Chapter 1. Understanding System Messages

- About System Messages

About System Messages

During operation, a fault or event in the Cisco Application Centric Infrastructure (ACI) system can trigger the sending of a system log (syslog) message to the console and, optionally, to a logging server on another system. A system message typically contains a subset of information about the fault or event, and the message is sent by syslog, by an SNMP trap, or by a Cisco Call Home message.

Many system messages are specific to the action that a user is performing or the object that a user is configuring or administering. These messages can be the following:

- Informational messages, providing assistance and tips about the action being performed

- Warning messages, providing information aboutsystem errorsrelated to an object,such as a user account or service profile, that the user is configuring or administering

- Finite state machine (FSM) status messages, providing information about the status of an FSM stage

A system message can contain one or more variables. The information that the system uses to replace these variables depends upon the context in which you see the message.

System messages are created by various sources, such as the Application Policy Infrastructure Controller (APIC) or the spine and leaf switches in the ACI fabric. System messages from the switches can be generated by either of the following processes:

- The underlying NX-OS operating system of the spine and leaf switches

- ACI-related processes in the switch

Additional details about the faults or events that generate these system messages are described in the Cisco APIC Faults, Events, and System Messages Management Guide and are listed in the Cisco APIC Management Information Model Reference, a web-based document.

Note

Not all system messages indicate problems with your system. Some messages are purely informational, while others may help diagnose problems with communications lines, internal hardware, or the system software.

NX-OS System Message Structure

System messages generated by the underlying NX-OS operating system are structured as follows:

timestamp Nexus: FACILITY-SEVERITY-MNEMONIC: Message-text

The fields in the messsage are described in the following sections.

timestamp

The year, month, date, and time of day when the message was generated.

FACILITY

The facility code consists of two or more uppercase letters that indicate the facility to which the message refers. A facility can be a hardware device, a protocol, or a module of the system software.

SEVERITY

The severity level is a single-digit code from 0 to 7 that reflects the severity of the condition. The lower the number, the more serious the situation. The following table lists the message severity levels.

NX-OS Message Severity Levels

Level

Severity Level (NX-OS)

ITU Level (ACI)

Description

0

emergency

System is unusable

1

alert

Critical

Immediate action required

2

critical

Major

Critical condition

3

error

Minor

Error condition

4

warning

Warning

Warning condition

5

notification

Cleared

Normal but significant condition

6

informational

Informational message only

7

debugging

Message that appears during debugging only

MNEMONIC

The MNEMONIC code uniquely identifies the error message.

Message-text

Message-text is a text string that describes the condition. The text string sometimes contains detailed information about the event, including terminal port numbers, network addresses, or addresses that correspond to locations in the system memory address space. Because variable fields change from message to message, they are represented here by short strings enclosed in square brackets ([ ]). A decimal number, for example, is represented as [dec]. The following table lists the variable fields in messages.

Representation of Variable Fields in NX-OS Messages

Representation

Type of Information

[chars] or [char]

Character string

[dec]

Decimal

[hex]

Hexadecimal integer

[int]

Integer

[num]

Number

NX-OS System Message Example

The following example shows a typical NX-OS system message:

2014 Jan 25 21:42:07 Nexus: ETHPORT-5-IF_DOWN_ADMIN_DOWN:
Interface Ethernet3/1 is down (Administratively down))

In this system message:

- Nexus indicates that this message is generated by NX-OS.

- ETHPORT is the facility code.

- The number 5 is the severity level, indicating a ‘notification,’ a normal but significant condition.

- IF_DOWN_ADMIN_DOWN is the mnemonic code.

- “Interface Ethernet3/1 is down (Administratively down))” is the message text.

ACI System Message Structure

System messages generated by ACI components other than NX-OS are structured as follows:

timestamp host %LOG_LOCALn-severity-SYSTEM_MSG [code][lifecycle state][rule][severity text][DN of affected MO]
Message-text

The fields in the messsage are described in the following sections.

timestamp

The year, month, date, and time of day when the message was generated.

host

The hostname or IP address of the host that generated the message, such as ‘apic1’ or ‘spine3.’

%LOG_LOCALn

The local facility code ‘n’ is a single-digit code from 0 to 7 that reflects indicate the local facility of the message. This number can be configured and is used to sort received messages.

severity

The severity level is a single-digit code from 1 to 5 that reflects the severity of the condition. The lower the number, the more serious the situation. Unlike NX-OS system messages, ACI system messages follow the ITU Perceived Severity values described in RFC5674. The following table lists the message severity levels.

ACI Message Severity Levels

Level

Severity Level (NX-OS)

ITU Level (ACI)

Description

0

emergency

System is unusable

1

alert

Critical

Immediate action required

2

critical

Major

Critical condition

3

error

Minor

Error condition

4

warning

Warning

Warning condition

5

notification

Cleared

Normal but significant condition

6

informational

(Info)

Informational message only

7

debugging

(Not used)

Message that appears during debugging only

code

The unique fault or event code.

lifecycle state

The current lifecycle state of the fault. Faults are stateful, and a fault transitions through more than one state during its life cycle. Events are stateless, and this field is omitted in event system messages.

rule

The action or condition that caused the event, such as a component failure or a threshold crossing.

severity text

The text translation of the numeric severity value. For example “major.”

DN of affected MO

The distinguished name (DN) of the managed object (MO) affected by the fault condition or event.

Message-text

Message-text is a text string that briefly describes the condition. The text string sometimes contains detailed information about the fault or event, including interface port numbers or network addresses.

ACI System Message Examples

Example: Fault system message

The following example shows an ACI system message generated by a fabric node failure:

July 22 22:45:28 apic1 %LOG_LOCAL0-2-SYSTEM_MSG [F0110][soaking][node-failed][critical][topology/pod-1/node-102/fault-F0110]
Node 102 not reachable. unknown

In this system message:

- apic1 indicates that this message is generated by the controller.

- The number 2 is the severity level, indicating a critical condition.

- F0110 is the fault code, which we can look up as ‘fltFabricNodeFailed.’

- soaking is the current lifecycle state of the fault.

- node-failed is the cause of the fault.

- topology/pod-1/node-102 is the DN of the affected object, which is node 102 in pod 1.

- fault-F0110 is the DN of the fault object, which is a child of the affected object.

Tip

Using the Visore object browser, you can inspect the properties of the fault object for more details about the fault condition.

- “Node 102 not reachable. unknown” is the message text.

Example: Event system message

The following example shows an ACI system message generated by a fabric node failure:

July 22 22:45:27 apic1 %LOG_LOCAL0-6-SYSTEM_MSG [E4208219][link-state-change][info]
[subj-[topology/pod-1/lnkcnt-1/lnk-101-1-1-to-1-1-3]/rec-4294968577]
Link State of Fabric Link is set to ok

In this system message:

- apic1 indicates that this message is generated by the controller.

- The number 6 is the severity level, indicating an informational message.

- E4208219 is the fault code, which we can look up as ‘fltFabricNodeFailed’.

- link-state-change is the cause of the event.

- topology/pod-1/lnkcnt-1/lnk-101-1-1-to-1-1-3 is the DN of the affected object, which is a link.

- ec-4294968577 is the event record object, which is a child of the affected object.

Tip

Using the Visore object browser, you can inspect the properties of the event record object for more details about the fault condition.

- “Link State of Fabric Link is set to ok” is the message text.

Chapter 2. NX-OS System Messages

This chapter lists the system messages generated by the underlying NX-OS operating system of the ACI-mode switches.

- ACLLOG Messages

- ARP Messages

- BCM56321 Messages

- BGP Messages

- BIOS_DAEMON Messages

- CARD_CLIENT Messages

- CDPD Messages

- CRDCFG Messages

- DC3_SENSOR Messages

- DEVICE_TEST Messages

- DHCP_SNOOP Messages

- DIAGCLIENT Messages

- DIAGMGR Messages

- DIAG_PORT_LB Messages

- DNS Messages

- DT_HELPER Messages

- ETH_PORT_CHANNEL Messages

- ETH_PORT_MGR Messages

- IGMP Messages

- IM Messages

- IPFIB Messages

- ISIS Messages

- L2MCAST Messages

- LACP Messages

- LIBLTLMAP Messages

- LLDP Messages

- MCECM Messages

- MCP Messages

- MFDM Messages

- MRIB Messages

- MVDXN Messages

- Messages Messages

- NEW_INSTALLER Messages

- OBFL_DAEMON Messages

- OSPF Messages

- PFMCLNT Messages

- PIXM Messages

- PLTFM_MGR Messages

- POLICY_MGR Messages

- RPM Messages

- SATMGR Messages

- SYSLOG_COOP Messages

- TM Messages

- UFDM Messages

- URIB Messages

- VLAN_MGR Messages

- VNTAG_MGR Messages

- interface_vlan Messages

ACLLOG Messages

ACLLOG-5-ACLLOG_PKTLOG Format: %s

Explanation: New Acllog Packet Log: [chars]

Recommended Action: No action is required.

ARP Messages

ARP-2-SET_SCHED Format: Failed to set policy or priority

Explanation: An unrecoverable software error has occurred during arp initialization.

Recommended Action: Use 'reload' CLI command to reload the system. Be aware that this affects all VDCs on the system.

ARP-2-INIT_FAIL Format: Initialization failure

Explanation: An unrecoverable software error has occurred during arp initialization.

Recommended Action: Use 'reload' CLI command to reload the system. Be aware that this affects all VDCs on the system.

ARP-2-SYSMGR_QUERY Format: Failed to query sysmgr for %s

Explanation: An unrecoverable software error has occurred during arp initialization.

Recommended Action: Use 'reload' CLI command to reload the system. Be aware that this affects all VDCs on the system.

ARP-2-SYSMGR_UUID Format: Failed to get uuid from sysmgr during %s

Explanation: An unrecoverable software error has occurred during arp initialization.

Recommended Action: Use 'reload' CLI command to reload the system. Be aware that this affects all VDCs on the system.

ARP-2-SYSMGR_NOTIFY Format: Bad notification from sysmgr for %s

Explanation: An unrecoverable software error has occurred during arp initialization.

Recommended Action: Use 'reload' CLI command to reload the system. Be aware that this affects all VDCs on the system.

ARP-2-SHM_ATTACH Format: Failed to attach %s shared memory

Explanation: An unrecoverable software error has occurred during arp initialization.

Recommended Action: Use 'reload' CLI command to reload the system. Be aware that this affects all VDCs on the system.

ARP-2-API_INIT Format: Failed to initialize %s API

Explanation: An unrecoverable software error has occurred during arp initialization.

Recommended Action: Use 'reload' CLI command to reload the system. Be aware that this affects all VDCs on the system.

ARP-2-API_INITIALIZE Format: Failed to initialize %s API with rc=0x%x, %s

Explanation: An unrecoverable software error has occurred during arp initialization.

Recommended Action: Use 'reload' CLI command to reload the system. Be aware that this affects all VDCs on the system.

ARP-2-SVR_REG Format: Failed to register as a client of %s

Explanation: An unrecoverable software error has occurred during arp initialization.

Recommended Action: Use 'reload' CLI command to reload the system. Be aware that this affects all VDCs on the system.

ARP-2-AM_REG Format: Failed to register as a client of AM %s

Explanation: An unrecoverable software error has occurred during arp initialization.

Recommended Action: Use 'reload' CLI command to reload the system. Be aware that this affects all VDCs on the system.

ARP-2-TIMERS_INIT Format: Failed to initialize timers

Explanation: An unrecoverable software error has occurred during arp initialization.

Recommended Action: Use 'reload' CLI command to reload the system. Be aware that this affects all VDCs on the system.

ARP-2-TIMER_SET Format: Failed to initialize new timer set

Explanation: An unrecoverable software error has occurred during arp initialization.

Recommended Action: Use 'reload' CLI command to reload the system. Be aware that this affects all VDCs on the system.

ARP-3-TIMER_RSTART Format: Failed to restart timer 0x%p for %s on %s

Explanation: An unexpected but recoverable error has occurred.

Recommended Action: No user action is required.

ARP-2-CLI_INIT Format: Failed to initialize CLI

Explanation: An unrecoverable software error has occurred during arp initialization.

Recommended Action: Use 'reload' CLI command to reload the system. Be aware that this affects all VDCs on the system.

ARP-2-THR_CREAT Format: Failed to create thread %s: error %d

Explanation: An unrecoverable software error has occurred during arp initialization.

Recommended Action: Use 'reload' CLI command to reload the system. Be aware that this affects all VDCs on the system.

ARP-2-THREAD_FAIL Format: Failed to start %s thread

Explanation: An unrecoverable software error has occurred during arp initialization.

Recommended Action: Use 'reload' CLI command to reload the system. Be aware that this affects all VDCs on the system.

ARP-3-API_MTS_INVAL Format: ARP API Error: Invalid ARP MTS queue in %s

Explanation: An unexpected but recoverable error has occurred.

Recommended Action: No user action is required.

ARP-3-API_MTS_SEND Format: ARP API Error: Failed to send %s to %s queue: %s

Explanation: An unexpected but recoverable error has occurred.

Recommended Action: No user action is required.

ARP-5-MQ_UNEXP Format: Received unexpected message (%d/%d) on %s queue

Explanation: An unexpected but recoverable error has occurred.

Recommended Action: No user action is required.

ARP-5-MQ_MINOR Format: Received unknown minor message type (%d) from %s

Explanation: An unexpected but recoverable error has occurred.

Recommended Action: No user action is required.

ARP-5-MSG_UNK Format: Received unknown % type: %lu

Explanation: An unexpected but recoverable error has occurred.

Recommended Action: No user action is required.

ARP-5-MTS_OPC_UNK Format: Received unknown MTS opcode %lu

Explanation: An unexpected but recoverable error has occurred.

Recommended Action: No user action is required.

ARP-2-MTS_OPC_SET Format: Failed to register with opcode %d: %s

Explanation: An unrecoverable software error has occurred during arp initialization.

Recommended Action: Use 'reload' CLI command to reload the system. Be aware that this affects all VDCs on the system.

ARP-2-MTS_BIND Format: Failed to do mts_bind for %s: %s

Explanation: An unrecoverable software error has occurred during arp initialization.

Recommended Action: Use 'reload' CLI command to reload the system. Be aware that this affects all VDCs on the system.

ARP-2-MTS_RECV Format: MTS queue receive failed on %s queue: %s

Explanation: An unexpected fatal error has occurred.

Recommended Action: Use 'reload' CLI command to reload the system. Be aware that this affects all VDCs on the system.

ARP-2-MTS_RECV_FAIL Format: %s as MTS queue receive failed: %s

Explanation: An unexpected fatal error has occurred.

Recommended Action: Use 'reload' CLI command to reload the system. Be aware that this affects all VDCs on the system.

ARP-3-MAC_ERR Format: Failed to get MAC address on %s for %s

Explanation: An unexpected but recoverable error has occurred.

Recommended Action: No user action is required.

ARP-3-ADJ_ADD Format: Failed to add adjacency for received packet from %s on %s

Explanation: Due to this failure, packet forwarding to this address will be affected until the next successful retrial.

Recommended Action: No user action is required.

ARP-3-ADJ_UPD Format: Failed to update adjacency for received packet from %s on %s

Explanation: Due to this failure, packet forwarding will continue to use the existing ARP adjacency entry values.

Recommended Action: No user action is required.

ARP-2-DUP_SRCIP Format: Source address of packet received from %s on %s is duplicate of local, %s

Explanation: There may be another router on this network that is configured with the same IP address.

Recommended Action: Check all routers on the interface for misconfiguration.

ARP-2-DUP_SRC_IP Format: Source address of packet received from %s on %s(%s) is duplicate of local, %s

Explanation: There may be another router on this network that is configured with the same IP address.

Recommended Action: Check all routers on the interface for misconfiguration.

ARP-3-DUP_VADDR_SRCIP Format: Source address of packet received from %s on %s is duplicate of local virtual ip, %s

Explanation: There may be another router on this network that is configured with the same IP address.

Recommended Action: Check all routers on the interface for misconfiguration.

ARP-3-DUP_VADDR_SRC_IP Format: Source address of packet received from %s on %s(%s) is duplicate of local virtual ip, %s

Explanation: There may be another router on this network that is configured with the same IP address.

Recommended Action: Check all routers on the interface for misconfiguration.

ARP-3-DUP_VIRT_SRCIP Format: Source address of packet received from %s on %s is duplicate of local virtual ip, %s

Explanation: There may be another router on this network that is configured with the same IP address.

Recommended Action: Check all routers on the interface for misconfiguration.

ARP-3-DUP_VIRT_SRC_IP Format: Source address of packet received from %s on %s(%s) is duplicate of local virtual ip, %s

Explanation: There may be another router on this network that is configured with the same IP address.

Recommended Action: Check all routers on the interface for misconfiguration.

ARP-3-DUP_SRCIP_PROBE Format: Duplicate address Detected. Probe packet received from %s on %s with destination set to our local ip, %s

Explanation: There may be another router on this network that is configured with the same IP address.

Recommended Action: Check all routers on the interface for misconfiguration.

ARP-3-DUP_SRC_IP_PROBE Format: Duplicate address Detected. Probe packet received from %s on %s(%s) with destination set to our local ip, %s

Explanation: There may be another router on this network that is configured with the same IP address.

Recommended Action: Check all routers on the interface for misconfiguration.

ARP-3-DUP_VADDR_SRCIP_PROBE Format: Duplicate address Detected. Probe packet received from %s on %s with destination set to our local Virtual ip, %s

Explanation: There may be another router on this network that is configured with the same IP address.

Recommended Action: Check all routers on the interface for misconfiguration.

ARP-3-DUP_VADDR_SRC_IP_PROBE Format: Duplicate address Detected. Probe packet received from %s on %s(%s) with destination set to our local Virtual ip, %s

Explanation: There may be another router on this network that is configured with the same IP address.

Recommended Action: Check all routers on the interface for misconfiguration.

ARP-4-DIR_BCAST Format: %s address of packet received from %s on %s matches directed broadcast address, %s

Explanation: There may be a configured subnet mask-length mismatch among router interfaces connected on this LAN.

Recommended Action: Check all routers on the interface for misconfiguration.

ARP-4-INVAL_IP Format: Received packet with invalid %s IP address (%s) from %s on %s

Explanation: There may be a connected router sending packets with a bogus IP address.

Recommended Action: Check all routers on the interface for misconfiguration.

ARP-4-INVAL_MAC Format: Received packet with invalid %s MAC address (%s) from %s on %s

Explanation: There may be a connected router sending packets with a bogus MAC address.

Recommended Action: Check all routers on the interface for misconfiguration.

ARP-4-OWN_SRCMAC Format: Received packet with a local source MAC address (%s) from %s on %s

Explanation: There may be a connected router sending packets with local MAC address.

Recommended Action: Check all routers on the interface for misconfiguration.

ARP-3-MBUF_ERR Format: Failed to get the remainder of packet, expected %d, got %d bytes

Explanation: An unexpected but recoverable error has occurred.

Recommended Action: No user action is required.

ARP-3-HDR_L2LEN_ERR Format: Received packet with incorrect layer 2 address length (%d bytes)

Explanation: An unexpected but recoverable error has occurred.

Recommended Action: No user action is required.

ARP-3-HDR_L3LEN_ERR Format: Received packet with incorrect layer 3 address length (%d bytes)

Explanation: An unexpected but recoverable error has occurred.

Recommended Action: No user action is required.

ARP-3-HDR_ERR Format: Failed to get ARP header, expected %d, got %d bytes

Explanation: An unexpected but recoverable error has occurred.

Recommended Action: No user action is required.

ARP-3-INVAL_HDR_HRD_TYPE Format: Found incorrect hardware type in ARP header: %hu

Explanation: An unexpected but recoverable error has occurred.

Recommended Action: No user action is required.

ARP-3-INVAL_HDR_PROT_TYPE Format: Found incorrect protocol type in ARP header: 0x%x

Explanation: An unexpected but recoverable error has occurred.

Recommended Action: No user action is required.

ARP-3-INVAL_STATE Format: Unrecognized ARP entry state in timer callback: %lu

Explanation: An unexpected but recoverable error has occurred.

Recommended Action: No user action is required.

ARP-4-DUP_IP Format: ARP entry found with duplicate IP address %s on %s

Explanation: There may be another router on this network that is configured with the same IP address.

Recommended Action: Check all routers on the interface for misconfiguration.

ARP-3-NO_MEM Format: Malloc failed for %s %s

Explanation: The system may be low on memory.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

ARP-3-NO_MBUF Format: Failed to allocate buffer for %s

Explanation: The system may have run out of packet memory buffers.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

ARP-3-PKT_OUT Format: Failed to send packet to PM

Explanation: PM's message queue may be temporarily full.

Recommended Action: No user action is required.

ARP-3-MTS_DROP Format: MTS drop failed on %s queue: %s

Explanation: An unexpected but recoverable error has occurred.

Recommended Action: No user action is required.

ARP-3-REQ_IOD Format: Sending ARP request for %s on an invalid interface %u, request from pid: %d

Explanation: An unexpected but recoverable error has occurred.

Recommended Action: No user action is required.

ARP-3-REQ_NON_AM Format: Sending ARP request for %s on invalid interface %s request from pid: %d

Explanation: An unexpected but recoverable error has occurred.

Recommended Action: No user action is required.

ARP-3-REQ_IP Format: Sending ARP request for %s IP address %s on %s, request from pid: %d

Explanation: An unexpected but recoverable error has occurred.

Recommended Action: No user action is required.

ARP-3-REQ_ADD Format: Failed to add adjacency while sending request for %s on %s, request from pid: %d

Explanation: An unexpected but recoverable error has occurred.

Recommended Action: No user action is required.

ARP-3-GRAT_IOD Format: Sending gratuitous ARP for %s on an invalid interface %u

Explanation: An unexpected but recoverable error has occurred.

Recommended Action: No user action is required.

ARP-3-GRAT_NON_AM Format: Sending gratuitous arp for %s on invalid interface %s

Explanation: An unexpected but recoverable error has occurred.

Recommended Action: No user action is required.

ARP-3-GRAT_IP Format: Sending gratuitous ARP request for %s IP address %s on %s

Explanation: An unexpected but recoverable error has occurred.

Recommended Action: No user action is required.

ARP-3-IF_INDEX Format: Invalid interface index received from %d

Explanation: An unexpected but recoverable error has occurred.

Recommended Action: No user action is required.

ARP-3-IM_EXT Format: Couldn't set IM-extension for interface %s

Explanation: ARP process failed to set IM extension.

Recommended Action: No user action is required.

BCM56321 Messages

BGP Messages

BGP-6-START Format: BGP process %s startup, reason: %s

Explanation: The indicated BGP process has started.

Recommended Action: No user action is required.

BGP-5-ADJCHANGE Format: neighbor %s %s %s

Explanation: A BGP session has just been established. Or a session has just been shutdown.

Recommended Action: No user action is required.

BGP-4-SLAB_HOLD Format: Not able to hold element from %s slab

Explanation:

Recommended Action: No user action is required.

BGP-6-EXIT_DECONFIG Format: BGP process exiting due to deconfiguration

Explanation: The indicated BGP process has been deconfigured.

Recommended Action: No user action is required.

BGP-6-EXIT_RESTART Format: BGP process exiting due to manual restart

Explanation: The indicated BGP process is being restarted.

Recommended Action: No user action is required.

BGP-6-EXIT_UNKNOWN Format: BGP process exiting due to unknown reason

Explanation:

Recommended Action: No user action is required.

BGP-5-SHUTDOWN Format: BGP protocol administratively shutdown

Explanation: BGP protocol was administratively shutdown.

Recommended Action: No user action is required.

BGP-5-NO_RD Format: VRF %s : RD deconfigured

Explanation: RD deconfigured from VRF.

Recommended Action: No user action is required.

BGP-6-MEMSTAT Format: Hit low memory condition - Free: %u MB, Min free: %u MB

Explanation:

Recommended Action: No user action is required.

BGP-6-PATH_MAXASLIMIT Format: [%s] Path for %s from peer %s found to %s the maxas-limit

Explanation:

Recommended Action: No user action is required.

BGP-4-AFIMPORT Format: %s prefixes imported from default vrf to %s vrf reached the limit %d

Explanation:

Recommended Action: No user action is required.

BGP-6-BADASPATH Format: Long AS path %s received from peer %s: more than configured maxas-limit %d

Explanation: The peer sent an AS path exceeding the maxas-limit.

Recommended Action: Check that the peering router is configured correctly. Clear the peer if necessary after any change.

BGP-6-MAXPEER_LIMIT Format: Reached maximum-peer limit on the prefix peer %s, ignoring connection request from %s

Explanation: Session can be brought up due to maximum-peer limit

Recommended Action: No user action is required.

BGP-6-AS4PATH_CONFED Format: Received AS4_PATH with CONFED related path segments in it from peer %s

Explanation: The peer has sent AS4_PATH with confed based path segments which would be discarded.

Recommended Action: No user action is required.

BGP-6-AS4PATH_SEGLEN Format: Received AS4_PATH with zero path segment length in it from peer %s

Explanation: The peer has sent AS4_PATH with zero path segment length which would be discarded.

Recommended Action: No user action is required.

BGP-6-AS4PATH_SEGTYPE Format: Received AS4_PATH with invalid path segment type in it from peer %s

Explanation: The peer has sent AS4_PATH with invalid path segment type which would be discarded.

Recommended Action: No user action is required.

BGP-6-AS4AGG_INVALID Format: Received AS4_AGGREGATOR with invalid length %d in it from peer %s

Explanation: The peer has sent AS4_AGGREGATOR with invalid attr length which would be discarded.

Recommended Action: No user action is required.

BGP-5-MEMALERT Format: BGP memory status changed from %s to %s

Explanation:

Recommended Action: No user action is required.

BGP-4-INVALIDIOD Format: Received interface(%s) %s notification from IM with zero iod

Explanation: BGP received an IF notification from IM with zero or invalid iod

Recommended Action: No user action is required.

BGP-3-RT_DB_ADD Format: Couldn't add route target %s into the database

Explanation: The router could not add route-target in its internal database

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-NEXTHOPADD Format: [%s] Couldn't add next-hop to RNHDB for %s/%d, error %d

Explanation: The router was unable to store a BGP next hop in an internal database, perhaps because it ran out of memory.

Recommended Action: If BGP ran out of memory, add memory to the router or change the network configuration to decrease memory requirements. Clear any BGP peers that may have been shut down automatically. If BGP has memory available, there was an internal error, restart BGP.

BGP-3-NEXTHOPDEL Format: [%s] Couldn't delete next-hop from RNHDB for %s/%d, error %d

Explanation: An unexpected but handleable event has occured.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-BRIBADD Format: [%s] Couldn't add dest to BRIB for %s

Explanation: BGP was unable to add a prefix to the BGP RIB. The BGP process may have run out of memory.

Recommended Action: If BGP ran out of memory, add memory to the router or change the network configuration to decrease memory requirements. Clear any BGP peers that may have been shut down automatically. If BGP has memory available, there was an internal error, restart BGP.

BGP-3-BRIB_ADD_INT Format: Internal error in adding to BRIB: %s

Explanation: An internal error was encountered in adding a path to the BRIB. The BGP process may have run out of memory.

Recommended Action: If BGP ran out of memory, add memory to the router or change the network configuration to decrease memory requirements. Clear any BGP peers that may have been shut down automatically. If BGP has memory available, there was an internal error, restart BGP.

BGP-3-BRIBDEL Format: [%s] Error %u deleting %s from BRIB

Explanation: An unexpected but handleable event has occured.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-FINDAGGR Format: [%s] Did not find aggregate path for entry %s/%d

Explanation: BGP was unable to find an internal datastructure for originating a configured aggregate.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-AGGADD Format: [%s] Couldn't add aggregate for %s/%d

Explanation: BGP was unable to store an aggregate in an internal datastructure. The BGP process may have run out of memory.

Recommended Action: If BGP ran out of memory, add memory to the router or change the network configuration to decrease memory requirements. Clear any BGP peers that may have been shut down automatically. If BGP has memory available, there was an internal error, restart BGP.

BGP-3-AGGDEL Format: [%s] Couldn't delete aggregate for %s/%d

Explanation: An unexpected but handleable event has occured.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-4-MAXPEERS Format: Trying to configure more than %d neighbors

Explanation: BGP has hit the limit of the number of peers that can. be configured.

Explanation: ACTION_KEEP_RUNNING

Recommended Action:

BGP-3-UNEXPPATHATTR Format: [%s] Unexpected attr (%p) path chain for %s

Explanation: An unexpected but handleable event has occured.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-4-PFXEXCEED Format: [%s] No. of prefix received from %s exceeded configured limit %d

Explanation: A peer sent us more routes than BGP was configured to accept.

Recommended Action: Check that the peering router is configured correctly. Clear the peer if necessary after any change.

BGP-4-PFXWARN Format: [%s] Number of prefixes received from %s reached %d, maximum %d

Explanation: The number of routes sent to us by a peer exceeded the threshold at which BGP should generate a warning.

Recommended Action: Check that the peering router is configured correctly. Clear the peer if necessary after any change.

BGP-3-LIST Format: %s

Explanation: An internal software error has occurred.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-ATTRID_OP Format: Failed to %s attribute ID

Explanation: BGP was unable to allocate or free an index for a BGP PATH attribute block

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-ATTRAVL_OP Format: Failed attribute external database operation: %s, id %lu

Explanation: BGP was unable to perform an attribute external database operation

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-VRF_CTX Format: VRF %s, failed %s

Explanation: An internal software error has occurred.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-VRFAVL_OP Format: Failed vrf database operation: %s, vrf %s id %lu

Explanation: BGP was unable to perform a vrf database operation

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-TBLAVL_OP Format: Failed table database operation: %s, table %s id %#lx

Explanation: BGP was unable to perform a table database operation

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-PEER Format: Peer %s, failed %s

Explanation: An internal software error has occurred.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-TBLCTX_INIT Format: VRF %s, %s, table %s: Table initialization failed

Explanation: BGP was unable to initialize an internal datastructure. The BGP process may have run out of memory.

Recommended Action: If BGP ran out of memory, add memory to the router or change the network configuration to decrease memory requirements. Clear any BGP peers that may have been shut down automatically. If BGP has memory available, there was an internal error, restart BGP.

BGP-3-BRIB_RDADD Format: [%s] Couldn't add rdinfo %s to BRIB

Explanation: BGP was unable to add a prefix to the BGP RIB. The BGP process may have run out of memory.

Recommended Action: If BGP ran out of memory, add memory to the router or change the network configuration to decrease memory requirements. Clear any BGP peers that may have been shut down automatically. If BGP has memory available, there was an internal error, restart BGP.

BGP-3-BRIB_RDDEL Format: [%s] Couldn't delete rdinfo %s from BRIB

Explanation: BGP was unable to remove from BGP RIB. The BGP process may have run out of memory.

Recommended Action: If BGP ran out of memory, add memory to the router or change the network configuration to decrease memory requirements. Clear any BGP peers that may have been shut down automatically. If BGP has memory available, there was an internal error, restart BGP.

BGP-3-TBLATTRAVL_OP Format: Failed table attribute database operation: %s, id %lu

Explanation: BGP was unable to perform a table attribute database operation

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-RDINFO Format: VRF %s, %s, table %s: rdinfo %s failed

Explanation: BGP was unable to initialize an internal datastructure. The BGP process may have run out of memory.

Recommended Action: If BGP ran out of memory, add memory to the router or change the network configuration to decrease memory requirements. Clear any BGP peers that may have been shut down automatically. If BGP has memory available, there was an internal error, restart BGP.

BGP-3-BRIB_RDCLASH Format: VRF %s, %s: RD clash found during %s

Explanation: BGP was unable to allocate RD for the BGP RIB. The BGP process may have run out of memory.

Recommended Action: If BGP ran out of memory, add memory to the router or change the network configuration to decrease memory requirements. Clear any BGP peers that may have been shut down automatically. If BGP has memory available, there was an internal error, restart BGP.

BGP-3-URIB_RT_MODIFY Format: URIB route modify operation failed during %s

Explanation: An internal software error has occurred.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-RPMHANDLE Format: RPM notification handle does not match existing handle for policy %s

Explanation: An unexpected but handleable event has occured.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-RPMBIND Format: RPM policy bind failed for %s %s

Explanation: An unexpected but handleable event has occured.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-PLCYOUT Format: Cannot add reference to policy out info for route-map %s

Explanation: BGP was not able to create an entry for an outbound policy.

Explanation: ACTION_SW_RESTART_COMP

Recommended Action:

BGP-3-PLCYRNHATTACH Format: Couldn't attach to policy RNH info for policy %s, error: %s

Explanation: An internal error occurred in using a policy. The system may be low on memory._MAYBE

Recommended Action: If BGP ran out of memory, add memory to the router or change the network configuration to decrease memory requirements. Clear any BGP peers that may have been shut down automatically. If BGP has memory available, there was an internal error, restart BGP.

BGP-3-PLCYRNHDETACH Format: Couldn't detach from policy RNH info for policy %s, error: %s

Explanation: An internal software error has occurred.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-PLCYRNHSETUP Format: Couldn't setup rnh notifications for policy %s, error: %s

Explanation: An internal error occurred in using a policy. The system may be low on memory._MAYBE

Recommended Action: If BGP ran out of memory, add memory to the router or change the network configuration to decrease memory requirements. Clear any BGP peers that may have been shut down automatically. If BGP has memory available, there was an internal error, restart BGP.

BGP-3-NETWKRNHSETUP Format: Couldn't setup rnh notifications for network %s, error: %s

Explanation: Could not setup RNH for network prefix

Recommended Action: If BGP ran out of memory, add memory to the router or change the network configuration to decrease memory requirements. Clear any BGP peers that may have been shut down automatically. If BGP has memory available, there was an internal error, restart BGP.

BGP-3-CLISET Format: Unable to set %s inheritance for %s

Explanation: An internal software error has occurred.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

BGP-3-DAMPCFG Format: Both policy and global dampconf exist

Explanation: An internal software error has occurred.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-ACLTESTADD Format: Failed to add %s peer policy test

Explanation: An internal software error has occurred.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-RPM_L3VPN_EXTCOMM Format: L3vpn extcommunity failure during %s

Explanation: An unexpected but handleable event has occured.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-4-MQUNEXPECT Format: Recieved unexpected message (%d/%d) on %s queue

Explanation: An unexpected but handleable event has occured.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-2-MTSBIND Format: Unable to bind to MTS SAP for %s, sap %d: %s

Explanation: BGP was not able to create a message queue for communication.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

BGP-4-MTSUNKOPC Format: Recieved unknown MTS message on %s queue, opc %d

Explanation: An unexpected but handleable event has occured.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-4-MTSNOMSG Format: No MTS payload found on %s queue, opc %d

Explanation: An unexpected but handleable event has occured.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-MTSRECV Format: MTS receive failed on %s queue: %s

Explanation: An unexpected but handleable event has occured.

Recommended Action: No user action is required.

BGP-3-MTSDROP Format: MTS drop failed on %s queue: %s

Explanation: An unexpected but handleable event has occured.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-MTSSEND Format: MTS send() error to SAP %d, opcode %d: %s

Explanation: An unexpected but handleable event has occured.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-4-TXLIST Format: %s

Explanation: An unexpected but handleable event has occured.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-API_UNEXP_RESP Format: Received unexpected message from SAP %d, opcode %d, address %s, ignore it

Explanation: An unexpected but handleable event has occured.

Recommended Action: No user action is required.

BGP-2-APIMTSBIND Format: Unable to bind to MTS SAP for %s, sap %d: %s

Explanation: BGP client was not able to create a message queue for communication.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

BGP-3-APIMTSRECV Format: MTS receive failed on %s queue: %s

Explanation: An unexpected but handleable event has occured.

Recommended Action: No user action is required.

BGP-3-APIMTSDROP Format: MTS drop failed on %s queue: %s

Explanation: An unexpected but handleable event has occured.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-APIMTSSEND Format: MTS send() error to SAP %d, opcode %d: %s

Explanation: An unexpected but handleable event has occured.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-4-APIMTSNOMSG Format: No MTS payload found on %s queue, opc %d

Explanation: An unexpected but handleable event has occured.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-APIASSERT Format: %s:%d: Assertion `%s' failed.

Explanation: An internal software error has occurred.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-2-APIINIT Format: Unable to initialize %s API

Explanation: An unrecoverable error has occured during BGP initialization.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

BGP-2-ATTACH Format: Unable to attach to %s

Explanation: An unrecoverable error has occured during BGP initialization.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

BGP-2-URIBREG Format: Unable to register with URIB for [afi/safi:%d/%d]

Explanation: An unrecoverable error has occured during BGP initialization.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

BGP-3-ULIBREG Format: Unable to register with ULIB

Explanation: An unrecoverable error has occured during BGP initialization.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

BGP-3-URIBRNH Format: URIB RNH error: %s

Explanation: An internal software error has occurred.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-U6RIBRNH Format: U6RIB RNH error: %s

Explanation: An internal software error has occurred.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-ULIBRNH Format: ULIB RNH error: %s

Explanation: An internal software error has occurred.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-RNHCB Format: RNH %s error: %s

Explanation: An internal software error has occurred.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-URIBRT Format: URIB RT error: %s

Explanation: An internal software error has occurred.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-2-SRVREG Format: Unable to register with %s

Explanation: An unrecoverable error has occured during BGP initialization.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

BGP-2-AFINIT Format: Error initializing address family, (%d)

Explanation: An unrecoverable error has occured during BGP initialization.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

BGP-2-AFINITFUNCS Format: Error initializing address family function vectors, (%d)

Explanation: An unrecoverable error has occured during BGP initialization.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

BGP-2-IPV6REG Format: Unable to register with IPv6

Explanation: An unrecoverable error has occured during BGP initialization.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

BGP-2-U6RIBREG Format: Unable to register with U6RIB for [afi/safi:%d/%d]

Explanation: An unrecoverable error has occured during BGP initialization.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

BGP-2-TSP_INIT Format: Unable to initialize with TSP

Explanation: An unrecoverable error has occured during BGP initialization.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

BGP-3-SUPSTATE Format: Error in learning SUP state

Explanation: An internal software error has occurred.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-RESTARTTYPE Format: Error in learning restart type

Explanation: An internal software error has occurred.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-2-SYSMGR_QUERY Format: Failed to query sysmgr for %s

Explanation: An internal software error has occurred.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

BGP-2-SYSMGR_CONDVERIF Format: Sysmgr conditional verify failed

Explanation: An internal software error has occurred.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

BGP-3-LISTEN_SOCK Format: Failed to listen on %s BGP TCP port

Explanation: An error occured during a socket operation.OR

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-SOCK_ERR Format: Socket (%d/%d): %s\n

Explanation: An error occured during a socket operation.OR

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-SOCKOPEN Format: TCP connection for peer %s already open, fd %d, state %s

Explanation: An internal software error has occurred.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-SOCKCREATE Format: Cannot create socket for peer %s: %s, stats: %lu/%lu/%lu/%lu/%lu

Explanation: An error occured during a socket operation.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-SOCKBIND Format: Cannot bind local socket for peer %s: %s

Explanation: An error occured during a socket operation.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-SOCK_ACCEPT Format: Socket (%d/%d) accept: %s\n

Explanation: An error occured during a socket operation.OR

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-SOCKNONBLOCK Format: Couldn't make fd %d non-blocking: %s

Explanation: An error occured during a socket operation.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-SENDBUF Format: Error manipulating sendbuf: %s

Explanation: An internal software error has occurred.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-NEGWRITE Format: Negative nr of %d bytes left to write to peer %s

Explanation: An internal software error has occurred.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-MD5PASS Format: Cannot set MD5 password %s for peer %s

Explanation: An internal software error has occurred.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-EBGPTTL Format: Unable to set EBGP TTL for peer %s, fd %d

Explanation: An unexpected but handleable event has occured.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-IPTOS Format: Unable to set IP TOS bits for %s, fd %d

Explanation: An unexpected but handleable event has occured.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-SOCK_FDPOP Format: Unexpected error during socket fd population %s(%d)

Explanation: An unexpected but handleable event has occured.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-SOCK_RECV Format: Unexpected error during socket data recv %s(%d)

Explanation: An unexpected but handleable event has occured.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-LOWMEM Format: Low on heap memory

Explanation: The system may be low on memory.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-2-PEERSHALTED Format: BGP %s shutdown due to no memory condition (%s)

Explanation: The system may be low on memory.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-ALLOCFAIL Format: %s malloc (%ld) failed for: %s

Explanation: The system may be low on memory.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-PFX_NOMEM Format: Could not allocate %s for %s/%d

Explanation: The system may be low on memory.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-NOMEMORY Format: Could not allocate %s

Explanation: The system may be low on memory.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-NOBUF Format: [%s] Unable to get buffer for %s msg to peer %s

Explanation: An internal software error has occurred.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-1-FATAL Format: Fatal error: %s: %s

Explanation: An unexpected fatal error has occured.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

BGP-1-UNKNOWNFATAL Format: Unknown fatal error %d: %s

Explanation: An unexpected fatal error has occured.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

BGP-2-PTHREAD Format: procket_pthread_create failed for %s: error %d

Explanation: An unexpected fatal error has occured.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

BGP-5-BADSIG Format: Should not have received signal %d

Explanation: An unexpected but handleable event has occured.

Recommended Action: No user action is required.

BGP-3-ILLARGS Format: %s called with illegal arguments

Explanation: An internal software error has occurred.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-4-NODAMPMEM Format: [%s] Unable to dampen prefix %s from peer %s due to no memory

Explanation: The system may be low on memory.ORY

Recommended Action: No user action is required.

BGP-3-INTERNAL Format: Internal error %d: %s

Explanation: An internal software error has occurred.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-NBRERR Format: %s Peer error: %s

Explanation: An internal software error has occurred.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-ASSERT Format: %s:%d: Assertion `%s' failed.

Explanation: An internal software error has occurred.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-UNEXPECT Format: %s L%d: %s

Explanation: An internal software error has occurred.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-PATH_DEL Format: Failed to destroy path (%s), error %d

Explanation: The BGP process may have run out of memory.

Recommended Action: If BGP ran out of memory, add memory to the router or change the network configuration to decrease memory requirements. Clear any BGP peers that may have been shut down automatically. If BGP has memory available, there was an internal error, restart BGP.

BGP-3-TIMER_START Format: Couldn't start %s timer %s

Explanation: An internal software error has occurred.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-THREAD_SHUTDOWN Format: Problem shutting down thread %s: Operation - %s, Error - %s\n

Explanation: An unexpected but handleable event has occured.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-2-MQLOOP_INIT Format: Message queue loop %s, %s, Error - %s

Explanation: An unrecoverable error has occured during BGP initialization.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

BGP-3-MQLOOP_SHUTDOWN Format: Couldn't shut down %s message queue loop

Explanation: An unexpected but handleable event has occured.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-APPLY_BESTPATH_CFG Format: Failed to apply bestpath configuration: %s

Explanation: An unexpected but handleable event has occured.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-RESTARTINIT Format: Unable to determine restart status and initialize

Explanation: An unrecoverable error has occured during BGP initialization.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

BGP-3-PATH_STALE Format: [%s] %s path being %s, for %s from peer %s, should not be stale

Explanation: An internal software error has occurred.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-SRAND Format: Failed to set random seed

Explanation: An unrecoverable error has occured during BGP initialization.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

BGP-3-EVENT_WAIT Format: Error while waiting for %s event, error - %s\n

Explanation: An unexpected but handleable event has occured.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-4-RLIMIT Format: Error while setting rlimit, error - %s\n

Explanation: An unexpected but handleable event has occured.

Recommended Action: No user action is required.

BGP-4-NORID Format: Peer %s sent us 0.0.0.0 as its router-id

Explanation: A BGP peer sent us an invalid router id.

Recommended Action: Check that the peering router is configured correctly. Clear the peer if necessary after any change.

BGP-4-SAMERID Format: Peer %s uses same routerid as us

Explanation: A BGP peer is using the same router id as this router.

Recommended Action: Configure either the local or remote router with a different router ID.

BGP-3-INVHDR Format: Peer %s sent unexpected header pattern

Explanation: The marker pattern in message header was invalid

Recommended Action: Check that the peering router is configured correctly. Clear the peer if necessary after any change.

BGP-3-BADPEERAS Format: VRF %s, Peer %s - bad remote-as, expecting %s received %s.

Explanation: The peer sent an incorrect AS Number

Recommended Action: Check that the peering router is configured correctly. Clear the peer if necessary after any change.

BGP-3-BADOPENCAP Format: VRF %s, Peer %s - bad capability code received %u.

Explanation: The peer sent a bad/unknown capability

Recommended Action: Check that the peering router is configured correctly. Clear the peer if necessary after any change.

BGP-3-BADOPENPARAM Format: VRF %s, Peer %s - unknown optional parameter received %u.

Explanation: The peer sent an unknown optional parameter

Recommended Action: Check that the peering router is configured correctly. Clear the peer if necessary after any change.

BGP-3-BADLOCALAS Format: VRF %s, Peer %s - bad AS sent in Open message %u.

Explanation: The peer received an incorrect AS Number

Recommended Action: Check that the peering router is configured correctly. Clear the peer if necessary after any change.

BGP-3-BADPEERHOLDTIME Format: VRF %s, Peer %s - bad hold time %s %d.

Explanation: The peer sent and/or received an incompatible hold time

Recommended Action: Check that the peering router is configured correctly. Clear the peer if necessary after any change.

BGP-3-BADPEERRID Format: VRF %s, Peer %s - bad router-id %s %s.

Explanation: The peer sent and/or received a bad router-id

Recommended Action: Check that the peering router is configured correctly. Clear the peer if necessary after any change.

BGP-3-BADPEERDYNAS Format: VRF %s, Peer %s - bad remote-as, failed route-map %s received %s.

Explanation: The peer sent an AS Number that did not match route-map

Recommended Action: Check that the peering router is configured correctly. Clear the peer if necessary after any change.

BGP-3-IMPORT_VRF_EXCEED Format: Maximum limit on number of import VRFs exceeded

Explanation: An unexpected but handleable event has occured.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-BADNEXTHOP Format: [%s] Peer %s advertised non-mapped nexthop %s in MP reach attr [afi/safi:%d/%d], dropping NLRI

Explanation: The router received a next-hop that was inconsistent with the address-family in the update message.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-5-MAXMSGLIMIT Format: [%s] Failed to send update message with prefix %s for peer %s because the msg size(%u) exceeded the maximum limit(%u)

Explanation: BGP Update message reached the maximum limit

Recommended Action: No user action is required.

BGP-3-ASPREPEND Format: Expected AS sequence or entry sequence, got %d/%d

Explanation: An error was encountered in prepending to an AS path.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-COMLEN Format: Community sets exceeded maximum allowed limit

Explanation: An internal limit was hit in adding a community.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-4-EXTCOMLEN Format: Extended communities exceeded the max limit of %u

Explanation: An internal limit was hit in adding an extended community.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-COMADD Format: Error occurred in community addition, no action taken

Explanation: An internal error was encountered in adding a community.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-EXTCOMADD Format: Error occurred in extended community addition, no action taken

Explanation: An internal error was encountered in adding an extended community.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-ASLEN Format: AS-PATH prepend length exceeds internal limit

Explanation: An internal limit was hit in prepending and AS path.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BGP-3-SOFTINCAP Format: Peer %s not capable of soft refresh in, operator intervention needed: %s

Explanation: The router is unable to do soft refresh for the indicated peer.

Recommended Action: If necessary, reset the connection with the peer.

BGP-3-SNMP_API_DATA Format: Message data is NULL

Explanation: SNMP message does not have memory to store data.

Recommended Action: No user action is required.

BGP-3-CONDSRV_CLEANUP Format: Conditional Service cleanup request failed, %s

Explanation: Sysmgr rejected BGP's request to shut down.

Recommended Action: No user action is required.

BGP-4-SNMP_REGFAIL Format: Failed to register MIB with the SNMP agent, the BGP MIB will be unavailable. (%s)\n

Explanation: MIB registration failed during startup.

Recommended Action: No user action is required.

BGP-4-SNMP_DEREGFAIL Format: Failed to deregister MIB with the SNMP agent (%s).\n

Explanation: MIB deregistration failed during shutdown.

Recommended Action: No user action is required.

BGP-3-FEATURE_STATUS Format: FM status for feature %s failed with error: %s(0x%08x).\n

Explanation: FM get feature status failed

Recommended Action: No user action is required.

BGP-3-URIB_API Format: URIB API %s() failed\n

Explanation: URIB API had failed

Recommended Action: No user action is required.

BGP-3-CONFCHECK Format: confcheck API %s() failed with error: %s(0x%08x).\n

Explanation: confcheck API has failed

Recommended Action: No user action is required.

BGP-7-OBJSTORE Format: Objstore API %s() failed with error: %d\n

Explanation: Objstore API has failed

Recommended Action: No user action is required.

BIOS_DAEMON Messages

BIOS_DAEMON-LC-2-BIOS_DAEMON_LC_ERROR Format: BIOS Sector (%d) is write protected

Explanation: BIOS WRITE PROTECTED

Recommended Action: Copy the message exactly as it appears on the console or in the system log. Research and attempt to resolve the issue using the tools and utilities provided at http://www.cisco.com/tac. Also refer to the Cisco ACI Release Notes and the Cisco ACI Troubleshooting Guide. If you cannot resolve the issue, export an On-demand TechSupport data file and contact Cisco Technical Support.

BIOS_DAEMON-2-BIOS_DAEMON_SUP_ERROR Format: BIOS Sector (%d) is write protected

Explanation: BIOS WRITE PROTECTED

Recommended Action: Copy the message exactly as it appears on the console or in the system log. Research and attempt to resolve the issue using the tools and utilities provided at http://www.cisco.com/tac. Also refer to the Cisco ACI Release Notes and the Cisco ACI Troubleshooting Guide. If you cannot resolve the issue, export an On-demand TechSupport data file and contact Cisco Technical Support.

BIOS_DAEMON-2-BIOS_DAEMON_FLASH_WARNING Format: Flash chip not supported by running image. Skipping bios upgrade.

Explanation: BIOS CHIP NOT SUPPORTED

Recommended Action: No action is required.

BIOS_DAEMON-LC-2-BIOS_DAEMON_LC_PRI_BOOT_FAIL Format: System booted from Alternate BIOS Flash

Explanation: Boot from Alternate

Recommended Action: No action is required.

BIOS_DAEMON-LC-5-BIOS_DAEMON_LC_PRI_BOOT Format: System booted from Primary BIOS Flash

Explanation: Boot from Primary

Recommended Action: No action is required.

BIOS_DAEMON-2-BIOS_DAEMON_PRI_BOOT_FAIL Format: System booted from Alternate BIOS Flash

Explanation: Boot from Alternate

Recommended Action: No action is required.

BIOS_DAEMON-5-BIOS_DAEMON_PRI_BOOT Format: System booted from Primary BIOS Flash

Explanation: Boot from Primary

Recommended Action: No action is required.

CARD_CLIENT Messages

CRDCLIENT-3-CARDCL_ERR Format: %s

Explanation: CardClient Error

Recommended Action: Copy the message exactly as it appears on the console or in the system log. Research and attempt to resolve the issue using the tools and utilities provided at http://www.cisco.com/tac. Also refer to the Cisco ACI Release Notes and the Cisco ACI Troubleshooting Guide. If you cannot resolve the issue, export an On-demand TechSupport data file and contact Cisco Technical Support.

CRDCLIENT-2-CARDCL_CRIT Format: %s

Explanation: CardClient Critical Message

Recommended Action: Copy the message exactly as it appears on the console or in the system log. Research and attempt to resolve the issue using the tools and utilities provided at http://www.cisco.com/tac. Also refer to the Cisco ACI Release Notes and the Cisco ACI Troubleshooting Guide. If you cannot resolve the issue, export an On-demand TechSupport data file and contact Cisco Technical Support.

CRDCLIENT-2-SSE Format: %s

Explanation: CardClient Console Message

Recommended Action: Copy the message exactly as it appears on the console or in the system log. Research and attempt to resolve the issue using the tools and utilities provided at http://www.cisco.com/tac. Also refer to the Cisco ACI Release Notes and the Cisco ACI Troubleshooting Guide. If you cannot resolve the issue, export an On-demand TechSupport data file and contact Cisco Technical Support.

CRDCLIENT-2-REG Format: %s

Explanation: CardClient Console Message

Recommended Action: Copy the message exactly as it appears on the console or in the system log. Research and attempt to resolve the issue using the tools and utilities provided at http://www.cisco.com/tac. Also refer to the Cisco ACI Release Notes and the Cisco ACI Troubleshooting Guide. If you cannot resolve the issue, export an On-demand TechSupport data file and contact Cisco Technical Support.

CRDCLIENT-LC-2-IMG_ERR Format: %s

Explanation: CardClient Remote Syslog msg

Recommended Action: Copy the message exactly as it appears on the console or in the system log. Research and attempt to resolve the issue using the tools and utilities provided at http://www.cisco.com/tac. Also refer to the Cisco ACI Release Notes and the Cisco ACI Troubleshooting Guide. If you cannot resolve the issue, export an On-demand TechSupport data file and contact Cisco Technical Support.

CRDCLIENT-LC-2-ERR Format: %s

Explanation: CardClient Remote Syslog msg

Recommended Action: Copy the message exactly as it appears on the console or in the system log. Research and attempt to resolve the issue using the tools and utilities provided at http://www.cisco.com/tac. Also refer to the Cisco ACI Release Notes and the Cisco ACI Troubleshooting Guide. If you cannot resolve the issue, export an On-demand TechSupport data file and contact Cisco Technical Support.

CDPD Messages

CDPD-2-INITFAIL Format: CDP Daemon Initialization failed: %s

Explanation: CDP Daemon Initialization failed. [chars] explains the reason for the failure.

Recommended Action: No action is required.

CDPD-3-ALLOCFAIL Format: Heap Memory allocation failed: %s

Explanation: CDP Daemon is out of dynamic memory. [chars] specifies the context where the failure occurred.

Recommended Action: No action is required.

CDPD-3-MTSERROR Format: %s

Explanation: CDP Daemon encountered an MTS error. [chars] specifies the context where the error occurred.

Recommended Action: No action is required.

CDPD-3-PSSERROR Format: %s

Explanation: CDP Daemon encountered a PSS error. [chars] specifies the context where the failure occurred.

Recommended Action: No action is required.

CDPD-3-GENERROR Format: %s

Explanation: CDP Daemon encountered a general error, one that does not fall in any of the above categories. [chars] describes the error and its context.

Recommended Action: No action is required.

CDPD-3-PKTRECVFAIL Format: Failed to receive packet - %s

Explanation: Failed to receive packet. [char] identifies the reason.

Recommended Action: No action is required.

CDPD-3-PKTSENDFAIL Format: Failed to send packet, interface 0x%x - %s

Explanation: Failed to send packet. [dec] identifies the interface [char] identifies the reason.

Recommended Action: No action is required.

CDPD-6-CDPDUP Format: CDP Daemon Up.

Explanation: CDP Daemon was created successfully and is up and running. This is an informational message.

Recommended Action: No action is required.

CDPD-6-PORTUP Format: A CDP enabled port %s came up.

Explanation: A CDP enabled port became operational. [chars] is the interface-ID string that identifies the port. This is an informational message.

Recommended Action: No action is required.

CDPD-6-PORTDOWN Format: A CDP enabled port %s went down.

Explanation: A CDP enabled port became un-operational. [chars] is the interface-ID string that identifies the port. This is an informational message.

Recommended Action: No action is required.

CDPD-6-PORTENABLE Format: CDP enabled on port %s

Explanation: CDP was enabled on a given port. [chars] is the interface-ID string that identifies the port. This is an informational message.

Recommended Action: No action is required.

CDPD-6-PORTDISABLE Format: CDP disabled on port %s

Explanation: CDP was disabled on a given port. [chars] is the interface-ID string that identifies the port. This is an informational message.

Recommended Action: No action is required.

CDPD-6-CDPEXIT Format: CDP Daemon shutting down gracefully.

Explanation: CDP Daemon is shutting down gracefully. This is an informational message.

Recommended Action: No action is required.

CDPD-5-ENABLED Format: CDP is enabled

Explanation: CDP is enabled on the device.

Recommended Action: No action is required.

CDPD-5-DISABLED Format: CDP is disabled

Explanation: CDP is disabled on the device.

Recommended Action: No action is required.

CDPD-5-NEIGHBOR_ADDED Format: Device %s discovered of type %s with port %s on incoming port %s with ip addr %s and mgmt ip %s

Explanation: Discovered a neighbor device. This is an informational message.

Recommended Action: No action is required.

CDPD-5-NEIGHBOR_REMOVED Format: CDP Neighbor %s on port %s has been removed

Explanation: Deleted a neighbor device. This is an informational message.

Recommended Action: No action is required.

CDPD-4-DUPLEX_MISMATCH Format: Duplex mismatch discovered on %s, with %s

Explanation: duplex mismatch discovered from the received cdp packet This is a warning message.

Recommended Action: No action is required.

CDPD-4-NATIVE_VLAN_MISMATCH Format: Native VLAN mismatch discovered on %s(%d), with %s(%d)

Explanation: Native VLAN mismatch discovered This is a warning message.

Recommended Action: No action is required.

CDPD-3-CDPD_INTERNAL_ERROR Format: CDP internal error: %s

Explanation: Internal error is encountered

Recommended Action: No action is required.

CDPD-3-ISTACKREGISTER Format: Failed to register istack - %s

Explanation: Failed to register istack. [char] identifies the reason.

Recommended Action: No action is required.

CRDCFG Messages

CRDCFG-3-CRDCFG_ERR Format: %s

Explanation: CardConfig error mesage

Recommended Action: Copy the message exactly as it appears on the console or in the system log. Research and attempt to resolve the issue using the tools and utilities provided at http://www.cisco.com/tac. Also refer to the Cisco ACI Release Notes and the Cisco ACI Troubleshooting Guide. If you cannot resolve the issue, export an On-demand TechSupport data file and contact Cisco Technical Support.

CRDCFG-3-CRDCFG_SRV_ERR Format: %s

Explanation: CardConfigServer error mesage

Recommended Action: Copy the message exactly as it appears on the console or in the system log. Research and attempt to resolve the issue using the tools and utilities provided at http://www.cisco.com/tac. Also refer to the Cisco ACI Release Notes and the Cisco ACI Troubleshooting Guide. If you cannot resolve the issue, export an On-demand TechSupport data file and contact Cisco Technical Support.

CRDCFG-LC-2-CONFIG_ERR Format: %s

Explanation: CardConfig Failed to find matching cardid, pnum in database

Recommended Action: Copy the message exactly as it appears on the console or in the system log. Research and attempt to resolve the issue using the tools and utilities provided at http://www.cisco.com/tac. Also refer to the Cisco ACI Release Notes and the Cisco ACI Troubleshooting Guide. If you cannot resolve the issue, export an On-demand TechSupport data file and contact Cisco Technical Support.

DC3_SENSOR Messages

DC3_SENSOR-3-DC3_SENSOR_MSG1 Format: %s

Explanation: SENSOR log message

Recommended Action: No action is required.

DEVICE_TEST Messages

DEVICE_TEST-2-MALLOC_FAILURE Format: "Memory allocation failed"

Explanation: Device Test process could not allocate memory

Recommended Action: No action is required.

DEVICE_TEST-4-THREAD_CREATE_FAIL Format: "Thread creation failed"

Explanation: Device Test process could not create threads

Recommended Action: No action is required.

DEVICE_TEST-3-STANDBY_TEST_INIT_FAIL Format: "Init for standby test failed due to error %x")msgdef_explanation("Device Test StandbyFabricLoopback Test failed init process"

Recommended Action: No action is required.

DEVICE_TEST-3-STANDBY_TEST_MTS_FAIL Format: "Mts Init for standby test failed due to error %x")msgdef_explanation("Device Test StandbyFabricLoopback Test failed mts init"

Recommended Action: No action is required.

DEVICE_TEST-3-STANDBY_TEST_GET_SPINE_FAIL Format: "Standby test get spines failed due to error %x")msgdef_explanation("Device Test StandbyFabricLoopback Test get spine failed"

Recommended Action: No action is required.

DEVICE_TEST-3-STANDBY_TEST_GET_DIAG_VQI_FAIL Format: "Standby test get diag vqi failed due to error %x")msgdef_explanation("Device Test StandbyLoopback Test failed get vqi"

Recommended Action: No action is required.

DEVICE_TEST-3-STANDBY_TEST_SOCKET_FAIL Format: "Standby test socket error %s: %x")msgdef_explanation("Device Test StandbyFabricLoopback Test Socket error"

Recommended Action: No action is required.

DEVICE_TEST-5-LC_TEST_PASS Format: Module-id(%d): %s has completed successfully

Explanation: Test on this particular LineCard completed successfully

Recommended Action: No action is required.

DEVICE_TEST-5-LC_TEST_FAIL Format: Module-id(%d): %s has failed

Explanation: Test on this particular LineCard failed

Recommended Action: No action is required.

DEVICE_TEST-5-TEST_FAILURE_EXCESS Format: "Module-id(%d): %s has failed more %d times"

Explanation: A test has failed more than configured allowed limit

Recommended Action: No action is required.

DEVICE_TEST-5-RT_PSS_OP_FAILURE Format: "DiagClient PSS operation failed"

Recommended Action: No action is required.

DEVICE_TEST-2-ASIC_REG_CHECK_FAIL Format: Module %d has failed test %s %d times on device %s %s %d %s due to error %s

Explanation: Online diagnostics ASICRegisterCheck test has failed

Recommended Action: No action is required.

DEVICE_TEST-2-USB_FAIL Format: Module %d has failed test %s %d times on device USB due to error %s

Explanation: Online diagnostics USB test has failed

Recommended Action: No action is required.

DEVICE_TEST-2-NVRAM_FAIL Format: Module %d has failed test %s %d times on device NVRAM due to error %s

Explanation: Online diagnostics NVRAM test has failed

Recommended Action: No action is required.

DEVICE_TEST-2-RTC_FAIL Format: Module %d has failed test %s %d times on device RealTimeClock due to error %s

Explanation: Online diagnostics RealTimeClock test has failed

Recommended Action: No action is required.

DEVICE_TEST-2-PRIMARY_BOOTROM_FAIL Format: Module %d has failed test %s %d times on device Primary BootROM due to error %s

Explanation: Online diagnostics PrimaryBootROM test has failed

Recommended Action: No action is required.

DEVICE_TEST-2-SPINE_CONTROL_BUS_FAIL Format: Module %d has failed test %s %d times on device Spine Control Bus on slot %d due to error %s error number 0x%08X

Explanation: Online diagnostics SpineControlBus test has failed

Recommended Action: No action is required.

DEVICE_TEST-2-POWER_SUPPLY_FAIL Format: Module %d has failed test %s %d times on System Mgmt Bus for chassis %s instance %d due to error %s error number 0x%08X

Explanation: Online diagnostics SystemMgmtBus test has failed

Recommended Action: No action is required.

DEVICE_TEST-2-FAN_MOD_FAIL Format: Module %d has failed test %s %d times on System Mgmt Bus for chassis %s instance %d due to error %s error number 0x%08X

Explanation: Online diagnostics SystemMgmtBus test has failed

Recommended Action: No action is required.

DEVICE_TEST-2-TWOWIRE_STW_FAIL Format: Module %d has failed test %s %d times on Status Bus on slot %d due to error %s

Explanation: Online diagnostics Status bus test has failed

Recommended Action: No action is required.

DEVICE_TEST-2-STANDBY_LOOPBACK_TEST_FAIL Format: Module %d has failed test %s %d times on %s %d due to error %s

Explanation: Online diagnostics StandbyFabricLoopback test has failed

Recommended Action: No action is required.

DEVICE_TEST-2-MGMT_PORT_SKIP Format: Module %d has skipped test %s on Management Port due to error %s

Explanation: Online diagnostics ManagementPort test is skipped

Recommended Action: No action is required.

DEVICE_TEST-2-EOBC_FAIL Format: Module %d has failed test %s on EOBC due to error %s

Explanation:

Recommended Action:

DEVICE_TEST-2-EPC_FAIL Format: Module %d has failed test %s on EPC due to error %s

Explanation: Online diagnostics EOBC test has failed

Recommended Action: No action is required.

DEVICE_TEST-2-OBFL_FAIL Format: Module %d has failed test %s %d times on device OBFL due to error %s

Explanation: Online diagnostics OBFL test has failed

Recommended Action: No action is required.

DEVICE_TEST-2-EPC_EOBC_SWITCH_FAIL Format: %s switch device %d diag failed. Port bitmap 0x%x, Pass bitmap 0x%x

Explanation: Bootup diagnostics test on EPC/EOBC switch failed

Recommended Action: No action is required.

DHCP_SNOOP Messages

DHCP_SNOOP-2-INITFAIL Format: DHCP Daemon Initialization failed: %s

Explanation: DHCP Daemon Initialization failed. [chars] explains the reason for the failure.

Recommended Action: No action is required.

DHCP_SNOOP-2-REGPARTREE Format: Unable to register par tree: %s

Explanation: Could not register par tree. [chars] explains the reason for the failure.

Recommended Action: No action is required.

DHCP_SNOOP-2-DHCP_SNOOP_PROGRAM_EXIT Format: %s

Explanation: DHCP snoop process did an abnormal exit

Recommended Action: No action is required.

DHCP_SNOOP-2-DHCP_CLIENT_DISCOVER_START Format: DHCP client Discover phase started

Explanation: DHCP client Discover phase started

Recommended Action: No action is required.

DHCP_SNOOP-2-DHCP_CLIENT_DISCOVER_START_INTF_LIST Format: DHCP client discover phase started list of interfaces

Explanation: DHCP client discover phase started list of interfaces

Recommended Action: No action is required.

DHCP_SNOOP-2-DHCP_CLIENT_REQUEST_START_INTF_LIST Format: DHCP client request phase started list of interfaces

Explanation: DHCP client request phase started list of interfaces

Recommended Action: No action is required.

DHCP_SNOOP-2-DHCP_CLIENT_REQUEST_START Format: DHCP client starts from Request phase directly

Explanation: DHCP client starts from Request phase directly

Recommended Action: No action is required.

DHCP_SNOOP-2-DHCP_CLIENT_FAILURE Format: DHCP client failed

Explanation: DHCP client failed

Recommended Action: No action is required.

DHCP_SNOOP-2-DHCP_CLIENT_INFO Format: %s

Explanation: DHCP client info

Recommended Action: No action is required.

DHCP_SNOOP-2-DHCP_DISCOVER_RECVD_NAK Format: Received DHCP NAK

Explanation: Received DHCP NAK

Recommended Action: No action is required.

DHCP_SNOOP-3-MTSERROR Format: %s

Explanation: DHCP Daemon encountered an MTS error. [chars] specifies the context where the error occurred.

Recommended Action: No action is required.

DHCP_SNOOP-3-SOCKOPENFAIL Format: Failed to open socket for receiving DHCP packets - %s

Explanation: An attempt to open a socket for receiving DHCP packets failed. [char] identifies the reason.

Recommended Action: No action is required.

DHCP_SNOOP-3-SOCKBINDFAIL Format: Failed to bind to raw socket - %s

Explanation: Failed to bind to socket. [char] identifies the reason.

Recommended Action: No action is required.

DHCP_SNOOP-3-PKTRECVFAIL Format: Failed to receive packet - %s

Explanation: Failed to receive packet. [char] identifies the reason.

Recommended Action: No action is required.

DHCP_SNOOP-3-PKTDROP Format: Packet dropped. Reason - %s

Explanation: Dropping the packet. [char] identifies the reason.

Recommended Action: No action is required.

DHCP_SNOOP-3-PKTSENDFAIL Format: Failed to send packet, - %s

Explanation: Failed to send packet. [char] identifies the reason.

Recommended Action: No action is required.

DHCP_SNOOP-3-INVDHCPPKTS Format: Validation errors while processing DHCP packet received on interface %s vlan %d Reason:%s. Dropping the packet

Explanation: Validation errors DHCP packet receieved on the interface [chars] vlan [%d]. Reason:[chars]

Recommended Action: No action is required.

DHCP_SNOOP-6-DHCPUP Format: DHCP Daemon Up.

Explanation: DHCP Daemon was created successfully and is up and running. This is an informational message.

Recommended Action: No action is required.

DHCP_SNOOP-6-OPT82INSTFAIL Format: %s %s

Explanation: Insertion of Option82 suboptions failed. [chars] tells the failure. [chars] explains the reason for failure. This is an informational message.

Recommended Action: No action is required.

DHCP_SNOOP-6-DHCPEXIT Format: DHCP Daemon shutting down gracefully.

Explanation: DHCP Daemon is shutting down gracefully. This is an informational message.

Recommended Action: No action is required.

DHCP_SNOOP-6-NONDHCPPKTFWD Format: Non DHCP packet with src port:%d dst port:%d on intf:%s vlan:%d. Forwarding on %s

Explanation: Non DHCP packet arrived with UDP src/dst ports [dec], [dec] on interface [chars], vlan [dec]. Forwarding the packet on [chars]

Recommended Action: No action is required.

DHCP_SNOOP-6-DHCPPKTFWD Format: Gracefully forwarding DHCP packet. Reason: %s

Explanation: Gracefully forwarding DHCP packet. reason [chars]

Recommended Action: No action is required.

DHCP_SNOOP-3-ASSERTION_FAILED Format: %s:%d

Explanation: DHCP Snoop process has hit an assert condition at file [chars] line number [dec]

Recommended Action: No action is required.

DIAGCLIENT Messages

DIAGCLIENT-5-CALLOC_FAILURE Format: Memory allocation failed

Explanation: DiagClient process could not allocate memory

Recommended Action: No action is required.

DIAGCLIENT-3-ONDEMAND_FAIL_EXCESS Format: Module \ Test \ has failed more than \ number of times

Explanation: Ondemand test has failed more than configured number of times

Recommended Action: copy the error message exactly as it appears on the console, gather the output of show tech-support, and contact your Cisco technical support representative with the gathered information

DIAGCLIENT-5-ONDEMAND_SUCCESS Format: Module \ Test \ has completed successfully in Test_Iteration \

Explanation: The specified test has reported SUCCESS in this Iteration

Recommended Action: No action is required.

DIAGCLIENT-5-ONDEMAND_FAIL Format: Module \ Test \ has failed in Test_Iteration \

Explanation: The specified test has reported FAILURE in this Iteration

Recommended Action: No action is required.

DIAGCLIENT-7-DIAG_HM_FAIL Format: Module \ Health Monitoring Test \ has failed. Please use 'show diagnostic result \' to see test results

Explanation: A Health Monitoring Test has reported failure

Recommended Action: Ensure the line card is firmly in the slot, reseat if necessary, and attempt to run the test again if the line card is not seated properly in the slot. If the line card was properly seated in the slot, copy the error message exactly as it appears on the console, gather the output of show tech-support, and contact your Cisco technical support representative with the gathered information.

DIAGCLIENT-7-PER_PORT_TEST_FAIL Format: PORT_LIST */ "Module \ Test \ has failed on Ports \ Please use 'show diagnostic result \' to see test results"

Explanation: Per Port Test has failed on the above all ports

Recommended Action: No action is required.

DIAGCLIENT-4-MTS_SEND_FAILURE Format: MTS send failed, mts_opc: %s, dest slot: %u, dest SAP: %d, error-id: 0x%x

Explanation: MTS send reports failure

Recommended Action: No action is required.

DIAGCLIENT-2-PSS_WRITE_FAILURE Format: /* MODULE_ID */ "Write to PSS failed on Module \"

Explanation: Write operation on PSS store failed

Recommended Action: No action is required.

DIAGCLIENT-2-PSS_READ_FAILURE Format: /* MODULE_ID */ "Read from PSS failed on Module \"

Explanation: Read operation from PSS store failed

Recommended Action: No action is required.

DIAGCLIENT-4-LC_OFFLINE_FOR_CURR_SLOT Format: Received LC offline event for the current slot:%d. Ignoring it

Explanation: Informational Syslog

Recommended Action: No action is required.

DIAGCLIENT-5-DIAG_ONDEMAND_TEST_START Format: Module %d: Ondemand test %s started

Explanation: Informational Syslog

Recommended Action: No action is required.

DIAGCLIENT-5-DIAG_ONDEMAND_TEST_STOP Format: Module %d: Ondemand test %s stopped

Explanation: Informational Syslog

Recommended Action: No action is required.

DIAGCLIENT-5-DIAG_ONDEMAND_TEST_FINISH Format: Module %d: Ondemand test %s finished

Explanation: Informational Syslog

Recommended Action: No action is required.

DIAGMGR Messages

DIAGMGR-5-CALLOC_FAILURE Format: Memory allocation failure

Explanation: Memory allocation in a call to malloc/calloc has failed

Recommended Action: No action is required.

DIAGMGR-5-BOOTUP_CONF Format: /*COMPLETE/BYPASS*/ "Diagnostic Bootup Level: \"

Explanation: Current Diagnostic BootUp Level being configure or changed

Recommended Action: No action is required.

DIAGMGR-2-MTS_SEND_FAILURE Format: MTS send failed, mts_opc: %s, dest slot: %d, dest SAP: %d, error-id: 0x%x

Explanation: MTS send reports failure

Recommended Action: No action is required.

DIAG_PORT_LB Messages

DIAG_PORT_LB-5-DIAG_PORT_LB_ENABLED Format: DIAG_PORT_LB Enabled

Explanation: DIAG_PORT_LB Service nabled

Recommended Action: No action is required.

DIAG_PORT_LB-5-DIAG_PORT_LB_DISABLED Format: DIAG_PORT_LB Disabled

Explanation: DIAG_PORT_LB Service Disabled

Recommended Action: No action is required.

DIAG_PORT_LB-2-MALLOC_FAILURE Format: %s(%d) Memory allocation failed.

Explanation: Port Loopback test process could not allocate memory

Recommended Action: No action is required.

DIAG_PORT_LB-3-PIXM_LIB_ERROR Format: %s(%d) Failed to convert %s:%x to %s. Error:%s

Explanation: Port Loopback test process failed to convert port ifindex \ port index.

Recommended Action: No action is required.

DIAG_PORT_LB-3-PORT_CLIENT_LIB_ERROR Format: %s(%d) %s. Error:%s

Explanation: Port Loopback test process failed in Port Client API.

Recommended Action: No action is required.

DIAG_PORT_LB-4-MTS_LIB_ERROR Format: %s(%d) %s. Warning:%s

Explanation: Port Loopback test process failed in MTS API.

Recommended Action: No action is required.

DIAG_PORT_LB-3-FSM_LIB_ERROR Format: %s(%d) %s. Error:%s

Explanation: Port Loopback test process failed in MTS API.

Recommended Action: No action is required.

DIAG_PORT_LB-3-STATS_LIB_ERROR Format: %s(%d) %s:%d

Explanation: Port Loopback test process failed in stats infra lib API.

Recommended Action: No action is required.

DIAG_PORT_LB-3-DIAG_PKT_SEND_FAILURE Format: %s(%d) %s. Error:%s

Explanation: Port Loopback test process failed to send loopback packets.

Recommended Action: No action is required.

DIAG_PORT_LB-3-TIMER_LIB_ERROR Format: %s(%d) %s

Explanation: Port Loopback test process timer handling failure.

Recommended Action: No action is required.

DIAG_PORT_LB-3-INVALID_TEST_REQUEST Format: %s(%d) %s:%d

Explanation: Port Loopback test process failed to get test request info.

Recommended Action: No action is required.

DIAG_PORT_LB-3-INVALID_TEST_RUN Format: %s(%d) %s:%d

Explanation: Port Loopback test process failed to get the current test run information

Recommended Action: No action is required.

DIAG_PORT_LB-3-RESULT_ADD_FAILURE Format: %s(%d) %s:%d

Explanation: Port Loopback test process failed to add the port test result

Recommended Action: No action is required.

DIAG_PORT_LB-3-IFINDEX_LIB_FAILURE Format: %s(%d) %s %s:%x %s %s

Explanation: Port Loopback test process failed in if_index library API

Recommended Action: No action is required.

DIAG_PORT_LB-2-PROC_INIT_FAILURE Format: %s(%d) %s Error:%s

Explanation: Port Loopback test process failed in process initialization

Recommended Action: No action is required.

DIAG_PORT_LB-3-SOCKET_ERROR Format: %s(%d) %s Error:%s

Explanation: Port Loopback test process failed in socket operations

Recommended Action: No action is required.

DIAG_PORT_LB-2-LIF_GET_ERROR Format: %s(%d) %s Error:%s

Explanation: Port Loopback test process failed to get Diagnostic LIF id

Recommended Action: No action is required.

DIAG_PORT_LB-3-VLAN_ERROR Format: %s(%d) %s Error:%s

Explanation: Port Loopback test process failed to get Diagnostic VLAN info

Recommended Action: No action is required.

DIAG_PORT_LB-2-PORTLOOPBACK_TEST_FAIL Format: Module:%d Test:PortLoopback failed %d consecutive times. Faulty module:%s %s Error:%s

Explanation: PortLoopback test failed on the module consecutively

Recommended Action: No action is required.

DIAG_PORT_LB-2-REWRITE_ENGINE_LOOPBACK_TEST_FAIL Format: Module:%d Test:RewriteEngine Loopback failed %d consecutive times. Faulty module:%s %s Error:%s

Explanation: Rewrite Engine Loopback test failed on the module consecutively

Recommended Action: No action is required.

DIAG_PORT_LB-4-PORT_CFG_REQ_SEND Format: %s(%d) Failed to send request to configure port ifindex:%d for port loopback test

Explanation: Failed to configure/restore the port to do/cleanup port loopback testing

Recommended Action: No action is required.

DIAG_PORT_LB-3-VQI_GET_FAIL Format: Failed to get the Diag VQi from XBM. Error:%s

Explanation: Rewrite Engine Loopback test failed to get the Diag VQi from XBAR Mgr

Recommended Action: No action is required.

DIAG_PORT_LB-3-RW_ENGINE_LOOPBACK_TEST_SPINE_PATH_FAIL Format: Module:%d Test:RewriteEngine Loopback Spine path:%d failed %d consecutive times. Error:%s

Explanation: Rewrite Engine Loopback test failed on the spine path consecutively

Recommended Action: No action is required.

DIAG_PORT_LB-3-TEST_RES_SEND_FAIL Format: Failed to send %s test results back to Diagnostics Infrastucture. Error:%s.

Explanation: The port loopback test was not able to send the test results

Recommended Action: No action is required.

DIAG_PORT_LB-3-PDB_LIB_API_ERROR Format: Failed to %s. Error:%d.

Explanation: The port loopback test was not able to get chassis info

Recommended Action: No action is required.

DIAG_PORT_LB-3-DIAG_FWD_PATH_SETUP_FAILURE Format: %s. Module:%d Error:%s.

Explanation: Forwarding path setup for port loopback tests failed

Recommended Action: No action is required.

DIAG_PORT_LB-2-LCM_RESP_SEND_FAILURE Format: LC Inserted request response send to Module Manager failed . Error:%s

Explanation: Failed to send the response for LC insertion to Module Manager.

Recommended Action: No action is required.

DIAG_PORT_LB-2-FIPS_RANDOM_ERROR Format: Random Number Generation Failure

Explanation: Random Number genration failed in FIPS module

Recommended Action: No action is required.

DIAG_PORT_LB-2-SNAKE_TEST_LOOPBACK_TEST_FAIL Format: Module:%d Test:SnakeLoopback failed %d consecutive times. Faulty module:%s affected ports:%s Error:%s

Explanation: Snake test failed on the module consecutively

Recommended Action: No action is required.

DNS Messages

DT_HELPER Messages

ETH_PORT_CHANNEL Messages

ETH_PORT_CHANNEL-5-CREATED Format: %s created

Explanation: a port-channel is created

Recommended Action: No action is required.

ETH_PORT_CHANNEL-5-DELETED Format: %s deleted

Explanation: a port-channel is deleted

Recommended Action: No action is required.

ETH_PORT_CHANNEL-5-PORT_ADDED Format: %s added to %s

Explanation: ports are added to a port-channel

Recommended Action: No action is required.

ETH_PORT_CHANNEL-5-PORT_REMOVED Format: %s removed from %s

Explanation: ports are removed from a port-channel

Recommended Action: No action is required.

ETH_PORT_CHANNEL-4-PORT_CFG_DELETED Format: %s removed from %s (different module inserted)

Explanation: port is removed from a port-channel because a different module was inserted to the same slot

Recommended Action: you lost some ports from port-channel, check if you want to add ports in the new module to the same port-channel.

ETH_PORT_CHANNEL-5-PORT_UP Format: %s: %s is up

Explanation: port comes up in a port-channel

Recommended Action: No action is required.

ETH_PORT_CHANNEL-5-PORT_DOWN Format: %s: %s is down

Explanation: port goes down in a port-channel

Recommended Action: No action is required.

ETH_PORT_CHANNEL-5-PORT_SUSPENDED Format: %s: %s is suspended

Explanation: port is suspended in a port-channel

Recommended Action: No action is required.

ETH_PORT_CHANNEL-5-PORT_HOT_STANDBY Format: %s: %s goes to hot-standby

Explanation: port goes to hot-standby in a port-channel

Recommended Action: No action is required.

ETH_PORT_CHANNEL-5-PORT_HOT_STANDBY_DOWN Format: %s: hot-standby port %s is down

Explanation: port-channel hot-standby member goes down

Recommended Action: No action is required.

ETH_PORT_CHANNEL-3-COMPAT_CHECK_FAILURE Format: %s is not compatible

Explanation: compatibility check failed when adding ports to port-channel

Recommended Action: make sure the compatibility parameters are consistent while adding ports to port-channel, or use force option

ETH_PORT_CHANNEL-5-IF_DOWN_SUSPENDED_BY_MODE Format: Interface %s is down (Suspended due to incompatible mode

Explanation: compatibility check failed when adding ports to port-channel

Recommended Action: make sure the compatibility parameters are consistent between the ports and the port-channel

ETH_PORT_CHANNEL-5-IF_DOWN_SUSPENDED_BY_SPEED Format: Interface %s is down (Suspended due to incompatible speed

Explanation: operational compatibility check failed on the port in a port-channel

Recommended Action: make sure the compatibility parameters are consistent between the ports and the port-channel

ETH_PORT_CHANNEL-1-MALLOC_FAILED Format: cannot allocate memory (size %d)

Explanation: no enough memory

Recommended Action: No action is required.

ETH_PORT_CHANNEL-3-MSG_SEND_FAILURE Format: failed to send %s to sap %d: %s

Explanation: failed to send a message

Recommended Action: No action is required.

ETH_PORT_CHANNEL-5-FOP_CHANGED Format: %s: first operational port changed from %s to %s

Explanation: the first operational port in a port-channel is changed

Recommended Action: No action is required.

ETH_PORT_CHANNEL-3-PORT_CHANNEL_NOT_FOUND Format: %s is not found

Explanation: cannot find port-channel in its database, which indicates an inconsistency with an external component

Recommended Action: No action is required.

ETH_PORT_CHANNEL-4-RACE_WARN Format: %s

Explanation: warning of possible race condition

Recommended Action: No action is required.

ETH_PORT_CHANNEL-3-GENERAL_ERROR Format: %s

Explanation: general error

Recommended Action: No action is required.

ETH_PORT_CHANNEL-4-PORT_INDIVIDUAL Format: port %s is operationally individual

Explanation: the port is operating as an individual link even though it is locally or remotely configured to be part of a port channel

Recommended Action: check the configuration of the port locally and remotely to ensure that it can operate as part of a port channel

ETH_PORT_CHANNEL-5-PORT_INDIVIDUAL_DOWN Format: individual port %s is down

Explanation: port-channel member operating in individual mode goes down

Recommended Action: No action is required.

ETH_PORT_CHANNEL-3-RSP_TIMEOUT Format: Component %s timed out on response to opcode:%s (for:%s)

Explanation: Some component did not respond to a request in stipulated time.

Recommended Action: None

ETH_PORT_CHANNEL-3-ALL_DROP_TIMEOUT Format: Some component(s) (sap:%s) timed out on dropping notif:%s (for:%s); Please collect \

Explanation: Some component did not respond to a request in stipulated time.

Recommended Action: None

ETH_PORT_CHANNEL-3-NUM_ACTIVE_PORTS_ERROR Format: Port-channel:%s active_nports %d; No member is active; Please collect \

Explanation: Port-channel num active ports error

Recommended Action: None

ETH_PORT_CHANNEL-3-PCM_HWCFG_FAIL_ERROR Format: Port-channel:%s mbr:%s SAP %d returned error %s for opc %s; if lacp port-channel please collect \ or please collect \

Explanation: Port-channel hwcfg fail error

Recommended Action: None

ETH_PORT_CHANNEL-3-PCM_PORT_DOWN_IN_PC_UP_ERROR Format: Port-channel:%s mbr:%s; if lacp port-channel please collect \ or please collect \

Explanation: Port-channel port down in pc_up. No bundle member down

Recommended Action: None

ETH_PORT_CHANNEL-3-ADD_REM_MEMBERS_FAILURE Format: %s

Explanation: Some service(s) failed to add or remove ports to port-channel

Recommended Action: None

ETH_PORT_CHANNEL-3-PCM_PORT_DEL_IN_PC_UP_ERROR Format: Port-channel:%s mbr:%s; if lacp port-channel please collect \ or please collect \

Explanation: Port-channel port del in pc_up. Shut resp recvd before bundle member down

Recommended Action: None

ETH_PORT_CHANNEL-3-RESOURCE_ALLOC_FAILED_PORT_CHANNEL_DELETED Format: %s deleted

Explanation: port-channel deleted from running config

Recommended Action: may need to re-configure the port-channel and its members

ETH_PORT_MGR Messages

ETH_PM-5-IF_UP Format: Interface %s is up %s

Explanation: Interface is up in mode specified, if applicable

Recommended Action: No action is required.

ETH_PM-5-IF_DOWN_NONE Format: Interface %s is down (%s)

Explanation: Interface is down with a possible reason.

Recommended Action: Collect more information about port using command 'show port internal info/event-history' to determine why it went down

ETH_PM-5-IF_DOWN_HW_FAILURE Format: Interface %s is down (Hardware Failure)

Explanation: The module's hardware has failed

Recommended Action: Collect more information about failed module using command 'show module internal all module'

ETH_PM-5-IF_DOWN_LOOPBACK_DIAG_FAILURE Format: Interface %s is down (Diag failure)

Explanation: Diag failed on the interface

Recommended Action: Collect more information about failed interface using command 'attach module' to connect to module

ETH_PM-2-IF_DOWN_ERROR_DISABLED Format: Interface %s is down (Error disabled. Reason:%s)

Explanation: The interface encountered an error while configuring it

Recommended Action: Collect more information about failed interface using command 'show port internal all interface [char]'. In most cases, you can recover using a 'shutdown' followed a 'no shutdown' on the interface or removing and re-inserting the fibre optic cable.

ETH_PM-5-IF_DOWN_SOFTWARE_FAILURE Format: Interface %s is down (Port software failure)

Explanation: The software servicing the data path on the port has failed

Recommended Action: No action is required.

ETH_PM-5-IF_DOWN_LINK_FAILURE Format: Interface %s is down (Link failure)

Explanation: The physical link has gone down

Recommended Action: Ensure that the cable is connected and the remote end is not shut down

ETH_PM-5-IF_DOWN_OFFLINE Format: Interface %s is down (Offline)

Explanation: The interface has been placed into the offline state

Recommended Action: No action is required.

ETH_PM-5-IF_DOWN_NON_PARTICIPATING Format: Interface %s is down (Non participating)

Explanation: The loop port has been put into non participating mode

Recommended Action: No action is required.

ETH_PM-5-IF_DOWN_INITIALIZING Format: Interface %s is down (Initializing)

Explanation: The interface is in the process of coming up

Recommended Action: If the interface is stuck in this state for a while, check the output of 'show port internal event-history' to determine what it is waiting for

ETH_PM-5-IF_DOWN_INACTIVE Format: Interface %s is down (Inactive)

Explanation: The port VSAN has been suspended or deleted

Recommended Action: Assign a new active port VSAN to the interface

ETH_PM-5-IF_DOWN_ADMIN_DOWN Format: Interface %s is down (Administratively down)

Explanation: Interface has been configured to be administratively down

Recommended Action: Perform 'no shutdown'

ETH_PM-5-IF_DOWN_CHANNEL_ADMIN_DOWN Format: Interface %s is down (Channel admin down)

Explanation: This interface belongs to a PortChannel and the PortChannel is configured to be administratively down

Recommended Action: Perform 'no shutdown' on the PortChannel interface that it belongs to

ETH_PM-3-IF_DOWN_CHANNEL_ERR_DISABLED Format: Interface %s is down (Channel error disabled)

Explanation: This interface belongs to a PortChannel and the PortChannel is error disabled

Recommended Action: Perform 'shut' and 'no shutdown' on the PortChannel interface that it belongs to

ETH_PM-5-IF_DOWN_SUSPENDED Format: Interface %s is down (Suspended)

Explanation: This interface belongs to a PortChannel and has been suspended due to an error while bringing it up

Recommended Action: Perform a 'shutdown' and a 'no shutdown'. If this happens again obtain output of 'show port internal info/event-history' on the interface

ETH_PM-5-IF_DOWN_CHANNEL_MEMBERSHIP_UPDATE_IN_PROGRESS Format: Interface %s is down (Channel membership update in progress)

Explanation: The interface belongs to a PortChannel and a configuration is being attempted on the interface while there is a configuration in progress on the PortChannel

Recommended Action: Retry the configuration again

ETH_PM-5-IF_DOWN_PARENT_ADMIN_DOWN Format: Interface %s is down (Parent interface down)

Explanation: Parent interface is down

Recommended Action: No action is required.

ETH_PM-5-IF_DOWN_SRC_PORT_NOT_BOUND Format: Interface %s is down (Tunnel port src interface unbound)

Explanation: Tunnel port source interface unbound

Recommended Action: No action is required.

ETH_PM-5-IF_DOWN_INTERFACE_REMOVED Format: Interface %s is down (Interface removed)

Explanation: Interface removed

Recommended Action: No action is required.

ETH_PM-5-IF_DOWN_FCOT_NOT_PRESENT Format: Interface %s is down (FCOT not present)

Explanation: The FCOT has been removed

Recommended Action: Insert an FCOT

ETH_PM-5-IF_DOWN_FCOT_VENDOR_NOT_SUPPORTED Format: Interface %s is down (Error disabled - Fcot vendor not supported)

Explanation: Fcot inserted is not a supported one

Recommended Action: Please contact customer support for a list of authorized transceiver vendors

ETH_PM-5-IF_DOWN_INCOMPATIBLE_ADMIN_MODE Format: Interface %s is down (Error disabled - Incompatible admin port mode)

Explanation: The configured mode is not supported on this interface

Recommended Action: Perform a 'show port internal info' to determine the list of modes supported on this interface

ETH_PM-5-IF_DOWN_INCOMPATIBLE_ADMIN_SPEED Format: Interface %s is down (Error disabled - Incompatible admin port speed)

Explanation: The configured speed is not supported on this interface

Recommended Action: Perform a 'show port internal info' to determine the range of speed supported on this interface

ETH_PM-5-IF_DOWN_SUSPENDED_BY_MODE Format: Interface %s is down (Suspended due to incompatible mode)

Explanation: This interface belongs to a PortChannel and operational mode of the interface is different from that of the PortChannel

Recommended Action: Change the mode and the trunking mode of the PortChannel from 'auto' and check to ensure that the remote end of the interface also belongs to the same PortChannel

ETH_PM-5-IF_DOWN_SUSPENDED_BY_SPEED Format: Interface %s is down (Suspended due to incompatible speed)

Explanation: This interface belongs to a PortChannel and operational speedode of the interface is different from that of the PortChannel

Recommended Action: Change the speed of the PortChannel from 'auto' and check to ensure that the remote end of the interface also belongs to the same PortChannel

ETH_PM-5-IF_DOWN_DOMAIN_MAX_RETRANSMISSION_FAILURE Format: Interface %s is down (Isolation due to domain manager other side not responding)

Explanation: Remote end domain manager not responding

Recommended Action: No action is required.

ETH_PM-5-IF_DOWN_LOOPBACK_ISOLATION Format: Interface %s is down (Isolation due to port loopback to same switch)

Explanation: The interface is looped back to another interface on the same switch

Recommended Action: Check the connectivity of this interface and ensure that it is connected to another switch

ETH_PM-5-IF_DOWN_UPGRADE_IN_PROGRESS Format: Interface %s is down (Linecard upgrade in progress)

Explanation: Upgrade of the linecard software is in progress

Recommended Action: No action is required.

ETH_PM-5-IF_DOWN_PORT_CHANNEL_MEMBERS_DOWN Format: Interface %s is down (No operational members)

Explanation: This is a PortChannel interface and all its members are operationally down

Recommended Action: Enable at least one of the PortChannel's members

ETH_PM-5-IF_DOWN_MODULE_REMOVED Format: Interface %s is down (module removed)

Explanation: Interface is down because the module was removed

Recommended Action: No action is required.

ETH_PM-5-IF_DUPLEX Format: Interface %s, operational duplex mode changed to %s

Explanation: Operational duplex mode has changed when link came up

Recommended Action: No action is required.

ETH_PM-5-SPEED Format: Interface %s, operational speed changed to %s

Explanation: Operational speed has changed when link came up

Recommended Action: No action is required.

ETH_PM-5-IF_RX_FLOW_CONTROL Format: Interface %s, operational Receive Flow Control state changed to %s

Explanation: Operational receive flow control has changed when link came up

Recommended Action: No action is required.

ETH_PM-5-IF_TX_FLOW_CONTROL Format: Interface %s, operational Transmit Flow Control state changed to %s

Explanation: Operational transmit flow control has changed when link came up

Recommended Action: No action is required.

ETH_PM-5-IF_TRUNK_UP Format: Interface %s, vlan %s up

Explanation: Interface [chars] is trunking, VLANs [chars] are up

Recommended Action: No action is required.

ETH_PM-5-IF_TRUNK_DOWN Format: Interface %s, vlan %s down

Explanation: Interface [chars] is trunking, VLANs [chars] are down

Recommended Action: The following commands will help determine why this VSAN is down on this interface: show interface, show port internal info interface VSAN, show port internal event-history interface vsan

ETH_PM-3-IF_UNSUPPORTED_TRANSCEIVER Format: Transceiver on interface %s is not supported

Explanation: The transceiver for the interface specified in the error message is not a Cisco supported module

Recommended Action: Replace the module with a compatible transceiver. If the transceiver was purchased from Cisco, please contact Cisco TAC to get the transceiver replaced

ETH_PM-5-IF_DOWN_ETH_LINK_DOWN Format: Interface %s is down(Tunnel port src interface link down)

Explanation: Ethernet link to which the FCIP interface is bound is down

Recommended Action: Ensure that the ethernet cable is connected and the remote end is also active

ETH_PM-5-IF_DOWN_ETH_IF_DOWN Format: Interface %s is down(Tunnel port src interface down)

Explanation: Ethernet link to which the FCIP interface is bound is down

Recommended Action: Ensure that the ethernet cable is connected, the interface is administratively enabled

ETH_PM-5-IF_DOWN_CFG_CHANGE Format: Interface %s is down(Config change)

Explanation: FCIP interface temporarily down due to reconfiguration

Recommended Action: No action is required.

ETH_PM-5-IF_DOWN_SRC_PORT_REMOVED Format: Interface %s is down(Tunnel src port removed)

Explanation: Tunnel source port of this FCIP interface has been removed

Recommended Action: The src interface with ip address that matches the ip address of the bound entity is removed. This happens normally due to the module on which the src interface exists is removed

ETH_PM-5-IF_DOWN_SRC_MOD_NOT_ONLINE Format: Interface %s is down(Tunnel source module not online)

Explanation: Module that has the tunnel source port of this FCIP interface is not fully online

Recommended Action: The module that has the tunnel src port is coming online. Please use show mod to find module status

ETH_PM-5-IF_DOWN_VRF_UNUSABLE Format: Interface %s is down (Vrf down)

Explanation: The vrf for which this interface is a member is removed

Recommended Action: No action is required.

ETH_PM-5-SEQ_TIMEOUT Format: Component %s timed out on response to opcode %s (%s)

Explanation: Some component did not respond to a request in stipulated time.

Recommended Action: None

ETH_PM-5-IF_SEQ_ERROR Format: Error (\%s\") communicating with %s for opcode %s (%s) "#ifndef FINAL " Follow PM FAQ #6 at: http://zed.cisco.com/confluence/display/KGP/Port+Manager+FAQ"#endif

Explanation: Some component returned system error as a response to one of the port event sequence.

Recommended Action: None

ETH_PM-5-STORM_CONTROL_ABOVE_THRESHOLD Format: Traffic in port %s exceeds the configured threshold %s

Explanation: Traffic on specified port is beyond the configured storm-control threshold, and the excess traffic is being dropped

Recommended Action: Identify source of traffic storm

ETH_PM-5-STORM_CONTROL_BELOW_THRESHOLD Format: Traffic in port %s has fallen below the configured threshold %s

Explanation: Traffic on specified port has returned to within configured storm-control threshold

Recommended Action: No action is required.

ETH_PM-5-IF_BANDWIDTH_CHANGE Format: Interface %s,bandwidth changed to %s Kbit

Explanation: Bandwidth of the interface (port channel) has changed and this change is updated

Recommended Action: No action is required.

ETH_PM-5-IF_HARDWARE Format: Interface %s, hardware type changed to %s

Explanation: There was a change in the hardware characteristic of an interface, such as a transceiver module plugged in or removed

Recommended Action: No action is required.

ETH_PM-3-IF_ERROR_VLANS_SUSPENDED Format: VLANs %s on Interface %s are being suspended. (Reason: %s)

Explanation: The VLANs on an interface are being suspended due to some protocol action

Recommended Action: No action is required.

ETH_PM-3-IF_ERROR_VLANS_REMOVED Format: VLANs %s on Interface %s are removed from suspended state.

Explanation: The VLANs on an interface are being removed from the suspended state

Recommended Action: No action is required.

ETH_PM-4-IF_SFP_WARNING Format: Interface %s, %s

Explanation: There was an warning on the transceiver module

Recommended Action: Please do show interface transceiver details to obtain more information

ETH_PM-3-IF_SFP_ALARM Format: Interface %s, %s

Explanation: There was an alarm on the transceiver module

Recommended Action: Please do show interface transceiver details to obtain more information

ETH_PM-3-IF_SFP_ERROR Format: Interface %s, %s

Explanation: There was an error on the transceiver module

Recommended Action: Please do show interface transceiver details to obtain more information

ETH_PM-5-IF_L2MP_MODE Format: Interface %s, l2mp-mode changed to %s

Explanation: The l2mp-mode on the port has changed

Recommended Action: No action is required.

ETH_PM-2-IF_CRITICAL_FAILURE Format: (Debug syslog)Critical failure: %s, %s

Explanation: There was a critical failure in the component.

Recommended Action: Please follow instructions on the syslog.)msgdef_ddts_component(SRVNAME_ETH_PORT_MGR

ETH_PM-2-SYSLOG_ETHPM_CRITICAL Format: Critical failure: %s

Explanation: There was a critical failure in the component.

Recommended Action: Please collect system tech-support)msgdef_ddts_component(SRVNAME_ETH_PORT_MGR

ETH_PM-4-IF_XCVR_WARNING Format: Interface %s, %s

Explanation: There was an warning on the transceiver module

Recommended Action: Please do show interface transceiver details to obtain more information

ETH_PM-3-IF_XCVR_ALARM Format: Interface %s, %s

Explanation: There was an alarm on the transceiver module

Recommended Action: Please do show interface transceiver details to obtain more information

ETH_PM-3-IF_XCVR_ERROR Format: Interface %s, %s

Explanation: There was an error on the transceiver module

Recommended Action: Please do show interface transceiver details to obtain more information

ETH_PM-5-IF_ADMIN_UP Format: Interface %s is admin up %s

Explanation: Interface is admin up

Recommended Action: No action is required.

ETH_PM-4-IF_NON_QUALIFIED_TRANSCEIVER Format: Non-qualified transceiver on interface %s was detected

Explanation: The transceiver for the interface specified has not been qualified on this platform for this software release

Recommended Action: Replace the module with a supported transceiver. Contact Cisco TAC to get platform transceiver qualification details

ETH_PM-5-IF_ERRDIS_RECOVERY Format: Interface %s is being recovered from error disabled state (Last Reason:%s)

Explanation: Interface is being recovered from error disabled state

Recommended Action: No action is required.

ETH_PM-5-IF_DOWN_PARENT_DOWN Format: Interface %s is down (Parent interface is down)

Explanation: The physical link on the parent interface has gone down

Recommended Action: No action is required.

IGMP Messages

IGMP-6-SHUTDOWN Format: IGMP shutting self down

Explanation: IGMP process is shutting itself down.

Recommended Action: No user action is required.

IGMP-6-RECEIVE_QUERY Format: Received %s interface %s from %s

Explanation: IGMP version mismatch, query still processed.

Recommended Action: No user action is required.

IGMP-6-RESTART_SHUTDOWN Format: IGMP shutting self down via restart command

Explanation: IGMP process is shutting itself down due to the restart command.

Recommended Action: No user action is required.

IGMP-3-RESTART_REASON Format: IGMP process has restarted, restart reason: %s\n

Explanation: IGMP is restoring the routes it had added in previous instance.

Recommended Action: No user action is required.

IGMP-6-STATE_LIMIT_WARNING Format: Exceeded 80% of the state-limit for interface %s

Explanation: Exceeded 80% of the state-limit for interface

Recommended Action: No user action is required.

IGMP-6-RESERVE_LIMIT_WARNING Format: Exceeded 80% of the reserve-limit for interface %s

Explanation: Exceeded 80% of the reserve-limit for interface

Recommended Action: No user action is required.

IGMP-6-AS_LIMIT_INCREASED Format: Address space size for %s increased %d times

Explanation: IGMP process incremented AS memory resource limit

Recommended Action: No user action is required.

IGMP-4-SYSTEM_RESOURCE_THRESHOLD_WARNING Format: System resource usage for %s is above 84%

Explanation: IGMP entries reached 84% of Threshold.

Recommended Action: No user action is required.

IGMP-3-STATE_LIMIT Format: Exceeded state-limit for interface %s - dropping

Explanation: Exceeded the state-limit for interface

Recommended Action: No user action is required.

IGMP-3-RESERVE_LIMIT Format: Exceeded reserve-limit for interface %s - dropping

Explanation: Exceeded the reserve-limit for interface

Recommended Action: No user action is required.

IGMP-3-GROUP_PREFIX_IGNORE Format: Too many Groups in Group Prefix %s. Specify the prefix within /24

Explanation: GPrefix yiels too many Groups

Recommended Action: No user action is required.

IGMP-3-GROUP_RANGE_IGNORE Format: Too many Groups in Group Range %s - %s

Explanation: Group Range yields too many Groups

Recommended Action: No user action is required.

IGMP-3-UNKNOWN_MTYPE Format: Unknown mtype: %d/%d in %s, opc:%d, from:%s

Explanation: IGMP process received unknown Interprocess message, dropped.

Recommended Action: No user action is required.

IGMP-6-UNKNOWN_OPC Format: Received unknown mts opcode %d

Explanation: IGMP process received unknown Interprocess message, dropped.

Recommended Action: No user action is required.

IGMP-3-MALLOC_FAILED Format: %s failed in %s

Explanation: IGMP process is out of free memory.

Recommended Action: Configure the network or router to decrease the number of routes.

IGMP-3-BITFIELD_FAILED Format: %s failed in %s

Explanation: IGMP process could not execute the bitfield operation.

Recommended Action: Dump core, then reload the stack.

IGMP-3-VRF_CREATE Format: IGMP VRF creation failed for vrf %s

Explanation: IGMP process could not create the VRF context.

Recommended Action: Dump core, then reload the stack.

IGMP-3-API_FAILED Format: %s failed in %s

Explanation: IGMP process failed in invoking an API.

Recommended Action: No user action is required.

IGMP-3-GET_MAC_ADDR Format: %s failed in %s with error %s

Explanation: IGMP process failed in getting mac addr

Recommended Action: No user action is required.

IGMP-3-IM_API_FAILED Format: %s failed in %s

Explanation: IM API failed in MCEC IGMP Snoop.

Recommended Action: No user action is required.

IGMP-3-vPC_API_FAILED Format: %s%s

Explanation: API failed in vPC IGMP snoop module.

Recommended Action: No user action is required.

IGMP-3-vPC_ERROR Format: %s%s

Explanation: vPC related messages.

Recommended Action: No user action is required.

IGMP-6-vPC_INFO Format: %s%s

Explanation: vPC related messages.

Recommended Action: No user action is required.

IGMP-3-PTHREAD_FAILED Format: %s failed in %s for thread %s

Explanation: IGMP process failed to create a task thread.

Recommended Action: Dump core, then restart component.

IGMP-3-TIMER_FAILED Format: %s failed for %s in %s

Explanation: IGMP process failed to configure a timer event.

Recommended Action: Dump core, then restart component.

IGMP-3-PULLUP_FAILED Format: m_pullup() of %d bytes failed in %s

Explanation: IGMP process failed to process the packet, dropping it.

Recommended Action: No user action is required.

IGMP-3-NO_SHUTDOWN Format: Unable to shutdown %s

Explanation: IGMP process unable to shut itself down.

Recommended Action: Dump core, then restart component.

IGMP-3-ALREADY_RUNNING Format: IGMP already running, exiting

Explanation: Another IGMP process is already running, this process will shutdown.

Recommended Action: No user action is required.

IGMP-3-NO_SET_PRIORITY Format: Failed to set policy or priority

Explanation: IGMP process could not set itself process priority, exiting.

Recommended Action: No user action is required.

IGMP-3-SETRLIMIT_FAILED Format: Address space size increment of %ld failed, reason %s

Explanation: IGMP process could not set itself memory resource limit

Recommended Action: No user action is required.

IGMP-3-GETRLIMIT_FAILED Format: Address Space size retrieval failed, reason %s

Explanation: IGMP process could not retrieve memory resource limit

Recommended Action: No user action is required.

IGMP-2-STARTUP_FAILURE Format: Startup failure: %s

Explanation: An unrecoverable software error has occurred during igmp startup.

Recommended Action: No user action is required.

IGMP-2-STARTUP_DEBUG Format: %s %d

Explanation: An unrecoverable software error has occurred during igmp startup.

Recommended Action: No user action is required.

IGMP-3-AVL_ERROR Format: AVL-tree operation %s failed for %s

Explanation: IGMP process failed in an AVL-tree manipulation.

Recommended Action: No user action is required.

IGMP-3-PT_ADD Format: Couldn't add element to PT %s

Explanation: IGMP failed to update the local snooping-db entry.

Recommended Action: No user action is required.

IGMP-3-PT_DEL Format: Couldn't delete element from PT %s

Explanation: IGMP failed to delete the local snooping-db entry.

Recommended Action: No user action is required.

IGMP-3-BF_CREATE Format: Couldn't create bitfield for %s

Explanation: IGMP failed to create bitfield resource.

Recommended Action: Dump core, then restart component.

IGMP-3-VLAN_EXISTS Format: SNOOP: Couldn't create %s, already esists

Explanation: IGMP failed to create vlan resource.

Recommended Action: No user action is required.

IGMP-3-IGMP_INIT Format: IGMP init failed: %s

Explanation: IGMP process initialization failed.

Recommended Action: Dump core, then restart component.

IGMP-3-VLAN_DEL Format: Couldn't delete vlan entry for %s due to %s from snooping database

Explanation: IGMP failed to delete the snooping-db vlan entry.

Recommended Action: No user action is required.

IGMP-3-GROUP_DEL Format: Couldn't delete group entry for %s (%s) due to %s from snooping database

Explanation: IGMP failed to delete the snooping-db group entry.

Recommended Action: No user action is required.

IGMP-3-ENCAP_DEL Format: Couldn't delete encap entry for %d (*, %s) (%s) due to %s from snooping database

Explanation: IGMP failed to delete the snooping-db encap entry.

Recommended Action: No user action is required.

IGMP-3-SOURCE_DEL Format: Couldn't delete source entry for (%s, %s) (%s) due to %s from snooping database

Explanation: IGMP failed to delete the snooping-db source entry.

Recommended Action: No user action is required.

IGMP-3-SNOOP_CONFIG_ERROR Format: SNOOP: Couldn't configure %s, please configure %s first.

Explanation: IGMP snooping could not configure a parameter because of dependencies

Recommended Action: No user action is required.

IGMP-3-FEX_QUERY_ERROR Format: Router behind FEX port %s is not supported by the hardware

Explanation: IGMP snooping could not process query from the fex port since it is not supported

Recommended Action: No user action is required.

IGMP-3-FEX_MRD_ERROR Format: Router behind FEX port %s is not supported by the hardware

Explanation: IGMP snooping could not process PIM hello from the fex port since it is not supported

Recommended Action: No user action is required.

IGMP-3-GROUP_LIMIT Format: Exceeded multicast group limit (%d), ignoring new reports

Explanation: Exceeded the multicast group limit

Recommended Action: No user action is required.

IGMP-3-GROUP_LOW_THRESH Format: Multicast group count below %d, group joins re-enabled

Explanation: Multicast group count below threshold

Recommended Action: No user action is required.

IGMP-3-TXLIST_CREATE Format: Couldn't create txlist for %s

Explanation: IGMP failed to create txlist resource.

Recommended Action: Dump core, then restart component.

IGMP-3-MUTEX_INIT Format: Couldn't init mutex %s

Explanation: IGMP process failed to initialize mutex system resource.

Recommended Action: Dump core, then restart component.

IGMP-3-CV_INIT Format: Couldn't init cond var %s

Explanation: IGMP process failed to initialize conditional-variable resource.

Recommended Action: Dump core, then restart component.

IGMP-3-QUERIER_START_FAILED Format: %s failed in %s

Explanation: IGMP snoop failed to start the querier.

Recommended Action: No user action is required.

IGMP-3-RPORT_UPDATE Format: Router-port update failed for %s (%s)

Explanation: IGMP-SNOOP called an API which returned an error.

Recommended Action:

IGMP-3-RCOUNT_UPDATE Format: Route count update failed for %s

Explanation: IGMP called an API which returned an error.

Recommended Action:

IGMP-3-RCOUNT_DELETE Format: Route count delete failed for %s

Explanation: IGMP called an API which returned an error.

Recommended Action:

IGMP-3-LVPORT_CREATE Format: IGMP Snooping couldn't create an leave-port in %s for group %s

Explanation: IGMP-SNOOP called an API which returned an error.

Recommended Action:

IGMP-3-INVALID_OIF_LIST Format: IGMP Snooping invalid OIF list %s with %d iods in %s

Explanation: IGMP-SNOOP has invalid number of iods.

Recommended Action:

IGMP-3-SYSMGR_DISPATCH Format: Error returned from sysmgr_dispatch(), errno: %s

Explanation: IGMP called a System Manager API which returned an error.

Recommended Action: Dump core, then restart component.

IGMP-3-MTS_BIND Format: Error returned from mts_bind() for %s mts-q, errno: %s

Explanation: IGMP called a MTS API which returned an error.

Recommended Action: Dump core, then restart component.

IGMP-3-MTS_SEND Format: Error returned from mts_send() for %s queue, errno: %s

Explanation: IGMP called a MTS API which returned an error.

Recommended Action: Dump core, then restart component.

IGMP-3-MTS_RECV Format: Error returned from mts_recv() for %s queue, errno: %s

Explanation: IGMP called a MTS API which returned an error.

Recommended Action: Dump core, then restart component.

IGMP-3-MTS_DROP Format: Error returned from mts_drop() for %s queue, errno: %s

Explanation: IGMP called a MTS API which returned an error.

Recommended Action: Dump core, then restart component.

IGMP-3-MTS_INIT Format: Error returned from mts_callback_handler_set() for %s queue, errno: %s

Explanation: IGMP called a MTS API which returned an error.

Recommended Action: Dump core, then restart component.

IGMP-3-BAD_MSG Format: Invalid %s message received from %s

Explanation: IGMP received an invalid MTS message.

Recommended Action: Dump core, then restart component.

IGMP-3-LIB_MTS_FAILED Format: %s failed in %s, errno: %s

Explanation: Process failed to access the IGMP MTS-queue.

Recommended Action: No user action is required.

IGMP-3-LIB_API_FAILED Format: %s failed in %s

Explanation: Process failed in invoking IGMP API.

Recommended Action: No user action is required.

IM Messages

IFMGR-5-IM_UNKNOWN_INTERFACE Format: %s

Explanation: Interface is not supported or not found

Recommended Action: No action is required.

IFMGR-5-IM_INTERNAL_ERROR Format: %s

Explanation: Internal error occurred

Recommended Action: No action is required.

IFMGR-5-IM_DEMUX_ERROR Format: %s

Explanation: Demux function returned error

Recommended Action: No action is required.

IFMGR-5-IM_INTF_STATE Format: %s %s in vdc %d

Explanation: Management interface state changed.

Recommended Action: No action is required.

IFMGR-3-IM_SEQ_ERROR Format: Error (%s) while communicating with component %s opcode:%s (for:%s)

Explanation: Some component did not respond to a request in stipulated time.

Recommended Action: No action is required.

IFMGR-3-IM_RESP_ERROR Format: Component %s opcode:%s in vdc:%d returned error:%s

Explanation: Some component returned an error.

Recommended Action: No action is required.

IFMGR-3-IM_LC_OFFLINE_ERROR Format: LC Offline could not be sent to vdc:%d\n

Explanation: LC Offline was not relayed to some vdc, so applications may not behave correctly.

Recommended Action: No action is required.

IFMGR-3-IM_IF_FEATURE_BIND_FAILURE Format: Interface feature bind failed %s\n

Explanation: interface feature bind failed, so applications in that feature set may not behave correctly.

Recommended Action: No action is required.

IPFIB Messages

IPFIB-LC-4-IPFIB_PSS_RUNNING_OUT_OF_SPACE Format: PSS Global buffer running out of space

ISIS Messages

ISIS-2-STARTUP_FAILURE Format: Startup failure: Failed to %s

Explanation: An unrecoverable software error has occurred during startup.

Recommended Action: Use 'reload' CLI command to reload the system. Be aware that this affects all VDCs on the system.

ISIS-2-RUNTIME_INIT_FAILURE Format: Unexpected runtime initialization failure. Failed to %s

Explanation: An unexpected software error has occurred while initializing a sub-component.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

ISIS-2-RUNTIME_CLEANUP_FAILURE Format: Unexpected runtime cleanup failure. Failed to %s

Explanation: An unexpected software error has occurred while cleaning up a sub-component.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

ISIS-2-TLV_MIGRATE Format: L%d %s still has TLV during migration

Explanation: An unexpected but handleable event has occurred.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

ISIS-2-HOLDDOWN Format: Failed to enable process after sequence number wrap holddown.

Explanation: An unexpected but handleable event has occurred.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

ISIS-2-MQRCVD Format: %s thread - message queue receive failure \

Explanation: An unexpected but handleable event has occurred.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

ISIS-2-URIB_UPDATE Format: Failed to notify SPF thread about route update buffer availability

Explanation: An unexpected but handleable event has occurred.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

ISIS-2-ROUTE_NOTIFY Format: Route notifications to the RIB are not possible. This will result in stale state in the FIB.

Explanation: An unexpected but handleable event has occurred.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

ISIS-2-MEM_ERR Format: Insufficient memory for %s

Explanation: Memory is not avialable for adding SNP entries

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

ISIS-2-AVL_FAIL Format: Add to CSNP cache failed: %s - %s

Explanation: An unexpected but handleable event has occurred.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

ISIS-2-URIB_ADD_RNH_FAILURE Format: Cannot add RNH to %s

Explanation: An unexpected but handleable event has occurred.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

ISIS-2-ROUTE_BUF_OVERFLOW Format: %s route buffer overflow at entry %lu\n

Explanation: An unexpected but handleable event has occurred.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

ISIS-2-REDIST_PIB_SHM Format: Failed to attach to redistributing PIB's SHM %s

Explanation: An unexpected but handleable event has occurred.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

ISIS-2-LSP_FREE_LINK Format: L%d %s is already on free list

Explanation: An unexpected but handleable event has occurred.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

ISIS-2-LSP_FREE_DELINK Format: L%d %s is not on free list

Explanation: An unexpected but handleable event has occurred.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

ISIS-2-IM_DEL Format: Delete msg for %s (%d) iib %p - iib iod %d mismatched

Explanation: An unexpected but handleable event has occurred.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

ISIS-2-IIB_EXT Format: %s extension msg for %s (%d) - %s

Explanation: An unexpected but handleable event has occurred.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

ISIS-2-SUM_DIST Format: sum-addr %s/%d has zero route-dist candidate count

Explanation: An unexpected but handleable event has occurred.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

ISIS-2-MCAST_ADD Format: Failed to add L%d multicast address

Explanation: Was unable to join to the appropriate multicast group on an interface.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

ISIS-3-AVL_LOOKUP Format: Can't locate CSNP fragment for %s

Explanation: SNP cache may get cleaned up during normal operation

Recommended Action: No user action is required.

ISIS-3-PT_ADD Format: Couldn't add entry to %s PT

Explanation: ISIS failed to update a local database entry.

Recommended Action: No user action is required.

ISIS-3-PT_DEL Format: Couldn't delete entry for %s from %s PT

Explanation: ISIS failed to delete an entry from a local database.

Recommended Action: No user action is required.

ISIS-3-SLAB_ALLOC Format: Slab alloc of type %s failed for %s

Explanation: ISIS process failed to allocate Slab memory.

Recommended Action: Configure the network or router to decrease the number of routes.

ISIS-3-SWID_UPDATE Format: Switch-ID table update failed for %s

Explanation: ISIS process failed to update Switch-ID database.

Recommended Action: Configure the network or router to decrease the number of routes.

ISIS-3-WEIRD_CACHE Format: Inconsistent cache %x %s %s

Explanation: An unexpected but handleable event has occurred.

Recommended Action: No user action is required.

ISIS-3-SELF_LSP_CLEANUP Format: Cleanup L%d LSP %s with non-null TLV list

Explanation: An unexpected but handleable event has occurred.

Recommended Action: No user action is required.

ISIS-3-NO_HELPER_IIB Format: No helper iib for %s

Explanation: An unexpected but handleable event has occurred.

Recommended Action: No user action is required.

ISIS-3-LSP_REFRESH Format: Refresh non-self-originated level-%d LSP %s

Explanation: An unexpected but handleable event has occurred.

Recommended Action: No user action is required.

ISIS-3-NOTIFY_THREAD Format: Failed to notify %s thread - Reschedule

Explanation: An unexpected but handleable event has occurred.

Recommended Action: No user action is required.

ISIS-3-MTS Format: Error returned from MTS operation %s, errno: %s

Explanation: ISIS called a MTS API which returned an error.

Recommended Action: Dump core, then restart component.

ISIS-3-MTS_RECV Format: Error returned from mts_recv(), errno: %s

Explanation: ISIS called a MTS API which returned an error.

Recommended Action: Dump core, then restart component.

ISIS-3-MTS_DROP Format: Error returned from mts_drop(), errno: %s

Explanation: ISIS called a MTS API which returned an error.

Recommended Action: Dump core, then restart component.

ISIS-3-BAD_PKT Format: Unexpected packet received by thread %s.

Explanation: ISIS received an unexpected packet.

Recommended Action: No user action is required.

ISIS-3-UNK_MTS_OPC Format: %s thread - Unrecognized MTS opcode %d

Explanation: An unexpected but handleable event has occurred.

Recommended Action: No user action is required.

ISIS-3-UNK_MSG_MAJOR Format: %s thread - Unrecognized message major type %d

Explanation: An unexpected but handleable event has occurred.

Recommended Action: No user action is required.

ISIS-3-UNK_MSG_MINOR Format: Unrecognized %s message minor type %d

Explanation: An unexpected but handleable event has occurred.

Recommended Action: No user action is required.

ISIS-3-UNK_LSP_TIMER Format: Unrecognized LSP timer type %d for level-%d LSP %s

Explanation: An unexpected but handleable event has occurred.

Recommended Action: No user action is required.

ISIS-3-UNK_DEB_FLAG Format: Ignore unrecognized debug flag \%s\""

Explanation: An unexpected but handleable event has occurred.

Recommended Action: No user action is required.

ISIS-3-UNK_IP_NOTIF Format: Unrecognized IP address change notification type %lu

Explanation: An unexpected but handleable event has occurred.

Recommended Action: No user action is required.

ISIS-3-SPF_ADJ_DEL Format: Deleting SPF adj with refcount %lu\n

Explanation: An unexpected but handleable event has occurred.

Recommended Action: No user action is required.

ISIS-5-NH_DEL Format: Cleanup L%d route %s/%d has %s next hop

Explanation: An unexpected but handleable event has occurred.

Recommended Action: No user action is required.

ISIS-3-MBUF_COPY Format: Error 0x%08x copy %hu bytes packet from %s%s

Explanation: An unexpected but handleable event has occurred.

Recommended Action: No user action is required.

ISIS-3-MCAST_DEL Format: Failed to remove L%d multicast address

Explanation: Was unable to leave from the appropriate multicast group on an interface.

Recommended Action: No user action is required.

ISIS-3-PIB_UP Format: Failed to bring up protocol

Explanation: An unexpected but handleable event has occurred.

Recommended Action: No user action is required.

ISIS-3-RPM_CALLBACK Format: RPM Callback handle and/or user data missing

Explanation: An attempt to obtain RPM Keychain information failed.

Recommended Action: No user action is required.

ISIS-3-VLAN_MGR Format: Error in parsing %s message from VLAN Manager

Explanation: An unexpected but handleable event has occurred.

Recommended Action: No user action is required.

ISIS-3-ISIS_HA_PSS Format: HA Persistent-store failure for %s %s: %s

Explanation: A software error has occurred during HA. Stateful HA recovery will be disabled

Recommended Action: No user action is required.

ISIS-3-UNK_SYSMGR_NOTIFY Format: Unexpected registration received from process %u

Explanation: An unexpected but handleable event has occurred.

Recommended Action: No user action is required.

ISIS-3-BFD_SESSION_REMOVE Format: Failed to remove BFD session, error %s

Explanation: Unable to remove BFD sessions.

Recommended Action: No user action is required.

ISIS-3-OTV_SITE_CAP Format: Failed to add/remove otv site/net-id capability conf check, error %s

Explanation: Unable to add conf check.

Recommended Action: No user action is required.

ISIS-3-OTV_INFO Format: Failed to retrieve OTV %s info %s

Explanation: Unable to retrieve OTV information

Recommended Action: No user action is required.

ISIS-3-CONFIG_ERROR Format: Error In Configuration: %s

Explanation: Unsupported configuration

Recommended Action: No user action is required.

ISIS-5-PROC_SEQWRAP Format: Handle sequence number wraparound - disabling process for %d secs

Explanation: An LSP's sequence number has wrapped, and the process will be disabled for the correct length of time.

Recommended Action: No user action is required.

ISIS-5-ADJCHANGE Format: %s adj L%s %s over %s - %s on MT-%d

Explanation: The indicated adjacency has changed state.

Recommended Action: No user action is required.

ISIS-4-LSPFULL Format: L%d %s LSP space is full

Explanation: There is no storage space left for routing information in the router's LSP

Recommended Action: Configure IS-IS so that less information will be distributed in the router's LSP, for example by reducing redistributed prefixes.

ISIS-4-SEQWRAP Format: Sequence number wraparound event detected

Explanation: IS-IS has detected that an LSP's sequence number has wrapped. IS-IS will shut down and restart

Recommended Action: No user action is required.

ISIS-4-PROC_NO_MEM Format: No memory event, shutting down process

Explanation: Previously an allocation failed due to no available memory. IS-IS will shut down and wait for user to restart it.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

ISIS-4-NO_MEM Format: No memory event detected

Explanation: An attempt to allocate from free memory failed.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

ISIS-4-LSPFULL_FORCED_DROP Format: L%d %s LSP is full, removed lower priority TLVs to make room for type %d TLV

Explanation: There was no storage space left for important routing information in the router\'s LSP, and so lower priority information (e.g., redistributed prefixes) has been dropped to make room.

Recommended Action: Configure IS-IS so that less information will be distributed in the router's LSP, for example by reducing redistributed prefixes.

ISIS-4-LSPFULL_FAILED_DROP Format: L%d %s LSP is full and couldn't remove lower priority TLVs to make room for type %d TLV

Explanation: There is no storage space left for routing information in the router\'s LSP, and an attempt to drop lower priority information has failed.

Recommended Action: Configure IS-IS so that less information will be distributed in the router's LSP, for example by reducing redistributed prefixes.

ISIS-4-NO_CID Format: Cannot allocate CID for %s\n - Over 255 LANs limit

Explanation: IS-IS has been enabled on more than 255 broadcast interfaces and thus exceeded the protocol mandated limitation. Interfaces that are enabled beyond 255 will be ignored internally until the total count drops below 255.

Recommended Action: Disable IS-IS on one or more broadcast interfaces using the CLI command 'no ip router isis', or convert the interface to point-to-point mode using the CLI command 'medium p2p' followed by 'ip router isis'.

ISIS-4-ADJ_ADVT Format: Failed to advertise level %d adjacency %s

Explanation: IS-IS was unable to advertise the indicated adjacency.

Recommended Action: No user action is required.

ISIS-4-LAN_DUP_SYSID Format: L%d LAN IIH - Duplicate system ID %s detected over %s from %s

Explanation: IS-IS has detected another system on the indicated LAN that is reusing the local system ID

Recommended Action: Configure either the local or remote router with a different system ID using the CLI command 'net'.

ISIS-4-P2P_DUP_SYSID Format: P2P IIH - Duplicate system ID %s detected over %s

Explanation: IS-IS has detected another system on the indicated P2P that is reusing the local system ID.

Recommended Action: Configure either the local or remote router with a different system ID using the CLI command 'net'.

ISIS-4-LSP_DUP_SYSID Format: L%d LSP - Possible duplicate system ID %s detected

Explanation: IS-IS has detected another non-directly connected system that is reusing the local system ID.

Recommended Action: Configure either the local or remote router with a different system ID using the CLI command 'net'.

ISIS-4-ADD_UNK_NH_ADDR Format: Attempt to add for L%d %s/%d on %s with unknown (zero) NH address

Explanation: IS-IS has detected one or more routers at the same level to have a different set of address families enabled.

Recommended Action: Configure all IS-IS routers at the same level to have the same address families enabled using the CLI command 'address-family ip/ipv6 unicast'.

ISIS-4-ILLEGAL_PREFIX Format: Ignore internal L%d route %s/%d with external metric from %s

Explanation: IS-IS has detected an internal route advertised with external metric, which is an illegal combination, by a router within the network

Recommended Action: You must correct the remote system that is generating the incorrect information. Either reconfigure the remote system or update the system software to a version that does not originate incorrect information.

ISIS-4-ADD_DEL_URIB_ERR Format: Failed to %s %lu %s route(s) xid %lu to URIB

Explanation: IS-IS failed to update route information into URIB

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

ISIS-4-REDIST_MAX_ROUTE Format: Redistribution route limit has been reached - %d routes

Explanation: ISIS redistribution: Max limit

Recommended Action: No user action is required.

ISIS-4-REDIST_THR_ROUTE Format: Redistribution threshold has been reached - %d routes

Explanation: ISIS redistribution: Threshold limit

Recommended Action: No user action is required.

ISIS-6-START Format: Process start. Reason - %s

Explanation: ISIS process start with specified reason

Recommended Action: No user action is required.

ISIS-6-STOP Format: Process stop. Reason - %s

Explanation: ISIS procss stop with specified reason

Recommended Action: No user action is required.

ISIS-6-SEQWRAP_HOLDDOWN Format: Sequence number wraparound holddown timer expired - enable process

Explanation: The correct amount of time has elapsed after an LSP's sequence number wrapped so that IS-IS can resume normal operation.

Recommended Action: No user action is required.

ISIS-6-SYSMAN_CLEANUP Format: Terminated by SYSMAN cleanup signal

Explanation: IS-IS has been signaled to exit.

Recommended Action: No user action is required.

ISIS-6-SHUTDOWN_FAILURE Format: Shutdown failure. Failed to %s - %s

Explanation: IS-IS request to system manager for permission to shutdown was declined.

Recommended Action: No user action is required.

ISIS-6-UNK_PDU Format: Unrecognized PDU type %d from %s%s

Explanation: IS-IS has received a packet of a type which it does not recognize. The packet will be dropped.

Recommended Action: No user action is required.

ISIS-6-JUMBO_PDU Format: Drop %hu bytes jumbo PDU with %hu bytes buffer from %s%s

Explanation: IS-IS has received a packet that exceeds the maximum supported size. The packet will be dropped.

Recommended Action: No user action is required.

ISIS-6-UNK_NLPID Format: Unrecognized NLP ID %02X from %s%s

Explanation: IS-IS has received a packet with an NLPID which it does not recognize. The packet will be dropped.

Recommended Action: No user action is required.

ISIS-6-MODE_NO_FUNC Format: No callback function registered for %s in %s mode

Explanation: IS-IS encountered a problem where no callback function has been registered in the given mode

Recommended Action: No user action is required.

L2MCAST Messages

L2MCAST-LC-6-L2MCAST_INITIALIZED Format: Internal state created %s

Explanation: L2MCAST has created its internal state stateless/stateful [chars].

Recommended Action: No action is required.

L2MCAST-LC-6-L2MCAST_VDC_CREATED Format: VDC %d created

Explanation: Request to create VDC [dec] in L2MCAST was successful.

Recommended Action: No action is required.

L2MCAST-LC-6-L2MCAST_VDC_REMOVED Format: VDC %d Removed

Explanation: L2MCAST has successfully removed VDC [dec] from its databases.

Recommended Action: No action is required.

L2MCAST-LC-6-L2MCAST_VDC_VLAN_CREATED Format: VLAN %d created

Explanation: L2MCAST has added VLAN [dec].

Recommended Action: No action is required.

L2MCAST-LC-6-L2MCAST_VDC_VLAN_REMOVED Format: VLAN %d removed from VDC %d

Explanation: L2MCAST has successfully removed VLAN [dec] from VDC [dec].

Recommended Action: No action is required.

L2MCAST-LC-2-L2MCAST_VLAN_NOT_FOUND Format: VLAN %d not found in L2MCAST database!

Explanation: L2MCAST failed to find VLAN [dec] in its database. L2 MAC learning and aging on VLAN [dec] may be affected.

Recommended Action: No action is required.

L2MCAST-LC-3-L2MCAST_HW_INSTALL_FAIL Format: Hw install failed for vlan %d (%d, %s, %s) entry!

Explanation: L2MCAST failed to insert bd, g, s entry in hardware. Igmp snooping may not be effective on vlan for that group and source

Recommended Action: No action is required.

L2MCAST-LC-2-L2MCAST Format: Memory allocation failed. %s

Explanation: Memory allocation failed. This is a critical failure

Explanation: SYSLOGDOC_NO_ACTION

Recommended Action:

L2MCAST-LC-0-L2MCAST_TIMER_INIT_FAILED Format: Timer subsystem initialization failed!

Explanation: L2MCAST failed to initialize timer library. This is a fatal error.

Recommended Action: No action is required.

L2MCAST-LC-0-L2MCAST_CLI_INIT_FAILED Format: CLI library initialization failed!

Explanation: L2MCAST failed to initialize CLI infrastructure\'s backend library. This is a fatal error.

Recommended Action: No action is required.

L2MCAST-LC-2-L2MCAST_HW_OMF_INSTALL_FAIL_TCAM_FULL Format: Failed to insert entry in OMF table for BD %d OMF cannot be configured on New BDs

Explanation: Failed to program the OMF entries for BD. New BD's cannot have omf mode

Recommended Action: No action is required.

LACP Messages

LACP-5-LACP_ENABLED Format: LACP Enabled

Explanation: LACP Service Enabled

Recommended Action: No action is required.

LACP-5-LACP_DISABLED Format: LACP Disabled

Explanation: LACP Service Disabled

Recommended Action: No action is required.

LACP-3-GENERAL_ERROR Format: %s

Explanation: general error

Recommended Action: No action is required.

LACP-5-SYSTEM_PRIORITY_CHANGED Format: LACP system priority changed from 0x%x to 0x%x

Explanation: LACP system priority has been changed

Recommended Action: No action is required.

LACP-5-PORT_PRIORITY_CHANGED Format: %s: LACP port priority changed from %d to %d

Explanation: LACP port priority has been changed

Recommended Action: No action is required.

LACP-3-PACKET_TRANSMIT_ERR Format: %s: Could not send LACP packet err=%d

Explanation: There was an error in sending LACP packet

Recommended Action: No action is required.

LACP-3-SYSTEM_MAC_ERR Format: %s: Could not get system mac[%s]

Explanation: There was an error in acquiring system mac from VDC Mgr

Recommended Action: No action is required.

LACP-3-SYN_COLL_DIS_EN Format: %s [%s]: SYNC, COLLECT and DISTRIBUTE flags enabled too early by partner

Explanation: Potential interop issue. Partner system seems to have enabled sync as well collecting or distributing flags too early even before actor has selected an aggregator

Recommended Action: No action is required.

LACP-3-LACP_SUSPEND_HALF_DUPLEX_PORT Format: Port %s is in half duplex mode. suspend port

Explanation: LACP is not supported in half duplex mode. Suspend port

Recommended Action: No action is required.

LACP-5-LACP_SUSPEND_INDIVIDUAL Format: LACP port %s of port-channel %s not receiving any LACP BPDUs suspending (individual) port

Explanation: LACP suspend individual ports

Recommended Action: No action is required.

LACP-3-LACP_SUSPEND_MINLINK Format: LACP port %s of port-channel %s is suspended as min-link requirement not met.

Explanation: LACP suspend ports due to min-link

Recommended Action: No action is required.

LACP-5-LACP_DOES_NOT_MEET_MINLINK_REQ Format: LACP port-channel %s is brought down as min-link requirement not met.

Explanation: LACP port-channel down as min-link requirement not met

Recommended Action: No action is required.

LACP-5-LACP_MEETS_MINLINK_REQ Format: LACP port-channel %s meets min-link requirement. Reint port-channel

Explanation: LACP port-channel meets min-link requirement

Recommended Action: No action is required.

LACP-5-LACP_UPGRADE_READY_SUCCESS Format: Upgrade ready successful.

Explanation: Upgrade ready event is successful as all port channel members are in steady state.

Recommended Action: No action is required.

LACP-3-LACP_UPGRADE_READY_FAILED Format: Upgrade ready failed.

Explanation: Upgrade ready event failed because atleast one port channel member is in intermediate state.

Recommended Action: No action is required.

LACP-5-LACP_REMOTE_NOTIFY_SUCCESS Format: Remote notify event.

Explanation: Remote notify event was successful.

Recommended Action: No action is required.

LACP-3-ALLOCFAIL Format: Failed to allocate memory in %s[%d] for size %d

Explanation: LACP is out of dynamic memory. [chars] specifies the context where the failure occurred.

Recommended Action: No action is required.

LACP-3-LACP_INTERNAL_ERROR Format: LACP internal error: %s

Explanation: Internal error is encountered

Recommended Action: No action is required.

LACP-3-ISTACKREGISTER Format: Failed to register istack - %s

Explanation: Failed to register istack. [char] identifies the reason.

Recommended Action: No action is required.

LIBLTLMAP Messages

LLDP Messages

LLDP-6-DETECT_REMOTE_CHANGE Format: Remote change detected on %s

Explanation: Remote change detected on an interface

Recommended Action: No action is required.

LLDP-3-DETECT_MULTIPLE_PEERS Format: Multiple peers detected on %s

Explanation: Multiple peers detected on an interface

Recommended Action: No action is required.

LLDP-3-INVALID_LLDP_RECEIVED Format: Received an invalid LLDP on %s

Explanation: Received an invalid LLDP on an interface

Recommended Action: No action is required.

LLDP-3-LLDP_INTERNAL_ERROR Format: LLDP internal error: %s

Explanation: Internal error is encountered

Recommended Action: No action is required.

LLDP-5-LLDP_ENABLED Format: LLDP Enabled

Explanation: LLDP Service Enabled

Recommended Action: No action is required.

LLDP-5-LLDP_DISABLED Format: LLDP Disabled

Explanation: LLDP Service Disabled

Recommended Action: No action is required.

LLDP-5-SERVER_ADDED Format: Server with Chassis ID %s Port ID %s management address %s discovered on local port %s in vlan %d with enabled capability %s

Explanation: A new peer is discovered

Recommended Action: No action is required.

LLDP-5-SERVER_REMOVED Format: Server with Chassis ID %s Port ID %s on local port %s has been removed

Explanation: A peer is removed

Recommended Action: No action is required.

LLDP-3-ALLOCFAIL Format: Failed to allocate memory in %s[%d] for size %d

Explanation: LLDP is out of dynamic memory. [chars] specifies the context where the failure occurred.

Recommended Action: No action is required.

LLDP-3-ISTACKREGISTER Format: Failed to register istack - %s

Explanation: Failed to register istack. [char] identifies the reason.

Recommended Action: No action is required.

MCECM Messages

MCECM-3-VPCM_INIT_FAIL Format: vPC Manager Initialization Failed (%s)

Explanation: vPCM Initialization failed. due to [chars]

Recommended Action: No action is required.

MCECM-3-VPCM_MTS_ERR Format: %s

Explanation: vPCM encountered an MTS error due to [chars]

Recommended Action: No action is required.

MCECM-3-VPCM_INTERNAL_ERR Format: %s

Explanation: vPCM encountered an internal error due to [chars]

Recommended Action: No action is required.

MCECM-6-VPCM_INTERNAL_INFO Format: %s

Explanation: vPCM got an internal info [chars]

Recommended Action: No action is required.

MCECM-3-PEER_UNREACHABLE Format: Remote Switch Unreachable

Explanation: Peer unreachable

Recommended Action: No action is required.

MCECM-6-VPC_CFGD Format: vPC %d is configured

Explanation: vPC is configured

Recommended Action: No action is required.

MCECM-6-PEER_VPC_CFGD Format: peer vPC %d is configured

Explanation: vPC is configured

Recommended Action: No action is required.

MCECM-4-VPC_DELETED Format: vPC %d is deleted

Explanation: vPC configuration deleted

Recommended Action: No action is required.

MCECM-4-PEER_VPC_DELETED Format: Peer vPC %d deleted

Explanation: Peer vPC configuration deleted

Recommended Action: No action is required.

MCECM-3-VPC_PEER_LINK_BRINGUP_FAILED Format: vPC peer-link bringup failed (%s)

Explanation: vPC Peer-link bringup failed

Recommended Action: No action is required.

MCECM-3-VPC_BRINGUP_FAILED Format: vPC %d bringup failed (%s)

Explanation: vPC bringup failed

Recommended Action: No action is required.

MCECM-5-VPC_PEER_LINK_UP Format: vPC Peer-link is up

Explanation: vPC Peer-link is up

Recommended Action: No action is required.

MCECM-5-VPC_UP Format: vPC %d is up

Explanation: MCEC is UP

Recommended Action: No action is required.

MCECM-6-PEER_VPC_UP Format: Peer vPC %d is up

Explanation: Peer vPC is up

Recommended Action: No action is required.

MCECM-3-VPC_PEER_LINK_DOWN Format: VPC Peer-link is down

Explanation: vPC Peer link is down

Recommended Action: No action is required.

MCECM-5-VPC_DOWN Format: vPC %d is down (%s)

Explanation: vPC is down (reason)

Recommended Action: No action is required.

MCECM-6-PEER_VPC_DOWN Format: Peer vPC %d is down (%s)

Explanation: Peer vPC is down

Recommended Action: No action is required.

MCECM-6-PEER_VPC_CFGD_VLANS_CHANGED Format: Peer vPC %d configured vlans changed

Explanation: Remote MCEC configured vlans Changed

Recommended Action: No action is required.

MCECM-4-VPC_ROLE_CHANGE Format: In domain %d, VPC role status has changed to %s

Explanation: vPC role status changed to (Primary/Secondary

Recommended Action: No action is required.

MCECM-6-VPC_DOMAIN_ID_CFGD Format: vPC domain-id configured to %d

Explanation: vPC domain-id configured

Recommended Action: No action is required.

MCECM-5-ROLE_PRIORITY_CFGD Format: In domain %d, vPC role priority changed to %d

Explanation: role priority configured

Recommended Action: No action is required.

MCECM-5-SYSTEM_MAC_CFGD Format: In domain %d, vPC system-mac changed to %s

Explanation: system mac configured

Recommended Action: No action is required.

MCECM-5-SYSTEM_PRIO_CFGD Format: In domain %d, vPC system priority changed to %d

Explanation: system priority changed

Recommended Action: No action is required.

MCECM-5-GLOBAL_CONSISTENCY_SUCCESS Format: In domain %d, global configuration is consistent

Explanation: global compat-check passed

Recommended Action: No action is required.

MCECM-3-GLOBAL_CONSISTENCY_FAILED Format: In domain %d, global configuration is not consistent (%s)

Explanation: global compat-check failed

Recommended Action: No action is required.

MCECM-5-INTF_CONSISTENCY_SUCCESS Format: In domain %d, vPC %d configuration is consistent

Explanation: vPC configuration is consistent

Recommended Action: No action is required.

MCECM-3-INTF_CONSISTENCY_FAILED Format: In domain %d, VPC %d configuration is not consistent (%s)

Explanation: MCEC compat-check failed

Recommended Action: No action is required.

MCECM-2-VPC_SUSP_ALL_VPC Format: Peer-link going down, suspending all vPCs on secondary

Explanation: peer link down suspend vPCs

Recommended Action: No action is required.

MCECM-2-PEER_VPC_RESP_TIMEDOUT Format: Failed to receive response from peer for vPC: %d

Explanation: vPC bringup failed

Recommended Action: No action is required.

MCECM-5-VPC_RESTORE_TIMER_START Format: vPC restore timer started to reinit vPCs

Explanation: vPC restore timer start

Recommended Action: No action is required.

MCECM-5-VPC_RESTORE_TIMER_EXPIRED Format: vPC restore timer expired, reinitiating vPCs

Explanation: vPC restore timer expired

Recommended Action: No action is required.

MCECM-5-VPC_DELAY_SVI_BUP_TIMER_START Format: vPC restore, delay interface-vlan bringup timer started

Explanation: vPC delay interface-vlan restore timer start

Recommended Action: No action is required.

MCECM-5-VPC_DELAY_SVI_BUP_TIMER_EXPIRED Format: vPC restore, delay interface-vlan bringup timer expired, reinitiating interface-vlans

Explanation: vPC delay interface-vlan restore timer expired

Recommended Action: No action is required.

MCECM-4-VPC_REINITIALIZED Format: Reinitializing vpcs assuming peer dead

Explanation: Initializing vpcs assuming peer dead

Recommended Action: No action is required.

MCECM-6-VPC_CONSISTENCY_CHECK_BYPASS Format: Bypassing consistency check for vPC: %d

Explanation: Bypassing consistency check for vpcs

Recommended Action: No action is required.

MCECM-6-VPC_CONSISTENCY_NEW_VLAN_PASS Format: Global Consistency check for vPC passed for new vlans

Explanation: Global Consistency check for vPC passed for new vlans

Recommended Action: No action is required.

MCECM-4-VPC_CONSISTENCY_NEW_VLAN_FAIL Format: Global Consistency check for vPC failed for new vlans

Explanation: Global Consistency check for vPC failed for new vlans

Recommended Action: No action is required.

MCECM-6-VPC_PER_VLAN_CONSISTENCY_PASSED Format: Global Consistency check for vPC passed for all vlans

Explanation: Global Consistency check for vPC passed for all vlans

Recommended Action: No action is required.

MCECM-4-VPC_PER_VLAN_CONSISTENCY_FAILED Format: Global consistency check for vPC failed for few vlans

Explanation: Global Consistency check for vPC failed for few vlans

Recommended Action: No action is required.

MCECM-2-VPC_GRACEFUL_SUSP_ALL_VPC Format: Operational graceful type-1 check state changed, reinitiating all vPCs

Explanation: graceful state change,reinit vPCs

Recommended Action: No action is required.

MCECM-2-VPC_PSS_ERROR Format: %s, 0x(%x) present in VPC DB but not is IM DB

Explanation: Triggered when vpc DB and IM SDB are inconsistent

Recommended Action: No action is required.

MCP Messages

MCP-3-MCP_MSTP_REGION_MISCONFIG Format: MCP MSTP Region with Name [%s], Revision [%d] not found

Explanation: MCP MSTP region misconfiguration

Recommended Action: No action is required.

MCP-3-MCP_RSTP_MISCONFIG Format: MCP intf 0x%x native vlan unset

Explanation: MCP RSTP misconfiguration

Recommended Action: No action is required.

MCP-3-ALLOCFAIL Format: Failed to allocate memory in %s[%d] for size %d

Explanation: MCP is out of dynamic memory. [chars] specifies the context where the failure occurred.

Recommended Action: No action is required.

MCP-3-MCP_INTERNAL_ERROR Format: MCP internal error: %s

Explanation: Internal error is encountered

Recommended Action: No action is required.

MCP-3-ISTACKREGISTER Format: Failed to register istack - %s

Explanation: Failed to register istack. [char] identifies the reason.

Recommended Action: No action is required.

MFDM Messages

MFDM-2-INTERNAL_ERROR Format: MFDM-%s Internal error : show system internal mfdm errors for more information

Explanation: MFDM PD hit a internal error. show system internal mfdm errors for futher analysis.

Recommended Action: No action is required.

MFDM-2-DOWNLOAD_TIMEOUT Format: Download of L2/L3 route databases timed out : download_in_progress_slots 0x%x for database %s %s %s

Explanation: Download of L2/L3 route databases timed out. Download triggered by VMM insert request.

Recommended Action: No action is required.

MFDM-2-DI_REUSE Format: LTL node exists with DI %d oiflist_index %d type %d and same DI returned for oiflist_index %d type %d Please collect show tech-support forwarding distribution l2/l3 multicast and show tech-support pixm.

Explanation: PIXM returned duplicate DI.

Recommended Action: No action is required.

MFDM-2-REF_OUTOFSYNC Format: In Decrement ltl_node ref_count: %d is less than count: %d passed in for DI: 0x%x, oiflist_index: %d, type: %d. Possible PI/PD refcount out-of-sync. Please collect show tech-support forwarding distribution l2/l3 multicast and show tech-support pixm.

Explanation: MFDM PI/PD refcount out-of-sync

Recommended Action: No action is required.

MRIB Messages

MRIB-6-USAGE Format: Usage: mrib [-h] [-d] [-m \]

Explanation: Usage for starting MRIB process.

Recommended Action: No user action is required.

MRIB-6-MEMORY_OPTION Format: memory size must be \>= 16MB and \

Explanation: Invalid memory size specified for MRIB process.

Recommended Action: No user action is required.

MRIB-6-SHUTDOWN Format: Shutting down MRIB process

Explanation: MRIB process is shutting itself down.

Recommended Action: No user action is required.

MRIB-6-SHUTDOWN_FAILED Format: Shutting down of MRIB process failed: %s

Explanation: MRIB process is shutting itself down.

Recommended Action: No user action is required.

MRIB-2-STARTUP_FAILURE Format: Startup failure: %s

Explanation: An unrecoverable software error has occurred during MRIB startup.

Recommended Action: Use 'reload' CLI command to reload the system. Be aware that this affects all VDCs on the system.

MRIB-2-RES_MGR Format: Error returned from %s for %d keys, errno: 0x%08x (%s) in %s(). Current reservation is %d, new size is %d

Explanation: The resource manager returned an error to MRIB, while MRIB was performing an action relating to its shared memory

Recommended Action: Use 'reload' CLI command to reload the system. Be aware that this affects all VDCs on the system.

MRIB-2-API_INIT_SEM Format: Failed to init the client API semaphore: %s, create: %s

Explanation: MRIB could not create the semaphore that protects access to the shared memory between MRIB and its clients.

Recommended Action: Use 'reload' CLI command to reload the system. Be aware that this affects all VDCs on the system.

MRIB-3-NO_SET_PRIORITY Format: Failed to set policy or priority

Explanation: MRIB process could not set itself process priority, exiting.

Recommended Action: No user action is required.

MRIB-3-INIT_SDB Format: %s Return Code: 0x%x Error String: %s

Explanation: SDB initialization failed

Recommended Action: No user action is required.

MRIB-3-OPCODE_REGISTER Format: %s opcode: 0x%x ErrorString: %s

Explanation: Opcdoe registration failed

Recommended Action: No user action is required.

MRIB-3-UNKNOWN_URIB Format: Received unknown URIB message type: %d

Explanation: MRIB process received unknown message from URIB, dropped.

Recommended Action: No user action is required.

MRIB-3-UNKNOWN_MRIB_MINOR Format: mrib_main(): unknown minor mtype: %d

Explanation: MRIB process received unknown Interprocess message, dropped.

Recommended Action: No user action is required.

MRIB-3-UNKNOWN_MRIB_MAJOR Format: mrib_main(): unknown major mtype: %d

Explanation: MRIB process received unknown Interprocess message, dropped.

Recommended Action: No user action is required.

MRIB-3-UNKNOWN_MFDM_OPC Format: mrib_mfdm_main(): reeceived unknown opcode %d

Explanation: MRIB process received unknown Interprocess message from MFDM, dropped.

Recommended Action: No user action is required.

MRIB-3-MALLOC_FAILED Format: %s failed for %s

Explanation: MRIB process is out of free memory.

Recommended Action: Configure the network or router to decrease the number of routes.

MRIB-3-BITFIELD_FAILED Format: %s failed in %s

Explanation: MRIB process could not execute the bitfield operation.

Recommended Action: Dump core, then reload the stack.

MRIB-3-NO_MPIB Format: Unable to get mpib index in mrib_register_internal()

Explanation: MRIB process cannot register the protocol as it has run out of PIB indices.

Recommended Action: Dump core, then reload the stack.

MRIB-3-NO_TIMER Format: Could not create stale timer for \%s\""

Explanation: MRIB process cannot stale the routes for this procotol.

Recommended Action: Dump core, then reload the stack.

MRIB-3-PT_FAILED Format: %s failed in %s

Explanation: MRIB process failed to update route-table for this event.

Recommended Action: Dump core, then reload the stack.

MRIB-3-INHERIT_FAILED Format: mrib_inherit_oifs(): bitfield is set but oif doesn't exist

Explanation: MRIB process failed in inheriting OIFs for the (S,G) from (*,G).

Recommended Action: No user action is required.

MRIB-3-NO_GROUP Format: Unable to create group entry for %s

Explanation: MRIB process unable to create the route entry in its route-table.

Recommended Action: No user action is required.

MRIB-3-NO_SOURCE Format: Unable to create source entry for %s

Explanation: MRIB process unable to create the route entry in its route-table.

Recommended Action: No user action is required.

MRIB-3-NO_MPIB_FOR_ROUTE Format: Unable to creates mpib entry for %s for mpib %s in VRF %s

Explanation: MRIB process unable to create the route entry in its route-table.

Recommended Action: No user action is required.

MRIB-3-NO_FREE_SOURCE Format: Unable to free source entry for %s

Explanation: MRIB process unable to delete a route-table entry.

Recommended Action: No user action is required.

MRIB-3-NO_FREE_GROUP Format: Unable to free group entry for %s

Explanation: MRIB process unable to delete a route-table entry.

Recommended Action: No user action is required.

MRIB-3-MQ_FAILED Format: %s failed in %s, errno: %s, for %s

Explanation: MRIB process failed to access the message-queue.

Recommended Action: No user action is required.

MRIB-3-MTS_FAILED Format: %s failed in %s, errno: %s, for %s

Explanation: MRIB process failed to access the mts-queue.

Recommended Action: No user action is required.

MRIB-3-SM_FAILED Format: %s failed in %s for segment %s, errno: %s

Explanation: MRIB process failed to access the System shared memory resource.

Recommended Action: No user action is required.

MRIB-3-API_FAILED Format: %s failed

Explanation: MRIB process failed in invoking an API.

Recommended Action: No user action is required.

MRIB-3-MDT_API_FAILED Format: %s failed in %s

Explanation: MRIB process failed in invoking an API.

Recommended Action: No user action is required.

MRIB-3-INVALID_GROUP Format: Operation for invalid group %s received in %s

Explanation: MRIB process received invalid group.

Recommended Action: No user action is required.

MRIB-3-RDLOCK_ASSERT Format: %s:%d: Assert, read-lock not acquired

Explanation: Caller Failed to get MRIB Shared Memory read lock

Recommended Action: No user action is required.

MRIB-3-WRLOCK_ASSERT Format: %s:%d: Assert, write-lock not acquired

Explanation: Caller Failed to get MRIB Shared Memory write lock

Recommended Action: No user action is required.

MRIB-3-MUTEX_INIT Format: Couldn't init mutex %s

Explanation: MRIB process failed to initialize mutex system resource.

Recommended Action: Dump core, then restart component.

MRIB-3-CV_INIT Format: Couldn't init cond var %s

Explanation: MRIB process failed to initialize conditional-variable resource.

Recommended Action: Dump core, then restart component.

MRIB-3-FTM_NO_XID Format: Cannot find FTM buffer, xid: %d

Explanation: MRIB process could not match the sequence number for FTM message, ignored.

Recommended Action: No user action is required.

MRIB-3-MFDM_NO_BUF Format: Cannot find MFDM buffer from route-ack for context %s, table-id 0x%08lx

Explanation: MRIB process could not find a route buffer in it's queue from the MFDM message, ignored.

Recommended Action: No user action is required.

MRIB-3-FTM_BAD_MINOR Format: Unknown FTM mtype: 0x%4x

Explanation: MRIB process received unsupported message type from FTM, ignored.

Recommended Action: No user action is required.

MRIB-3-FTM_BAD_METER Format: %s failed for meter %s in %s

Explanation: MRIB process failed to configure the multicast meter.

Recommended Action: No user action is required.

MRIB-3-MRIB_ALREADY_UP Format: mrib already running, exiting

Explanation: Another MRIB process is already running, this process will shutdown.

Recommended Action: No user action is required.

MRIB-3-TIMER_FAILED Format: could not %s

Explanation: MRIB process failed to configure a timer event.

Recommended Action: Dump core, then reload the stack.

MRIB-3-ACTIVE_TIMER_FAILED Format: active_timer_create() failed for mrib_main()

Explanation: MRIB process failed to create a timer.

Recommended Action: Dump core, then reload the stack.

MRIB-3-PTHREAD_FAILED Format: pthread_create() failed for mrib_main()

Explanation: MRIB process failed to create a task thread.

Recommended Action: Dump core, then reload the stack.

MRIB-3-CONTEXT_BF_FAILED Format: bitfield_create() failed for context %s

Explanation: MRIB process failed to create a bitfield for mrib_ cibtype.

Recommended Action: Dump core, then reload the stack.

MRIB-3-PSS Format: Error returned from %s, errno: 0x%08x (%s) in %s()

Explanation: MRIB called a PSS API which returned an error. The error reported should be examined for the cause.

Recommended Action: ERRMSG

MRIB-3-KSINK_LIB_ERROR Format: %s %s

Explanation: A severe error was encountered during ksink operations.

Recommended Action: No action is required.

MRIB-5-RES_MGR_CHANGE Format: Changed m4route-mem from (%d, %d) to (%d, %d)

Explanation: The requested limit-resource command was adapted to fit the limits in this version.

Recommended Action: No user action is required.

MRIB-5-API_INIT_SEM_CLEAR Format: Cleared the API semaphore from %d

Explanation: The API semaphore was in an unexpected state, and was restored to a correct value.

Recommended Action: No user action is required.

MRIB-3-MTS_SHORT_MSG_ERROR Format: Received short (%d \

Explanation: MRIB recieved an unknown message. The message is dropped

Recommended Action: No user action is required.

MRIB-3-MTS_NO_PAYLOAD_ERROR Format: Received MTS message with no payload on %s queue with opcode %d, dropping it

Explanation: MRIB recieved an unknown message. The message is dropped

Recommended Action: No user action is required.

MRIB-3-TXLIST_CREATE Format: Couldn't create txlist for %s in VRF:%s

Explanation: MRIB failed to create txlist resource.

Recommended Action: No user action is required.

MRIB-3-NO_MARKER Format: Unable to find the txlist marker for VRF:%s for the client: %s

Explanation: MRIB failed to find txlist resource.

Recommended Action: No user action is required.

MRIB-3-NOTIFY_BUF_FAILED Format: Unable to create notification buffer's for client %s, aborting registration.

Explanation: MRIB failed to create notification buffer for a client

Recommended Action: No user action is required.

MRIB-3-CONF_CHECK Format: Failed to %s MRIB confcheck capability with error: %s

Explanation: MRIB failed to update config check capability in the system

Recommended Action: No user action is required.

MRIB-3-SYSMGR_DISPATCH Format: Error returned from sysmgr_dispatch(), errno: %s

Explanation: MRIB called a System Manager API which returned an error.

Recommended Action: Dump core, then restart component.

MRIB-3-MTS_BIND Format: Error returned from mts_bind() for %s mts queue, errno: %s

Explanation: MRIB called a MTS API which returned an error.

Recommended Action: Dump core, then restart component.

MRIB-3-MTS_RECV Format: Error returned from mts_recv(), errno: %s

Explanation: MRIB called a MTS API which returned an error.

Recommended Action: Dump core, then restart component.

MRIB-3-MTS_DROP Format: Error returned from mts_drop(), errno: %s

Explanation: MRIB called a MTS API which returned an error.

Recommended Action: Dump core, then restart component.

MRIB-3-LIB_MTS_FAILED Format: %s failed in %s, errno: %s, for %s

Explanation: Failure in MRIB library to access mts-queue

Recommended Action: No user action is required.

MRIB-3-LIB_SM_FAILED Format: %s failed to access MRIB shared memory in %s, errno: %s

Explanation: Process failed to access the System shared memory resource.

Recommended Action: No user action is required.

MRIB-3-LIB_API_FAILED Format: %s failed in %s

Explanation: Process failed in invoking an API.

Recommended Action: No user action is required.

MRIB-3-LIB_DUP_REGISTER Format: mrib_register(): duplicate register by \%s\""

Explanation: Dupilcate registration request to the MRIB process, ignored.

Recommended Action: No user action is required.

MRIB-3-LIB_SEM_OP Format: %s:%d: semaphore operation %s failed

Explanation: Caller failed to get perform an operation on the MRIB semaphore

Recommended Action: No user action is required.

MRIB-3-LIB_SEM_INVALID Format: %s:%d: semaphore invalid in %s

Explanation: MRIB semaphore was found to be invalid when performing a semaphore operation

Recommended Action: No user action is required.

MVDXN Messages

Messages Messages

BCM_USD-5-BUFFER_THRESHOLD_EXCEEDED Format: Port %2d buffer threshold %d cells[%2.1f%% - ~%1.1fMB] exceeded %d[%d%%]

Explanation: Buffer usage exceeded threshold

Recommended Action: No action is required.

NEW_INSTALLER Messages

INSTALLER-5-UPGRADE_INITIATED Format: System upgrade initiated.

Explanation: System wide upgrade has been initiated by the user.

Recommended Action: No action is required.

INSTALLER-5-UPGRADE_COMPLETED Format: System upgrade completed.

Explanation: This message indicates system wide upgrade has completed.

Recommended Action: No action is required.

INSTALLER-5-UPGRADE_ABORTED Format: System upgrade aborted.

Explanation: This message indicates that system wide upgrade has aborted.

Recommended Action: No action is required.

INSTALLER-5-UPGRADE_STOPPED Format: System upgrade stopped.

Explanation: This message indicates that system wide upgrade has been stopped by the user.

Recommended Action: No action is required.

INSTALLER-1-UPGRADE_EXCEEDED_DOWNTIME Format: Switch control plane down more than 80 seconds.

Explanation: This message indicates that control plane was down for more than 80 seconds.

Recommended Action: No action is required.

OBFL_DAEMON Messages

OSPF Messages

OSPF-6-START Format: Starting OSPF %s, %s

Explanation: OSPF process is starting due to the specified reason.

Recommended Action: No user action is required.

OSPF-5-ADJCHANGE Format: Nbr %s on %s went %s

Explanation: An OSPF neighborship has just been established. Or a neighborship has just been shutdown.

Recommended Action: No user action is required.

OSPF-5-NBRSTATE Format: Process %s, Nbr %s on %s from %s to %s, %s

Explanation: An OSPF neighbor has just changed state.

Recommended Action: No user action is required.

OSPF-4-CLEANUP Format: OSPF is exiting, reason %s(0x%x)

Explanation: OSPF has been deconfigured or restarted.

Recommended Action: No user action is required.

OSPF-6-SHUTDOWN_REQUEST_FAIL Format: OSPF shutdown request failed, %s

Explanation: OSPF request to system mananger for permission to shutdown was turned down.

Recommended Action: No user action is required.

OSPF-6-DECONFIG_SHUTDOWN Format: OSPF shutting self down via deconfiguration

Explanation: OSPF process is shutting itself down due to the deconfiguration command.

Recommended Action: No user action is required.

OSPF-4-RESTART_SHUTDOWN Format: OSPF shutting self down via restart command

Explanation: OSPF process is shutting itself down due to the restart command.

Recommended Action: No user action is required.

OSPF-6-UNKNOWN_SHUTDOWN Format: OSPF shutting self down due to unknown reason

Explanation: OSPF process is shutting itself down due to unknown reason.

Recommended Action: No user action is required.

OSPF-4-DUPRID Format: Router %s on interface %s is using our routerid, packet dropped

Explanation: Two routers are configured with the same router ID.

Recommended Action: Check all routers on the indicated interface for misconfigurations.

OSPF-4-SELF_LSA Format: context %s: %s

Explanation: Router received an newer copy of an LSA generated by itself. Two routers may be configured with the same router ID or a router which was disconnected from the network has come back.

Recommended Action: Verify if the router ID for the router is unique in the network.

OSPF-1-LOWMEM Format: Low memory condition: %s

Explanation: The router did not have enough memory to store certain data structures.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

OSPF-1-NOMEM Format: Malloc (%ld bytes) failed for: %s

Explanation: The router did not have enough memory to store mentioned data structures.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

OSPF-1-SLABS Format: Could not create %s slabs

Explanation: The router did not have enough memory to reserve space in advance for certain slab data structures.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

OSPF-3-SMALLBUF Format: %s packet doesn't fit in buffer (packet %d/ buffer %d)

Explanation: The router has allocated a packet buffer that was too small.

Recommended Action: No user action is required.

OSPF-3-ROUTEDEL Format: Route deletion %s/%d failed

Explanation: Internal Error.

Recommended Action: No user action is required.

OSPF-3-INVALID_TLV Format: Found corrupted TLV, LSA %s

Explanation: Error while parsing TLV.

Recommended Action: No user action is required.

OSPF-3-MIB_FAIL Format: Failed to %s the MIB with status as %s

Explanation: Error while loading or unloading the MIB.

Recommended Action: No user action is required.

OSPF-3-SNMP_FAIL Format: Failed to %s the SNMP with status as %s

Explanation: Error while registering or deregistering with SNMP.

Recommended Action: No user action is required.

OSPF-3-SNMP_SAP_FAIL Format: Failed to %s the SNMP SAP with status as %s

Explanation: Error while registering or deregistering with SNMP SAP.

Recommended Action: No user action is required.

OSPF-3-MAXLSAS Format: Maximum number of LSAs in domain has been reached

Explanation: The OSPF domain contains more LSAs than this router can store.

Recommended Action: Redesign the network to redistribute less external routes into the OSPF domain.

OSPF-3-MAXIFS Format: Exceeded the limit on interfaces per area [i.e %d]

Explanation: Restricting the number of interfaces per area to avoid problems during lsa generation.

Recommended Action: Reduce the number of interfaces per area.

OSPF-1-INIT Format: Unable to %s %s

Explanation: An internal software error has occurred.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

OSPF-1-STARTTHREAD Format: Unable to start thread %s (%d), error %s

Explanation: An internal software error has occurred.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

OSPF-1-MCASTJOIN Format: Unable to join %s group on interface %s

Explanation: An internal software error has occurred.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

OSPF-1-MCASTLEAVE Format: Unable to leave %s group on interface %s

Explanation: An internal software error has occurred.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

OSPF-1-TIMER Format: Unable to create %s timer on interface %s

Explanation: An internal software error has occurred.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

OSPF-1-MQSEND Format: Unable to send message %s to %s

Explanation: An internal software error has occurred.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

OSPF-3-HEAPSIZE Format: Error increasing heap size to %d, error %d

Explanation: Reduced heap size will limit the LSDB size.

Recommended Action: No user action is required.

OSPF-1-TAG Format: Unable to retrieve service tag on %s supervisor

Explanation: An internal software error has occurred.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

OSPF-3-UNKNOWNSIG Format: Received unknown signal: %d

Explanation: An unexpected software interrupts was received.

Recommended Action: No user action is required.

OSPF-4-INVALIDOUT Format: Trying to send packet with packettype %d to %s on %s

Explanation: The router tried to send unknown OSPF packet.

Recommended Action: No user action is required.

OSPF-3-UNAWAKABLE Format: Trying to awake unawakable thread %s

Explanation: Thread cannot be wokenup at this time

Recommended Action: No user action is required.

OSPF-4-WRONGQ Format: Found wrong type of packet (%d) on internal %s queue

Explanation: Did not expect the specified packet type on the given incoming message queue

Recommended Action: No user action is required.

OSPF-4-AF_NO_FUNC Format: Function %s not supported by OSPF version %s

Explanation: Function is not specified for the current address family

Recommended Action: No user action is required.

OSPF-3-CTX Format: Error in subrouter context %s: %s

Explanation: Error related to multiple subrouters and contexts

Recommended Action: No action is required.

OSPF-3-CTX_IF Format: Error in subrouter context for interface %s: %s

Explanation: Error related to interface context

Recommended Action: No action is required.

OSPF-3-MTS_BIND Format: Error returned from mts_bind(), errno: %s

Explanation: OSPF called a MTS API which returned an error.

Recommended Action: No action is required.

OSPF-6-MTS_UNKNOWN_MSG Format: Received unknown MTS message with opcode %d, dropping it

Explanation: OSPF recieved an unknown MTS message. The message will be dropped

Recommended Action: No action is required.

OSPF-3-MTS_RECV Format: Error returned from tsp_mts_recv(), errno: %s

Explanation: OSPF called a MTS API which returned an error.

Recommended Action: No action is required.

OSPF-3-MTS_DROP Format: Error returned from mts_drop(), errno: %s

Explanation: OSPF called a MTS API which returned an error.

Recommended Action: No action is required.

OSPF-3-PSS_READ Format: PSS read for %s information failed

Explanation: OSPF called an PSS API which returned an error.

Recommended Action: No action is required.

OSPF-3-TLV_INTF Format: Failed to convert to %s for %s

Explanation: OSPF called an TLV intf which returned an error.

Recommended Action: No action is required.

OSPF-3-MTS_NOTIFY Format: Error returned from mts_send_notify(), errno: %s

Explanation: OSPF called a MTS API which returned an error.

Recommended Action: No action is required.

OSPF-3-CMI_ERR Format: CMI error: %s.

Explanation: CMI returned an error

Recommended Action: No user action is required.

OSPF-3-CMI_NO_VRF_ERR Format: CMI error: No %s VRF information found

Explanation: CMI returned an error

Recommended Action: No user action is required.

OSPF-4-IF_ERR Format: Packet from %s received on %s interface %s

Explanation: A OSPF packet not belonging to this interface was received

Recommended Action: No action is required.

OSPF-4-PKTLEN_ERR Format: Packet received from %s on %s has length %d which is less than %s %d

Explanation: A OSPF packet with invalid length was received

Recommended Action: No action is required.

OSPF-4-AREA_ERR Format: Packet from %s on %s received for wrong area %s

Explanation: A OSPF packet not belonging to this area was received

Recommended Action: No action is required.

OSPF-4-PKTTYPE_ERR Format: Unknown type %d received from %s on %s

Explanation: A OSPF packet with incorrect packet type was received

Recommended Action: No action is required.

OSPF-4-VERSION_ERR Format: Bad ospf version %d received from %s on %s

Explanation: A OSPF packet with incorrect version number was received

Recommended Action: No action is required.

OSPF-4-SOURCE_ERR Format: Bad source address %s - ours on %s

Explanation: A OSPF packet with our own source address was received

Recommended Action: No action is required.

OSPF-4-SRC_INVALID Format: Invalid src address %s, should not be seen on %s

Explanation: A OSPF packet packet with source address not on this network was received

Recommended Action: No action is required.

OSPF-4-CKSM_ERR Format: Bad OSPF checksum in packet %hx computed %hx from %s on %s

Explanation: A OSPF packet with invalid checksum was received

Recommended Action: No action is required.

OSPF-4-AUTH_ERR Format: Received packet from %s on %s with bad authentication %hx

Explanation: A OSPF packet with mismatched authentication type was received

Recommended Action: No action is required.

OSPF-4-NEIGH_ERR Format: Neighbor %s not found, packet dropped

Explanation: A non-hello OSPF packet with no neighbor was received

Recommended Action: No action is required.

OSPF-4-SRC_MCAST Format: Bad source address %s - multicast on %s

Explanation: A OSPFv3 packet with muticast source address was received

Recommended Action: No action is required.

OSPF-4-DEST_INVALID Format: Bad destination address %s

Explanation: A OSPFv3 packet with muticast source address was received

Recommended Action: No action is required.

OSPF-4-REDIST_MAX_PFX Format: Redistribution prefix limit has been reached - %d prefixes

Explanation: Check if redistribution of large number of prefixes is desired and has not been configured by mistake

Recommended Action: No action is required.

OSPF-4-REDIST_THR_PFX Format: Redistribution prefix threshold has been reached - %d prefixes

Explanation: Check if redistribution of large number of prefixes is desired and has not been configured by mistake

Recommended Action: No action is required.

OSPF-2-REDIST_VPN Format: Received VPN routes without extended community for %s/%d

Explanation: An internal error

Recommended Action: No action is required.

OSPF-3-IF_INVALID Format: Unable to find interface %s

Explanation: OSPF could not find an interface

Recommended Action: No action is required.

OSPF-3-SET_OVERLOAD Format: Setting overload state for %s

Explanation: OSPF sets the configuration to sends the LSAs with max-metric cost

Recommended Action: No action is required.

OSPF-3-CLEAR_OVERLOAD Format: Clearing overload state for %s

Explanation: OSPF resets the configuration to sends the LSAs with normal cost

Recommended Action: No action is required.

PFMCLNT Messages

PIXM Messages

PIXM-2-PIXM_SYSLOG_MESSAGE_TYPE_CRIT Format: %s

Explanation: PIXM has encountered a critical error

Recommended Action: Please collect PIXM tech support using 'show tech pixm-all' and 'show tech pixmc-all'

PIXM-3-PIXM_SYSLOG_MESSAGE_TYPE_ERR Format: %s

Explanation: PIXM has encountered a error

Recommended Action: Please collect PIXM tech support using 'show tech pixm-all' and 'show tech pixmc-all'

PIXM-4-PIXM_SYSLOG_MESSAGE_TYPE_WARNING Format: %s

Explanation: PIXM has encountered a warning-level error

Recommended Action: Please collect PIXM tech support using 'show tech pixm-all' and 'show tech pixmc-all'

PIXM-7-PIXM_SYSLOG_MESSAGE_TYPE_DEBUG Format: %s

Explanation: This is a debug output from PIXM

Recommended Action: Please collect PIXM tech support using 'show tech pixm-all' and 'show tech pixmc-all'

PLTFM_MGR Messages

PLATFORM-0-SUP_WRONGSLOTNUM Format: Supervisor powered up in WRONG SLOT:%d (Serial number %s)

Explanation: The supervisor is comming up in wrong slot [decimal digit].

Recommended Action: No action is required.

PLATFORM-2-SYS_IDPROMBAD_RECOVER_PASS Format: Chassis IDPROM %d data re-initialized successfully

Explanation: Chassis IDPROM [decimal digit] invalid data was succesfully re-initialized to valid.

Recommended Action: Please perform a 'show sprom module [decimal digit] 1' to read module IDPROM contents and verify the information.

PLATFORM-2-SYS_IDPROMBAD_RECOVER_FAIL Format: Chassis IDPROM %d data re-initialization Un-successful. Data is invalid

Explanation: Chassis IDPROM [decimal digit] re-initialization was unsuccessful. Data is invalid.

Recommended Action: Please perform a 'show sprom module [decimal digit] 1' to read module IDPROM contents and collect more information.

PLATFORM-5-PS_FOUND Format: Power supply %d found (Serial number %s)

Explanation: Power Supply is detected.

Recommended Action: No action is required.

PLATFORM-2-PS_DETECT Format: Power supply %d detected but shutdown (Serial number %s)

Explanation: Power Supply is detected but shutdown.

Recommended Action: Please perform a 'show environment power' and 'show platform internal info' to collect more information.

PLATFORM-5-PS_STATUS Format: PowerSupply %d current-status is %s %s

Explanation: module in slot [decimal digit] changed status.

Recommended Action: No action is required.

PLATFORM-2-PS_REMOVE Format: Power supply %d removed (Serial number %s)

Explanation: Power Supply is removed.

Recommended Action: No action is required.

PLATFORM-2-PS_OK Format: Power supply %d ok (Serial number %s)

Explanation: Power Supply is ok.

Recommended Action: No action is required.

PLATFORM-2-PS_UNSUPPORTED Format: Detected an unsupported power supply %d %s for CISCO Multilayer Switch (Serial number %s)

Explanation: This power supply is not supported for the CISCO Multilayer Switches.

Recommended Action: Please refer to power supply document on increasing decreasing power supply capacity, configuring power supplies, etc.

PLATFORM-5-FAN_DETECT Format: Fan module %d (Serial number %s) %s detected

Explanation: Fan module is detected

Recommended Action: No action is required.

PLATFORM-5-FAN_STATUS Format: Fan module %d (Serial number %s) %s current-status is %s

Explanation: Fan module changed status

Recommended Action: No action is required.

PLATFORM-2-FAN_REMOVED Format: Fan module %d (Serial number %s) %s removed

Explanation: Fan module is removed

Recommended Action: No action is required.

PLATFORM-0-SYS_SHUTDOWN Format: System shutdown in %d seconds due to major temperature alarm

Explanation: System shutdown in [decimal digit] seconds due to temperature exceeding major threshold.

Recommended Action: Please perform a 'show env temperature' to collect more information.

PLATFORM-0-SYS_LC_DRIVER_LOAD_FAILED Format: Failed to load linecard module drivers

Explanation: failed to load drivers.

Recommended Action: Image is possibly corrupt. Try to load a different image.

PLATFORM-2-PFM_SYSTEM_SHUTDOWN_TRIGGER Format: System shutdown due to %s policy trigger)msgdef_explanation("Policy/trigger initiated a system shutdown "

Recommended Action: None

PLATFORM-2-PFM_SYSTEM_RESET Format: Manual system restart from Command Line Interface)msgdef_explanation("User initiated a system reload from the CLI"

Recommended Action: None

PLATFORM-2-PFM_MODULE_POWER_OFF Format: Manual power-off of %s from Command Line Interface)msgdef_explanation("User initiated a module power-off from the CLI"

Recommended Action: None

PLATFORM-2-PFM_MODULE_POWER_ON Format: Manual power-on of %s from Command Line Interface)msgdef_explanation("User initiated a module power-on from the CLI"

Recommended Action: None

PLATFORM-2-PFM_MODULE_POWER_OFF_TRIGGER Format: Power-off %s due to %s policy trigger )msgdef_explanation("Policy trigger initiated a module poweroff"

Recommended Action: None

PLATFORM-2-PFM_MODULE_RESET Format: Manual restart of Module %d from Command Line Interface)msgdef_explanation("User initiated a module reload from the CLI"

Recommended Action: None

PLATFORM-2-PFM_XBAR_RESET Format: Manual restart of Xbar %d from Command Line Interface)msgdef_explanation("User initiated a xbar reload from the CLI"

Recommended Action: None

PLATFORM-3-EJECTOR_STAT_CHANGED Format: Ejectors' status in slot %d has changed, %s Ejector is %s, %s Ejector is %s)msgdef_explanation("Ejector status has changed"

Recommended Action: None

PLATFORM-2-PFM_PREP_DEEP_SLEEP Format: Supervisor module in slot %d preparing to enter deep sleep mode

Explanation: Deep sleep mode initiated by the Connectivity Management Processor (CMP) for this supervisor

Recommended Action: No action is required.

PLATFORM-2-MEMORY_ALERT_RECOVERED Format: Memory Status Alert : %s)msgdef_explanation("Memory alert event received "

Recommended Action: None

PLATFORM-2-MEMORY_ALERT Format: Memory Status Alert : %s. Usage %s%% of Available Memory)msgdef_explanation("Memory alert event received "

Recommended Action: None

PLATFORM-1-PFM_ALERT Format: %s

Explanation: Platform Alert

Recommended Action: No action is required.

PLATFORM-5-FEX_FAN_DETECT Format: Fex %d Fan Module %d detected

Explanation: Fex Fan module is detected

Recommended Action: No action is required.

PLATFORM-5-FEX_FAN_REMOVE Format: Fex %d Fan Module %d removed

Explanation: Fex Fan module is removed

Recommended Action: No action is required.

PLATFORM-5-FEX_PS_FOUND Format: Fex %d Power Supply %d found (Serial number %s)

Explanation: Fex power supply is found

Recommended Action: No action is required.

PLATFORM-5-FEX_PS_REMOVE Format: Fex %d Power Supply %d removed (Serial number %s)

Explanation: Fex power supply is removed

Recommended Action: No action is required.

PLATFORM-2-SUP_UNSUPPORTED Format: Unsupported card detected in supervisor slot %d powered down

Explanation: The module in slot [decimal digit] has been powered down.

Recommended Action: No action is required.

POLICY_MGR Messages

POLICY_MGR-6-POLICY_MGR_PPF_NOTIF Format: PPF notification: %s

Explanation: The PPF generated notification

Recommended Action: No action is required.

POLICY_MGR-4-POLICY_MGR_PPF_WARNING Format: PPF warning: %s

Explanation: The PPF generated warning

Recommended Action: No action is required.

POLICY_MGR-3-POLICY_MGR_PPF_ERROR Format: PPF error: %s

Explanation: The PPF generated error

Recommended Action: No action is required.

RPM Messages

RPM-3-INT_ERROR Format: %s in %s()

Explanation: RPM encountered an error during internal processing

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

RPM-7-INFRA_SYSERR Format: %s failed with error - %s (0x%08x) - in %s()

Explanation: RPM called an infra API which returned an error.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

RPM-2-PTHREAD Format: %s failed with error - %d in %s()

Explanation: RPM invoked an API which failed. This is an unexpected but manageable event.

Recommended Action: No user action is required.

RPM-2-PSS_SYNC_BUFFER Format: Crossed pss sync buffer size limit of %d with payload size %d - in %s()

Explanation: RPM tried to PSS sync a message exceeding the maximum allowed size

Recommended Action: No action is required.

RPM-6-RESTART_SHUTDOWN Format: RPM shutting self down via restart command in %s()

Explanation: RPM process is shutting itself down due to the restart command.

Recommended Action: No user action is required.

RPM-6-MTS_UNKNOWN_MSG Format: Received unknown MTS message with opcode %d, dropping it in %s()

Explanation: RPM received an unknown message. The message is dropped

Recommended Action: No user action is required.

RPM-3-MTS_RECV Format: Error returned from tsp_mts_recv(), errno: %s (0x%08x) in %s()

Explanation: An MTS API returned an error while RPM was receiving on an MTS queue

Recommended Action: No user action is required.

RPM-3-MTS_SEND Format: Error returned from mts_send(), errno: %s (0x%08x) in %s()

Explanation: An MTS API returned an error while RPM was sending an MTS message

Recommended Action: No user action is required.

RPM-3-MTS_DROP Format: Error returned from mts_drop(), errno: %s (0x%08x) in %s()

Explanation: An MTS API returned an error when RPM tried to drop a message

Recommended Action: No user action is required.

RPM-3-ISSU_PREUPG_FAILED Format: ISSU Preupgrade failed

Explanation: Please remove the incompatible RPM/PBR config and restart ISSU.

Recommended Action: No user action is required.

RPM-2-SRV_INIT_API_FAIL Format: %s failed during initialization in %s()

Explanation: RPM called a server API during initialization which returned an error.

Recommended Action: Use 'reload' CLI command to reload the system. Be aware that this affects all VDCs on the system.

RPM-2-PPF_SES_VERIFY Format: PPF session verify failed in client %s with an error 0x%08x(%s)

Explanation: RPM encountered an error while pushing PBR policy changes during the verify stage to PBR clients

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

RPM-2-PPF_SES_COMMIT Format: PPF session commit failed in client %s with an error 0x%08x(%s)

Explanation: RPM encountered a serious error while committing the verified PBR policy changes to PBR clients

Recommended Action: Use 'reload' CLI command to reload the system. Be aware that this affects all VDCs on the system.

RPM-2-PPF_SES_ABORT Format: PPF session abort failed in client %s with an error 0x%08x(%s)

Explanation: RPM encountered an error during PPF abort operation.

Recommended Action: Use 'reload' CLI command to reload the system. Be aware that this affects all VDCs on the system.

RPM-2-PPF_SES_RQST Format: PPF session request failed in client %s with an error 0x%08x(%s)

Explanation: RPM encountered an error while requesting PBR statistics from PBR clients

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

RPM-2-MALLOC_FAILED Format: malloc() failed for allocating %s in %s()

Explanation: RPM process is out of heap memory

Recommended Action: Use 'reload' CLI command to reload the system. Be aware that this affects all VDCs on the system.

RPM-2-SMALLOC_FAILED Format: smalloc() failed for allocating %s in %s()

Explanation: RPM process is out of shared memory. This could be due to temporary increase in the number of policies configured to a very high value

Recommended Action: Use 'reload' CLI command to reload the system. Be aware that this affects all VDCs on the system.

RPM-7-API_FAILED Format: %s - failed in %s()

Explanation: RPM invoked an API which failed. This is an unexpected but manageable event.

Recommended Action: No user action is required.

RPM-7-API_FAILED_STR_NUM Format: %s - failed for %s %d in %s()

Explanation: RPM invoked an API which failed. This is an unexpected but manageable event.

Recommended Action: No user action is required.

RPM-7-API_FAILED_STR_STR Format: %s - failed for %s %s in %s()

Explanation: RPM invoked an API which failed. This is an unexpected but manageable event.

Recommended Action: No user action is required.

RPM-7-API_FAILED_STR Format: %s - failed for %s in %s()

Explanation: RPM invoked an API which failed. This is an unexpected but manageable event.

Recommended Action: No user action is required.

RPM-7-API_FAILED_NUM Format: %s - failed for %d in %s()

Explanation: RPM invoked an API which failed. This is an unexpected but manageable event.

Recommended Action: No user action is required.

RPM-3-LIC_REG_FAILED Format: %s failed with error - %s (0x%08x) - in %s()

Explanation: Licensing API failed while registering for license change notifications.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

RPM-3-LIC_CHECKIN_FAILED Format: %s failed with error - %s (0x%08x) - in %s()

Explanation: Licensing API failed to check in a license.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

RPM-3-LIC_CHECKOUT_FAILED Format: %s failed with error - %s (0x%08x) - in %s()

Explanation: Licensing API failed to check out a license.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

RPM-3-LOAD_PARSE_TREE Format: %s failed with error - %s (0x%08x) - in %s()

Explanation: API failed to load parse tree for PBR commands.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

RPM-3-UNLOAD_PARSE_TREE Format: %s failed with error - %s (0x%08x) - in %s()

Explanation: API failed to unload parse tree for PBR commands.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

RPM-3-BUILD_LIC_REQ Format: %s failed with error - %s (0x%08x) - in %s()

Explanation: API failed to build a license request to recheckout a license.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

RPM-7-LIB_API_FAILED Format: %s - failed in %s()

Explanation: RPM invoked an API which failed. This is an unexpected but manageable event.

Recommended Action: No user action is required.

RPM-2-LIB_MALLOC_FAILED Format: malloc() failed for allocating %s in %s()

Explanation: RPM API library is out of heap memory

Recommended Action: Use 'reload' CLI command to reload the system. Be aware that this affects all VDCs on the system.

RPM-7-LIB_INT_ERROR Format: %s in %s()

Explanation: RPM API encountered an error during internal processing

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

RPM-7-LIB_MTS_SEND Format: Error returned from mts_send(), errno: %s in %s()

Explanation: An MTS API returned an error while RPM was sending an MTS message.

Recommended Action: No user action is required.

RPM-7-LIB_API_FAILED_STR Format: %s - failed for %s in %s()

Explanation: RPM invoked an API which failed. This is an unexpected but manageable event.

Recommended Action: No user action is required.

RPM-7-LIB_API_FAILED_NUM Format: %s - failed for %d in %s()

Explanation: RPM invoked an API which failed. This is an unexpected but manageable event.

Recommended Action: No user action is required.

RPM-7-LIB_API_FAILED_NUM_NUM Format: %s - failed for %d %d in %s()

Explanation: RPM invoked an API which failed. This is an unexpected but manageable event.

Recommended Action: No user action is required.

RPM-6-LIB_MATCH_IGNORED Format: The command %s in seq. %u of route-map %s is ignored in %s()

Explanation: A route-map match command has been ignored.

Recommended Action: No user action is required.

RPM-7-LIB_KEYCHAIN Format: Unexpected keychain result :%s

Explanation: Unexpected result during RPM keychain API processing

Recommended Action: No user action is required.

SATMGR Messages

SATMGR-5-FEX_PORT_STATUS_NOTI Format: Uplink-ID %d of Fex %d that is connected with %s changed its status from %s to %s

Explanation: Fex [decimal-digit] changed port status

Recommended Action: No action is required.

SATMGR-2-FEX_PORT_STATUS_CRIT Format: Uplink-ID %d of Fex %d that is connected with %s changed its status from %s to %s

Explanation: Fex [decimal-digit] changed port status

Recommended Action: No action is required.

SATMGR-5-PINNING_CHANGED Format: Fex %d pinning information is changed

Explanation: Fex pinning information changed

Recommended Action: No action is required.

SATMGR-5-FEX_ENABLED Format: FEX Enabled

Explanation: FEX Service Enabled

Recommended Action: No action is required.

SATMGR-5-FEX_DISABLED Format: FEX Disabled

Explanation: FEX Service Disabled

Recommended Action: No action is required.

SATMGR-5-SATMGR_DISABLE_FAILED Format: Disabling of feature FEX failed. Please remove FEX related configs from interfaces

Explanation: Disabling of FEX feature failed

Recommended Action: No action is required.

SATMGR-2-FEX_NOT_ONLINE_SUP_ISSU Format: FEX %d did not come online after SUP ISSU

Explanation: FEX did not come online after sup ISSU

Recommended Action: No action is required.

SATMGR-2-FEX_ONLINE Format: FEX %d has come ONLINE

Explanation: FEX has come ONLINE

Recommended Action: No action is required.

SATMGR-2-FEX_OFFLINE Format: FEX %d has gone OFFLINE

Explanation: FEX has gone OFFLINE

Recommended Action: No action is required.

SATMGR-2-NOHMS_ENV_FEX_ONLINE Format: %s

Explanation: Fex on-line

Recommended Action: show inventory

SATMGR-2-NOHMS_ENV_FEX_OFFLINE Format: %s

Explanation: Fex off-line

Recommended Action: show inventory

SATMGR-2-FEX_OFFLINE_WITH_REASON Format: FEX %d has gone OFFLINE because %s.

Explanation: FEX has gone OFFLINE because of the specified reason.

Recommended Action: No action is required.

SYSLOG_COOP Messages

COOP-2-COOP_INIT_FAILURE Format: %s(%d): %s

Explanation: COOP initialization failure

Recommended Action: No action is required.

COOP-2-COOP_FU_INIT_FAILURE Format: %s %s

Explanation: COOP fu initialization failure

Recommended Action: No action is required.

COOP-6-COOP_INIT_INFO Format: %s(%d): %s

Explanation: COOP initialization information

Recommended Action: No action is required.

COOP-6-COOP_MTS_INIT_INFO Format: %d: %s

Explanation: COOP MTS initialization information

Recommended Action: No action is required.

COOP-2-COOP_MTS_INIT_FAILURE Format: %d: %s

Explanation: COOP MTS initialization failure

Recommended Action: No action is required.

TM Messages

TM-5-TM_ENABLED Format: Tunnel Enabled

Explanation: Tunnel Service Enabled

Recommended Action: No action is required.

TM-5-TM_DISABLED Format: Tunnel Disabled

Explanation: Tunnel Service Disabled

Recommended Action: No action is required.

TM-7-TM_INFO Format: %s

Explanation: Tunnel Service info

Recommended Action: No action is required.

TM-3-HW_PROGRAMMING_FAILED Format: for %s, reason %s

Explanation: Hardware programming failed for tunnel [num] interface

Recommended Action: Try 'shutdown' and 'no shutdown' under tunnel interface submode after sometime. if still tunnel interface doesn't come up capture show tech-support tunnel to identify the issue

TM-4-TM_MTU_PROGRAMMING Format: Programming %s mtu %d...

Explanation: Programming [chars] mtu [int]

Recommended Action: No action is required.

TM-4-TM_MTU_PROGRAMMING_FAILED Format: %s mtu %d programming failed! status 0x%x

Explanation: [chars] mtu [int] programming failed! status [int]

Recommended Action: capture show \tech-support tunnel\ to identify why MTU programming as failed. tunnel interface will used default mtu value

TM-4-TM_DF_PROGRAMMING Format: Programming %s DF(dont fragment) df.sel %d df.val %d

Explanation: Programming [chars] DF df.sel [int] df.val [int]

Recommended Action: No action is required.

TM-4-TM_DF_PROGRAMMING_FAILED Format: %s DF(dont fragment) programming failed! status 0x%x

Explanation: [chars] DF programming failed! status [int]

Recommended Action: capture \show tech-support tunnel \ to identify why df flag programing failed

TM-5-IF_STATE_UPDATE Format: Interface %s is %s reason %s

Explanation: Interface [char] is [char] reason [char]

Recommended Action: No action is required.

TM-5-IF_CREATED Format: Interface %s is created

Explanation: Interface [char] is created

Recommended Action: No action is required.

TM-5-IF_CREATE_FAILED Format: Interface %s creation failed due to [0x%x] %s

Explanation: Interface [char] is creation failed due to [int] [char]

Recommended Action: No action is required.

TM-5-IF_DELETED Format: Interface %s is deleted

Explanation: Interface [char] is deleted

Recommended Action: No action is required.

TM-5-IF_CLEAR_COUNTER Format: Interface %s counters is cleared

Explanation: Interface [char] counters is cleared

Recommended Action: No action is required.

TM-5-PPF_SESSION_FAILED Format: session id %llx type %s for %s failed error %x %s

Explanation: session id [int] type [char] for [char] failed error [int] [char]

Recommended Action: No action is required.

TM-2-FEATURE_ENABLE_FAILED Format: failed to enable feature tunnel, reason %s (0x%x)

Explanation: failed to enable feature tunnel, reason [char] ([int])

Recommended Action: check the failure reason and take appropriate action to fix the failure. if unable to fix, please capture \show tech-support tunnel\

TM-2-TM_F2_ONLY_VDC Format: Tunnel feature is not supported in F2 only VDC

Explanation: Tunnel feature is not supported in F2 only VDC

Recommended Action: Disable the Tunnel feature by the CLI \no feature tunnel\

UFDM Messages

UFDM-2-INTERNAL_ERROR Format: Internal error: %s, collect output of show tech-support fowarding l3 unicast... command

Explanation: UFDM hit a internal error. Collect show tech-support forwarding l3 unicast for futher analysis.

Recommended Action: No action is required.

UFDM-2-DNLD_TIMEDOUT Format: Download timer expired: %s

Explanation: UFDM download timer expired. Collect show tech-support forwarding l3 unicast for futher analysis.

Recommended Action: No action is required.

UFDM-2-FIB_ROUTE_UPDATE_ERR Format: Route update error from slot %d FIB

Explanation: FIB returned route update error. Collect show tech-support forwarding l3 unicast for futher analysis.

Recommended Action: No action is required.

URIB Messages

URIB-2-STARTUP_FAILURE Format: Startup failure: %s

Explanation: An unrecoverable software error has occurred during URIB startup.

Recommended Action: Use 'reload' CLI command to reload the system. Be aware that this affects all VDCs on the system.

URIB-2-BAD_PT Format: Possible Patricia tree corruption in %s

Explanation: An unrecoverable software error has occurred because of a bad route table.

Recommended Action: Use 'reload' CLI command to reload the system. Be aware that this affects all VDCs on the system.

URIB-2-TOO_MANY_CLIENTS Format: %s client \%s\""

Explanation: URIB cannot add this client because the URIB client limit has already been reached.

Recommended Action: Kill component and don't restart it.

URIB-2-TIMER_LIB Format: %s %s

Explanation: The timer library returned an error, causing an unrecoverable problem for URIB.

Recommended Action: Use 'reload' CLI command to reload the system. Be aware that this affects all VDCs on the system.

URIB-2-RES_MGR Format: Error returned from %s, errno: 0x%08x (%s) in %s()

Explanation: The resource manager returned an error to URIB, while URIB was performing an action relating to its shared memory

Recommended Action: Use 'reload' CLI command to reload the system. Be aware that this affects all VDCs on the system.

URIB-2-API_INIT_SEM Format: Failed to init the client API semaphore: open: %s, create: %s

Explanation: URIB could not create the semaphore that protects access to the shared memory between URIB and its clients.

Recommended Action: Use 'reload' CLI command to reload the system. Be aware that this affects all VDCs on the system.

URIB-2-NOSMEM Format: Failed to allocate shared memory for %s

Explanation: URIB has run out of shared memory to store routes and related information. This condition can be caused by a temporary increase in the number of routes in the network, or a general network or router misconfiguration.

Recommended Action: Configure the network or router to decrease the number of routes, or reconfigure the shared memory through the following vdc mode commands: 'limit-resource u4route-mem min \ max \' or 'limit-resource u6route-mem min \ max \'

URIB-2-NOPMEM Format: Failed to allocate private memory for %s

Explanation: URIB has run out of private memory. This condition can be caused by a temporary increase in the number of routes in the network, or a general network or router misconfiguration.

Recommended Action: Configure the network or router to decrease the number of routes, or add additional memory to the router.

URIB-3-PTADD_ERROR Format: Could not add %s/%d to the %s pt, error code %d

Explanation: A severe route table error was encountered. The system may run into more errors because of this problem.

Recommended Action: Use the 'system switchover' CLI command to switchover to the standby supervisor. If no standby is present, or the standby is not ready, use the 'reload' CLI command to reload the system. The state of the standby can be checked using the 'show system redundancy ha status' CLI command.

URIB-3-PTDEL_ERROR Format: Could not delete %s/%d from the URIB pt, error code %d

Explanation: A severe route table error was encountered. The system may run into more errors because of this problem.

Recommended Action: Use the 'system switchover' CLI command to switchover to the standby supervisor. If no standby is present, or the standby is not ready, use the 'reload' CLI command to reload the system. The state of the standby can be checked using the 'show system redundancy ha status' CLI command.

URIB-3-CCMARKERERROR Format: Mismatch in marker_elem = %u and urib_cc_end_download_marker = %u for tib: %s

Explanation: An severe error was enountered during Consistency Checker

Recommended Action: No action is required.

URIB-3-CCPENDING Format: Previous Consistency Check has not yet completed

Explanation: Previous Consistency Check has not yet completed

Recommended Action: No action is required.

URIB-3-AVLINIT_ERROR Format: Could not init %s avl for VRF %s

Explanation: URIB was unable to correctly initialise an AVL data structure.

Recommended Action: Use 'reload' CLI command to reload the system. Be aware that this affects all VDCs on the system.

URIB-3-AVLADD_ERROR Format: Could not add %s (0x%08x) to the %s avl

Explanation: URIB was unable to add a piece of data to an AVL data structure.

Recommended Action: Use 'reload' CLI command to reload the system. Be aware that this affects all VDCs on the system.

URIB-3-QADD_ERROR Format: Could not add %s to the %s queue

Explanation: A severe queue error was encountered. The system may run into more errors because of this problem.

Recommended Action: Use the 'system switchover' CLI command to switchover to the standby supervisor. If no standby is present, or the standby is not ready, use the 'reload' CLI command to reload the system. The state of the standby can be checked using the 'show system redundancy ha status' CLI command.

URIB-3-HTADD_ERROR Format: Could not add %s to the %s hash table

Explanation: A severe hash table error was encountered. The system may run into more errors because of this problem.

Recommended Action: Use the 'system switchover' CLI command to switchover to the standby supervisor. If no standby is present, or the standby is not ready, use the 'reload' CLI command to reload the system. The state of the standby can be checked using the 'show system redundancy ha status' CLI command.

URIB-3-ADD_ERROR Format: Client \%s\" could not add %s/%d to the %s"

Explanation: A severe error was encountered. The system may run into more errors because of this problem.

Recommended Action: Use the 'system switchover' CLI command to switchover to the standby supervisor. If no standby is present, or the standby is not ready, use the 'reload' CLI command to reload the system. The state of the standby can be checked using the 'show system redundancy ha status' CLI command.

URIB-3-MOD_ERROR Format: Client \%s\" could not modify %s/%d: %s"

Explanation: A severe error was encountered. The system may run into more errors because of this problem.

Recommended Action: Use the 'system switchover' CLI command to switchover to the standby supervisor. If no standby is present, or the standby is not ready, use the 'reload' CLI command to reload the system. The state of the standby can be checked using the 'show system redundancy ha status' CLI command.

URIB-3-DEL_ERROR Format: Could not delete %s/%d from %s

Explanation: A severe error was encountered. The system may run into more errors because of this problem.

Recommended Action: Use the 'system switchover' CLI command to switchover to the standby supervisor. If no standby is present, or the standby is not ready, use the 'reload' CLI command to reload the system. The state of the standby can be checked using the 'show system redundancy ha status' CLI command.

URIB-3-NH_RESOLV_ADD_ERROR Format: Could not add %s/%d to the %s (%d) resolve buffer

Explanation: A severe error was encountered. The system may run into more errors because of this problem.

Recommended Action: Use the 'system switchover' CLI command to switchover to the standby supervisor. If no standby is present, or the standby is not ready, use the 'reload' CLI command to reload the system. The state of the standby can be checked using the 'show system redundancy ha status' CLI command.

URIB-3-COPY_ERROR Format: Could not copy %s for %s/%d

Explanation: A severe error was encountered during route optimisation. The system may run into more errors because of this problem.

Recommended Action: No action is required.

URIB-3-KSINK_LIB_ERROR Format: %s %s

Explanation: A severe error was encountered during ksink operations. The system may run into more errors because of this problem.

Recommended Action: No action is required.

URIB-3-RPM_LIB_ERROR Format: %s %d

Explanation: An RPM library function returned an error.

Recommended Action: No action is required.

URIB-3-SDWRAP_LIB_ERROR Format: %s %s

Explanation: A SDWrap library function returned an error.

Recommended Action: No action is required.

URIB-3-ADD_PATH_ERROR Format: %s: could not add path for client \%s\"."

Explanation: A route add operation has failed for the given client. There may be a previous error message that further explains the problem.

Recommended Action: No action is required.

URIB-3-ADD_RPATH Format: Client \%s\" added %s/%u via not found rnh %s/%u%%%s"

Explanation: A route add operation has failed for the given client. This may be a transient error.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

URIB-3-ADD_TPATH Format: Client \%s\" added %s/%u via tableid 0x%08x : %s"

Explanation: A route add operation has failed for the given client. This was because the tableid could not be found. This may be a transient error.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

URIB-3-DEL_PATH_ERROR Format: %s: could not del path for client \%s\"."

Explanation: A route add operation has failed for the given client. There may be a previous error message that further explains the problem.

Recommended Action: No action is required.

URIB-3-NOT_INIT_L3VM_ERROR Format: L3VM info for table id 0x%08x from client \%s\" not available - URIB not initialised with L3VM"

Explanation: A client tried to add some information to the URIB, before URIB has registered for the table information. The client should be restarted.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

URIB-3-NO_L3VM_INFO_ERROR Format: no L3VM info for table id 0x%08x from client \%s\" - unknown to L3VM"

Explanation: A client tried to add some information to URIB and provided a Table-Id that is unknown in the system. The client should be restarted.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

URIB-3-NO_L3VM_LIMITS Format: Could not get routing table limits from L3VM

Explanation: URIB could not pull the routing limits for the table. L3VM should be restarted.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

URIB-3-TABLE_CREATE_ERROR Format: Failed to create table info for VRF %s for client \%s\""

Explanation: URIB could not create its table data structure for the VRF being created. There may be further errors that indicate the failure in more detail. The shown VRF should be reconfigured in the system. i.e. in global configuration, 'no vrf context \'

Recommended Action: Requires operator to intervene.

URIB-3-TABLE_STATE_ERROR Format: Table state %s for VRF %s for client \%s\""

Explanation: URIB received a request from a client for a given VRF, but the given VRF was in a state where that request is not permitted

Recommended Action: Requires operator to intervene.

URIB-3-INSTANCE_CREATE_ERROR Format: ERRMSG_LIMIT_DEF

Explanation: URIB could not create its data structures for a client in the shown VRF. There may be further errors to indicate the failure in more detail. The shown VRF should be reconfigured in the client. i.e. in router sub-mode configuration, 'no vrf \'

Recommended Action: Requires operator to intervene.

URIB-3-GET_INSTANCE_ERROR Format: instance not found for client \%s\" in VRF %s"

Explanation: URIB could not find its data structures for a client in the shown VRF. The shown VRF should be reconfigured in the client. i.e. in router sub-mode configuration, 'no vrf \'

Recommended Action: Requires operator to intervene.

URIB-3-GENERAL_PTHREAD_ERROR Format: Thread %d: %s

Explanation: The POSIX pthread library returned an error to URIB.

Recommended Action: Use the 'system switchover' CLI command to switchover to the standby supervisor. If no standby is present, or the standby is not ready, use the 'reload' CLI command to reload the system. The state of the standby can be checked using the 'show system redundancy ha status' CLI command.

URIB-3-EPID_MIS_MATCH_ERROR Format: \%s\" epid (%u) does not match known epid (%u)"

Explanation: The id a client provided does not match the id that URIB currently has stored for the client. The client probably restarted ungracefully and URIB has the old id.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

URIB-3-GENERAL_UI_ERROR Format: %s

Explanation: The shown error occured while the user interface was processing a request. The request should be tried again.

Recommended Action: Requires operator to retry the request.

URIB-3-ASSERT_ERROR Format: "%s:%d: Assertion \"%s\" failed."

Explanation: An internal software error has occured. An assertion held to be true failed.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

URIB-3-FILE_OPEN_ERROR Format: File open error: %s

Explanation: This message is for internal debugging only.

Recommended Action: No action is required.

URIB-3-FILE_WRITE_ERROR Format: File write error: %s

Explanation: This message is for internal debugging only.

Recommended Action: No action is required.

URIB-3-OPEN_CLIENT_SHM_ERROR Format: "Failed to open client shared memory \"%s\": %s"

Explanation: The calling process failed with the shown error while trying to open the named URIB shared memory region. The status of the memory is shown in 'show process memory shared'.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

URIB-3-SEND_TO_ERROR Format: "Send to URIB failed: %s"

Explanation: The calling process was unable to send a message to URIB.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

URIB-3-SEND_FROM_ERROR Format: Send from URIB to client \%s\" failed: %s"

Explanation: URIB was unable to send a message to the shown client.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

URIB-3-SEND_NOTIF_ERROR Format: Failed to send %s notification buffer to client \%s\"; retried %lu times"

Explanation: URIB was unable to send a notification to a client.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

URIB-3-RNH_LOOP_ERROR Format: Number of prefixes forming rnh loop exceeds %d\n Flagging route %s/%d from client \%s\" with rnh %s/%d\n as causing rnh loop"

Explanation: URIB detected a loop between routes installed in the RIB. The message shows which client caused the loop.

Recommended Action: Requires operator to intervene.

URIB-3-XRI_TYPE_ERROR Format: Unknown XRI type %u

Explanation: URIB detected unknown eXtended route information while displaying a next-hop address.

Recommended Action: No user action is required.

URIB-3-INCONSISTENT_STRUCTURE Format: %s

Explanation: Unexpected remaining state removed during RIB cleanup.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

URIB-3-INCONSISTENT_ROUTE Format: %s: %s/%d via %s

Explanation: Unexpected remaining route removed during RIB cleanup.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

URIB-3-INCONSISTENT_RNH Format: %s: %s/%d

Explanation: Unexpected remaining recursive next-hop removed during RIB cleanup

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

URIB-3-INCONSISTENT_SUMMARY Format: %s: routes %d, rnh's %d

Explanation: Unexpected remaining state for client during RIB cleanup. Use the 'show routing ipv4 unicast internal event-history errors' CLI command for more information.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

URIB-3-RANGE_CHECK_ERR Format: "Range check of %s failed from %s (0x%08x)"

Explanation: The value provided is outside of the acceptable range.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

URIB-3-MORE_INFO_ERROR Format: Client \%s\": %s"

Explanation: This error provides further information about the previous error. Action should be taken depending on the previous error logged.

Recommended Action: No user action is required.

URIB-3-MORE_MTS_INFO_ERROR Format: source SAP is: %d dest SAP is: %d

Explanation: This error provides further information about the previous MTS error. Action should be taken depending on the previous MTS error logged.

Recommended Action: No user action is required.

URIB-3-PSS Format: Error returned from %s, errno: 0x%08x (%s) in %s()

Explanation: URIB called a PSS API which returned an error. The error reported should be examined for the cause.

Recommended Action: Use 'reload' CLI command to reload the system. Be aware that this affects all VDCs on the system.

URIB-3-UFDM_MTSSEND_FAILURE Format: MTS send; to UFDM failed with unexpected error %d

Explanation: URIB was unable to send a route update to UFDM. This means there will be a route missing from the FIB.

Recommended Action: Use the 'system switchover' CLI command to switchover to the standby supervisor. If no standby is present, or the standby is not ready, use the 'reload' CLI command to reload the system. The state of the standby can be checked using the 'show system redundancy ha status' CLI command.

URIB-4-ROUTELIMIT_EXCEEDED Format: Number of routes (%llu) reached or exceeds configured limit (%lu); dropped (%llu)

Explanation: The number of routes in the named routing table has reached the configured limit. No further routes will be added to the table

Recommended Action: Reduce the number of routes in the table, or reconfigure the limit

URIB-4-ROUTELIMIT_NOT_ENFORCED Format: Number of routes (%llu) already exceeds newly configured limit (%lu); dropped (%llu)

Explanation: The number of routes in the named routing table is already more than the newly configured limit. No further routes will be added to the table, but the new limit has not been enforced.

Recommended Action: To enforce the new limit, clear the table, or transistion the table though the administrative shutdown state. Then reduce the number of routes in the table, or reconfigure the limit

URIB-4-ROUTELIMIT_WARNING Format: Number of routes (%llu) exceeds warning limit (%lu)

Explanation: The number of routes in the named routing table has reached the configured warning limit.

Recommended Action: Reduce the number of routes in the table, or reconfigure the limit

URIB-3-RNH_REFCOUNT Format: Client \%s\" deleting RNH %s/%u with refcount %u"

Explanation: A client tried to delete a Recursive Next-hop while that RNH was still in use.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

URIB-4-ZERO_NEXTHOP Format: Client \%s\" added 0.0.0.0 next hop and interface %s is not point-to-point"

Explanation: The client protocol added a 0.0.0.0 next-hop address on a non point-to-point interface

Recommended Action: No user action is required.

URIB-4-RTDEL_ERROR Format: Could not find prefix %s/%d, client \%s\"'s delete request"

Explanation: Route delete request was received for a non-existing route.

Recommended Action: No user action is required.

URIB-3-UNEXPECTED_MESSAGE Format: %s %d. src SAP: %d dst SAP: %d

Explanation: An unexpected interprocess message was received.

Recommended Action: No user action is required.

URIB-4-UNEXPECTED_VALUE Format: Unexpected value for %s

Explanation: An unexpected value was encountered for the logged event.

Recommended Action: No user action is required.

URIB-4-INVALID_PIB Format: %s %s

Explanation: A bad protocol information block was encountered in the given situation.

Recommended Action: No user action is required.

URIB-4-NH_RESOLV_LUKUP Format: Could not find %s/%d while processing %s (%d) resolve buffer

Explanation: Unresolved nexthop not cleaned up properly.

Recommended Action: No action is required.

URIB-4-UFDM_ACKNOT_FOUND Format: Could not find UFDM buffer with ptr 0x%08x

Explanation: Ack received for a UFDM buffer that URIB does not know about.

Recommended Action: No user action is required.

URIB-5-GENERAL_FAILURE Format: Failed to %s

Explanation: The logged action failed, causing an unrecoverable error.

Recommended Action: Use the 'system switchover' CLI command to switchover to the standby supervisor. If no standby is present, or the standby is not ready, use the 'reload' CLI command to reload the system. The state of the standby can be checked using the 'show system redundancy ha status' CLI command.

URIB-5-BOGUS_RNH Format: \%s\" tried to add %s/%d with RNH %s/%d"

Explanation: A bogus update with unexpected RNH was received from the client.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

URIB-5-BOGUS_PREFIX Format: \%s\" tried to add %s/%d"

Explanation: A bogus prefix was received from the client.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

URIB-5-BOGUS_MASK Format: Client \%s\" tried to add %s/%d"

Explanation: A bogus mask was received from the client.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

URIB-5-BOGUS_INTF Format: Client \%s\" tried to add %s/%d via %s with invalid iod %d"

Explanation: A bad interface was received in a path add from the client.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

URIB-5-PATH_DELETE Format: ERRMSG_LIMIT_DEF

Explanation: URIB could not find the path that a client tried to delete.

Recommended Action: No user action is required.

URIB-5-RPATH_DELETE Format: ERRMSG_LIMIT_DEF

Explanation: URIB could not find the recursive path that a client tried to delete.

Recommended Action: No user action is required.

URIB-5-API_INIT_SEM_CLEAR Format: Cleared the API semaphore from %d

Explanation: The API semaphore was in an unexpected state, and was restored to a correct value.

Recommended Action: No user action is required.

URIB-5-RES_MGR_CHANGE Format: Changed u4route-mem from (%d, %d) to (%d, %d)

Explanation: The requested limit-resource command was adapted to fit the limits in this version.

Recommended Action: No user action is required.

URIB-6-NH_DELETED_NIB_INFO Format: Found hidden rnh %s/%d for client \%s\" in deleted NIB"

Explanation: URIB found a hidden next-hop for a client while the client was deregistering for a table.

Recommended Action: No user action is required.

URIB-6-UFDM_MGMT Format: Route %s/%d in VRF management not sent to ufdm

Explanation: URIB tried to give a route in the management VRF to UFDM

Recommended Action: No user action is required.

URIB-6-GENERAL_INFO Format: %s

Explanation: Informational message only.

Recommended Action: No user action is required.

URIB-6-TRACE_OVERFLOW Format: Trace buffer %s overflowed

Explanation: The given event trace overflowed. This is normal behaviour.

Recommended Action: No user action is required.

URIB-6-ROUTELIMIT_RECOVERED Format: Number of routes (%llu) is below the configured limit (%lu)

Explanation: The number of routes in the named routing table has fallen below the configured limit. The routing table has recovered

Recommended Action: No user action is required.

URIB-6-ROUTELIMIT_REINSTALL Format: Routing table was reinstalled

Explanation: The routing table was automatically reloaded to allow the new routing limit or because the reinstall threshold was crossed.

Recommended Action: No user action is required.

URIB-6-ROUTELIMIT_OVERFLOWED Format: Routing table statistic \%s\" overflowed 32 bits"

Explanation: The routing table statistic is returned in a MIB which only supports 32 bit values. The statistic just past the maximum value for 32 bits.

Recommended Action: No user action is required.

URIB-3-ROUTECOUNT_UNDERFLOW Format: Routing table statistic current tried to underflow deleting %s/%d

Explanation: The system tried to decrement the current number of routes in the table, but the statistic was already zero.

Recommended Action: Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

URIB-3-MTS_BIND Format: "mts_bind failed for %s: %s"

Explanation: URIB was unable to bind to an MTS queue SAP, causing an unrecoverable error.

Recommended Action: Use 'reload' CLI command to reload the system. Be aware that this affects all VDCs on the system.

URIB-3-MTS_OPTIONS Format: MTS option set failed for opcode %s: %s (%d)

Explanation: URIB was unable to set options for an MTS opcode

Recommended Action: Use the 'system switchover' CLI command to switchover to the standby supervisor. If no standby is present, or the standby is not ready, use the 'reload' CLI command to reload the system. The state of the standby can be checked using the 'show system redundancy ha status' CLI command.

URIB-3-CMI_MTSSEND_FAILURE Format: mts_send failure for client %s: %s

Explanation: URIB was unable to send MTS message to a particular client

Recommended Action: Use the 'system switchover' CLI command to switchover to the standby supervisor. If no standby is present, or the standby is not ready, use the 'reload' CLI command to reload the system. The state of the standby can be checked using the 'show system redundancy ha status' CLI command.

URIB-3-CMI_PAYLOAD_CONV_ERR Format: CMI payload conversion error failure from %s order to %s order

Explanation: The cmi payload conversion did not occur successfully.

Recommended Action: No user action is required.

URIB-3-MTS_UBIND Format: mts_unbind failed for %s: %s

Explanation: URIB was unable to unbind from an MTS queue SAP, causing an unrecoverable error.

Recommended Action: Use the 'system switchover' CLI command to switchover to the standby supervisor. If no standby is present, or the standby is not ready, use the 'reload' CLI command to reload the system. The state of the standby can be checked using the 'show system redundancy ha status' CLI command.

URIB-3-MTS_UNK_OPC Format: Received unknown MTS message on %s queue with opcode %d, dropping it. src SAP: %d dst SAP: %d

Explanation: URIB recieved an unknown message. The message is dropped

Recommended Action: No user action is required.

URIB-3-MTS_RECV Format: Error returned from mts_recv(%s), errno: %s

Explanation: An MTS API returned an error while URIB was receiving on an MTS queue.

Recommended Action: No user action is required.

URIB-3-MTS_DROP Format: Error returned from mts_drop(), error: %s

Explanation: An MTS API returned an error when URIB tried to drop a message.

Recommended Action: No user action is required.

URIB-3-MTS_SHORT_MSG_ERROR Format: Received short (%d \

Explanation: URIB recieved an unknown message. The message is dropped

Recommended Action: No user action is required.

URIB-3-MTS_NO_PAYLOAD_ERROR Format: Received MTS message with no payload on %s queue with opcode %d, dropping it. src SAP: %d dst SAP: %d

Explanation: URIB recieved an unknown message. The message is dropped

Recommended Action: No user action is required.

URIB-3-MTS_SIZE_ERROR Format: %s: incorrect %s message size from client %s: %d (should be %d)

Explanation: The size of a URIB message is incorrect for the type of message. The message is dropped.

Recommended Action: No user action is required.

URIB-3-MTS_NO_CLIENT_SAP Format: %s: client \%s\" has not provided a SAP for ack"

Explanation: A client registered with URIB, but did not provide a SAP for URIB to send reply messages to. This caused an unrecoverable error.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

URIB-3-MTS_REGISTER Format: "mts_register failed for urib: %s"

Explanation: URIB was unable to register client for URIB notifications, causing an unrecoverable error.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

URIB-3-MTS_DEREGISTER Format: "mts_deregister failed for urib: %s"

Explanation: URIB was unable to deregister client from URIB notifications, causing an unrecoverable error.

Recommended Action: Use the 'restart' CLI command to restart the feature and clear this issue.

VLAN_MGR Messages

VLAN_MGR-3-ERROR_MSG Format: %s

Explanation: VLAN manager error

Recommended Action: No action is required.

VLAN_MGR-4-WARN_MSG Format: %s

Explanation: VLAN manager warning

Recommended Action: No action is required.

VLAN_MGR-6-INFO_MSG Format: %s

Explanation: VLAN manager info

Recommended Action: No action is required.

VLAN_MGR-5-NOTIF_MSG Format: %s

Explanation: VLAN Manager Notification Message

Recommended Action: No action is required.

VLAN_MGR-2-CRITICAL_MSG Format: %s

Explanation: VLAN Manager Critical Message

Recommended Action: No action is required.

VLAN_MGR-6-VLAN_OPER_STATUS_CHG Format: VLAN %d, status changed to %s

Explanation: VLAN operational state change

Recommended Action: No action is required.

VLAN_MGR-6-VLAN_CREATED Format: VLAN %d, created

Explanation: VLAN created

Recommended Action: No action is required.

VLAN_MGR-6-VLAN_MGR_STATELESS_RESTART Format: VLAN Manager stateless restart

Explanation: VLAN Manager stateless restart

Recommended Action: No action is required.

VLAN_MGR-6-VLAN_MGR_STATEFULL_RESTART Format: VLAN Manager statefull restart

Explanation: VLAN Manager statefull restart

Recommended Action: No action is required.

VLAN_MGR-5-RESERVED_VLAN_RANGE_CHANGED Format: New Reserved VLAN Range Configured From VLAN %d to VLAN %d

Explanation: VLAN Manager Reserved VLAN Reconfiguration Message

Recommended Action: No action is required.

VNTAG_MGR Messages

VNTAG_MGR-5-VNTAG_MGR_GENERIC_SYSLOG Format: %s

Explanation: VNTag Manager Generic Syslog

Recommended Action: No action is required.

VNTAG_MGR-5-VNTAG_MGR_ENABLED Format: VNTag Manager Enabled

Explanation: VNTag Manager Service Enabled

Recommended Action: No action is required.

VNTAG_MGR-5-VNTAG_MGR_DISABLED Format: VNTag Manager Disabled

Explanation: VNTag Manager Service Disabled

Recommended Action: No action is required.

VNTAG_MGR-5-VNTAG_SEQ_ERROR Format: %s

Explanation: Some step in an event sequence has failed

Recommended Action: No action is required.

VNTAG_MGR-2-VNTAG_SEQ_TIMEOUT Format: %s

Explanation: Event sequence timeout

Recommended Action: No action is required.

VNTAG_MGR-2-VNTAG_DVIF_LIMIT_REACHED Format: %s

Explanation: Event DVIF Limit of 4k Reached

Recommended Action: No action is required.

interface_vlan Messages

SVI-5-UPDOWN Format: Line Protocol on Interface %s, changed state to %s

Explanation: Line protocol status changed for an interface

Recommended Action: No action is required.

SVI-5-IF_DOWN_ADMIN_DOWN Format: Interface %s is down(Administratively Down)

Explanation: Interface has been configured to be administratively down

Recommended Action: No action is required.

SVI-5-IF_DOWN_ERROR_DISABLED Format: Interface %s is down. Reason %d

Explanation: The interface encountered an error while configuring it

Recommended Action: No action is required.

SVI-5-IF_DOWN_INACTIVE Format: Interface %s is down (Inactive)

Explanation: Interface VLAN has been suspended or deleted

Recommended Action: No action is required.

SVI-5-SVI_INIT Format: SVI intialization failed with error 0x%x

Explanation: SVI initialziation error

Recommended Action: No action is required.

SVI-5-SVI_SDB_UPDATE_FAILED Format: sdb update failed with ret_val %d

Explanation: SDB updated failed for SVI

Recommended Action: No action is required.

SVI-5-SVI_MTS_SEND_FAILURE Format: MTS send failure for opcode %d, error 0x%x

Explanation: SVI encountered an error in with MTS message

Recommended Action: No action is required.

SVI-5-SVI_MTS_TIME_OUT Format: MTS send timed out

Explanation: SVI did not recieve response for mts message

Recommended Action: No action is required.

SVI-5-SVI_RSRVD_VLAN_FAILED Format: Failed to get list of reserved vlans 0x%x

Explanation: SVI failed to get the list reserved vlans

Recommended Action: No action is required.

SVI-4-SVI_VLAN_DOES_NOT_EXIST Format: Vlan %d does not exist

Explanation: Vlan not created before assignment

Recommended Action:

SVI-5-SVI_IOD_RELEASE_ERROR_RESPONSE Format: IM failed to release SVI IOD error 0x%x

Explanation: IM failed to release SVI IOD

Recommended Action: No action is required.

SVI-4-SVI_IF_CONFIG_DELETED_NOTIF_DELAYED_DROPPED Format: Interface VLAN Delete Notification Not Processed on Time by SAP %d (%s)

Explanation: This SAP took long time in processing Interface VLAN delete notification and caused timeout

Recommended Action: No action is required.

SVI-4-SVI_IF_CONFIG_REMOVED_NOTIF_DELAYED_DROPPED Format: Interface VLAN Remove Notification Not Processed on Time by SAP %d (%s)

Explanation: This SAP took long time in processing Interface VLAN remove notification and caused timeout

Recommended Action: No action is required.

Part I. ACI System Messages

- ACI System Messages Reference

- ACI F0x Messages

- ACI F1x Messages

- ACI F2x Messages

- ACI F3x Messages

- ACI F4x Messages

- ACI F5x Messages

- ACI F6x Messages

- ACI F8x Messages

- ACI F9x Messages

Chapter 3. ACI System Messages Reference

- ACI System Messages

ACI System Messages

This section lists basic information about the system messages generated by APIC and the ACI switches.

Tip

For investigating an ACI system message, refer to the "Researching a Fault" section of the Cisco APIC Faults, Events, and System Messages Management Guide (https://www.cisco.com/c/en/us/td/docs/switches/datacenter/aci/apic/sw/1-x/faults/guide/b_APIC_Faults_Errors.html. You can also find additional details about the faults or events that generate these system messages in the sources listed below.

- Cisco APIC System Faults and Messages Reference (https://www.cisco.com/c/dam/en/us/td/docs/Website/datacenter/syslogref/index.html) — An interactive Web-based lookup tool. Enter an APIC fault or event code to learn the cause, recommended action, affected object, severity, and other properties of the system message.

- Cisco APIC Faults, Events, and System Messages Management Guide (https://www.cisco.com/c/en/us/td/docs/switches/datacenter/aci/apic/sw/1-x/faults/guide/b_APIC_Faults_Errors.html) — Describes the sources, creation, lifecycle, and management of APIC faults, events, and system messages, and discusses how to research and handle faults and events.

- Cisco APIC Management Information Model Reference (https://developer.cisco.com/site/apic-mim-ref-api/) — A comprehensive Web-based reference listing all APIC object classes and properties, event types, fault types, and syslog messages. In the Navigation frame of this reference, select the Classes tab to view the properties of the affected object class for a fault or event. Select the Syslog Messages tab and the Syslog Faults link to view a list of faults by fault code. To view the faults by affected object or by the fault name, select the Faults tab.

This document is also embedded in the APIC GUI and can be accessed by clicking the "Help and Tools" icon in the main menu bar, then selecting Documentation > API Documentation.

Note

Fault messages whose names begin with ‘fsm’ are internal finite state machine (FSM) faults. These faults are raised when specific internal messages or tasks between APIC software components cannot be processed. FSM faults are rarely raised, and when they are, they are often transient (for example, if the system is temporarily busy). These tasks have built-in retries and will raise a fault only after multiple successive retry failures. After such a fault is raised, the retries continue and the fault may eventually be cleared. If an FSM fault persists, the recommended action is to contact Cisco TAC.

Chapter 4. ACI F0x Messages

- ACI F0* Commands

ACI F0* Commands

F0020: fltFabricSelectorIssuesConfig-failed

Severity: minor

Explanation: This fault occurs when a fabric selector (port selector, card selector, node selector etc.) is incorrectly configured.

Recommended Action: If you see this fault, take the following actions:

1. Look at the configuration for issues

2. For invalid-port, check the fabric port selector, it should have only fabric ports in it. Leaf host ports and fex host ports are not allowed to be configured using fabric port selector.

3. For port-configured-for-apic, check the fabric port selector. Port connected to the controller cannot be configured using fabric port selector.

4. For invalid-card, check the fabric card selector, its referring to a card which does not exist. Fault will clear once the card is added to the node.

5. For further details, refer to the documentation for fabric:SelectorIssues

6. Verify the fabric selector configuration is correct and complete

7. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F0021: fltAaaRadiusProviderRadiusProvider_Inoperable

Severity: minor

Explanation: This fault occurs when the Radius Provider is not operational.

Recommended Action: If you see this fault, take the following actions:

1. Verify the IP address and path to the Radius provider are still active and functioning.

2. Ensure the configuration on the Radius provider has not changed.

3. Verify that the Radius provider is still functioning properly

4. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F0022: fltAaaLdapProviderLdapProvider_Inoperable

Severity: minor

Explanation: This fault occurs when the LDAP provider is not operational.

Recommended Action: If you see this fault, take the following actions:

1. Verify the IP address and path to the LDAP provider are still active and functioning.

2. Ensure the configuration on the LDAP provider has not changed.

3. Verify that the LDAP provider is still functioning properly

4. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F0023: fltAaaTacacsPlusProviderTacacsPlusProvider_Inoperable

Severity: minor

Explanation: This fault occurs when the TACACS+ provider is not operational.

Recommended Action: If you see this fault, take the following actions:

1. Verify the IP address and path to the TACACS+ provider are still active and functioning.

2. Ensure the configuration on the TACACS+ provider has not changed.

3. Verify that the TACACS+ provider is still functioning properly

4. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F0048: fltStatsAExportJobIfc-export-failed

Severity: minor

Explanation: This fault occurs due to a Stats Export Policy session failure.

Recommended Action: If you see this fault, please check the Stats Export Policy configuration parameters and health of the destination export server.

F0051: fltDbgOdAggRsltTenantAtomicCounterExcessiveDrops

Severity: major

Explanation: This fault occurs when a significant number of packet drops are detected by a configured and enabled Atomic Counter

Recommended Action: If you see this fault, take the following actions:

1. Check the network configuration in the packet path where this Atomic Counter policy is configured.

2. Check for any CRC, etc errors in the packet path where this Atomic Counter policy is configured.

3. Check interface counters and rates in the packet path where this Atomic Counter policy is configured to make sure there is no oversubscription.

4. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F0052: fltDbgOdAggRsltTenantAtomicCounterExcessPackets

Severity: major

Explanation: This fault occurs when a significant number of excess packets are detected by a configured and enabled Atomic Counter

Recommended Action: If you see this fault, take the following actions:

1. Check the network configuration in the packet path where this Atomic Counter policy is configured.

2. Check interface counters and rates in the packet path where this Atomic Counter policy is configured to make sure there is no oversubscription.

3. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F0053: fltConfigJobConfigBackupFailed

Severity: minor

Explanation: This fault occurs when a configuration export/import job fails.

Recommended Action: If you see this fault, take the following actions:

1. Verify that the Controllers can reach the remote destination without issues and that the remote file is correct

2. Verify that the remote destination is healthy.

3. To clear this fault, you can acknowledge the job. In GUI:

1. Navigate to the Operational tab of the config policy

2. Select the failed job, and choose Delete from the Actions menu

4. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F0058: fltFirmwareDownloadDownloadFailed

Severity: major

Explanation: This fault occurs when a firmware download fails

Recommended Action: If you see this fault, take the following actions:

1. Verify the location where the firmware stored is reachable through scp/http request

2. Verify the directory and file location exist

3. Verify the source name has valid characters [a-z], [A-Z], [0-9], underscore(_), dash(-), period(.)

4. Verify the firmware file is valid

5. Verify the file has sufficient permissions

6. Free-up firmware repo by deleting any stale/old images.

7. Verify username/password authentication

8. Enclose the ip address within square brackets if specifying a v6 address. Otherwise, it will be considered as a hostname.

9. If the above actions did not resolve the issue, create a tech-support file and contact Cisco TAC.

F0080: fltDhcpProviderAddressAssignmentFailed

Severity: major

Explanation: This fault is raised when the DHCP server runs out of IP address to allocate to clients

Recommended Action: If you see this fault, take the following actions:

1. Decommission if there are any unused switches in the fabric.

2. If the above actions did not resolve the issue, collect a tech-support file and contact Cisco TAC.

F0098: fltStatsAExportJobSw-export-failed

Severity: minor

Explanation: This fault occurs due to a Stats Export Policy session failure.

Recommended Action: If you see this fault, please check the Stats Export Policy configuration parameters and health of the destination export server.

F0101: fltEqptStorageFailed

Severity: major

Explanation: This fault occurs when a storage device fails on a controller

Recommended Action: If you see this fault, take the following actions:

1. Create a tech-support file and contact Cisco TAC.

F0103: fltCnwPhysIfDown

Severity: major

Explanation: This fault occurs when a physical interface on a controller is in the link-down state.

Recommended Action: If you see this fault, take the following actions:

1. Verify that the physical port is properly connected to the peer device.

2. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F0104: fltCnwAggrIfDown

Severity: critical

Explanation: This fault occurs when a bond interface on a controller is in the link-down state.

Recommended Action: If you see this fault, take the following actions:

1. Verify that the physical ports that make up the bond are properly connected to the peer devices.

2. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F0105: fltMaintUpgJobUpgradeFailed

Severity: major

Explanation: This fault occurs when a software upgrade fails on a controller

Recommended Action: If you see this fault, take the following actions:

1. Make sure that the /firmware directory is not filled more than 75% before re-triggering the upgrade.

2. Verify that the NTP providers with which the APIC is synchronized is correctly configured and is reachable.

3. If Authentication using authkey is configured in NTP Server Check if all the keys given to APIC are correct. If not, redo the entire process starting with the NTP Provider.

4. If Authentication using authkey is configured in NTP Server Check if the client password given to APIC is correct. The client password is used when generating the IFF group keys. If not, redo the entire process starting with the NTP Provider.

5. Verify whether NTP daemon is running in the NTP Provider with which authentication has been established.

6. If the above actions did not resolve the issue, create a tech-support file and contact Cisco TAC.

F0106: fltCnwPhysIfPortOutofService

Severity: critical

Explanation: This fault occurs when a port is out-of-service because of a wiring error.

Recommended Action: If you see this fault, take the following actions:

1. Ensure the device connected to the port is the correct device.

2. Ensure the device connected to the port is configured properly for the fabric it is being connected to.

3. If the device being connected is being reprovisioned from another fabric, ensure that the config on that device has been factory reset

4. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F0111: fltFabricLooseNodeOperIssues

Severity: major

Explanation: This fault occurs when operational issues are detected on a LooseNode (Unmanaged switch)

Recommended Action: If you see this fault, take the following action:

1. Check and reestablish LooseNode connectivity to Leaf Node

2. If the above action did not resolve the issue, create a show tech-support file and contact Cisco TAC.

F0130: fltCompCtrlrConnectFailed

Severity: major

Explanation: This fault is raised when the VMM Controller is marked offline. Recovery is in process.

Recommended Action: If you see this fault repeatedly, take the following actions:

1. Verify that there is network connectivity to VMM Controller.

2. Verify that the user credentials to VMM Controller are correct.

3. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F0132: fltCompCtrlrOperationalIssues

Severity: major

Explanation: This fault is raised when Remote or External disruptive operations on VMM Controller are detected.

Recommended Action: If you see this fault, take the following actions:

1. Ensure all vCenter hosts are in connected state and online

2. Ensure at least one VM exists within the vCenter Inventory

3. Ensure there are no VMs in an 'Unreachable' state

4. Manually retrigger a VMM inventory sync by going to the VM networking -> Inventory -> Expand 'VMware' -> Expand Domain -> Expand 'Controllers' -> Right click on the controller and select "Trigger Inventory Sync"

5. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F0133: fltCompCtrlrUnsupportedOperation

Severity: major

Explanation: This fault is raised when deployment of given configuration fails for a Controller.

Recommended Action: If you see this fault, take the following actions:

1. Try to delete and add the policy again.

2. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F0134: fltHvsAdjConfigIssues

Severity: minor

Explanation: This fault is raised when LooseNode (Unmanaged switch) has config issues such as missing Management Address config.

Recommended Action: If you see this fault, take the following actions:

1. Configure Management Address address on LooseNode and ensure that LLDP or CDP is enabled to advertise Management Address

2. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F0135: fltCompEpPDUnsupportedOperation

Severity: major

Explanation: This fault is raised when remote or external disruptive EPG operations are performed on the Controller.

Recommended Action: If you see this fault, take the following actions:

1. Restore EPG to its original state on the Controller.

2. Detach and reattach the EPG to the VMM domain, or update its encapsulation value.

3. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F0214: fltOpflexODevOperationalIssues

Severity: major

Explanation: This fault is raised when there is an issue with respect to the OpFlex device

Recommended Action: If you see this fault, take the following actions:

1. Check the AEP configuration on the domain attached to this device. Make sure there are valid interfaces.

2. Check for any issues with the Port Channel/ VPC.

3. Check connectivity to the OpFlex device.

4. To restore, delete and re-add the OpFlex device.

5. Try restarting the device.

6. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F0256: fltCoopDomCoopDomInconsistentCfg

Severity: major

Explanation: This fault occurs when the coop domain has inconsistent configuration in the council

Recommended Action: To recover from this fault, try the following actions

1. Look at any configuration issues

2. Verify the configuration is correct/complete

F0299: fltBgpPeerEntryFailed

Severity: warning

Explanation: This fault occurs when the peer state is not established

Recommended Action: To recover from this fault, try the following actions

1. Look at any configuration issues

2. Verify the configuration is correct/complete

3. Check network connectivity to the peer

4. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F0309: fltInfraReplicaReplicaState

Severity: critical

Explanation: This fault occurs when a controller reports some data for service failed to initialize.

Recommended Action: If you see this fault, take the following actions:

1. Check cluster connectivity. All controllers need to be listed and reported as available. Check this by using the apic command show controller or by looking at System->Controller->First Controller->Cluster as Seen By Node

2. Ensure that the cluster configuration is stable. Make note of any any frequent and brief interruptions of cluster availability or prolonged unavailability.

3. If any controllers are missing from the cluster, check if those controllers are accessible via other means like ssh.

4. Check for other faults related to cluster health and availability by looking at System->Faults Count By Domain->Infra

5. If the above actions did not resolve the issue, create a tech-support file and contact Cisco TAC.

F0310: fltInfraReplicaCommitLogState

Severity: major

Explanation: This fault occurs when a controller reports some data for a service has been corrupted.

Recommended Action: If you see this fault, take the following actions:

1. Check for errors regarding the disks in the controller

2. Check the error logs on the controller to see if there is any additional information.

3. If the above actions did not resolve the issue, create a tech-support file and contact Cisco TAC.

F0317: fltInfraReplicaDatabaseState

Severity: major

Explanation: This fault occurs when a controller reports data in the internal datastore for a given service has been corrupted.

Recommended Action: If you see this fault, take the following actions:

1. Check for errors regarding the disks in the controller

2. Check the error logs on the controller to see if there is any additional information.

3. If the above actions did not resolve the issue, create a tech-support file and contact Cisco TAC.

F0320: fltVnsAL4L7ServiceFaultServiceMinorFault

Severity: minor

Explanation: This fault occurs when the L4-L7 service returns a minor fault

Recommended Action: If you see this fault, please refer to L4-L7 device vendor documentation.

F0321: fltInfraWiNodeHealth

Severity: critical

Explanation: This fault occurs when a controller reports the distributed internal database (data layer) of the controller cluster is not fully functional.

Recommended Action: If you see this fault, take the following actions:

1. Check cluster connectivity. All controllers need to be listed and reported as available.

2. Ensure that the cluster configuration is stable. Make note of any frequent and brief interruptions of cluster availability or prolonged unavailability.

3. If any controllers are missing from the cluster, check if those controllers are accessible via other means like ssh.

4. Check for other faults related to cluster health and availability by looking at System->Faults Count By Domain->infra

5. Check that all services are up and running on all controllers. You can look for faults with code F1419.

6. Check for any process crashes and cores.

7. If the above actions did not resolve the issue, create a tech-support file and contact Cisco TAC.

F0323: fltInfraServiceHealth

Severity: critical

Explanation: This fault occurs when a controller reports it has lost connectivity to the replica leader for one or more data subsets of specific service. The service cannot process request in this state.

Recommended Action: If you see this fault, take the following actions:

1. Check cluster connectivity. All controllers need to be listed and reported as available. Use the apic command show controller or by looking at System->Controllers->First Controller ->Cluster as Seen By Node.

2. Ensure that the cluster configuration is stable. Make note of any any frequent and brief interruptions of cluster availability or prolonged unavailability.

3. Check that the service in question is running on all controllers using System->Controllers->First Controller->Process.

4. Check for any process crashes and cores using System->Controllers APIC name->Troubleshooting.

5. If the above actions did not resolve the issue, create a tech-support file and contact Cisco TAC.

F0324: fltVnsAL4L7ServiceFaultServiceMajorFault

Severity: major

Explanation: This fault occurs when the L4-L7 service returns a major fault

Recommended Action: If you see this fault, please refer to L4-L7 device vendor documentation.

F0325: fltInfraLoNodeHealth

Severity: critical

Explanation: This fault occurs when a controller reports it has lost connectivity to the cluster replica leader for one or more data subsets for a service. The service cannot process requests in this state.

Recommended Action: If you see this fault, take the following actions:

1. Check cluster connectivity. All controllers need to be listed and reported as available using the apic command show controller or by looking at System->Controller ->First Controller-> Cluster as Seen By Node.

2. Ensure that the cluster configuration is stable. Make note of any any frequent and brief interruptions of cluster availability or prolonged unavailability.

3. Check that the service in question is running on all controllers using System->Controlers->First Controller ->Process.

4. Check for any process crashes and cores.

5. If the above actions did not resolve the issue, create a tech-support file and contact Cisco TAC.

F0329: fltVnsScriptRTInfoScriptRunTimeInfo

Severity: major

Explanation: This fault occurs when there is a failure in starting the service script

Recommended Action: If you see this fault, please contact L4-L7 device vendor.

F0330: fltVnsScriptRTInfoScriptFunctions

Severity: minor

Explanation: This fault occurs when there is missing function in device package

Recommended Action: If you see this fault, please contact L4-L7 device vendor for a more recent version of device package.

F0338: fltOspfInstInstMemAlertCritical

Severity: warning

Explanation: This fault occurs when the ospf instance memory alert is critical

Recommended Action: To recover from this fault, try the following actions

1. Look at any configuration issues

2. Verify the configuration is correct/complete

3. Reduce the number of ospf enabled interfaces

4. Reduce the number of routes into ospf

5. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F0341: fltDhcpClientIfIfOperStFailed

Severity: major

Explanation: This fault occurs when the operational state of the dhcp client interface changes to failed state

Recommended Action: To recover from this fault, try the following actions

1. Check the network connectivity between APIC controller and the node

2. Try rebooting the switch using CLI or GUI.

3. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F0344: fltIgmpsnoopInstIgmpSnoopLocalLearningDisabledFault

Severity: major

Explanation: This fault occurs when the igmp snooping local learning is disabled

Recommended Action: To recover from this fault, try the following actions

1. Reduce the number of multicast groups in the network behind the leaf node

2. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F0345: fltIgmpsnoopInstIgmpSnoopFabricearningDisabledFault

Severity: major

Explanation: This fault occurs when the igmp snooping fabric learning is disabled

Recommended Action: To recover from this fault, try the following actions

1. Reduce the number of multicast groups in the fabric

2. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F0350: fltLldpAdjEpAdjStMultipleNbrs

Severity: warning

Explanation: This fault occurs when multiple neighbors are discovered on the interface

Recommended Action: None set.

F0361: fltIsisFmcastTreeTreeLargeDia

Severity: warning

Explanation: This event occurs when the tree diameter of a Mcast tree is deemed large.

Recommended Action: None set.

F0377: fltIsisInstInstMemAlertCritical

Severity: warning

Explanation: This fault occurs when the isis instance memory alert is critical

Recommended Action: None set.

F0391: fltIsisIfInitError

Severity: major

Explanation: This fault usually occurs when ISIS interface specific initaliztion fails.

Recommended Action: If you see this fault, take the following actions:

1. Try shutting down and restarting the ISIS instance.

2. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F0394: fltIsisIfLvlProtocolError

Severity: major

Explanation: This fault usually occurs when ISIS interface specific protocol handling fails.

Recommended Action: If you see this fault, take the following actions:

1. Try shutting down and restarting the ISIS instance.

2. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F0397: fltAaaRadiusProviderRadiusProviderInoperable

Severity: minor

Explanation: This fault occurs when the Radius Provider is not operational.

Recommended Action: If you see this fault, take the following actions:

1. Verify the IP address and path to the Radius provider are still active and functioning.

2. Ensure the configuration on the Radius provider has not changed.

3. Verify that the Radius provider is still functioning properly

4. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F0398: fltAaaLdapProviderLdapProviderInoperable

Severity: minor

Explanation: This fault occurs when the LDAP provider is not operational.

Recommended Action: If you see this fault, take the following actions:

1. Verify the IP address and path to the LDAP provider are still active and functioning.

2. Ensure the configuration on the LDAP provider has not changed.

3. Verify that the LDAP provider is still functioning properly

4. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F0400: fltAaaTacacsPlusProviderTacacsPlusProviderInoperable

Severity: minor

Explanation: This fault occurs when the TACACS+ provider is not operational.

Recommended Action: If you see this fault, take the following actions:

1. Verify the IP address and path to the TACACS+ provider are still active and functioning.

2. Ensure the configuration on the TACACS+ provider has not changed.

3. Verify that the TACACS+ provider is still functioning properly

4. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F0401: fltEqptdiagSubjUnsupported

Severity: minor

Explanation: This fault occurs when a diagnostic test is not supported.

Recommended Action: None set.

F0402: fltEqptdiagSubjNotAccessible

Severity: minor

Explanation: This fault occurs when a diagnostic test subject is not accessible.

Recommended Action: None set.

F0403: fltEqptdiagOnDSubjUnsupported

Severity: minor

Explanation: This fault occurs when a on-demand diagnostic test is not supported.

Recommended Action: None set.

F0404: fltEqptdiagOnDSubjNotAccessible

Severity: minor

Explanation: This fault occurs when a on-demand diagnostic test subject is not accessible.

Recommended Action: None set.

F0411: fltEqptPsuFailed

Severity: minor

Explanation: This fault occurs when psu is failed

Recommended Action: To recover from this fault, try the following actions

1. Replace the power supply unit

2. If the above actions did not resolve the issue, create a show tech-support file and contact Cisco TAC

F0412: fltEqptPsuFanFailed

Severity: minor

Explanation: This fault occurs when the fan in the psu is failed

Recommended Action: To recover from this fault, try the following actions

1. Replace the power supply unit

2. If the above actions did not resolve the issue, create a show tech-support file and contact Cisco TAC

F0413: fltEqptPsuSlotPsuMissing

Severity: minor

Explanation: This fault occurs when the the psu is missing

Recommended Action: To recover from this fault, try the following actions

1. Connect power supply unit

2. If the above actions did not resolve the issue, create a show tech-support file and contact Cisco TAC

F0415: fltEqptCardMismatchSlot

Severity: major

Explanation: This fault typically occurs when the SUP is inserted in the wrong slot

Recommended Action: To recover from this fault, try the following actions

1. Insert the SUP in the correct slot

2. If the above actions did not resolve the issue, create a show tech-support file and contact Cisco TAC

F0416: fltEqptCardUnknownSwId

Severity: major

Explanation: This fault typically occurs when a card with an unknown card id is inserted in the chassis

Recommended Action: To recover from this fault, try the following actions

1. Remove the card from the chassis

2. Fix the software card index to one of the known types

3. If the above actions did not resolve the issue, create a show tech-support file and contact Cisco TAC

F0418: fltVzAnyConfigurationFailed

Severity: minor

Explanation: This fault occurs when a Contract, with a scope set as something other than Context, is added to an 'EPG Collection for Context' in a Private Network

Recommended Action: If you see this fault, take the following actions:

1. Look at each Contract associated to the Private Network's 'EPG Collection for Context'

2. Verify that all of these Contracts have a scope of "Context"

3. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F0440: fltEqptSpromSpromFailed

Severity: major

Explanation: This fault usually occurs if the backplane sprom is corrupted

Recommended Action: If you see this fault, take the following actions:

1. Fix the sprom contents

2. If the above actions did not resolve the issue, create a show tech-support file and contact Cisco TAC.

F0441: fltEqptSpromBPBadIDPROM

Severity: major

Explanation: This fault would occur if the backplane IDPROM contents become invalid or corrupted

Recommended Action: If you see this fault, take the following actions:

1. Create a show tech-support file and contact Cisco TAC.

F0449: fltEqptSensorFailed

Severity: major

Explanation: This fault usually occurs if sensor fails

Recommended Action: If you see this fault, take the following actions:

1. replace the component that has failed

2. If the above actions did not resolve the issue, create a show tech-support file and contact Cisco TAC.

F0454: fltLldpIfPortOutofService

Severity: major

Explanation: This fault occurs when a port is out-of-service because of a wiring error.

Recommended Action: If you see this fault, take the following actions:

1. Ensure the device connected to the port is the correct device.

2. Ensure the device connected to the port is configured properly for the fabric it is being connected to.

3. If the device being connected is being reprovisioned from another fabric, ensure that the config on that device has been factory reset

4. If above actions did not resolve the issue, create a tech-support file and contact Cisco TAC.

F0467: fltFvNwIssuesConfig-failed

Severity: minor

Explanation: This fault occurs when an End Point Group / End Point Security Group is incompletely or incorrectly configured.

Recommended Action: If you see this fault, take the following actions:

1. Look at the configuration for issues

2. For bd-not-present, this could be a temporary issue when the bridge domain has not yet been deployed to the node. If the EPG is associated with the default bridge domain, check the Connectivity Instrumentation Policy

3. For context-not-present, this could be a temporary issue while the VRF has not yet been deployed to the node. If the EPG is associated with the default VRF, check the Connectivity Instrumentation Policy under Networking / Protocol Policies in common tenant

4. For vlan-capacity, check that the number of configured EPGs and bridge domains deployed on a node do not exceed the supported number

5. For vxlan-capacity, check that the number of configured EPGs, bridge domains and VRFs deployed on a node do not exceed the supported number

6. For invalid-path, check that the configured path exists and is valid. Following issues are possible: The path (i.e. port/port-channel/Attachable-Profile/Loose-Node) getting referred does not exist on the node. The domain associated with the EPG is not allowed to use the specified path. Check the Attachable Profile configuration associated with the domain. The path (i.e. port/port-channel/Attachable-Profile/Loose-Node) is deployed on FEX and is part of l2Out/l3Out. l2Out and l3Out are NOT supported on FEX. L3Dom associated with the L3out does not exist. Configure a valid L3 Domain and associate it with the L3Out

7. For port-part-of-port-channel, the configured interface is already configured as a port channel member

8. For port-configured-as-l3, the configured interface is already configured as L3

9. For port-configured-as-l2, the configured interface is referring to an interface that is already configured as L2

10. For port-configured-for-fex, the configured interface is already configured for attaching to a FEX

11. For port-configured-for-apic, the configured interface is connected to a controller

12. For port-channel-capacity, check that the number of configured port channels deployed on a node do not exceed the supported number

13. For native-or-untagged-encap-failure, multiple encaps are configured as native or untagged on the same path. Check the configured mode type

14. For multiple-external-encap, a bridge domain can be extended outside the fabric using only one external encap per node

15. For multiple-ctx-configuration, an L3 interface can belong to only 1 VRF at a time

16. For encap-already-in-use, another EPG is already configured using this encap

17. For invalid-vlan :

1. This EPG's encap may not be valid for the domain on which the EPG is configured

2. Check Fabric -> Acccess Policies -> Switches -> Leaf Switches -> Profile -> has a leaf profile defined with required node where config is deployed.

3. Check leaf-profile is associated with interface selector with target profile.

4. Check whether Fabric -> Access Policies -> Interface -> Leaf Interfaces -> Profiles has interface profile configured with required port and associated to leaf interface policy group.

5. Check configured leaf interface policy-group in Fabric -> Access Policies -> Interface -> Leaf Interfaces -> Policy Groups has ?Attached Entity Profile? configured.

6. Attached Entity profile should have domain configured with vlan-pool contains deployed vlan.

18. For insufficient vlan, check the sum of number of EPG and number of BD applied on switch which should not exceed the capapcity of ToR. Check scalability guide.

19. For path-wiring-issues, the configured interface has wiring issues

20. For router-id-conflict ensure that same router ID is used for node in the VRF. Also ensure that node specified under "Logical interface profile" has been added to "Logical node profile".

21. For port configured as q-in-q tunnel originator/terminator, Configure Leaf Interface Profile with policy-group enabled with “L2 Interface policy” with edgeport turned-on. And also make sure to create Switch Association with Associated Interface Selector Profiles

22. For further details, refer to the documentation for fv:NwIssues

23. Verify the End Point Group configuration is correct and complete

24. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F0468: fltFvCtxConfigIssuesConfig-failed

Severity: minor

Explanation: This fault occurs when a given Ctx configured to use a DNS Profile which doesn't configured In Fabric or when BGP RouteTarget Profiles are not configured for Ctx associated to SR-MPLS L3Out.

Recommended Action: If you see this fault, take the following actions:

1. For dns-policy-not-present issue: Check the Configuration and make sure that DNS Profile consumed by Ctx is defined in fabric. Only DNS Profiles configured for fabric can be used.

2. For bgp-route-target-profile-not-present issue: Check the Configuration and make sure that BGP RouteTarget Profiles are configured for Ctx associated to SR-MPLS L3Out.

3. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F0469: fltFvBDConfigIssuesConfig-failed

Severity: minor

Explanation: This fault occurs when there is one or more duplicate Subnets defined for BDs or/and AEpGs associated with the Ctx.

Recommended Action: If you see this fault, take the following actions:

1. For duplicate-subnets-within-ctx issue: Find the Ctx that this BD is associated with and find all other BDs associated with the Ctx, Find all the AEpGs associated with BDs found in previous step, Verify that there is no single subnets configured for AEpGs and BDs associated with Ctx.

2. For dhcp-policy-not-present issue: Check the Configuration and make sure that DHCP Pelay Profile consumed by BD is defined in Tenant.

3. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F0471: fltEqptAsicAsicFailed

Severity: major

Explanation: This fault occurs when an ASIC on a card sees a fatal failure during runtime

Recommended Action: If a card is found in a fail state, collect the show techsupport command output on the switch and contact Cisco TAC to eliminate any known software issues before replacing the hardware.

F0474: fltTunnelIfHwProgFail

Severity: major

Explanation: This fault occurs when tunnel manager fails to create a tunnel due to hardware failure.

Recommended Action: To correct this fault, please attempt to create the tunnel again.

F0475: fltTunnelIfDestUnreach

Severity: major

Explanation: This fault occurs when destination becomes unreachable.

Recommended Action: To correct this fault, please ensure that the destination is reachable.

F0482: fltTunnelIfDestIPUnres

Severity: major

Explanation: This fault occurs when destination IP address is unresolved.

Recommended Action: To correct this fault, please ensure that the destination IP address is resolved./>

F0507: fltVpcDomFabricLinksDown

Severity: major

Explanation: This fault occurs when vpc domain bringup fails due to all fabric links being down.

Recommended Action: Please verify fabric connectivity of the switch.

F0508: fltVpcDomPeerRouteDown

Severity: major

Explanation: This fault occurs when vpc domain bringup fails because there is no route to peer.

Recommended Action: Please verify peer configuration and fabric connectivity.

F0509: fltVpcDomPeerUnrch

Severity: major

Explanation: This fault occurs when vpc domain bringup fails due to peer being unreachable.

Recommended Action:

F0510: fltVpcDomDomCompatFail

Severity: major

Explanation: This fault occurs when vpc domain bringup fails due to domain compatibility failure.

Recommended Action: Please verify domain configuration and hardware compatibility of both the peers.

F0511: fltVpcDomElectionErr

Severity: major

Explanation: This fault occurs when vpc domain bringup fails due to election error.

Recommended Action: Please make sure that domain configuration is consistent with the peer.

F0512: fltVpcDomOobNotUp

Severity: major

Explanation: This fault occurs when vpc domain bringup fails due to keepalive being inoperational.

Recommended Action: Please verify keepalive configuration on both the peers.

F0513: fltVpcDomGlobalCompatFail

Severity: major

Explanation: This fault occurs when global configuration on the peers is not consistent.

Recommended Action: Please make sure that global configuration is consistent with the peer.

F0518: fltVpcIfIfCompatFail

Severity: major

Explanation: This fault occurs when vPC configuration on the peers is not consistent.

Recommended Action: Please make sure that the vPC configuration is consistent with the peer.

F0520: fltVpcKeepaliveKeepaliveSendFail

Severity: critical

Explanation: This event occurs when vPC peer keep-alive send has failed.

Recommended Action: Please check if there is an issue with l3 traffic between the peers.

F0522: fltVpcKeepaliveKeepaliveRecvFail

Severity: critical

Explanation: This event occurs when peer keep-alive receive has failed.

Recommended Action:

F0523: fltFvATgConfigurationFailed

Severity: minor

Explanation: This fault occurs when an End Point Group / End Point Security Group is incompletely or incorrectly configured.

Recommended Action: If you see this fault, take the following actions:

1. Look at the configuration for issues

2. Verify the End Point Group configuration is correct and complete

3. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F0524: fltFvStCEpConfigurationFailed

Severity: minor

Explanation: This fault occurs when a Static Endpoint (fvStCEp) is not correctly configured.

Recommended Action: If you see this fault, take the following actions:

1. Specify on which path the static endpoint is present

2. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F0532: fltEthpmIfPortDownInfraEpg

Severity: critical

Explanation: This fault occurs when a port is down and is in use for epg

Recommended Action: If you see this fault, take the following actions

1. Check the port connectivity

2. Remove the configuration or administratively shut the port if the port is not in use

3. To remove the static port configuration from EPG go to Tenant->ApplicationProfile->ApplicationEPG->Static Ports and remove the affected port if not being used.

4. For mcp-loop-err-disable, this could be due to a loop in the network. Check the config to resolve any loops

5. For lacp suspended ports, check for following issues -

1. Check whether peer device supports lacp or not.

2. Enable LACP feature in peer device, if peer device requires explicit global configuration.

3. Check vlan range configured part of member interface and port-channel configurations matches.

4. Check whether peer physical interface is added to port-channel as member interface.

5. Check whether lacp is configured on member interface of peer device.

6. If peer switch is of Cisco's, issue "show lacp counters" and verify interfaces of peer device are sending LACP PDU.

7. Using the "show etherchannel summary"/"show port-channel summary" command, ensure that the port-channel shows the S (Layer-2) and U (in use) flags, and that both the interfaces appear in the ports column with the P (bundled) flag.

8. If peer switch or router is not manufactured by Cisco, Please contact customer support of peer device's manufacturer for not sending lacp or recommended configuration guidelines.

6. For reason of suspend(connected) port, check whether VPC domain is configured in GUI Fabric-> External Access/Access Policies ->Virtual Port Channel defaul to tie two switches part of VPC domain if intent is to make two switches part of VPC.

7. If the above actions did not resolve the issue, create a tech-support file and contact Cisco TAC.

F0543: fltEthpmIfPortDownInfraNoEpg

Severity: major

Explanation: This fault occurs when a port is down and is in use for infra and no epg

Recommended Action: If you see this fault, take the following actions

1. Check the port connectivity

2. Remove the configuration or administratively shut the port if the port is not in use

3. For mcp-loop-err-disable, this could be due to a loop in the network. Check the config to resolve any loops

4. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F0546: fltEthpmIfPortDownNoInfra

Severity: warning

Explanation: This fault occurs when a port goes down

Recommended Action: If you see this fault, take the following actions

1. Check the port connectivity

2. Administratively shut the port if the port is not in use

3. For mcp-loop-err-disable, this could be due to a loop in the network. Check the config to resolve any loops

4. For bpdu-guard-err-disable, Check configuration of peer device connected to Top of Rack Switch where peer device is sending BPDU to Top of Rack switch's interface and interfaces were configured with BPDU guard makes interface to go into err-disabled as intended

5. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F0564: fltVmmCtrlrPConfigFailed

Severity: minor

Explanation: This fault is raised when the VMM Controller cannot be deployed due to a missing or invalid configuration.

Recommended Action: If you see this fault, take the following actions:

1. Verify that the policy for the VMM Controller is complete.

2. Review the fault message and add missing or remove invalid configuration.

3. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F0565: fltVmmEpPDDeployFailed

Severity: major

Explanation: This fault is raised when the Endpoint Group cannot be deployed due to a missing or invalid configuration.

Recommended Action: If you see this fault, take the following actions:

1. Verify that a VLAN pool is associated to the VMM Domain.

2. If a Port Encap value is specified in the Endpoint Group-to-VMM association, verify that this value is a VLAN encap and it is part of an encapsulation block with static allocation mode in the VLAN pool. VXLAN Port Encap is not supported.

3. Disable EPG isolation if the EPG is associated with a VMware Domain in AVS mode, or a Microsoft(SCVMM) Domain.

4. Review the fault message and add missing or remove invalid configuration.

5. Check whether required encap blocks are configured in pool.

6. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F0600: fltPcAggrMbrIfPortSuspended

Severity: major

Explanation: This fault occurs when port has been suspended.

Recommended Action: Please verify the configuration on both ends of the port-channel.

F0603: fltPcAggrMbrIfPortIndividual

Severity: minor

Explanation: This fault occurs when port becomes operationally individual.

Recommended Action: Please verify the configuration on both ends of the port-channel.

F0618: fltMgmtNodeDefMgmtAddressNotAllocated

Severity: minor

Explanation: This fault occurs when a management node address is not allocated to a node.

Recommended Action: If you see this fault, take the following actions:

1. Create a node management address policy for the node.

2. Ensure that there are no other faults related to the node management address policy.

3. If above actions did not resolve the issue, create a tech-support file and contact Cisco TAC.

F0650: fltTraceroutepRsTrEpSrcMissingSrcIp

Severity: warning

Explanation: This fault occurs when the source Endpoint IP address that the traceroute policy is configured to run with is not found in the fabric.

Recommended Action: If you see this fault, take the following actions:

1. Verify that the configured source Endpoint IP address in the Traceroute Policy exists in the fabric and is correct

2. Review the fault message and add missing or remove invalid configuration

3. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F0657: fltTraceroutepRsTrEpDstMissingDestIp

Severity: warning

Explanation: This fault occurs when the destination Endpoint IP address that the traceroute policy is configured to run with is not found in the fabric.

Recommended Action: If you see this fault, take the following actions:

1. Verify that the configured destination Endpoint IP address in the Traceroute Policy exists in the fabric and is correct

2. Review the fault message and add missing or remove invalid configuration

3. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F0699: fltInfraHostCfgConfigurationFailed

Severity: minor

Explanation: : All policies associated with the configured Fex/Port Policy Group should get deployed to all nodes associated with the configured Fex/Port Selector Profiles for the Node Profile. A Fault has been raised because the associated policies have not been deployed to the configured node.

Recommended Action: : If you see this fault take the following actions: - Verify that configured node is ready to receive policies - Verify that configured node is capable of handling the associated access Fex/Port level policies - If the listed recommendations do not resolve the issue, collect tech-support file and contact Cisco TAC.

F0701: fltInfraADomPConfigFailed

Severity: minor

Explanation: Infra Policy fault is raised when the configured Domain cannot be deployed due to a missing or invalid configuration.

Recommended Action: If you see this fault, take the following actions:

1. Review the fault message to identify configuration issue.

2. Modify configuration to add any missing parameters.

3. Modify configuration to remove any invalid configuration parameters.

4. If the listed recommendations do not resolve the issue, collect tech-support file and contact Cisco TAC.

F0721: fltFvnsAInstPConfigFailed

Severity: minor

Explanation: This fault is raised when a VLAN/VxLAN/NVGRE pool cannot be deployed due to a missing or invalid configuration.

Recommended Action: If you see this fault, take the following actions:

1. Review the fault message and correct the invalid configuration.

2. If the above actions did not resolve the issue, collect a tech-support file and contact Cisco TAC.

F0749: fltFabricProtGEpConfigurationFailed

Severity: warning

Explanation: This fault occurs when a virtual Port Channel (vPC) policy is created but it has not been deployed yet (for example in a pre-provisioning scenario) and at least one of the following are conditions true:

1. At least one of the fabric nodes that is part of the vPC is not ready

2. The IP address for at least one of the fabric nodes is unknown

3. One of the fabric nodes that is part of the vPC pair is already paired with another node (each node can only be part of one vPC pair)

4. One of the fabric nodes is not a leaf (vPC pairs can only be formed between two leafs)

5. The Virtual Ip address has been not allocated yet

6. The Logical Pair Id has not been allocated yet

7. Nodes are not in same POD

Recommended Action: If you see this fault, take the following actions:

1. Verify that corresponding fabric nodes are ready

2. Verify that corresponding fabric nodes are ready

3. Verify that corresponding fabric nodes are leaf

4. Verify that the fabric node is not already part of another protection group

5. In case of fabricExplicitGEp, verify that the pair id is set

6. If the above actions did not resolve the issue, create a tech-support file and contact Cisco TAC.

F0750: fltFabricProtGEpOperStateChange

Severity: minor

Explanation: This fault is occurs when a vPC policy has been deployed to a fabric node, then at least one of the following conditions is true:

1. One of the fabric nodes that is part of the vPC is not ready

2. The fabric node ip address is not known

3. One of the fabric nodes is not a leaf (vPC pairs can only be formed between two leafs)

Recommended Action: If you see this fault, take the following actions:

1. Verify that corresponding fabric nodes are ready

2. Verify that corresponding fabric nodes are leafs

3. Verify that the fabric node is not already part of another protection group

4. If the above actions did not resolve the issue, create a tech-support file and contact Cisco TAC.

F0751: fltFabricProtGEpOperStateFail

Severity: critical

Explanation: This fault occurs when a virtual Port Channel (vPC) policy is no longer deployed because both of the member fabric nodes that are part of the vPC pair are not ready to receive policies

Recommended Action: If you see this fault, take the following actions:

1. Verify that the corresponding fabric nodes are ready to receive policies by checking Fabric->Inventory->Fabric Membership->Leaf Node Status to be Active.

2. Verify that the corresponding fabric nodes are leafs by checking the Fabric->Inventory->Fabric Membership->Role .

3. If the above actions did not resolve the issue, create a tech-support file and contact Cisco TAC.

F0756: fltPolNToRefMismatchTarget

Severity: minor

Explanation: This fault occurs when a configured target of a named relationship cannot be resolved.

Recommended Action: If you see this fault, take the following actions:

1. Verify that the configuration for the named target is correct and complete, and that it exists

2. Verify the configuration for the specific relationship is correct and complete.

3. If the above actions did not resolve the issue, create a tech-support file and contact Cisco TAC.

F0757: fltVnsAbsGraphValidationFailed

Severity: minor

Explanation: This fault occurs due to an invalid service graph configuration.

Recommended Action: If you see this fault, please modify service graph configuration to fix validation errors.

F0758: fltVnsGraphInstRenderingFailed

Severity: minor

Explanation: This fault occurs when a service graph could not be instantiated.

Recommended Action: If you see this fault, take the following actions:

1. Look at the graph configuration for issues

2. For missing-lif, check for fault on LDev or check LDev specified in LDevCtx

3. For function-type-mismatch-failure, check for valid MFunc in the MDev for selected LDev

4. For missing-ldev-ctx, check if LDevCtx is defined under tenant, or check if LDev associated with LDevCtx has proper MDev specified.

5. For missing-lif, check that matching LIF for func connector exists

6. For invalid-filter-referred-by-rsconntoflt, check AbsFuncConn to filter relation is formed

7. For missing-l3ctx, check that RsConnToCtxTerm points to valid tDn

8. For param-cardinality-error, check that configuration parameter has valid cardinality, Graph param/rel can only have at most one instance

9. For invalid-abstract-graph-config-param, check that all abstract graph configurations are valid

10. For param-validation-failed, check that all specified params are valid

11. For invalid-param-scope, check that RsScopeToTerm is configured and is pointing to valid terminal or terminal node. Or check that there is no missing default RsScopeToTerm in AbsConfig

12. For invalid-conn-for-configparam, check that RsCfgToConn is configured in AbsConn and is pointing to a valid connector

13. For invalid-rsmconnatt, check for valid RsMConn in AbsConn

14. For missing-mandatory-param, check that all mandatory graph params and graph relations exist

15. For invalid-relation-target, fix the incorrect service folder/param name

F0759: fltVnsNodeInstNodeRenderingFailed

Severity: minor

Explanation: This fault occurs when a service graph could not be instantiated.

Recommended Action: If you see this fault, please modify graph configuration to resolve cause of fault.

F0760: fltVnsTermNodeInstNodeRenderingFailed

Severity: minor

Explanation: This fault occurs when a service graph could not be instantiated.

Recommended Action: If you see this fault, please modify graph configuration to resolve cause of fault.

F0761: fltVnsGParamResolutionFailed

Severity: minor

Explanation: This fault occurs when a cfg parameter has an error..

Recommended Action: If you see this fault, please modify your configuration to provide all needed parameters and folders.

F0762: fltVnsAbsFolderResolutionFailed

Severity: minor

Explanation: This fault occurs when a cfg parameter has an error..

Recommended Action: If you see this fault, please modify your configuration to update service graph config parameters and folders.

F0763: fltVnsAbsParamResolutionFailed

Severity: minor

Explanation: This fault occurs when a cfg parameter has an error..

Recommended Action: If you see this fault, please modify your configuration to update service graph config parameters and folders.

F0764: fltVnsALDevConfMismatch

Severity: minor

Explanation: This fault occurs when a logical device is being configured in a way which is not compatible with the meta device information supplied by the device package.

Recommended Action: If you see this fault, please modify LDev configuration to resolve cause of fault.

F0765: fltVnsCDevConfMismatch

Severity: minor

Explanation: This fault occurs when a user provided Concrete device configuration is invalid. The config issues indicate the exact reason for the error.

Recommended Action: If you see this fault, please modify CDev configuration to resolve cause of fault.

F0766: fltVnsGFolderResolutionFailed

Severity: minor

Explanation: This fault occurs when a config folder has an error. The config issues indicate the exact reason for the error.

Recommended Action: If you see this fault, please modify configuration of the folder to resolve the cause of fault.

F0768: fltVnsGRelResolutionFailed

Severity: minor

Explanation: This fault occurs when a config GRel has an an error. The config issues indicate the exact reason for the error.

Recommended Action: If you see this fault, please modify configuration of the GRel to resolve the cause of fault.

F0769: fltVnsFuncConnInstValidationFailed

Severity: minor

Explanation: This fault occurs when a Function Connector (FuncConnInst) has an error.The config issues the exact reason for the error.

Recommended Action: If you see this fault, please modify configuration to resolve the cause of fault.

F0770: fltVnsTermConnInstValidationFailed

Severity: minor

Explanation: This fault occurs when a Terminal Connector (TermConnInst) has an error.The config issues the exact reason for the error.

Recommended Action: If you see this fault, please modify configuration to resolve the cause of fault.

F0771: fltVnsConnectionInstValidationFailed

Severity: minor

Explanation: This fault occurs when a Connection Inst (ConnectionInst) has an error.The config issues the exact reason for the error.

Recommended Action: If you see this fault, please modify your configuration to resolve the cause of fault.

F0772: fltVnsALIfValidationFailed

Severity: minor

Explanation: This fault occurs when a Logical Interface configuration is invalid.The config issues the exact reason for the error.

Recommended Action: If you see this fault, please modify configuration to resolve the cause of fault.

F0843: fltSyntheticATestObjPm-atest

Severity: critical

Explanation: This fault is for testing purpose. It is to test if EM framework can raise and clear fault correclty.

Recommended Action: This fault will not be raised on customer or QA test bed:

1. This fault is for testing purpose. It is to test if EM framework can raise and clear fault correclty.

F0844: fltSyntheticTLTestObjPm-tltest

Severity: minor

Explanation: This fault is for testing purpose. It is to test if EM framework can raise and clear fault correclty.

Recommended Action: This fault will not be raised on customer or QA test bed:

1. This fault is for testing purpose. It is to test if EM framework can raise and clear fault correclty.

F0845: fltSyntheticCTestObjPm-ctest

Severity: major

Explanation: This fault is for testing purpose. It is to test if EM framework can raise and clear fault correclty.

Recommended Action: This fault will not be raised on customer or QA test bed:

1. This fault is for testing purpose. It is to test if EM framework can raise and clear fault correclty.

F0846: fltSyntheticATestObjPe-atest

Severity: critical

Explanation: This fault is for testing purpose. It is to test if EM framework can raise and clear fault correclty.

Recommended Action: This fault will not be raised on customer or QA test bed:

1. This fault is for testing purpose. It is to test if EM framework can raise and clear fault correclty.

F0847: fltSyntheticTLTestObjPe-tltest

Severity: minor

Explanation: This fault is for testing purpose. It is to test if EM framework can raise and clear fault correclty.

Recommended Action: This fault will not be raised on customer or QA test bed:

1. This fault is for testing purpose. It is to test if EM framework can raise and clear fault correclty.

F0848: fltSyntheticCTestObjPe-ctest

Severity: major

Explanation: This fault is for testing purpose. It is to test if EM framework can raise and clear fault correclty.

Recommended Action: This fault will not be raised on customer or QA test bed:

1. This fault is for testing purpose. It is to test if EM framework can raise and clear fault correclty.

F0849: fltInfraSelectorIssuesConfig-failed

Severity: minor

Explanation: This fault occurs when a infra selector (port selector, card selector, node selector etc.) is incorrectly configured.

Recommended Action: If you see this fault, take the following actions:

1. Look at the configuration for issues

2. For invalid-port, check the infra port selector, it should have only leaf host ports or fex host ports. Fabric ports are not allowed to be configured using infra port selector.

3. For port-configured-for-apic, check the infra port selector and the associated policies. Port connected to the controller can be configured for limited policies. Its allowed to be associated with only infra::AccPortGrp.

4. For invalid-card, check the infra card selector, its referring to a card which does not exist. Fault will clear once the card is added to the node.

5. For further details, refer to the documentation for fabric:SelectorIssues

6. Verify the infra selector configuration is correct and complete

7. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F0853: fltBgpRsPeerPfxPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0854: fltCallhomeRsInvSchedulerResolveFail

Severity: warning

Explanation: This fault is raised when the inventory policy refers to a scheduler that does not exist.

Recommended Action: Check that the name of the scheduler is spelled correctly or create it if it doesn't exist.

F0855: fltCallhomeRsDestGroupRelResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0856: fltCallhomeRsDestGroupResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0857: fltCallhomeRsQueryGroupRelResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0859: fltConditionRsNodeAaaRecRetPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0860: fltConditionRsNodeEventRecRetPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0861: fltConditionRsNodeFaultRecRetPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0862: fltConditionRsNodeHealthRecRetPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0864: fltConfigRsExportSchedulerResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0865: fltConfigRsImportSourceResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0866: fltDatetimeRsNtpProvToNtpAuthKeyResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0867: fltDbgacRsToEpForEpToEpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0868: fltDbgacRsFromEpForEpToEpgResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0869: fltDbgacRsToLDevForEpToExtResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0870: fltDbgacRsToEpForEpgToEpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0871: fltDbgacRsToEpgForEpgToEpgResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0872: fltDbgacRsToLDevForEpgToIpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0873: fltDbgacRsFromLDevForExtToEpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0874: fltDbgacRsFromEpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0875: fltDbgacRsFromEpgResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0876: fltDbgacRsFromLDevForIpToEpgResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0878: fltDbgacRsToEpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0879: fltDbgacRsToEpgResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0880: fltDbgexpRsUserCtxResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0881: fltDbgexpRsDataResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0882: fltDbgexpRsExportDestResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0883: fltDbgexpRsTSSchedulerResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0885: fltDhcpRsDhcpOptionPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0886: fltDhcpRsRelayPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0887: fltDhcpRsProvResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0888: fltPolRsFirmwareRepoPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0889: fltDnsRsDnsProfileResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0897: fltFabricRsMonModuleFabricPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0898: fltFabricRsCallhomeInvPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0899: fltFabricRsMonInstFabricPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0900: fltFabricRsNodeCorePResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0901: fltFabricRsNodeTechSupPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0902: fltFabricRsPsuInstPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0903: fltFabricRsMonIfFabricPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0904: fltFabricRsApplCorePResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0905: fltFabricRsApplMonPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0906: fltFabricRsApplTechSupPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0907: fltFabricRsCtrlrPGrpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0909: fltFabricRsLePortPGrpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0913: fltFabricRsLeCardPGrpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0916: fltFabricRsLeCardPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0917: fltFabricRsLePortPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0918: fltFabricRsLeNodePGrpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0919: fltFabricRsCommPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0920: fltFabricRsTimePolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0921: fltFabricRsPodPGrpBGPRRPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0922: fltFabricRsPodPGrpCoopPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0923: fltFabricRsPodPGrpIsisDomPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0924: fltFabricRsSnmpPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0925: fltFabricRsPodPGrpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0926: fltFabricRsVpcInstPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0927: fltFabricRsSpPortPGrpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0940: fltFabricRsSpCardPGrpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0943: fltFabricRsSpCardPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0944: fltFabricRsSpPortPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0945: fltFabricRsSpNodePGrpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0946: fltFirmwareRsFwgrppResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0947: fltFvRsBDToOutResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0948: fltFvRsBDToProfileResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0949: fltFvRsBDToRelayPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0950: fltFvRsBdFloodToResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0951: fltFvRsBdToEpRetResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0952: fltFvRsCtxResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0953: fltFvRsIgmpsnResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0954: fltFvRsABDPolMonPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0955: fltFvRsBdResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0956: fltFvRsDomAttResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0957: fltFvRsAEPgMonPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0959: fltFvRsApMonPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0960: fltFvRsBgpCtxPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0963: fltFvRsCtxToEpRetResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0964: fltFvRsOspfCtxPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0965: fltFvRsCtxMonPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0966: fltFvRsDomDefNsLocalResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0967: fltFvRsConsResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0970: fltFvRsConsIfResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0971: fltFvRsCustQosPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0973: fltFvRsProtByResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0974: fltFvRsProvResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0976: fltFvRsBDSubnetToOutResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0977: fltFvRsBDSubnetToProfileResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0978: fltFvRsTnDenyRuleResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0979: fltFvRsTenantMonPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0981: fltInfraRsVlanNsResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0982: fltInfraRsFuncToEpgResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0983: fltInfraRsLacpPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0984: fltInfraRsLacpIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0988: fltInfraRsMonModuleInfraPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0989: fltInfraRsAttEntPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0990: fltInfraRsCdpIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0991: fltInfraRsHIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0992: fltInfraRsL2InstPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0993: fltInfraRsLldpIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0994: fltInfraRsMonIfInfraPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0995: fltInfraRsSpanVDestGrpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0996: fltInfraRsSpanVSrcGrpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0997: fltInfraRsStpIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0998: fltInfraRsMonNodeInfraPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F0999: fltInfraRsMstInstPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

Chapter 5. ACI F1x Messages

- ACI F1* Commands

ACI F1* Commands

F100008: fltTcaEqptIngrBytes5minUnicastRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100009: fltTcaEqptIngrBytes15minUnicastRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100010: fltTcaEqptIngrBytes1hUnicastRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100011: fltTcaEqptIngrBytes1dUnicastRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100012: fltTcaEqptIngrBytes1wUnicastRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100013: fltTcaEqptIngrBytes1moUnicastRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100014: fltTcaEqptIngrBytes1qtrUnicastRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100015: fltTcaEqptIngrBytes1yearUnicastRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100016: fltTcaEqptIngrBytes5minUnicastRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100017: fltTcaEqptIngrBytes15minUnicastRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100018: fltTcaEqptIngrBytes1hUnicastRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100019: fltTcaEqptIngrBytes1dUnicastRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100020: fltTcaEqptIngrBytes1wUnicastRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100021: fltTcaEqptIngrBytes1moUnicastRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100022: fltTcaEqptIngrBytes1qtrUnicastRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100023: fltTcaEqptIngrBytes1yearUnicastRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100024: fltTcaEqptIngrBytes5minUnicastRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100025: fltTcaEqptIngrBytes15minUnicastRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100026: fltTcaEqptIngrBytes1hUnicastRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100027: fltTcaEqptIngrBytes1dUnicastRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100028: fltTcaEqptIngrBytes1wUnicastRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100029: fltTcaEqptIngrBytes1moUnicastRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100030: fltTcaEqptIngrBytes1qtrUnicastRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100031: fltTcaEqptIngrBytes1yearUnicastRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100032: fltTcaEqptIngrBytes5minUnicastRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100033: fltTcaEqptIngrBytes15minUnicastRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100034: fltTcaEqptIngrBytes1hUnicastRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100035: fltTcaEqptIngrBytes1dUnicastRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100036: fltTcaEqptIngrBytes1wUnicastRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100037: fltTcaEqptIngrBytes1moUnicastRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100038: fltTcaEqptIngrBytes1qtrUnicastRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100039: fltTcaEqptIngrBytes1yearUnicastRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100072: fltTcaEqptIngrBytes5minUnicastRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100073: fltTcaEqptIngrBytes15minUnicastRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100074: fltTcaEqptIngrBytes1hUnicastRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100075: fltTcaEqptIngrBytes1dUnicastRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100076: fltTcaEqptIngrBytes1wUnicastRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100077: fltTcaEqptIngrBytes1moUnicastRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100078: fltTcaEqptIngrBytes1qtrUnicastRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100079: fltTcaEqptIngrBytes1yearUnicastRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100176: fltTcaEqptIngrDropPkts5minBufferLast

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100177: fltTcaEqptIngrDropPkts15minBufferLast

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100178: fltTcaEqptIngrDropPkts1hBufferLast

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100179: fltTcaEqptIngrDropPkts1dBufferLast

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100180: fltTcaEqptIngrDropPkts1wBufferLast

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100181: fltTcaEqptIngrDropPkts1moBufferLast

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100182: fltTcaEqptIngrDropPkts1qtrBufferLast

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100183: fltTcaEqptIngrDropPkts1yearBufferLast

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100192: fltTcaEqptIngrDropPkts5minBufferCum

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100193: fltTcaEqptIngrDropPkts15minBufferCum

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100194: fltTcaEqptIngrDropPkts1hBufferCum

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100195: fltTcaEqptIngrDropPkts1dBufferCum

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100196: fltTcaEqptIngrDropPkts1wBufferCum

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100197: fltTcaEqptIngrDropPkts1moBufferCum

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100198: fltTcaEqptIngrDropPkts1qtrBufferCum

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100199: fltTcaEqptIngrDropPkts1yearBufferCum

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100200: fltTcaEqptIngrDropPkts5minBufferPer

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100201: fltTcaEqptIngrDropPkts15minBufferPer

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100202: fltTcaEqptIngrDropPkts1hBufferPer

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100203: fltTcaEqptIngrDropPkts1dBufferPer

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100204: fltTcaEqptIngrDropPkts1wBufferPer

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100205: fltTcaEqptIngrDropPkts1moBufferPer

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100206: fltTcaEqptIngrDropPkts1qtrBufferPer

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100207: fltTcaEqptIngrDropPkts1yearBufferPer

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100208: fltTcaEqptIngrDropPkts5minBufferMin

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100209: fltTcaEqptIngrDropPkts15minBufferMin

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100210: fltTcaEqptIngrDropPkts1hBufferMin

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100211: fltTcaEqptIngrDropPkts1dBufferMin

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100212: fltTcaEqptIngrDropPkts1wBufferMin

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100213: fltTcaEqptIngrDropPkts1moBufferMin

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100214: fltTcaEqptIngrDropPkts1qtrBufferMin

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100215: fltTcaEqptIngrDropPkts1yearBufferMin

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100216: fltTcaEqptIngrDropPkts5minBufferMax

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100217: fltTcaEqptIngrDropPkts15minBufferMax

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100218: fltTcaEqptIngrDropPkts1hBufferMax

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100219: fltTcaEqptIngrDropPkts1dBufferMax

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100220: fltTcaEqptIngrDropPkts1wBufferMax

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100221: fltTcaEqptIngrDropPkts1moBufferMax

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100222: fltTcaEqptIngrDropPkts1qtrBufferMax

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100223: fltTcaEqptIngrDropPkts1yearBufferMax

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100224: fltTcaEqptIngrDropPkts5minBufferAvg

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100225: fltTcaEqptIngrDropPkts15minBufferAvg

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100226: fltTcaEqptIngrDropPkts1hBufferAvg

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100227: fltTcaEqptIngrDropPkts1dBufferAvg

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100228: fltTcaEqptIngrDropPkts1wBufferAvg

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100229: fltTcaEqptIngrDropPkts1moBufferAvg

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100230: fltTcaEqptIngrDropPkts1qtrBufferAvg

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100231: fltTcaEqptIngrDropPkts1yearBufferAvg

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100256: fltTcaEqptIngrDropPkts5minBufferTr

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100257: fltTcaEqptIngrDropPkts15minBufferTr

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100258: fltTcaEqptIngrDropPkts1hBufferTr

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100259: fltTcaEqptIngrDropPkts1dBufferTr

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100260: fltTcaEqptIngrDropPkts1wBufferTr

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100261: fltTcaEqptIngrDropPkts1moBufferTr

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100262: fltTcaEqptIngrDropPkts1qtrBufferTr

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100263: fltTcaEqptIngrDropPkts1yearBufferTr

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100264: fltTcaEqptIngrDropPkts5minBufferRate

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100265: fltTcaEqptIngrDropPkts15minBufferRate

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100266: fltTcaEqptIngrDropPkts1hBufferRate

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100267: fltTcaEqptIngrDropPkts1dBufferRate

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100268: fltTcaEqptIngrDropPkts1wBufferRate

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100269: fltTcaEqptIngrDropPkts1moBufferRate

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100270: fltTcaEqptIngrDropPkts1qtrBufferRate

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100271: fltTcaEqptIngrDropPkts1yearBufferRate

Severity: variable

Explanation: This fault is caused by "Ingress Buffer Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Buffer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1003: fltInfraRsDomPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F100392: fltTcaEqptIngrDropPkts5minErrorLast

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100393: fltTcaEqptIngrDropPkts15minErrorLast

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100394: fltTcaEqptIngrDropPkts1hErrorLast

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100395: fltTcaEqptIngrDropPkts1dErrorLast

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100396: fltTcaEqptIngrDropPkts1wErrorLast

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100397: fltTcaEqptIngrDropPkts1moErrorLast

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100398: fltTcaEqptIngrDropPkts1qtrErrorLast

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100399: fltTcaEqptIngrDropPkts1yearErrorLast

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1004: fltInfraRsOverrideCdpIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F100408: fltTcaEqptIngrDropPkts5minErrorCum

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100409: fltTcaEqptIngrDropPkts15minErrorCum

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100410: fltTcaEqptIngrDropPkts1hErrorCum

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100411: fltTcaEqptIngrDropPkts1dErrorCum

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100412: fltTcaEqptIngrDropPkts1wErrorCum

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100413: fltTcaEqptIngrDropPkts1moErrorCum

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100414: fltTcaEqptIngrDropPkts1qtrErrorCum

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100415: fltTcaEqptIngrDropPkts1yearErrorCum

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100416: fltTcaEqptIngrDropPkts5minErrorPer

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100417: fltTcaEqptIngrDropPkts15minErrorPer

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100418: fltTcaEqptIngrDropPkts1hErrorPer

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100419: fltTcaEqptIngrDropPkts1dErrorPer

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100420: fltTcaEqptIngrDropPkts1wErrorPer

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100421: fltTcaEqptIngrDropPkts1moErrorPer

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100422: fltTcaEqptIngrDropPkts1qtrErrorPer

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100423: fltTcaEqptIngrDropPkts1yearErrorPer

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100424: fltTcaEqptIngrDropPkts5minErrorMin

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100425: fltTcaEqptIngrDropPkts15minErrorMin

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100426: fltTcaEqptIngrDropPkts1hErrorMin

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100427: fltTcaEqptIngrDropPkts1dErrorMin

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100428: fltTcaEqptIngrDropPkts1wErrorMin

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100429: fltTcaEqptIngrDropPkts1moErrorMin

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100430: fltTcaEqptIngrDropPkts1qtrErrorMin

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100431: fltTcaEqptIngrDropPkts1yearErrorMin

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100432: fltTcaEqptIngrDropPkts5minErrorMax

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100433: fltTcaEqptIngrDropPkts15minErrorMax

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100434: fltTcaEqptIngrDropPkts1hErrorMax

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100435: fltTcaEqptIngrDropPkts1dErrorMax

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100436: fltTcaEqptIngrDropPkts1wErrorMax

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100437: fltTcaEqptIngrDropPkts1moErrorMax

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100438: fltTcaEqptIngrDropPkts1qtrErrorMax

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100439: fltTcaEqptIngrDropPkts1yearErrorMax

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100440: fltTcaEqptIngrDropPkts5minErrorAvg

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100441: fltTcaEqptIngrDropPkts15minErrorAvg

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100442: fltTcaEqptIngrDropPkts1hErrorAvg

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100443: fltTcaEqptIngrDropPkts1dErrorAvg

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100444: fltTcaEqptIngrDropPkts1wErrorAvg

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100445: fltTcaEqptIngrDropPkts1moErrorAvg

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100446: fltTcaEqptIngrDropPkts1qtrErrorAvg

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100447: fltTcaEqptIngrDropPkts1yearErrorAvg

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100472: fltTcaEqptIngrDropPkts5minErrorTr

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100473: fltTcaEqptIngrDropPkts15minErrorTr

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100474: fltTcaEqptIngrDropPkts1hErrorTr

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100475: fltTcaEqptIngrDropPkts1dErrorTr

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100476: fltTcaEqptIngrDropPkts1wErrorTr

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100477: fltTcaEqptIngrDropPkts1moErrorTr

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100478: fltTcaEqptIngrDropPkts1qtrErrorTr

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100479: fltTcaEqptIngrDropPkts1yearErrorTr

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100480: fltTcaEqptIngrDropPkts5minErrorRate

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100481: fltTcaEqptIngrDropPkts15minErrorRate

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100482: fltTcaEqptIngrDropPkts1hErrorRate

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100483: fltTcaEqptIngrDropPkts1dErrorRate

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100484: fltTcaEqptIngrDropPkts1wErrorRate

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100485: fltTcaEqptIngrDropPkts1moErrorRate

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100486: fltTcaEqptIngrDropPkts1qtrErrorRate

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100487: fltTcaEqptIngrDropPkts1yearErrorRate

Severity: variable

Explanation: This fault is caused by "Ingress Error Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Error Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1005: fltInfraRsOverrideLacpPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1006: fltInfraRsOverrideLldpIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F100608: fltTcaEqptIngrDropPkts5minForwardingLast

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100609: fltTcaEqptIngrDropPkts15minForwardingLast

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100610: fltTcaEqptIngrDropPkts1hForwardingLast

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100611: fltTcaEqptIngrDropPkts1dForwardingLast

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100612: fltTcaEqptIngrDropPkts1wForwardingLast

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100613: fltTcaEqptIngrDropPkts1moForwardingLast

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100614: fltTcaEqptIngrDropPkts1qtrForwardingLast

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100615: fltTcaEqptIngrDropPkts1yearForwardingLast

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100624: fltTcaEqptIngrDropPkts5minForwardingCum

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100625: fltTcaEqptIngrDropPkts15minForwardingCum

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100626: fltTcaEqptIngrDropPkts1hForwardingCum

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100627: fltTcaEqptIngrDropPkts1dForwardingCum

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100628: fltTcaEqptIngrDropPkts1wForwardingCum

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100629: fltTcaEqptIngrDropPkts1moForwardingCum

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100630: fltTcaEqptIngrDropPkts1qtrForwardingCum

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100631: fltTcaEqptIngrDropPkts1yearForwardingCum

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100632: fltTcaEqptIngrDropPkts5minForwardingPer

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100633: fltTcaEqptIngrDropPkts15minForwardingPer

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100634: fltTcaEqptIngrDropPkts1hForwardingPer

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100635: fltTcaEqptIngrDropPkts1dForwardingPer

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100636: fltTcaEqptIngrDropPkts1wForwardingPer

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100637: fltTcaEqptIngrDropPkts1moForwardingPer

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100638: fltTcaEqptIngrDropPkts1qtrForwardingPer

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100639: fltTcaEqptIngrDropPkts1yearForwardingPer

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100640: fltTcaEqptIngrDropPkts5minForwardingMin

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100641: fltTcaEqptIngrDropPkts15minForwardingMin

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100642: fltTcaEqptIngrDropPkts1hForwardingMin

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100643: fltTcaEqptIngrDropPkts1dForwardingMin

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100644: fltTcaEqptIngrDropPkts1wForwardingMin

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100645: fltTcaEqptIngrDropPkts1moForwardingMin

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100646: fltTcaEqptIngrDropPkts1qtrForwardingMin

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100647: fltTcaEqptIngrDropPkts1yearForwardingMin

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100648: fltTcaEqptIngrDropPkts5minForwardingMax

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100649: fltTcaEqptIngrDropPkts15minForwardingMax

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100650: fltTcaEqptIngrDropPkts1hForwardingMax

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100651: fltTcaEqptIngrDropPkts1dForwardingMax

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100652: fltTcaEqptIngrDropPkts1wForwardingMax

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100653: fltTcaEqptIngrDropPkts1moForwardingMax

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100654: fltTcaEqptIngrDropPkts1qtrForwardingMax

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100655: fltTcaEqptIngrDropPkts1yearForwardingMax

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100656: fltTcaEqptIngrDropPkts5minForwardingAvg

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100657: fltTcaEqptIngrDropPkts15minForwardingAvg

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100658: fltTcaEqptIngrDropPkts1hForwardingAvg

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100659: fltTcaEqptIngrDropPkts1dForwardingAvg

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100660: fltTcaEqptIngrDropPkts1wForwardingAvg

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100661: fltTcaEqptIngrDropPkts1moForwardingAvg

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100662: fltTcaEqptIngrDropPkts1qtrForwardingAvg

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100663: fltTcaEqptIngrDropPkts1yearForwardingAvg

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100688: fltTcaEqptIngrDropPkts5minForwardingTr

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100689: fltTcaEqptIngrDropPkts15minForwardingTr

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100690: fltTcaEqptIngrDropPkts1hForwardingTr

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100691: fltTcaEqptIngrDropPkts1dForwardingTr

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100692: fltTcaEqptIngrDropPkts1wForwardingTr

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100693: fltTcaEqptIngrDropPkts1moForwardingTr

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100694: fltTcaEqptIngrDropPkts1qtrForwardingTr

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100695: fltTcaEqptIngrDropPkts1yearForwardingTr

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100696: fltTcaEqptIngrDropPkts5minForwardingRate

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100697: fltTcaEqptIngrDropPkts15minForwardingRate

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100698: fltTcaEqptIngrDropPkts1hForwardingRate

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100699: fltTcaEqptIngrDropPkts1dForwardingRate

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1007: fltInfraRsCardPGrpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F100700: fltTcaEqptIngrDropPkts1wForwardingRate

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100701: fltTcaEqptIngrDropPkts1moForwardingRate

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100702: fltTcaEqptIngrDropPkts1qtrForwardingRate

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100703: fltTcaEqptIngrDropPkts1yearForwardingRate

Severity: variable

Explanation: This fault is caused by "Ingress Forwarding Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Forwarding Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1008: fltInfraRsConnFexSResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F100824: fltTcaEqptIngrDropPkts5minLbLast

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100825: fltTcaEqptIngrDropPkts15minLbLast

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100826: fltTcaEqptIngrDropPkts1hLbLast

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100827: fltTcaEqptIngrDropPkts1dLbLast

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100828: fltTcaEqptIngrDropPkts1wLbLast

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100829: fltTcaEqptIngrDropPkts1moLbLast

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100830: fltTcaEqptIngrDropPkts1qtrLbLast

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100831: fltTcaEqptIngrDropPkts1yearLbLast

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100840: fltTcaEqptIngrDropPkts5minLbCum

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100841: fltTcaEqptIngrDropPkts15minLbCum

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100842: fltTcaEqptIngrDropPkts1hLbCum

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100843: fltTcaEqptIngrDropPkts1dLbCum

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100844: fltTcaEqptIngrDropPkts1wLbCum

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100845: fltTcaEqptIngrDropPkts1moLbCum

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100846: fltTcaEqptIngrDropPkts1qtrLbCum

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100847: fltTcaEqptIngrDropPkts1yearLbCum

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100848: fltTcaEqptIngrDropPkts5minLbPer

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100849: fltTcaEqptIngrDropPkts15minLbPer

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100850: fltTcaEqptIngrDropPkts1hLbPer

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100851: fltTcaEqptIngrDropPkts1dLbPer

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100852: fltTcaEqptIngrDropPkts1wLbPer

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100853: fltTcaEqptIngrDropPkts1moLbPer

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100854: fltTcaEqptIngrDropPkts1qtrLbPer

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100855: fltTcaEqptIngrDropPkts1yearLbPer

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100856: fltTcaEqptIngrDropPkts5minLbMin

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100857: fltTcaEqptIngrDropPkts15minLbMin

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100858: fltTcaEqptIngrDropPkts1hLbMin

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100859: fltTcaEqptIngrDropPkts1dLbMin

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100860: fltTcaEqptIngrDropPkts1wLbMin

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100861: fltTcaEqptIngrDropPkts1moLbMin

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100862: fltTcaEqptIngrDropPkts1qtrLbMin

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100863: fltTcaEqptIngrDropPkts1yearLbMin

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100864: fltTcaEqptIngrDropPkts5minLbMax

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100865: fltTcaEqptIngrDropPkts15minLbMax

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100866: fltTcaEqptIngrDropPkts1hLbMax

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100867: fltTcaEqptIngrDropPkts1dLbMax

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100868: fltTcaEqptIngrDropPkts1wLbMax

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100869: fltTcaEqptIngrDropPkts1moLbMax

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100870: fltTcaEqptIngrDropPkts1qtrLbMax

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100871: fltTcaEqptIngrDropPkts1yearLbMax

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100872: fltTcaEqptIngrDropPkts5minLbAvg

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100873: fltTcaEqptIngrDropPkts15minLbAvg

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100874: fltTcaEqptIngrDropPkts1hLbAvg

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100875: fltTcaEqptIngrDropPkts1dLbAvg

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100876: fltTcaEqptIngrDropPkts1wLbAvg

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100877: fltTcaEqptIngrDropPkts1moLbAvg

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100878: fltTcaEqptIngrDropPkts1qtrLbAvg

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100879: fltTcaEqptIngrDropPkts1yearLbAvg

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1009: fltInfraRsConnPortSResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F100904: fltTcaEqptIngrDropPkts5minLbTr

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100905: fltTcaEqptIngrDropPkts15minLbTr

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100906: fltTcaEqptIngrDropPkts1hLbTr

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100907: fltTcaEqptIngrDropPkts1dLbTr

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100908: fltTcaEqptIngrDropPkts1wLbTr

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100909: fltTcaEqptIngrDropPkts1moLbTr

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100910: fltTcaEqptIngrDropPkts1qtrLbTr

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100911: fltTcaEqptIngrDropPkts1yearLbTr

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100912: fltTcaEqptIngrDropPkts5minLbRate

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100913: fltTcaEqptIngrDropPkts15minLbRate

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100914: fltTcaEqptIngrDropPkts1hLbRate

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100915: fltTcaEqptIngrDropPkts1dLbRate

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100916: fltTcaEqptIngrDropPkts1wLbRate

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100917: fltTcaEqptIngrDropPkts1moLbRate

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100918: fltTcaEqptIngrDropPkts1qtrLbRate

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F100919: fltTcaEqptIngrDropPkts1yearLbRate

Severity: variable

Explanation: This fault is caused by "Ingress Load Balancer Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Load Balancer Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1010: fltInfraRsInfraBDResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F101040: fltTcaEqptIngrPkts5minFloodLast

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101041: fltTcaEqptIngrPkts15minFloodLast

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101042: fltTcaEqptIngrPkts1hFloodLast

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101043: fltTcaEqptIngrPkts1dFloodLast

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101044: fltTcaEqptIngrPkts1wFloodLast

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101045: fltTcaEqptIngrPkts1moFloodLast

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101046: fltTcaEqptIngrPkts1qtrFloodLast

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101047: fltTcaEqptIngrPkts1yearFloodLast

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101056: fltTcaEqptIngrPkts5minFloodCum

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101057: fltTcaEqptIngrPkts15minFloodCum

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101058: fltTcaEqptIngrPkts1hFloodCum

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101059: fltTcaEqptIngrPkts1dFloodCum

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101060: fltTcaEqptIngrPkts1wFloodCum

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101061: fltTcaEqptIngrPkts1moFloodCum

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101062: fltTcaEqptIngrPkts1qtrFloodCum

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101063: fltTcaEqptIngrPkts1yearFloodCum

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101064: fltTcaEqptIngrPkts5minFloodPer

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101065: fltTcaEqptIngrPkts15minFloodPer

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101066: fltTcaEqptIngrPkts1hFloodPer

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101067: fltTcaEqptIngrPkts1dFloodPer

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101068: fltTcaEqptIngrPkts1wFloodPer

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101069: fltTcaEqptIngrPkts1moFloodPer

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101070: fltTcaEqptIngrPkts1qtrFloodPer

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101071: fltTcaEqptIngrPkts1yearFloodPer

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101072: fltTcaEqptIngrPkts5minFloodMin

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101073: fltTcaEqptIngrPkts15minFloodMin

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101074: fltTcaEqptIngrPkts1hFloodMin

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101075: fltTcaEqptIngrPkts1dFloodMin

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101076: fltTcaEqptIngrPkts1wFloodMin

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101077: fltTcaEqptIngrPkts1moFloodMin

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101078: fltTcaEqptIngrPkts1qtrFloodMin

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101079: fltTcaEqptIngrPkts1yearFloodMin

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101080: fltTcaEqptIngrPkts5minFloodMax

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101081: fltTcaEqptIngrPkts15minFloodMax

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101082: fltTcaEqptIngrPkts1hFloodMax

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101083: fltTcaEqptIngrPkts1dFloodMax

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101084: fltTcaEqptIngrPkts1wFloodMax

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101085: fltTcaEqptIngrPkts1moFloodMax

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101086: fltTcaEqptIngrPkts1qtrFloodMax

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101087: fltTcaEqptIngrPkts1yearFloodMax

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101088: fltTcaEqptIngrPkts5minFloodAvg

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101089: fltTcaEqptIngrPkts15minFloodAvg

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101090: fltTcaEqptIngrPkts1hFloodAvg

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101091: fltTcaEqptIngrPkts1dFloodAvg

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101092: fltTcaEqptIngrPkts1wFloodAvg

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101093: fltTcaEqptIngrPkts1moFloodAvg

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101094: fltTcaEqptIngrPkts1qtrFloodAvg

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101095: fltTcaEqptIngrPkts1yearFloodAvg

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1011: fltInfraRsAccBaseGrpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F101120: fltTcaEqptIngrPkts5minFloodTr

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101121: fltTcaEqptIngrPkts15minFloodTr

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101122: fltTcaEqptIngrPkts1hFloodTr

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101123: fltTcaEqptIngrPkts1dFloodTr

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101124: fltTcaEqptIngrPkts1wFloodTr

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101125: fltTcaEqptIngrPkts1moFloodTr

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101126: fltTcaEqptIngrPkts1qtrFloodTr

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101127: fltTcaEqptIngrPkts1yearFloodTr

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101128: fltTcaEqptIngrPkts5minFloodRate

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101129: fltTcaEqptIngrPkts15minFloodRate

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101130: fltTcaEqptIngrPkts1hFloodRate

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101131: fltTcaEqptIngrPkts1dFloodRate

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101132: fltTcaEqptIngrPkts1wFloodRate

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101133: fltTcaEqptIngrPkts1moFloodRate

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101134: fltTcaEqptIngrPkts1qtrFloodRate

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101135: fltTcaEqptIngrPkts1yearFloodRate

Severity: variable

Explanation: This fault is caused by "Ingress Flood Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Flood Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1012: fltInfraRsAccNodePGrpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F101256: fltTcaEqptIngrPkts5minMulticastLast

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101257: fltTcaEqptIngrPkts15minMulticastLast

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101258: fltTcaEqptIngrPkts1hMulticastLast

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101259: fltTcaEqptIngrPkts1dMulticastLast

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101260: fltTcaEqptIngrPkts1wMulticastLast

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101261: fltTcaEqptIngrPkts1moMulticastLast

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101262: fltTcaEqptIngrPkts1qtrMulticastLast

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101263: fltTcaEqptIngrPkts1yearMulticastLast

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101272: fltTcaEqptIngrPkts5minMulticastCum

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101273: fltTcaEqptIngrPkts15minMulticastCum

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101274: fltTcaEqptIngrPkts1hMulticastCum

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101275: fltTcaEqptIngrPkts1dMulticastCum

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101276: fltTcaEqptIngrPkts1wMulticastCum

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101277: fltTcaEqptIngrPkts1moMulticastCum

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101278: fltTcaEqptIngrPkts1qtrMulticastCum

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101279: fltTcaEqptIngrPkts1yearMulticastCum

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101280: fltTcaEqptIngrPkts5minMulticastPer

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101281: fltTcaEqptIngrPkts15minMulticastPer

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101282: fltTcaEqptIngrPkts1hMulticastPer

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101283: fltTcaEqptIngrPkts1dMulticastPer

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101284: fltTcaEqptIngrPkts1wMulticastPer

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101285: fltTcaEqptIngrPkts1moMulticastPer

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101286: fltTcaEqptIngrPkts1qtrMulticastPer

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101287: fltTcaEqptIngrPkts1yearMulticastPer

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101288: fltTcaEqptIngrPkts5minMulticastMin

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101289: fltTcaEqptIngrPkts15minMulticastMin

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101290: fltTcaEqptIngrPkts1hMulticastMin

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101291: fltTcaEqptIngrPkts1dMulticastMin

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101292: fltTcaEqptIngrPkts1wMulticastMin

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101293: fltTcaEqptIngrPkts1moMulticastMin

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101294: fltTcaEqptIngrPkts1qtrMulticastMin

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101295: fltTcaEqptIngrPkts1yearMulticastMin

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101296: fltTcaEqptIngrPkts5minMulticastMax

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101297: fltTcaEqptIngrPkts15minMulticastMax

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101298: fltTcaEqptIngrPkts1hMulticastMax

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101299: fltTcaEqptIngrPkts1dMulticastMax

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1013: fltInfraRsAccCardPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F101300: fltTcaEqptIngrPkts1wMulticastMax

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101301: fltTcaEqptIngrPkts1moMulticastMax

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101302: fltTcaEqptIngrPkts1qtrMulticastMax

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101303: fltTcaEqptIngrPkts1yearMulticastMax

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101304: fltTcaEqptIngrPkts5minMulticastAvg

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101305: fltTcaEqptIngrPkts15minMulticastAvg

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101306: fltTcaEqptIngrPkts1hMulticastAvg

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101307: fltTcaEqptIngrPkts1dMulticastAvg

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101308: fltTcaEqptIngrPkts1wMulticastAvg

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101309: fltTcaEqptIngrPkts1moMulticastAvg

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101310: fltTcaEqptIngrPkts1qtrMulticastAvg

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101311: fltTcaEqptIngrPkts1yearMulticastAvg

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101336: fltTcaEqptIngrPkts5minMulticastTr

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101337: fltTcaEqptIngrPkts15minMulticastTr

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101338: fltTcaEqptIngrPkts1hMulticastTr

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101339: fltTcaEqptIngrPkts1dMulticastTr

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101340: fltTcaEqptIngrPkts1wMulticastTr

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101341: fltTcaEqptIngrPkts1moMulticastTr

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101342: fltTcaEqptIngrPkts1qtrMulticastTr

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101343: fltTcaEqptIngrPkts1yearMulticastTr

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101344: fltTcaEqptIngrPkts5minMulticastRate

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101345: fltTcaEqptIngrPkts15minMulticastRate

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101346: fltTcaEqptIngrPkts1hMulticastRate

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101347: fltTcaEqptIngrPkts1dMulticastRate

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101348: fltTcaEqptIngrPkts1wMulticastRate

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101349: fltTcaEqptIngrPkts1moMulticastRate

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101350: fltTcaEqptIngrPkts1qtrMulticastRate

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101351: fltTcaEqptIngrPkts1yearMulticastRate

Severity: variable

Explanation: This fault is caused by "Ingress Multicast Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Multicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1014: fltInfraRsAccPortPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F101472: fltTcaEqptIngrPkts5minUnicastLast

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101473: fltTcaEqptIngrPkts15minUnicastLast

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101474: fltTcaEqptIngrPkts1hUnicastLast

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101475: fltTcaEqptIngrPkts1dUnicastLast

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101476: fltTcaEqptIngrPkts1wUnicastLast

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101477: fltTcaEqptIngrPkts1moUnicastLast

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101478: fltTcaEqptIngrPkts1qtrUnicastLast

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101479: fltTcaEqptIngrPkts1yearUnicastLast

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101488: fltTcaEqptIngrPkts5minUnicastCum

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101489: fltTcaEqptIngrPkts15minUnicastCum

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101490: fltTcaEqptIngrPkts1hUnicastCum

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101491: fltTcaEqptIngrPkts1dUnicastCum

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101492: fltTcaEqptIngrPkts1wUnicastCum

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101493: fltTcaEqptIngrPkts1moUnicastCum

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101494: fltTcaEqptIngrPkts1qtrUnicastCum

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101495: fltTcaEqptIngrPkts1yearUnicastCum

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101496: fltTcaEqptIngrPkts5minUnicastPer

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101497: fltTcaEqptIngrPkts15minUnicastPer

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101498: fltTcaEqptIngrPkts1hUnicastPer

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101499: fltTcaEqptIngrPkts1dUnicastPer

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1015: fltInfraRsAccBndlSubgrpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F101500: fltTcaEqptIngrPkts1wUnicastPer

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101501: fltTcaEqptIngrPkts1moUnicastPer

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101502: fltTcaEqptIngrPkts1qtrUnicastPer

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101503: fltTcaEqptIngrPkts1yearUnicastPer

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101504: fltTcaEqptIngrPkts5minUnicastMin

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101505: fltTcaEqptIngrPkts15minUnicastMin

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101506: fltTcaEqptIngrPkts1hUnicastMin

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101507: fltTcaEqptIngrPkts1dUnicastMin

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101508: fltTcaEqptIngrPkts1wUnicastMin

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101509: fltTcaEqptIngrPkts1moUnicastMin

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101510: fltTcaEqptIngrPkts1qtrUnicastMin

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101511: fltTcaEqptIngrPkts1yearUnicastMin

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101512: fltTcaEqptIngrPkts5minUnicastMax

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101513: fltTcaEqptIngrPkts15minUnicastMax

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101514: fltTcaEqptIngrPkts1hUnicastMax

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101515: fltTcaEqptIngrPkts1dUnicastMax

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101516: fltTcaEqptIngrPkts1wUnicastMax

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101517: fltTcaEqptIngrPkts1moUnicastMax

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101518: fltTcaEqptIngrPkts1qtrUnicastMax

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101519: fltTcaEqptIngrPkts1yearUnicastMax

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101520: fltTcaEqptIngrPkts5minUnicastAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101521: fltTcaEqptIngrPkts15minUnicastAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101522: fltTcaEqptIngrPkts1hUnicastAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101523: fltTcaEqptIngrPkts1dUnicastAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101524: fltTcaEqptIngrPkts1wUnicastAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101525: fltTcaEqptIngrPkts1moUnicastAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101526: fltTcaEqptIngrPkts1qtrUnicastAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101527: fltTcaEqptIngrPkts1yearUnicastAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101552: fltTcaEqptIngrPkts5minUnicastTr

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101553: fltTcaEqptIngrPkts15minUnicastTr

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101554: fltTcaEqptIngrPkts1hUnicastTr

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101555: fltTcaEqptIngrPkts1dUnicastTr

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101556: fltTcaEqptIngrPkts1wUnicastTr

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101557: fltTcaEqptIngrPkts1moUnicastTr

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101558: fltTcaEqptIngrPkts1qtrUnicastTr

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101559: fltTcaEqptIngrPkts1yearUnicastTr

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101560: fltTcaEqptIngrPkts5minUnicastRate

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101561: fltTcaEqptIngrPkts15minUnicastRate

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101562: fltTcaEqptIngrPkts1hUnicastRate

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101563: fltTcaEqptIngrPkts1dUnicastRate

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101564: fltTcaEqptIngrPkts1wUnicastRate

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101565: fltTcaEqptIngrPkts1moUnicastRate

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101566: fltTcaEqptIngrPkts1qtrUnicastRate

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101567: fltTcaEqptIngrPkts1yearUnicastRate

Severity: variable

Explanation: This fault is caused by "Ingress Unicast Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1016: fltIsisRsNhAttResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F101688: fltTcaEqptIngrTotal5minBytesLast

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101689: fltTcaEqptIngrTotal15minBytesLast

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101690: fltTcaEqptIngrTotal1hBytesLast

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101691: fltTcaEqptIngrTotal1dBytesLast

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101692: fltTcaEqptIngrTotal1wBytesLast

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101693: fltTcaEqptIngrTotal1moBytesLast

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101694: fltTcaEqptIngrTotal1qtrBytesLast

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101695: fltTcaEqptIngrTotal1yearBytesLast

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1017: fltL2extRsEBdResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F101704: fltTcaEqptIngrTotal5minBytesCum

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101705: fltTcaEqptIngrTotal15minBytesCum

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101706: fltTcaEqptIngrTotal1hBytesCum

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101707: fltTcaEqptIngrTotal1dBytesCum

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101708: fltTcaEqptIngrTotal1wBytesCum

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101709: fltTcaEqptIngrTotal1moBytesCum

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101710: fltTcaEqptIngrTotal1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101711: fltTcaEqptIngrTotal1yearBytesCum

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101712: fltTcaEqptIngrTotal5minBytesPer

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101713: fltTcaEqptIngrTotal15minBytesPer

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101714: fltTcaEqptIngrTotal1hBytesPer

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101715: fltTcaEqptIngrTotal1dBytesPer

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101716: fltTcaEqptIngrTotal1wBytesPer

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101717: fltTcaEqptIngrTotal1moBytesPer

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101718: fltTcaEqptIngrTotal1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101719: fltTcaEqptIngrTotal1yearBytesPer

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101720: fltTcaEqptIngrTotal5minBytesMin

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101721: fltTcaEqptIngrTotal15minBytesMin

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101722: fltTcaEqptIngrTotal1hBytesMin

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101723: fltTcaEqptIngrTotal1dBytesMin

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101724: fltTcaEqptIngrTotal1wBytesMin

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101725: fltTcaEqptIngrTotal1moBytesMin

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101726: fltTcaEqptIngrTotal1qtrBytesMin

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101727: fltTcaEqptIngrTotal1yearBytesMin

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101728: fltTcaEqptIngrTotal5minBytesMax

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101729: fltTcaEqptIngrTotal15minBytesMax

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101730: fltTcaEqptIngrTotal1hBytesMax

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101731: fltTcaEqptIngrTotal1dBytesMax

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101732: fltTcaEqptIngrTotal1wBytesMax

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101733: fltTcaEqptIngrTotal1moBytesMax

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101734: fltTcaEqptIngrTotal1qtrBytesMax

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101735: fltTcaEqptIngrTotal1yearBytesMax

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101736: fltTcaEqptIngrTotal5minBytesAvg

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101737: fltTcaEqptIngrTotal15minBytesAvg

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101738: fltTcaEqptIngrTotal1hBytesAvg

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101739: fltTcaEqptIngrTotal1dBytesAvg

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101740: fltTcaEqptIngrTotal1wBytesAvg

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101741: fltTcaEqptIngrTotal1moBytesAvg

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101742: fltTcaEqptIngrTotal1qtrBytesAvg

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101743: fltTcaEqptIngrTotal1yearBytesAvg

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101768: fltTcaEqptIngrTotal5minBytesTr

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101769: fltTcaEqptIngrTotal15minBytesTr

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101770: fltTcaEqptIngrTotal1hBytesTr

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101771: fltTcaEqptIngrTotal1dBytesTr

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101772: fltTcaEqptIngrTotal1wBytesTr

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101773: fltTcaEqptIngrTotal1moBytesTr

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101774: fltTcaEqptIngrTotal1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101775: fltTcaEqptIngrTotal1yearBytesTr

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101776: fltTcaEqptIngrTotal5minBytesRate

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101777: fltTcaEqptIngrTotal15minBytesRate

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101778: fltTcaEqptIngrTotal1hBytesRate

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101779: fltTcaEqptIngrTotal1dBytesRate

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101780: fltTcaEqptIngrTotal1wBytesRate

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101781: fltTcaEqptIngrTotal1moBytesRate

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101782: fltTcaEqptIngrTotal1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101783: fltTcaEqptIngrTotal1yearBytesRate

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1018: fltL2extRsL2DomAttResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1019: fltL3extRsSubnetToProfileResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F101904: fltTcaEqptIngrTotal5minBytesRateLast

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101905: fltTcaEqptIngrTotal15minBytesRateLast

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101906: fltTcaEqptIngrTotal1hBytesRateLast

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101907: fltTcaEqptIngrTotal1dBytesRateLast

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101908: fltTcaEqptIngrTotal1wBytesRateLast

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101909: fltTcaEqptIngrTotal1moBytesRateLast

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101910: fltTcaEqptIngrTotal1qtrBytesRateLast

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101911: fltTcaEqptIngrTotal1yearBytesRateLast

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101912: fltTcaEqptIngrTotal5minBytesRateMin

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101913: fltTcaEqptIngrTotal15minBytesRateMin

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101914: fltTcaEqptIngrTotal1hBytesRateMin

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101915: fltTcaEqptIngrTotal1dBytesRateMin

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101916: fltTcaEqptIngrTotal1wBytesRateMin

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101917: fltTcaEqptIngrTotal1moBytesRateMin

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101918: fltTcaEqptIngrTotal1qtrBytesRateMin

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101919: fltTcaEqptIngrTotal1yearBytesRateMin

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101920: fltTcaEqptIngrTotal5minBytesRateMax

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101921: fltTcaEqptIngrTotal15minBytesRateMax

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101922: fltTcaEqptIngrTotal1hBytesRateMax

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101923: fltTcaEqptIngrTotal1dBytesRateMax

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101924: fltTcaEqptIngrTotal1wBytesRateMax

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101925: fltTcaEqptIngrTotal1moBytesRateMax

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101926: fltTcaEqptIngrTotal1qtrBytesRateMax

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101927: fltTcaEqptIngrTotal1yearBytesRateMax

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101928: fltTcaEqptIngrTotal5minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101929: fltTcaEqptIngrTotal15minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101930: fltTcaEqptIngrTotal1hBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101931: fltTcaEqptIngrTotal1dBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101932: fltTcaEqptIngrTotal1wBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101933: fltTcaEqptIngrTotal1moBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101934: fltTcaEqptIngrTotal1qtrBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101935: fltTcaEqptIngrTotal1yearBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101968: fltTcaEqptIngrTotal5minBytesRateTr

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101969: fltTcaEqptIngrTotal15minBytesRateTr

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101970: fltTcaEqptIngrTotal1hBytesRateTr

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101971: fltTcaEqptIngrTotal1dBytesRateTr

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101972: fltTcaEqptIngrTotal1wBytesRateTr

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101973: fltTcaEqptIngrTotal1moBytesRateTr

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101974: fltTcaEqptIngrTotal1qtrBytesRateTr

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F101975: fltTcaEqptIngrTotal1yearBytesRateTr

Severity: variable

Explanation: This fault is caused by "Total Ingress Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1020: fltL3extRsEctxResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F102072: fltTcaEqptIngrTotal5minPktsLast

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102073: fltTcaEqptIngrTotal15minPktsLast

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102074: fltTcaEqptIngrTotal1hPktsLast

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102075: fltTcaEqptIngrTotal1dPktsLast

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102076: fltTcaEqptIngrTotal1wPktsLast

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102077: fltTcaEqptIngrTotal1moPktsLast

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102078: fltTcaEqptIngrTotal1qtrPktsLast

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102079: fltTcaEqptIngrTotal1yearPktsLast

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102088: fltTcaEqptIngrTotal5minPktsCum

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102089: fltTcaEqptIngrTotal15minPktsCum

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102090: fltTcaEqptIngrTotal1hPktsCum

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102091: fltTcaEqptIngrTotal1dPktsCum

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102092: fltTcaEqptIngrTotal1wPktsCum

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102093: fltTcaEqptIngrTotal1moPktsCum

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102094: fltTcaEqptIngrTotal1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102095: fltTcaEqptIngrTotal1yearPktsCum

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102096: fltTcaEqptIngrTotal5minPktsPer

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102097: fltTcaEqptIngrTotal15minPktsPer

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102098: fltTcaEqptIngrTotal1hPktsPer

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102099: fltTcaEqptIngrTotal1dPktsPer

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1021: fltL3extRsL3DomAttResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F102100: fltTcaEqptIngrTotal1wPktsPer

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102101: fltTcaEqptIngrTotal1moPktsPer

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102102: fltTcaEqptIngrTotal1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102103: fltTcaEqptIngrTotal1yearPktsPer

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102104: fltTcaEqptIngrTotal5minPktsMin

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102105: fltTcaEqptIngrTotal15minPktsMin

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102106: fltTcaEqptIngrTotal1hPktsMin

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102107: fltTcaEqptIngrTotal1dPktsMin

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102108: fltTcaEqptIngrTotal1wPktsMin

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102109: fltTcaEqptIngrTotal1moPktsMin

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102110: fltTcaEqptIngrTotal1qtrPktsMin

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102111: fltTcaEqptIngrTotal1yearPktsMin

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102112: fltTcaEqptIngrTotal5minPktsMax

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102113: fltTcaEqptIngrTotal15minPktsMax

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102114: fltTcaEqptIngrTotal1hPktsMax

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102115: fltTcaEqptIngrTotal1dPktsMax

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102116: fltTcaEqptIngrTotal1wPktsMax

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102117: fltTcaEqptIngrTotal1moPktsMax

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102118: fltTcaEqptIngrTotal1qtrPktsMax

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102119: fltTcaEqptIngrTotal1yearPktsMax

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102120: fltTcaEqptIngrTotal5minPktsAvg

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102121: fltTcaEqptIngrTotal15minPktsAvg

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102122: fltTcaEqptIngrTotal1hPktsAvg

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102123: fltTcaEqptIngrTotal1dPktsAvg

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102124: fltTcaEqptIngrTotal1wPktsAvg

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102125: fltTcaEqptIngrTotal1moPktsAvg

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102126: fltTcaEqptIngrTotal1qtrPktsAvg

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102127: fltTcaEqptIngrTotal1yearPktsAvg

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102152: fltTcaEqptIngrTotal5minPktsTr

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102153: fltTcaEqptIngrTotal15minPktsTr

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102154: fltTcaEqptIngrTotal1hPktsTr

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102155: fltTcaEqptIngrTotal1dPktsTr

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102156: fltTcaEqptIngrTotal1wPktsTr

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102157: fltTcaEqptIngrTotal1moPktsTr

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102158: fltTcaEqptIngrTotal1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102159: fltTcaEqptIngrTotal1yearPktsTr

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102160: fltTcaEqptIngrTotal5minPktsRate

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102161: fltTcaEqptIngrTotal15minPktsRate

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102162: fltTcaEqptIngrTotal1hPktsRate

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102163: fltTcaEqptIngrTotal1dPktsRate

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102164: fltTcaEqptIngrTotal1wPktsRate

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102165: fltTcaEqptIngrTotal1moPktsRate

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102166: fltTcaEqptIngrTotal1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102167: fltTcaEqptIngrTotal1yearPktsRate

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102288: fltTcaEqptIngrTotal5minUtilLast

Severity: variable

Explanation: This fault is caused by "Ingress Link Utilization current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Link Utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102289: fltTcaEqptIngrTotal15minUtilLast

Severity: variable

Explanation: This fault is caused by "Ingress Link Utilization current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Link Utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102290: fltTcaEqptIngrTotal1hUtilLast

Severity: variable

Explanation: This fault is caused by "Ingress Link Utilization current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Link Utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102291: fltTcaEqptIngrTotal1dUtilLast

Severity: variable

Explanation: This fault is caused by "Ingress Link Utilization current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Link Utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102292: fltTcaEqptIngrTotal1wUtilLast

Severity: variable

Explanation: This fault is caused by "Ingress Link Utilization current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Link Utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102293: fltTcaEqptIngrTotal1moUtilLast

Severity: variable

Explanation: This fault is caused by "Ingress Link Utilization current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Link Utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102294: fltTcaEqptIngrTotal1qtrUtilLast

Severity: variable

Explanation: This fault is caused by "Ingress Link Utilization current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Link Utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102295: fltTcaEqptIngrTotal1yearUtilLast

Severity: variable

Explanation: This fault is caused by "Ingress Link Utilization current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Link Utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102296: fltTcaEqptIngrTotal5minUtilMin

Severity: variable

Explanation: This fault is caused by "Ingress Link Utilization minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Link Utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102297: fltTcaEqptIngrTotal15minUtilMin

Severity: variable

Explanation: This fault is caused by "Ingress Link Utilization minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Link Utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102298: fltTcaEqptIngrTotal1hUtilMin

Severity: variable

Explanation: This fault is caused by "Ingress Link Utilization minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Link Utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102299: fltTcaEqptIngrTotal1dUtilMin

Severity: variable

Explanation: This fault is caused by "Ingress Link Utilization minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Link Utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1023: fltMaintRsMgrppResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F102300: fltTcaEqptIngrTotal1wUtilMin

Severity: variable

Explanation: This fault is caused by "Ingress Link Utilization minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Link Utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102301: fltTcaEqptIngrTotal1moUtilMin

Severity: variable

Explanation: This fault is caused by "Ingress Link Utilization minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Link Utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102302: fltTcaEqptIngrTotal1qtrUtilMin

Severity: variable

Explanation: This fault is caused by "Ingress Link Utilization minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Link Utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102303: fltTcaEqptIngrTotal1yearUtilMin

Severity: variable

Explanation: This fault is caused by "Ingress Link Utilization minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Link Utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102304: fltTcaEqptIngrTotal5minUtilMax

Severity: variable

Explanation: This fault is caused by "Ingress Link Utilization maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Link Utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102305: fltTcaEqptIngrTotal15minUtilMax

Severity: variable

Explanation: This fault is caused by "Ingress Link Utilization maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Link Utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102306: fltTcaEqptIngrTotal1hUtilMax

Severity: variable

Explanation: This fault is caused by "Ingress Link Utilization maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Link Utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102307: fltTcaEqptIngrTotal1dUtilMax

Severity: variable

Explanation: This fault is caused by "Ingress Link Utilization maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Link Utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102308: fltTcaEqptIngrTotal1wUtilMax

Severity: variable

Explanation: This fault is caused by "Ingress Link Utilization maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Link Utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102309: fltTcaEqptIngrTotal1moUtilMax

Severity: variable

Explanation: This fault is caused by "Ingress Link Utilization maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Link Utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102310: fltTcaEqptIngrTotal1qtrUtilMax

Severity: variable

Explanation: This fault is caused by "Ingress Link Utilization maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Link Utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102311: fltTcaEqptIngrTotal1yearUtilMax

Severity: variable

Explanation: This fault is caused by "Ingress Link Utilization maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Link Utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102312: fltTcaEqptIngrTotal5minUtilAvg

Severity: variable

Explanation: This fault is caused by "Ingress Link Utilization average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Link Utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102313: fltTcaEqptIngrTotal15minUtilAvg

Severity: variable

Explanation: This fault is caused by "Ingress Link Utilization average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Link Utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102314: fltTcaEqptIngrTotal1hUtilAvg

Severity: variable

Explanation: This fault is caused by "Ingress Link Utilization average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Link Utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102315: fltTcaEqptIngrTotal1dUtilAvg

Severity: variable

Explanation: This fault is caused by "Ingress Link Utilization average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Link Utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102316: fltTcaEqptIngrTotal1wUtilAvg

Severity: variable

Explanation: This fault is caused by "Ingress Link Utilization average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Link Utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102317: fltTcaEqptIngrTotal1moUtilAvg

Severity: variable

Explanation: This fault is caused by "Ingress Link Utilization average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Link Utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102318: fltTcaEqptIngrTotal1qtrUtilAvg

Severity: variable

Explanation: This fault is caused by "Ingress Link Utilization average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Link Utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102319: fltTcaEqptIngrTotal1yearUtilAvg

Severity: variable

Explanation: This fault is caused by "Ingress Link Utilization average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Link Utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102352: fltTcaEqptIngrTotal5minUtilTr

Severity: variable

Explanation: This fault is caused by "Ingress Link Utilization trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Link Utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102353: fltTcaEqptIngrTotal15minUtilTr

Severity: variable

Explanation: This fault is caused by "Ingress Link Utilization trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Link Utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102354: fltTcaEqptIngrTotal1hUtilTr

Severity: variable

Explanation: This fault is caused by "Ingress Link Utilization trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Link Utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102355: fltTcaEqptIngrTotal1dUtilTr

Severity: variable

Explanation: This fault is caused by "Ingress Link Utilization trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Link Utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102356: fltTcaEqptIngrTotal1wUtilTr

Severity: variable

Explanation: This fault is caused by "Ingress Link Utilization trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Link Utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102357: fltTcaEqptIngrTotal1moUtilTr

Severity: variable

Explanation: This fault is caused by "Ingress Link Utilization trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Link Utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102358: fltTcaEqptIngrTotal1qtrUtilTr

Severity: variable

Explanation: This fault is caused by "Ingress Link Utilization trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Link Utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102359: fltTcaEqptIngrTotal1yearUtilTr

Severity: variable

Explanation: This fault is caused by "Ingress Link Utilization trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Link Utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1024: fltMaintRsPolCtrlrSchedulerResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F102456: fltTcaEqptIngrUnkBytes5minUnclassifiedLast

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102457: fltTcaEqptIngrUnkBytes15minUnclassifiedLast

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102458: fltTcaEqptIngrUnkBytes1hUnclassifiedLast

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102459: fltTcaEqptIngrUnkBytes1dUnclassifiedLast

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102460: fltTcaEqptIngrUnkBytes1wUnclassifiedLast

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102461: fltTcaEqptIngrUnkBytes1moUnclassifiedLast

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102462: fltTcaEqptIngrUnkBytes1qtrUnclassifiedLast

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102463: fltTcaEqptIngrUnkBytes1yearUnclassifiedLast

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102472: fltTcaEqptIngrUnkBytes5minUnclassifiedCum

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102473: fltTcaEqptIngrUnkBytes15minUnclassifiedCum

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102474: fltTcaEqptIngrUnkBytes1hUnclassifiedCum

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102475: fltTcaEqptIngrUnkBytes1dUnclassifiedCum

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102476: fltTcaEqptIngrUnkBytes1wUnclassifiedCum

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102477: fltTcaEqptIngrUnkBytes1moUnclassifiedCum

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102478: fltTcaEqptIngrUnkBytes1qtrUnclassifiedCum

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102479: fltTcaEqptIngrUnkBytes1yearUnclassifiedCum

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102480: fltTcaEqptIngrUnkBytes5minUnclassifiedPer

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102481: fltTcaEqptIngrUnkBytes15minUnclassifiedPer

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102482: fltTcaEqptIngrUnkBytes1hUnclassifiedPer

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102483: fltTcaEqptIngrUnkBytes1dUnclassifiedPer

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102484: fltTcaEqptIngrUnkBytes1wUnclassifiedPer

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102485: fltTcaEqptIngrUnkBytes1moUnclassifiedPer

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102486: fltTcaEqptIngrUnkBytes1qtrUnclassifiedPer

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102487: fltTcaEqptIngrUnkBytes1yearUnclassifiedPer

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102488: fltTcaEqptIngrUnkBytes5minUnclassifiedMin

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102489: fltTcaEqptIngrUnkBytes15minUnclassifiedMin

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102490: fltTcaEqptIngrUnkBytes1hUnclassifiedMin

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102491: fltTcaEqptIngrUnkBytes1dUnclassifiedMin

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102492: fltTcaEqptIngrUnkBytes1wUnclassifiedMin

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102493: fltTcaEqptIngrUnkBytes1moUnclassifiedMin

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102494: fltTcaEqptIngrUnkBytes1qtrUnclassifiedMin

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102495: fltTcaEqptIngrUnkBytes1yearUnclassifiedMin

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102496: fltTcaEqptIngrUnkBytes5minUnclassifiedMax

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102497: fltTcaEqptIngrUnkBytes15minUnclassifiedMax

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102498: fltTcaEqptIngrUnkBytes1hUnclassifiedMax

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102499: fltTcaEqptIngrUnkBytes1dUnclassifiedMax

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1025: fltMaintRsPolNotifResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F102500: fltTcaEqptIngrUnkBytes1wUnclassifiedMax

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102501: fltTcaEqptIngrUnkBytes1moUnclassifiedMax

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102502: fltTcaEqptIngrUnkBytes1qtrUnclassifiedMax

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102503: fltTcaEqptIngrUnkBytes1yearUnclassifiedMax

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102504: fltTcaEqptIngrUnkBytes5minUnclassifiedAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102505: fltTcaEqptIngrUnkBytes15minUnclassifiedAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102506: fltTcaEqptIngrUnkBytes1hUnclassifiedAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102507: fltTcaEqptIngrUnkBytes1dUnclassifiedAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102508: fltTcaEqptIngrUnkBytes1wUnclassifiedAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102509: fltTcaEqptIngrUnkBytes1moUnclassifiedAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102510: fltTcaEqptIngrUnkBytes1qtrUnclassifiedAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102511: fltTcaEqptIngrUnkBytes1yearUnclassifiedAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102536: fltTcaEqptIngrUnkBytes5minUnclassifiedTr

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102537: fltTcaEqptIngrUnkBytes15minUnclassifiedTr

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102538: fltTcaEqptIngrUnkBytes1hUnclassifiedTr

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102539: fltTcaEqptIngrUnkBytes1dUnclassifiedTr

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102540: fltTcaEqptIngrUnkBytes1wUnclassifiedTr

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102541: fltTcaEqptIngrUnkBytes1moUnclassifiedTr

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102542: fltTcaEqptIngrUnkBytes1qtrUnclassifiedTr

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102543: fltTcaEqptIngrUnkBytes1yearUnclassifiedTr

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102544: fltTcaEqptIngrUnkBytes5minUnclassifiedRate

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102545: fltTcaEqptIngrUnkBytes15minUnclassifiedRate

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102546: fltTcaEqptIngrUnkBytes1hUnclassifiedRate

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102547: fltTcaEqptIngrUnkBytes1dUnclassifiedRate

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102548: fltTcaEqptIngrUnkBytes1wUnclassifiedRate

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102549: fltTcaEqptIngrUnkBytes1moUnclassifiedRate

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102550: fltTcaEqptIngrUnkBytes1qtrUnclassifiedRate

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102551: fltTcaEqptIngrUnkBytes1yearUnclassifiedRate

Severity: variable

Explanation: This fault is caused by "Ingress Unclassfied Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassfied Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102672: fltTcaEqptIngrUnkBytes5minUnicastLast

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102673: fltTcaEqptIngrUnkBytes15minUnicastLast

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102674: fltTcaEqptIngrUnkBytes1hUnicastLast

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102675: fltTcaEqptIngrUnkBytes1dUnicastLast

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102676: fltTcaEqptIngrUnkBytes1wUnicastLast

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102677: fltTcaEqptIngrUnkBytes1moUnicastLast

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102678: fltTcaEqptIngrUnkBytes1qtrUnicastLast

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102679: fltTcaEqptIngrUnkBytes1yearUnicastLast

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102688: fltTcaEqptIngrUnkBytes5minUnicastCum

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102689: fltTcaEqptIngrUnkBytes15minUnicastCum

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102690: fltTcaEqptIngrUnkBytes1hUnicastCum

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102691: fltTcaEqptIngrUnkBytes1dUnicastCum

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102692: fltTcaEqptIngrUnkBytes1wUnicastCum

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102693: fltTcaEqptIngrUnkBytes1moUnicastCum

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102694: fltTcaEqptIngrUnkBytes1qtrUnicastCum

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102695: fltTcaEqptIngrUnkBytes1yearUnicastCum

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102696: fltTcaEqptIngrUnkBytes5minUnicastPer

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102697: fltTcaEqptIngrUnkBytes15minUnicastPer

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102698: fltTcaEqptIngrUnkBytes1hUnicastPer

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102699: fltTcaEqptIngrUnkBytes1dUnicastPer

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1027: fltMgmtRsAddrInstResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F102700: fltTcaEqptIngrUnkBytes1wUnicastPer

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102701: fltTcaEqptIngrUnkBytes1moUnicastPer

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102702: fltTcaEqptIngrUnkBytes1qtrUnicastPer

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102703: fltTcaEqptIngrUnkBytes1yearUnicastPer

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102704: fltTcaEqptIngrUnkBytes5minUnicastMin

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102705: fltTcaEqptIngrUnkBytes15minUnicastMin

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102706: fltTcaEqptIngrUnkBytes1hUnicastMin

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102707: fltTcaEqptIngrUnkBytes1dUnicastMin

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102708: fltTcaEqptIngrUnkBytes1wUnicastMin

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102709: fltTcaEqptIngrUnkBytes1moUnicastMin

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102710: fltTcaEqptIngrUnkBytes1qtrUnicastMin

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102711: fltTcaEqptIngrUnkBytes1yearUnicastMin

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102712: fltTcaEqptIngrUnkBytes5minUnicastMax

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102713: fltTcaEqptIngrUnkBytes15minUnicastMax

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102714: fltTcaEqptIngrUnkBytes1hUnicastMax

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102715: fltTcaEqptIngrUnkBytes1dUnicastMax

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102716: fltTcaEqptIngrUnkBytes1wUnicastMax

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102717: fltTcaEqptIngrUnkBytes1moUnicastMax

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102718: fltTcaEqptIngrUnkBytes1qtrUnicastMax

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102719: fltTcaEqptIngrUnkBytes1yearUnicastMax

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102720: fltTcaEqptIngrUnkBytes5minUnicastAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102721: fltTcaEqptIngrUnkBytes15minUnicastAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102722: fltTcaEqptIngrUnkBytes1hUnicastAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102723: fltTcaEqptIngrUnkBytes1dUnicastAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102724: fltTcaEqptIngrUnkBytes1wUnicastAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102725: fltTcaEqptIngrUnkBytes1moUnicastAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102726: fltTcaEqptIngrUnkBytes1qtrUnicastAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102727: fltTcaEqptIngrUnkBytes1yearUnicastAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102752: fltTcaEqptIngrUnkBytes5minUnicastTr

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102753: fltTcaEqptIngrUnkBytes15minUnicastTr

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102754: fltTcaEqptIngrUnkBytes1hUnicastTr

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102755: fltTcaEqptIngrUnkBytes1dUnicastTr

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102756: fltTcaEqptIngrUnkBytes1wUnicastTr

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102757: fltTcaEqptIngrUnkBytes1moUnicastTr

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102758: fltTcaEqptIngrUnkBytes1qtrUnicastTr

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102759: fltTcaEqptIngrUnkBytes1yearUnicastTr

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102760: fltTcaEqptIngrUnkBytes5minUnicastRate

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102761: fltTcaEqptIngrUnkBytes15minUnicastRate

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102762: fltTcaEqptIngrUnkBytes1hUnicastRate

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102763: fltTcaEqptIngrUnkBytes1dUnicastRate

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102764: fltTcaEqptIngrUnkBytes1wUnicastRate

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102765: fltTcaEqptIngrUnkBytes1moUnicastRate

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102766: fltTcaEqptIngrUnkBytes1qtrUnicastRate

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102767: fltTcaEqptIngrUnkBytes1yearUnicastRate

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1028: fltMgmtRsMgmtBDResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F102888: fltTcaEqptIngrUnkPkts5minUnclassifiedLast

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102889: fltTcaEqptIngrUnkPkts15minUnclassifiedLast

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102890: fltTcaEqptIngrUnkPkts1hUnclassifiedLast

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102891: fltTcaEqptIngrUnkPkts1dUnclassifiedLast

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102892: fltTcaEqptIngrUnkPkts1wUnclassifiedLast

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102893: fltTcaEqptIngrUnkPkts1moUnclassifiedLast

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102894: fltTcaEqptIngrUnkPkts1qtrUnclassifiedLast

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102895: fltTcaEqptIngrUnkPkts1yearUnclassifiedLast

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1029: fltMgmtRsInbEpgResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F102904: fltTcaEqptIngrUnkPkts5minUnclassifiedCum

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102905: fltTcaEqptIngrUnkPkts15minUnclassifiedCum

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102906: fltTcaEqptIngrUnkPkts1hUnclassifiedCum

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102907: fltTcaEqptIngrUnkPkts1dUnclassifiedCum

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102908: fltTcaEqptIngrUnkPkts1wUnclassifiedCum

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102909: fltTcaEqptIngrUnkPkts1moUnclassifiedCum

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102910: fltTcaEqptIngrUnkPkts1qtrUnclassifiedCum

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102911: fltTcaEqptIngrUnkPkts1yearUnclassifiedCum

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102912: fltTcaEqptIngrUnkPkts5minUnclassifiedPer

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102913: fltTcaEqptIngrUnkPkts15minUnclassifiedPer

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102914: fltTcaEqptIngrUnkPkts1hUnclassifiedPer

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102915: fltTcaEqptIngrUnkPkts1dUnclassifiedPer

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102916: fltTcaEqptIngrUnkPkts1wUnclassifiedPer

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102917: fltTcaEqptIngrUnkPkts1moUnclassifiedPer

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102918: fltTcaEqptIngrUnkPkts1qtrUnclassifiedPer

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102919: fltTcaEqptIngrUnkPkts1yearUnclassifiedPer

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102920: fltTcaEqptIngrUnkPkts5minUnclassifiedMin

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102921: fltTcaEqptIngrUnkPkts15minUnclassifiedMin

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102922: fltTcaEqptIngrUnkPkts1hUnclassifiedMin

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102923: fltTcaEqptIngrUnkPkts1dUnclassifiedMin

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102924: fltTcaEqptIngrUnkPkts1wUnclassifiedMin

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102925: fltTcaEqptIngrUnkPkts1moUnclassifiedMin

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102926: fltTcaEqptIngrUnkPkts1qtrUnclassifiedMin

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102927: fltTcaEqptIngrUnkPkts1yearUnclassifiedMin

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102928: fltTcaEqptIngrUnkPkts5minUnclassifiedMax

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102929: fltTcaEqptIngrUnkPkts15minUnclassifiedMax

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102930: fltTcaEqptIngrUnkPkts1hUnclassifiedMax

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102931: fltTcaEqptIngrUnkPkts1dUnclassifiedMax

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102932: fltTcaEqptIngrUnkPkts1wUnclassifiedMax

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102933: fltTcaEqptIngrUnkPkts1moUnclassifiedMax

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102934: fltTcaEqptIngrUnkPkts1qtrUnclassifiedMax

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102935: fltTcaEqptIngrUnkPkts1yearUnclassifiedMax

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102936: fltTcaEqptIngrUnkPkts5minUnclassifiedAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102937: fltTcaEqptIngrUnkPkts15minUnclassifiedAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102938: fltTcaEqptIngrUnkPkts1hUnclassifiedAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102939: fltTcaEqptIngrUnkPkts1dUnclassifiedAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102940: fltTcaEqptIngrUnkPkts1wUnclassifiedAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102941: fltTcaEqptIngrUnkPkts1moUnclassifiedAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102942: fltTcaEqptIngrUnkPkts1qtrUnclassifiedAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102943: fltTcaEqptIngrUnkPkts1yearUnclassifiedAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102968: fltTcaEqptIngrUnkPkts5minUnclassifiedTr

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102969: fltTcaEqptIngrUnkPkts15minUnclassifiedTr

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102970: fltTcaEqptIngrUnkPkts1hUnclassifiedTr

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102971: fltTcaEqptIngrUnkPkts1dUnclassifiedTr

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102972: fltTcaEqptIngrUnkPkts1wUnclassifiedTr

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102973: fltTcaEqptIngrUnkPkts1moUnclassifiedTr

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102974: fltTcaEqptIngrUnkPkts1qtrUnclassifiedTr

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102975: fltTcaEqptIngrUnkPkts1yearUnclassifiedTr

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102976: fltTcaEqptIngrUnkPkts5minUnclassifiedRate

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102977: fltTcaEqptIngrUnkPkts15minUnclassifiedRate

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102978: fltTcaEqptIngrUnkPkts1hUnclassifiedRate

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102979: fltTcaEqptIngrUnkPkts1dUnclassifiedRate

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102980: fltTcaEqptIngrUnkPkts1wUnclassifiedRate

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102981: fltTcaEqptIngrUnkPkts1moUnclassifiedRate

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102982: fltTcaEqptIngrUnkPkts1qtrUnclassifiedRate

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F102983: fltTcaEqptIngrUnkPkts1yearUnclassifiedRate

Severity: variable

Explanation: This fault is caused by "Ingress Unclassified Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unclassified Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1030: fltMgmtRsOoBConsResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1031: fltMgmtRsGrpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F103104: fltTcaEqptIngrUnkPkts5minUnicastLast

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103105: fltTcaEqptIngrUnkPkts15minUnicastLast

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103106: fltTcaEqptIngrUnkPkts1hUnicastLast

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103107: fltTcaEqptIngrUnkPkts1dUnicastLast

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103108: fltTcaEqptIngrUnkPkts1wUnicastLast

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103109: fltTcaEqptIngrUnkPkts1moUnicastLast

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103110: fltTcaEqptIngrUnkPkts1qtrUnicastLast

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103111: fltTcaEqptIngrUnkPkts1yearUnicastLast

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103120: fltTcaEqptIngrUnkPkts5minUnicastCum

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103121: fltTcaEqptIngrUnkPkts15minUnicastCum

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103122: fltTcaEqptIngrUnkPkts1hUnicastCum

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103123: fltTcaEqptIngrUnkPkts1dUnicastCum

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103124: fltTcaEqptIngrUnkPkts1wUnicastCum

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103125: fltTcaEqptIngrUnkPkts1moUnicastCum

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103126: fltTcaEqptIngrUnkPkts1qtrUnicastCum

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103127: fltTcaEqptIngrUnkPkts1yearUnicastCum

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103128: fltTcaEqptIngrUnkPkts5minUnicastPer

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103129: fltTcaEqptIngrUnkPkts15minUnicastPer

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103130: fltTcaEqptIngrUnkPkts1hUnicastPer

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103131: fltTcaEqptIngrUnkPkts1dUnicastPer

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103132: fltTcaEqptIngrUnkPkts1wUnicastPer

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103133: fltTcaEqptIngrUnkPkts1moUnicastPer

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103134: fltTcaEqptIngrUnkPkts1qtrUnicastPer

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103135: fltTcaEqptIngrUnkPkts1yearUnicastPer

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103136: fltTcaEqptIngrUnkPkts5minUnicastMin

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103137: fltTcaEqptIngrUnkPkts15minUnicastMin

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103138: fltTcaEqptIngrUnkPkts1hUnicastMin

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103139: fltTcaEqptIngrUnkPkts1dUnicastMin

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103140: fltTcaEqptIngrUnkPkts1wUnicastMin

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103141: fltTcaEqptIngrUnkPkts1moUnicastMin

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103142: fltTcaEqptIngrUnkPkts1qtrUnicastMin

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103143: fltTcaEqptIngrUnkPkts1yearUnicastMin

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103144: fltTcaEqptIngrUnkPkts5minUnicastMax

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103145: fltTcaEqptIngrUnkPkts15minUnicastMax

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103146: fltTcaEqptIngrUnkPkts1hUnicastMax

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103147: fltTcaEqptIngrUnkPkts1dUnicastMax

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103148: fltTcaEqptIngrUnkPkts1wUnicastMax

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103149: fltTcaEqptIngrUnkPkts1moUnicastMax

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103150: fltTcaEqptIngrUnkPkts1qtrUnicastMax

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103151: fltTcaEqptIngrUnkPkts1yearUnicastMax

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103152: fltTcaEqptIngrUnkPkts5minUnicastAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103153: fltTcaEqptIngrUnkPkts15minUnicastAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103154: fltTcaEqptIngrUnkPkts1hUnicastAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103155: fltTcaEqptIngrUnkPkts1dUnicastAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103156: fltTcaEqptIngrUnkPkts1wUnicastAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103157: fltTcaEqptIngrUnkPkts1moUnicastAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103158: fltTcaEqptIngrUnkPkts1qtrUnicastAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103159: fltTcaEqptIngrUnkPkts1yearUnicastAvg

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103184: fltTcaEqptIngrUnkPkts5minUnicastTr

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103185: fltTcaEqptIngrUnkPkts15minUnicastTr

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103186: fltTcaEqptIngrUnkPkts1hUnicastTr

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103187: fltTcaEqptIngrUnkPkts1dUnicastTr

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103188: fltTcaEqptIngrUnkPkts1wUnicastTr

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103189: fltTcaEqptIngrUnkPkts1moUnicastTr

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103190: fltTcaEqptIngrUnkPkts1qtrUnicastTr

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103191: fltTcaEqptIngrUnkPkts1yearUnicastTr

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103192: fltTcaEqptIngrUnkPkts5minUnicastRate

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103193: fltTcaEqptIngrUnkPkts15minUnicastRate

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103194: fltTcaEqptIngrUnkPkts1hUnicastRate

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103195: fltTcaEqptIngrUnkPkts1dUnicastRate

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103196: fltTcaEqptIngrUnkPkts1wUnicastRate

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103197: fltTcaEqptIngrUnkPkts1moUnicastRate

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103198: fltTcaEqptIngrUnkPkts1qtrUnicastRate

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103199: fltTcaEqptIngrUnkPkts1yearUnicastRate

Severity: variable

Explanation: This fault is caused by "Ingress Unknown Unicast Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Unknown Unicast Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1032: fltMgmtRsOoBProvResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1033: fltMgmtRsOobEpgResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F103320: fltTcaEqptPsPower5minDrawnLast

Severity: variable

Explanation: This fault is caused by "power drawn current value" statistical property crossing threshold level.

Recommended Action: Check the values of "power drawn" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103321: fltTcaEqptPsPower15minDrawnLast

Severity: variable

Explanation: This fault is caused by "power drawn current value" statistical property crossing threshold level.

Recommended Action: Check the values of "power drawn" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103322: fltTcaEqptPsPower1hDrawnLast

Severity: variable

Explanation: This fault is caused by "power drawn current value" statistical property crossing threshold level.

Recommended Action: Check the values of "power drawn" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103323: fltTcaEqptPsPower1dDrawnLast

Severity: variable

Explanation: This fault is caused by "power drawn current value" statistical property crossing threshold level.

Recommended Action: Check the values of "power drawn" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103324: fltTcaEqptPsPower1wDrawnLast

Severity: variable

Explanation: This fault is caused by "power drawn current value" statistical property crossing threshold level.

Recommended Action: Check the values of "power drawn" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103325: fltTcaEqptPsPower1moDrawnLast

Severity: variable

Explanation: This fault is caused by "power drawn current value" statistical property crossing threshold level.

Recommended Action: Check the values of "power drawn" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103326: fltTcaEqptPsPower1qtrDrawnLast

Severity: variable

Explanation: This fault is caused by "power drawn current value" statistical property crossing threshold level.

Recommended Action: Check the values of "power drawn" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103327: fltTcaEqptPsPower1yearDrawnLast

Severity: variable

Explanation: This fault is caused by "power drawn current value" statistical property crossing threshold level.

Recommended Action: Check the values of "power drawn" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103328: fltTcaEqptPsPower5minDrawnMin

Severity: variable

Explanation: This fault is caused by "power drawn minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "power drawn" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103329: fltTcaEqptPsPower15minDrawnMin

Severity: variable

Explanation: This fault is caused by "power drawn minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "power drawn" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103330: fltTcaEqptPsPower1hDrawnMin

Severity: variable

Explanation: This fault is caused by "power drawn minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "power drawn" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103331: fltTcaEqptPsPower1dDrawnMin

Severity: variable

Explanation: This fault is caused by "power drawn minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "power drawn" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103332: fltTcaEqptPsPower1wDrawnMin

Severity: variable

Explanation: This fault is caused by "power drawn minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "power drawn" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103333: fltTcaEqptPsPower1moDrawnMin

Severity: variable

Explanation: This fault is caused by "power drawn minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "power drawn" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103334: fltTcaEqptPsPower1qtrDrawnMin

Severity: variable

Explanation: This fault is caused by "power drawn minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "power drawn" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103335: fltTcaEqptPsPower1yearDrawnMin

Severity: variable

Explanation: This fault is caused by "power drawn minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "power drawn" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103336: fltTcaEqptPsPower5minDrawnMax

Severity: variable

Explanation: This fault is caused by "power drawn maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "power drawn" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103337: fltTcaEqptPsPower15minDrawnMax

Severity: variable

Explanation: This fault is caused by "power drawn maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "power drawn" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103338: fltTcaEqptPsPower1hDrawnMax

Severity: variable

Explanation: This fault is caused by "power drawn maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "power drawn" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103339: fltTcaEqptPsPower1dDrawnMax

Severity: variable

Explanation: This fault is caused by "power drawn maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "power drawn" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103340: fltTcaEqptPsPower1wDrawnMax

Severity: variable

Explanation: This fault is caused by "power drawn maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "power drawn" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103341: fltTcaEqptPsPower1moDrawnMax

Severity: variable

Explanation: This fault is caused by "power drawn maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "power drawn" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103342: fltTcaEqptPsPower1qtrDrawnMax

Severity: variable

Explanation: This fault is caused by "power drawn maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "power drawn" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103343: fltTcaEqptPsPower1yearDrawnMax

Severity: variable

Explanation: This fault is caused by "power drawn maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "power drawn" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103344: fltTcaEqptPsPower5minDrawnAvg

Severity: variable

Explanation: This fault is caused by "power drawn average value" statistical property crossing threshold level.

Recommended Action: Check the values of "power drawn" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103345: fltTcaEqptPsPower15minDrawnAvg

Severity: variable

Explanation: This fault is caused by "power drawn average value" statistical property crossing threshold level.

Recommended Action: Check the values of "power drawn" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103346: fltTcaEqptPsPower1hDrawnAvg

Severity: variable

Explanation: This fault is caused by "power drawn average value" statistical property crossing threshold level.

Recommended Action: Check the values of "power drawn" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103347: fltTcaEqptPsPower1dDrawnAvg

Severity: variable

Explanation: This fault is caused by "power drawn average value" statistical property crossing threshold level.

Recommended Action: Check the values of "power drawn" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103348: fltTcaEqptPsPower1wDrawnAvg

Severity: variable

Explanation: This fault is caused by "power drawn average value" statistical property crossing threshold level.

Recommended Action: Check the values of "power drawn" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103349: fltTcaEqptPsPower1moDrawnAvg

Severity: variable

Explanation: This fault is caused by "power drawn average value" statistical property crossing threshold level.

Recommended Action: Check the values of "power drawn" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103350: fltTcaEqptPsPower1qtrDrawnAvg

Severity: variable

Explanation: This fault is caused by "power drawn average value" statistical property crossing threshold level.

Recommended Action: Check the values of "power drawn" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103351: fltTcaEqptPsPower1yearDrawnAvg

Severity: variable

Explanation: This fault is caused by "power drawn average value" statistical property crossing threshold level.

Recommended Action: Check the values of "power drawn" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103384: fltTcaEqptPsPower5minDrawnTr

Severity: variable

Explanation: This fault is caused by "power drawn trend" statistical property crossing threshold level.

Recommended Action: Check the values of "power drawn" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103385: fltTcaEqptPsPower15minDrawnTr

Severity: variable

Explanation: This fault is caused by "power drawn trend" statistical property crossing threshold level.

Recommended Action: Check the values of "power drawn" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103386: fltTcaEqptPsPower1hDrawnTr

Severity: variable

Explanation: This fault is caused by "power drawn trend" statistical property crossing threshold level.

Recommended Action: Check the values of "power drawn" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103387: fltTcaEqptPsPower1dDrawnTr

Severity: variable

Explanation: This fault is caused by "power drawn trend" statistical property crossing threshold level.

Recommended Action: Check the values of "power drawn" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103388: fltTcaEqptPsPower1wDrawnTr

Severity: variable

Explanation: This fault is caused by "power drawn trend" statistical property crossing threshold level.

Recommended Action: Check the values of "power drawn" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103389: fltTcaEqptPsPower1moDrawnTr

Severity: variable

Explanation: This fault is caused by "power drawn trend" statistical property crossing threshold level.

Recommended Action: Check the values of "power drawn" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103390: fltTcaEqptPsPower1qtrDrawnTr

Severity: variable

Explanation: This fault is caused by "power drawn trend" statistical property crossing threshold level.

Recommended Action: Check the values of "power drawn" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103391: fltTcaEqptPsPower1yearDrawnTr

Severity: variable

Explanation: This fault is caused by "power drawn trend" statistical property crossing threshold level.

Recommended Action: Check the values of "power drawn" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1034: fltOspfRsIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F103488: fltTcaEqptPsPower5minSuppliedLast

Severity: variable

Explanation: This fault is caused by "power supplied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "power supplied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103489: fltTcaEqptPsPower15minSuppliedLast

Severity: variable

Explanation: This fault is caused by "power supplied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "power supplied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103490: fltTcaEqptPsPower1hSuppliedLast

Severity: variable

Explanation: This fault is caused by "power supplied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "power supplied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103491: fltTcaEqptPsPower1dSuppliedLast

Severity: variable

Explanation: This fault is caused by "power supplied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "power supplied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103492: fltTcaEqptPsPower1wSuppliedLast

Severity: variable

Explanation: This fault is caused by "power supplied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "power supplied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103493: fltTcaEqptPsPower1moSuppliedLast

Severity: variable

Explanation: This fault is caused by "power supplied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "power supplied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103494: fltTcaEqptPsPower1qtrSuppliedLast

Severity: variable

Explanation: This fault is caused by "power supplied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "power supplied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103495: fltTcaEqptPsPower1yearSuppliedLast

Severity: variable

Explanation: This fault is caused by "power supplied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "power supplied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103496: fltTcaEqptPsPower5minSuppliedMin

Severity: variable

Explanation: This fault is caused by "power supplied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "power supplied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103497: fltTcaEqptPsPower15minSuppliedMin

Severity: variable

Explanation: This fault is caused by "power supplied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "power supplied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103498: fltTcaEqptPsPower1hSuppliedMin

Severity: variable

Explanation: This fault is caused by "power supplied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "power supplied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103499: fltTcaEqptPsPower1dSuppliedMin

Severity: variable

Explanation: This fault is caused by "power supplied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "power supplied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103500: fltTcaEqptPsPower1wSuppliedMin

Severity: variable

Explanation: This fault is caused by "power supplied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "power supplied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103501: fltTcaEqptPsPower1moSuppliedMin

Severity: variable

Explanation: This fault is caused by "power supplied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "power supplied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103502: fltTcaEqptPsPower1qtrSuppliedMin

Severity: variable

Explanation: This fault is caused by "power supplied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "power supplied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103503: fltTcaEqptPsPower1yearSuppliedMin

Severity: variable

Explanation: This fault is caused by "power supplied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "power supplied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103504: fltTcaEqptPsPower5minSuppliedMax

Severity: variable

Explanation: This fault is caused by "power supplied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "power supplied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103505: fltTcaEqptPsPower15minSuppliedMax

Severity: variable

Explanation: This fault is caused by "power supplied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "power supplied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103506: fltTcaEqptPsPower1hSuppliedMax

Severity: variable

Explanation: This fault is caused by "power supplied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "power supplied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103507: fltTcaEqptPsPower1dSuppliedMax

Severity: variable

Explanation: This fault is caused by "power supplied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "power supplied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103508: fltTcaEqptPsPower1wSuppliedMax

Severity: variable

Explanation: This fault is caused by "power supplied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "power supplied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103509: fltTcaEqptPsPower1moSuppliedMax

Severity: variable

Explanation: This fault is caused by "power supplied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "power supplied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103510: fltTcaEqptPsPower1qtrSuppliedMax

Severity: variable

Explanation: This fault is caused by "power supplied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "power supplied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103511: fltTcaEqptPsPower1yearSuppliedMax

Severity: variable

Explanation: This fault is caused by "power supplied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "power supplied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103512: fltTcaEqptPsPower5minSuppliedAvg

Severity: variable

Explanation: This fault is caused by "power supplied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "power supplied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103513: fltTcaEqptPsPower15minSuppliedAvg

Severity: variable

Explanation: This fault is caused by "power supplied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "power supplied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103514: fltTcaEqptPsPower1hSuppliedAvg

Severity: variable

Explanation: This fault is caused by "power supplied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "power supplied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103515: fltTcaEqptPsPower1dSuppliedAvg

Severity: variable

Explanation: This fault is caused by "power supplied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "power supplied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103516: fltTcaEqptPsPower1wSuppliedAvg

Severity: variable

Explanation: This fault is caused by "power supplied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "power supplied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103517: fltTcaEqptPsPower1moSuppliedAvg

Severity: variable

Explanation: This fault is caused by "power supplied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "power supplied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103518: fltTcaEqptPsPower1qtrSuppliedAvg

Severity: variable

Explanation: This fault is caused by "power supplied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "power supplied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103519: fltTcaEqptPsPower1yearSuppliedAvg

Severity: variable

Explanation: This fault is caused by "power supplied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "power supplied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103552: fltTcaEqptPsPower5minSuppliedTr

Severity: variable

Explanation: This fault is caused by "power supplied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "power supplied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103553: fltTcaEqptPsPower15minSuppliedTr

Severity: variable

Explanation: This fault is caused by "power supplied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "power supplied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103554: fltTcaEqptPsPower1hSuppliedTr

Severity: variable

Explanation: This fault is caused by "power supplied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "power supplied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103555: fltTcaEqptPsPower1dSuppliedTr

Severity: variable

Explanation: This fault is caused by "power supplied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "power supplied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103556: fltTcaEqptPsPower1wSuppliedTr

Severity: variable

Explanation: This fault is caused by "power supplied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "power supplied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103557: fltTcaEqptPsPower1moSuppliedTr

Severity: variable

Explanation: This fault is caused by "power supplied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "power supplied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103558: fltTcaEqptPsPower1qtrSuppliedTr

Severity: variable

Explanation: This fault is caused by "power supplied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "power supplied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103559: fltTcaEqptPsPower1yearSuppliedTr

Severity: variable

Explanation: This fault is caused by "power supplied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "power supplied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103656: fltTcaEqptTemp5minCurrentLast

Severity: variable

Explanation: This fault is caused by "current temperature current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103657: fltTcaEqptTemp15minCurrentLast

Severity: variable

Explanation: This fault is caused by "current temperature current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103658: fltTcaEqptTemp1hCurrentLast

Severity: variable

Explanation: This fault is caused by "current temperature current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103659: fltTcaEqptTemp1dCurrentLast

Severity: variable

Explanation: This fault is caused by "current temperature current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103660: fltTcaEqptTemp1wCurrentLast

Severity: variable

Explanation: This fault is caused by "current temperature current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103661: fltTcaEqptTemp1moCurrentLast

Severity: variable

Explanation: This fault is caused by "current temperature current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103662: fltTcaEqptTemp1qtrCurrentLast

Severity: variable

Explanation: This fault is caused by "current temperature current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103663: fltTcaEqptTemp1yearCurrentLast

Severity: variable

Explanation: This fault is caused by "current temperature current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103664: fltTcaEqptTemp5minCurrentMin

Severity: variable

Explanation: This fault is caused by "current temperature minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103665: fltTcaEqptTemp15minCurrentMin

Severity: variable

Explanation: This fault is caused by "current temperature minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103666: fltTcaEqptTemp1hCurrentMin

Severity: variable

Explanation: This fault is caused by "current temperature minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103667: fltTcaEqptTemp1dCurrentMin

Severity: variable

Explanation: This fault is caused by "current temperature minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103668: fltTcaEqptTemp1wCurrentMin

Severity: variable

Explanation: This fault is caused by "current temperature minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103669: fltTcaEqptTemp1moCurrentMin

Severity: variable

Explanation: This fault is caused by "current temperature minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103670: fltTcaEqptTemp1qtrCurrentMin

Severity: variable

Explanation: This fault is caused by "current temperature minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103671: fltTcaEqptTemp1yearCurrentMin

Severity: variable

Explanation: This fault is caused by "current temperature minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103672: fltTcaEqptTemp5minCurrentMax

Severity: variable

Explanation: This fault is caused by "current temperature maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103673: fltTcaEqptTemp15minCurrentMax

Severity: variable

Explanation: This fault is caused by "current temperature maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103674: fltTcaEqptTemp1hCurrentMax

Severity: variable

Explanation: This fault is caused by "current temperature maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103675: fltTcaEqptTemp1dCurrentMax

Severity: variable

Explanation: This fault is caused by "current temperature maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103676: fltTcaEqptTemp1wCurrentMax

Severity: variable

Explanation: This fault is caused by "current temperature maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103677: fltTcaEqptTemp1moCurrentMax

Severity: variable

Explanation: This fault is caused by "current temperature maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103678: fltTcaEqptTemp1qtrCurrentMax

Severity: variable

Explanation: This fault is caused by "current temperature maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103679: fltTcaEqptTemp1yearCurrentMax

Severity: variable

Explanation: This fault is caused by "current temperature maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103680: fltTcaEqptTemp5minCurrentAvg

Severity: variable

Explanation: This fault is caused by "current temperature average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103681: fltTcaEqptTemp15minCurrentAvg

Severity: variable

Explanation: This fault is caused by "current temperature average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103682: fltTcaEqptTemp1hCurrentAvg

Severity: variable

Explanation: This fault is caused by "current temperature average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103683: fltTcaEqptTemp1dCurrentAvg

Severity: variable

Explanation: This fault is caused by "current temperature average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103684: fltTcaEqptTemp1wCurrentAvg

Severity: variable

Explanation: This fault is caused by "current temperature average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103685: fltTcaEqptTemp1moCurrentAvg

Severity: variable

Explanation: This fault is caused by "current temperature average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103686: fltTcaEqptTemp1qtrCurrentAvg

Severity: variable

Explanation: This fault is caused by "current temperature average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103687: fltTcaEqptTemp1yearCurrentAvg

Severity: variable

Explanation: This fault is caused by "current temperature average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1037: fltRtctrlRsCtxPToSubjPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F103720: fltTcaEqptTemp5minCurrentTr

Severity: variable

Explanation: This fault is caused by "current temperature trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103721: fltTcaEqptTemp15minCurrentTr

Severity: variable

Explanation: This fault is caused by "current temperature trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103722: fltTcaEqptTemp1hCurrentTr

Severity: variable

Explanation: This fault is caused by "current temperature trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103723: fltTcaEqptTemp1dCurrentTr

Severity: variable

Explanation: This fault is caused by "current temperature trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103724: fltTcaEqptTemp1wCurrentTr

Severity: variable

Explanation: This fault is caused by "current temperature trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103725: fltTcaEqptTemp1moCurrentTr

Severity: variable

Explanation: This fault is caused by "current temperature trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103726: fltTcaEqptTemp1qtrCurrentTr

Severity: variable

Explanation: This fault is caused by "current temperature trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103727: fltTcaEqptTemp1yearCurrentTr

Severity: variable

Explanation: This fault is caused by "current temperature trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1038: fltRtctrlRsScopeToAttrPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F103824: fltTcaEqptTemp5minNormalizedLast

Severity: variable

Explanation: This fault is caused by "normalized temperature current value" statistical property crossing threshold level.

Recommended Action: Check the values of "normalized temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103825: fltTcaEqptTemp15minNormalizedLast

Severity: variable

Explanation: This fault is caused by "normalized temperature current value" statistical property crossing threshold level.

Recommended Action: Check the values of "normalized temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103826: fltTcaEqptTemp1hNormalizedLast

Severity: variable

Explanation: This fault is caused by "normalized temperature current value" statistical property crossing threshold level.

Recommended Action: Check the values of "normalized temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103827: fltTcaEqptTemp1dNormalizedLast

Severity: variable

Explanation: This fault is caused by "normalized temperature current value" statistical property crossing threshold level.

Recommended Action: Check the values of "normalized temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103828: fltTcaEqptTemp1wNormalizedLast

Severity: variable

Explanation: This fault is caused by "normalized temperature current value" statistical property crossing threshold level.

Recommended Action: Check the values of "normalized temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103829: fltTcaEqptTemp1moNormalizedLast

Severity: variable

Explanation: This fault is caused by "normalized temperature current value" statistical property crossing threshold level.

Recommended Action: Check the values of "normalized temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103830: fltTcaEqptTemp1qtrNormalizedLast

Severity: variable

Explanation: This fault is caused by "normalized temperature current value" statistical property crossing threshold level.

Recommended Action: Check the values of "normalized temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103831: fltTcaEqptTemp1yearNormalizedLast

Severity: variable

Explanation: This fault is caused by "normalized temperature current value" statistical property crossing threshold level.

Recommended Action: Check the values of "normalized temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103832: fltTcaEqptTemp5minNormalizedMin

Severity: variable

Explanation: This fault is caused by "normalized temperature minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "normalized temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103833: fltTcaEqptTemp15minNormalizedMin

Severity: variable

Explanation: This fault is caused by "normalized temperature minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "normalized temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103834: fltTcaEqptTemp1hNormalizedMin

Severity: variable

Explanation: This fault is caused by "normalized temperature minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "normalized temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103835: fltTcaEqptTemp1dNormalizedMin

Severity: variable

Explanation: This fault is caused by "normalized temperature minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "normalized temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103836: fltTcaEqptTemp1wNormalizedMin

Severity: variable

Explanation: This fault is caused by "normalized temperature minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "normalized temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103837: fltTcaEqptTemp1moNormalizedMin

Severity: variable

Explanation: This fault is caused by "normalized temperature minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "normalized temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103838: fltTcaEqptTemp1qtrNormalizedMin

Severity: variable

Explanation: This fault is caused by "normalized temperature minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "normalized temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103839: fltTcaEqptTemp1yearNormalizedMin

Severity: variable

Explanation: This fault is caused by "normalized temperature minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "normalized temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103840: fltTcaEqptTemp5minNormalizedMax

Severity: variable

Explanation: This fault is caused by "normalized temperature maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "normalized temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103841: fltTcaEqptTemp15minNormalizedMax

Severity: variable

Explanation: This fault is caused by "normalized temperature maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "normalized temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103842: fltTcaEqptTemp1hNormalizedMax

Severity: variable

Explanation: This fault is caused by "normalized temperature maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "normalized temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103843: fltTcaEqptTemp1dNormalizedMax

Severity: variable

Explanation: This fault is caused by "normalized temperature maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "normalized temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103844: fltTcaEqptTemp1wNormalizedMax

Severity: variable

Explanation: This fault is caused by "normalized temperature maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "normalized temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103845: fltTcaEqptTemp1moNormalizedMax

Severity: variable

Explanation: This fault is caused by "normalized temperature maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "normalized temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103846: fltTcaEqptTemp1qtrNormalizedMax

Severity: variable

Explanation: This fault is caused by "normalized temperature maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "normalized temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103847: fltTcaEqptTemp1yearNormalizedMax

Severity: variable

Explanation: This fault is caused by "normalized temperature maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "normalized temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103848: fltTcaEqptTemp5minNormalizedAvg

Severity: variable

Explanation: This fault is caused by "normalized temperature average value" statistical property crossing threshold level.

Recommended Action: Check the values of "normalized temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103849: fltTcaEqptTemp15minNormalizedAvg

Severity: variable

Explanation: This fault is caused by "normalized temperature average value" statistical property crossing threshold level.

Recommended Action: Check the values of "normalized temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103850: fltTcaEqptTemp1hNormalizedAvg

Severity: variable

Explanation: This fault is caused by "normalized temperature average value" statistical property crossing threshold level.

Recommended Action: Check the values of "normalized temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103851: fltTcaEqptTemp1dNormalizedAvg

Severity: variable

Explanation: This fault is caused by "normalized temperature average value" statistical property crossing threshold level.

Recommended Action: Check the values of "normalized temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103852: fltTcaEqptTemp1wNormalizedAvg

Severity: variable

Explanation: This fault is caused by "normalized temperature average value" statistical property crossing threshold level.

Recommended Action: Check the values of "normalized temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103853: fltTcaEqptTemp1moNormalizedAvg

Severity: variable

Explanation: This fault is caused by "normalized temperature average value" statistical property crossing threshold level.

Recommended Action: Check the values of "normalized temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103854: fltTcaEqptTemp1qtrNormalizedAvg

Severity: variable

Explanation: This fault is caused by "normalized temperature average value" statistical property crossing threshold level.

Recommended Action: Check the values of "normalized temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103855: fltTcaEqptTemp1yearNormalizedAvg

Severity: variable

Explanation: This fault is caused by "normalized temperature average value" statistical property crossing threshold level.

Recommended Action: Check the values of "normalized temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103888: fltTcaEqptTemp5minNormalizedTr

Severity: variable

Explanation: This fault is caused by "normalized temperature trend" statistical property crossing threshold level.

Recommended Action: Check the values of "normalized temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103889: fltTcaEqptTemp15minNormalizedTr

Severity: variable

Explanation: This fault is caused by "normalized temperature trend" statistical property crossing threshold level.

Recommended Action: Check the values of "normalized temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103890: fltTcaEqptTemp1hNormalizedTr

Severity: variable

Explanation: This fault is caused by "normalized temperature trend" statistical property crossing threshold level.

Recommended Action: Check the values of "normalized temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103891: fltTcaEqptTemp1dNormalizedTr

Severity: variable

Explanation: This fault is caused by "normalized temperature trend" statistical property crossing threshold level.

Recommended Action: Check the values of "normalized temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103892: fltTcaEqptTemp1wNormalizedTr

Severity: variable

Explanation: This fault is caused by "normalized temperature trend" statistical property crossing threshold level.

Recommended Action: Check the values of "normalized temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103893: fltTcaEqptTemp1moNormalizedTr

Severity: variable

Explanation: This fault is caused by "normalized temperature trend" statistical property crossing threshold level.

Recommended Action: Check the values of "normalized temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103894: fltTcaEqptTemp1qtrNormalizedTr

Severity: variable

Explanation: This fault is caused by "normalized temperature trend" statistical property crossing threshold level.

Recommended Action: Check the values of "normalized temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F103895: fltTcaEqptTemp1yearNormalizedTr

Severity: variable

Explanation: This fault is caused by "normalized temperature trend" statistical property crossing threshold level.

Recommended Action: Check the values of "normalized temperature" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1040: fltSnmpRsDestGroupResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1041: fltSpanRsDestEpgResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F104160: fltTcaEqptcapacityBDEntry5minNormalizedLast

Severity: variable

Explanation: This fault is caused by "bridge domain entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "bridge domain entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104161: fltTcaEqptcapacityBDEntry15minNormalizedLast

Severity: variable

Explanation: This fault is caused by "bridge domain entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "bridge domain entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104162: fltTcaEqptcapacityBDEntry1hNormalizedLast

Severity: variable

Explanation: This fault is caused by "bridge domain entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "bridge domain entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104163: fltTcaEqptcapacityBDEntry1dNormalizedLast

Severity: variable

Explanation: This fault is caused by "bridge domain entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "bridge domain entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104164: fltTcaEqptcapacityBDEntry1wNormalizedLast

Severity: variable

Explanation: This fault is caused by "bridge domain entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "bridge domain entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104165: fltTcaEqptcapacityBDEntry1moNormalizedLast

Severity: variable

Explanation: This fault is caused by "bridge domain entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "bridge domain entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104166: fltTcaEqptcapacityBDEntry1qtrNormalizedLast

Severity: variable

Explanation: This fault is caused by "bridge domain entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "bridge domain entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104167: fltTcaEqptcapacityBDEntry1yearNormalizedLast

Severity: variable

Explanation: This fault is caused by "bridge domain entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "bridge domain entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104168: fltTcaEqptcapacityBDEntry5minNormalizedMin

Severity: variable

Explanation: This fault is caused by "bridge domain entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "bridge domain entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104169: fltTcaEqptcapacityBDEntry15minNormalizedMin

Severity: variable

Explanation: This fault is caused by "bridge domain entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "bridge domain entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104170: fltTcaEqptcapacityBDEntry1hNormalizedMin

Severity: variable

Explanation: This fault is caused by "bridge domain entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "bridge domain entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104171: fltTcaEqptcapacityBDEntry1dNormalizedMin

Severity: variable

Explanation: This fault is caused by "bridge domain entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "bridge domain entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104172: fltTcaEqptcapacityBDEntry1wNormalizedMin

Severity: variable

Explanation: This fault is caused by "bridge domain entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "bridge domain entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104173: fltTcaEqptcapacityBDEntry1moNormalizedMin

Severity: variable

Explanation: This fault is caused by "bridge domain entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "bridge domain entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104174: fltTcaEqptcapacityBDEntry1qtrNormalizedMin

Severity: variable

Explanation: This fault is caused by "bridge domain entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "bridge domain entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104175: fltTcaEqptcapacityBDEntry1yearNormalizedMin

Severity: variable

Explanation: This fault is caused by "bridge domain entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "bridge domain entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104176: fltTcaEqptcapacityBDEntry5minNormalizedMax

Severity: variable

Explanation: This fault is caused by "bridge domain entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "bridge domain entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104177: fltTcaEqptcapacityBDEntry15minNormalizedMax

Severity: variable

Explanation: This fault is caused by "bridge domain entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "bridge domain entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104178: fltTcaEqptcapacityBDEntry1hNormalizedMax

Severity: variable

Explanation: This fault is caused by "bridge domain entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "bridge domain entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104179: fltTcaEqptcapacityBDEntry1dNormalizedMax

Severity: variable

Explanation: This fault is caused by "bridge domain entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "bridge domain entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104180: fltTcaEqptcapacityBDEntry1wNormalizedMax

Severity: variable

Explanation: This fault is caused by "bridge domain entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "bridge domain entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104181: fltTcaEqptcapacityBDEntry1moNormalizedMax

Severity: variable

Explanation: This fault is caused by "bridge domain entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "bridge domain entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104182: fltTcaEqptcapacityBDEntry1qtrNormalizedMax

Severity: variable

Explanation: This fault is caused by "bridge domain entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "bridge domain entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104183: fltTcaEqptcapacityBDEntry1yearNormalizedMax

Severity: variable

Explanation: This fault is caused by "bridge domain entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "bridge domain entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104184: fltTcaEqptcapacityBDEntry5minNormalizedAvg

Severity: variable

Explanation: This fault is caused by "bridge domain entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "bridge domain entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104185: fltTcaEqptcapacityBDEntry15minNormalizedAvg

Severity: variable

Explanation: This fault is caused by "bridge domain entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "bridge domain entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104186: fltTcaEqptcapacityBDEntry1hNormalizedAvg

Severity: variable

Explanation: This fault is caused by "bridge domain entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "bridge domain entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104187: fltTcaEqptcapacityBDEntry1dNormalizedAvg

Severity: variable

Explanation: This fault is caused by "bridge domain entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "bridge domain entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104188: fltTcaEqptcapacityBDEntry1wNormalizedAvg

Severity: variable

Explanation: This fault is caused by "bridge domain entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "bridge domain entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104189: fltTcaEqptcapacityBDEntry1moNormalizedAvg

Severity: variable

Explanation: This fault is caused by "bridge domain entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "bridge domain entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104190: fltTcaEqptcapacityBDEntry1qtrNormalizedAvg

Severity: variable

Explanation: This fault is caused by "bridge domain entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "bridge domain entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104191: fltTcaEqptcapacityBDEntry1yearNormalizedAvg

Severity: variable

Explanation: This fault is caused by "bridge domain entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "bridge domain entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104224: fltTcaEqptcapacityBDEntry5minNormalizedTr

Severity: variable

Explanation: This fault is caused by "bridge domain entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "bridge domain entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104225: fltTcaEqptcapacityBDEntry15minNormalizedTr

Severity: variable

Explanation: This fault is caused by "bridge domain entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "bridge domain entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104226: fltTcaEqptcapacityBDEntry1hNormalizedTr

Severity: variable

Explanation: This fault is caused by "bridge domain entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "bridge domain entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104227: fltTcaEqptcapacityBDEntry1dNormalizedTr

Severity: variable

Explanation: This fault is caused by "bridge domain entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "bridge domain entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104228: fltTcaEqptcapacityBDEntry1wNormalizedTr

Severity: variable

Explanation: This fault is caused by "bridge domain entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "bridge domain entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104229: fltTcaEqptcapacityBDEntry1moNormalizedTr

Severity: variable

Explanation: This fault is caused by "bridge domain entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "bridge domain entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104230: fltTcaEqptcapacityBDEntry1qtrNormalizedTr

Severity: variable

Explanation: This fault is caused by "bridge domain entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "bridge domain entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104231: fltTcaEqptcapacityBDEntry1yearNormalizedTr

Severity: variable

Explanation: This fault is caused by "bridge domain entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "bridge domain entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104496: fltTcaEqptcapacityL2Entry5minNormalizedLast

Severity: variable

Explanation: This fault is caused by "Layer2 entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104497: fltTcaEqptcapacityL2Entry15minNormalizedLast

Severity: variable

Explanation: This fault is caused by "Layer2 entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104498: fltTcaEqptcapacityL2Entry1hNormalizedLast

Severity: variable

Explanation: This fault is caused by "Layer2 entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104499: fltTcaEqptcapacityL2Entry1dNormalizedLast

Severity: variable

Explanation: This fault is caused by "Layer2 entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104500: fltTcaEqptcapacityL2Entry1wNormalizedLast

Severity: variable

Explanation: This fault is caused by "Layer2 entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104501: fltTcaEqptcapacityL2Entry1moNormalizedLast

Severity: variable

Explanation: This fault is caused by "Layer2 entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104502: fltTcaEqptcapacityL2Entry1qtrNormalizedLast

Severity: variable

Explanation: This fault is caused by "Layer2 entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104503: fltTcaEqptcapacityL2Entry1yearNormalizedLast

Severity: variable

Explanation: This fault is caused by "Layer2 entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104504: fltTcaEqptcapacityL2Entry5minNormalizedMin

Severity: variable

Explanation: This fault is caused by "Layer2 entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104505: fltTcaEqptcapacityL2Entry15minNormalizedMin

Severity: variable

Explanation: This fault is caused by "Layer2 entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104506: fltTcaEqptcapacityL2Entry1hNormalizedMin

Severity: variable

Explanation: This fault is caused by "Layer2 entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104507: fltTcaEqptcapacityL2Entry1dNormalizedMin

Severity: variable

Explanation: This fault is caused by "Layer2 entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104508: fltTcaEqptcapacityL2Entry1wNormalizedMin

Severity: variable

Explanation: This fault is caused by "Layer2 entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104509: fltTcaEqptcapacityL2Entry1moNormalizedMin

Severity: variable

Explanation: This fault is caused by "Layer2 entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104510: fltTcaEqptcapacityL2Entry1qtrNormalizedMin

Severity: variable

Explanation: This fault is caused by "Layer2 entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104511: fltTcaEqptcapacityL2Entry1yearNormalizedMin

Severity: variable

Explanation: This fault is caused by "Layer2 entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104512: fltTcaEqptcapacityL2Entry5minNormalizedMax

Severity: variable

Explanation: This fault is caused by "Layer2 entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104513: fltTcaEqptcapacityL2Entry15minNormalizedMax

Severity: variable

Explanation: This fault is caused by "Layer2 entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104514: fltTcaEqptcapacityL2Entry1hNormalizedMax

Severity: variable

Explanation: This fault is caused by "Layer2 entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104515: fltTcaEqptcapacityL2Entry1dNormalizedMax

Severity: variable

Explanation: This fault is caused by "Layer2 entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104516: fltTcaEqptcapacityL2Entry1wNormalizedMax

Severity: variable

Explanation: This fault is caused by "Layer2 entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104517: fltTcaEqptcapacityL2Entry1moNormalizedMax

Severity: variable

Explanation: This fault is caused by "Layer2 entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104518: fltTcaEqptcapacityL2Entry1qtrNormalizedMax

Severity: variable

Explanation: This fault is caused by "Layer2 entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104519: fltTcaEqptcapacityL2Entry1yearNormalizedMax

Severity: variable

Explanation: This fault is caused by "Layer2 entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104520: fltTcaEqptcapacityL2Entry5minNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Layer2 entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104521: fltTcaEqptcapacityL2Entry15minNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Layer2 entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104522: fltTcaEqptcapacityL2Entry1hNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Layer2 entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104523: fltTcaEqptcapacityL2Entry1dNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Layer2 entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104524: fltTcaEqptcapacityL2Entry1wNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Layer2 entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104525: fltTcaEqptcapacityL2Entry1moNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Layer2 entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104526: fltTcaEqptcapacityL2Entry1qtrNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Layer2 entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104527: fltTcaEqptcapacityL2Entry1yearNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Layer2 entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104560: fltTcaEqptcapacityL2Entry5minNormalizedTr

Severity: variable

Explanation: This fault is caused by "Layer2 entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104561: fltTcaEqptcapacityL2Entry15minNormalizedTr

Severity: variable

Explanation: This fault is caused by "Layer2 entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104562: fltTcaEqptcapacityL2Entry1hNormalizedTr

Severity: variable

Explanation: This fault is caused by "Layer2 entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104563: fltTcaEqptcapacityL2Entry1dNormalizedTr

Severity: variable

Explanation: This fault is caused by "Layer2 entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104564: fltTcaEqptcapacityL2Entry1wNormalizedTr

Severity: variable

Explanation: This fault is caused by "Layer2 entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104565: fltTcaEqptcapacityL2Entry1moNormalizedTr

Severity: variable

Explanation: This fault is caused by "Layer2 entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104566: fltTcaEqptcapacityL2Entry1qtrNormalizedTr

Severity: variable

Explanation: This fault is caused by "Layer2 entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104567: fltTcaEqptcapacityL2Entry1yearNormalizedTr

Severity: variable

Explanation: This fault is caused by "Layer2 entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1048: fltSpanRsDestToVPortResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F104832: fltTcaEqptcapacityL3Entry5minNormalizedLast

Severity: variable

Explanation: This fault is caused by "Layer3 entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer3 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104833: fltTcaEqptcapacityL3Entry15minNormalizedLast

Severity: variable

Explanation: This fault is caused by "Layer3 entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer3 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104834: fltTcaEqptcapacityL3Entry1hNormalizedLast

Severity: variable

Explanation: This fault is caused by "Layer3 entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer3 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104835: fltTcaEqptcapacityL3Entry1dNormalizedLast

Severity: variable

Explanation: This fault is caused by "Layer3 entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer3 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104836: fltTcaEqptcapacityL3Entry1wNormalizedLast

Severity: variable

Explanation: This fault is caused by "Layer3 entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer3 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104837: fltTcaEqptcapacityL3Entry1moNormalizedLast

Severity: variable

Explanation: This fault is caused by "Layer3 entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer3 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104838: fltTcaEqptcapacityL3Entry1qtrNormalizedLast

Severity: variable

Explanation: This fault is caused by "Layer3 entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer3 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104839: fltTcaEqptcapacityL3Entry1yearNormalizedLast

Severity: variable

Explanation: This fault is caused by "Layer3 entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer3 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104840: fltTcaEqptcapacityL3Entry5minNormalizedMin

Severity: variable

Explanation: This fault is caused by "Layer3 entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer3 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104841: fltTcaEqptcapacityL3Entry15minNormalizedMin

Severity: variable

Explanation: This fault is caused by "Layer3 entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer3 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104842: fltTcaEqptcapacityL3Entry1hNormalizedMin

Severity: variable

Explanation: This fault is caused by "Layer3 entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer3 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104843: fltTcaEqptcapacityL3Entry1dNormalizedMin

Severity: variable

Explanation: This fault is caused by "Layer3 entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer3 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104844: fltTcaEqptcapacityL3Entry1wNormalizedMin

Severity: variable

Explanation: This fault is caused by "Layer3 entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer3 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104845: fltTcaEqptcapacityL3Entry1moNormalizedMin

Severity: variable

Explanation: This fault is caused by "Layer3 entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer3 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104846: fltTcaEqptcapacityL3Entry1qtrNormalizedMin

Severity: variable

Explanation: This fault is caused by "Layer3 entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer3 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104847: fltTcaEqptcapacityL3Entry1yearNormalizedMin

Severity: variable

Explanation: This fault is caused by "Layer3 entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer3 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104848: fltTcaEqptcapacityL3Entry5minNormalizedMax

Severity: variable

Explanation: This fault is caused by "Layer3 entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer3 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104849: fltTcaEqptcapacityL3Entry15minNormalizedMax

Severity: variable

Explanation: This fault is caused by "Layer3 entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer3 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104850: fltTcaEqptcapacityL3Entry1hNormalizedMax

Severity: variable

Explanation: This fault is caused by "Layer3 entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer3 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104851: fltTcaEqptcapacityL3Entry1dNormalizedMax

Severity: variable

Explanation: This fault is caused by "Layer3 entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer3 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104852: fltTcaEqptcapacityL3Entry1wNormalizedMax

Severity: variable

Explanation: This fault is caused by "Layer3 entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer3 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104853: fltTcaEqptcapacityL3Entry1moNormalizedMax

Severity: variable

Explanation: This fault is caused by "Layer3 entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer3 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104854: fltTcaEqptcapacityL3Entry1qtrNormalizedMax

Severity: variable

Explanation: This fault is caused by "Layer3 entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer3 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104855: fltTcaEqptcapacityL3Entry1yearNormalizedMax

Severity: variable

Explanation: This fault is caused by "Layer3 entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer3 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104856: fltTcaEqptcapacityL3Entry5minNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Layer3 entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer3 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104857: fltTcaEqptcapacityL3Entry15minNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Layer3 entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer3 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104858: fltTcaEqptcapacityL3Entry1hNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Layer3 entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer3 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104859: fltTcaEqptcapacityL3Entry1dNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Layer3 entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer3 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104860: fltTcaEqptcapacityL3Entry1wNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Layer3 entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer3 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104861: fltTcaEqptcapacityL3Entry1moNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Layer3 entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer3 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104862: fltTcaEqptcapacityL3Entry1qtrNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Layer3 entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer3 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104863: fltTcaEqptcapacityL3Entry1yearNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Layer3 entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer3 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104896: fltTcaEqptcapacityL3Entry5minNormalizedTr

Severity: variable

Explanation: This fault is caused by "Layer3 entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer3 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104897: fltTcaEqptcapacityL3Entry15minNormalizedTr

Severity: variable

Explanation: This fault is caused by "Layer3 entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer3 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104898: fltTcaEqptcapacityL3Entry1hNormalizedTr

Severity: variable

Explanation: This fault is caused by "Layer3 entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer3 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104899: fltTcaEqptcapacityL3Entry1dNormalizedTr

Severity: variable

Explanation: This fault is caused by "Layer3 entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer3 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1049: fltSpanRsSrcToVPortResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F104900: fltTcaEqptcapacityL3Entry1wNormalizedTr

Severity: variable

Explanation: This fault is caused by "Layer3 entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer3 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104901: fltTcaEqptcapacityL3Entry1moNormalizedTr

Severity: variable

Explanation: This fault is caused by "Layer3 entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer3 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104902: fltTcaEqptcapacityL3Entry1qtrNormalizedTr

Severity: variable

Explanation: This fault is caused by "Layer3 entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer3 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F104903: fltTcaEqptcapacityL3Entry1yearNormalizedTr

Severity: variable

Explanation: This fault is caused by "Layer3 entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Layer3 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105168: fltTcaEqptcapacityMcastEntry5minNormalizedLast

Severity: variable

Explanation: This fault is caused by "Multicast entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105169: fltTcaEqptcapacityMcastEntry15minNormalizedLast

Severity: variable

Explanation: This fault is caused by "Multicast entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105170: fltTcaEqptcapacityMcastEntry1hNormalizedLast

Severity: variable

Explanation: This fault is caused by "Multicast entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105171: fltTcaEqptcapacityMcastEntry1dNormalizedLast

Severity: variable

Explanation: This fault is caused by "Multicast entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105172: fltTcaEqptcapacityMcastEntry1wNormalizedLast

Severity: variable

Explanation: This fault is caused by "Multicast entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105173: fltTcaEqptcapacityMcastEntry1moNormalizedLast

Severity: variable

Explanation: This fault is caused by "Multicast entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105174: fltTcaEqptcapacityMcastEntry1qtrNormalizedLast

Severity: variable

Explanation: This fault is caused by "Multicast entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105175: fltTcaEqptcapacityMcastEntry1yearNormalizedLast

Severity: variable

Explanation: This fault is caused by "Multicast entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105176: fltTcaEqptcapacityMcastEntry5minNormalizedMin

Severity: variable

Explanation: This fault is caused by "Multicast entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105177: fltTcaEqptcapacityMcastEntry15minNormalizedMin

Severity: variable

Explanation: This fault is caused by "Multicast entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105178: fltTcaEqptcapacityMcastEntry1hNormalizedMin

Severity: variable

Explanation: This fault is caused by "Multicast entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105179: fltTcaEqptcapacityMcastEntry1dNormalizedMin

Severity: variable

Explanation: This fault is caused by "Multicast entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105180: fltTcaEqptcapacityMcastEntry1wNormalizedMin

Severity: variable

Explanation: This fault is caused by "Multicast entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105181: fltTcaEqptcapacityMcastEntry1moNormalizedMin

Severity: variable

Explanation: This fault is caused by "Multicast entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105182: fltTcaEqptcapacityMcastEntry1qtrNormalizedMin

Severity: variable

Explanation: This fault is caused by "Multicast entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105183: fltTcaEqptcapacityMcastEntry1yearNormalizedMin

Severity: variable

Explanation: This fault is caused by "Multicast entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105184: fltTcaEqptcapacityMcastEntry5minNormalizedMax

Severity: variable

Explanation: This fault is caused by "Multicast entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105185: fltTcaEqptcapacityMcastEntry15minNormalizedMax

Severity: variable

Explanation: This fault is caused by "Multicast entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105186: fltTcaEqptcapacityMcastEntry1hNormalizedMax

Severity: variable

Explanation: This fault is caused by "Multicast entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105187: fltTcaEqptcapacityMcastEntry1dNormalizedMax

Severity: variable

Explanation: This fault is caused by "Multicast entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105188: fltTcaEqptcapacityMcastEntry1wNormalizedMax

Severity: variable

Explanation: This fault is caused by "Multicast entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105189: fltTcaEqptcapacityMcastEntry1moNormalizedMax

Severity: variable

Explanation: This fault is caused by "Multicast entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105190: fltTcaEqptcapacityMcastEntry1qtrNormalizedMax

Severity: variable

Explanation: This fault is caused by "Multicast entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105191: fltTcaEqptcapacityMcastEntry1yearNormalizedMax

Severity: variable

Explanation: This fault is caused by "Multicast entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105192: fltTcaEqptcapacityMcastEntry5minNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Multicast entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105193: fltTcaEqptcapacityMcastEntry15minNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Multicast entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105194: fltTcaEqptcapacityMcastEntry1hNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Multicast entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105195: fltTcaEqptcapacityMcastEntry1dNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Multicast entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105196: fltTcaEqptcapacityMcastEntry1wNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Multicast entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105197: fltTcaEqptcapacityMcastEntry1moNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Multicast entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105198: fltTcaEqptcapacityMcastEntry1qtrNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Multicast entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105199: fltTcaEqptcapacityMcastEntry1yearNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Multicast entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105232: fltTcaEqptcapacityMcastEntry5minNormalizedTr

Severity: variable

Explanation: This fault is caused by "Multicast entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105233: fltTcaEqptcapacityMcastEntry15minNormalizedTr

Severity: variable

Explanation: This fault is caused by "Multicast entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105234: fltTcaEqptcapacityMcastEntry1hNormalizedTr

Severity: variable

Explanation: This fault is caused by "Multicast entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105235: fltTcaEqptcapacityMcastEntry1dNormalizedTr

Severity: variable

Explanation: This fault is caused by "Multicast entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105236: fltTcaEqptcapacityMcastEntry1wNormalizedTr

Severity: variable

Explanation: This fault is caused by "Multicast entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105237: fltTcaEqptcapacityMcastEntry1moNormalizedTr

Severity: variable

Explanation: This fault is caused by "Multicast entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105238: fltTcaEqptcapacityMcastEntry1qtrNormalizedTr

Severity: variable

Explanation: This fault is caused by "Multicast entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105239: fltTcaEqptcapacityMcastEntry1yearNormalizedTr

Severity: variable

Explanation: This fault is caused by "Multicast entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1053: fltSyntheticRsPhysIfResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1054: fltSyntheticRsPolicyResolveFail

Severity: minor

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1055: fltSyntheticRsToObjResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F105504: fltTcaEqptcapacityPolEntry5minNormalizedLast

Severity: variable

Explanation: This fault is caused by "Policy CAM entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy CAM entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105505: fltTcaEqptcapacityPolEntry15minNormalizedLast

Severity: variable

Explanation: This fault is caused by "Policy CAM entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy CAM entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105506: fltTcaEqptcapacityPolEntry1hNormalizedLast

Severity: variable

Explanation: This fault is caused by "Policy CAM entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy CAM entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105507: fltTcaEqptcapacityPolEntry1dNormalizedLast

Severity: variable

Explanation: This fault is caused by "Policy CAM entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy CAM entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105508: fltTcaEqptcapacityPolEntry1wNormalizedLast

Severity: variable

Explanation: This fault is caused by "Policy CAM entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy CAM entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105509: fltTcaEqptcapacityPolEntry1moNormalizedLast

Severity: variable

Explanation: This fault is caused by "Policy CAM entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy CAM entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105510: fltTcaEqptcapacityPolEntry1qtrNormalizedLast

Severity: variable

Explanation: This fault is caused by "Policy CAM entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy CAM entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105511: fltTcaEqptcapacityPolEntry1yearNormalizedLast

Severity: variable

Explanation: This fault is caused by "Policy CAM entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy CAM entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105512: fltTcaEqptcapacityPolEntry5minNormalizedMin

Severity: variable

Explanation: This fault is caused by "Policy CAM entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy CAM entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105513: fltTcaEqptcapacityPolEntry15minNormalizedMin

Severity: variable

Explanation: This fault is caused by "Policy CAM entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy CAM entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105514: fltTcaEqptcapacityPolEntry1hNormalizedMin

Severity: variable

Explanation: This fault is caused by "Policy CAM entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy CAM entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105515: fltTcaEqptcapacityPolEntry1dNormalizedMin

Severity: variable

Explanation: This fault is caused by "Policy CAM entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy CAM entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105516: fltTcaEqptcapacityPolEntry1wNormalizedMin

Severity: variable

Explanation: This fault is caused by "Policy CAM entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy CAM entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105517: fltTcaEqptcapacityPolEntry1moNormalizedMin

Severity: variable

Explanation: This fault is caused by "Policy CAM entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy CAM entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105518: fltTcaEqptcapacityPolEntry1qtrNormalizedMin

Severity: variable

Explanation: This fault is caused by "Policy CAM entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy CAM entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105519: fltTcaEqptcapacityPolEntry1yearNormalizedMin

Severity: variable

Explanation: This fault is caused by "Policy CAM entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy CAM entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105520: fltTcaEqptcapacityPolEntry5minNormalizedMax

Severity: variable

Explanation: This fault is caused by "Policy CAM entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy CAM entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105521: fltTcaEqptcapacityPolEntry15minNormalizedMax

Severity: variable

Explanation: This fault is caused by "Policy CAM entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy CAM entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105522: fltTcaEqptcapacityPolEntry1hNormalizedMax

Severity: variable

Explanation: This fault is caused by "Policy CAM entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy CAM entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105523: fltTcaEqptcapacityPolEntry1dNormalizedMax

Severity: variable

Explanation: This fault is caused by "Policy CAM entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy CAM entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105524: fltTcaEqptcapacityPolEntry1wNormalizedMax

Severity: variable

Explanation: This fault is caused by "Policy CAM entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy CAM entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105525: fltTcaEqptcapacityPolEntry1moNormalizedMax

Severity: variable

Explanation: This fault is caused by "Policy CAM entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy CAM entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105526: fltTcaEqptcapacityPolEntry1qtrNormalizedMax

Severity: variable

Explanation: This fault is caused by "Policy CAM entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy CAM entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105527: fltTcaEqptcapacityPolEntry1yearNormalizedMax

Severity: variable

Explanation: This fault is caused by "Policy CAM entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy CAM entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105528: fltTcaEqptcapacityPolEntry5minNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Policy CAM entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy CAM entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105529: fltTcaEqptcapacityPolEntry15minNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Policy CAM entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy CAM entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105530: fltTcaEqptcapacityPolEntry1hNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Policy CAM entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy CAM entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105531: fltTcaEqptcapacityPolEntry1dNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Policy CAM entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy CAM entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105532: fltTcaEqptcapacityPolEntry1wNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Policy CAM entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy CAM entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105533: fltTcaEqptcapacityPolEntry1moNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Policy CAM entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy CAM entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105534: fltTcaEqptcapacityPolEntry1qtrNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Policy CAM entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy CAM entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105535: fltTcaEqptcapacityPolEntry1yearNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Policy CAM entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy CAM entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105568: fltTcaEqptcapacityPolEntry5minNormalizedTr

Severity: variable

Explanation: This fault is caused by "Policy CAM entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy CAM entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105569: fltTcaEqptcapacityPolEntry15minNormalizedTr

Severity: variable

Explanation: This fault is caused by "Policy CAM entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy CAM entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105570: fltTcaEqptcapacityPolEntry1hNormalizedTr

Severity: variable

Explanation: This fault is caused by "Policy CAM entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy CAM entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105571: fltTcaEqptcapacityPolEntry1dNormalizedTr

Severity: variable

Explanation: This fault is caused by "Policy CAM entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy CAM entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105572: fltTcaEqptcapacityPolEntry1wNormalizedTr

Severity: variable

Explanation: This fault is caused by "Policy CAM entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy CAM entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105573: fltTcaEqptcapacityPolEntry1moNormalizedTr

Severity: variable

Explanation: This fault is caused by "Policy CAM entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy CAM entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105574: fltTcaEqptcapacityPolEntry1qtrNormalizedTr

Severity: variable

Explanation: This fault is caused by "Policy CAM entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy CAM entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105575: fltTcaEqptcapacityPolEntry1yearNormalizedTr

Severity: variable

Explanation: This fault is caused by "Policy CAM entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy CAM entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1056: fltSyslogRsDestGroupResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F105672: fltTcaFabricAcDropExcess5minDropPktLast

Severity: variable

Explanation: This fault is caused by "dropped packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105673: fltTcaFabricAcDropExcess15minDropPktLast

Severity: variable

Explanation: This fault is caused by "dropped packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105674: fltTcaFabricAcDropExcess1hDropPktLast

Severity: variable

Explanation: This fault is caused by "dropped packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105675: fltTcaFabricAcDropExcess1dDropPktLast

Severity: variable

Explanation: This fault is caused by "dropped packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105676: fltTcaFabricAcDropExcess1wDropPktLast

Severity: variable

Explanation: This fault is caused by "dropped packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105677: fltTcaFabricAcDropExcess1moDropPktLast

Severity: variable

Explanation: This fault is caused by "dropped packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105678: fltTcaFabricAcDropExcess1qtrDropPktLast

Severity: variable

Explanation: This fault is caused by "dropped packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105679: fltTcaFabricAcDropExcess1yearDropPktLast

Severity: variable

Explanation: This fault is caused by "dropped packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105688: fltTcaFabricAcDropExcess5minDropPktCum

Severity: variable

Explanation: This fault is caused by "dropped packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105689: fltTcaFabricAcDropExcess15minDropPktCum

Severity: variable

Explanation: This fault is caused by "dropped packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105690: fltTcaFabricAcDropExcess1hDropPktCum

Severity: variable

Explanation: This fault is caused by "dropped packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105691: fltTcaFabricAcDropExcess1dDropPktCum

Severity: variable

Explanation: This fault is caused by "dropped packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105692: fltTcaFabricAcDropExcess1wDropPktCum

Severity: variable

Explanation: This fault is caused by "dropped packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105693: fltTcaFabricAcDropExcess1moDropPktCum

Severity: variable

Explanation: This fault is caused by "dropped packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105694: fltTcaFabricAcDropExcess1qtrDropPktCum

Severity: variable

Explanation: This fault is caused by "dropped packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105695: fltTcaFabricAcDropExcess1yearDropPktCum

Severity: variable

Explanation: This fault is caused by "dropped packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105696: fltTcaFabricAcDropExcess5minDropPktPer

Severity: variable

Explanation: This fault is caused by "dropped packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105697: fltTcaFabricAcDropExcess15minDropPktPer

Severity: variable

Explanation: This fault is caused by "dropped packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105698: fltTcaFabricAcDropExcess1hDropPktPer

Severity: variable

Explanation: This fault is caused by "dropped packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105699: fltTcaFabricAcDropExcess1dDropPktPer

Severity: variable

Explanation: This fault is caused by "dropped packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105700: fltTcaFabricAcDropExcess1wDropPktPer

Severity: variable

Explanation: This fault is caused by "dropped packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105701: fltTcaFabricAcDropExcess1moDropPktPer

Severity: variable

Explanation: This fault is caused by "dropped packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105702: fltTcaFabricAcDropExcess1qtrDropPktPer

Severity: variable

Explanation: This fault is caused by "dropped packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105703: fltTcaFabricAcDropExcess1yearDropPktPer

Severity: variable

Explanation: This fault is caused by "dropped packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105704: fltTcaFabricAcDropExcess5minDropPktMin

Severity: variable

Explanation: This fault is caused by "dropped packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105705: fltTcaFabricAcDropExcess15minDropPktMin

Severity: variable

Explanation: This fault is caused by "dropped packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105706: fltTcaFabricAcDropExcess1hDropPktMin

Severity: variable

Explanation: This fault is caused by "dropped packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105707: fltTcaFabricAcDropExcess1dDropPktMin

Severity: variable

Explanation: This fault is caused by "dropped packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105708: fltTcaFabricAcDropExcess1wDropPktMin

Severity: variable

Explanation: This fault is caused by "dropped packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105709: fltTcaFabricAcDropExcess1moDropPktMin

Severity: variable

Explanation: This fault is caused by "dropped packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105710: fltTcaFabricAcDropExcess1qtrDropPktMin

Severity: variable

Explanation: This fault is caused by "dropped packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105711: fltTcaFabricAcDropExcess1yearDropPktMin

Severity: variable

Explanation: This fault is caused by "dropped packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105712: fltTcaFabricAcDropExcess5minDropPktMax

Severity: variable

Explanation: This fault is caused by "dropped packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105713: fltTcaFabricAcDropExcess15minDropPktMax

Severity: variable

Explanation: This fault is caused by "dropped packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105714: fltTcaFabricAcDropExcess1hDropPktMax

Severity: variable

Explanation: This fault is caused by "dropped packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105715: fltTcaFabricAcDropExcess1dDropPktMax

Severity: variable

Explanation: This fault is caused by "dropped packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105716: fltTcaFabricAcDropExcess1wDropPktMax

Severity: variable

Explanation: This fault is caused by "dropped packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105717: fltTcaFabricAcDropExcess1moDropPktMax

Severity: variable

Explanation: This fault is caused by "dropped packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105718: fltTcaFabricAcDropExcess1qtrDropPktMax

Severity: variable

Explanation: This fault is caused by "dropped packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105719: fltTcaFabricAcDropExcess1yearDropPktMax

Severity: variable

Explanation: This fault is caused by "dropped packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105720: fltTcaFabricAcDropExcess5minDropPktAvg

Severity: variable

Explanation: This fault is caused by "dropped packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105721: fltTcaFabricAcDropExcess15minDropPktAvg

Severity: variable

Explanation: This fault is caused by "dropped packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105722: fltTcaFabricAcDropExcess1hDropPktAvg

Severity: variable

Explanation: This fault is caused by "dropped packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105723: fltTcaFabricAcDropExcess1dDropPktAvg

Severity: variable

Explanation: This fault is caused by "dropped packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105724: fltTcaFabricAcDropExcess1wDropPktAvg

Severity: variable

Explanation: This fault is caused by "dropped packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105725: fltTcaFabricAcDropExcess1moDropPktAvg

Severity: variable

Explanation: This fault is caused by "dropped packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105726: fltTcaFabricAcDropExcess1qtrDropPktAvg

Severity: variable

Explanation: This fault is caused by "dropped packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105727: fltTcaFabricAcDropExcess1yearDropPktAvg

Severity: variable

Explanation: This fault is caused by "dropped packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105752: fltTcaFabricAcDropExcess5minDropPktTr

Severity: variable

Explanation: This fault is caused by "dropped packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105753: fltTcaFabricAcDropExcess15minDropPktTr

Severity: variable

Explanation: This fault is caused by "dropped packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105754: fltTcaFabricAcDropExcess1hDropPktTr

Severity: variable

Explanation: This fault is caused by "dropped packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105755: fltTcaFabricAcDropExcess1dDropPktTr

Severity: variable

Explanation: This fault is caused by "dropped packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105756: fltTcaFabricAcDropExcess1wDropPktTr

Severity: variable

Explanation: This fault is caused by "dropped packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105757: fltTcaFabricAcDropExcess1moDropPktTr

Severity: variable

Explanation: This fault is caused by "dropped packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105758: fltTcaFabricAcDropExcess1qtrDropPktTr

Severity: variable

Explanation: This fault is caused by "dropped packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105759: fltTcaFabricAcDropExcess1yearDropPktTr

Severity: variable

Explanation: This fault is caused by "dropped packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105760: fltTcaFabricAcDropExcess5minDropPktRate

Severity: variable

Explanation: This fault is caused by "dropped packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105761: fltTcaFabricAcDropExcess15minDropPktRate

Severity: variable

Explanation: This fault is caused by "dropped packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105762: fltTcaFabricAcDropExcess1hDropPktRate

Severity: variable

Explanation: This fault is caused by "dropped packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105763: fltTcaFabricAcDropExcess1dDropPktRate

Severity: variable

Explanation: This fault is caused by "dropped packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105764: fltTcaFabricAcDropExcess1wDropPktRate

Severity: variable

Explanation: This fault is caused by "dropped packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105765: fltTcaFabricAcDropExcess1moDropPktRate

Severity: variable

Explanation: This fault is caused by "dropped packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105766: fltTcaFabricAcDropExcess1qtrDropPktRate

Severity: variable

Explanation: This fault is caused by "dropped packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105767: fltTcaFabricAcDropExcess1yearDropPktRate

Severity: variable

Explanation: This fault is caused by "dropped packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1058: fltTestinfralabRsSnacksResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F105888: fltTcaFabricAcDropExcess5minDropPktPercentageLast

Severity: variable

Explanation: This fault is caused by "drop percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "drop percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105889: fltTcaFabricAcDropExcess15minDropPktPercentageLast

Severity: variable

Explanation: This fault is caused by "drop percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "drop percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105890: fltTcaFabricAcDropExcess1hDropPktPercentageLast

Severity: variable

Explanation: This fault is caused by "drop percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "drop percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105891: fltTcaFabricAcDropExcess1dDropPktPercentageLast

Severity: variable

Explanation: This fault is caused by "drop percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "drop percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105892: fltTcaFabricAcDropExcess1wDropPktPercentageLast

Severity: variable

Explanation: This fault is caused by "drop percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "drop percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105893: fltTcaFabricAcDropExcess1moDropPktPercentageLast

Severity: variable

Explanation: This fault is caused by "drop percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "drop percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105894: fltTcaFabricAcDropExcess1qtrDropPktPercentageLast

Severity: variable

Explanation: This fault is caused by "drop percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "drop percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105895: fltTcaFabricAcDropExcess1yearDropPktPercentageLast

Severity: variable

Explanation: This fault is caused by "drop percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "drop percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105896: fltTcaFabricAcDropExcess5minDropPktPercentageMin

Severity: variable

Explanation: This fault is caused by "drop percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "drop percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105897: fltTcaFabricAcDropExcess15minDropPktPercentageMin

Severity: variable

Explanation: This fault is caused by "drop percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "drop percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105898: fltTcaFabricAcDropExcess1hDropPktPercentageMin

Severity: variable

Explanation: This fault is caused by "drop percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "drop percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105899: fltTcaFabricAcDropExcess1dDropPktPercentageMin

Severity: variable

Explanation: This fault is caused by "drop percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "drop percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1059: fltTraceroutepRsTrEpDstResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F105900: fltTcaFabricAcDropExcess1wDropPktPercentageMin

Severity: variable

Explanation: This fault is caused by "drop percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "drop percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105901: fltTcaFabricAcDropExcess1moDropPktPercentageMin

Severity: variable

Explanation: This fault is caused by "drop percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "drop percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105902: fltTcaFabricAcDropExcess1qtrDropPktPercentageMin

Severity: variable

Explanation: This fault is caused by "drop percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "drop percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105903: fltTcaFabricAcDropExcess1yearDropPktPercentageMin

Severity: variable

Explanation: This fault is caused by "drop percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "drop percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105904: fltTcaFabricAcDropExcess5minDropPktPercentageMax

Severity: variable

Explanation: This fault is caused by "drop percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "drop percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105905: fltTcaFabricAcDropExcess15minDropPktPercentageMax

Severity: variable

Explanation: This fault is caused by "drop percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "drop percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105906: fltTcaFabricAcDropExcess1hDropPktPercentageMax

Severity: variable

Explanation: This fault is caused by "drop percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "drop percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105907: fltTcaFabricAcDropExcess1dDropPktPercentageMax

Severity: variable

Explanation: This fault is caused by "drop percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "drop percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105908: fltTcaFabricAcDropExcess1wDropPktPercentageMax

Severity: variable

Explanation: This fault is caused by "drop percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "drop percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105909: fltTcaFabricAcDropExcess1moDropPktPercentageMax

Severity: variable

Explanation: This fault is caused by "drop percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "drop percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105910: fltTcaFabricAcDropExcess1qtrDropPktPercentageMax

Severity: variable

Explanation: This fault is caused by "drop percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "drop percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105911: fltTcaFabricAcDropExcess1yearDropPktPercentageMax

Severity: variable

Explanation: This fault is caused by "drop percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "drop percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105912: fltTcaFabricAcDropExcess5minDropPktPercentageAvg

Severity: variable

Explanation: This fault is caused by "drop percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "drop percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105913: fltTcaFabricAcDropExcess15minDropPktPercentageAvg

Severity: variable

Explanation: This fault is caused by "drop percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "drop percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105914: fltTcaFabricAcDropExcess1hDropPktPercentageAvg

Severity: variable

Explanation: This fault is caused by "drop percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "drop percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105915: fltTcaFabricAcDropExcess1dDropPktPercentageAvg

Severity: variable

Explanation: This fault is caused by "drop percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "drop percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105916: fltTcaFabricAcDropExcess1wDropPktPercentageAvg

Severity: variable

Explanation: This fault is caused by "drop percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "drop percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105917: fltTcaFabricAcDropExcess1moDropPktPercentageAvg

Severity: variable

Explanation: This fault is caused by "drop percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "drop percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105918: fltTcaFabricAcDropExcess1qtrDropPktPercentageAvg

Severity: variable

Explanation: This fault is caused by "drop percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "drop percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105919: fltTcaFabricAcDropExcess1yearDropPktPercentageAvg

Severity: variable

Explanation: This fault is caused by "drop percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "drop percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105952: fltTcaFabricAcDropExcess5minDropPktPercentageTr

Severity: variable

Explanation: This fault is caused by "drop percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "drop percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105953: fltTcaFabricAcDropExcess15minDropPktPercentageTr

Severity: variable

Explanation: This fault is caused by "drop percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "drop percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105954: fltTcaFabricAcDropExcess1hDropPktPercentageTr

Severity: variable

Explanation: This fault is caused by "drop percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "drop percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105955: fltTcaFabricAcDropExcess1dDropPktPercentageTr

Severity: variable

Explanation: This fault is caused by "drop percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "drop percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105956: fltTcaFabricAcDropExcess1wDropPktPercentageTr

Severity: variable

Explanation: This fault is caused by "drop percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "drop percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105957: fltTcaFabricAcDropExcess1moDropPktPercentageTr

Severity: variable

Explanation: This fault is caused by "drop percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "drop percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105958: fltTcaFabricAcDropExcess1qtrDropPktPercentageTr

Severity: variable

Explanation: This fault is caused by "drop percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "drop percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F105959: fltTcaFabricAcDropExcess1yearDropPktPercentageTr

Severity: variable

Explanation: This fault is caused by "drop percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "drop percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1060: fltTraceroutepRsTrEpSrcResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F106056: fltTcaFabricAcDropExcess5minExcessPktLast

Severity: variable

Explanation: This fault is caused by "excess packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106057: fltTcaFabricAcDropExcess15minExcessPktLast

Severity: variable

Explanation: This fault is caused by "excess packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106058: fltTcaFabricAcDropExcess1hExcessPktLast

Severity: variable

Explanation: This fault is caused by "excess packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106059: fltTcaFabricAcDropExcess1dExcessPktLast

Severity: variable

Explanation: This fault is caused by "excess packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106060: fltTcaFabricAcDropExcess1wExcessPktLast

Severity: variable

Explanation: This fault is caused by "excess packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106061: fltTcaFabricAcDropExcess1moExcessPktLast

Severity: variable

Explanation: This fault is caused by "excess packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106062: fltTcaFabricAcDropExcess1qtrExcessPktLast

Severity: variable

Explanation: This fault is caused by "excess packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106063: fltTcaFabricAcDropExcess1yearExcessPktLast

Severity: variable

Explanation: This fault is caused by "excess packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106072: fltTcaFabricAcDropExcess5minExcessPktCum

Severity: variable

Explanation: This fault is caused by "excess packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106073: fltTcaFabricAcDropExcess15minExcessPktCum

Severity: variable

Explanation: This fault is caused by "excess packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106074: fltTcaFabricAcDropExcess1hExcessPktCum

Severity: variable

Explanation: This fault is caused by "excess packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106075: fltTcaFabricAcDropExcess1dExcessPktCum

Severity: variable

Explanation: This fault is caused by "excess packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106076: fltTcaFabricAcDropExcess1wExcessPktCum

Severity: variable

Explanation: This fault is caused by "excess packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106077: fltTcaFabricAcDropExcess1moExcessPktCum

Severity: variable

Explanation: This fault is caused by "excess packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106078: fltTcaFabricAcDropExcess1qtrExcessPktCum

Severity: variable

Explanation: This fault is caused by "excess packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106079: fltTcaFabricAcDropExcess1yearExcessPktCum

Severity: variable

Explanation: This fault is caused by "excess packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106080: fltTcaFabricAcDropExcess5minExcessPktPer

Severity: variable

Explanation: This fault is caused by "excess packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106081: fltTcaFabricAcDropExcess15minExcessPktPer

Severity: variable

Explanation: This fault is caused by "excess packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106082: fltTcaFabricAcDropExcess1hExcessPktPer

Severity: variable

Explanation: This fault is caused by "excess packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106083: fltTcaFabricAcDropExcess1dExcessPktPer

Severity: variable

Explanation: This fault is caused by "excess packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106084: fltTcaFabricAcDropExcess1wExcessPktPer

Severity: variable

Explanation: This fault is caused by "excess packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106085: fltTcaFabricAcDropExcess1moExcessPktPer

Severity: variable

Explanation: This fault is caused by "excess packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106086: fltTcaFabricAcDropExcess1qtrExcessPktPer

Severity: variable

Explanation: This fault is caused by "excess packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106087: fltTcaFabricAcDropExcess1yearExcessPktPer

Severity: variable

Explanation: This fault is caused by "excess packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106088: fltTcaFabricAcDropExcess5minExcessPktMin

Severity: variable

Explanation: This fault is caused by "excess packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106089: fltTcaFabricAcDropExcess15minExcessPktMin

Severity: variable

Explanation: This fault is caused by "excess packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106090: fltTcaFabricAcDropExcess1hExcessPktMin

Severity: variable

Explanation: This fault is caused by "excess packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106091: fltTcaFabricAcDropExcess1dExcessPktMin

Severity: variable

Explanation: This fault is caused by "excess packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106092: fltTcaFabricAcDropExcess1wExcessPktMin

Severity: variable

Explanation: This fault is caused by "excess packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106093: fltTcaFabricAcDropExcess1moExcessPktMin

Severity: variable

Explanation: This fault is caused by "excess packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106094: fltTcaFabricAcDropExcess1qtrExcessPktMin

Severity: variable

Explanation: This fault is caused by "excess packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106095: fltTcaFabricAcDropExcess1yearExcessPktMin

Severity: variable

Explanation: This fault is caused by "excess packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106096: fltTcaFabricAcDropExcess5minExcessPktMax

Severity: variable

Explanation: This fault is caused by "excess packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106097: fltTcaFabricAcDropExcess15minExcessPktMax

Severity: variable

Explanation: This fault is caused by "excess packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106098: fltTcaFabricAcDropExcess1hExcessPktMax

Severity: variable

Explanation: This fault is caused by "excess packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106099: fltTcaFabricAcDropExcess1dExcessPktMax

Severity: variable

Explanation: This fault is caused by "excess packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106100: fltTcaFabricAcDropExcess1wExcessPktMax

Severity: variable

Explanation: This fault is caused by "excess packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106101: fltTcaFabricAcDropExcess1moExcessPktMax

Severity: variable

Explanation: This fault is caused by "excess packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106102: fltTcaFabricAcDropExcess1qtrExcessPktMax

Severity: variable

Explanation: This fault is caused by "excess packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106103: fltTcaFabricAcDropExcess1yearExcessPktMax

Severity: variable

Explanation: This fault is caused by "excess packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106104: fltTcaFabricAcDropExcess5minExcessPktAvg

Severity: variable

Explanation: This fault is caused by "excess packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106105: fltTcaFabricAcDropExcess15minExcessPktAvg

Severity: variable

Explanation: This fault is caused by "excess packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106106: fltTcaFabricAcDropExcess1hExcessPktAvg

Severity: variable

Explanation: This fault is caused by "excess packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106107: fltTcaFabricAcDropExcess1dExcessPktAvg

Severity: variable

Explanation: This fault is caused by "excess packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106108: fltTcaFabricAcDropExcess1wExcessPktAvg

Severity: variable

Explanation: This fault is caused by "excess packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106109: fltTcaFabricAcDropExcess1moExcessPktAvg

Severity: variable

Explanation: This fault is caused by "excess packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106110: fltTcaFabricAcDropExcess1qtrExcessPktAvg

Severity: variable

Explanation: This fault is caused by "excess packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106111: fltTcaFabricAcDropExcess1yearExcessPktAvg

Severity: variable

Explanation: This fault is caused by "excess packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106136: fltTcaFabricAcDropExcess5minExcessPktTr

Severity: variable

Explanation: This fault is caused by "excess packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106137: fltTcaFabricAcDropExcess15minExcessPktTr

Severity: variable

Explanation: This fault is caused by "excess packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106138: fltTcaFabricAcDropExcess1hExcessPktTr

Severity: variable

Explanation: This fault is caused by "excess packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106139: fltTcaFabricAcDropExcess1dExcessPktTr

Severity: variable

Explanation: This fault is caused by "excess packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106140: fltTcaFabricAcDropExcess1wExcessPktTr

Severity: variable

Explanation: This fault is caused by "excess packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106141: fltTcaFabricAcDropExcess1moExcessPktTr

Severity: variable

Explanation: This fault is caused by "excess packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106142: fltTcaFabricAcDropExcess1qtrExcessPktTr

Severity: variable

Explanation: This fault is caused by "excess packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106143: fltTcaFabricAcDropExcess1yearExcessPktTr

Severity: variable

Explanation: This fault is caused by "excess packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106144: fltTcaFabricAcDropExcess5minExcessPktRate

Severity: variable

Explanation: This fault is caused by "excess packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106145: fltTcaFabricAcDropExcess15minExcessPktRate

Severity: variable

Explanation: This fault is caused by "excess packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106146: fltTcaFabricAcDropExcess1hExcessPktRate

Severity: variable

Explanation: This fault is caused by "excess packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106147: fltTcaFabricAcDropExcess1dExcessPktRate

Severity: variable

Explanation: This fault is caused by "excess packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106148: fltTcaFabricAcDropExcess1wExcessPktRate

Severity: variable

Explanation: This fault is caused by "excess packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106149: fltTcaFabricAcDropExcess1moExcessPktRate

Severity: variable

Explanation: This fault is caused by "excess packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106150: fltTcaFabricAcDropExcess1qtrExcessPktRate

Severity: variable

Explanation: This fault is caused by "excess packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106151: fltTcaFabricAcDropExcess1yearExcessPktRate

Severity: variable

Explanation: This fault is caused by "excess packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "excess packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1062: fltTrigRsTriggerableResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F106272: fltTcaFabricAcDropExcess5minExcessPktPercentageLast

Severity: variable

Explanation: This fault is caused by "excess percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106273: fltTcaFabricAcDropExcess15minExcessPktPercentageLast

Severity: variable

Explanation: This fault is caused by "excess percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106274: fltTcaFabricAcDropExcess1hExcessPktPercentageLast

Severity: variable

Explanation: This fault is caused by "excess percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106275: fltTcaFabricAcDropExcess1dExcessPktPercentageLast

Severity: variable

Explanation: This fault is caused by "excess percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106276: fltTcaFabricAcDropExcess1wExcessPktPercentageLast

Severity: variable

Explanation: This fault is caused by "excess percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106277: fltTcaFabricAcDropExcess1moExcessPktPercentageLast

Severity: variable

Explanation: This fault is caused by "excess percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106278: fltTcaFabricAcDropExcess1qtrExcessPktPercentageLast

Severity: variable

Explanation: This fault is caused by "excess percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106279: fltTcaFabricAcDropExcess1yearExcessPktPercentageLast

Severity: variable

Explanation: This fault is caused by "excess percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106280: fltTcaFabricAcDropExcess5minExcessPktPercentageMin

Severity: variable

Explanation: This fault is caused by "excess percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106281: fltTcaFabricAcDropExcess15minExcessPktPercentageMin

Severity: variable

Explanation: This fault is caused by "excess percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106282: fltTcaFabricAcDropExcess1hExcessPktPercentageMin

Severity: variable

Explanation: This fault is caused by "excess percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106283: fltTcaFabricAcDropExcess1dExcessPktPercentageMin

Severity: variable

Explanation: This fault is caused by "excess percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106284: fltTcaFabricAcDropExcess1wExcessPktPercentageMin

Severity: variable

Explanation: This fault is caused by "excess percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106285: fltTcaFabricAcDropExcess1moExcessPktPercentageMin

Severity: variable

Explanation: This fault is caused by "excess percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106286: fltTcaFabricAcDropExcess1qtrExcessPktPercentageMin

Severity: variable

Explanation: This fault is caused by "excess percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106287: fltTcaFabricAcDropExcess1yearExcessPktPercentageMin

Severity: variable

Explanation: This fault is caused by "excess percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106288: fltTcaFabricAcDropExcess5minExcessPktPercentageMax

Severity: variable

Explanation: This fault is caused by "excess percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106289: fltTcaFabricAcDropExcess15minExcessPktPercentageMax

Severity: variable

Explanation: This fault is caused by "excess percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106290: fltTcaFabricAcDropExcess1hExcessPktPercentageMax

Severity: variable

Explanation: This fault is caused by "excess percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106291: fltTcaFabricAcDropExcess1dExcessPktPercentageMax

Severity: variable

Explanation: This fault is caused by "excess percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106292: fltTcaFabricAcDropExcess1wExcessPktPercentageMax

Severity: variable

Explanation: This fault is caused by "excess percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106293: fltTcaFabricAcDropExcess1moExcessPktPercentageMax

Severity: variable

Explanation: This fault is caused by "excess percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106294: fltTcaFabricAcDropExcess1qtrExcessPktPercentageMax

Severity: variable

Explanation: This fault is caused by "excess percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106295: fltTcaFabricAcDropExcess1yearExcessPktPercentageMax

Severity: variable

Explanation: This fault is caused by "excess percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106296: fltTcaFabricAcDropExcess5minExcessPktPercentageAvg

Severity: variable

Explanation: This fault is caused by "excess percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106297: fltTcaFabricAcDropExcess15minExcessPktPercentageAvg

Severity: variable

Explanation: This fault is caused by "excess percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106298: fltTcaFabricAcDropExcess1hExcessPktPercentageAvg

Severity: variable

Explanation: This fault is caused by "excess percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106299: fltTcaFabricAcDropExcess1dExcessPktPercentageAvg

Severity: variable

Explanation: This fault is caused by "excess percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1063: fltVmmRsAccResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F106300: fltTcaFabricAcDropExcess1wExcessPktPercentageAvg

Severity: variable

Explanation: This fault is caused by "excess percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106301: fltTcaFabricAcDropExcess1moExcessPktPercentageAvg

Severity: variable

Explanation: This fault is caused by "excess percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106302: fltTcaFabricAcDropExcess1qtrExcessPktPercentageAvg

Severity: variable

Explanation: This fault is caused by "excess percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106303: fltTcaFabricAcDropExcess1yearExcessPktPercentageAvg

Severity: variable

Explanation: This fault is caused by "excess percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "excess percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106336: fltTcaFabricAcDropExcess5minExcessPktPercentageTr

Severity: variable

Explanation: This fault is caused by "excess percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "excess percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106337: fltTcaFabricAcDropExcess15minExcessPktPercentageTr

Severity: variable

Explanation: This fault is caused by "excess percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "excess percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106338: fltTcaFabricAcDropExcess1hExcessPktPercentageTr

Severity: variable

Explanation: This fault is caused by "excess percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "excess percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106339: fltTcaFabricAcDropExcess1dExcessPktPercentageTr

Severity: variable

Explanation: This fault is caused by "excess percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "excess percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106340: fltTcaFabricAcDropExcess1wExcessPktPercentageTr

Severity: variable

Explanation: This fault is caused by "excess percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "excess percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106341: fltTcaFabricAcDropExcess1moExcessPktPercentageTr

Severity: variable

Explanation: This fault is caused by "excess percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "excess percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106342: fltTcaFabricAcDropExcess1qtrExcessPktPercentageTr

Severity: variable

Explanation: This fault is caused by "excess percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "excess percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106343: fltTcaFabricAcDropExcess1yearExcessPktPercentageTr

Severity: variable

Explanation: This fault is caused by "excess percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "excess percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1064: fltVmmRsCtrlrPMonPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F106440: fltTcaFabricAcTxRx5minRxPktLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106441: fltTcaFabricAcTxRx15minRxPktLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106442: fltTcaFabricAcTxRx1hRxPktLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106443: fltTcaFabricAcTxRx1dRxPktLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106444: fltTcaFabricAcTxRx1wRxPktLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106445: fltTcaFabricAcTxRx1moRxPktLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106446: fltTcaFabricAcTxRx1qtrRxPktLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106447: fltTcaFabricAcTxRx1yearRxPktLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106456: fltTcaFabricAcTxRx5minRxPktCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106457: fltTcaFabricAcTxRx15minRxPktCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106458: fltTcaFabricAcTxRx1hRxPktCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106459: fltTcaFabricAcTxRx1dRxPktCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106460: fltTcaFabricAcTxRx1wRxPktCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106461: fltTcaFabricAcTxRx1moRxPktCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106462: fltTcaFabricAcTxRx1qtrRxPktCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106463: fltTcaFabricAcTxRx1yearRxPktCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106464: fltTcaFabricAcTxRx5minRxPktPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106465: fltTcaFabricAcTxRx15minRxPktPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106466: fltTcaFabricAcTxRx1hRxPktPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106467: fltTcaFabricAcTxRx1dRxPktPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106468: fltTcaFabricAcTxRx1wRxPktPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106469: fltTcaFabricAcTxRx1moRxPktPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106470: fltTcaFabricAcTxRx1qtrRxPktPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106471: fltTcaFabricAcTxRx1yearRxPktPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106472: fltTcaFabricAcTxRx5minRxPktMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106473: fltTcaFabricAcTxRx15minRxPktMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106474: fltTcaFabricAcTxRx1hRxPktMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106475: fltTcaFabricAcTxRx1dRxPktMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106476: fltTcaFabricAcTxRx1wRxPktMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106477: fltTcaFabricAcTxRx1moRxPktMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106478: fltTcaFabricAcTxRx1qtrRxPktMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106479: fltTcaFabricAcTxRx1yearRxPktMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106480: fltTcaFabricAcTxRx5minRxPktMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106481: fltTcaFabricAcTxRx15minRxPktMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106482: fltTcaFabricAcTxRx1hRxPktMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106483: fltTcaFabricAcTxRx1dRxPktMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106484: fltTcaFabricAcTxRx1wRxPktMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106485: fltTcaFabricAcTxRx1moRxPktMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106486: fltTcaFabricAcTxRx1qtrRxPktMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106487: fltTcaFabricAcTxRx1yearRxPktMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106488: fltTcaFabricAcTxRx5minRxPktAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106489: fltTcaFabricAcTxRx15minRxPktAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106490: fltTcaFabricAcTxRx1hRxPktAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106491: fltTcaFabricAcTxRx1dRxPktAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106492: fltTcaFabricAcTxRx1wRxPktAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106493: fltTcaFabricAcTxRx1moRxPktAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106494: fltTcaFabricAcTxRx1qtrRxPktAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106495: fltTcaFabricAcTxRx1yearRxPktAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1065: fltVmmRsMcastAddrNsResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F106520: fltTcaFabricAcTxRx5minRxPktTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106521: fltTcaFabricAcTxRx15minRxPktTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106522: fltTcaFabricAcTxRx1hRxPktTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106523: fltTcaFabricAcTxRx1dRxPktTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106524: fltTcaFabricAcTxRx1wRxPktTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106525: fltTcaFabricAcTxRx1moRxPktTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106526: fltTcaFabricAcTxRx1qtrRxPktTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106527: fltTcaFabricAcTxRx1yearRxPktTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106528: fltTcaFabricAcTxRx5minRxPktRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106529: fltTcaFabricAcTxRx15minRxPktRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106530: fltTcaFabricAcTxRx1hRxPktRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106531: fltTcaFabricAcTxRx1dRxPktRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106532: fltTcaFabricAcTxRx1wRxPktRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106533: fltTcaFabricAcTxRx1moRxPktRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106534: fltTcaFabricAcTxRx1qtrRxPktRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106535: fltTcaFabricAcTxRx1yearRxPktRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1066: fltVmmRsVmmCtrlrPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F106656: fltTcaFabricAcTxRx5minTxPktLast

Severity: variable

Explanation: This fault is caused by "transmitted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106657: fltTcaFabricAcTxRx15minTxPktLast

Severity: variable

Explanation: This fault is caused by "transmitted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106658: fltTcaFabricAcTxRx1hTxPktLast

Severity: variable

Explanation: This fault is caused by "transmitted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106659: fltTcaFabricAcTxRx1dTxPktLast

Severity: variable

Explanation: This fault is caused by "transmitted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106660: fltTcaFabricAcTxRx1wTxPktLast

Severity: variable

Explanation: This fault is caused by "transmitted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106661: fltTcaFabricAcTxRx1moTxPktLast

Severity: variable

Explanation: This fault is caused by "transmitted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106662: fltTcaFabricAcTxRx1qtrTxPktLast

Severity: variable

Explanation: This fault is caused by "transmitted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106663: fltTcaFabricAcTxRx1yearTxPktLast

Severity: variable

Explanation: This fault is caused by "transmitted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106672: fltTcaFabricAcTxRx5minTxPktCum

Severity: variable

Explanation: This fault is caused by "transmitted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106673: fltTcaFabricAcTxRx15minTxPktCum

Severity: variable

Explanation: This fault is caused by "transmitted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106674: fltTcaFabricAcTxRx1hTxPktCum

Severity: variable

Explanation: This fault is caused by "transmitted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106675: fltTcaFabricAcTxRx1dTxPktCum

Severity: variable

Explanation: This fault is caused by "transmitted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106676: fltTcaFabricAcTxRx1wTxPktCum

Severity: variable

Explanation: This fault is caused by "transmitted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106677: fltTcaFabricAcTxRx1moTxPktCum

Severity: variable

Explanation: This fault is caused by "transmitted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106678: fltTcaFabricAcTxRx1qtrTxPktCum

Severity: variable

Explanation: This fault is caused by "transmitted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106679: fltTcaFabricAcTxRx1yearTxPktCum

Severity: variable

Explanation: This fault is caused by "transmitted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106680: fltTcaFabricAcTxRx5minTxPktPer

Severity: variable

Explanation: This fault is caused by "transmitted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106681: fltTcaFabricAcTxRx15minTxPktPer

Severity: variable

Explanation: This fault is caused by "transmitted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106682: fltTcaFabricAcTxRx1hTxPktPer

Severity: variable

Explanation: This fault is caused by "transmitted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106683: fltTcaFabricAcTxRx1dTxPktPer

Severity: variable

Explanation: This fault is caused by "transmitted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106684: fltTcaFabricAcTxRx1wTxPktPer

Severity: variable

Explanation: This fault is caused by "transmitted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106685: fltTcaFabricAcTxRx1moTxPktPer

Severity: variable

Explanation: This fault is caused by "transmitted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106686: fltTcaFabricAcTxRx1qtrTxPktPer

Severity: variable

Explanation: This fault is caused by "transmitted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106687: fltTcaFabricAcTxRx1yearTxPktPer

Severity: variable

Explanation: This fault is caused by "transmitted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106688: fltTcaFabricAcTxRx5minTxPktMin

Severity: variable

Explanation: This fault is caused by "transmitted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106689: fltTcaFabricAcTxRx15minTxPktMin

Severity: variable

Explanation: This fault is caused by "transmitted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106690: fltTcaFabricAcTxRx1hTxPktMin

Severity: variable

Explanation: This fault is caused by "transmitted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106691: fltTcaFabricAcTxRx1dTxPktMin

Severity: variable

Explanation: This fault is caused by "transmitted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106692: fltTcaFabricAcTxRx1wTxPktMin

Severity: variable

Explanation: This fault is caused by "transmitted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106693: fltTcaFabricAcTxRx1moTxPktMin

Severity: variable

Explanation: This fault is caused by "transmitted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106694: fltTcaFabricAcTxRx1qtrTxPktMin

Severity: variable

Explanation: This fault is caused by "transmitted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106695: fltTcaFabricAcTxRx1yearTxPktMin

Severity: variable

Explanation: This fault is caused by "transmitted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106696: fltTcaFabricAcTxRx5minTxPktMax

Severity: variable

Explanation: This fault is caused by "transmitted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106697: fltTcaFabricAcTxRx15minTxPktMax

Severity: variable

Explanation: This fault is caused by "transmitted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106698: fltTcaFabricAcTxRx1hTxPktMax

Severity: variable

Explanation: This fault is caused by "transmitted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106699: fltTcaFabricAcTxRx1dTxPktMax

Severity: variable

Explanation: This fault is caused by "transmitted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1067: fltVmmRsVxlanNsResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F106700: fltTcaFabricAcTxRx1wTxPktMax

Severity: variable

Explanation: This fault is caused by "transmitted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106701: fltTcaFabricAcTxRx1moTxPktMax

Severity: variable

Explanation: This fault is caused by "transmitted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106702: fltTcaFabricAcTxRx1qtrTxPktMax

Severity: variable

Explanation: This fault is caused by "transmitted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106703: fltTcaFabricAcTxRx1yearTxPktMax

Severity: variable

Explanation: This fault is caused by "transmitted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106704: fltTcaFabricAcTxRx5minTxPktAvg

Severity: variable

Explanation: This fault is caused by "transmitted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106705: fltTcaFabricAcTxRx15minTxPktAvg

Severity: variable

Explanation: This fault is caused by "transmitted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106706: fltTcaFabricAcTxRx1hTxPktAvg

Severity: variable

Explanation: This fault is caused by "transmitted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106707: fltTcaFabricAcTxRx1dTxPktAvg

Severity: variable

Explanation: This fault is caused by "transmitted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106708: fltTcaFabricAcTxRx1wTxPktAvg

Severity: variable

Explanation: This fault is caused by "transmitted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106709: fltTcaFabricAcTxRx1moTxPktAvg

Severity: variable

Explanation: This fault is caused by "transmitted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106710: fltTcaFabricAcTxRx1qtrTxPktAvg

Severity: variable

Explanation: This fault is caused by "transmitted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106711: fltTcaFabricAcTxRx1yearTxPktAvg

Severity: variable

Explanation: This fault is caused by "transmitted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106736: fltTcaFabricAcTxRx5minTxPktTr

Severity: variable

Explanation: This fault is caused by "transmitted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106737: fltTcaFabricAcTxRx15minTxPktTr

Severity: variable

Explanation: This fault is caused by "transmitted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106738: fltTcaFabricAcTxRx1hTxPktTr

Severity: variable

Explanation: This fault is caused by "transmitted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106739: fltTcaFabricAcTxRx1dTxPktTr

Severity: variable

Explanation: This fault is caused by "transmitted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106740: fltTcaFabricAcTxRx1wTxPktTr

Severity: variable

Explanation: This fault is caused by "transmitted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106741: fltTcaFabricAcTxRx1moTxPktTr

Severity: variable

Explanation: This fault is caused by "transmitted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106742: fltTcaFabricAcTxRx1qtrTxPktTr

Severity: variable

Explanation: This fault is caused by "transmitted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106743: fltTcaFabricAcTxRx1yearTxPktTr

Severity: variable

Explanation: This fault is caused by "transmitted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106744: fltTcaFabricAcTxRx5minTxPktRate

Severity: variable

Explanation: This fault is caused by "transmitted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106745: fltTcaFabricAcTxRx15minTxPktRate

Severity: variable

Explanation: This fault is caused by "transmitted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106746: fltTcaFabricAcTxRx1hTxPktRate

Severity: variable

Explanation: This fault is caused by "transmitted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106747: fltTcaFabricAcTxRx1dTxPktRate

Severity: variable

Explanation: This fault is caused by "transmitted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106748: fltTcaFabricAcTxRx1wTxPktRate

Severity: variable

Explanation: This fault is caused by "transmitted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106749: fltTcaFabricAcTxRx1moTxPktRate

Severity: variable

Explanation: This fault is caused by "transmitted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106750: fltTcaFabricAcTxRx1qtrTxPktRate

Severity: variable

Explanation: This fault is caused by "transmitted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106751: fltTcaFabricAcTxRx1yearTxPktRate

Severity: variable

Explanation: This fault is caused by "transmitted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1068: fltVmmRsDefaultCdpIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F106872: fltTcaFabricNodeHealth5minHealthLast

Severity: variable

Explanation: This fault is caused by "health score current value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106873: fltTcaFabricNodeHealth15minHealthLast

Severity: variable

Explanation: This fault is caused by "health score current value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106874: fltTcaFabricNodeHealth1hHealthLast

Severity: variable

Explanation: This fault is caused by "health score current value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106875: fltTcaFabricNodeHealth1dHealthLast

Severity: variable

Explanation: This fault is caused by "health score current value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106876: fltTcaFabricNodeHealth1wHealthLast

Severity: variable

Explanation: This fault is caused by "health score current value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106877: fltTcaFabricNodeHealth1moHealthLast

Severity: variable

Explanation: This fault is caused by "health score current value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106878: fltTcaFabricNodeHealth1qtrHealthLast

Severity: variable

Explanation: This fault is caused by "health score current value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106879: fltTcaFabricNodeHealth1yearHealthLast

Severity: variable

Explanation: This fault is caused by "health score current value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106880: fltTcaFabricNodeHealth5minHealthMin

Severity: variable

Explanation: This fault is caused by "health score minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106881: fltTcaFabricNodeHealth15minHealthMin

Severity: variable

Explanation: This fault is caused by "health score minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106882: fltTcaFabricNodeHealth1hHealthMin

Severity: variable

Explanation: This fault is caused by "health score minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106883: fltTcaFabricNodeHealth1dHealthMin

Severity: variable

Explanation: This fault is caused by "health score minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106884: fltTcaFabricNodeHealth1wHealthMin

Severity: variable

Explanation: This fault is caused by "health score minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106885: fltTcaFabricNodeHealth1moHealthMin

Severity: variable

Explanation: This fault is caused by "health score minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106886: fltTcaFabricNodeHealth1qtrHealthMin

Severity: variable

Explanation: This fault is caused by "health score minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106887: fltTcaFabricNodeHealth1yearHealthMin

Severity: variable

Explanation: This fault is caused by "health score minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106888: fltTcaFabricNodeHealth5minHealthMax

Severity: variable

Explanation: This fault is caused by "health score maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106889: fltTcaFabricNodeHealth15minHealthMax

Severity: variable

Explanation: This fault is caused by "health score maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106890: fltTcaFabricNodeHealth1hHealthMax

Severity: variable

Explanation: This fault is caused by "health score maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106891: fltTcaFabricNodeHealth1dHealthMax

Severity: variable

Explanation: This fault is caused by "health score maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106892: fltTcaFabricNodeHealth1wHealthMax

Severity: variable

Explanation: This fault is caused by "health score maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106893: fltTcaFabricNodeHealth1moHealthMax

Severity: variable

Explanation: This fault is caused by "health score maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106894: fltTcaFabricNodeHealth1qtrHealthMax

Severity: variable

Explanation: This fault is caused by "health score maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106895: fltTcaFabricNodeHealth1yearHealthMax

Severity: variable

Explanation: This fault is caused by "health score maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106896: fltTcaFabricNodeHealth5minHealthAvg

Severity: variable

Explanation: This fault is caused by "health score average value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106897: fltTcaFabricNodeHealth15minHealthAvg

Severity: variable

Explanation: This fault is caused by "health score average value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106898: fltTcaFabricNodeHealth1hHealthAvg

Severity: variable

Explanation: This fault is caused by "health score average value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106899: fltTcaFabricNodeHealth1dHealthAvg

Severity: variable

Explanation: This fault is caused by "health score average value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1069: fltVmmRsDefaultL2InstPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F106900: fltTcaFabricNodeHealth1wHealthAvg

Severity: variable

Explanation: This fault is caused by "health score average value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106901: fltTcaFabricNodeHealth1moHealthAvg

Severity: variable

Explanation: This fault is caused by "health score average value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106902: fltTcaFabricNodeHealth1qtrHealthAvg

Severity: variable

Explanation: This fault is caused by "health score average value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106903: fltTcaFabricNodeHealth1yearHealthAvg

Severity: variable

Explanation: This fault is caused by "health score average value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106936: fltTcaFabricNodeHealth5minHealthTr

Severity: variable

Explanation: This fault is caused by "health score trend" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106937: fltTcaFabricNodeHealth15minHealthTr

Severity: variable

Explanation: This fault is caused by "health score trend" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106938: fltTcaFabricNodeHealth1hHealthTr

Severity: variable

Explanation: This fault is caused by "health score trend" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106939: fltTcaFabricNodeHealth1dHealthTr

Severity: variable

Explanation: This fault is caused by "health score trend" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106940: fltTcaFabricNodeHealth1wHealthTr

Severity: variable

Explanation: This fault is caused by "health score trend" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106941: fltTcaFabricNodeHealth1moHealthTr

Severity: variable

Explanation: This fault is caused by "health score trend" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106942: fltTcaFabricNodeHealth1qtrHealthTr

Severity: variable

Explanation: This fault is caused by "health score trend" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F106943: fltTcaFabricNodeHealth1yearHealthTr

Severity: variable

Explanation: This fault is caused by "health score trend" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1070: fltVmmRsDefaultLldpIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F107040: fltTcaFabricOverallHealth5minHealthLast

Severity: variable

Explanation: This fault is caused by "health score current value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107041: fltTcaFabricOverallHealth15minHealthLast

Severity: variable

Explanation: This fault is caused by "health score current value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107042: fltTcaFabricOverallHealth1hHealthLast

Severity: variable

Explanation: This fault is caused by "health score current value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107043: fltTcaFabricOverallHealth1dHealthLast

Severity: variable

Explanation: This fault is caused by "health score current value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107044: fltTcaFabricOverallHealth1wHealthLast

Severity: variable

Explanation: This fault is caused by "health score current value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107045: fltTcaFabricOverallHealth1moHealthLast

Severity: variable

Explanation: This fault is caused by "health score current value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107046: fltTcaFabricOverallHealth1qtrHealthLast

Severity: variable

Explanation: This fault is caused by "health score current value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107047: fltTcaFabricOverallHealth1yearHealthLast

Severity: variable

Explanation: This fault is caused by "health score current value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107048: fltTcaFabricOverallHealth5minHealthMin

Severity: variable

Explanation: This fault is caused by "health score minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107049: fltTcaFabricOverallHealth15minHealthMin

Severity: variable

Explanation: This fault is caused by "health score minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107050: fltTcaFabricOverallHealth1hHealthMin

Severity: variable

Explanation: This fault is caused by "health score minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107051: fltTcaFabricOverallHealth1dHealthMin

Severity: variable

Explanation: This fault is caused by "health score minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107052: fltTcaFabricOverallHealth1wHealthMin

Severity: variable

Explanation: This fault is caused by "health score minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107053: fltTcaFabricOverallHealth1moHealthMin

Severity: variable

Explanation: This fault is caused by "health score minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107054: fltTcaFabricOverallHealth1qtrHealthMin

Severity: variable

Explanation: This fault is caused by "health score minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107055: fltTcaFabricOverallHealth1yearHealthMin

Severity: variable

Explanation: This fault is caused by "health score minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107056: fltTcaFabricOverallHealth5minHealthMax

Severity: variable

Explanation: This fault is caused by "health score maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107057: fltTcaFabricOverallHealth15minHealthMax

Severity: variable

Explanation: This fault is caused by "health score maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107058: fltTcaFabricOverallHealth1hHealthMax

Severity: variable

Explanation: This fault is caused by "health score maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107059: fltTcaFabricOverallHealth1dHealthMax

Severity: variable

Explanation: This fault is caused by "health score maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107060: fltTcaFabricOverallHealth1wHealthMax

Severity: variable

Explanation: This fault is caused by "health score maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107061: fltTcaFabricOverallHealth1moHealthMax

Severity: variable

Explanation: This fault is caused by "health score maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107062: fltTcaFabricOverallHealth1qtrHealthMax

Severity: variable

Explanation: This fault is caused by "health score maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107063: fltTcaFabricOverallHealth1yearHealthMax

Severity: variable

Explanation: This fault is caused by "health score maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107064: fltTcaFabricOverallHealth5minHealthAvg

Severity: variable

Explanation: This fault is caused by "health score average value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107065: fltTcaFabricOverallHealth15minHealthAvg

Severity: variable

Explanation: This fault is caused by "health score average value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107066: fltTcaFabricOverallHealth1hHealthAvg

Severity: variable

Explanation: This fault is caused by "health score average value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107067: fltTcaFabricOverallHealth1dHealthAvg

Severity: variable

Explanation: This fault is caused by "health score average value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107068: fltTcaFabricOverallHealth1wHealthAvg

Severity: variable

Explanation: This fault is caused by "health score average value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107069: fltTcaFabricOverallHealth1moHealthAvg

Severity: variable

Explanation: This fault is caused by "health score average value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107070: fltTcaFabricOverallHealth1qtrHealthAvg

Severity: variable

Explanation: This fault is caused by "health score average value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107071: fltTcaFabricOverallHealth1yearHealthAvg

Severity: variable

Explanation: This fault is caused by "health score average value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1071: fltVmmRsDefaultStpIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F107104: fltTcaFabricOverallHealth5minHealthTr

Severity: variable

Explanation: This fault is caused by "health score trend" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107105: fltTcaFabricOverallHealth15minHealthTr

Severity: variable

Explanation: This fault is caused by "health score trend" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107106: fltTcaFabricOverallHealth1hHealthTr

Severity: variable

Explanation: This fault is caused by "health score trend" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107107: fltTcaFabricOverallHealth1dHealthTr

Severity: variable

Explanation: This fault is caused by "health score trend" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107108: fltTcaFabricOverallHealth1wHealthTr

Severity: variable

Explanation: This fault is caused by "health score trend" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107109: fltTcaFabricOverallHealth1moHealthTr

Severity: variable

Explanation: This fault is caused by "health score trend" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107110: fltTcaFabricOverallHealth1qtrHealthTr

Severity: variable

Explanation: This fault is caused by "health score trend" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107111: fltTcaFabricOverallHealth1yearHealthTr

Severity: variable

Explanation: This fault is caused by "health score trend" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107160: fltTcaFvOverallHealth5minHealthLast

Severity: variable

Explanation: This fault is caused by "health score current value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107161: fltTcaFvOverallHealth15minHealthLast

Severity: variable

Explanation: This fault is caused by "health score current value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107162: fltTcaFvOverallHealth1hHealthLast

Severity: variable

Explanation: This fault is caused by "health score current value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107163: fltTcaFvOverallHealth1dHealthLast

Severity: variable

Explanation: This fault is caused by "health score current value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107164: fltTcaFvOverallHealth1wHealthLast

Severity: variable

Explanation: This fault is caused by "health score current value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107165: fltTcaFvOverallHealth1moHealthLast

Severity: variable

Explanation: This fault is caused by "health score current value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107166: fltTcaFvOverallHealth1qtrHealthLast

Severity: variable

Explanation: This fault is caused by "health score current value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107167: fltTcaFvOverallHealth1yearHealthLast

Severity: variable

Explanation: This fault is caused by "health score current value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107168: fltTcaFvOverallHealth5minHealthMin

Severity: variable

Explanation: This fault is caused by "health score minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107169: fltTcaFvOverallHealth15minHealthMin

Severity: variable

Explanation: This fault is caused by "health score minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107170: fltTcaFvOverallHealth1hHealthMin

Severity: variable

Explanation: This fault is caused by "health score minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107171: fltTcaFvOverallHealth1dHealthMin

Severity: variable

Explanation: This fault is caused by "health score minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107172: fltTcaFvOverallHealth1wHealthMin

Severity: variable

Explanation: This fault is caused by "health score minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107173: fltTcaFvOverallHealth1moHealthMin

Severity: variable

Explanation: This fault is caused by "health score minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107174: fltTcaFvOverallHealth1qtrHealthMin

Severity: variable

Explanation: This fault is caused by "health score minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107175: fltTcaFvOverallHealth1yearHealthMin

Severity: variable

Explanation: This fault is caused by "health score minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107176: fltTcaFvOverallHealth5minHealthMax

Severity: variable

Explanation: This fault is caused by "health score maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107177: fltTcaFvOverallHealth15minHealthMax

Severity: variable

Explanation: This fault is caused by "health score maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107178: fltTcaFvOverallHealth1hHealthMax

Severity: variable

Explanation: This fault is caused by "health score maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107179: fltTcaFvOverallHealth1dHealthMax

Severity: variable

Explanation: This fault is caused by "health score maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107180: fltTcaFvOverallHealth1wHealthMax

Severity: variable

Explanation: This fault is caused by "health score maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107181: fltTcaFvOverallHealth1moHealthMax

Severity: variable

Explanation: This fault is caused by "health score maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107182: fltTcaFvOverallHealth1qtrHealthMax

Severity: variable

Explanation: This fault is caused by "health score maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107183: fltTcaFvOverallHealth1yearHealthMax

Severity: variable

Explanation: This fault is caused by "health score maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107184: fltTcaFvOverallHealth5minHealthAvg

Severity: variable

Explanation: This fault is caused by "health score average value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107185: fltTcaFvOverallHealth15minHealthAvg

Severity: variable

Explanation: This fault is caused by "health score average value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107186: fltTcaFvOverallHealth1hHealthAvg

Severity: variable

Explanation: This fault is caused by "health score average value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107187: fltTcaFvOverallHealth1dHealthAvg

Severity: variable

Explanation: This fault is caused by "health score average value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107188: fltTcaFvOverallHealth1wHealthAvg

Severity: variable

Explanation: This fault is caused by "health score average value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107189: fltTcaFvOverallHealth1moHealthAvg

Severity: variable

Explanation: This fault is caused by "health score average value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107190: fltTcaFvOverallHealth1qtrHealthAvg

Severity: variable

Explanation: This fault is caused by "health score average value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107191: fltTcaFvOverallHealth1yearHealthAvg

Severity: variable

Explanation: This fault is caused by "health score average value" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107224: fltTcaFvOverallHealth5minHealthTr

Severity: variable

Explanation: This fault is caused by "health score trend" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107225: fltTcaFvOverallHealth15minHealthTr

Severity: variable

Explanation: This fault is caused by "health score trend" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107226: fltTcaFvOverallHealth1hHealthTr

Severity: variable

Explanation: This fault is caused by "health score trend" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107227: fltTcaFvOverallHealth1dHealthTr

Severity: variable

Explanation: This fault is caused by "health score trend" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107228: fltTcaFvOverallHealth1wHealthTr

Severity: variable

Explanation: This fault is caused by "health score trend" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107229: fltTcaFvOverallHealth1moHealthTr

Severity: variable

Explanation: This fault is caused by "health score trend" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107230: fltTcaFvOverallHealth1qtrHealthTr

Severity: variable

Explanation: This fault is caused by "health score trend" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107231: fltTcaFvOverallHealth1yearHealthTr

Severity: variable

Explanation: This fault is caused by "health score trend" statistical property crossing threshold level.

Recommended Action: Check the values of "health score" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107280: fltTcaInfraClusterStats5minA2uCountLast

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions current value" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107281: fltTcaInfraClusterStats15minA2uCountLast

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions current value" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107282: fltTcaInfraClusterStats1hA2uCountLast

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions current value" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107283: fltTcaInfraClusterStats1dA2uCountLast

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions current value" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107284: fltTcaInfraClusterStats1wA2uCountLast

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions current value" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107285: fltTcaInfraClusterStats1moA2uCountLast

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions current value" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107286: fltTcaInfraClusterStats1qtrA2uCountLast

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions current value" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107287: fltTcaInfraClusterStats1yearA2uCountLast

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions current value" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107296: fltTcaInfraClusterStats5minA2uCountCum

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107297: fltTcaInfraClusterStats15minA2uCountCum

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107298: fltTcaInfraClusterStats1hA2uCountCum

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107299: fltTcaInfraClusterStats1dA2uCountCum

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1073: fltVnsRsCfgToConnResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F107300: fltTcaInfraClusterStats1wA2uCountCum

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107301: fltTcaInfraClusterStats1moA2uCountCum

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107302: fltTcaInfraClusterStats1qtrA2uCountCum

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107303: fltTcaInfraClusterStats1yearA2uCountCum

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107304: fltTcaInfraClusterStats5minA2uCountPer

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107305: fltTcaInfraClusterStats15minA2uCountPer

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107306: fltTcaInfraClusterStats1hA2uCountPer

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107307: fltTcaInfraClusterStats1dA2uCountPer

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107308: fltTcaInfraClusterStats1wA2uCountPer

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107309: fltTcaInfraClusterStats1moA2uCountPer

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107310: fltTcaInfraClusterStats1qtrA2uCountPer

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107311: fltTcaInfraClusterStats1yearA2uCountPer

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107312: fltTcaInfraClusterStats5minA2uCountMin

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107313: fltTcaInfraClusterStats15minA2uCountMin

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107314: fltTcaInfraClusterStats1hA2uCountMin

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107315: fltTcaInfraClusterStats1dA2uCountMin

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107316: fltTcaInfraClusterStats1wA2uCountMin

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107317: fltTcaInfraClusterStats1moA2uCountMin

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107318: fltTcaInfraClusterStats1qtrA2uCountMin

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107319: fltTcaInfraClusterStats1yearA2uCountMin

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107320: fltTcaInfraClusterStats5minA2uCountMax

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107321: fltTcaInfraClusterStats15minA2uCountMax

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107322: fltTcaInfraClusterStats1hA2uCountMax

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107323: fltTcaInfraClusterStats1dA2uCountMax

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107324: fltTcaInfraClusterStats1wA2uCountMax

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107325: fltTcaInfraClusterStats1moA2uCountMax

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107326: fltTcaInfraClusterStats1qtrA2uCountMax

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107327: fltTcaInfraClusterStats1yearA2uCountMax

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107328: fltTcaInfraClusterStats5minA2uCountAvg

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions average value" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107329: fltTcaInfraClusterStats15minA2uCountAvg

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions average value" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107330: fltTcaInfraClusterStats1hA2uCountAvg

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions average value" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107331: fltTcaInfraClusterStats1dA2uCountAvg

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions average value" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107332: fltTcaInfraClusterStats1wA2uCountAvg

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions average value" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107333: fltTcaInfraClusterStats1moA2uCountAvg

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions average value" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107334: fltTcaInfraClusterStats1qtrA2uCountAvg

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions average value" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107335: fltTcaInfraClusterStats1yearA2uCountAvg

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions average value" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107360: fltTcaInfraClusterStats5minA2uCountTr

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions trend" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107361: fltTcaInfraClusterStats15minA2uCountTr

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions trend" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107362: fltTcaInfraClusterStats1hA2uCountTr

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions trend" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107363: fltTcaInfraClusterStats1dA2uCountTr

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions trend" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107364: fltTcaInfraClusterStats1wA2uCountTr

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions trend" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107365: fltTcaInfraClusterStats1moA2uCountTr

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions trend" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107366: fltTcaInfraClusterStats1qtrA2uCountTr

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions trend" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107367: fltTcaInfraClusterStats1yearA2uCountTr

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions trend" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107368: fltTcaInfraClusterStats5minA2uCountRate

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions rate" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107369: fltTcaInfraClusterStats15minA2uCountRate

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions rate" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107370: fltTcaInfraClusterStats1hA2uCountRate

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions rate" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107371: fltTcaInfraClusterStats1dA2uCountRate

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions rate" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107372: fltTcaInfraClusterStats1wA2uCountRate

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions rate" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107373: fltTcaInfraClusterStats1moA2uCountRate

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions rate" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107374: fltTcaInfraClusterStats1qtrA2uCountRate

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions rate" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107375: fltTcaInfraClusterStats1yearA2uCountRate

Severity: variable

Explanation: This fault is caused by "active to unavailable transitions rate" statistical property crossing threshold level.

Recommended Action: Check the values of "active to unavailable transitions" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107496: fltTcaInfraClusterStats5minUTimeLast

Severity: variable

Explanation: This fault is caused by "time in unavailable state current value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in unavailable state" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107497: fltTcaInfraClusterStats15minUTimeLast

Severity: variable

Explanation: This fault is caused by "time in unavailable state current value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in unavailable state" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107498: fltTcaInfraClusterStats1hUTimeLast

Severity: variable

Explanation: This fault is caused by "time in unavailable state current value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in unavailable state" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107499: fltTcaInfraClusterStats1dUTimeLast

Severity: variable

Explanation: This fault is caused by "time in unavailable state current value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in unavailable state" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1075: fltVnsRsScopeToTermResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F107500: fltTcaInfraClusterStats1wUTimeLast

Severity: variable

Explanation: This fault is caused by "time in unavailable state current value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in unavailable state" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107501: fltTcaInfraClusterStats1moUTimeLast

Severity: variable

Explanation: This fault is caused by "time in unavailable state current value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in unavailable state" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107502: fltTcaInfraClusterStats1qtrUTimeLast

Severity: variable

Explanation: This fault is caused by "time in unavailable state current value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in unavailable state" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107503: fltTcaInfraClusterStats1yearUTimeLast

Severity: variable

Explanation: This fault is caused by "time in unavailable state current value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in unavailable state" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107528: fltTcaInfraClusterStats5minUTimeMin

Severity: variable

Explanation: This fault is caused by "time in unavailable state minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in unavailable state" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107529: fltTcaInfraClusterStats15minUTimeMin

Severity: variable

Explanation: This fault is caused by "time in unavailable state minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in unavailable state" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107530: fltTcaInfraClusterStats1hUTimeMin

Severity: variable

Explanation: This fault is caused by "time in unavailable state minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in unavailable state" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107531: fltTcaInfraClusterStats1dUTimeMin

Severity: variable

Explanation: This fault is caused by "time in unavailable state minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in unavailable state" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107532: fltTcaInfraClusterStats1wUTimeMin

Severity: variable

Explanation: This fault is caused by "time in unavailable state minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in unavailable state" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107533: fltTcaInfraClusterStats1moUTimeMin

Severity: variable

Explanation: This fault is caused by "time in unavailable state minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in unavailable state" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107534: fltTcaInfraClusterStats1qtrUTimeMin

Severity: variable

Explanation: This fault is caused by "time in unavailable state minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in unavailable state" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107535: fltTcaInfraClusterStats1yearUTimeMin

Severity: variable

Explanation: This fault is caused by "time in unavailable state minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in unavailable state" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107536: fltTcaInfraClusterStats5minUTimeMax

Severity: variable

Explanation: This fault is caused by "time in unavailable state maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in unavailable state" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107537: fltTcaInfraClusterStats15minUTimeMax

Severity: variable

Explanation: This fault is caused by "time in unavailable state maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in unavailable state" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107538: fltTcaInfraClusterStats1hUTimeMax

Severity: variable

Explanation: This fault is caused by "time in unavailable state maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in unavailable state" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107539: fltTcaInfraClusterStats1dUTimeMax

Severity: variable

Explanation: This fault is caused by "time in unavailable state maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in unavailable state" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107540: fltTcaInfraClusterStats1wUTimeMax

Severity: variable

Explanation: This fault is caused by "time in unavailable state maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in unavailable state" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107541: fltTcaInfraClusterStats1moUTimeMax

Severity: variable

Explanation: This fault is caused by "time in unavailable state maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in unavailable state" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107542: fltTcaInfraClusterStats1qtrUTimeMax

Severity: variable

Explanation: This fault is caused by "time in unavailable state maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in unavailable state" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107543: fltTcaInfraClusterStats1yearUTimeMax

Severity: variable

Explanation: This fault is caused by "time in unavailable state maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in unavailable state" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107544: fltTcaInfraClusterStats5minUTimeAvg

Severity: variable

Explanation: This fault is caused by "time in unavailable state average value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in unavailable state" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107545: fltTcaInfraClusterStats15minUTimeAvg

Severity: variable

Explanation: This fault is caused by "time in unavailable state average value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in unavailable state" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107546: fltTcaInfraClusterStats1hUTimeAvg

Severity: variable

Explanation: This fault is caused by "time in unavailable state average value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in unavailable state" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107547: fltTcaInfraClusterStats1dUTimeAvg

Severity: variable

Explanation: This fault is caused by "time in unavailable state average value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in unavailable state" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107548: fltTcaInfraClusterStats1wUTimeAvg

Severity: variable

Explanation: This fault is caused by "time in unavailable state average value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in unavailable state" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107549: fltTcaInfraClusterStats1moUTimeAvg

Severity: variable

Explanation: This fault is caused by "time in unavailable state average value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in unavailable state" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107550: fltTcaInfraClusterStats1qtrUTimeAvg

Severity: variable

Explanation: This fault is caused by "time in unavailable state average value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in unavailable state" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107551: fltTcaInfraClusterStats1yearUTimeAvg

Severity: variable

Explanation: This fault is caused by "time in unavailable state average value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in unavailable state" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107576: fltTcaInfraClusterStats5minUTimeTr

Severity: variable

Explanation: This fault is caused by "time in unavailable state trend" statistical property crossing threshold level.

Recommended Action: Check the values of "time in unavailable state" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107577: fltTcaInfraClusterStats15minUTimeTr

Severity: variable

Explanation: This fault is caused by "time in unavailable state trend" statistical property crossing threshold level.

Recommended Action: Check the values of "time in unavailable state" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107578: fltTcaInfraClusterStats1hUTimeTr

Severity: variable

Explanation: This fault is caused by "time in unavailable state trend" statistical property crossing threshold level.

Recommended Action: Check the values of "time in unavailable state" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107579: fltTcaInfraClusterStats1dUTimeTr

Severity: variable

Explanation: This fault is caused by "time in unavailable state trend" statistical property crossing threshold level.

Recommended Action: Check the values of "time in unavailable state" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107580: fltTcaInfraClusterStats1wUTimeTr

Severity: variable

Explanation: This fault is caused by "time in unavailable state trend" statistical property crossing threshold level.

Recommended Action: Check the values of "time in unavailable state" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107581: fltTcaInfraClusterStats1moUTimeTr

Severity: variable

Explanation: This fault is caused by "time in unavailable state trend" statistical property crossing threshold level.

Recommended Action: Check the values of "time in unavailable state" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107582: fltTcaInfraClusterStats1qtrUTimeTr

Severity: variable

Explanation: This fault is caused by "time in unavailable state trend" statistical property crossing threshold level.

Recommended Action: Check the values of "time in unavailable state" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107583: fltTcaInfraClusterStats1yearUTimeTr

Severity: variable

Explanation: This fault is caused by "time in unavailable state trend" statistical property crossing threshold level.

Recommended Action: Check the values of "time in unavailable state" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1076: fltVnsRsConnToCtxTermResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1077: fltVnsRsConnToFltResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F107712: fltTcaInfraReplicaStats5minPersTLast

Severity: variable

Explanation: This fault is caused by "time in persistification current value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107713: fltTcaInfraReplicaStats15minPersTLast

Severity: variable

Explanation: This fault is caused by "time in persistification current value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107714: fltTcaInfraReplicaStats1hPersTLast

Severity: variable

Explanation: This fault is caused by "time in persistification current value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107715: fltTcaInfraReplicaStats1dPersTLast

Severity: variable

Explanation: This fault is caused by "time in persistification current value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107716: fltTcaInfraReplicaStats1wPersTLast

Severity: variable

Explanation: This fault is caused by "time in persistification current value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107717: fltTcaInfraReplicaStats1moPersTLast

Severity: variable

Explanation: This fault is caused by "time in persistification current value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107718: fltTcaInfraReplicaStats1qtrPersTLast

Severity: variable

Explanation: This fault is caused by "time in persistification current value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107719: fltTcaInfraReplicaStats1yearPersTLast

Severity: variable

Explanation: This fault is caused by "time in persistification current value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107728: fltTcaInfraReplicaStats5minPersTCum

Severity: variable

Explanation: This fault is caused by "time in persistification cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107729: fltTcaInfraReplicaStats15minPersTCum

Severity: variable

Explanation: This fault is caused by "time in persistification cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107730: fltTcaInfraReplicaStats1hPersTCum

Severity: variable

Explanation: This fault is caused by "time in persistification cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107731: fltTcaInfraReplicaStats1dPersTCum

Severity: variable

Explanation: This fault is caused by "time in persistification cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107732: fltTcaInfraReplicaStats1wPersTCum

Severity: variable

Explanation: This fault is caused by "time in persistification cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107733: fltTcaInfraReplicaStats1moPersTCum

Severity: variable

Explanation: This fault is caused by "time in persistification cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107734: fltTcaInfraReplicaStats1qtrPersTCum

Severity: variable

Explanation: This fault is caused by "time in persistification cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107735: fltTcaInfraReplicaStats1yearPersTCum

Severity: variable

Explanation: This fault is caused by "time in persistification cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107736: fltTcaInfraReplicaStats5minPersTPer

Severity: variable

Explanation: This fault is caused by "time in persistification periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107737: fltTcaInfraReplicaStats15minPersTPer

Severity: variable

Explanation: This fault is caused by "time in persistification periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107738: fltTcaInfraReplicaStats1hPersTPer

Severity: variable

Explanation: This fault is caused by "time in persistification periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107739: fltTcaInfraReplicaStats1dPersTPer

Severity: variable

Explanation: This fault is caused by "time in persistification periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107740: fltTcaInfraReplicaStats1wPersTPer

Severity: variable

Explanation: This fault is caused by "time in persistification periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107741: fltTcaInfraReplicaStats1moPersTPer

Severity: variable

Explanation: This fault is caused by "time in persistification periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107742: fltTcaInfraReplicaStats1qtrPersTPer

Severity: variable

Explanation: This fault is caused by "time in persistification periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107743: fltTcaInfraReplicaStats1yearPersTPer

Severity: variable

Explanation: This fault is caused by "time in persistification periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107744: fltTcaInfraReplicaStats5minPersTMin

Severity: variable

Explanation: This fault is caused by "time in persistification minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107745: fltTcaInfraReplicaStats15minPersTMin

Severity: variable

Explanation: This fault is caused by "time in persistification minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107746: fltTcaInfraReplicaStats1hPersTMin

Severity: variable

Explanation: This fault is caused by "time in persistification minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107747: fltTcaInfraReplicaStats1dPersTMin

Severity: variable

Explanation: This fault is caused by "time in persistification minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107748: fltTcaInfraReplicaStats1wPersTMin

Severity: variable

Explanation: This fault is caused by "time in persistification minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107749: fltTcaInfraReplicaStats1moPersTMin

Severity: variable

Explanation: This fault is caused by "time in persistification minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107750: fltTcaInfraReplicaStats1qtrPersTMin

Severity: variable

Explanation: This fault is caused by "time in persistification minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107751: fltTcaInfraReplicaStats1yearPersTMin

Severity: variable

Explanation: This fault is caused by "time in persistification minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107752: fltTcaInfraReplicaStats5minPersTMax

Severity: variable

Explanation: This fault is caused by "time in persistification maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107753: fltTcaInfraReplicaStats15minPersTMax

Severity: variable

Explanation: This fault is caused by "time in persistification maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107754: fltTcaInfraReplicaStats1hPersTMax

Severity: variable

Explanation: This fault is caused by "time in persistification maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107755: fltTcaInfraReplicaStats1dPersTMax

Severity: variable

Explanation: This fault is caused by "time in persistification maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107756: fltTcaInfraReplicaStats1wPersTMax

Severity: variable

Explanation: This fault is caused by "time in persistification maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107757: fltTcaInfraReplicaStats1moPersTMax

Severity: variable

Explanation: This fault is caused by "time in persistification maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107758: fltTcaInfraReplicaStats1qtrPersTMax

Severity: variable

Explanation: This fault is caused by "time in persistification maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107759: fltTcaInfraReplicaStats1yearPersTMax

Severity: variable

Explanation: This fault is caused by "time in persistification maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107760: fltTcaInfraReplicaStats5minPersTAvg

Severity: variable

Explanation: This fault is caused by "time in persistification average value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107761: fltTcaInfraReplicaStats15minPersTAvg

Severity: variable

Explanation: This fault is caused by "time in persistification average value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107762: fltTcaInfraReplicaStats1hPersTAvg

Severity: variable

Explanation: This fault is caused by "time in persistification average value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107763: fltTcaInfraReplicaStats1dPersTAvg

Severity: variable

Explanation: This fault is caused by "time in persistification average value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107764: fltTcaInfraReplicaStats1wPersTAvg

Severity: variable

Explanation: This fault is caused by "time in persistification average value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107765: fltTcaInfraReplicaStats1moPersTAvg

Severity: variable

Explanation: This fault is caused by "time in persistification average value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107766: fltTcaInfraReplicaStats1qtrPersTAvg

Severity: variable

Explanation: This fault is caused by "time in persistification average value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107767: fltTcaInfraReplicaStats1yearPersTAvg

Severity: variable

Explanation: This fault is caused by "time in persistification average value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107792: fltTcaInfraReplicaStats5minPersTTr

Severity: variable

Explanation: This fault is caused by "time in persistification trend" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107793: fltTcaInfraReplicaStats15minPersTTr

Severity: variable

Explanation: This fault is caused by "time in persistification trend" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107794: fltTcaInfraReplicaStats1hPersTTr

Severity: variable

Explanation: This fault is caused by "time in persistification trend" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107795: fltTcaInfraReplicaStats1dPersTTr

Severity: variable

Explanation: This fault is caused by "time in persistification trend" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107796: fltTcaInfraReplicaStats1wPersTTr

Severity: variable

Explanation: This fault is caused by "time in persistification trend" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107797: fltTcaInfraReplicaStats1moPersTTr

Severity: variable

Explanation: This fault is caused by "time in persistification trend" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107798: fltTcaInfraReplicaStats1qtrPersTTr

Severity: variable

Explanation: This fault is caused by "time in persistification trend" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107799: fltTcaInfraReplicaStats1yearPersTTr

Severity: variable

Explanation: This fault is caused by "time in persistification trend" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107800: fltTcaInfraReplicaStats5minPersTRate

Severity: variable

Explanation: This fault is caused by "time in persistification rate" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107801: fltTcaInfraReplicaStats15minPersTRate

Severity: variable

Explanation: This fault is caused by "time in persistification rate" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107802: fltTcaInfraReplicaStats1hPersTRate

Severity: variable

Explanation: This fault is caused by "time in persistification rate" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107803: fltTcaInfraReplicaStats1dPersTRate

Severity: variable

Explanation: This fault is caused by "time in persistification rate" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107804: fltTcaInfraReplicaStats1wPersTRate

Severity: variable

Explanation: This fault is caused by "time in persistification rate" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107805: fltTcaInfraReplicaStats1moPersTRate

Severity: variable

Explanation: This fault is caused by "time in persistification rate" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107806: fltTcaInfraReplicaStats1qtrPersTRate

Severity: variable

Explanation: This fault is caused by "time in persistification rate" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107807: fltTcaInfraReplicaStats1yearPersTRate

Severity: variable

Explanation: This fault is caused by "time in persistification rate" statistical property crossing threshold level.

Recommended Action: Check the values of "time in persistification" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1079: fltVnsRsMConnAttResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F107928: fltTcaInfraReplicaStats5minReplTLast

Severity: variable

Explanation: This fault is caused by "time in replication current value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107929: fltTcaInfraReplicaStats15minReplTLast

Severity: variable

Explanation: This fault is caused by "time in replication current value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107930: fltTcaInfraReplicaStats1hReplTLast

Severity: variable

Explanation: This fault is caused by "time in replication current value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107931: fltTcaInfraReplicaStats1dReplTLast

Severity: variable

Explanation: This fault is caused by "time in replication current value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107932: fltTcaInfraReplicaStats1wReplTLast

Severity: variable

Explanation: This fault is caused by "time in replication current value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107933: fltTcaInfraReplicaStats1moReplTLast

Severity: variable

Explanation: This fault is caused by "time in replication current value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107934: fltTcaInfraReplicaStats1qtrReplTLast

Severity: variable

Explanation: This fault is caused by "time in replication current value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107935: fltTcaInfraReplicaStats1yearReplTLast

Severity: variable

Explanation: This fault is caused by "time in replication current value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107944: fltTcaInfraReplicaStats5minReplTCum

Severity: variable

Explanation: This fault is caused by "time in replication cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107945: fltTcaInfraReplicaStats15minReplTCum

Severity: variable

Explanation: This fault is caused by "time in replication cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107946: fltTcaInfraReplicaStats1hReplTCum

Severity: variable

Explanation: This fault is caused by "time in replication cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107947: fltTcaInfraReplicaStats1dReplTCum

Severity: variable

Explanation: This fault is caused by "time in replication cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107948: fltTcaInfraReplicaStats1wReplTCum

Severity: variable

Explanation: This fault is caused by "time in replication cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107949: fltTcaInfraReplicaStats1moReplTCum

Severity: variable

Explanation: This fault is caused by "time in replication cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107950: fltTcaInfraReplicaStats1qtrReplTCum

Severity: variable

Explanation: This fault is caused by "time in replication cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107951: fltTcaInfraReplicaStats1yearReplTCum

Severity: variable

Explanation: This fault is caused by "time in replication cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107952: fltTcaInfraReplicaStats5minReplTPer

Severity: variable

Explanation: This fault is caused by "time in replication periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107953: fltTcaInfraReplicaStats15minReplTPer

Severity: variable

Explanation: This fault is caused by "time in replication periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107954: fltTcaInfraReplicaStats1hReplTPer

Severity: variable

Explanation: This fault is caused by "time in replication periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107955: fltTcaInfraReplicaStats1dReplTPer

Severity: variable

Explanation: This fault is caused by "time in replication periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107956: fltTcaInfraReplicaStats1wReplTPer

Severity: variable

Explanation: This fault is caused by "time in replication periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107957: fltTcaInfraReplicaStats1moReplTPer

Severity: variable

Explanation: This fault is caused by "time in replication periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107958: fltTcaInfraReplicaStats1qtrReplTPer

Severity: variable

Explanation: This fault is caused by "time in replication periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107959: fltTcaInfraReplicaStats1yearReplTPer

Severity: variable

Explanation: This fault is caused by "time in replication periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107960: fltTcaInfraReplicaStats5minReplTMin

Severity: variable

Explanation: This fault is caused by "time in replication minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107961: fltTcaInfraReplicaStats15minReplTMin

Severity: variable

Explanation: This fault is caused by "time in replication minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107962: fltTcaInfraReplicaStats1hReplTMin

Severity: variable

Explanation: This fault is caused by "time in replication minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107963: fltTcaInfraReplicaStats1dReplTMin

Severity: variable

Explanation: This fault is caused by "time in replication minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107964: fltTcaInfraReplicaStats1wReplTMin

Severity: variable

Explanation: This fault is caused by "time in replication minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107965: fltTcaInfraReplicaStats1moReplTMin

Severity: variable

Explanation: This fault is caused by "time in replication minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107966: fltTcaInfraReplicaStats1qtrReplTMin

Severity: variable

Explanation: This fault is caused by "time in replication minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107967: fltTcaInfraReplicaStats1yearReplTMin

Severity: variable

Explanation: This fault is caused by "time in replication minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107968: fltTcaInfraReplicaStats5minReplTMax

Severity: variable

Explanation: This fault is caused by "time in replication maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107969: fltTcaInfraReplicaStats15minReplTMax

Severity: variable

Explanation: This fault is caused by "time in replication maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107970: fltTcaInfraReplicaStats1hReplTMax

Severity: variable

Explanation: This fault is caused by "time in replication maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107971: fltTcaInfraReplicaStats1dReplTMax

Severity: variable

Explanation: This fault is caused by "time in replication maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107972: fltTcaInfraReplicaStats1wReplTMax

Severity: variable

Explanation: This fault is caused by "time in replication maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107973: fltTcaInfraReplicaStats1moReplTMax

Severity: variable

Explanation: This fault is caused by "time in replication maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107974: fltTcaInfraReplicaStats1qtrReplTMax

Severity: variable

Explanation: This fault is caused by "time in replication maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107975: fltTcaInfraReplicaStats1yearReplTMax

Severity: variable

Explanation: This fault is caused by "time in replication maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107976: fltTcaInfraReplicaStats5minReplTAvg

Severity: variable

Explanation: This fault is caused by "time in replication average value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107977: fltTcaInfraReplicaStats15minReplTAvg

Severity: variable

Explanation: This fault is caused by "time in replication average value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107978: fltTcaInfraReplicaStats1hReplTAvg

Severity: variable

Explanation: This fault is caused by "time in replication average value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107979: fltTcaInfraReplicaStats1dReplTAvg

Severity: variable

Explanation: This fault is caused by "time in replication average value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107980: fltTcaInfraReplicaStats1wReplTAvg

Severity: variable

Explanation: This fault is caused by "time in replication average value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107981: fltTcaInfraReplicaStats1moReplTAvg

Severity: variable

Explanation: This fault is caused by "time in replication average value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107982: fltTcaInfraReplicaStats1qtrReplTAvg

Severity: variable

Explanation: This fault is caused by "time in replication average value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F107983: fltTcaInfraReplicaStats1yearReplTAvg

Severity: variable

Explanation: This fault is caused by "time in replication average value" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1080: fltVnsRsDefaultScopeToTermResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F108008: fltTcaInfraReplicaStats5minReplTTr

Severity: variable

Explanation: This fault is caused by "time in replication trend" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108009: fltTcaInfraReplicaStats15minReplTTr

Severity: variable

Explanation: This fault is caused by "time in replication trend" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108010: fltTcaInfraReplicaStats1hReplTTr

Severity: variable

Explanation: This fault is caused by "time in replication trend" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108011: fltTcaInfraReplicaStats1dReplTTr

Severity: variable

Explanation: This fault is caused by "time in replication trend" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108012: fltTcaInfraReplicaStats1wReplTTr

Severity: variable

Explanation: This fault is caused by "time in replication trend" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108013: fltTcaInfraReplicaStats1moReplTTr

Severity: variable

Explanation: This fault is caused by "time in replication trend" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108014: fltTcaInfraReplicaStats1qtrReplTTr

Severity: variable

Explanation: This fault is caused by "time in replication trend" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108015: fltTcaInfraReplicaStats1yearReplTTr

Severity: variable

Explanation: This fault is caused by "time in replication trend" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108016: fltTcaInfraReplicaStats5minReplTRate

Severity: variable

Explanation: This fault is caused by "time in replication rate" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108017: fltTcaInfraReplicaStats15minReplTRate

Severity: variable

Explanation: This fault is caused by "time in replication rate" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108018: fltTcaInfraReplicaStats1hReplTRate

Severity: variable

Explanation: This fault is caused by "time in replication rate" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108019: fltTcaInfraReplicaStats1dReplTRate

Severity: variable

Explanation: This fault is caused by "time in replication rate" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108020: fltTcaInfraReplicaStats1wReplTRate

Severity: variable

Explanation: This fault is caused by "time in replication rate" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108021: fltTcaInfraReplicaStats1moReplTRate

Severity: variable

Explanation: This fault is caused by "time in replication rate" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108022: fltTcaInfraReplicaStats1qtrReplTRate

Severity: variable

Explanation: This fault is caused by "time in replication rate" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108023: fltTcaInfraReplicaStats1yearReplTRate

Severity: variable

Explanation: This fault is caused by "time in replication rate" statistical property crossing threshold level.

Recommended Action: Check the values of "time in replication" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1081: fltVnsRsALDevToDomPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F108144: fltTcaIsisFtagTreeStats5minAvgAvgPenaltyLast

Severity: variable

Explanation: This fault is caused by "average average penalty current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108145: fltTcaIsisFtagTreeStats15minAvgAvgPenaltyLast

Severity: variable

Explanation: This fault is caused by "average average penalty current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108146: fltTcaIsisFtagTreeStats1hAvgAvgPenaltyLast

Severity: variable

Explanation: This fault is caused by "average average penalty current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108147: fltTcaIsisFtagTreeStats1dAvgAvgPenaltyLast

Severity: variable

Explanation: This fault is caused by "average average penalty current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108148: fltTcaIsisFtagTreeStats1wAvgAvgPenaltyLast

Severity: variable

Explanation: This fault is caused by "average average penalty current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108149: fltTcaIsisFtagTreeStats1moAvgAvgPenaltyLast

Severity: variable

Explanation: This fault is caused by "average average penalty current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108150: fltTcaIsisFtagTreeStats1qtrAvgAvgPenaltyLast

Severity: variable

Explanation: This fault is caused by "average average penalty current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108151: fltTcaIsisFtagTreeStats1yearAvgAvgPenaltyLast

Severity: variable

Explanation: This fault is caused by "average average penalty current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108160: fltTcaIsisFtagTreeStats5minAvgAvgPenaltyCum

Severity: variable

Explanation: This fault is caused by "average average penalty cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108161: fltTcaIsisFtagTreeStats15minAvgAvgPenaltyCum

Severity: variable

Explanation: This fault is caused by "average average penalty cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108162: fltTcaIsisFtagTreeStats1hAvgAvgPenaltyCum

Severity: variable

Explanation: This fault is caused by "average average penalty cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108163: fltTcaIsisFtagTreeStats1dAvgAvgPenaltyCum

Severity: variable

Explanation: This fault is caused by "average average penalty cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108164: fltTcaIsisFtagTreeStats1wAvgAvgPenaltyCum

Severity: variable

Explanation: This fault is caused by "average average penalty cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108165: fltTcaIsisFtagTreeStats1moAvgAvgPenaltyCum

Severity: variable

Explanation: This fault is caused by "average average penalty cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108166: fltTcaIsisFtagTreeStats1qtrAvgAvgPenaltyCum

Severity: variable

Explanation: This fault is caused by "average average penalty cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108167: fltTcaIsisFtagTreeStats1yearAvgAvgPenaltyCum

Severity: variable

Explanation: This fault is caused by "average average penalty cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108168: fltTcaIsisFtagTreeStats5minAvgAvgPenaltyPer

Severity: variable

Explanation: This fault is caused by "average average penalty periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108169: fltTcaIsisFtagTreeStats15minAvgAvgPenaltyPer

Severity: variable

Explanation: This fault is caused by "average average penalty periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108170: fltTcaIsisFtagTreeStats1hAvgAvgPenaltyPer

Severity: variable

Explanation: This fault is caused by "average average penalty periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108171: fltTcaIsisFtagTreeStats1dAvgAvgPenaltyPer

Severity: variable

Explanation: This fault is caused by "average average penalty periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108172: fltTcaIsisFtagTreeStats1wAvgAvgPenaltyPer

Severity: variable

Explanation: This fault is caused by "average average penalty periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108173: fltTcaIsisFtagTreeStats1moAvgAvgPenaltyPer

Severity: variable

Explanation: This fault is caused by "average average penalty periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108174: fltTcaIsisFtagTreeStats1qtrAvgAvgPenaltyPer

Severity: variable

Explanation: This fault is caused by "average average penalty periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108175: fltTcaIsisFtagTreeStats1yearAvgAvgPenaltyPer

Severity: variable

Explanation: This fault is caused by "average average penalty periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108176: fltTcaIsisFtagTreeStats5minAvgAvgPenaltyMin

Severity: variable

Explanation: This fault is caused by "average average penalty minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108177: fltTcaIsisFtagTreeStats15minAvgAvgPenaltyMin

Severity: variable

Explanation: This fault is caused by "average average penalty minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108178: fltTcaIsisFtagTreeStats1hAvgAvgPenaltyMin

Severity: variable

Explanation: This fault is caused by "average average penalty minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108179: fltTcaIsisFtagTreeStats1dAvgAvgPenaltyMin

Severity: variable

Explanation: This fault is caused by "average average penalty minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108180: fltTcaIsisFtagTreeStats1wAvgAvgPenaltyMin

Severity: variable

Explanation: This fault is caused by "average average penalty minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108181: fltTcaIsisFtagTreeStats1moAvgAvgPenaltyMin

Severity: variable

Explanation: This fault is caused by "average average penalty minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108182: fltTcaIsisFtagTreeStats1qtrAvgAvgPenaltyMin

Severity: variable

Explanation: This fault is caused by "average average penalty minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108183: fltTcaIsisFtagTreeStats1yearAvgAvgPenaltyMin

Severity: variable

Explanation: This fault is caused by "average average penalty minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108184: fltTcaIsisFtagTreeStats5minAvgAvgPenaltyMax

Severity: variable

Explanation: This fault is caused by "average average penalty maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108185: fltTcaIsisFtagTreeStats15minAvgAvgPenaltyMax

Severity: variable

Explanation: This fault is caused by "average average penalty maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108186: fltTcaIsisFtagTreeStats1hAvgAvgPenaltyMax

Severity: variable

Explanation: This fault is caused by "average average penalty maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108187: fltTcaIsisFtagTreeStats1dAvgAvgPenaltyMax

Severity: variable

Explanation: This fault is caused by "average average penalty maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108188: fltTcaIsisFtagTreeStats1wAvgAvgPenaltyMax

Severity: variable

Explanation: This fault is caused by "average average penalty maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108189: fltTcaIsisFtagTreeStats1moAvgAvgPenaltyMax

Severity: variable

Explanation: This fault is caused by "average average penalty maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108190: fltTcaIsisFtagTreeStats1qtrAvgAvgPenaltyMax

Severity: variable

Explanation: This fault is caused by "average average penalty maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108191: fltTcaIsisFtagTreeStats1yearAvgAvgPenaltyMax

Severity: variable

Explanation: This fault is caused by "average average penalty maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108192: fltTcaIsisFtagTreeStats5minAvgAvgPenaltyAvg

Severity: variable

Explanation: This fault is caused by "average average penalty average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108193: fltTcaIsisFtagTreeStats15minAvgAvgPenaltyAvg

Severity: variable

Explanation: This fault is caused by "average average penalty average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108194: fltTcaIsisFtagTreeStats1hAvgAvgPenaltyAvg

Severity: variable

Explanation: This fault is caused by "average average penalty average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108195: fltTcaIsisFtagTreeStats1dAvgAvgPenaltyAvg

Severity: variable

Explanation: This fault is caused by "average average penalty average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108196: fltTcaIsisFtagTreeStats1wAvgAvgPenaltyAvg

Severity: variable

Explanation: This fault is caused by "average average penalty average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108197: fltTcaIsisFtagTreeStats1moAvgAvgPenaltyAvg

Severity: variable

Explanation: This fault is caused by "average average penalty average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108198: fltTcaIsisFtagTreeStats1qtrAvgAvgPenaltyAvg

Severity: variable

Explanation: This fault is caused by "average average penalty average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108199: fltTcaIsisFtagTreeStats1yearAvgAvgPenaltyAvg

Severity: variable

Explanation: This fault is caused by "average average penalty average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1082: fltVnsRsALDevToPhysDomPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F108224: fltTcaIsisFtagTreeStats5minAvgAvgPenaltyTr

Severity: variable

Explanation: This fault is caused by "average average penalty trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108225: fltTcaIsisFtagTreeStats15minAvgAvgPenaltyTr

Severity: variable

Explanation: This fault is caused by "average average penalty trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108226: fltTcaIsisFtagTreeStats1hAvgAvgPenaltyTr

Severity: variable

Explanation: This fault is caused by "average average penalty trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108227: fltTcaIsisFtagTreeStats1dAvgAvgPenaltyTr

Severity: variable

Explanation: This fault is caused by "average average penalty trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108228: fltTcaIsisFtagTreeStats1wAvgAvgPenaltyTr

Severity: variable

Explanation: This fault is caused by "average average penalty trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108229: fltTcaIsisFtagTreeStats1moAvgAvgPenaltyTr

Severity: variable

Explanation: This fault is caused by "average average penalty trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108230: fltTcaIsisFtagTreeStats1qtrAvgAvgPenaltyTr

Severity: variable

Explanation: This fault is caused by "average average penalty trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108231: fltTcaIsisFtagTreeStats1yearAvgAvgPenaltyTr

Severity: variable

Explanation: This fault is caused by "average average penalty trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108232: fltTcaIsisFtagTreeStats5minAvgAvgPenaltyRate

Severity: variable

Explanation: This fault is caused by "average average penalty rate" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108233: fltTcaIsisFtagTreeStats15minAvgAvgPenaltyRate

Severity: variable

Explanation: This fault is caused by "average average penalty rate" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108234: fltTcaIsisFtagTreeStats1hAvgAvgPenaltyRate

Severity: variable

Explanation: This fault is caused by "average average penalty rate" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108235: fltTcaIsisFtagTreeStats1dAvgAvgPenaltyRate

Severity: variable

Explanation: This fault is caused by "average average penalty rate" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108236: fltTcaIsisFtagTreeStats1wAvgAvgPenaltyRate

Severity: variable

Explanation: This fault is caused by "average average penalty rate" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108237: fltTcaIsisFtagTreeStats1moAvgAvgPenaltyRate

Severity: variable

Explanation: This fault is caused by "average average penalty rate" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108238: fltTcaIsisFtagTreeStats1qtrAvgAvgPenaltyRate

Severity: variable

Explanation: This fault is caused by "average average penalty rate" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108239: fltTcaIsisFtagTreeStats1yearAvgAvgPenaltyRate

Severity: variable

Explanation: This fault is caused by "average average penalty rate" statistical property crossing threshold level.

Recommended Action: Check the values of "average average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1083: fltVnsRsALDevToVxlanInstPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F108360: fltTcaIsisFtagTreeStats5minAvgMaxPenaltyLast

Severity: variable

Explanation: This fault is caused by "average maximum penalty current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108361: fltTcaIsisFtagTreeStats15minAvgMaxPenaltyLast

Severity: variable

Explanation: This fault is caused by "average maximum penalty current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108362: fltTcaIsisFtagTreeStats1hAvgMaxPenaltyLast

Severity: variable

Explanation: This fault is caused by "average maximum penalty current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108363: fltTcaIsisFtagTreeStats1dAvgMaxPenaltyLast

Severity: variable

Explanation: This fault is caused by "average maximum penalty current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108364: fltTcaIsisFtagTreeStats1wAvgMaxPenaltyLast

Severity: variable

Explanation: This fault is caused by "average maximum penalty current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108365: fltTcaIsisFtagTreeStats1moAvgMaxPenaltyLast

Severity: variable

Explanation: This fault is caused by "average maximum penalty current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108366: fltTcaIsisFtagTreeStats1qtrAvgMaxPenaltyLast

Severity: variable

Explanation: This fault is caused by "average maximum penalty current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108367: fltTcaIsisFtagTreeStats1yearAvgMaxPenaltyLast

Severity: variable

Explanation: This fault is caused by "average maximum penalty current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108376: fltTcaIsisFtagTreeStats5minAvgMaxPenaltyCum

Severity: variable

Explanation: This fault is caused by "average maximum penalty cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108377: fltTcaIsisFtagTreeStats15minAvgMaxPenaltyCum

Severity: variable

Explanation: This fault is caused by "average maximum penalty cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108378: fltTcaIsisFtagTreeStats1hAvgMaxPenaltyCum

Severity: variable

Explanation: This fault is caused by "average maximum penalty cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108379: fltTcaIsisFtagTreeStats1dAvgMaxPenaltyCum

Severity: variable

Explanation: This fault is caused by "average maximum penalty cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108380: fltTcaIsisFtagTreeStats1wAvgMaxPenaltyCum

Severity: variable

Explanation: This fault is caused by "average maximum penalty cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108381: fltTcaIsisFtagTreeStats1moAvgMaxPenaltyCum

Severity: variable

Explanation: This fault is caused by "average maximum penalty cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108382: fltTcaIsisFtagTreeStats1qtrAvgMaxPenaltyCum

Severity: variable

Explanation: This fault is caused by "average maximum penalty cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108383: fltTcaIsisFtagTreeStats1yearAvgMaxPenaltyCum

Severity: variable

Explanation: This fault is caused by "average maximum penalty cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108384: fltTcaIsisFtagTreeStats5minAvgMaxPenaltyPer

Severity: variable

Explanation: This fault is caused by "average maximum penalty periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108385: fltTcaIsisFtagTreeStats15minAvgMaxPenaltyPer

Severity: variable

Explanation: This fault is caused by "average maximum penalty periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108386: fltTcaIsisFtagTreeStats1hAvgMaxPenaltyPer

Severity: variable

Explanation: This fault is caused by "average maximum penalty periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108387: fltTcaIsisFtagTreeStats1dAvgMaxPenaltyPer

Severity: variable

Explanation: This fault is caused by "average maximum penalty periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108388: fltTcaIsisFtagTreeStats1wAvgMaxPenaltyPer

Severity: variable

Explanation: This fault is caused by "average maximum penalty periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108389: fltTcaIsisFtagTreeStats1moAvgMaxPenaltyPer

Severity: variable

Explanation: This fault is caused by "average maximum penalty periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108390: fltTcaIsisFtagTreeStats1qtrAvgMaxPenaltyPer

Severity: variable

Explanation: This fault is caused by "average maximum penalty periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108391: fltTcaIsisFtagTreeStats1yearAvgMaxPenaltyPer

Severity: variable

Explanation: This fault is caused by "average maximum penalty periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108392: fltTcaIsisFtagTreeStats5minAvgMaxPenaltyMin

Severity: variable

Explanation: This fault is caused by "average maximum penalty minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108393: fltTcaIsisFtagTreeStats15minAvgMaxPenaltyMin

Severity: variable

Explanation: This fault is caused by "average maximum penalty minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108394: fltTcaIsisFtagTreeStats1hAvgMaxPenaltyMin

Severity: variable

Explanation: This fault is caused by "average maximum penalty minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108395: fltTcaIsisFtagTreeStats1dAvgMaxPenaltyMin

Severity: variable

Explanation: This fault is caused by "average maximum penalty minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108396: fltTcaIsisFtagTreeStats1wAvgMaxPenaltyMin

Severity: variable

Explanation: This fault is caused by "average maximum penalty minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108397: fltTcaIsisFtagTreeStats1moAvgMaxPenaltyMin

Severity: variable

Explanation: This fault is caused by "average maximum penalty minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108398: fltTcaIsisFtagTreeStats1qtrAvgMaxPenaltyMin

Severity: variable

Explanation: This fault is caused by "average maximum penalty minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108399: fltTcaIsisFtagTreeStats1yearAvgMaxPenaltyMin

Severity: variable

Explanation: This fault is caused by "average maximum penalty minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1084: fltVnsRsDevEpgResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F108400: fltTcaIsisFtagTreeStats5minAvgMaxPenaltyMax

Severity: variable

Explanation: This fault is caused by "average maximum penalty maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108401: fltTcaIsisFtagTreeStats15minAvgMaxPenaltyMax

Severity: variable

Explanation: This fault is caused by "average maximum penalty maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108402: fltTcaIsisFtagTreeStats1hAvgMaxPenaltyMax

Severity: variable

Explanation: This fault is caused by "average maximum penalty maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108403: fltTcaIsisFtagTreeStats1dAvgMaxPenaltyMax

Severity: variable

Explanation: This fault is caused by "average maximum penalty maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108404: fltTcaIsisFtagTreeStats1wAvgMaxPenaltyMax

Severity: variable

Explanation: This fault is caused by "average maximum penalty maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108405: fltTcaIsisFtagTreeStats1moAvgMaxPenaltyMax

Severity: variable

Explanation: This fault is caused by "average maximum penalty maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108406: fltTcaIsisFtagTreeStats1qtrAvgMaxPenaltyMax

Severity: variable

Explanation: This fault is caused by "average maximum penalty maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108407: fltTcaIsisFtagTreeStats1yearAvgMaxPenaltyMax

Severity: variable

Explanation: This fault is caused by "average maximum penalty maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108408: fltTcaIsisFtagTreeStats5minAvgMaxPenaltyAvg

Severity: variable

Explanation: This fault is caused by "average maximum penalty average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108409: fltTcaIsisFtagTreeStats15minAvgMaxPenaltyAvg

Severity: variable

Explanation: This fault is caused by "average maximum penalty average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108410: fltTcaIsisFtagTreeStats1hAvgMaxPenaltyAvg

Severity: variable

Explanation: This fault is caused by "average maximum penalty average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108411: fltTcaIsisFtagTreeStats1dAvgMaxPenaltyAvg

Severity: variable

Explanation: This fault is caused by "average maximum penalty average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108412: fltTcaIsisFtagTreeStats1wAvgMaxPenaltyAvg

Severity: variable

Explanation: This fault is caused by "average maximum penalty average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108413: fltTcaIsisFtagTreeStats1moAvgMaxPenaltyAvg

Severity: variable

Explanation: This fault is caused by "average maximum penalty average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108414: fltTcaIsisFtagTreeStats1qtrAvgMaxPenaltyAvg

Severity: variable

Explanation: This fault is caused by "average maximum penalty average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108415: fltTcaIsisFtagTreeStats1yearAvgMaxPenaltyAvg

Severity: variable

Explanation: This fault is caused by "average maximum penalty average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108440: fltTcaIsisFtagTreeStats5minAvgMaxPenaltyTr

Severity: variable

Explanation: This fault is caused by "average maximum penalty trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108441: fltTcaIsisFtagTreeStats15minAvgMaxPenaltyTr

Severity: variable

Explanation: This fault is caused by "average maximum penalty trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108442: fltTcaIsisFtagTreeStats1hAvgMaxPenaltyTr

Severity: variable

Explanation: This fault is caused by "average maximum penalty trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108443: fltTcaIsisFtagTreeStats1dAvgMaxPenaltyTr

Severity: variable

Explanation: This fault is caused by "average maximum penalty trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108444: fltTcaIsisFtagTreeStats1wAvgMaxPenaltyTr

Severity: variable

Explanation: This fault is caused by "average maximum penalty trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108445: fltTcaIsisFtagTreeStats1moAvgMaxPenaltyTr

Severity: variable

Explanation: This fault is caused by "average maximum penalty trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108446: fltTcaIsisFtagTreeStats1qtrAvgMaxPenaltyTr

Severity: variable

Explanation: This fault is caused by "average maximum penalty trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108447: fltTcaIsisFtagTreeStats1yearAvgMaxPenaltyTr

Severity: variable

Explanation: This fault is caused by "average maximum penalty trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108448: fltTcaIsisFtagTreeStats5minAvgMaxPenaltyRate

Severity: variable

Explanation: This fault is caused by "average maximum penalty rate" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108449: fltTcaIsisFtagTreeStats15minAvgMaxPenaltyRate

Severity: variable

Explanation: This fault is caused by "average maximum penalty rate" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108450: fltTcaIsisFtagTreeStats1hAvgMaxPenaltyRate

Severity: variable

Explanation: This fault is caused by "average maximum penalty rate" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108451: fltTcaIsisFtagTreeStats1dAvgMaxPenaltyRate

Severity: variable

Explanation: This fault is caused by "average maximum penalty rate" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108452: fltTcaIsisFtagTreeStats1wAvgMaxPenaltyRate

Severity: variable

Explanation: This fault is caused by "average maximum penalty rate" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108453: fltTcaIsisFtagTreeStats1moAvgMaxPenaltyRate

Severity: variable

Explanation: This fault is caused by "average maximum penalty rate" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108454: fltTcaIsisFtagTreeStats1qtrAvgMaxPenaltyRate

Severity: variable

Explanation: This fault is caused by "average maximum penalty rate" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108455: fltTcaIsisFtagTreeStats1yearAvgMaxPenaltyRate

Severity: variable

Explanation: This fault is caused by "average maximum penalty rate" statistical property crossing threshold level.

Recommended Action: Check the values of "average maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1085: fltVnsRsMDevAttResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F108576: fltTcaIsisFtagTreeStats5minCurAvgPenaltyLast

Severity: variable

Explanation: This fault is caused by "current average penalty current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108577: fltTcaIsisFtagTreeStats15minCurAvgPenaltyLast

Severity: variable

Explanation: This fault is caused by "current average penalty current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108578: fltTcaIsisFtagTreeStats1hCurAvgPenaltyLast

Severity: variable

Explanation: This fault is caused by "current average penalty current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108579: fltTcaIsisFtagTreeStats1dCurAvgPenaltyLast

Severity: variable

Explanation: This fault is caused by "current average penalty current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108580: fltTcaIsisFtagTreeStats1wCurAvgPenaltyLast

Severity: variable

Explanation: This fault is caused by "current average penalty current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108581: fltTcaIsisFtagTreeStats1moCurAvgPenaltyLast

Severity: variable

Explanation: This fault is caused by "current average penalty current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108582: fltTcaIsisFtagTreeStats1qtrCurAvgPenaltyLast

Severity: variable

Explanation: This fault is caused by "current average penalty current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108583: fltTcaIsisFtagTreeStats1yearCurAvgPenaltyLast

Severity: variable

Explanation: This fault is caused by "current average penalty current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108592: fltTcaIsisFtagTreeStats5minCurAvgPenaltyCum

Severity: variable

Explanation: This fault is caused by "current average penalty cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108593: fltTcaIsisFtagTreeStats15minCurAvgPenaltyCum

Severity: variable

Explanation: This fault is caused by "current average penalty cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108594: fltTcaIsisFtagTreeStats1hCurAvgPenaltyCum

Severity: variable

Explanation: This fault is caused by "current average penalty cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108595: fltTcaIsisFtagTreeStats1dCurAvgPenaltyCum

Severity: variable

Explanation: This fault is caused by "current average penalty cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108596: fltTcaIsisFtagTreeStats1wCurAvgPenaltyCum

Severity: variable

Explanation: This fault is caused by "current average penalty cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108597: fltTcaIsisFtagTreeStats1moCurAvgPenaltyCum

Severity: variable

Explanation: This fault is caused by "current average penalty cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108598: fltTcaIsisFtagTreeStats1qtrCurAvgPenaltyCum

Severity: variable

Explanation: This fault is caused by "current average penalty cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108599: fltTcaIsisFtagTreeStats1yearCurAvgPenaltyCum

Severity: variable

Explanation: This fault is caused by "current average penalty cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1086: fltVnsRsCIfAttResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F108600: fltTcaIsisFtagTreeStats5minCurAvgPenaltyPer

Severity: variable

Explanation: This fault is caused by "current average penalty periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108601: fltTcaIsisFtagTreeStats15minCurAvgPenaltyPer

Severity: variable

Explanation: This fault is caused by "current average penalty periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108602: fltTcaIsisFtagTreeStats1hCurAvgPenaltyPer

Severity: variable

Explanation: This fault is caused by "current average penalty periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108603: fltTcaIsisFtagTreeStats1dCurAvgPenaltyPer

Severity: variable

Explanation: This fault is caused by "current average penalty periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108604: fltTcaIsisFtagTreeStats1wCurAvgPenaltyPer

Severity: variable

Explanation: This fault is caused by "current average penalty periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108605: fltTcaIsisFtagTreeStats1moCurAvgPenaltyPer

Severity: variable

Explanation: This fault is caused by "current average penalty periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108606: fltTcaIsisFtagTreeStats1qtrCurAvgPenaltyPer

Severity: variable

Explanation: This fault is caused by "current average penalty periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108607: fltTcaIsisFtagTreeStats1yearCurAvgPenaltyPer

Severity: variable

Explanation: This fault is caused by "current average penalty periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108608: fltTcaIsisFtagTreeStats5minCurAvgPenaltyMin

Severity: variable

Explanation: This fault is caused by "current average penalty minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108609: fltTcaIsisFtagTreeStats15minCurAvgPenaltyMin

Severity: variable

Explanation: This fault is caused by "current average penalty minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108610: fltTcaIsisFtagTreeStats1hCurAvgPenaltyMin

Severity: variable

Explanation: This fault is caused by "current average penalty minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108611: fltTcaIsisFtagTreeStats1dCurAvgPenaltyMin

Severity: variable

Explanation: This fault is caused by "current average penalty minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108612: fltTcaIsisFtagTreeStats1wCurAvgPenaltyMin

Severity: variable

Explanation: This fault is caused by "current average penalty minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108613: fltTcaIsisFtagTreeStats1moCurAvgPenaltyMin

Severity: variable

Explanation: This fault is caused by "current average penalty minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108614: fltTcaIsisFtagTreeStats1qtrCurAvgPenaltyMin

Severity: variable

Explanation: This fault is caused by "current average penalty minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108615: fltTcaIsisFtagTreeStats1yearCurAvgPenaltyMin

Severity: variable

Explanation: This fault is caused by "current average penalty minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108616: fltTcaIsisFtagTreeStats5minCurAvgPenaltyMax

Severity: variable

Explanation: This fault is caused by "current average penalty maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108617: fltTcaIsisFtagTreeStats15minCurAvgPenaltyMax

Severity: variable

Explanation: This fault is caused by "current average penalty maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108618: fltTcaIsisFtagTreeStats1hCurAvgPenaltyMax

Severity: variable

Explanation: This fault is caused by "current average penalty maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108619: fltTcaIsisFtagTreeStats1dCurAvgPenaltyMax

Severity: variable

Explanation: This fault is caused by "current average penalty maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108620: fltTcaIsisFtagTreeStats1wCurAvgPenaltyMax

Severity: variable

Explanation: This fault is caused by "current average penalty maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108621: fltTcaIsisFtagTreeStats1moCurAvgPenaltyMax

Severity: variable

Explanation: This fault is caused by "current average penalty maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108622: fltTcaIsisFtagTreeStats1qtrCurAvgPenaltyMax

Severity: variable

Explanation: This fault is caused by "current average penalty maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108623: fltTcaIsisFtagTreeStats1yearCurAvgPenaltyMax

Severity: variable

Explanation: This fault is caused by "current average penalty maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108624: fltTcaIsisFtagTreeStats5minCurAvgPenaltyAvg

Severity: variable

Explanation: This fault is caused by "current average penalty average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108625: fltTcaIsisFtagTreeStats15minCurAvgPenaltyAvg

Severity: variable

Explanation: This fault is caused by "current average penalty average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108626: fltTcaIsisFtagTreeStats1hCurAvgPenaltyAvg

Severity: variable

Explanation: This fault is caused by "current average penalty average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108627: fltTcaIsisFtagTreeStats1dCurAvgPenaltyAvg

Severity: variable

Explanation: This fault is caused by "current average penalty average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108628: fltTcaIsisFtagTreeStats1wCurAvgPenaltyAvg

Severity: variable

Explanation: This fault is caused by "current average penalty average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108629: fltTcaIsisFtagTreeStats1moCurAvgPenaltyAvg

Severity: variable

Explanation: This fault is caused by "current average penalty average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108630: fltTcaIsisFtagTreeStats1qtrCurAvgPenaltyAvg

Severity: variable

Explanation: This fault is caused by "current average penalty average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108631: fltTcaIsisFtagTreeStats1yearCurAvgPenaltyAvg

Severity: variable

Explanation: This fault is caused by "current average penalty average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108656: fltTcaIsisFtagTreeStats5minCurAvgPenaltyTr

Severity: variable

Explanation: This fault is caused by "current average penalty trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108657: fltTcaIsisFtagTreeStats15minCurAvgPenaltyTr

Severity: variable

Explanation: This fault is caused by "current average penalty trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108658: fltTcaIsisFtagTreeStats1hCurAvgPenaltyTr

Severity: variable

Explanation: This fault is caused by "current average penalty trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108659: fltTcaIsisFtagTreeStats1dCurAvgPenaltyTr

Severity: variable

Explanation: This fault is caused by "current average penalty trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108660: fltTcaIsisFtagTreeStats1wCurAvgPenaltyTr

Severity: variable

Explanation: This fault is caused by "current average penalty trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108661: fltTcaIsisFtagTreeStats1moCurAvgPenaltyTr

Severity: variable

Explanation: This fault is caused by "current average penalty trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108662: fltTcaIsisFtagTreeStats1qtrCurAvgPenaltyTr

Severity: variable

Explanation: This fault is caused by "current average penalty trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108663: fltTcaIsisFtagTreeStats1yearCurAvgPenaltyTr

Severity: variable

Explanation: This fault is caused by "current average penalty trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108664: fltTcaIsisFtagTreeStats5minCurAvgPenaltyRate

Severity: variable

Explanation: This fault is caused by "current average penalty rate" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108665: fltTcaIsisFtagTreeStats15minCurAvgPenaltyRate

Severity: variable

Explanation: This fault is caused by "current average penalty rate" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108666: fltTcaIsisFtagTreeStats1hCurAvgPenaltyRate

Severity: variable

Explanation: This fault is caused by "current average penalty rate" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108667: fltTcaIsisFtagTreeStats1dCurAvgPenaltyRate

Severity: variable

Explanation: This fault is caused by "current average penalty rate" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108668: fltTcaIsisFtagTreeStats1wCurAvgPenaltyRate

Severity: variable

Explanation: This fault is caused by "current average penalty rate" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108669: fltTcaIsisFtagTreeStats1moCurAvgPenaltyRate

Severity: variable

Explanation: This fault is caused by "current average penalty rate" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108670: fltTcaIsisFtagTreeStats1qtrCurAvgPenaltyRate

Severity: variable

Explanation: This fault is caused by "current average penalty rate" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108671: fltTcaIsisFtagTreeStats1yearCurAvgPenaltyRate

Severity: variable

Explanation: This fault is caused by "current average penalty rate" statistical property crossing threshold level.

Recommended Action: Check the values of "current average penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1087: fltVnsRsMetaIfResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F108792: fltTcaIsisFtagTreeStats5minCurMaxPenaltyLast

Severity: variable

Explanation: This fault is caused by "current maximum penalty current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108793: fltTcaIsisFtagTreeStats15minCurMaxPenaltyLast

Severity: variable

Explanation: This fault is caused by "current maximum penalty current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108794: fltTcaIsisFtagTreeStats1hCurMaxPenaltyLast

Severity: variable

Explanation: This fault is caused by "current maximum penalty current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108795: fltTcaIsisFtagTreeStats1dCurMaxPenaltyLast

Severity: variable

Explanation: This fault is caused by "current maximum penalty current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108796: fltTcaIsisFtagTreeStats1wCurMaxPenaltyLast

Severity: variable

Explanation: This fault is caused by "current maximum penalty current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108797: fltTcaIsisFtagTreeStats1moCurMaxPenaltyLast

Severity: variable

Explanation: This fault is caused by "current maximum penalty current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108798: fltTcaIsisFtagTreeStats1qtrCurMaxPenaltyLast

Severity: variable

Explanation: This fault is caused by "current maximum penalty current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108799: fltTcaIsisFtagTreeStats1yearCurMaxPenaltyLast

Severity: variable

Explanation: This fault is caused by "current maximum penalty current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1088: fltVnsRsConnectorResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F108808: fltTcaIsisFtagTreeStats5minCurMaxPenaltyCum

Severity: variable

Explanation: This fault is caused by "current maximum penalty cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108809: fltTcaIsisFtagTreeStats15minCurMaxPenaltyCum

Severity: variable

Explanation: This fault is caused by "current maximum penalty cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108810: fltTcaIsisFtagTreeStats1hCurMaxPenaltyCum

Severity: variable

Explanation: This fault is caused by "current maximum penalty cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108811: fltTcaIsisFtagTreeStats1dCurMaxPenaltyCum

Severity: variable

Explanation: This fault is caused by "current maximum penalty cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108812: fltTcaIsisFtagTreeStats1wCurMaxPenaltyCum

Severity: variable

Explanation: This fault is caused by "current maximum penalty cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108813: fltTcaIsisFtagTreeStats1moCurMaxPenaltyCum

Severity: variable

Explanation: This fault is caused by "current maximum penalty cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108814: fltTcaIsisFtagTreeStats1qtrCurMaxPenaltyCum

Severity: variable

Explanation: This fault is caused by "current maximum penalty cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108815: fltTcaIsisFtagTreeStats1yearCurMaxPenaltyCum

Severity: variable

Explanation: This fault is caused by "current maximum penalty cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108816: fltTcaIsisFtagTreeStats5minCurMaxPenaltyPer

Severity: variable

Explanation: This fault is caused by "current maximum penalty periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108817: fltTcaIsisFtagTreeStats15minCurMaxPenaltyPer

Severity: variable

Explanation: This fault is caused by "current maximum penalty periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108818: fltTcaIsisFtagTreeStats1hCurMaxPenaltyPer

Severity: variable

Explanation: This fault is caused by "current maximum penalty periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108819: fltTcaIsisFtagTreeStats1dCurMaxPenaltyPer

Severity: variable

Explanation: This fault is caused by "current maximum penalty periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108820: fltTcaIsisFtagTreeStats1wCurMaxPenaltyPer

Severity: variable

Explanation: This fault is caused by "current maximum penalty periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108821: fltTcaIsisFtagTreeStats1moCurMaxPenaltyPer

Severity: variable

Explanation: This fault is caused by "current maximum penalty periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108822: fltTcaIsisFtagTreeStats1qtrCurMaxPenaltyPer

Severity: variable

Explanation: This fault is caused by "current maximum penalty periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108823: fltTcaIsisFtagTreeStats1yearCurMaxPenaltyPer

Severity: variable

Explanation: This fault is caused by "current maximum penalty periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108824: fltTcaIsisFtagTreeStats5minCurMaxPenaltyMin

Severity: variable

Explanation: This fault is caused by "current maximum penalty minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108825: fltTcaIsisFtagTreeStats15minCurMaxPenaltyMin

Severity: variable

Explanation: This fault is caused by "current maximum penalty minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108826: fltTcaIsisFtagTreeStats1hCurMaxPenaltyMin

Severity: variable

Explanation: This fault is caused by "current maximum penalty minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108827: fltTcaIsisFtagTreeStats1dCurMaxPenaltyMin

Severity: variable

Explanation: This fault is caused by "current maximum penalty minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108828: fltTcaIsisFtagTreeStats1wCurMaxPenaltyMin

Severity: variable

Explanation: This fault is caused by "current maximum penalty minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108829: fltTcaIsisFtagTreeStats1moCurMaxPenaltyMin

Severity: variable

Explanation: This fault is caused by "current maximum penalty minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108830: fltTcaIsisFtagTreeStats1qtrCurMaxPenaltyMin

Severity: variable

Explanation: This fault is caused by "current maximum penalty minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108831: fltTcaIsisFtagTreeStats1yearCurMaxPenaltyMin

Severity: variable

Explanation: This fault is caused by "current maximum penalty minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108832: fltTcaIsisFtagTreeStats5minCurMaxPenaltyMax

Severity: variable

Explanation: This fault is caused by "current maximum penalty maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108833: fltTcaIsisFtagTreeStats15minCurMaxPenaltyMax

Severity: variable

Explanation: This fault is caused by "current maximum penalty maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108834: fltTcaIsisFtagTreeStats1hCurMaxPenaltyMax

Severity: variable

Explanation: This fault is caused by "current maximum penalty maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108835: fltTcaIsisFtagTreeStats1dCurMaxPenaltyMax

Severity: variable

Explanation: This fault is caused by "current maximum penalty maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108836: fltTcaIsisFtagTreeStats1wCurMaxPenaltyMax

Severity: variable

Explanation: This fault is caused by "current maximum penalty maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108837: fltTcaIsisFtagTreeStats1moCurMaxPenaltyMax

Severity: variable

Explanation: This fault is caused by "current maximum penalty maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108838: fltTcaIsisFtagTreeStats1qtrCurMaxPenaltyMax

Severity: variable

Explanation: This fault is caused by "current maximum penalty maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108839: fltTcaIsisFtagTreeStats1yearCurMaxPenaltyMax

Severity: variable

Explanation: This fault is caused by "current maximum penalty maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108840: fltTcaIsisFtagTreeStats5minCurMaxPenaltyAvg

Severity: variable

Explanation: This fault is caused by "current maximum penalty average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108841: fltTcaIsisFtagTreeStats15minCurMaxPenaltyAvg

Severity: variable

Explanation: This fault is caused by "current maximum penalty average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108842: fltTcaIsisFtagTreeStats1hCurMaxPenaltyAvg

Severity: variable

Explanation: This fault is caused by "current maximum penalty average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108843: fltTcaIsisFtagTreeStats1dCurMaxPenaltyAvg

Severity: variable

Explanation: This fault is caused by "current maximum penalty average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108844: fltTcaIsisFtagTreeStats1wCurMaxPenaltyAvg

Severity: variable

Explanation: This fault is caused by "current maximum penalty average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108845: fltTcaIsisFtagTreeStats1moCurMaxPenaltyAvg

Severity: variable

Explanation: This fault is caused by "current maximum penalty average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108846: fltTcaIsisFtagTreeStats1qtrCurMaxPenaltyAvg

Severity: variable

Explanation: This fault is caused by "current maximum penalty average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108847: fltTcaIsisFtagTreeStats1yearCurMaxPenaltyAvg

Severity: variable

Explanation: This fault is caused by "current maximum penalty average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108872: fltTcaIsisFtagTreeStats5minCurMaxPenaltyTr

Severity: variable

Explanation: This fault is caused by "current maximum penalty trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108873: fltTcaIsisFtagTreeStats15minCurMaxPenaltyTr

Severity: variable

Explanation: This fault is caused by "current maximum penalty trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108874: fltTcaIsisFtagTreeStats1hCurMaxPenaltyTr

Severity: variable

Explanation: This fault is caused by "current maximum penalty trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108875: fltTcaIsisFtagTreeStats1dCurMaxPenaltyTr

Severity: variable

Explanation: This fault is caused by "current maximum penalty trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108876: fltTcaIsisFtagTreeStats1wCurMaxPenaltyTr

Severity: variable

Explanation: This fault is caused by "current maximum penalty trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108877: fltTcaIsisFtagTreeStats1moCurMaxPenaltyTr

Severity: variable

Explanation: This fault is caused by "current maximum penalty trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108878: fltTcaIsisFtagTreeStats1qtrCurMaxPenaltyTr

Severity: variable

Explanation: This fault is caused by "current maximum penalty trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108879: fltTcaIsisFtagTreeStats1yearCurMaxPenaltyTr

Severity: variable

Explanation: This fault is caused by "current maximum penalty trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108880: fltTcaIsisFtagTreeStats5minCurMaxPenaltyRate

Severity: variable

Explanation: This fault is caused by "current maximum penalty rate" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108881: fltTcaIsisFtagTreeStats15minCurMaxPenaltyRate

Severity: variable

Explanation: This fault is caused by "current maximum penalty rate" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108882: fltTcaIsisFtagTreeStats1hCurMaxPenaltyRate

Severity: variable

Explanation: This fault is caused by "current maximum penalty rate" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108883: fltTcaIsisFtagTreeStats1dCurMaxPenaltyRate

Severity: variable

Explanation: This fault is caused by "current maximum penalty rate" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108884: fltTcaIsisFtagTreeStats1wCurMaxPenaltyRate

Severity: variable

Explanation: This fault is caused by "current maximum penalty rate" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108885: fltTcaIsisFtagTreeStats1moCurMaxPenaltyRate

Severity: variable

Explanation: This fault is caused by "current maximum penalty rate" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108886: fltTcaIsisFtagTreeStats1qtrCurMaxPenaltyRate

Severity: variable

Explanation: This fault is caused by "current maximum penalty rate" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F108887: fltTcaIsisFtagTreeStats1yearCurMaxPenaltyRate

Severity: variable

Explanation: This fault is caused by "current maximum penalty rate" statistical property crossing threshold level.

Recommended Action: Check the values of "current maximum penalty" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1089: fltVnsRsAbsConnectionConnsResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1090: fltVnsRsProfToMFuncResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F109008: fltTcaIsisTreeCalcNodeStats5minLeafCountLast

Severity: variable

Explanation: This fault is caused by "leaf count current value" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109009: fltTcaIsisTreeCalcNodeStats15minLeafCountLast

Severity: variable

Explanation: This fault is caused by "leaf count current value" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109010: fltTcaIsisTreeCalcNodeStats1hLeafCountLast

Severity: variable

Explanation: This fault is caused by "leaf count current value" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109011: fltTcaIsisTreeCalcNodeStats1dLeafCountLast

Severity: variable

Explanation: This fault is caused by "leaf count current value" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109012: fltTcaIsisTreeCalcNodeStats1wLeafCountLast

Severity: variable

Explanation: This fault is caused by "leaf count current value" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109013: fltTcaIsisTreeCalcNodeStats1moLeafCountLast

Severity: variable

Explanation: This fault is caused by "leaf count current value" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109014: fltTcaIsisTreeCalcNodeStats1qtrLeafCountLast

Severity: variable

Explanation: This fault is caused by "leaf count current value" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109015: fltTcaIsisTreeCalcNodeStats1yearLeafCountLast

Severity: variable

Explanation: This fault is caused by "leaf count current value" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109024: fltTcaIsisTreeCalcNodeStats5minLeafCountCum

Severity: variable

Explanation: This fault is caused by "leaf count cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109025: fltTcaIsisTreeCalcNodeStats15minLeafCountCum

Severity: variable

Explanation: This fault is caused by "leaf count cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109026: fltTcaIsisTreeCalcNodeStats1hLeafCountCum

Severity: variable

Explanation: This fault is caused by "leaf count cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109027: fltTcaIsisTreeCalcNodeStats1dLeafCountCum

Severity: variable

Explanation: This fault is caused by "leaf count cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109028: fltTcaIsisTreeCalcNodeStats1wLeafCountCum

Severity: variable

Explanation: This fault is caused by "leaf count cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109029: fltTcaIsisTreeCalcNodeStats1moLeafCountCum

Severity: variable

Explanation: This fault is caused by "leaf count cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109030: fltTcaIsisTreeCalcNodeStats1qtrLeafCountCum

Severity: variable

Explanation: This fault is caused by "leaf count cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109031: fltTcaIsisTreeCalcNodeStats1yearLeafCountCum

Severity: variable

Explanation: This fault is caused by "leaf count cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109032: fltTcaIsisTreeCalcNodeStats5minLeafCountPer

Severity: variable

Explanation: This fault is caused by "leaf count periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109033: fltTcaIsisTreeCalcNodeStats15minLeafCountPer

Severity: variable

Explanation: This fault is caused by "leaf count periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109034: fltTcaIsisTreeCalcNodeStats1hLeafCountPer

Severity: variable

Explanation: This fault is caused by "leaf count periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109035: fltTcaIsisTreeCalcNodeStats1dLeafCountPer

Severity: variable

Explanation: This fault is caused by "leaf count periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109036: fltTcaIsisTreeCalcNodeStats1wLeafCountPer

Severity: variable

Explanation: This fault is caused by "leaf count periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109037: fltTcaIsisTreeCalcNodeStats1moLeafCountPer

Severity: variable

Explanation: This fault is caused by "leaf count periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109038: fltTcaIsisTreeCalcNodeStats1qtrLeafCountPer

Severity: variable

Explanation: This fault is caused by "leaf count periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109039: fltTcaIsisTreeCalcNodeStats1yearLeafCountPer

Severity: variable

Explanation: This fault is caused by "leaf count periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109040: fltTcaIsisTreeCalcNodeStats5minLeafCountMin

Severity: variable

Explanation: This fault is caused by "leaf count minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109041: fltTcaIsisTreeCalcNodeStats15minLeafCountMin

Severity: variable

Explanation: This fault is caused by "leaf count minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109042: fltTcaIsisTreeCalcNodeStats1hLeafCountMin

Severity: variable

Explanation: This fault is caused by "leaf count minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109043: fltTcaIsisTreeCalcNodeStats1dLeafCountMin

Severity: variable

Explanation: This fault is caused by "leaf count minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109044: fltTcaIsisTreeCalcNodeStats1wLeafCountMin

Severity: variable

Explanation: This fault is caused by "leaf count minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109045: fltTcaIsisTreeCalcNodeStats1moLeafCountMin

Severity: variable

Explanation: This fault is caused by "leaf count minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109046: fltTcaIsisTreeCalcNodeStats1qtrLeafCountMin

Severity: variable

Explanation: This fault is caused by "leaf count minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109047: fltTcaIsisTreeCalcNodeStats1yearLeafCountMin

Severity: variable

Explanation: This fault is caused by "leaf count minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109048: fltTcaIsisTreeCalcNodeStats5minLeafCountMax

Severity: variable

Explanation: This fault is caused by "leaf count maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109049: fltTcaIsisTreeCalcNodeStats15minLeafCountMax

Severity: variable

Explanation: This fault is caused by "leaf count maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109050: fltTcaIsisTreeCalcNodeStats1hLeafCountMax

Severity: variable

Explanation: This fault is caused by "leaf count maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109051: fltTcaIsisTreeCalcNodeStats1dLeafCountMax

Severity: variable

Explanation: This fault is caused by "leaf count maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109052: fltTcaIsisTreeCalcNodeStats1wLeafCountMax

Severity: variable

Explanation: This fault is caused by "leaf count maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109053: fltTcaIsisTreeCalcNodeStats1moLeafCountMax

Severity: variable

Explanation: This fault is caused by "leaf count maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109054: fltTcaIsisTreeCalcNodeStats1qtrLeafCountMax

Severity: variable

Explanation: This fault is caused by "leaf count maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109055: fltTcaIsisTreeCalcNodeStats1yearLeafCountMax

Severity: variable

Explanation: This fault is caused by "leaf count maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109056: fltTcaIsisTreeCalcNodeStats5minLeafCountAvg

Severity: variable

Explanation: This fault is caused by "leaf count average value" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109057: fltTcaIsisTreeCalcNodeStats15minLeafCountAvg

Severity: variable

Explanation: This fault is caused by "leaf count average value" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109058: fltTcaIsisTreeCalcNodeStats1hLeafCountAvg

Severity: variable

Explanation: This fault is caused by "leaf count average value" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109059: fltTcaIsisTreeCalcNodeStats1dLeafCountAvg

Severity: variable

Explanation: This fault is caused by "leaf count average value" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109060: fltTcaIsisTreeCalcNodeStats1wLeafCountAvg

Severity: variable

Explanation: This fault is caused by "leaf count average value" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109061: fltTcaIsisTreeCalcNodeStats1moLeafCountAvg

Severity: variable

Explanation: This fault is caused by "leaf count average value" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109062: fltTcaIsisTreeCalcNodeStats1qtrLeafCountAvg

Severity: variable

Explanation: This fault is caused by "leaf count average value" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109063: fltTcaIsisTreeCalcNodeStats1yearLeafCountAvg

Severity: variable

Explanation: This fault is caused by "leaf count average value" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109088: fltTcaIsisTreeCalcNodeStats5minLeafCountTr

Severity: variable

Explanation: This fault is caused by "leaf count trend" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109089: fltTcaIsisTreeCalcNodeStats15minLeafCountTr

Severity: variable

Explanation: This fault is caused by "leaf count trend" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109090: fltTcaIsisTreeCalcNodeStats1hLeafCountTr

Severity: variable

Explanation: This fault is caused by "leaf count trend" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109091: fltTcaIsisTreeCalcNodeStats1dLeafCountTr

Severity: variable

Explanation: This fault is caused by "leaf count trend" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109092: fltTcaIsisTreeCalcNodeStats1wLeafCountTr

Severity: variable

Explanation: This fault is caused by "leaf count trend" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109093: fltTcaIsisTreeCalcNodeStats1moLeafCountTr

Severity: variable

Explanation: This fault is caused by "leaf count trend" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109094: fltTcaIsisTreeCalcNodeStats1qtrLeafCountTr

Severity: variable

Explanation: This fault is caused by "leaf count trend" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109095: fltTcaIsisTreeCalcNodeStats1yearLeafCountTr

Severity: variable

Explanation: This fault is caused by "leaf count trend" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109096: fltTcaIsisTreeCalcNodeStats5minLeafCountRate

Severity: variable

Explanation: This fault is caused by "leaf count rate" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109097: fltTcaIsisTreeCalcNodeStats15minLeafCountRate

Severity: variable

Explanation: This fault is caused by "leaf count rate" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109098: fltTcaIsisTreeCalcNodeStats1hLeafCountRate

Severity: variable

Explanation: This fault is caused by "leaf count rate" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109099: fltTcaIsisTreeCalcNodeStats1dLeafCountRate

Severity: variable

Explanation: This fault is caused by "leaf count rate" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1091: fltVnsRsNodeToAbsFuncProfResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F109100: fltTcaIsisTreeCalcNodeStats1wLeafCountRate

Severity: variable

Explanation: This fault is caused by "leaf count rate" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109101: fltTcaIsisTreeCalcNodeStats1moLeafCountRate

Severity: variable

Explanation: This fault is caused by "leaf count rate" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109102: fltTcaIsisTreeCalcNodeStats1qtrLeafCountRate

Severity: variable

Explanation: This fault is caused by "leaf count rate" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109103: fltTcaIsisTreeCalcNodeStats1yearLeafCountRate

Severity: variable

Explanation: This fault is caused by "leaf count rate" statistical property crossing threshold level.

Recommended Action: Check the values of "leaf count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1092: fltVnsRsNodeToMFuncResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F109224: fltTcaIsisTreeCalcNodeStats5minSpineCountLast

Severity: variable

Explanation: This fault is caused by "spine count current value" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109225: fltTcaIsisTreeCalcNodeStats15minSpineCountLast

Severity: variable

Explanation: This fault is caused by "spine count current value" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109226: fltTcaIsisTreeCalcNodeStats1hSpineCountLast

Severity: variable

Explanation: This fault is caused by "spine count current value" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109227: fltTcaIsisTreeCalcNodeStats1dSpineCountLast

Severity: variable

Explanation: This fault is caused by "spine count current value" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109228: fltTcaIsisTreeCalcNodeStats1wSpineCountLast

Severity: variable

Explanation: This fault is caused by "spine count current value" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109229: fltTcaIsisTreeCalcNodeStats1moSpineCountLast

Severity: variable

Explanation: This fault is caused by "spine count current value" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109230: fltTcaIsisTreeCalcNodeStats1qtrSpineCountLast

Severity: variable

Explanation: This fault is caused by "spine count current value" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109231: fltTcaIsisTreeCalcNodeStats1yearSpineCountLast

Severity: variable

Explanation: This fault is caused by "spine count current value" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109240: fltTcaIsisTreeCalcNodeStats5minSpineCountCum

Severity: variable

Explanation: This fault is caused by "spine count cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109241: fltTcaIsisTreeCalcNodeStats15minSpineCountCum

Severity: variable

Explanation: This fault is caused by "spine count cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109242: fltTcaIsisTreeCalcNodeStats1hSpineCountCum

Severity: variable

Explanation: This fault is caused by "spine count cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109243: fltTcaIsisTreeCalcNodeStats1dSpineCountCum

Severity: variable

Explanation: This fault is caused by "spine count cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109244: fltTcaIsisTreeCalcNodeStats1wSpineCountCum

Severity: variable

Explanation: This fault is caused by "spine count cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109245: fltTcaIsisTreeCalcNodeStats1moSpineCountCum

Severity: variable

Explanation: This fault is caused by "spine count cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109246: fltTcaIsisTreeCalcNodeStats1qtrSpineCountCum

Severity: variable

Explanation: This fault is caused by "spine count cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109247: fltTcaIsisTreeCalcNodeStats1yearSpineCountCum

Severity: variable

Explanation: This fault is caused by "spine count cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109248: fltTcaIsisTreeCalcNodeStats5minSpineCountPer

Severity: variable

Explanation: This fault is caused by "spine count periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109249: fltTcaIsisTreeCalcNodeStats15minSpineCountPer

Severity: variable

Explanation: This fault is caused by "spine count periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109250: fltTcaIsisTreeCalcNodeStats1hSpineCountPer

Severity: variable

Explanation: This fault is caused by "spine count periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109251: fltTcaIsisTreeCalcNodeStats1dSpineCountPer

Severity: variable

Explanation: This fault is caused by "spine count periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109252: fltTcaIsisTreeCalcNodeStats1wSpineCountPer

Severity: variable

Explanation: This fault is caused by "spine count periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109253: fltTcaIsisTreeCalcNodeStats1moSpineCountPer

Severity: variable

Explanation: This fault is caused by "spine count periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109254: fltTcaIsisTreeCalcNodeStats1qtrSpineCountPer

Severity: variable

Explanation: This fault is caused by "spine count periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109255: fltTcaIsisTreeCalcNodeStats1yearSpineCountPer

Severity: variable

Explanation: This fault is caused by "spine count periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109256: fltTcaIsisTreeCalcNodeStats5minSpineCountMin

Severity: variable

Explanation: This fault is caused by "spine count minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109257: fltTcaIsisTreeCalcNodeStats15minSpineCountMin

Severity: variable

Explanation: This fault is caused by "spine count minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109258: fltTcaIsisTreeCalcNodeStats1hSpineCountMin

Severity: variable

Explanation: This fault is caused by "spine count minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109259: fltTcaIsisTreeCalcNodeStats1dSpineCountMin

Severity: variable

Explanation: This fault is caused by "spine count minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109260: fltTcaIsisTreeCalcNodeStats1wSpineCountMin

Severity: variable

Explanation: This fault is caused by "spine count minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109261: fltTcaIsisTreeCalcNodeStats1moSpineCountMin

Severity: variable

Explanation: This fault is caused by "spine count minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109262: fltTcaIsisTreeCalcNodeStats1qtrSpineCountMin

Severity: variable

Explanation: This fault is caused by "spine count minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109263: fltTcaIsisTreeCalcNodeStats1yearSpineCountMin

Severity: variable

Explanation: This fault is caused by "spine count minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109264: fltTcaIsisTreeCalcNodeStats5minSpineCountMax

Severity: variable

Explanation: This fault is caused by "spine count maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109265: fltTcaIsisTreeCalcNodeStats15minSpineCountMax

Severity: variable

Explanation: This fault is caused by "spine count maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109266: fltTcaIsisTreeCalcNodeStats1hSpineCountMax

Severity: variable

Explanation: This fault is caused by "spine count maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109267: fltTcaIsisTreeCalcNodeStats1dSpineCountMax

Severity: variable

Explanation: This fault is caused by "spine count maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109268: fltTcaIsisTreeCalcNodeStats1wSpineCountMax

Severity: variable

Explanation: This fault is caused by "spine count maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109269: fltTcaIsisTreeCalcNodeStats1moSpineCountMax

Severity: variable

Explanation: This fault is caused by "spine count maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109270: fltTcaIsisTreeCalcNodeStats1qtrSpineCountMax

Severity: variable

Explanation: This fault is caused by "spine count maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109271: fltTcaIsisTreeCalcNodeStats1yearSpineCountMax

Severity: variable

Explanation: This fault is caused by "spine count maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109272: fltTcaIsisTreeCalcNodeStats5minSpineCountAvg

Severity: variable

Explanation: This fault is caused by "spine count average value" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109273: fltTcaIsisTreeCalcNodeStats15minSpineCountAvg

Severity: variable

Explanation: This fault is caused by "spine count average value" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109274: fltTcaIsisTreeCalcNodeStats1hSpineCountAvg

Severity: variable

Explanation: This fault is caused by "spine count average value" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109275: fltTcaIsisTreeCalcNodeStats1dSpineCountAvg

Severity: variable

Explanation: This fault is caused by "spine count average value" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109276: fltTcaIsisTreeCalcNodeStats1wSpineCountAvg

Severity: variable

Explanation: This fault is caused by "spine count average value" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109277: fltTcaIsisTreeCalcNodeStats1moSpineCountAvg

Severity: variable

Explanation: This fault is caused by "spine count average value" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109278: fltTcaIsisTreeCalcNodeStats1qtrSpineCountAvg

Severity: variable

Explanation: This fault is caused by "spine count average value" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109279: fltTcaIsisTreeCalcNodeStats1yearSpineCountAvg

Severity: variable

Explanation: This fault is caused by "spine count average value" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109304: fltTcaIsisTreeCalcNodeStats5minSpineCountTr

Severity: variable

Explanation: This fault is caused by "spine count trend" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109305: fltTcaIsisTreeCalcNodeStats15minSpineCountTr

Severity: variable

Explanation: This fault is caused by "spine count trend" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109306: fltTcaIsisTreeCalcNodeStats1hSpineCountTr

Severity: variable

Explanation: This fault is caused by "spine count trend" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109307: fltTcaIsisTreeCalcNodeStats1dSpineCountTr

Severity: variable

Explanation: This fault is caused by "spine count trend" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109308: fltTcaIsisTreeCalcNodeStats1wSpineCountTr

Severity: variable

Explanation: This fault is caused by "spine count trend" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109309: fltTcaIsisTreeCalcNodeStats1moSpineCountTr

Severity: variable

Explanation: This fault is caused by "spine count trend" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109310: fltTcaIsisTreeCalcNodeStats1qtrSpineCountTr

Severity: variable

Explanation: This fault is caused by "spine count trend" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109311: fltTcaIsisTreeCalcNodeStats1yearSpineCountTr

Severity: variable

Explanation: This fault is caused by "spine count trend" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109312: fltTcaIsisTreeCalcNodeStats5minSpineCountRate

Severity: variable

Explanation: This fault is caused by "spine count rate" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109313: fltTcaIsisTreeCalcNodeStats15minSpineCountRate

Severity: variable

Explanation: This fault is caused by "spine count rate" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109314: fltTcaIsisTreeCalcNodeStats1hSpineCountRate

Severity: variable

Explanation: This fault is caused by "spine count rate" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109315: fltTcaIsisTreeCalcNodeStats1dSpineCountRate

Severity: variable

Explanation: This fault is caused by "spine count rate" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109316: fltTcaIsisTreeCalcNodeStats1wSpineCountRate

Severity: variable

Explanation: This fault is caused by "spine count rate" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109317: fltTcaIsisTreeCalcNodeStats1moSpineCountRate

Severity: variable

Explanation: This fault is caused by "spine count rate" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109318: fltTcaIsisTreeCalcNodeStats1qtrSpineCountRate

Severity: variable

Explanation: This fault is caused by "spine count rate" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109319: fltTcaIsisTreeCalcNodeStats1yearSpineCountRate

Severity: variable

Explanation: This fault is caused by "spine count rate" statistical property crossing threshold level.

Recommended Action: Check the values of "spine count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1094: fltVnsRsMgmtAddrResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F109440: fltTcaIsisTreeCalcStats5minAvgCalcEffLast

Severity: variable

Explanation: This fault is caused by "average effective calculations current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109441: fltTcaIsisTreeCalcStats15minAvgCalcEffLast

Severity: variable

Explanation: This fault is caused by "average effective calculations current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109442: fltTcaIsisTreeCalcStats1hAvgCalcEffLast

Severity: variable

Explanation: This fault is caused by "average effective calculations current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109443: fltTcaIsisTreeCalcStats1dAvgCalcEffLast

Severity: variable

Explanation: This fault is caused by "average effective calculations current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109444: fltTcaIsisTreeCalcStats1wAvgCalcEffLast

Severity: variable

Explanation: This fault is caused by "average effective calculations current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109445: fltTcaIsisTreeCalcStats1moAvgCalcEffLast

Severity: variable

Explanation: This fault is caused by "average effective calculations current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109446: fltTcaIsisTreeCalcStats1qtrAvgCalcEffLast

Severity: variable

Explanation: This fault is caused by "average effective calculations current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109447: fltTcaIsisTreeCalcStats1yearAvgCalcEffLast

Severity: variable

Explanation: This fault is caused by "average effective calculations current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109456: fltTcaIsisTreeCalcStats5minAvgCalcEffCum

Severity: variable

Explanation: This fault is caused by "average effective calculations cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109457: fltTcaIsisTreeCalcStats15minAvgCalcEffCum

Severity: variable

Explanation: This fault is caused by "average effective calculations cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109458: fltTcaIsisTreeCalcStats1hAvgCalcEffCum

Severity: variable

Explanation: This fault is caused by "average effective calculations cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109459: fltTcaIsisTreeCalcStats1dAvgCalcEffCum

Severity: variable

Explanation: This fault is caused by "average effective calculations cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109460: fltTcaIsisTreeCalcStats1wAvgCalcEffCum

Severity: variable

Explanation: This fault is caused by "average effective calculations cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109461: fltTcaIsisTreeCalcStats1moAvgCalcEffCum

Severity: variable

Explanation: This fault is caused by "average effective calculations cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109462: fltTcaIsisTreeCalcStats1qtrAvgCalcEffCum

Severity: variable

Explanation: This fault is caused by "average effective calculations cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109463: fltTcaIsisTreeCalcStats1yearAvgCalcEffCum

Severity: variable

Explanation: This fault is caused by "average effective calculations cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109464: fltTcaIsisTreeCalcStats5minAvgCalcEffPer

Severity: variable

Explanation: This fault is caused by "average effective calculations periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109465: fltTcaIsisTreeCalcStats15minAvgCalcEffPer

Severity: variable

Explanation: This fault is caused by "average effective calculations periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109466: fltTcaIsisTreeCalcStats1hAvgCalcEffPer

Severity: variable

Explanation: This fault is caused by "average effective calculations periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109467: fltTcaIsisTreeCalcStats1dAvgCalcEffPer

Severity: variable

Explanation: This fault is caused by "average effective calculations periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109468: fltTcaIsisTreeCalcStats1wAvgCalcEffPer

Severity: variable

Explanation: This fault is caused by "average effective calculations periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109469: fltTcaIsisTreeCalcStats1moAvgCalcEffPer

Severity: variable

Explanation: This fault is caused by "average effective calculations periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109470: fltTcaIsisTreeCalcStats1qtrAvgCalcEffPer

Severity: variable

Explanation: This fault is caused by "average effective calculations periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109471: fltTcaIsisTreeCalcStats1yearAvgCalcEffPer

Severity: variable

Explanation: This fault is caused by "average effective calculations periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109472: fltTcaIsisTreeCalcStats5minAvgCalcEffMin

Severity: variable

Explanation: This fault is caused by "average effective calculations minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109473: fltTcaIsisTreeCalcStats15minAvgCalcEffMin

Severity: variable

Explanation: This fault is caused by "average effective calculations minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109474: fltTcaIsisTreeCalcStats1hAvgCalcEffMin

Severity: variable

Explanation: This fault is caused by "average effective calculations minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109475: fltTcaIsisTreeCalcStats1dAvgCalcEffMin

Severity: variable

Explanation: This fault is caused by "average effective calculations minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109476: fltTcaIsisTreeCalcStats1wAvgCalcEffMin

Severity: variable

Explanation: This fault is caused by "average effective calculations minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109477: fltTcaIsisTreeCalcStats1moAvgCalcEffMin

Severity: variable

Explanation: This fault is caused by "average effective calculations minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109478: fltTcaIsisTreeCalcStats1qtrAvgCalcEffMin

Severity: variable

Explanation: This fault is caused by "average effective calculations minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109479: fltTcaIsisTreeCalcStats1yearAvgCalcEffMin

Severity: variable

Explanation: This fault is caused by "average effective calculations minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109480: fltTcaIsisTreeCalcStats5minAvgCalcEffMax

Severity: variable

Explanation: This fault is caused by "average effective calculations maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109481: fltTcaIsisTreeCalcStats15minAvgCalcEffMax

Severity: variable

Explanation: This fault is caused by "average effective calculations maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109482: fltTcaIsisTreeCalcStats1hAvgCalcEffMax

Severity: variable

Explanation: This fault is caused by "average effective calculations maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109483: fltTcaIsisTreeCalcStats1dAvgCalcEffMax

Severity: variable

Explanation: This fault is caused by "average effective calculations maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109484: fltTcaIsisTreeCalcStats1wAvgCalcEffMax

Severity: variable

Explanation: This fault is caused by "average effective calculations maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109485: fltTcaIsisTreeCalcStats1moAvgCalcEffMax

Severity: variable

Explanation: This fault is caused by "average effective calculations maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109486: fltTcaIsisTreeCalcStats1qtrAvgCalcEffMax

Severity: variable

Explanation: This fault is caused by "average effective calculations maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109487: fltTcaIsisTreeCalcStats1yearAvgCalcEffMax

Severity: variable

Explanation: This fault is caused by "average effective calculations maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109488: fltTcaIsisTreeCalcStats5minAvgCalcEffAvg

Severity: variable

Explanation: This fault is caused by "average effective calculations average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109489: fltTcaIsisTreeCalcStats15minAvgCalcEffAvg

Severity: variable

Explanation: This fault is caused by "average effective calculations average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109490: fltTcaIsisTreeCalcStats1hAvgCalcEffAvg

Severity: variable

Explanation: This fault is caused by "average effective calculations average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109491: fltTcaIsisTreeCalcStats1dAvgCalcEffAvg

Severity: variable

Explanation: This fault is caused by "average effective calculations average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109492: fltTcaIsisTreeCalcStats1wAvgCalcEffAvg

Severity: variable

Explanation: This fault is caused by "average effective calculations average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109493: fltTcaIsisTreeCalcStats1moAvgCalcEffAvg

Severity: variable

Explanation: This fault is caused by "average effective calculations average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109494: fltTcaIsisTreeCalcStats1qtrAvgCalcEffAvg

Severity: variable

Explanation: This fault is caused by "average effective calculations average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109495: fltTcaIsisTreeCalcStats1yearAvgCalcEffAvg

Severity: variable

Explanation: This fault is caused by "average effective calculations average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1095: fltVnsRsDevFolderToMFolderResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F109520: fltTcaIsisTreeCalcStats5minAvgCalcEffTr

Severity: variable

Explanation: This fault is caused by "average effective calculations trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109521: fltTcaIsisTreeCalcStats15minAvgCalcEffTr

Severity: variable

Explanation: This fault is caused by "average effective calculations trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109522: fltTcaIsisTreeCalcStats1hAvgCalcEffTr

Severity: variable

Explanation: This fault is caused by "average effective calculations trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109523: fltTcaIsisTreeCalcStats1dAvgCalcEffTr

Severity: variable

Explanation: This fault is caused by "average effective calculations trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109524: fltTcaIsisTreeCalcStats1wAvgCalcEffTr

Severity: variable

Explanation: This fault is caused by "average effective calculations trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109525: fltTcaIsisTreeCalcStats1moAvgCalcEffTr

Severity: variable

Explanation: This fault is caused by "average effective calculations trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109526: fltTcaIsisTreeCalcStats1qtrAvgCalcEffTr

Severity: variable

Explanation: This fault is caused by "average effective calculations trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109527: fltTcaIsisTreeCalcStats1yearAvgCalcEffTr

Severity: variable

Explanation: This fault is caused by "average effective calculations trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109528: fltTcaIsisTreeCalcStats5minAvgCalcEffRate

Severity: variable

Explanation: This fault is caused by "average effective calculations rate" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109529: fltTcaIsisTreeCalcStats15minAvgCalcEffRate

Severity: variable

Explanation: This fault is caused by "average effective calculations rate" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109530: fltTcaIsisTreeCalcStats1hAvgCalcEffRate

Severity: variable

Explanation: This fault is caused by "average effective calculations rate" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109531: fltTcaIsisTreeCalcStats1dAvgCalcEffRate

Severity: variable

Explanation: This fault is caused by "average effective calculations rate" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109532: fltTcaIsisTreeCalcStats1wAvgCalcEffRate

Severity: variable

Explanation: This fault is caused by "average effective calculations rate" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109533: fltTcaIsisTreeCalcStats1moAvgCalcEffRate

Severity: variable

Explanation: This fault is caused by "average effective calculations rate" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109534: fltTcaIsisTreeCalcStats1qtrAvgCalcEffRate

Severity: variable

Explanation: This fault is caused by "average effective calculations rate" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109535: fltTcaIsisTreeCalcStats1yearAvgCalcEffRate

Severity: variable

Explanation: This fault is caused by "average effective calculations rate" statistical property crossing threshold level.

Recommended Action: Check the values of "average effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1096: fltVnsRsDevPingToCDevResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F109656: fltTcaIsisTreeCalcStats5minCalcEffLast

Severity: variable

Explanation: This fault is caused by "effective calculations current value" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109657: fltTcaIsisTreeCalcStats15minCalcEffLast

Severity: variable

Explanation: This fault is caused by "effective calculations current value" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109658: fltTcaIsisTreeCalcStats1hCalcEffLast

Severity: variable

Explanation: This fault is caused by "effective calculations current value" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109659: fltTcaIsisTreeCalcStats1dCalcEffLast

Severity: variable

Explanation: This fault is caused by "effective calculations current value" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109660: fltTcaIsisTreeCalcStats1wCalcEffLast

Severity: variable

Explanation: This fault is caused by "effective calculations current value" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109661: fltTcaIsisTreeCalcStats1moCalcEffLast

Severity: variable

Explanation: This fault is caused by "effective calculations current value" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109662: fltTcaIsisTreeCalcStats1qtrCalcEffLast

Severity: variable

Explanation: This fault is caused by "effective calculations current value" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109663: fltTcaIsisTreeCalcStats1yearCalcEffLast

Severity: variable

Explanation: This fault is caused by "effective calculations current value" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109672: fltTcaIsisTreeCalcStats5minCalcEffCum

Severity: variable

Explanation: This fault is caused by "effective calculations cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109673: fltTcaIsisTreeCalcStats15minCalcEffCum

Severity: variable

Explanation: This fault is caused by "effective calculations cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109674: fltTcaIsisTreeCalcStats1hCalcEffCum

Severity: variable

Explanation: This fault is caused by "effective calculations cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109675: fltTcaIsisTreeCalcStats1dCalcEffCum

Severity: variable

Explanation: This fault is caused by "effective calculations cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109676: fltTcaIsisTreeCalcStats1wCalcEffCum

Severity: variable

Explanation: This fault is caused by "effective calculations cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109677: fltTcaIsisTreeCalcStats1moCalcEffCum

Severity: variable

Explanation: This fault is caused by "effective calculations cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109678: fltTcaIsisTreeCalcStats1qtrCalcEffCum

Severity: variable

Explanation: This fault is caused by "effective calculations cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109679: fltTcaIsisTreeCalcStats1yearCalcEffCum

Severity: variable

Explanation: This fault is caused by "effective calculations cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109680: fltTcaIsisTreeCalcStats5minCalcEffPer

Severity: variable

Explanation: This fault is caused by "effective calculations periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109681: fltTcaIsisTreeCalcStats15minCalcEffPer

Severity: variable

Explanation: This fault is caused by "effective calculations periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109682: fltTcaIsisTreeCalcStats1hCalcEffPer

Severity: variable

Explanation: This fault is caused by "effective calculations periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109683: fltTcaIsisTreeCalcStats1dCalcEffPer

Severity: variable

Explanation: This fault is caused by "effective calculations periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109684: fltTcaIsisTreeCalcStats1wCalcEffPer

Severity: variable

Explanation: This fault is caused by "effective calculations periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109685: fltTcaIsisTreeCalcStats1moCalcEffPer

Severity: variable

Explanation: This fault is caused by "effective calculations periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109686: fltTcaIsisTreeCalcStats1qtrCalcEffPer

Severity: variable

Explanation: This fault is caused by "effective calculations periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109687: fltTcaIsisTreeCalcStats1yearCalcEffPer

Severity: variable

Explanation: This fault is caused by "effective calculations periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109688: fltTcaIsisTreeCalcStats5minCalcEffMin

Severity: variable

Explanation: This fault is caused by "effective calculations minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109689: fltTcaIsisTreeCalcStats15minCalcEffMin

Severity: variable

Explanation: This fault is caused by "effective calculations minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109690: fltTcaIsisTreeCalcStats1hCalcEffMin

Severity: variable

Explanation: This fault is caused by "effective calculations minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109691: fltTcaIsisTreeCalcStats1dCalcEffMin

Severity: variable

Explanation: This fault is caused by "effective calculations minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109692: fltTcaIsisTreeCalcStats1wCalcEffMin

Severity: variable

Explanation: This fault is caused by "effective calculations minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109693: fltTcaIsisTreeCalcStats1moCalcEffMin

Severity: variable

Explanation: This fault is caused by "effective calculations minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109694: fltTcaIsisTreeCalcStats1qtrCalcEffMin

Severity: variable

Explanation: This fault is caused by "effective calculations minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109695: fltTcaIsisTreeCalcStats1yearCalcEffMin

Severity: variable

Explanation: This fault is caused by "effective calculations minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109696: fltTcaIsisTreeCalcStats5minCalcEffMax

Severity: variable

Explanation: This fault is caused by "effective calculations maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109697: fltTcaIsisTreeCalcStats15minCalcEffMax

Severity: variable

Explanation: This fault is caused by "effective calculations maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109698: fltTcaIsisTreeCalcStats1hCalcEffMax

Severity: variable

Explanation: This fault is caused by "effective calculations maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109699: fltTcaIsisTreeCalcStats1dCalcEffMax

Severity: variable

Explanation: This fault is caused by "effective calculations maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1097: fltVnsRsFolderInstToMFolderResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F109700: fltTcaIsisTreeCalcStats1wCalcEffMax

Severity: variable

Explanation: This fault is caused by "effective calculations maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109701: fltTcaIsisTreeCalcStats1moCalcEffMax

Severity: variable

Explanation: This fault is caused by "effective calculations maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109702: fltTcaIsisTreeCalcStats1qtrCalcEffMax

Severity: variable

Explanation: This fault is caused by "effective calculations maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109703: fltTcaIsisTreeCalcStats1yearCalcEffMax

Severity: variable

Explanation: This fault is caused by "effective calculations maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109704: fltTcaIsisTreeCalcStats5minCalcEffAvg

Severity: variable

Explanation: This fault is caused by "effective calculations average value" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109705: fltTcaIsisTreeCalcStats15minCalcEffAvg

Severity: variable

Explanation: This fault is caused by "effective calculations average value" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109706: fltTcaIsisTreeCalcStats1hCalcEffAvg

Severity: variable

Explanation: This fault is caused by "effective calculations average value" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109707: fltTcaIsisTreeCalcStats1dCalcEffAvg

Severity: variable

Explanation: This fault is caused by "effective calculations average value" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109708: fltTcaIsisTreeCalcStats1wCalcEffAvg

Severity: variable

Explanation: This fault is caused by "effective calculations average value" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109709: fltTcaIsisTreeCalcStats1moCalcEffAvg

Severity: variable

Explanation: This fault is caused by "effective calculations average value" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109710: fltTcaIsisTreeCalcStats1qtrCalcEffAvg

Severity: variable

Explanation: This fault is caused by "effective calculations average value" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109711: fltTcaIsisTreeCalcStats1yearCalcEffAvg

Severity: variable

Explanation: This fault is caused by "effective calculations average value" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109736: fltTcaIsisTreeCalcStats5minCalcEffTr

Severity: variable

Explanation: This fault is caused by "effective calculations trend" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109737: fltTcaIsisTreeCalcStats15minCalcEffTr

Severity: variable

Explanation: This fault is caused by "effective calculations trend" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109738: fltTcaIsisTreeCalcStats1hCalcEffTr

Severity: variable

Explanation: This fault is caused by "effective calculations trend" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109739: fltTcaIsisTreeCalcStats1dCalcEffTr

Severity: variable

Explanation: This fault is caused by "effective calculations trend" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109740: fltTcaIsisTreeCalcStats1wCalcEffTr

Severity: variable

Explanation: This fault is caused by "effective calculations trend" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109741: fltTcaIsisTreeCalcStats1moCalcEffTr

Severity: variable

Explanation: This fault is caused by "effective calculations trend" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109742: fltTcaIsisTreeCalcStats1qtrCalcEffTr

Severity: variable

Explanation: This fault is caused by "effective calculations trend" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109743: fltTcaIsisTreeCalcStats1yearCalcEffTr

Severity: variable

Explanation: This fault is caused by "effective calculations trend" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109744: fltTcaIsisTreeCalcStats5minCalcEffRate

Severity: variable

Explanation: This fault is caused by "effective calculations rate" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109745: fltTcaIsisTreeCalcStats15minCalcEffRate

Severity: variable

Explanation: This fault is caused by "effective calculations rate" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109746: fltTcaIsisTreeCalcStats1hCalcEffRate

Severity: variable

Explanation: This fault is caused by "effective calculations rate" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109747: fltTcaIsisTreeCalcStats1dCalcEffRate

Severity: variable

Explanation: This fault is caused by "effective calculations rate" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109748: fltTcaIsisTreeCalcStats1wCalcEffRate

Severity: variable

Explanation: This fault is caused by "effective calculations rate" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109749: fltTcaIsisTreeCalcStats1moCalcEffRate

Severity: variable

Explanation: This fault is caused by "effective calculations rate" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109750: fltTcaIsisTreeCalcStats1qtrCalcEffRate

Severity: variable

Explanation: This fault is caused by "effective calculations rate" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109751: fltTcaIsisTreeCalcStats1yearCalcEffRate

Severity: variable

Explanation: This fault is caused by "effective calculations rate" statistical property crossing threshold level.

Recommended Action: Check the values of "effective calculations" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1098: fltVnsRsConnToCtxTermInstResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F109872: fltTcaIsisTreeCalcStats5minRunsLast

Severity: variable

Explanation: This fault is caused by "runs current value" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109873: fltTcaIsisTreeCalcStats15minRunsLast

Severity: variable

Explanation: This fault is caused by "runs current value" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109874: fltTcaIsisTreeCalcStats1hRunsLast

Severity: variable

Explanation: This fault is caused by "runs current value" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109875: fltTcaIsisTreeCalcStats1dRunsLast

Severity: variable

Explanation: This fault is caused by "runs current value" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109876: fltTcaIsisTreeCalcStats1wRunsLast

Severity: variable

Explanation: This fault is caused by "runs current value" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109877: fltTcaIsisTreeCalcStats1moRunsLast

Severity: variable

Explanation: This fault is caused by "runs current value" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109878: fltTcaIsisTreeCalcStats1qtrRunsLast

Severity: variable

Explanation: This fault is caused by "runs current value" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109879: fltTcaIsisTreeCalcStats1yearRunsLast

Severity: variable

Explanation: This fault is caused by "runs current value" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109888: fltTcaIsisTreeCalcStats5minRunsCum

Severity: variable

Explanation: This fault is caused by "runs cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109889: fltTcaIsisTreeCalcStats15minRunsCum

Severity: variable

Explanation: This fault is caused by "runs cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109890: fltTcaIsisTreeCalcStats1hRunsCum

Severity: variable

Explanation: This fault is caused by "runs cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109891: fltTcaIsisTreeCalcStats1dRunsCum

Severity: variable

Explanation: This fault is caused by "runs cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109892: fltTcaIsisTreeCalcStats1wRunsCum

Severity: variable

Explanation: This fault is caused by "runs cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109893: fltTcaIsisTreeCalcStats1moRunsCum

Severity: variable

Explanation: This fault is caused by "runs cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109894: fltTcaIsisTreeCalcStats1qtrRunsCum

Severity: variable

Explanation: This fault is caused by "runs cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109895: fltTcaIsisTreeCalcStats1yearRunsCum

Severity: variable

Explanation: This fault is caused by "runs cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109896: fltTcaIsisTreeCalcStats5minRunsPer

Severity: variable

Explanation: This fault is caused by "runs periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109897: fltTcaIsisTreeCalcStats15minRunsPer

Severity: variable

Explanation: This fault is caused by "runs periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109898: fltTcaIsisTreeCalcStats1hRunsPer

Severity: variable

Explanation: This fault is caused by "runs periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109899: fltTcaIsisTreeCalcStats1dRunsPer

Severity: variable

Explanation: This fault is caused by "runs periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1099: fltVnsRsConnToFltInstResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F109900: fltTcaIsisTreeCalcStats1wRunsPer

Severity: variable

Explanation: This fault is caused by "runs periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109901: fltTcaIsisTreeCalcStats1moRunsPer

Severity: variable

Explanation: This fault is caused by "runs periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109902: fltTcaIsisTreeCalcStats1qtrRunsPer

Severity: variable

Explanation: This fault is caused by "runs periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109903: fltTcaIsisTreeCalcStats1yearRunsPer

Severity: variable

Explanation: This fault is caused by "runs periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109904: fltTcaIsisTreeCalcStats5minRunsMin

Severity: variable

Explanation: This fault is caused by "runs minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109905: fltTcaIsisTreeCalcStats15minRunsMin

Severity: variable

Explanation: This fault is caused by "runs minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109906: fltTcaIsisTreeCalcStats1hRunsMin

Severity: variable

Explanation: This fault is caused by "runs minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109907: fltTcaIsisTreeCalcStats1dRunsMin

Severity: variable

Explanation: This fault is caused by "runs minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109908: fltTcaIsisTreeCalcStats1wRunsMin

Severity: variable

Explanation: This fault is caused by "runs minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109909: fltTcaIsisTreeCalcStats1moRunsMin

Severity: variable

Explanation: This fault is caused by "runs minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109910: fltTcaIsisTreeCalcStats1qtrRunsMin

Severity: variable

Explanation: This fault is caused by "runs minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109911: fltTcaIsisTreeCalcStats1yearRunsMin

Severity: variable

Explanation: This fault is caused by "runs minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109912: fltTcaIsisTreeCalcStats5minRunsMax

Severity: variable

Explanation: This fault is caused by "runs maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109913: fltTcaIsisTreeCalcStats15minRunsMax

Severity: variable

Explanation: This fault is caused by "runs maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109914: fltTcaIsisTreeCalcStats1hRunsMax

Severity: variable

Explanation: This fault is caused by "runs maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109915: fltTcaIsisTreeCalcStats1dRunsMax

Severity: variable

Explanation: This fault is caused by "runs maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109916: fltTcaIsisTreeCalcStats1wRunsMax

Severity: variable

Explanation: This fault is caused by "runs maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109917: fltTcaIsisTreeCalcStats1moRunsMax

Severity: variable

Explanation: This fault is caused by "runs maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109918: fltTcaIsisTreeCalcStats1qtrRunsMax

Severity: variable

Explanation: This fault is caused by "runs maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109919: fltTcaIsisTreeCalcStats1yearRunsMax

Severity: variable

Explanation: This fault is caused by "runs maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109920: fltTcaIsisTreeCalcStats5minRunsAvg

Severity: variable

Explanation: This fault is caused by "runs average value" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109921: fltTcaIsisTreeCalcStats15minRunsAvg

Severity: variable

Explanation: This fault is caused by "runs average value" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109922: fltTcaIsisTreeCalcStats1hRunsAvg

Severity: variable

Explanation: This fault is caused by "runs average value" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109923: fltTcaIsisTreeCalcStats1dRunsAvg

Severity: variable

Explanation: This fault is caused by "runs average value" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109924: fltTcaIsisTreeCalcStats1wRunsAvg

Severity: variable

Explanation: This fault is caused by "runs average value" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109925: fltTcaIsisTreeCalcStats1moRunsAvg

Severity: variable

Explanation: This fault is caused by "runs average value" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109926: fltTcaIsisTreeCalcStats1qtrRunsAvg

Severity: variable

Explanation: This fault is caused by "runs average value" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109927: fltTcaIsisTreeCalcStats1yearRunsAvg

Severity: variable

Explanation: This fault is caused by "runs average value" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109952: fltTcaIsisTreeCalcStats5minRunsTr

Severity: variable

Explanation: This fault is caused by "runs trend" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109953: fltTcaIsisTreeCalcStats15minRunsTr

Severity: variable

Explanation: This fault is caused by "runs trend" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109954: fltTcaIsisTreeCalcStats1hRunsTr

Severity: variable

Explanation: This fault is caused by "runs trend" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109955: fltTcaIsisTreeCalcStats1dRunsTr

Severity: variable

Explanation: This fault is caused by "runs trend" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109956: fltTcaIsisTreeCalcStats1wRunsTr

Severity: variable

Explanation: This fault is caused by "runs trend" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109957: fltTcaIsisTreeCalcStats1moRunsTr

Severity: variable

Explanation: This fault is caused by "runs trend" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109958: fltTcaIsisTreeCalcStats1qtrRunsTr

Severity: variable

Explanation: This fault is caused by "runs trend" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109959: fltTcaIsisTreeCalcStats1yearRunsTr

Severity: variable

Explanation: This fault is caused by "runs trend" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109960: fltTcaIsisTreeCalcStats5minRunsRate

Severity: variable

Explanation: This fault is caused by "runs rate" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109961: fltTcaIsisTreeCalcStats15minRunsRate

Severity: variable

Explanation: This fault is caused by "runs rate" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109962: fltTcaIsisTreeCalcStats1hRunsRate

Severity: variable

Explanation: This fault is caused by "runs rate" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109963: fltTcaIsisTreeCalcStats1dRunsRate

Severity: variable

Explanation: This fault is caused by "runs rate" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109964: fltTcaIsisTreeCalcStats1wRunsRate

Severity: variable

Explanation: This fault is caused by "runs rate" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109965: fltTcaIsisTreeCalcStats1moRunsRate

Severity: variable

Explanation: This fault is caused by "runs rate" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109966: fltTcaIsisTreeCalcStats1qtrRunsRate

Severity: variable

Explanation: This fault is caused by "runs rate" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F109967: fltTcaIsisTreeCalcStats1yearRunsRate

Severity: variable

Explanation: This fault is caused by "runs rate" statistical property crossing threshold level.

Recommended Action: Check the values of "runs" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1100: fltVnsRsConnToLIfInstResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F110088: fltTcaL2IngrBytes5minDropLast

Severity: variable

Explanation: This fault is caused by "ingress drop bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110089: fltTcaL2IngrBytes15minDropLast

Severity: variable

Explanation: This fault is caused by "ingress drop bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110090: fltTcaL2IngrBytes1hDropLast

Severity: variable

Explanation: This fault is caused by "ingress drop bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110091: fltTcaL2IngrBytes1dDropLast

Severity: variable

Explanation: This fault is caused by "ingress drop bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110092: fltTcaL2IngrBytes1wDropLast

Severity: variable

Explanation: This fault is caused by "ingress drop bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110093: fltTcaL2IngrBytes1moDropLast

Severity: variable

Explanation: This fault is caused by "ingress drop bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110094: fltTcaL2IngrBytes1qtrDropLast

Severity: variable

Explanation: This fault is caused by "ingress drop bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110095: fltTcaL2IngrBytes1yearDropLast

Severity: variable

Explanation: This fault is caused by "ingress drop bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1101: fltVnsRsLDevCtxToLDevResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F110104: fltTcaL2IngrBytes5minDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110105: fltTcaL2IngrBytes15minDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110106: fltTcaL2IngrBytes1hDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110107: fltTcaL2IngrBytes1dDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110108: fltTcaL2IngrBytes1wDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110109: fltTcaL2IngrBytes1moDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110110: fltTcaL2IngrBytes1qtrDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110111: fltTcaL2IngrBytes1yearDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110112: fltTcaL2IngrBytes5minDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110113: fltTcaL2IngrBytes15minDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110114: fltTcaL2IngrBytes1hDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110115: fltTcaL2IngrBytes1dDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110116: fltTcaL2IngrBytes1wDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110117: fltTcaL2IngrBytes1moDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110118: fltTcaL2IngrBytes1qtrDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110119: fltTcaL2IngrBytes1yearDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110120: fltTcaL2IngrBytes5minDropMin

Severity: variable

Explanation: This fault is caused by "ingress drop bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110121: fltTcaL2IngrBytes15minDropMin

Severity: variable

Explanation: This fault is caused by "ingress drop bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110122: fltTcaL2IngrBytes1hDropMin

Severity: variable

Explanation: This fault is caused by "ingress drop bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110123: fltTcaL2IngrBytes1dDropMin

Severity: variable

Explanation: This fault is caused by "ingress drop bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110124: fltTcaL2IngrBytes1wDropMin

Severity: variable

Explanation: This fault is caused by "ingress drop bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110125: fltTcaL2IngrBytes1moDropMin

Severity: variable

Explanation: This fault is caused by "ingress drop bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110126: fltTcaL2IngrBytes1qtrDropMin

Severity: variable

Explanation: This fault is caused by "ingress drop bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110127: fltTcaL2IngrBytes1yearDropMin

Severity: variable

Explanation: This fault is caused by "ingress drop bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110128: fltTcaL2IngrBytes5minDropMax

Severity: variable

Explanation: This fault is caused by "ingress drop bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110129: fltTcaL2IngrBytes15minDropMax

Severity: variable

Explanation: This fault is caused by "ingress drop bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110130: fltTcaL2IngrBytes1hDropMax

Severity: variable

Explanation: This fault is caused by "ingress drop bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110131: fltTcaL2IngrBytes1dDropMax

Severity: variable

Explanation: This fault is caused by "ingress drop bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110132: fltTcaL2IngrBytes1wDropMax

Severity: variable

Explanation: This fault is caused by "ingress drop bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110133: fltTcaL2IngrBytes1moDropMax

Severity: variable

Explanation: This fault is caused by "ingress drop bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110134: fltTcaL2IngrBytes1qtrDropMax

Severity: variable

Explanation: This fault is caused by "ingress drop bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110135: fltTcaL2IngrBytes1yearDropMax

Severity: variable

Explanation: This fault is caused by "ingress drop bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110136: fltTcaL2IngrBytes5minDropAvg

Severity: variable

Explanation: This fault is caused by "ingress drop bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110137: fltTcaL2IngrBytes15minDropAvg

Severity: variable

Explanation: This fault is caused by "ingress drop bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110138: fltTcaL2IngrBytes1hDropAvg

Severity: variable

Explanation: This fault is caused by "ingress drop bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110139: fltTcaL2IngrBytes1dDropAvg

Severity: variable

Explanation: This fault is caused by "ingress drop bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110140: fltTcaL2IngrBytes1wDropAvg

Severity: variable

Explanation: This fault is caused by "ingress drop bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110141: fltTcaL2IngrBytes1moDropAvg

Severity: variable

Explanation: This fault is caused by "ingress drop bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110142: fltTcaL2IngrBytes1qtrDropAvg

Severity: variable

Explanation: This fault is caused by "ingress drop bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110143: fltTcaL2IngrBytes1yearDropAvg

Severity: variable

Explanation: This fault is caused by "ingress drop bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110168: fltTcaL2IngrBytes5minDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110169: fltTcaL2IngrBytes15minDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110170: fltTcaL2IngrBytes1hDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110171: fltTcaL2IngrBytes1dDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110172: fltTcaL2IngrBytes1wDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110173: fltTcaL2IngrBytes1moDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110174: fltTcaL2IngrBytes1qtrDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110175: fltTcaL2IngrBytes1yearDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110176: fltTcaL2IngrBytes5minDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110177: fltTcaL2IngrBytes15minDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110178: fltTcaL2IngrBytes1hDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110179: fltTcaL2IngrBytes1dDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110180: fltTcaL2IngrBytes1wDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110181: fltTcaL2IngrBytes1moDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110182: fltTcaL2IngrBytes1qtrDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110183: fltTcaL2IngrBytes1yearDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1102: fltVnsRsLdevIfToLDevResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F110256: fltTcaL2IngrBytesPart5minDropLast

Severity: variable

Explanation: This fault is caused by "ingress drop bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110257: fltTcaL2IngrBytesPart15minDropLast

Severity: variable

Explanation: This fault is caused by "ingress drop bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110258: fltTcaL2IngrBytesPart1hDropLast

Severity: variable

Explanation: This fault is caused by "ingress drop bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110259: fltTcaL2IngrBytesPart1dDropLast

Severity: variable

Explanation: This fault is caused by "ingress drop bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110260: fltTcaL2IngrBytesPart1wDropLast

Severity: variable

Explanation: This fault is caused by "ingress drop bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110261: fltTcaL2IngrBytesPart1moDropLast

Severity: variable

Explanation: This fault is caused by "ingress drop bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110262: fltTcaL2IngrBytesPart1qtrDropLast

Severity: variable

Explanation: This fault is caused by "ingress drop bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110263: fltTcaL2IngrBytesPart1yearDropLast

Severity: variable

Explanation: This fault is caused by "ingress drop bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110272: fltTcaL2IngrBytesPart5minDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110273: fltTcaL2IngrBytesPart15minDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110274: fltTcaL2IngrBytesPart1hDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110275: fltTcaL2IngrBytesPart1dDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110276: fltTcaL2IngrBytesPart1wDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110277: fltTcaL2IngrBytesPart1moDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110278: fltTcaL2IngrBytesPart1qtrDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110279: fltTcaL2IngrBytesPart1yearDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110280: fltTcaL2IngrBytesPart5minDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110281: fltTcaL2IngrBytesPart15minDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110282: fltTcaL2IngrBytesPart1hDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110283: fltTcaL2IngrBytesPart1dDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110284: fltTcaL2IngrBytesPart1wDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110285: fltTcaL2IngrBytesPart1moDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110286: fltTcaL2IngrBytesPart1qtrDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110287: fltTcaL2IngrBytesPart1yearDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110288: fltTcaL2IngrBytesPart5minDropMin

Severity: variable

Explanation: This fault is caused by "ingress drop bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110289: fltTcaL2IngrBytesPart15minDropMin

Severity: variable

Explanation: This fault is caused by "ingress drop bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110290: fltTcaL2IngrBytesPart1hDropMin

Severity: variable

Explanation: This fault is caused by "ingress drop bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110291: fltTcaL2IngrBytesPart1dDropMin

Severity: variable

Explanation: This fault is caused by "ingress drop bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110292: fltTcaL2IngrBytesPart1wDropMin

Severity: variable

Explanation: This fault is caused by "ingress drop bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110293: fltTcaL2IngrBytesPart1moDropMin

Severity: variable

Explanation: This fault is caused by "ingress drop bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110294: fltTcaL2IngrBytesPart1qtrDropMin

Severity: variable

Explanation: This fault is caused by "ingress drop bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110295: fltTcaL2IngrBytesPart1yearDropMin

Severity: variable

Explanation: This fault is caused by "ingress drop bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110296: fltTcaL2IngrBytesPart5minDropMax

Severity: variable

Explanation: This fault is caused by "ingress drop bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110297: fltTcaL2IngrBytesPart15minDropMax

Severity: variable

Explanation: This fault is caused by "ingress drop bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110298: fltTcaL2IngrBytesPart1hDropMax

Severity: variable

Explanation: This fault is caused by "ingress drop bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110299: fltTcaL2IngrBytesPart1dDropMax

Severity: variable

Explanation: This fault is caused by "ingress drop bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1103: fltVnsRsLIfCtxToLIfResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F110300: fltTcaL2IngrBytesPart1wDropMax

Severity: variable

Explanation: This fault is caused by "ingress drop bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110301: fltTcaL2IngrBytesPart1moDropMax

Severity: variable

Explanation: This fault is caused by "ingress drop bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110302: fltTcaL2IngrBytesPart1qtrDropMax

Severity: variable

Explanation: This fault is caused by "ingress drop bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110303: fltTcaL2IngrBytesPart1yearDropMax

Severity: variable

Explanation: This fault is caused by "ingress drop bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110304: fltTcaL2IngrBytesPart5minDropAvg

Severity: variable

Explanation: This fault is caused by "ingress drop bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110305: fltTcaL2IngrBytesPart15minDropAvg

Severity: variable

Explanation: This fault is caused by "ingress drop bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110306: fltTcaL2IngrBytesPart1hDropAvg

Severity: variable

Explanation: This fault is caused by "ingress drop bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110307: fltTcaL2IngrBytesPart1dDropAvg

Severity: variable

Explanation: This fault is caused by "ingress drop bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110308: fltTcaL2IngrBytesPart1wDropAvg

Severity: variable

Explanation: This fault is caused by "ingress drop bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110309: fltTcaL2IngrBytesPart1moDropAvg

Severity: variable

Explanation: This fault is caused by "ingress drop bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110310: fltTcaL2IngrBytesPart1qtrDropAvg

Severity: variable

Explanation: This fault is caused by "ingress drop bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110311: fltTcaL2IngrBytesPart1yearDropAvg

Severity: variable

Explanation: This fault is caused by "ingress drop bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110336: fltTcaL2IngrBytesPart5minDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110337: fltTcaL2IngrBytesPart15minDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110338: fltTcaL2IngrBytesPart1hDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110339: fltTcaL2IngrBytesPart1dDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110340: fltTcaL2IngrBytesPart1wDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110341: fltTcaL2IngrBytesPart1moDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110342: fltTcaL2IngrBytesPart1qtrDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110343: fltTcaL2IngrBytesPart1yearDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110344: fltTcaL2IngrBytesPart5minDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110345: fltTcaL2IngrBytesPart15minDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110346: fltTcaL2IngrBytesPart1hDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110347: fltTcaL2IngrBytesPart1dDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110348: fltTcaL2IngrBytesPart1wDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110349: fltTcaL2IngrBytesPart1moDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110350: fltTcaL2IngrBytesPart1qtrDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110351: fltTcaL2IngrBytesPart1yearDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1104: fltVnsRsInterfaceResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F110424: fltTcaL2IngrBytesAg5minDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110425: fltTcaL2IngrBytesAg15minDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110426: fltTcaL2IngrBytesAg1hDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110427: fltTcaL2IngrBytesAg1dDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110428: fltTcaL2IngrBytesAg1wDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110429: fltTcaL2IngrBytesAg1moDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110430: fltTcaL2IngrBytesAg1qtrDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110431: fltTcaL2IngrBytesAg1yearDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110432: fltTcaL2IngrBytesAg5minDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110433: fltTcaL2IngrBytesAg15minDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110434: fltTcaL2IngrBytesAg1hDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110435: fltTcaL2IngrBytesAg1dDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110436: fltTcaL2IngrBytesAg1wDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110437: fltTcaL2IngrBytesAg1moDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110438: fltTcaL2IngrBytesAg1qtrDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110439: fltTcaL2IngrBytesAg1yearDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110464: fltTcaL2IngrBytesAg5minDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110465: fltTcaL2IngrBytesAg15minDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110466: fltTcaL2IngrBytesAg1hDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110467: fltTcaL2IngrBytesAg1dDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110468: fltTcaL2IngrBytesAg1wDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110469: fltTcaL2IngrBytesAg1moDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110470: fltTcaL2IngrBytesAg1qtrDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110471: fltTcaL2IngrBytesAg1yearDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110472: fltTcaL2IngrBytesAg5minDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110473: fltTcaL2IngrBytesAg15minDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110474: fltTcaL2IngrBytesAg1hDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110475: fltTcaL2IngrBytesAg1dDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110476: fltTcaL2IngrBytesAg1wDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110477: fltTcaL2IngrBytesAg1moDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110478: fltTcaL2IngrBytesAg1qtrDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110479: fltTcaL2IngrBytesAg1yearDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1105: fltVnsRsDfctToCatResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F110576: fltTcaL2IngrBytes5minFloodLast

Severity: variable

Explanation: This fault is caused by "ingress flood bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110577: fltTcaL2IngrBytes15minFloodLast

Severity: variable

Explanation: This fault is caused by "ingress flood bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110578: fltTcaL2IngrBytes1hFloodLast

Severity: variable

Explanation: This fault is caused by "ingress flood bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110579: fltTcaL2IngrBytes1dFloodLast

Severity: variable

Explanation: This fault is caused by "ingress flood bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110580: fltTcaL2IngrBytes1wFloodLast

Severity: variable

Explanation: This fault is caused by "ingress flood bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110581: fltTcaL2IngrBytes1moFloodLast

Severity: variable

Explanation: This fault is caused by "ingress flood bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110582: fltTcaL2IngrBytes1qtrFloodLast

Severity: variable

Explanation: This fault is caused by "ingress flood bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110583: fltTcaL2IngrBytes1yearFloodLast

Severity: variable

Explanation: This fault is caused by "ingress flood bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110592: fltTcaL2IngrBytes5minFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110593: fltTcaL2IngrBytes15minFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110594: fltTcaL2IngrBytes1hFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110595: fltTcaL2IngrBytes1dFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110596: fltTcaL2IngrBytes1wFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110597: fltTcaL2IngrBytes1moFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110598: fltTcaL2IngrBytes1qtrFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110599: fltTcaL2IngrBytes1yearFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110600: fltTcaL2IngrBytes5minFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110601: fltTcaL2IngrBytes15minFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110602: fltTcaL2IngrBytes1hFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110603: fltTcaL2IngrBytes1dFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110604: fltTcaL2IngrBytes1wFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110605: fltTcaL2IngrBytes1moFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110606: fltTcaL2IngrBytes1qtrFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110607: fltTcaL2IngrBytes1yearFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110608: fltTcaL2IngrBytes5minFloodMin

Severity: variable

Explanation: This fault is caused by "ingress flood bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110609: fltTcaL2IngrBytes15minFloodMin

Severity: variable

Explanation: This fault is caused by "ingress flood bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110610: fltTcaL2IngrBytes1hFloodMin

Severity: variable

Explanation: This fault is caused by "ingress flood bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110611: fltTcaL2IngrBytes1dFloodMin

Severity: variable

Explanation: This fault is caused by "ingress flood bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110612: fltTcaL2IngrBytes1wFloodMin

Severity: variable

Explanation: This fault is caused by "ingress flood bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110613: fltTcaL2IngrBytes1moFloodMin

Severity: variable

Explanation: This fault is caused by "ingress flood bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110614: fltTcaL2IngrBytes1qtrFloodMin

Severity: variable

Explanation: This fault is caused by "ingress flood bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110615: fltTcaL2IngrBytes1yearFloodMin

Severity: variable

Explanation: This fault is caused by "ingress flood bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110616: fltTcaL2IngrBytes5minFloodMax

Severity: variable

Explanation: This fault is caused by "ingress flood bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110617: fltTcaL2IngrBytes15minFloodMax

Severity: variable

Explanation: This fault is caused by "ingress flood bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110618: fltTcaL2IngrBytes1hFloodMax

Severity: variable

Explanation: This fault is caused by "ingress flood bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110619: fltTcaL2IngrBytes1dFloodMax

Severity: variable

Explanation: This fault is caused by "ingress flood bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110620: fltTcaL2IngrBytes1wFloodMax

Severity: variable

Explanation: This fault is caused by "ingress flood bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110621: fltTcaL2IngrBytes1moFloodMax

Severity: variable

Explanation: This fault is caused by "ingress flood bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110622: fltTcaL2IngrBytes1qtrFloodMax

Severity: variable

Explanation: This fault is caused by "ingress flood bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110623: fltTcaL2IngrBytes1yearFloodMax

Severity: variable

Explanation: This fault is caused by "ingress flood bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110624: fltTcaL2IngrBytes5minFloodAvg

Severity: variable

Explanation: This fault is caused by "ingress flood bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110625: fltTcaL2IngrBytes15minFloodAvg

Severity: variable

Explanation: This fault is caused by "ingress flood bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110626: fltTcaL2IngrBytes1hFloodAvg

Severity: variable

Explanation: This fault is caused by "ingress flood bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110627: fltTcaL2IngrBytes1dFloodAvg

Severity: variable

Explanation: This fault is caused by "ingress flood bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110628: fltTcaL2IngrBytes1wFloodAvg

Severity: variable

Explanation: This fault is caused by "ingress flood bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110629: fltTcaL2IngrBytes1moFloodAvg

Severity: variable

Explanation: This fault is caused by "ingress flood bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110630: fltTcaL2IngrBytes1qtrFloodAvg

Severity: variable

Explanation: This fault is caused by "ingress flood bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110631: fltTcaL2IngrBytes1yearFloodAvg

Severity: variable

Explanation: This fault is caused by "ingress flood bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110656: fltTcaL2IngrBytes5minFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110657: fltTcaL2IngrBytes15minFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110658: fltTcaL2IngrBytes1hFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110659: fltTcaL2IngrBytes1dFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110660: fltTcaL2IngrBytes1wFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110661: fltTcaL2IngrBytes1moFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110662: fltTcaL2IngrBytes1qtrFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110663: fltTcaL2IngrBytes1yearFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110664: fltTcaL2IngrBytes5minFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110665: fltTcaL2IngrBytes15minFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110666: fltTcaL2IngrBytes1hFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110667: fltTcaL2IngrBytes1dFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110668: fltTcaL2IngrBytes1wFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110669: fltTcaL2IngrBytes1moFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110670: fltTcaL2IngrBytes1qtrFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110671: fltTcaL2IngrBytes1yearFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1107: fltVnsRsNodeInstToLDevCtxResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F110744: fltTcaL2IngrBytesPart5minFloodLast

Severity: variable

Explanation: This fault is caused by "ingress flood bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110745: fltTcaL2IngrBytesPart15minFloodLast

Severity: variable

Explanation: This fault is caused by "ingress flood bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110746: fltTcaL2IngrBytesPart1hFloodLast

Severity: variable

Explanation: This fault is caused by "ingress flood bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110747: fltTcaL2IngrBytesPart1dFloodLast

Severity: variable

Explanation: This fault is caused by "ingress flood bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110748: fltTcaL2IngrBytesPart1wFloodLast

Severity: variable

Explanation: This fault is caused by "ingress flood bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110749: fltTcaL2IngrBytesPart1moFloodLast

Severity: variable

Explanation: This fault is caused by "ingress flood bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110750: fltTcaL2IngrBytesPart1qtrFloodLast

Severity: variable

Explanation: This fault is caused by "ingress flood bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110751: fltTcaL2IngrBytesPart1yearFloodLast

Severity: variable

Explanation: This fault is caused by "ingress flood bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110760: fltTcaL2IngrBytesPart5minFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110761: fltTcaL2IngrBytesPart15minFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110762: fltTcaL2IngrBytesPart1hFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110763: fltTcaL2IngrBytesPart1dFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110764: fltTcaL2IngrBytesPart1wFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110765: fltTcaL2IngrBytesPart1moFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110766: fltTcaL2IngrBytesPart1qtrFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110767: fltTcaL2IngrBytesPart1yearFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110768: fltTcaL2IngrBytesPart5minFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110769: fltTcaL2IngrBytesPart15minFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110770: fltTcaL2IngrBytesPart1hFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110771: fltTcaL2IngrBytesPart1dFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110772: fltTcaL2IngrBytesPart1wFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110773: fltTcaL2IngrBytesPart1moFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110774: fltTcaL2IngrBytesPart1qtrFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110775: fltTcaL2IngrBytesPart1yearFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110776: fltTcaL2IngrBytesPart5minFloodMin

Severity: variable

Explanation: This fault is caused by "ingress flood bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110777: fltTcaL2IngrBytesPart15minFloodMin

Severity: variable

Explanation: This fault is caused by "ingress flood bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110778: fltTcaL2IngrBytesPart1hFloodMin

Severity: variable

Explanation: This fault is caused by "ingress flood bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110779: fltTcaL2IngrBytesPart1dFloodMin

Severity: variable

Explanation: This fault is caused by "ingress flood bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110780: fltTcaL2IngrBytesPart1wFloodMin

Severity: variable

Explanation: This fault is caused by "ingress flood bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110781: fltTcaL2IngrBytesPart1moFloodMin

Severity: variable

Explanation: This fault is caused by "ingress flood bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110782: fltTcaL2IngrBytesPart1qtrFloodMin

Severity: variable

Explanation: This fault is caused by "ingress flood bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110783: fltTcaL2IngrBytesPart1yearFloodMin

Severity: variable

Explanation: This fault is caused by "ingress flood bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110784: fltTcaL2IngrBytesPart5minFloodMax

Severity: variable

Explanation: This fault is caused by "ingress flood bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110785: fltTcaL2IngrBytesPart15minFloodMax

Severity: variable

Explanation: This fault is caused by "ingress flood bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110786: fltTcaL2IngrBytesPart1hFloodMax

Severity: variable

Explanation: This fault is caused by "ingress flood bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110787: fltTcaL2IngrBytesPart1dFloodMax

Severity: variable

Explanation: This fault is caused by "ingress flood bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110788: fltTcaL2IngrBytesPart1wFloodMax

Severity: variable

Explanation: This fault is caused by "ingress flood bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110789: fltTcaL2IngrBytesPart1moFloodMax

Severity: variable

Explanation: This fault is caused by "ingress flood bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110790: fltTcaL2IngrBytesPart1qtrFloodMax

Severity: variable

Explanation: This fault is caused by "ingress flood bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110791: fltTcaL2IngrBytesPart1yearFloodMax

Severity: variable

Explanation: This fault is caused by "ingress flood bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110792: fltTcaL2IngrBytesPart5minFloodAvg

Severity: variable

Explanation: This fault is caused by "ingress flood bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110793: fltTcaL2IngrBytesPart15minFloodAvg

Severity: variable

Explanation: This fault is caused by "ingress flood bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110794: fltTcaL2IngrBytesPart1hFloodAvg

Severity: variable

Explanation: This fault is caused by "ingress flood bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110795: fltTcaL2IngrBytesPart1dFloodAvg

Severity: variable

Explanation: This fault is caused by "ingress flood bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110796: fltTcaL2IngrBytesPart1wFloodAvg

Severity: variable

Explanation: This fault is caused by "ingress flood bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110797: fltTcaL2IngrBytesPart1moFloodAvg

Severity: variable

Explanation: This fault is caused by "ingress flood bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110798: fltTcaL2IngrBytesPart1qtrFloodAvg

Severity: variable

Explanation: This fault is caused by "ingress flood bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110799: fltTcaL2IngrBytesPart1yearFloodAvg

Severity: variable

Explanation: This fault is caused by "ingress flood bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110824: fltTcaL2IngrBytesPart5minFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110825: fltTcaL2IngrBytesPart15minFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110826: fltTcaL2IngrBytesPart1hFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110827: fltTcaL2IngrBytesPart1dFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110828: fltTcaL2IngrBytesPart1wFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110829: fltTcaL2IngrBytesPart1moFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110830: fltTcaL2IngrBytesPart1qtrFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110831: fltTcaL2IngrBytesPart1yearFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110832: fltTcaL2IngrBytesPart5minFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110833: fltTcaL2IngrBytesPart15minFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110834: fltTcaL2IngrBytesPart1hFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110835: fltTcaL2IngrBytesPart1dFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110836: fltTcaL2IngrBytesPart1wFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110837: fltTcaL2IngrBytesPart1moFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110838: fltTcaL2IngrBytesPart1qtrFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110839: fltTcaL2IngrBytesPart1yearFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110912: fltTcaL2IngrBytesAg5minFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110913: fltTcaL2IngrBytesAg15minFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110914: fltTcaL2IngrBytesAg1hFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110915: fltTcaL2IngrBytesAg1dFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110916: fltTcaL2IngrBytesAg1wFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110917: fltTcaL2IngrBytesAg1moFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110918: fltTcaL2IngrBytesAg1qtrFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110919: fltTcaL2IngrBytesAg1yearFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110920: fltTcaL2IngrBytesAg5minFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110921: fltTcaL2IngrBytesAg15minFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110922: fltTcaL2IngrBytesAg1hFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110923: fltTcaL2IngrBytesAg1dFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110924: fltTcaL2IngrBytesAg1wFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110925: fltTcaL2IngrBytesAg1moFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110926: fltTcaL2IngrBytesAg1qtrFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110927: fltTcaL2IngrBytesAg1yearFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110952: fltTcaL2IngrBytesAg5minFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110953: fltTcaL2IngrBytesAg15minFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110954: fltTcaL2IngrBytesAg1hFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110955: fltTcaL2IngrBytesAg1dFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110956: fltTcaL2IngrBytesAg1wFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110957: fltTcaL2IngrBytesAg1moFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110958: fltTcaL2IngrBytesAg1qtrFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110959: fltTcaL2IngrBytesAg1yearFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110960: fltTcaL2IngrBytesAg5minFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110961: fltTcaL2IngrBytesAg15minFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110962: fltTcaL2IngrBytesAg1hFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110963: fltTcaL2IngrBytesAg1dFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110964: fltTcaL2IngrBytesAg1wFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110965: fltTcaL2IngrBytesAg1moFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110966: fltTcaL2IngrBytesAg1qtrFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F110967: fltTcaL2IngrBytesAg1yearFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1110: fltVzRsFiltGraphAttResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F111064: fltTcaL2IngrBytes5minMulticastLast

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111065: fltTcaL2IngrBytes15minMulticastLast

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111066: fltTcaL2IngrBytes1hMulticastLast

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111067: fltTcaL2IngrBytes1dMulticastLast

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111068: fltTcaL2IngrBytes1wMulticastLast

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111069: fltTcaL2IngrBytes1moMulticastLast

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111070: fltTcaL2IngrBytes1qtrMulticastLast

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111071: fltTcaL2IngrBytes1yearMulticastLast

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111080: fltTcaL2IngrBytes5minMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111081: fltTcaL2IngrBytes15minMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111082: fltTcaL2IngrBytes1hMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111083: fltTcaL2IngrBytes1dMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111084: fltTcaL2IngrBytes1wMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111085: fltTcaL2IngrBytes1moMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111086: fltTcaL2IngrBytes1qtrMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111087: fltTcaL2IngrBytes1yearMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111088: fltTcaL2IngrBytes5minMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111089: fltTcaL2IngrBytes15minMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111090: fltTcaL2IngrBytes1hMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111091: fltTcaL2IngrBytes1dMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111092: fltTcaL2IngrBytes1wMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111093: fltTcaL2IngrBytes1moMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111094: fltTcaL2IngrBytes1qtrMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111095: fltTcaL2IngrBytes1yearMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111096: fltTcaL2IngrBytes5minMulticastMin

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111097: fltTcaL2IngrBytes15minMulticastMin

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111098: fltTcaL2IngrBytes1hMulticastMin

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111099: fltTcaL2IngrBytes1dMulticastMin

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1111: fltVzRsFiltAttResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F111100: fltTcaL2IngrBytes1wMulticastMin

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111101: fltTcaL2IngrBytes1moMulticastMin

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111102: fltTcaL2IngrBytes1qtrMulticastMin

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111103: fltTcaL2IngrBytes1yearMulticastMin

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111104: fltTcaL2IngrBytes5minMulticastMax

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111105: fltTcaL2IngrBytes15minMulticastMax

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111106: fltTcaL2IngrBytes1hMulticastMax

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111107: fltTcaL2IngrBytes1dMulticastMax

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111108: fltTcaL2IngrBytes1wMulticastMax

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111109: fltTcaL2IngrBytes1moMulticastMax

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111110: fltTcaL2IngrBytes1qtrMulticastMax

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111111: fltTcaL2IngrBytes1yearMulticastMax

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111112: fltTcaL2IngrBytes5minMulticastAvg

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111113: fltTcaL2IngrBytes15minMulticastAvg

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111114: fltTcaL2IngrBytes1hMulticastAvg

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111115: fltTcaL2IngrBytes1dMulticastAvg

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111116: fltTcaL2IngrBytes1wMulticastAvg

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111117: fltTcaL2IngrBytes1moMulticastAvg

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111118: fltTcaL2IngrBytes1qtrMulticastAvg

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111119: fltTcaL2IngrBytes1yearMulticastAvg

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111144: fltTcaL2IngrBytes5minMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111145: fltTcaL2IngrBytes15minMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111146: fltTcaL2IngrBytes1hMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111147: fltTcaL2IngrBytes1dMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111148: fltTcaL2IngrBytes1wMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111149: fltTcaL2IngrBytes1moMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111150: fltTcaL2IngrBytes1qtrMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111151: fltTcaL2IngrBytes1yearMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111152: fltTcaL2IngrBytes5minMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111153: fltTcaL2IngrBytes15minMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111154: fltTcaL2IngrBytes1hMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111155: fltTcaL2IngrBytes1dMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111156: fltTcaL2IngrBytes1wMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111157: fltTcaL2IngrBytes1moMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111158: fltTcaL2IngrBytes1qtrMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111159: fltTcaL2IngrBytes1yearMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1112: fltVzRsAnyToConsResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F111232: fltTcaL2IngrBytesPart5minMulticastLast

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111233: fltTcaL2IngrBytesPart15minMulticastLast

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111234: fltTcaL2IngrBytesPart1hMulticastLast

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111235: fltTcaL2IngrBytesPart1dMulticastLast

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111236: fltTcaL2IngrBytesPart1wMulticastLast

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111237: fltTcaL2IngrBytesPart1moMulticastLast

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111238: fltTcaL2IngrBytesPart1qtrMulticastLast

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111239: fltTcaL2IngrBytesPart1yearMulticastLast

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111248: fltTcaL2IngrBytesPart5minMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111249: fltTcaL2IngrBytesPart15minMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111250: fltTcaL2IngrBytesPart1hMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111251: fltTcaL2IngrBytesPart1dMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111252: fltTcaL2IngrBytesPart1wMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111253: fltTcaL2IngrBytesPart1moMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111254: fltTcaL2IngrBytesPart1qtrMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111255: fltTcaL2IngrBytesPart1yearMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111256: fltTcaL2IngrBytesPart5minMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111257: fltTcaL2IngrBytesPart15minMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111258: fltTcaL2IngrBytesPart1hMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111259: fltTcaL2IngrBytesPart1dMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111260: fltTcaL2IngrBytesPart1wMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111261: fltTcaL2IngrBytesPart1moMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111262: fltTcaL2IngrBytesPart1qtrMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111263: fltTcaL2IngrBytesPart1yearMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111264: fltTcaL2IngrBytesPart5minMulticastMin

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111265: fltTcaL2IngrBytesPart15minMulticastMin

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111266: fltTcaL2IngrBytesPart1hMulticastMin

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111267: fltTcaL2IngrBytesPart1dMulticastMin

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111268: fltTcaL2IngrBytesPart1wMulticastMin

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111269: fltTcaL2IngrBytesPart1moMulticastMin

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111270: fltTcaL2IngrBytesPart1qtrMulticastMin

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111271: fltTcaL2IngrBytesPart1yearMulticastMin

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111272: fltTcaL2IngrBytesPart5minMulticastMax

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111273: fltTcaL2IngrBytesPart15minMulticastMax

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111274: fltTcaL2IngrBytesPart1hMulticastMax

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111275: fltTcaL2IngrBytesPart1dMulticastMax

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111276: fltTcaL2IngrBytesPart1wMulticastMax

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111277: fltTcaL2IngrBytesPart1moMulticastMax

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111278: fltTcaL2IngrBytesPart1qtrMulticastMax

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111279: fltTcaL2IngrBytesPart1yearMulticastMax

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111280: fltTcaL2IngrBytesPart5minMulticastAvg

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111281: fltTcaL2IngrBytesPart15minMulticastAvg

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111282: fltTcaL2IngrBytesPart1hMulticastAvg

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111283: fltTcaL2IngrBytesPart1dMulticastAvg

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111284: fltTcaL2IngrBytesPart1wMulticastAvg

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111285: fltTcaL2IngrBytesPart1moMulticastAvg

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111286: fltTcaL2IngrBytesPart1qtrMulticastAvg

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111287: fltTcaL2IngrBytesPart1yearMulticastAvg

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111312: fltTcaL2IngrBytesPart5minMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111313: fltTcaL2IngrBytesPart15minMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111314: fltTcaL2IngrBytesPart1hMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111315: fltTcaL2IngrBytesPart1dMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111316: fltTcaL2IngrBytesPart1wMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111317: fltTcaL2IngrBytesPart1moMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111318: fltTcaL2IngrBytesPart1qtrMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111319: fltTcaL2IngrBytesPart1yearMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111320: fltTcaL2IngrBytesPart5minMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111321: fltTcaL2IngrBytesPart15minMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111322: fltTcaL2IngrBytesPart1hMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111323: fltTcaL2IngrBytesPart1dMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111324: fltTcaL2IngrBytesPart1wMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111325: fltTcaL2IngrBytesPart1moMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111326: fltTcaL2IngrBytesPart1qtrMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111327: fltTcaL2IngrBytesPart1yearMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111400: fltTcaL2IngrBytesAg5minMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111401: fltTcaL2IngrBytesAg15minMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111402: fltTcaL2IngrBytesAg1hMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111403: fltTcaL2IngrBytesAg1dMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111404: fltTcaL2IngrBytesAg1wMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111405: fltTcaL2IngrBytesAg1moMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111406: fltTcaL2IngrBytesAg1qtrMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111407: fltTcaL2IngrBytesAg1yearMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111408: fltTcaL2IngrBytesAg5minMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111409: fltTcaL2IngrBytesAg15minMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111410: fltTcaL2IngrBytesAg1hMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111411: fltTcaL2IngrBytesAg1dMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111412: fltTcaL2IngrBytesAg1wMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111413: fltTcaL2IngrBytesAg1moMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111414: fltTcaL2IngrBytesAg1qtrMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111415: fltTcaL2IngrBytesAg1yearMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111440: fltTcaL2IngrBytesAg5minMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111441: fltTcaL2IngrBytesAg15minMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111442: fltTcaL2IngrBytesAg1hMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111443: fltTcaL2IngrBytesAg1dMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111444: fltTcaL2IngrBytesAg1wMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111445: fltTcaL2IngrBytesAg1moMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111446: fltTcaL2IngrBytesAg1qtrMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111447: fltTcaL2IngrBytesAg1yearMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111448: fltTcaL2IngrBytesAg5minMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111449: fltTcaL2IngrBytesAg15minMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111450: fltTcaL2IngrBytesAg1hMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111451: fltTcaL2IngrBytesAg1dMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111452: fltTcaL2IngrBytesAg1wMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111453: fltTcaL2IngrBytesAg1moMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111454: fltTcaL2IngrBytesAg1qtrMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111455: fltTcaL2IngrBytesAg1yearMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1115: fltVzRsAnyToConsIfResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F111552: fltTcaL2IngrBytes5minUnicastLast

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111553: fltTcaL2IngrBytes15minUnicastLast

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111554: fltTcaL2IngrBytes1hUnicastLast

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111555: fltTcaL2IngrBytes1dUnicastLast

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111556: fltTcaL2IngrBytes1wUnicastLast

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111557: fltTcaL2IngrBytes1moUnicastLast

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111558: fltTcaL2IngrBytes1qtrUnicastLast

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111559: fltTcaL2IngrBytes1yearUnicastLast

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111568: fltTcaL2IngrBytes5minUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111569: fltTcaL2IngrBytes15minUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111570: fltTcaL2IngrBytes1hUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111571: fltTcaL2IngrBytes1dUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111572: fltTcaL2IngrBytes1wUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111573: fltTcaL2IngrBytes1moUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111574: fltTcaL2IngrBytes1qtrUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111575: fltTcaL2IngrBytes1yearUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111576: fltTcaL2IngrBytes5minUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111577: fltTcaL2IngrBytes15minUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111578: fltTcaL2IngrBytes1hUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111579: fltTcaL2IngrBytes1dUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111580: fltTcaL2IngrBytes1wUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111581: fltTcaL2IngrBytes1moUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111582: fltTcaL2IngrBytes1qtrUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111583: fltTcaL2IngrBytes1yearUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111584: fltTcaL2IngrBytes5minUnicastMin

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111585: fltTcaL2IngrBytes15minUnicastMin

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111586: fltTcaL2IngrBytes1hUnicastMin

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111587: fltTcaL2IngrBytes1dUnicastMin

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111588: fltTcaL2IngrBytes1wUnicastMin

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111589: fltTcaL2IngrBytes1moUnicastMin

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111590: fltTcaL2IngrBytes1qtrUnicastMin

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111591: fltTcaL2IngrBytes1yearUnicastMin

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111592: fltTcaL2IngrBytes5minUnicastMax

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111593: fltTcaL2IngrBytes15minUnicastMax

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111594: fltTcaL2IngrBytes1hUnicastMax

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111595: fltTcaL2IngrBytes1dUnicastMax

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111596: fltTcaL2IngrBytes1wUnicastMax

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111597: fltTcaL2IngrBytes1moUnicastMax

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111598: fltTcaL2IngrBytes1qtrUnicastMax

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111599: fltTcaL2IngrBytes1yearUnicastMax

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111600: fltTcaL2IngrBytes5minUnicastAvg

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111601: fltTcaL2IngrBytes15minUnicastAvg

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111602: fltTcaL2IngrBytes1hUnicastAvg

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111603: fltTcaL2IngrBytes1dUnicastAvg

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111604: fltTcaL2IngrBytes1wUnicastAvg

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111605: fltTcaL2IngrBytes1moUnicastAvg

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111606: fltTcaL2IngrBytes1qtrUnicastAvg

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111607: fltTcaL2IngrBytes1yearUnicastAvg

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111632: fltTcaL2IngrBytes5minUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111633: fltTcaL2IngrBytes15minUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111634: fltTcaL2IngrBytes1hUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111635: fltTcaL2IngrBytes1dUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111636: fltTcaL2IngrBytes1wUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111637: fltTcaL2IngrBytes1moUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111638: fltTcaL2IngrBytes1qtrUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111639: fltTcaL2IngrBytes1yearUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111640: fltTcaL2IngrBytes5minUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111641: fltTcaL2IngrBytes15minUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111642: fltTcaL2IngrBytes1hUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111643: fltTcaL2IngrBytes1dUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111644: fltTcaL2IngrBytes1wUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111645: fltTcaL2IngrBytes1moUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111646: fltTcaL2IngrBytes1qtrUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111647: fltTcaL2IngrBytes1yearUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1117: fltVzRsAnyToProvResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F111720: fltTcaL2IngrBytesPart5minUnicastLast

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111721: fltTcaL2IngrBytesPart15minUnicastLast

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111722: fltTcaL2IngrBytesPart1hUnicastLast

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111723: fltTcaL2IngrBytesPart1dUnicastLast

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111724: fltTcaL2IngrBytesPart1wUnicastLast

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111725: fltTcaL2IngrBytesPart1moUnicastLast

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111726: fltTcaL2IngrBytesPart1qtrUnicastLast

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111727: fltTcaL2IngrBytesPart1yearUnicastLast

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111736: fltTcaL2IngrBytesPart5minUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111737: fltTcaL2IngrBytesPart15minUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111738: fltTcaL2IngrBytesPart1hUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111739: fltTcaL2IngrBytesPart1dUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111740: fltTcaL2IngrBytesPart1wUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111741: fltTcaL2IngrBytesPart1moUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111742: fltTcaL2IngrBytesPart1qtrUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111743: fltTcaL2IngrBytesPart1yearUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111744: fltTcaL2IngrBytesPart5minUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111745: fltTcaL2IngrBytesPart15minUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111746: fltTcaL2IngrBytesPart1hUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111747: fltTcaL2IngrBytesPart1dUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111748: fltTcaL2IngrBytesPart1wUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111749: fltTcaL2IngrBytesPart1moUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111750: fltTcaL2IngrBytesPart1qtrUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111751: fltTcaL2IngrBytesPart1yearUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111752: fltTcaL2IngrBytesPart5minUnicastMin

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111753: fltTcaL2IngrBytesPart15minUnicastMin

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111754: fltTcaL2IngrBytesPart1hUnicastMin

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111755: fltTcaL2IngrBytesPart1dUnicastMin

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111756: fltTcaL2IngrBytesPart1wUnicastMin

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111757: fltTcaL2IngrBytesPart1moUnicastMin

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111758: fltTcaL2IngrBytesPart1qtrUnicastMin

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111759: fltTcaL2IngrBytesPart1yearUnicastMin

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111760: fltTcaL2IngrBytesPart5minUnicastMax

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111761: fltTcaL2IngrBytesPart15minUnicastMax

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111762: fltTcaL2IngrBytesPart1hUnicastMax

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111763: fltTcaL2IngrBytesPart1dUnicastMax

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111764: fltTcaL2IngrBytesPart1wUnicastMax

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111765: fltTcaL2IngrBytesPart1moUnicastMax

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111766: fltTcaL2IngrBytesPart1qtrUnicastMax

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111767: fltTcaL2IngrBytesPart1yearUnicastMax

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111768: fltTcaL2IngrBytesPart5minUnicastAvg

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111769: fltTcaL2IngrBytesPart15minUnicastAvg

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111770: fltTcaL2IngrBytesPart1hUnicastAvg

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111771: fltTcaL2IngrBytesPart1dUnicastAvg

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111772: fltTcaL2IngrBytesPart1wUnicastAvg

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111773: fltTcaL2IngrBytesPart1moUnicastAvg

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111774: fltTcaL2IngrBytesPart1qtrUnicastAvg

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111775: fltTcaL2IngrBytesPart1yearUnicastAvg

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111800: fltTcaL2IngrBytesPart5minUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111801: fltTcaL2IngrBytesPart15minUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111802: fltTcaL2IngrBytesPart1hUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111803: fltTcaL2IngrBytesPart1dUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111804: fltTcaL2IngrBytesPart1wUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111805: fltTcaL2IngrBytesPart1moUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111806: fltTcaL2IngrBytesPart1qtrUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111807: fltTcaL2IngrBytesPart1yearUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111808: fltTcaL2IngrBytesPart5minUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111809: fltTcaL2IngrBytesPart15minUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111810: fltTcaL2IngrBytesPart1hUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111811: fltTcaL2IngrBytesPart1dUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111812: fltTcaL2IngrBytesPart1wUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111813: fltTcaL2IngrBytesPart1moUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111814: fltTcaL2IngrBytesPart1qtrUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111815: fltTcaL2IngrBytesPart1yearUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111888: fltTcaL2IngrBytesAg5minUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111889: fltTcaL2IngrBytesAg15minUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111890: fltTcaL2IngrBytesAg1hUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111891: fltTcaL2IngrBytesAg1dUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111892: fltTcaL2IngrBytesAg1wUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111893: fltTcaL2IngrBytesAg1moUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111894: fltTcaL2IngrBytesAg1qtrUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111895: fltTcaL2IngrBytesAg1yearUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111896: fltTcaL2IngrBytesAg5minUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111897: fltTcaL2IngrBytesAg15minUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111898: fltTcaL2IngrBytesAg1hUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111899: fltTcaL2IngrBytesAg1dUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111900: fltTcaL2IngrBytesAg1wUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111901: fltTcaL2IngrBytesAg1moUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111902: fltTcaL2IngrBytesAg1qtrUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111903: fltTcaL2IngrBytesAg1yearUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111928: fltTcaL2IngrBytesAg5minUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111929: fltTcaL2IngrBytesAg15minUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111930: fltTcaL2IngrBytesAg1hUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111931: fltTcaL2IngrBytesAg1dUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111932: fltTcaL2IngrBytesAg1wUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111933: fltTcaL2IngrBytesAg1moUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111934: fltTcaL2IngrBytesAg1qtrUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111935: fltTcaL2IngrBytesAg1yearUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111936: fltTcaL2IngrBytesAg5minUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111937: fltTcaL2IngrBytesAg15minUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111938: fltTcaL2IngrBytesAg1hUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111939: fltTcaL2IngrBytesAg1dUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111940: fltTcaL2IngrBytesAg1wUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111941: fltTcaL2IngrBytesAg1moUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111942: fltTcaL2IngrBytesAg1qtrUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F111943: fltTcaL2IngrBytesAg1yearUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112040: fltTcaL2IngrPkts5minDropLast

Severity: variable

Explanation: This fault is caused by "ingress drop packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112041: fltTcaL2IngrPkts15minDropLast

Severity: variable

Explanation: This fault is caused by "ingress drop packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112042: fltTcaL2IngrPkts1hDropLast

Severity: variable

Explanation: This fault is caused by "ingress drop packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112043: fltTcaL2IngrPkts1dDropLast

Severity: variable

Explanation: This fault is caused by "ingress drop packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112044: fltTcaL2IngrPkts1wDropLast

Severity: variable

Explanation: This fault is caused by "ingress drop packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112045: fltTcaL2IngrPkts1moDropLast

Severity: variable

Explanation: This fault is caused by "ingress drop packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112046: fltTcaL2IngrPkts1qtrDropLast

Severity: variable

Explanation: This fault is caused by "ingress drop packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112047: fltTcaL2IngrPkts1yearDropLast

Severity: variable

Explanation: This fault is caused by "ingress drop packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112056: fltTcaL2IngrPkts5minDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112057: fltTcaL2IngrPkts15minDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112058: fltTcaL2IngrPkts1hDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112059: fltTcaL2IngrPkts1dDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112060: fltTcaL2IngrPkts1wDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112061: fltTcaL2IngrPkts1moDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112062: fltTcaL2IngrPkts1qtrDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112063: fltTcaL2IngrPkts1yearDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112064: fltTcaL2IngrPkts5minDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112065: fltTcaL2IngrPkts15minDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112066: fltTcaL2IngrPkts1hDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112067: fltTcaL2IngrPkts1dDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112068: fltTcaL2IngrPkts1wDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112069: fltTcaL2IngrPkts1moDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112070: fltTcaL2IngrPkts1qtrDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112071: fltTcaL2IngrPkts1yearDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112072: fltTcaL2IngrPkts5minDropMin

Severity: variable

Explanation: This fault is caused by "ingress drop packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112073: fltTcaL2IngrPkts15minDropMin

Severity: variable

Explanation: This fault is caused by "ingress drop packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112074: fltTcaL2IngrPkts1hDropMin

Severity: variable

Explanation: This fault is caused by "ingress drop packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112075: fltTcaL2IngrPkts1dDropMin

Severity: variable

Explanation: This fault is caused by "ingress drop packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112076: fltTcaL2IngrPkts1wDropMin

Severity: variable

Explanation: This fault is caused by "ingress drop packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112077: fltTcaL2IngrPkts1moDropMin

Severity: variable

Explanation: This fault is caused by "ingress drop packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112078: fltTcaL2IngrPkts1qtrDropMin

Severity: variable

Explanation: This fault is caused by "ingress drop packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112079: fltTcaL2IngrPkts1yearDropMin

Severity: variable

Explanation: This fault is caused by "ingress drop packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112080: fltTcaL2IngrPkts5minDropMax

Severity: variable

Explanation: This fault is caused by "ingress drop packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112081: fltTcaL2IngrPkts15minDropMax

Severity: variable

Explanation: This fault is caused by "ingress drop packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112082: fltTcaL2IngrPkts1hDropMax

Severity: variable

Explanation: This fault is caused by "ingress drop packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112083: fltTcaL2IngrPkts1dDropMax

Severity: variable

Explanation: This fault is caused by "ingress drop packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112084: fltTcaL2IngrPkts1wDropMax

Severity: variable

Explanation: This fault is caused by "ingress drop packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112085: fltTcaL2IngrPkts1moDropMax

Severity: variable

Explanation: This fault is caused by "ingress drop packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112086: fltTcaL2IngrPkts1qtrDropMax

Severity: variable

Explanation: This fault is caused by "ingress drop packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112087: fltTcaL2IngrPkts1yearDropMax

Severity: variable

Explanation: This fault is caused by "ingress drop packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112088: fltTcaL2IngrPkts5minDropAvg

Severity: variable

Explanation: This fault is caused by "ingress drop packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112089: fltTcaL2IngrPkts15minDropAvg

Severity: variable

Explanation: This fault is caused by "ingress drop packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112090: fltTcaL2IngrPkts1hDropAvg

Severity: variable

Explanation: This fault is caused by "ingress drop packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112091: fltTcaL2IngrPkts1dDropAvg

Severity: variable

Explanation: This fault is caused by "ingress drop packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112092: fltTcaL2IngrPkts1wDropAvg

Severity: variable

Explanation: This fault is caused by "ingress drop packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112093: fltTcaL2IngrPkts1moDropAvg

Severity: variable

Explanation: This fault is caused by "ingress drop packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112094: fltTcaL2IngrPkts1qtrDropAvg

Severity: variable

Explanation: This fault is caused by "ingress drop packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112095: fltTcaL2IngrPkts1yearDropAvg

Severity: variable

Explanation: This fault is caused by "ingress drop packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1121: fltVzRsGraphAttResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F112120: fltTcaL2IngrPkts5minDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112121: fltTcaL2IngrPkts15minDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112122: fltTcaL2IngrPkts1hDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112123: fltTcaL2IngrPkts1dDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112124: fltTcaL2IngrPkts1wDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112125: fltTcaL2IngrPkts1moDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112126: fltTcaL2IngrPkts1qtrDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112127: fltTcaL2IngrPkts1yearDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112128: fltTcaL2IngrPkts5minDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112129: fltTcaL2IngrPkts15minDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112130: fltTcaL2IngrPkts1hDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112131: fltTcaL2IngrPkts1dDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112132: fltTcaL2IngrPkts1wDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112133: fltTcaL2IngrPkts1moDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112134: fltTcaL2IngrPkts1qtrDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112135: fltTcaL2IngrPkts1yearDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112208: fltTcaL2IngrPktsPart5minDropLast

Severity: variable

Explanation: This fault is caused by "ingress drop packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112209: fltTcaL2IngrPktsPart15minDropLast

Severity: variable

Explanation: This fault is caused by "ingress drop packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112210: fltTcaL2IngrPktsPart1hDropLast

Severity: variable

Explanation: This fault is caused by "ingress drop packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112211: fltTcaL2IngrPktsPart1dDropLast

Severity: variable

Explanation: This fault is caused by "ingress drop packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112212: fltTcaL2IngrPktsPart1wDropLast

Severity: variable

Explanation: This fault is caused by "ingress drop packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112213: fltTcaL2IngrPktsPart1moDropLast

Severity: variable

Explanation: This fault is caused by "ingress drop packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112214: fltTcaL2IngrPktsPart1qtrDropLast

Severity: variable

Explanation: This fault is caused by "ingress drop packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112215: fltTcaL2IngrPktsPart1yearDropLast

Severity: variable

Explanation: This fault is caused by "ingress drop packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112224: fltTcaL2IngrPktsPart5minDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112225: fltTcaL2IngrPktsPart15minDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112226: fltTcaL2IngrPktsPart1hDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112227: fltTcaL2IngrPktsPart1dDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112228: fltTcaL2IngrPktsPart1wDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112229: fltTcaL2IngrPktsPart1moDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112230: fltTcaL2IngrPktsPart1qtrDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112231: fltTcaL2IngrPktsPart1yearDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112232: fltTcaL2IngrPktsPart5minDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112233: fltTcaL2IngrPktsPart15minDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112234: fltTcaL2IngrPktsPart1hDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112235: fltTcaL2IngrPktsPart1dDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112236: fltTcaL2IngrPktsPart1wDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112237: fltTcaL2IngrPktsPart1moDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112238: fltTcaL2IngrPktsPart1qtrDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112239: fltTcaL2IngrPktsPart1yearDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112240: fltTcaL2IngrPktsPart5minDropMin

Severity: variable

Explanation: This fault is caused by "ingress drop packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112241: fltTcaL2IngrPktsPart15minDropMin

Severity: variable

Explanation: This fault is caused by "ingress drop packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112242: fltTcaL2IngrPktsPart1hDropMin

Severity: variable

Explanation: This fault is caused by "ingress drop packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112243: fltTcaL2IngrPktsPart1dDropMin

Severity: variable

Explanation: This fault is caused by "ingress drop packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112244: fltTcaL2IngrPktsPart1wDropMin

Severity: variable

Explanation: This fault is caused by "ingress drop packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112245: fltTcaL2IngrPktsPart1moDropMin

Severity: variable

Explanation: This fault is caused by "ingress drop packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112246: fltTcaL2IngrPktsPart1qtrDropMin

Severity: variable

Explanation: This fault is caused by "ingress drop packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112247: fltTcaL2IngrPktsPart1yearDropMin

Severity: variable

Explanation: This fault is caused by "ingress drop packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112248: fltTcaL2IngrPktsPart5minDropMax

Severity: variable

Explanation: This fault is caused by "ingress drop packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112249: fltTcaL2IngrPktsPart15minDropMax

Severity: variable

Explanation: This fault is caused by "ingress drop packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112250: fltTcaL2IngrPktsPart1hDropMax

Severity: variable

Explanation: This fault is caused by "ingress drop packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112251: fltTcaL2IngrPktsPart1dDropMax

Severity: variable

Explanation: This fault is caused by "ingress drop packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112252: fltTcaL2IngrPktsPart1wDropMax

Severity: variable

Explanation: This fault is caused by "ingress drop packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112253: fltTcaL2IngrPktsPart1moDropMax

Severity: variable

Explanation: This fault is caused by "ingress drop packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112254: fltTcaL2IngrPktsPart1qtrDropMax

Severity: variable

Explanation: This fault is caused by "ingress drop packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112255: fltTcaL2IngrPktsPart1yearDropMax

Severity: variable

Explanation: This fault is caused by "ingress drop packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112256: fltTcaL2IngrPktsPart5minDropAvg

Severity: variable

Explanation: This fault is caused by "ingress drop packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112257: fltTcaL2IngrPktsPart15minDropAvg

Severity: variable

Explanation: This fault is caused by "ingress drop packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112258: fltTcaL2IngrPktsPart1hDropAvg

Severity: variable

Explanation: This fault is caused by "ingress drop packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112259: fltTcaL2IngrPktsPart1dDropAvg

Severity: variable

Explanation: This fault is caused by "ingress drop packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112260: fltTcaL2IngrPktsPart1wDropAvg

Severity: variable

Explanation: This fault is caused by "ingress drop packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112261: fltTcaL2IngrPktsPart1moDropAvg

Severity: variable

Explanation: This fault is caused by "ingress drop packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112262: fltTcaL2IngrPktsPart1qtrDropAvg

Severity: variable

Explanation: This fault is caused by "ingress drop packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112263: fltTcaL2IngrPktsPart1yearDropAvg

Severity: variable

Explanation: This fault is caused by "ingress drop packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112288: fltTcaL2IngrPktsPart5minDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112289: fltTcaL2IngrPktsPart15minDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112290: fltTcaL2IngrPktsPart1hDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112291: fltTcaL2IngrPktsPart1dDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112292: fltTcaL2IngrPktsPart1wDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112293: fltTcaL2IngrPktsPart1moDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112294: fltTcaL2IngrPktsPart1qtrDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112295: fltTcaL2IngrPktsPart1yearDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112296: fltTcaL2IngrPktsPart5minDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112297: fltTcaL2IngrPktsPart15minDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112298: fltTcaL2IngrPktsPart1hDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112299: fltTcaL2IngrPktsPart1dDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1123: fltVzRsIfResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F112300: fltTcaL2IngrPktsPart1wDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112301: fltTcaL2IngrPktsPart1moDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112302: fltTcaL2IngrPktsPart1qtrDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112303: fltTcaL2IngrPktsPart1yearDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112376: fltTcaL2IngrPktsAg5minDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112377: fltTcaL2IngrPktsAg15minDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112378: fltTcaL2IngrPktsAg1hDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112379: fltTcaL2IngrPktsAg1dDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112380: fltTcaL2IngrPktsAg1wDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112381: fltTcaL2IngrPktsAg1moDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112382: fltTcaL2IngrPktsAg1qtrDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112383: fltTcaL2IngrPktsAg1yearDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112384: fltTcaL2IngrPktsAg5minDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112385: fltTcaL2IngrPktsAg15minDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112386: fltTcaL2IngrPktsAg1hDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112387: fltTcaL2IngrPktsAg1dDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112388: fltTcaL2IngrPktsAg1wDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112389: fltTcaL2IngrPktsAg1moDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112390: fltTcaL2IngrPktsAg1qtrDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112391: fltTcaL2IngrPktsAg1yearDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112416: fltTcaL2IngrPktsAg5minDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112417: fltTcaL2IngrPktsAg15minDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112418: fltTcaL2IngrPktsAg1hDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112419: fltTcaL2IngrPktsAg1dDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112420: fltTcaL2IngrPktsAg1wDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112421: fltTcaL2IngrPktsAg1moDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112422: fltTcaL2IngrPktsAg1qtrDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112423: fltTcaL2IngrPktsAg1yearDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112424: fltTcaL2IngrPktsAg5minDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112425: fltTcaL2IngrPktsAg15minDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112426: fltTcaL2IngrPktsAg1hDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112427: fltTcaL2IngrPktsAg1dDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112428: fltTcaL2IngrPktsAg1wDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112429: fltTcaL2IngrPktsAg1moDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112430: fltTcaL2IngrPktsAg1qtrDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112431: fltTcaL2IngrPktsAg1yearDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1125: fltVzRsInTermGraphAttResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F112528: fltTcaL2IngrPkts5minFloodLast

Severity: variable

Explanation: This fault is caused by "ingress flood packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112529: fltTcaL2IngrPkts15minFloodLast

Severity: variable

Explanation: This fault is caused by "ingress flood packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112530: fltTcaL2IngrPkts1hFloodLast

Severity: variable

Explanation: This fault is caused by "ingress flood packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112531: fltTcaL2IngrPkts1dFloodLast

Severity: variable

Explanation: This fault is caused by "ingress flood packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112532: fltTcaL2IngrPkts1wFloodLast

Severity: variable

Explanation: This fault is caused by "ingress flood packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112533: fltTcaL2IngrPkts1moFloodLast

Severity: variable

Explanation: This fault is caused by "ingress flood packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112534: fltTcaL2IngrPkts1qtrFloodLast

Severity: variable

Explanation: This fault is caused by "ingress flood packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112535: fltTcaL2IngrPkts1yearFloodLast

Severity: variable

Explanation: This fault is caused by "ingress flood packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112544: fltTcaL2IngrPkts5minFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112545: fltTcaL2IngrPkts15minFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112546: fltTcaL2IngrPkts1hFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112547: fltTcaL2IngrPkts1dFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112548: fltTcaL2IngrPkts1wFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112549: fltTcaL2IngrPkts1moFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112550: fltTcaL2IngrPkts1qtrFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112551: fltTcaL2IngrPkts1yearFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112552: fltTcaL2IngrPkts5minFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112553: fltTcaL2IngrPkts15minFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112554: fltTcaL2IngrPkts1hFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112555: fltTcaL2IngrPkts1dFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112556: fltTcaL2IngrPkts1wFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112557: fltTcaL2IngrPkts1moFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112558: fltTcaL2IngrPkts1qtrFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112559: fltTcaL2IngrPkts1yearFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112560: fltTcaL2IngrPkts5minFloodMin

Severity: variable

Explanation: This fault is caused by "ingress flood packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112561: fltTcaL2IngrPkts15minFloodMin

Severity: variable

Explanation: This fault is caused by "ingress flood packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112562: fltTcaL2IngrPkts1hFloodMin

Severity: variable

Explanation: This fault is caused by "ingress flood packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112563: fltTcaL2IngrPkts1dFloodMin

Severity: variable

Explanation: This fault is caused by "ingress flood packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112564: fltTcaL2IngrPkts1wFloodMin

Severity: variable

Explanation: This fault is caused by "ingress flood packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112565: fltTcaL2IngrPkts1moFloodMin

Severity: variable

Explanation: This fault is caused by "ingress flood packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112566: fltTcaL2IngrPkts1qtrFloodMin

Severity: variable

Explanation: This fault is caused by "ingress flood packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112567: fltTcaL2IngrPkts1yearFloodMin

Severity: variable

Explanation: This fault is caused by "ingress flood packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112568: fltTcaL2IngrPkts5minFloodMax

Severity: variable

Explanation: This fault is caused by "ingress flood packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112569: fltTcaL2IngrPkts15minFloodMax

Severity: variable

Explanation: This fault is caused by "ingress flood packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112570: fltTcaL2IngrPkts1hFloodMax

Severity: variable

Explanation: This fault is caused by "ingress flood packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112571: fltTcaL2IngrPkts1dFloodMax

Severity: variable

Explanation: This fault is caused by "ingress flood packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112572: fltTcaL2IngrPkts1wFloodMax

Severity: variable

Explanation: This fault is caused by "ingress flood packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112573: fltTcaL2IngrPkts1moFloodMax

Severity: variable

Explanation: This fault is caused by "ingress flood packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112574: fltTcaL2IngrPkts1qtrFloodMax

Severity: variable

Explanation: This fault is caused by "ingress flood packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112575: fltTcaL2IngrPkts1yearFloodMax

Severity: variable

Explanation: This fault is caused by "ingress flood packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112576: fltTcaL2IngrPkts5minFloodAvg

Severity: variable

Explanation: This fault is caused by "ingress flood packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112577: fltTcaL2IngrPkts15minFloodAvg

Severity: variable

Explanation: This fault is caused by "ingress flood packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112578: fltTcaL2IngrPkts1hFloodAvg

Severity: variable

Explanation: This fault is caused by "ingress flood packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112579: fltTcaL2IngrPkts1dFloodAvg

Severity: variable

Explanation: This fault is caused by "ingress flood packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112580: fltTcaL2IngrPkts1wFloodAvg

Severity: variable

Explanation: This fault is caused by "ingress flood packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112581: fltTcaL2IngrPkts1moFloodAvg

Severity: variable

Explanation: This fault is caused by "ingress flood packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112582: fltTcaL2IngrPkts1qtrFloodAvg

Severity: variable

Explanation: This fault is caused by "ingress flood packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112583: fltTcaL2IngrPkts1yearFloodAvg

Severity: variable

Explanation: This fault is caused by "ingress flood packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1126: fltVzRsOutTermGraphAttResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F112608: fltTcaL2IngrPkts5minFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112609: fltTcaL2IngrPkts15minFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112610: fltTcaL2IngrPkts1hFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112611: fltTcaL2IngrPkts1dFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112612: fltTcaL2IngrPkts1wFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112613: fltTcaL2IngrPkts1moFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112614: fltTcaL2IngrPkts1qtrFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112615: fltTcaL2IngrPkts1yearFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112616: fltTcaL2IngrPkts5minFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112617: fltTcaL2IngrPkts15minFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112618: fltTcaL2IngrPkts1hFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112619: fltTcaL2IngrPkts1dFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112620: fltTcaL2IngrPkts1wFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112621: fltTcaL2IngrPkts1moFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112622: fltTcaL2IngrPkts1qtrFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112623: fltTcaL2IngrPkts1yearFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112696: fltTcaL2IngrPktsPart5minFloodLast

Severity: variable

Explanation: This fault is caused by "ingress flood packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112697: fltTcaL2IngrPktsPart15minFloodLast

Severity: variable

Explanation: This fault is caused by "ingress flood packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112698: fltTcaL2IngrPktsPart1hFloodLast

Severity: variable

Explanation: This fault is caused by "ingress flood packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112699: fltTcaL2IngrPktsPart1dFloodLast

Severity: variable

Explanation: This fault is caused by "ingress flood packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1127: fltVzRsSubjFiltAttResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F112700: fltTcaL2IngrPktsPart1wFloodLast

Severity: variable

Explanation: This fault is caused by "ingress flood packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112701: fltTcaL2IngrPktsPart1moFloodLast

Severity: variable

Explanation: This fault is caused by "ingress flood packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112702: fltTcaL2IngrPktsPart1qtrFloodLast

Severity: variable

Explanation: This fault is caused by "ingress flood packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112703: fltTcaL2IngrPktsPart1yearFloodLast

Severity: variable

Explanation: This fault is caused by "ingress flood packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112712: fltTcaL2IngrPktsPart5minFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112713: fltTcaL2IngrPktsPart15minFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112714: fltTcaL2IngrPktsPart1hFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112715: fltTcaL2IngrPktsPart1dFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112716: fltTcaL2IngrPktsPart1wFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112717: fltTcaL2IngrPktsPart1moFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112718: fltTcaL2IngrPktsPart1qtrFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112719: fltTcaL2IngrPktsPart1yearFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112720: fltTcaL2IngrPktsPart5minFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112721: fltTcaL2IngrPktsPart15minFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112722: fltTcaL2IngrPktsPart1hFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112723: fltTcaL2IngrPktsPart1dFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112724: fltTcaL2IngrPktsPart1wFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112725: fltTcaL2IngrPktsPart1moFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112726: fltTcaL2IngrPktsPart1qtrFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112727: fltTcaL2IngrPktsPart1yearFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112728: fltTcaL2IngrPktsPart5minFloodMin

Severity: variable

Explanation: This fault is caused by "ingress flood packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112729: fltTcaL2IngrPktsPart15minFloodMin

Severity: variable

Explanation: This fault is caused by "ingress flood packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112730: fltTcaL2IngrPktsPart1hFloodMin

Severity: variable

Explanation: This fault is caused by "ingress flood packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112731: fltTcaL2IngrPktsPart1dFloodMin

Severity: variable

Explanation: This fault is caused by "ingress flood packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112732: fltTcaL2IngrPktsPart1wFloodMin

Severity: variable

Explanation: This fault is caused by "ingress flood packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112733: fltTcaL2IngrPktsPart1moFloodMin

Severity: variable

Explanation: This fault is caused by "ingress flood packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112734: fltTcaL2IngrPktsPart1qtrFloodMin

Severity: variable

Explanation: This fault is caused by "ingress flood packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112735: fltTcaL2IngrPktsPart1yearFloodMin

Severity: variable

Explanation: This fault is caused by "ingress flood packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112736: fltTcaL2IngrPktsPart5minFloodMax

Severity: variable

Explanation: This fault is caused by "ingress flood packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112737: fltTcaL2IngrPktsPart15minFloodMax

Severity: variable

Explanation: This fault is caused by "ingress flood packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112738: fltTcaL2IngrPktsPart1hFloodMax

Severity: variable

Explanation: This fault is caused by "ingress flood packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112739: fltTcaL2IngrPktsPart1dFloodMax

Severity: variable

Explanation: This fault is caused by "ingress flood packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112740: fltTcaL2IngrPktsPart1wFloodMax

Severity: variable

Explanation: This fault is caused by "ingress flood packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112741: fltTcaL2IngrPktsPart1moFloodMax

Severity: variable

Explanation: This fault is caused by "ingress flood packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112742: fltTcaL2IngrPktsPart1qtrFloodMax

Severity: variable

Explanation: This fault is caused by "ingress flood packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112743: fltTcaL2IngrPktsPart1yearFloodMax

Severity: variable

Explanation: This fault is caused by "ingress flood packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112744: fltTcaL2IngrPktsPart5minFloodAvg

Severity: variable

Explanation: This fault is caused by "ingress flood packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112745: fltTcaL2IngrPktsPart15minFloodAvg

Severity: variable

Explanation: This fault is caused by "ingress flood packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112746: fltTcaL2IngrPktsPart1hFloodAvg

Severity: variable

Explanation: This fault is caused by "ingress flood packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112747: fltTcaL2IngrPktsPart1dFloodAvg

Severity: variable

Explanation: This fault is caused by "ingress flood packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112748: fltTcaL2IngrPktsPart1wFloodAvg

Severity: variable

Explanation: This fault is caused by "ingress flood packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112749: fltTcaL2IngrPktsPart1moFloodAvg

Severity: variable

Explanation: This fault is caused by "ingress flood packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112750: fltTcaL2IngrPktsPart1qtrFloodAvg

Severity: variable

Explanation: This fault is caused by "ingress flood packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112751: fltTcaL2IngrPktsPart1yearFloodAvg

Severity: variable

Explanation: This fault is caused by "ingress flood packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112776: fltTcaL2IngrPktsPart5minFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112777: fltTcaL2IngrPktsPart15minFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112778: fltTcaL2IngrPktsPart1hFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112779: fltTcaL2IngrPktsPart1dFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112780: fltTcaL2IngrPktsPart1wFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112781: fltTcaL2IngrPktsPart1moFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112782: fltTcaL2IngrPktsPart1qtrFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112783: fltTcaL2IngrPktsPart1yearFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112784: fltTcaL2IngrPktsPart5minFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112785: fltTcaL2IngrPktsPart15minFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112786: fltTcaL2IngrPktsPart1hFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112787: fltTcaL2IngrPktsPart1dFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112788: fltTcaL2IngrPktsPart1wFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112789: fltTcaL2IngrPktsPart1moFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112790: fltTcaL2IngrPktsPart1qtrFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112791: fltTcaL2IngrPktsPart1yearFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1128: fltVzRsSubjGraphAttResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F112864: fltTcaL2IngrPktsAg5minFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112865: fltTcaL2IngrPktsAg15minFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112866: fltTcaL2IngrPktsAg1hFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112867: fltTcaL2IngrPktsAg1dFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112868: fltTcaL2IngrPktsAg1wFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112869: fltTcaL2IngrPktsAg1moFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112870: fltTcaL2IngrPktsAg1qtrFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112871: fltTcaL2IngrPktsAg1yearFloodCum

Severity: variable

Explanation: This fault is caused by "ingress flood packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112872: fltTcaL2IngrPktsAg5minFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112873: fltTcaL2IngrPktsAg15minFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112874: fltTcaL2IngrPktsAg1hFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112875: fltTcaL2IngrPktsAg1dFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112876: fltTcaL2IngrPktsAg1wFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112877: fltTcaL2IngrPktsAg1moFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112878: fltTcaL2IngrPktsAg1qtrFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112879: fltTcaL2IngrPktsAg1yearFloodPer

Severity: variable

Explanation: This fault is caused by "ingress flood packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1129: fltVzRsDenyRuleResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F112904: fltTcaL2IngrPktsAg5minFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112905: fltTcaL2IngrPktsAg15minFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112906: fltTcaL2IngrPktsAg1hFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112907: fltTcaL2IngrPktsAg1dFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112908: fltTcaL2IngrPktsAg1wFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112909: fltTcaL2IngrPktsAg1moFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112910: fltTcaL2IngrPktsAg1qtrFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112911: fltTcaL2IngrPktsAg1yearFloodTr

Severity: variable

Explanation: This fault is caused by "ingress flood packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112912: fltTcaL2IngrPktsAg5minFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112913: fltTcaL2IngrPktsAg15minFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112914: fltTcaL2IngrPktsAg1hFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112915: fltTcaL2IngrPktsAg1dFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112916: fltTcaL2IngrPktsAg1wFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112917: fltTcaL2IngrPktsAg1moFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112918: fltTcaL2IngrPktsAg1qtrFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F112919: fltTcaL2IngrPktsAg1yearFloodRate

Severity: variable

Explanation: This fault is caused by "ingress flood packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress flood packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113016: fltTcaL2IngrPkts5minMulticastLast

Severity: variable

Explanation: This fault is caused by "ingress multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113017: fltTcaL2IngrPkts15minMulticastLast

Severity: variable

Explanation: This fault is caused by "ingress multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113018: fltTcaL2IngrPkts1hMulticastLast

Severity: variable

Explanation: This fault is caused by "ingress multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113019: fltTcaL2IngrPkts1dMulticastLast

Severity: variable

Explanation: This fault is caused by "ingress multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113020: fltTcaL2IngrPkts1wMulticastLast

Severity: variable

Explanation: This fault is caused by "ingress multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113021: fltTcaL2IngrPkts1moMulticastLast

Severity: variable

Explanation: This fault is caused by "ingress multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113022: fltTcaL2IngrPkts1qtrMulticastLast

Severity: variable

Explanation: This fault is caused by "ingress multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113023: fltTcaL2IngrPkts1yearMulticastLast

Severity: variable

Explanation: This fault is caused by "ingress multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113032: fltTcaL2IngrPkts5minMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113033: fltTcaL2IngrPkts15minMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113034: fltTcaL2IngrPkts1hMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113035: fltTcaL2IngrPkts1dMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113036: fltTcaL2IngrPkts1wMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113037: fltTcaL2IngrPkts1moMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113038: fltTcaL2IngrPkts1qtrMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113039: fltTcaL2IngrPkts1yearMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113040: fltTcaL2IngrPkts5minMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113041: fltTcaL2IngrPkts15minMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113042: fltTcaL2IngrPkts1hMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113043: fltTcaL2IngrPkts1dMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113044: fltTcaL2IngrPkts1wMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113045: fltTcaL2IngrPkts1moMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113046: fltTcaL2IngrPkts1qtrMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113047: fltTcaL2IngrPkts1yearMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113048: fltTcaL2IngrPkts5minMulticastMin

Severity: variable

Explanation: This fault is caused by "ingress multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113049: fltTcaL2IngrPkts15minMulticastMin

Severity: variable

Explanation: This fault is caused by "ingress multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113050: fltTcaL2IngrPkts1hMulticastMin

Severity: variable

Explanation: This fault is caused by "ingress multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113051: fltTcaL2IngrPkts1dMulticastMin

Severity: variable

Explanation: This fault is caused by "ingress multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113052: fltTcaL2IngrPkts1wMulticastMin

Severity: variable

Explanation: This fault is caused by "ingress multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113053: fltTcaL2IngrPkts1moMulticastMin

Severity: variable

Explanation: This fault is caused by "ingress multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113054: fltTcaL2IngrPkts1qtrMulticastMin

Severity: variable

Explanation: This fault is caused by "ingress multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113055: fltTcaL2IngrPkts1yearMulticastMin

Severity: variable

Explanation: This fault is caused by "ingress multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113056: fltTcaL2IngrPkts5minMulticastMax

Severity: variable

Explanation: This fault is caused by "ingress multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113057: fltTcaL2IngrPkts15minMulticastMax

Severity: variable

Explanation: This fault is caused by "ingress multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113058: fltTcaL2IngrPkts1hMulticastMax

Severity: variable

Explanation: This fault is caused by "ingress multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113059: fltTcaL2IngrPkts1dMulticastMax

Severity: variable

Explanation: This fault is caused by "ingress multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113060: fltTcaL2IngrPkts1wMulticastMax

Severity: variable

Explanation: This fault is caused by "ingress multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113061: fltTcaL2IngrPkts1moMulticastMax

Severity: variable

Explanation: This fault is caused by "ingress multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113062: fltTcaL2IngrPkts1qtrMulticastMax

Severity: variable

Explanation: This fault is caused by "ingress multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113063: fltTcaL2IngrPkts1yearMulticastMax

Severity: variable

Explanation: This fault is caused by "ingress multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113064: fltTcaL2IngrPkts5minMulticastAvg

Severity: variable

Explanation: This fault is caused by "ingress multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113065: fltTcaL2IngrPkts15minMulticastAvg

Severity: variable

Explanation: This fault is caused by "ingress multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113066: fltTcaL2IngrPkts1hMulticastAvg

Severity: variable

Explanation: This fault is caused by "ingress multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113067: fltTcaL2IngrPkts1dMulticastAvg

Severity: variable

Explanation: This fault is caused by "ingress multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113068: fltTcaL2IngrPkts1wMulticastAvg

Severity: variable

Explanation: This fault is caused by "ingress multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113069: fltTcaL2IngrPkts1moMulticastAvg

Severity: variable

Explanation: This fault is caused by "ingress multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113070: fltTcaL2IngrPkts1qtrMulticastAvg

Severity: variable

Explanation: This fault is caused by "ingress multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113071: fltTcaL2IngrPkts1yearMulticastAvg

Severity: variable

Explanation: This fault is caused by "ingress multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113096: fltTcaL2IngrPkts5minMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113097: fltTcaL2IngrPkts15minMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113098: fltTcaL2IngrPkts1hMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113099: fltTcaL2IngrPkts1dMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113100: fltTcaL2IngrPkts1wMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113101: fltTcaL2IngrPkts1moMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113102: fltTcaL2IngrPkts1qtrMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113103: fltTcaL2IngrPkts1yearMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113104: fltTcaL2IngrPkts5minMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113105: fltTcaL2IngrPkts15minMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113106: fltTcaL2IngrPkts1hMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113107: fltTcaL2IngrPkts1dMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113108: fltTcaL2IngrPkts1wMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113109: fltTcaL2IngrPkts1moMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113110: fltTcaL2IngrPkts1qtrMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113111: fltTcaL2IngrPkts1yearMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113184: fltTcaL2IngrPktsPart5minMulticastLast

Severity: variable

Explanation: This fault is caused by "ingress multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113185: fltTcaL2IngrPktsPart15minMulticastLast

Severity: variable

Explanation: This fault is caused by "ingress multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113186: fltTcaL2IngrPktsPart1hMulticastLast

Severity: variable

Explanation: This fault is caused by "ingress multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113187: fltTcaL2IngrPktsPart1dMulticastLast

Severity: variable

Explanation: This fault is caused by "ingress multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113188: fltTcaL2IngrPktsPart1wMulticastLast

Severity: variable

Explanation: This fault is caused by "ingress multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113189: fltTcaL2IngrPktsPart1moMulticastLast

Severity: variable

Explanation: This fault is caused by "ingress multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113190: fltTcaL2IngrPktsPart1qtrMulticastLast

Severity: variable

Explanation: This fault is caused by "ingress multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113191: fltTcaL2IngrPktsPart1yearMulticastLast

Severity: variable

Explanation: This fault is caused by "ingress multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113200: fltTcaL2IngrPktsPart5minMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113201: fltTcaL2IngrPktsPart15minMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113202: fltTcaL2IngrPktsPart1hMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113203: fltTcaL2IngrPktsPart1dMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113204: fltTcaL2IngrPktsPart1wMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113205: fltTcaL2IngrPktsPart1moMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113206: fltTcaL2IngrPktsPart1qtrMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113207: fltTcaL2IngrPktsPart1yearMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113208: fltTcaL2IngrPktsPart5minMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113209: fltTcaL2IngrPktsPart15minMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113210: fltTcaL2IngrPktsPart1hMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113211: fltTcaL2IngrPktsPart1dMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113212: fltTcaL2IngrPktsPart1wMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113213: fltTcaL2IngrPktsPart1moMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113214: fltTcaL2IngrPktsPart1qtrMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113215: fltTcaL2IngrPktsPart1yearMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113216: fltTcaL2IngrPktsPart5minMulticastMin

Severity: variable

Explanation: This fault is caused by "ingress multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113217: fltTcaL2IngrPktsPart15minMulticastMin

Severity: variable

Explanation: This fault is caused by "ingress multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113218: fltTcaL2IngrPktsPart1hMulticastMin

Severity: variable

Explanation: This fault is caused by "ingress multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113219: fltTcaL2IngrPktsPart1dMulticastMin

Severity: variable

Explanation: This fault is caused by "ingress multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113220: fltTcaL2IngrPktsPart1wMulticastMin

Severity: variable

Explanation: This fault is caused by "ingress multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113221: fltTcaL2IngrPktsPart1moMulticastMin

Severity: variable

Explanation: This fault is caused by "ingress multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113222: fltTcaL2IngrPktsPart1qtrMulticastMin

Severity: variable

Explanation: This fault is caused by "ingress multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113223: fltTcaL2IngrPktsPart1yearMulticastMin

Severity: variable

Explanation: This fault is caused by "ingress multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113224: fltTcaL2IngrPktsPart5minMulticastMax

Severity: variable

Explanation: This fault is caused by "ingress multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113225: fltTcaL2IngrPktsPart15minMulticastMax

Severity: variable

Explanation: This fault is caused by "ingress multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113226: fltTcaL2IngrPktsPart1hMulticastMax

Severity: variable

Explanation: This fault is caused by "ingress multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113227: fltTcaL2IngrPktsPart1dMulticastMax

Severity: variable

Explanation: This fault is caused by "ingress multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113228: fltTcaL2IngrPktsPart1wMulticastMax

Severity: variable

Explanation: This fault is caused by "ingress multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113229: fltTcaL2IngrPktsPart1moMulticastMax

Severity: variable

Explanation: This fault is caused by "ingress multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113230: fltTcaL2IngrPktsPart1qtrMulticastMax

Severity: variable

Explanation: This fault is caused by "ingress multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113231: fltTcaL2IngrPktsPart1yearMulticastMax

Severity: variable

Explanation: This fault is caused by "ingress multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113232: fltTcaL2IngrPktsPart5minMulticastAvg

Severity: variable

Explanation: This fault is caused by "ingress multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113233: fltTcaL2IngrPktsPart15minMulticastAvg

Severity: variable

Explanation: This fault is caused by "ingress multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113234: fltTcaL2IngrPktsPart1hMulticastAvg

Severity: variable

Explanation: This fault is caused by "ingress multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113235: fltTcaL2IngrPktsPart1dMulticastAvg

Severity: variable

Explanation: This fault is caused by "ingress multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113236: fltTcaL2IngrPktsPart1wMulticastAvg

Severity: variable

Explanation: This fault is caused by "ingress multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113237: fltTcaL2IngrPktsPart1moMulticastAvg

Severity: variable

Explanation: This fault is caused by "ingress multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113238: fltTcaL2IngrPktsPart1qtrMulticastAvg

Severity: variable

Explanation: This fault is caused by "ingress multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113239: fltTcaL2IngrPktsPart1yearMulticastAvg

Severity: variable

Explanation: This fault is caused by "ingress multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113264: fltTcaL2IngrPktsPart5minMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113265: fltTcaL2IngrPktsPart15minMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113266: fltTcaL2IngrPktsPart1hMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113267: fltTcaL2IngrPktsPart1dMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113268: fltTcaL2IngrPktsPart1wMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113269: fltTcaL2IngrPktsPart1moMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113270: fltTcaL2IngrPktsPart1qtrMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113271: fltTcaL2IngrPktsPart1yearMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113272: fltTcaL2IngrPktsPart5minMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113273: fltTcaL2IngrPktsPart15minMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113274: fltTcaL2IngrPktsPart1hMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113275: fltTcaL2IngrPktsPart1dMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113276: fltTcaL2IngrPktsPart1wMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113277: fltTcaL2IngrPktsPart1moMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113278: fltTcaL2IngrPktsPart1qtrMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113279: fltTcaL2IngrPktsPart1yearMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113352: fltTcaL2IngrPktsAg5minMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113353: fltTcaL2IngrPktsAg15minMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113354: fltTcaL2IngrPktsAg1hMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113355: fltTcaL2IngrPktsAg1dMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113356: fltTcaL2IngrPktsAg1wMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113357: fltTcaL2IngrPktsAg1moMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113358: fltTcaL2IngrPktsAg1qtrMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113359: fltTcaL2IngrPktsAg1yearMulticastCum

Severity: variable

Explanation: This fault is caused by "ingress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113360: fltTcaL2IngrPktsAg5minMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113361: fltTcaL2IngrPktsAg15minMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113362: fltTcaL2IngrPktsAg1hMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113363: fltTcaL2IngrPktsAg1dMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113364: fltTcaL2IngrPktsAg1wMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113365: fltTcaL2IngrPktsAg1moMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113366: fltTcaL2IngrPktsAg1qtrMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113367: fltTcaL2IngrPktsAg1yearMulticastPer

Severity: variable

Explanation: This fault is caused by "ingress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113392: fltTcaL2IngrPktsAg5minMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113393: fltTcaL2IngrPktsAg15minMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113394: fltTcaL2IngrPktsAg1hMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113395: fltTcaL2IngrPktsAg1dMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113396: fltTcaL2IngrPktsAg1wMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113397: fltTcaL2IngrPktsAg1moMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113398: fltTcaL2IngrPktsAg1qtrMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113399: fltTcaL2IngrPktsAg1yearMulticastTr

Severity: variable

Explanation: This fault is caused by "ingress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113400: fltTcaL2IngrPktsAg5minMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113401: fltTcaL2IngrPktsAg15minMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113402: fltTcaL2IngrPktsAg1hMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113403: fltTcaL2IngrPktsAg1dMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113404: fltTcaL2IngrPktsAg1wMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113405: fltTcaL2IngrPktsAg1moMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113406: fltTcaL2IngrPktsAg1qtrMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113407: fltTcaL2IngrPktsAg1yearMulticastRate

Severity: variable

Explanation: This fault is caused by "ingress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113504: fltTcaL2IngrPkts5minUnicastLast

Severity: variable

Explanation: This fault is caused by "ingress unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113505: fltTcaL2IngrPkts15minUnicastLast

Severity: variable

Explanation: This fault is caused by "ingress unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113506: fltTcaL2IngrPkts1hUnicastLast

Severity: variable

Explanation: This fault is caused by "ingress unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113507: fltTcaL2IngrPkts1dUnicastLast

Severity: variable

Explanation: This fault is caused by "ingress unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113508: fltTcaL2IngrPkts1wUnicastLast

Severity: variable

Explanation: This fault is caused by "ingress unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113509: fltTcaL2IngrPkts1moUnicastLast

Severity: variable

Explanation: This fault is caused by "ingress unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113510: fltTcaL2IngrPkts1qtrUnicastLast

Severity: variable

Explanation: This fault is caused by "ingress unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113511: fltTcaL2IngrPkts1yearUnicastLast

Severity: variable

Explanation: This fault is caused by "ingress unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113520: fltTcaL2IngrPkts5minUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113521: fltTcaL2IngrPkts15minUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113522: fltTcaL2IngrPkts1hUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113523: fltTcaL2IngrPkts1dUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113524: fltTcaL2IngrPkts1wUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113525: fltTcaL2IngrPkts1moUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113526: fltTcaL2IngrPkts1qtrUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113527: fltTcaL2IngrPkts1yearUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113528: fltTcaL2IngrPkts5minUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113529: fltTcaL2IngrPkts15minUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113530: fltTcaL2IngrPkts1hUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113531: fltTcaL2IngrPkts1dUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113532: fltTcaL2IngrPkts1wUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113533: fltTcaL2IngrPkts1moUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113534: fltTcaL2IngrPkts1qtrUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113535: fltTcaL2IngrPkts1yearUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113536: fltTcaL2IngrPkts5minUnicastMin

Severity: variable

Explanation: This fault is caused by "ingress unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113537: fltTcaL2IngrPkts15minUnicastMin

Severity: variable

Explanation: This fault is caused by "ingress unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113538: fltTcaL2IngrPkts1hUnicastMin

Severity: variable

Explanation: This fault is caused by "ingress unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113539: fltTcaL2IngrPkts1dUnicastMin

Severity: variable

Explanation: This fault is caused by "ingress unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113540: fltTcaL2IngrPkts1wUnicastMin

Severity: variable

Explanation: This fault is caused by "ingress unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113541: fltTcaL2IngrPkts1moUnicastMin

Severity: variable

Explanation: This fault is caused by "ingress unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113542: fltTcaL2IngrPkts1qtrUnicastMin

Severity: variable

Explanation: This fault is caused by "ingress unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113543: fltTcaL2IngrPkts1yearUnicastMin

Severity: variable

Explanation: This fault is caused by "ingress unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113544: fltTcaL2IngrPkts5minUnicastMax

Severity: variable

Explanation: This fault is caused by "ingress unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113545: fltTcaL2IngrPkts15minUnicastMax

Severity: variable

Explanation: This fault is caused by "ingress unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113546: fltTcaL2IngrPkts1hUnicastMax

Severity: variable

Explanation: This fault is caused by "ingress unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113547: fltTcaL2IngrPkts1dUnicastMax

Severity: variable

Explanation: This fault is caused by "ingress unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113548: fltTcaL2IngrPkts1wUnicastMax

Severity: variable

Explanation: This fault is caused by "ingress unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113549: fltTcaL2IngrPkts1moUnicastMax

Severity: variable

Explanation: This fault is caused by "ingress unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113550: fltTcaL2IngrPkts1qtrUnicastMax

Severity: variable

Explanation: This fault is caused by "ingress unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113551: fltTcaL2IngrPkts1yearUnicastMax

Severity: variable

Explanation: This fault is caused by "ingress unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113552: fltTcaL2IngrPkts5minUnicastAvg

Severity: variable

Explanation: This fault is caused by "ingress unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113553: fltTcaL2IngrPkts15minUnicastAvg

Severity: variable

Explanation: This fault is caused by "ingress unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113554: fltTcaL2IngrPkts1hUnicastAvg

Severity: variable

Explanation: This fault is caused by "ingress unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113555: fltTcaL2IngrPkts1dUnicastAvg

Severity: variable

Explanation: This fault is caused by "ingress unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113556: fltTcaL2IngrPkts1wUnicastAvg

Severity: variable

Explanation: This fault is caused by "ingress unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113557: fltTcaL2IngrPkts1moUnicastAvg

Severity: variable

Explanation: This fault is caused by "ingress unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113558: fltTcaL2IngrPkts1qtrUnicastAvg

Severity: variable

Explanation: This fault is caused by "ingress unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113559: fltTcaL2IngrPkts1yearUnicastAvg

Severity: variable

Explanation: This fault is caused by "ingress unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113584: fltTcaL2IngrPkts5minUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113585: fltTcaL2IngrPkts15minUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113586: fltTcaL2IngrPkts1hUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113587: fltTcaL2IngrPkts1dUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113588: fltTcaL2IngrPkts1wUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113589: fltTcaL2IngrPkts1moUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113590: fltTcaL2IngrPkts1qtrUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113591: fltTcaL2IngrPkts1yearUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113592: fltTcaL2IngrPkts5minUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113593: fltTcaL2IngrPkts15minUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113594: fltTcaL2IngrPkts1hUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113595: fltTcaL2IngrPkts1dUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113596: fltTcaL2IngrPkts1wUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113597: fltTcaL2IngrPkts1moUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113598: fltTcaL2IngrPkts1qtrUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113599: fltTcaL2IngrPkts1yearUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113672: fltTcaL2IngrPktsPart5minUnicastLast

Severity: variable

Explanation: This fault is caused by "ingress unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113673: fltTcaL2IngrPktsPart15minUnicastLast

Severity: variable

Explanation: This fault is caused by "ingress unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113674: fltTcaL2IngrPktsPart1hUnicastLast

Severity: variable

Explanation: This fault is caused by "ingress unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113675: fltTcaL2IngrPktsPart1dUnicastLast

Severity: variable

Explanation: This fault is caused by "ingress unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113676: fltTcaL2IngrPktsPart1wUnicastLast

Severity: variable

Explanation: This fault is caused by "ingress unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113677: fltTcaL2IngrPktsPart1moUnicastLast

Severity: variable

Explanation: This fault is caused by "ingress unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113678: fltTcaL2IngrPktsPart1qtrUnicastLast

Severity: variable

Explanation: This fault is caused by "ingress unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113679: fltTcaL2IngrPktsPart1yearUnicastLast

Severity: variable

Explanation: This fault is caused by "ingress unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113688: fltTcaL2IngrPktsPart5minUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113689: fltTcaL2IngrPktsPart15minUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113690: fltTcaL2IngrPktsPart1hUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113691: fltTcaL2IngrPktsPart1dUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113692: fltTcaL2IngrPktsPart1wUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113693: fltTcaL2IngrPktsPart1moUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113694: fltTcaL2IngrPktsPart1qtrUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113695: fltTcaL2IngrPktsPart1yearUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113696: fltTcaL2IngrPktsPart5minUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113697: fltTcaL2IngrPktsPart15minUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113698: fltTcaL2IngrPktsPart1hUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113699: fltTcaL2IngrPktsPart1dUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113700: fltTcaL2IngrPktsPart1wUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113701: fltTcaL2IngrPktsPart1moUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113702: fltTcaL2IngrPktsPart1qtrUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113703: fltTcaL2IngrPktsPart1yearUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113704: fltTcaL2IngrPktsPart5minUnicastMin

Severity: variable

Explanation: This fault is caused by "ingress unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113705: fltTcaL2IngrPktsPart15minUnicastMin

Severity: variable

Explanation: This fault is caused by "ingress unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113706: fltTcaL2IngrPktsPart1hUnicastMin

Severity: variable

Explanation: This fault is caused by "ingress unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113707: fltTcaL2IngrPktsPart1dUnicastMin

Severity: variable

Explanation: This fault is caused by "ingress unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113708: fltTcaL2IngrPktsPart1wUnicastMin

Severity: variable

Explanation: This fault is caused by "ingress unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113709: fltTcaL2IngrPktsPart1moUnicastMin

Severity: variable

Explanation: This fault is caused by "ingress unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113710: fltTcaL2IngrPktsPart1qtrUnicastMin

Severity: variable

Explanation: This fault is caused by "ingress unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113711: fltTcaL2IngrPktsPart1yearUnicastMin

Severity: variable

Explanation: This fault is caused by "ingress unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113712: fltTcaL2IngrPktsPart5minUnicastMax

Severity: variable

Explanation: This fault is caused by "ingress unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113713: fltTcaL2IngrPktsPart15minUnicastMax

Severity: variable

Explanation: This fault is caused by "ingress unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113714: fltTcaL2IngrPktsPart1hUnicastMax

Severity: variable

Explanation: This fault is caused by "ingress unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113715: fltTcaL2IngrPktsPart1dUnicastMax

Severity: variable

Explanation: This fault is caused by "ingress unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113716: fltTcaL2IngrPktsPart1wUnicastMax

Severity: variable

Explanation: This fault is caused by "ingress unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113717: fltTcaL2IngrPktsPart1moUnicastMax

Severity: variable

Explanation: This fault is caused by "ingress unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113718: fltTcaL2IngrPktsPart1qtrUnicastMax

Severity: variable

Explanation: This fault is caused by "ingress unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113719: fltTcaL2IngrPktsPart1yearUnicastMax

Severity: variable

Explanation: This fault is caused by "ingress unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113720: fltTcaL2IngrPktsPart5minUnicastAvg

Severity: variable

Explanation: This fault is caused by "ingress unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113721: fltTcaL2IngrPktsPart15minUnicastAvg

Severity: variable

Explanation: This fault is caused by "ingress unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113722: fltTcaL2IngrPktsPart1hUnicastAvg

Severity: variable

Explanation: This fault is caused by "ingress unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113723: fltTcaL2IngrPktsPart1dUnicastAvg

Severity: variable

Explanation: This fault is caused by "ingress unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113724: fltTcaL2IngrPktsPart1wUnicastAvg

Severity: variable

Explanation: This fault is caused by "ingress unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113725: fltTcaL2IngrPktsPart1moUnicastAvg

Severity: variable

Explanation: This fault is caused by "ingress unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113726: fltTcaL2IngrPktsPart1qtrUnicastAvg

Severity: variable

Explanation: This fault is caused by "ingress unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113727: fltTcaL2IngrPktsPart1yearUnicastAvg

Severity: variable

Explanation: This fault is caused by "ingress unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113752: fltTcaL2IngrPktsPart5minUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113753: fltTcaL2IngrPktsPart15minUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113754: fltTcaL2IngrPktsPart1hUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113755: fltTcaL2IngrPktsPart1dUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113756: fltTcaL2IngrPktsPart1wUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113757: fltTcaL2IngrPktsPart1moUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113758: fltTcaL2IngrPktsPart1qtrUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113759: fltTcaL2IngrPktsPart1yearUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113760: fltTcaL2IngrPktsPart5minUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113761: fltTcaL2IngrPktsPart15minUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113762: fltTcaL2IngrPktsPart1hUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113763: fltTcaL2IngrPktsPart1dUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113764: fltTcaL2IngrPktsPart1wUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113765: fltTcaL2IngrPktsPart1moUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113766: fltTcaL2IngrPktsPart1qtrUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113767: fltTcaL2IngrPktsPart1yearUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113840: fltTcaL2IngrPktsAg5minUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113841: fltTcaL2IngrPktsAg15minUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113842: fltTcaL2IngrPktsAg1hUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113843: fltTcaL2IngrPktsAg1dUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113844: fltTcaL2IngrPktsAg1wUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113845: fltTcaL2IngrPktsAg1moUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113846: fltTcaL2IngrPktsAg1qtrUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113847: fltTcaL2IngrPktsAg1yearUnicastCum

Severity: variable

Explanation: This fault is caused by "ingress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113848: fltTcaL2IngrPktsAg5minUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113849: fltTcaL2IngrPktsAg15minUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113850: fltTcaL2IngrPktsAg1hUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113851: fltTcaL2IngrPktsAg1dUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113852: fltTcaL2IngrPktsAg1wUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113853: fltTcaL2IngrPktsAg1moUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113854: fltTcaL2IngrPktsAg1qtrUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113855: fltTcaL2IngrPktsAg1yearUnicastPer

Severity: variable

Explanation: This fault is caused by "ingress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113880: fltTcaL2IngrPktsAg5minUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113881: fltTcaL2IngrPktsAg15minUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113882: fltTcaL2IngrPktsAg1hUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113883: fltTcaL2IngrPktsAg1dUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113884: fltTcaL2IngrPktsAg1wUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113885: fltTcaL2IngrPktsAg1moUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113886: fltTcaL2IngrPktsAg1qtrUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113887: fltTcaL2IngrPktsAg1yearUnicastTr

Severity: variable

Explanation: This fault is caused by "ingress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113888: fltTcaL2IngrPktsAg5minUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113889: fltTcaL2IngrPktsAg15minUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113890: fltTcaL2IngrPktsAg1hUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113891: fltTcaL2IngrPktsAg1dUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113892: fltTcaL2IngrPktsAg1wUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113893: fltTcaL2IngrPktsAg1moUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113894: fltTcaL2IngrPktsAg1qtrUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F113895: fltTcaL2IngrPktsAg1yearUnicastRate

Severity: variable

Explanation: This fault is caused by "ingress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114328: fltTcaOpflexIDEpRxBytes5minBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114329: fltTcaOpflexIDEpRxBytes15minBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114330: fltTcaOpflexIDEpRxBytes1hBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114331: fltTcaOpflexIDEpRxBytes1dBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114332: fltTcaOpflexIDEpRxBytes1wBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114333: fltTcaOpflexIDEpRxBytes1moBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114334: fltTcaOpflexIDEpRxBytes1qtrBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114335: fltTcaOpflexIDEpRxBytes1yearBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114344: fltTcaOpflexIDEpRxBytes5minBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114345: fltTcaOpflexIDEpRxBytes15minBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114346: fltTcaOpflexIDEpRxBytes1hBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114347: fltTcaOpflexIDEpRxBytes1dBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114348: fltTcaOpflexIDEpRxBytes1wBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114349: fltTcaOpflexIDEpRxBytes1moBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114350: fltTcaOpflexIDEpRxBytes1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114351: fltTcaOpflexIDEpRxBytes1yearBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114352: fltTcaOpflexIDEpRxBytes5minBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114353: fltTcaOpflexIDEpRxBytes15minBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114354: fltTcaOpflexIDEpRxBytes1hBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114355: fltTcaOpflexIDEpRxBytes1dBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114356: fltTcaOpflexIDEpRxBytes1wBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114357: fltTcaOpflexIDEpRxBytes1moBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114358: fltTcaOpflexIDEpRxBytes1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114359: fltTcaOpflexIDEpRxBytes1yearBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114360: fltTcaOpflexIDEpRxBytes5minBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114361: fltTcaOpflexIDEpRxBytes15minBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114362: fltTcaOpflexIDEpRxBytes1hBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114363: fltTcaOpflexIDEpRxBytes1dBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114364: fltTcaOpflexIDEpRxBytes1wBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114365: fltTcaOpflexIDEpRxBytes1moBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114366: fltTcaOpflexIDEpRxBytes1qtrBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114367: fltTcaOpflexIDEpRxBytes1yearBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114368: fltTcaOpflexIDEpRxBytes5minBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114369: fltTcaOpflexIDEpRxBytes15minBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114370: fltTcaOpflexIDEpRxBytes1hBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114371: fltTcaOpflexIDEpRxBytes1dBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114372: fltTcaOpflexIDEpRxBytes1wBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114373: fltTcaOpflexIDEpRxBytes1moBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114374: fltTcaOpflexIDEpRxBytes1qtrBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114375: fltTcaOpflexIDEpRxBytes1yearBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114376: fltTcaOpflexIDEpRxBytes5minBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114377: fltTcaOpflexIDEpRxBytes15minBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114378: fltTcaOpflexIDEpRxBytes1hBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114379: fltTcaOpflexIDEpRxBytes1dBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114380: fltTcaOpflexIDEpRxBytes1wBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114381: fltTcaOpflexIDEpRxBytes1moBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114382: fltTcaOpflexIDEpRxBytes1qtrBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114383: fltTcaOpflexIDEpRxBytes1yearBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114408: fltTcaOpflexIDEpRxBytes5minBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114409: fltTcaOpflexIDEpRxBytes15minBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114410: fltTcaOpflexIDEpRxBytes1hBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114411: fltTcaOpflexIDEpRxBytes1dBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114412: fltTcaOpflexIDEpRxBytes1wBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114413: fltTcaOpflexIDEpRxBytes1moBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114414: fltTcaOpflexIDEpRxBytes1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114415: fltTcaOpflexIDEpRxBytes1yearBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114416: fltTcaOpflexIDEpRxBytes5minBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114417: fltTcaOpflexIDEpRxBytes15minBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114418: fltTcaOpflexIDEpRxBytes1hBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114419: fltTcaOpflexIDEpRxBytes1dBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114420: fltTcaOpflexIDEpRxBytes1wBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114421: fltTcaOpflexIDEpRxBytes1moBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114422: fltTcaOpflexIDEpRxBytes1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114423: fltTcaOpflexIDEpRxBytes1yearBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114544: fltTcaOpflexIDEpRxPkts5minDropLast

Severity: variable

Explanation: This fault is caused by "received dropped packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114545: fltTcaOpflexIDEpRxPkts15minDropLast

Severity: variable

Explanation: This fault is caused by "received dropped packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114546: fltTcaOpflexIDEpRxPkts1hDropLast

Severity: variable

Explanation: This fault is caused by "received dropped packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114547: fltTcaOpflexIDEpRxPkts1dDropLast

Severity: variable

Explanation: This fault is caused by "received dropped packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114548: fltTcaOpflexIDEpRxPkts1wDropLast

Severity: variable

Explanation: This fault is caused by "received dropped packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114549: fltTcaOpflexIDEpRxPkts1moDropLast

Severity: variable

Explanation: This fault is caused by "received dropped packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114550: fltTcaOpflexIDEpRxPkts1qtrDropLast

Severity: variable

Explanation: This fault is caused by "received dropped packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114551: fltTcaOpflexIDEpRxPkts1yearDropLast

Severity: variable

Explanation: This fault is caused by "received dropped packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114560: fltTcaOpflexIDEpRxPkts5minDropCum

Severity: variable

Explanation: This fault is caused by "received dropped packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114561: fltTcaOpflexIDEpRxPkts15minDropCum

Severity: variable

Explanation: This fault is caused by "received dropped packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114562: fltTcaOpflexIDEpRxPkts1hDropCum

Severity: variable

Explanation: This fault is caused by "received dropped packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114563: fltTcaOpflexIDEpRxPkts1dDropCum

Severity: variable

Explanation: This fault is caused by "received dropped packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114564: fltTcaOpflexIDEpRxPkts1wDropCum

Severity: variable

Explanation: This fault is caused by "received dropped packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114565: fltTcaOpflexIDEpRxPkts1moDropCum

Severity: variable

Explanation: This fault is caused by "received dropped packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114566: fltTcaOpflexIDEpRxPkts1qtrDropCum

Severity: variable

Explanation: This fault is caused by "received dropped packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114567: fltTcaOpflexIDEpRxPkts1yearDropCum

Severity: variable

Explanation: This fault is caused by "received dropped packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114568: fltTcaOpflexIDEpRxPkts5minDropPer

Severity: variable

Explanation: This fault is caused by "received dropped packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114569: fltTcaOpflexIDEpRxPkts15minDropPer

Severity: variable

Explanation: This fault is caused by "received dropped packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114570: fltTcaOpflexIDEpRxPkts1hDropPer

Severity: variable

Explanation: This fault is caused by "received dropped packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114571: fltTcaOpflexIDEpRxPkts1dDropPer

Severity: variable

Explanation: This fault is caused by "received dropped packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114572: fltTcaOpflexIDEpRxPkts1wDropPer

Severity: variable

Explanation: This fault is caused by "received dropped packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114573: fltTcaOpflexIDEpRxPkts1moDropPer

Severity: variable

Explanation: This fault is caused by "received dropped packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114574: fltTcaOpflexIDEpRxPkts1qtrDropPer

Severity: variable

Explanation: This fault is caused by "received dropped packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114575: fltTcaOpflexIDEpRxPkts1yearDropPer

Severity: variable

Explanation: This fault is caused by "received dropped packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114576: fltTcaOpflexIDEpRxPkts5minDropMin

Severity: variable

Explanation: This fault is caused by "received dropped packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114577: fltTcaOpflexIDEpRxPkts15minDropMin

Severity: variable

Explanation: This fault is caused by "received dropped packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114578: fltTcaOpflexIDEpRxPkts1hDropMin

Severity: variable

Explanation: This fault is caused by "received dropped packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114579: fltTcaOpflexIDEpRxPkts1dDropMin

Severity: variable

Explanation: This fault is caused by "received dropped packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114580: fltTcaOpflexIDEpRxPkts1wDropMin

Severity: variable

Explanation: This fault is caused by "received dropped packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114581: fltTcaOpflexIDEpRxPkts1moDropMin

Severity: variable

Explanation: This fault is caused by "received dropped packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114582: fltTcaOpflexIDEpRxPkts1qtrDropMin

Severity: variable

Explanation: This fault is caused by "received dropped packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114583: fltTcaOpflexIDEpRxPkts1yearDropMin

Severity: variable

Explanation: This fault is caused by "received dropped packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114584: fltTcaOpflexIDEpRxPkts5minDropMax

Severity: variable

Explanation: This fault is caused by "received dropped packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114585: fltTcaOpflexIDEpRxPkts15minDropMax

Severity: variable

Explanation: This fault is caused by "received dropped packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114586: fltTcaOpflexIDEpRxPkts1hDropMax

Severity: variable

Explanation: This fault is caused by "received dropped packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114587: fltTcaOpflexIDEpRxPkts1dDropMax

Severity: variable

Explanation: This fault is caused by "received dropped packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114588: fltTcaOpflexIDEpRxPkts1wDropMax

Severity: variable

Explanation: This fault is caused by "received dropped packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114589: fltTcaOpflexIDEpRxPkts1moDropMax

Severity: variable

Explanation: This fault is caused by "received dropped packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114590: fltTcaOpflexIDEpRxPkts1qtrDropMax

Severity: variable

Explanation: This fault is caused by "received dropped packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114591: fltTcaOpflexIDEpRxPkts1yearDropMax

Severity: variable

Explanation: This fault is caused by "received dropped packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114592: fltTcaOpflexIDEpRxPkts5minDropAvg

Severity: variable

Explanation: This fault is caused by "received dropped packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114593: fltTcaOpflexIDEpRxPkts15minDropAvg

Severity: variable

Explanation: This fault is caused by "received dropped packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114594: fltTcaOpflexIDEpRxPkts1hDropAvg

Severity: variable

Explanation: This fault is caused by "received dropped packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114595: fltTcaOpflexIDEpRxPkts1dDropAvg

Severity: variable

Explanation: This fault is caused by "received dropped packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114596: fltTcaOpflexIDEpRxPkts1wDropAvg

Severity: variable

Explanation: This fault is caused by "received dropped packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114597: fltTcaOpflexIDEpRxPkts1moDropAvg

Severity: variable

Explanation: This fault is caused by "received dropped packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114598: fltTcaOpflexIDEpRxPkts1qtrDropAvg

Severity: variable

Explanation: This fault is caused by "received dropped packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114599: fltTcaOpflexIDEpRxPkts1yearDropAvg

Severity: variable

Explanation: This fault is caused by "received dropped packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114624: fltTcaOpflexIDEpRxPkts5minDropTr

Severity: variable

Explanation: This fault is caused by "received dropped packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114625: fltTcaOpflexIDEpRxPkts15minDropTr

Severity: variable

Explanation: This fault is caused by "received dropped packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114626: fltTcaOpflexIDEpRxPkts1hDropTr

Severity: variable

Explanation: This fault is caused by "received dropped packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114627: fltTcaOpflexIDEpRxPkts1dDropTr

Severity: variable

Explanation: This fault is caused by "received dropped packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114628: fltTcaOpflexIDEpRxPkts1wDropTr

Severity: variable

Explanation: This fault is caused by "received dropped packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114629: fltTcaOpflexIDEpRxPkts1moDropTr

Severity: variable

Explanation: This fault is caused by "received dropped packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114630: fltTcaOpflexIDEpRxPkts1qtrDropTr

Severity: variable

Explanation: This fault is caused by "received dropped packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114631: fltTcaOpflexIDEpRxPkts1yearDropTr

Severity: variable

Explanation: This fault is caused by "received dropped packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114632: fltTcaOpflexIDEpRxPkts5minDropRate

Severity: variable

Explanation: This fault is caused by "received dropped packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114633: fltTcaOpflexIDEpRxPkts15minDropRate

Severity: variable

Explanation: This fault is caused by "received dropped packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114634: fltTcaOpflexIDEpRxPkts1hDropRate

Severity: variable

Explanation: This fault is caused by "received dropped packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114635: fltTcaOpflexIDEpRxPkts1dDropRate

Severity: variable

Explanation: This fault is caused by "received dropped packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114636: fltTcaOpflexIDEpRxPkts1wDropRate

Severity: variable

Explanation: This fault is caused by "received dropped packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114637: fltTcaOpflexIDEpRxPkts1moDropRate

Severity: variable

Explanation: This fault is caused by "received dropped packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114638: fltTcaOpflexIDEpRxPkts1qtrDropRate

Severity: variable

Explanation: This fault is caused by "received dropped packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114639: fltTcaOpflexIDEpRxPkts1yearDropRate

Severity: variable

Explanation: This fault is caused by "received dropped packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114760: fltTcaOpflexIDEpRxPkts5minMcastLast

Severity: variable

Explanation: This fault is caused by "received multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114761: fltTcaOpflexIDEpRxPkts15minMcastLast

Severity: variable

Explanation: This fault is caused by "received multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114762: fltTcaOpflexIDEpRxPkts1hMcastLast

Severity: variable

Explanation: This fault is caused by "received multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114763: fltTcaOpflexIDEpRxPkts1dMcastLast

Severity: variable

Explanation: This fault is caused by "received multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114764: fltTcaOpflexIDEpRxPkts1wMcastLast

Severity: variable

Explanation: This fault is caused by "received multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114765: fltTcaOpflexIDEpRxPkts1moMcastLast

Severity: variable

Explanation: This fault is caused by "received multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114766: fltTcaOpflexIDEpRxPkts1qtrMcastLast

Severity: variable

Explanation: This fault is caused by "received multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114767: fltTcaOpflexIDEpRxPkts1yearMcastLast

Severity: variable

Explanation: This fault is caused by "received multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114776: fltTcaOpflexIDEpRxPkts5minMcastCum

Severity: variable

Explanation: This fault is caused by "received multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114777: fltTcaOpflexIDEpRxPkts15minMcastCum

Severity: variable

Explanation: This fault is caused by "received multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114778: fltTcaOpflexIDEpRxPkts1hMcastCum

Severity: variable

Explanation: This fault is caused by "received multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114779: fltTcaOpflexIDEpRxPkts1dMcastCum

Severity: variable

Explanation: This fault is caused by "received multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114780: fltTcaOpflexIDEpRxPkts1wMcastCum

Severity: variable

Explanation: This fault is caused by "received multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114781: fltTcaOpflexIDEpRxPkts1moMcastCum

Severity: variable

Explanation: This fault is caused by "received multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114782: fltTcaOpflexIDEpRxPkts1qtrMcastCum

Severity: variable

Explanation: This fault is caused by "received multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114783: fltTcaOpflexIDEpRxPkts1yearMcastCum

Severity: variable

Explanation: This fault is caused by "received multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114784: fltTcaOpflexIDEpRxPkts5minMcastPer

Severity: variable

Explanation: This fault is caused by "received multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114785: fltTcaOpflexIDEpRxPkts15minMcastPer

Severity: variable

Explanation: This fault is caused by "received multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114786: fltTcaOpflexIDEpRxPkts1hMcastPer

Severity: variable

Explanation: This fault is caused by "received multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114787: fltTcaOpflexIDEpRxPkts1dMcastPer

Severity: variable

Explanation: This fault is caused by "received multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114788: fltTcaOpflexIDEpRxPkts1wMcastPer

Severity: variable

Explanation: This fault is caused by "received multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114789: fltTcaOpflexIDEpRxPkts1moMcastPer

Severity: variable

Explanation: This fault is caused by "received multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114790: fltTcaOpflexIDEpRxPkts1qtrMcastPer

Severity: variable

Explanation: This fault is caused by "received multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114791: fltTcaOpflexIDEpRxPkts1yearMcastPer

Severity: variable

Explanation: This fault is caused by "received multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114792: fltTcaOpflexIDEpRxPkts5minMcastMin

Severity: variable

Explanation: This fault is caused by "received multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114793: fltTcaOpflexIDEpRxPkts15minMcastMin

Severity: variable

Explanation: This fault is caused by "received multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114794: fltTcaOpflexIDEpRxPkts1hMcastMin

Severity: variable

Explanation: This fault is caused by "received multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114795: fltTcaOpflexIDEpRxPkts1dMcastMin

Severity: variable

Explanation: This fault is caused by "received multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114796: fltTcaOpflexIDEpRxPkts1wMcastMin

Severity: variable

Explanation: This fault is caused by "received multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114797: fltTcaOpflexIDEpRxPkts1moMcastMin

Severity: variable

Explanation: This fault is caused by "received multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114798: fltTcaOpflexIDEpRxPkts1qtrMcastMin

Severity: variable

Explanation: This fault is caused by "received multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114799: fltTcaOpflexIDEpRxPkts1yearMcastMin

Severity: variable

Explanation: This fault is caused by "received multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114800: fltTcaOpflexIDEpRxPkts5minMcastMax

Severity: variable

Explanation: This fault is caused by "received multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114801: fltTcaOpflexIDEpRxPkts15minMcastMax

Severity: variable

Explanation: This fault is caused by "received multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114802: fltTcaOpflexIDEpRxPkts1hMcastMax

Severity: variable

Explanation: This fault is caused by "received multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114803: fltTcaOpflexIDEpRxPkts1dMcastMax

Severity: variable

Explanation: This fault is caused by "received multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114804: fltTcaOpflexIDEpRxPkts1wMcastMax

Severity: variable

Explanation: This fault is caused by "received multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114805: fltTcaOpflexIDEpRxPkts1moMcastMax

Severity: variable

Explanation: This fault is caused by "received multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114806: fltTcaOpflexIDEpRxPkts1qtrMcastMax

Severity: variable

Explanation: This fault is caused by "received multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114807: fltTcaOpflexIDEpRxPkts1yearMcastMax

Severity: variable

Explanation: This fault is caused by "received multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114808: fltTcaOpflexIDEpRxPkts5minMcastAvg

Severity: variable

Explanation: This fault is caused by "received multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114809: fltTcaOpflexIDEpRxPkts15minMcastAvg

Severity: variable

Explanation: This fault is caused by "received multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114810: fltTcaOpflexIDEpRxPkts1hMcastAvg

Severity: variable

Explanation: This fault is caused by "received multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114811: fltTcaOpflexIDEpRxPkts1dMcastAvg

Severity: variable

Explanation: This fault is caused by "received multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114812: fltTcaOpflexIDEpRxPkts1wMcastAvg

Severity: variable

Explanation: This fault is caused by "received multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114813: fltTcaOpflexIDEpRxPkts1moMcastAvg

Severity: variable

Explanation: This fault is caused by "received multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114814: fltTcaOpflexIDEpRxPkts1qtrMcastAvg

Severity: variable

Explanation: This fault is caused by "received multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114815: fltTcaOpflexIDEpRxPkts1yearMcastAvg

Severity: variable

Explanation: This fault is caused by "received multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114840: fltTcaOpflexIDEpRxPkts5minMcastTr

Severity: variable

Explanation: This fault is caused by "received multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114841: fltTcaOpflexIDEpRxPkts15minMcastTr

Severity: variable

Explanation: This fault is caused by "received multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114842: fltTcaOpflexIDEpRxPkts1hMcastTr

Severity: variable

Explanation: This fault is caused by "received multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114843: fltTcaOpflexIDEpRxPkts1dMcastTr

Severity: variable

Explanation: This fault is caused by "received multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114844: fltTcaOpflexIDEpRxPkts1wMcastTr

Severity: variable

Explanation: This fault is caused by "received multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114845: fltTcaOpflexIDEpRxPkts1moMcastTr

Severity: variable

Explanation: This fault is caused by "received multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114846: fltTcaOpflexIDEpRxPkts1qtrMcastTr

Severity: variable

Explanation: This fault is caused by "received multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114847: fltTcaOpflexIDEpRxPkts1yearMcastTr

Severity: variable

Explanation: This fault is caused by "received multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114848: fltTcaOpflexIDEpRxPkts5minMcastRate

Severity: variable

Explanation: This fault is caused by "received multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114849: fltTcaOpflexIDEpRxPkts15minMcastRate

Severity: variable

Explanation: This fault is caused by "received multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114850: fltTcaOpflexIDEpRxPkts1hMcastRate

Severity: variable

Explanation: This fault is caused by "received multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114851: fltTcaOpflexIDEpRxPkts1dMcastRate

Severity: variable

Explanation: This fault is caused by "received multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114852: fltTcaOpflexIDEpRxPkts1wMcastRate

Severity: variable

Explanation: This fault is caused by "received multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114853: fltTcaOpflexIDEpRxPkts1moMcastRate

Severity: variable

Explanation: This fault is caused by "received multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114854: fltTcaOpflexIDEpRxPkts1qtrMcastRate

Severity: variable

Explanation: This fault is caused by "received multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114855: fltTcaOpflexIDEpRxPkts1yearMcastRate

Severity: variable

Explanation: This fault is caused by "received multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114976: fltTcaOpflexIDEpRxPkts5minPktsLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114977: fltTcaOpflexIDEpRxPkts15minPktsLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114978: fltTcaOpflexIDEpRxPkts1hPktsLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114979: fltTcaOpflexIDEpRxPkts1dPktsLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114980: fltTcaOpflexIDEpRxPkts1wPktsLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114981: fltTcaOpflexIDEpRxPkts1moPktsLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114982: fltTcaOpflexIDEpRxPkts1qtrPktsLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114983: fltTcaOpflexIDEpRxPkts1yearPktsLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114992: fltTcaOpflexIDEpRxPkts5minPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114993: fltTcaOpflexIDEpRxPkts15minPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114994: fltTcaOpflexIDEpRxPkts1hPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114995: fltTcaOpflexIDEpRxPkts1dPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114996: fltTcaOpflexIDEpRxPkts1wPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114997: fltTcaOpflexIDEpRxPkts1moPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114998: fltTcaOpflexIDEpRxPkts1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F114999: fltTcaOpflexIDEpRxPkts1yearPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115000: fltTcaOpflexIDEpRxPkts5minPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115001: fltTcaOpflexIDEpRxPkts15minPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115002: fltTcaOpflexIDEpRxPkts1hPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115003: fltTcaOpflexIDEpRxPkts1dPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115004: fltTcaOpflexIDEpRxPkts1wPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115005: fltTcaOpflexIDEpRxPkts1moPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115006: fltTcaOpflexIDEpRxPkts1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115007: fltTcaOpflexIDEpRxPkts1yearPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115008: fltTcaOpflexIDEpRxPkts5minPktsMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115009: fltTcaOpflexIDEpRxPkts15minPktsMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115010: fltTcaOpflexIDEpRxPkts1hPktsMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115011: fltTcaOpflexIDEpRxPkts1dPktsMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115012: fltTcaOpflexIDEpRxPkts1wPktsMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115013: fltTcaOpflexIDEpRxPkts1moPktsMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115014: fltTcaOpflexIDEpRxPkts1qtrPktsMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115015: fltTcaOpflexIDEpRxPkts1yearPktsMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115016: fltTcaOpflexIDEpRxPkts5minPktsMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115017: fltTcaOpflexIDEpRxPkts15minPktsMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115018: fltTcaOpflexIDEpRxPkts1hPktsMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115019: fltTcaOpflexIDEpRxPkts1dPktsMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115020: fltTcaOpflexIDEpRxPkts1wPktsMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115021: fltTcaOpflexIDEpRxPkts1moPktsMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115022: fltTcaOpflexIDEpRxPkts1qtrPktsMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115023: fltTcaOpflexIDEpRxPkts1yearPktsMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115024: fltTcaOpflexIDEpRxPkts5minPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115025: fltTcaOpflexIDEpRxPkts15minPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115026: fltTcaOpflexIDEpRxPkts1hPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115027: fltTcaOpflexIDEpRxPkts1dPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115028: fltTcaOpflexIDEpRxPkts1wPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115029: fltTcaOpflexIDEpRxPkts1moPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115030: fltTcaOpflexIDEpRxPkts1qtrPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115031: fltTcaOpflexIDEpRxPkts1yearPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115056: fltTcaOpflexIDEpRxPkts5minPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115057: fltTcaOpflexIDEpRxPkts15minPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115058: fltTcaOpflexIDEpRxPkts1hPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115059: fltTcaOpflexIDEpRxPkts1dPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115060: fltTcaOpflexIDEpRxPkts1wPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115061: fltTcaOpflexIDEpRxPkts1moPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115062: fltTcaOpflexIDEpRxPkts1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115063: fltTcaOpflexIDEpRxPkts1yearPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115064: fltTcaOpflexIDEpRxPkts5minPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115065: fltTcaOpflexIDEpRxPkts15minPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115066: fltTcaOpflexIDEpRxPkts1hPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115067: fltTcaOpflexIDEpRxPkts1dPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115068: fltTcaOpflexIDEpRxPkts1wPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115069: fltTcaOpflexIDEpRxPkts1moPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115070: fltTcaOpflexIDEpRxPkts1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115071: fltTcaOpflexIDEpRxPkts1yearPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115192: fltTcaOpflexIDEpRxPkts5minUcastLast

Severity: variable

Explanation: This fault is caused by "received unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115193: fltTcaOpflexIDEpRxPkts15minUcastLast

Severity: variable

Explanation: This fault is caused by "received unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115194: fltTcaOpflexIDEpRxPkts1hUcastLast

Severity: variable

Explanation: This fault is caused by "received unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115195: fltTcaOpflexIDEpRxPkts1dUcastLast

Severity: variable

Explanation: This fault is caused by "received unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115196: fltTcaOpflexIDEpRxPkts1wUcastLast

Severity: variable

Explanation: This fault is caused by "received unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115197: fltTcaOpflexIDEpRxPkts1moUcastLast

Severity: variable

Explanation: This fault is caused by "received unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115198: fltTcaOpflexIDEpRxPkts1qtrUcastLast

Severity: variable

Explanation: This fault is caused by "received unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115199: fltTcaOpflexIDEpRxPkts1yearUcastLast

Severity: variable

Explanation: This fault is caused by "received unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115208: fltTcaOpflexIDEpRxPkts5minUcastCum

Severity: variable

Explanation: This fault is caused by "received unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115209: fltTcaOpflexIDEpRxPkts15minUcastCum

Severity: variable

Explanation: This fault is caused by "received unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115210: fltTcaOpflexIDEpRxPkts1hUcastCum

Severity: variable

Explanation: This fault is caused by "received unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115211: fltTcaOpflexIDEpRxPkts1dUcastCum

Severity: variable

Explanation: This fault is caused by "received unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115212: fltTcaOpflexIDEpRxPkts1wUcastCum

Severity: variable

Explanation: This fault is caused by "received unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115213: fltTcaOpflexIDEpRxPkts1moUcastCum

Severity: variable

Explanation: This fault is caused by "received unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115214: fltTcaOpflexIDEpRxPkts1qtrUcastCum

Severity: variable

Explanation: This fault is caused by "received unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115215: fltTcaOpflexIDEpRxPkts1yearUcastCum

Severity: variable

Explanation: This fault is caused by "received unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115216: fltTcaOpflexIDEpRxPkts5minUcastPer

Severity: variable

Explanation: This fault is caused by "received unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115217: fltTcaOpflexIDEpRxPkts15minUcastPer

Severity: variable

Explanation: This fault is caused by "received unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115218: fltTcaOpflexIDEpRxPkts1hUcastPer

Severity: variable

Explanation: This fault is caused by "received unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115219: fltTcaOpflexIDEpRxPkts1dUcastPer

Severity: variable

Explanation: This fault is caused by "received unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115220: fltTcaOpflexIDEpRxPkts1wUcastPer

Severity: variable

Explanation: This fault is caused by "received unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115221: fltTcaOpflexIDEpRxPkts1moUcastPer

Severity: variable

Explanation: This fault is caused by "received unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115222: fltTcaOpflexIDEpRxPkts1qtrUcastPer

Severity: variable

Explanation: This fault is caused by "received unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115223: fltTcaOpflexIDEpRxPkts1yearUcastPer

Severity: variable

Explanation: This fault is caused by "received unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115224: fltTcaOpflexIDEpRxPkts5minUcastMin

Severity: variable

Explanation: This fault is caused by "received unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115225: fltTcaOpflexIDEpRxPkts15minUcastMin

Severity: variable

Explanation: This fault is caused by "received unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115226: fltTcaOpflexIDEpRxPkts1hUcastMin

Severity: variable

Explanation: This fault is caused by "received unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115227: fltTcaOpflexIDEpRxPkts1dUcastMin

Severity: variable

Explanation: This fault is caused by "received unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115228: fltTcaOpflexIDEpRxPkts1wUcastMin

Severity: variable

Explanation: This fault is caused by "received unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115229: fltTcaOpflexIDEpRxPkts1moUcastMin

Severity: variable

Explanation: This fault is caused by "received unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115230: fltTcaOpflexIDEpRxPkts1qtrUcastMin

Severity: variable

Explanation: This fault is caused by "received unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115231: fltTcaOpflexIDEpRxPkts1yearUcastMin

Severity: variable

Explanation: This fault is caused by "received unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115232: fltTcaOpflexIDEpRxPkts5minUcastMax

Severity: variable

Explanation: This fault is caused by "received unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115233: fltTcaOpflexIDEpRxPkts15minUcastMax

Severity: variable

Explanation: This fault is caused by "received unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115234: fltTcaOpflexIDEpRxPkts1hUcastMax

Severity: variable

Explanation: This fault is caused by "received unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115235: fltTcaOpflexIDEpRxPkts1dUcastMax

Severity: variable

Explanation: This fault is caused by "received unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115236: fltTcaOpflexIDEpRxPkts1wUcastMax

Severity: variable

Explanation: This fault is caused by "received unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115237: fltTcaOpflexIDEpRxPkts1moUcastMax

Severity: variable

Explanation: This fault is caused by "received unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115238: fltTcaOpflexIDEpRxPkts1qtrUcastMax

Severity: variable

Explanation: This fault is caused by "received unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115239: fltTcaOpflexIDEpRxPkts1yearUcastMax

Severity: variable

Explanation: This fault is caused by "received unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115240: fltTcaOpflexIDEpRxPkts5minUcastAvg

Severity: variable

Explanation: This fault is caused by "received unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115241: fltTcaOpflexIDEpRxPkts15minUcastAvg

Severity: variable

Explanation: This fault is caused by "received unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115242: fltTcaOpflexIDEpRxPkts1hUcastAvg

Severity: variable

Explanation: This fault is caused by "received unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115243: fltTcaOpflexIDEpRxPkts1dUcastAvg

Severity: variable

Explanation: This fault is caused by "received unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115244: fltTcaOpflexIDEpRxPkts1wUcastAvg

Severity: variable

Explanation: This fault is caused by "received unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115245: fltTcaOpflexIDEpRxPkts1moUcastAvg

Severity: variable

Explanation: This fault is caused by "received unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115246: fltTcaOpflexIDEpRxPkts1qtrUcastAvg

Severity: variable

Explanation: This fault is caused by "received unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115247: fltTcaOpflexIDEpRxPkts1yearUcastAvg

Severity: variable

Explanation: This fault is caused by "received unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115272: fltTcaOpflexIDEpRxPkts5minUcastTr

Severity: variable

Explanation: This fault is caused by "received unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115273: fltTcaOpflexIDEpRxPkts15minUcastTr

Severity: variable

Explanation: This fault is caused by "received unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115274: fltTcaOpflexIDEpRxPkts1hUcastTr

Severity: variable

Explanation: This fault is caused by "received unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115275: fltTcaOpflexIDEpRxPkts1dUcastTr

Severity: variable

Explanation: This fault is caused by "received unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115276: fltTcaOpflexIDEpRxPkts1wUcastTr

Severity: variable

Explanation: This fault is caused by "received unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115277: fltTcaOpflexIDEpRxPkts1moUcastTr

Severity: variable

Explanation: This fault is caused by "received unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115278: fltTcaOpflexIDEpRxPkts1qtrUcastTr

Severity: variable

Explanation: This fault is caused by "received unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115279: fltTcaOpflexIDEpRxPkts1yearUcastTr

Severity: variable

Explanation: This fault is caused by "received unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115280: fltTcaOpflexIDEpRxPkts5minUcastRate

Severity: variable

Explanation: This fault is caused by "received unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115281: fltTcaOpflexIDEpRxPkts15minUcastRate

Severity: variable

Explanation: This fault is caused by "received unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115282: fltTcaOpflexIDEpRxPkts1hUcastRate

Severity: variable

Explanation: This fault is caused by "received unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115283: fltTcaOpflexIDEpRxPkts1dUcastRate

Severity: variable

Explanation: This fault is caused by "received unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115284: fltTcaOpflexIDEpRxPkts1wUcastRate

Severity: variable

Explanation: This fault is caused by "received unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115285: fltTcaOpflexIDEpRxPkts1moUcastRate

Severity: variable

Explanation: This fault is caused by "received unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115286: fltTcaOpflexIDEpRxPkts1qtrUcastRate

Severity: variable

Explanation: This fault is caused by "received unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115287: fltTcaOpflexIDEpRxPkts1yearUcastRate

Severity: variable

Explanation: This fault is caused by "received unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115408: fltTcaOpflexIDEpTxBytes5minBytesLast

Severity: variable

Explanation: This fault is caused by "transmitted bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115409: fltTcaOpflexIDEpTxBytes15minBytesLast

Severity: variable

Explanation: This fault is caused by "transmitted bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115410: fltTcaOpflexIDEpTxBytes1hBytesLast

Severity: variable

Explanation: This fault is caused by "transmitted bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115411: fltTcaOpflexIDEpTxBytes1dBytesLast

Severity: variable

Explanation: This fault is caused by "transmitted bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115412: fltTcaOpflexIDEpTxBytes1wBytesLast

Severity: variable

Explanation: This fault is caused by "transmitted bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115413: fltTcaOpflexIDEpTxBytes1moBytesLast

Severity: variable

Explanation: This fault is caused by "transmitted bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115414: fltTcaOpflexIDEpTxBytes1qtrBytesLast

Severity: variable

Explanation: This fault is caused by "transmitted bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115415: fltTcaOpflexIDEpTxBytes1yearBytesLast

Severity: variable

Explanation: This fault is caused by "transmitted bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115424: fltTcaOpflexIDEpTxBytes5minBytesCum

Severity: variable

Explanation: This fault is caused by "transmitted bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115425: fltTcaOpflexIDEpTxBytes15minBytesCum

Severity: variable

Explanation: This fault is caused by "transmitted bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115426: fltTcaOpflexIDEpTxBytes1hBytesCum

Severity: variable

Explanation: This fault is caused by "transmitted bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115427: fltTcaOpflexIDEpTxBytes1dBytesCum

Severity: variable

Explanation: This fault is caused by "transmitted bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115428: fltTcaOpflexIDEpTxBytes1wBytesCum

Severity: variable

Explanation: This fault is caused by "transmitted bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115429: fltTcaOpflexIDEpTxBytes1moBytesCum

Severity: variable

Explanation: This fault is caused by "transmitted bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115430: fltTcaOpflexIDEpTxBytes1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "transmitted bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115431: fltTcaOpflexIDEpTxBytes1yearBytesCum

Severity: variable

Explanation: This fault is caused by "transmitted bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115432: fltTcaOpflexIDEpTxBytes5minBytesPer

Severity: variable

Explanation: This fault is caused by "transmitted bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115433: fltTcaOpflexIDEpTxBytes15minBytesPer

Severity: variable

Explanation: This fault is caused by "transmitted bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115434: fltTcaOpflexIDEpTxBytes1hBytesPer

Severity: variable

Explanation: This fault is caused by "transmitted bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115435: fltTcaOpflexIDEpTxBytes1dBytesPer

Severity: variable

Explanation: This fault is caused by "transmitted bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115436: fltTcaOpflexIDEpTxBytes1wBytesPer

Severity: variable

Explanation: This fault is caused by "transmitted bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115437: fltTcaOpflexIDEpTxBytes1moBytesPer

Severity: variable

Explanation: This fault is caused by "transmitted bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115438: fltTcaOpflexIDEpTxBytes1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "transmitted bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115439: fltTcaOpflexIDEpTxBytes1yearBytesPer

Severity: variable

Explanation: This fault is caused by "transmitted bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115440: fltTcaOpflexIDEpTxBytes5minBytesMin

Severity: variable

Explanation: This fault is caused by "transmitted bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115441: fltTcaOpflexIDEpTxBytes15minBytesMin

Severity: variable

Explanation: This fault is caused by "transmitted bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115442: fltTcaOpflexIDEpTxBytes1hBytesMin

Severity: variable

Explanation: This fault is caused by "transmitted bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115443: fltTcaOpflexIDEpTxBytes1dBytesMin

Severity: variable

Explanation: This fault is caused by "transmitted bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115444: fltTcaOpflexIDEpTxBytes1wBytesMin

Severity: variable

Explanation: This fault is caused by "transmitted bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115445: fltTcaOpflexIDEpTxBytes1moBytesMin

Severity: variable

Explanation: This fault is caused by "transmitted bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115446: fltTcaOpflexIDEpTxBytes1qtrBytesMin

Severity: variable

Explanation: This fault is caused by "transmitted bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115447: fltTcaOpflexIDEpTxBytes1yearBytesMin

Severity: variable

Explanation: This fault is caused by "transmitted bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115448: fltTcaOpflexIDEpTxBytes5minBytesMax

Severity: variable

Explanation: This fault is caused by "transmitted bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115449: fltTcaOpflexIDEpTxBytes15minBytesMax

Severity: variable

Explanation: This fault is caused by "transmitted bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115450: fltTcaOpflexIDEpTxBytes1hBytesMax

Severity: variable

Explanation: This fault is caused by "transmitted bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115451: fltTcaOpflexIDEpTxBytes1dBytesMax

Severity: variable

Explanation: This fault is caused by "transmitted bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115452: fltTcaOpflexIDEpTxBytes1wBytesMax

Severity: variable

Explanation: This fault is caused by "transmitted bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115453: fltTcaOpflexIDEpTxBytes1moBytesMax

Severity: variable

Explanation: This fault is caused by "transmitted bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115454: fltTcaOpflexIDEpTxBytes1qtrBytesMax

Severity: variable

Explanation: This fault is caused by "transmitted bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115455: fltTcaOpflexIDEpTxBytes1yearBytesMax

Severity: variable

Explanation: This fault is caused by "transmitted bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115456: fltTcaOpflexIDEpTxBytes5minBytesAvg

Severity: variable

Explanation: This fault is caused by "transmitted bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115457: fltTcaOpflexIDEpTxBytes15minBytesAvg

Severity: variable

Explanation: This fault is caused by "transmitted bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115458: fltTcaOpflexIDEpTxBytes1hBytesAvg

Severity: variable

Explanation: This fault is caused by "transmitted bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115459: fltTcaOpflexIDEpTxBytes1dBytesAvg

Severity: variable

Explanation: This fault is caused by "transmitted bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115460: fltTcaOpflexIDEpTxBytes1wBytesAvg

Severity: variable

Explanation: This fault is caused by "transmitted bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115461: fltTcaOpflexIDEpTxBytes1moBytesAvg

Severity: variable

Explanation: This fault is caused by "transmitted bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115462: fltTcaOpflexIDEpTxBytes1qtrBytesAvg

Severity: variable

Explanation: This fault is caused by "transmitted bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115463: fltTcaOpflexIDEpTxBytes1yearBytesAvg

Severity: variable

Explanation: This fault is caused by "transmitted bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115488: fltTcaOpflexIDEpTxBytes5minBytesTr

Severity: variable

Explanation: This fault is caused by "transmitted bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115489: fltTcaOpflexIDEpTxBytes15minBytesTr

Severity: variable

Explanation: This fault is caused by "transmitted bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115490: fltTcaOpflexIDEpTxBytes1hBytesTr

Severity: variable

Explanation: This fault is caused by "transmitted bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115491: fltTcaOpflexIDEpTxBytes1dBytesTr

Severity: variable

Explanation: This fault is caused by "transmitted bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115492: fltTcaOpflexIDEpTxBytes1wBytesTr

Severity: variable

Explanation: This fault is caused by "transmitted bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115493: fltTcaOpflexIDEpTxBytes1moBytesTr

Severity: variable

Explanation: This fault is caused by "transmitted bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115494: fltTcaOpflexIDEpTxBytes1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "transmitted bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115495: fltTcaOpflexIDEpTxBytes1yearBytesTr

Severity: variable

Explanation: This fault is caused by "transmitted bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115496: fltTcaOpflexIDEpTxBytes5minBytesRate

Severity: variable

Explanation: This fault is caused by "transmitted bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115497: fltTcaOpflexIDEpTxBytes15minBytesRate

Severity: variable

Explanation: This fault is caused by "transmitted bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115498: fltTcaOpflexIDEpTxBytes1hBytesRate

Severity: variable

Explanation: This fault is caused by "transmitted bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115499: fltTcaOpflexIDEpTxBytes1dBytesRate

Severity: variable

Explanation: This fault is caused by "transmitted bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115500: fltTcaOpflexIDEpTxBytes1wBytesRate

Severity: variable

Explanation: This fault is caused by "transmitted bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115501: fltTcaOpflexIDEpTxBytes1moBytesRate

Severity: variable

Explanation: This fault is caused by "transmitted bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115502: fltTcaOpflexIDEpTxBytes1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "transmitted bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115503: fltTcaOpflexIDEpTxBytes1yearBytesRate

Severity: variable

Explanation: This fault is caused by "transmitted bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115624: fltTcaOpflexIDEpTxPkts5minDropLast

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115625: fltTcaOpflexIDEpTxPkts15minDropLast

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115626: fltTcaOpflexIDEpTxPkts1hDropLast

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115627: fltTcaOpflexIDEpTxPkts1dDropLast

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115628: fltTcaOpflexIDEpTxPkts1wDropLast

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115629: fltTcaOpflexIDEpTxPkts1moDropLast

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115630: fltTcaOpflexIDEpTxPkts1qtrDropLast

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115631: fltTcaOpflexIDEpTxPkts1yearDropLast

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115640: fltTcaOpflexIDEpTxPkts5minDropCum

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115641: fltTcaOpflexIDEpTxPkts15minDropCum

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115642: fltTcaOpflexIDEpTxPkts1hDropCum

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115643: fltTcaOpflexIDEpTxPkts1dDropCum

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115644: fltTcaOpflexIDEpTxPkts1wDropCum

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115645: fltTcaOpflexIDEpTxPkts1moDropCum

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115646: fltTcaOpflexIDEpTxPkts1qtrDropCum

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115647: fltTcaOpflexIDEpTxPkts1yearDropCum

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115648: fltTcaOpflexIDEpTxPkts5minDropPer

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115649: fltTcaOpflexIDEpTxPkts15minDropPer

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115650: fltTcaOpflexIDEpTxPkts1hDropPer

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115651: fltTcaOpflexIDEpTxPkts1dDropPer

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115652: fltTcaOpflexIDEpTxPkts1wDropPer

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115653: fltTcaOpflexIDEpTxPkts1moDropPer

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115654: fltTcaOpflexIDEpTxPkts1qtrDropPer

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115655: fltTcaOpflexIDEpTxPkts1yearDropPer

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115656: fltTcaOpflexIDEpTxPkts5minDropMin

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115657: fltTcaOpflexIDEpTxPkts15minDropMin

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115658: fltTcaOpflexIDEpTxPkts1hDropMin

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115659: fltTcaOpflexIDEpTxPkts1dDropMin

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115660: fltTcaOpflexIDEpTxPkts1wDropMin

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115661: fltTcaOpflexIDEpTxPkts1moDropMin

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115662: fltTcaOpflexIDEpTxPkts1qtrDropMin

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115663: fltTcaOpflexIDEpTxPkts1yearDropMin

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115664: fltTcaOpflexIDEpTxPkts5minDropMax

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115665: fltTcaOpflexIDEpTxPkts15minDropMax

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115666: fltTcaOpflexIDEpTxPkts1hDropMax

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115667: fltTcaOpflexIDEpTxPkts1dDropMax

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115668: fltTcaOpflexIDEpTxPkts1wDropMax

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115669: fltTcaOpflexIDEpTxPkts1moDropMax

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115670: fltTcaOpflexIDEpTxPkts1qtrDropMax

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115671: fltTcaOpflexIDEpTxPkts1yearDropMax

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115672: fltTcaOpflexIDEpTxPkts5minDropAvg

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115673: fltTcaOpflexIDEpTxPkts15minDropAvg

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115674: fltTcaOpflexIDEpTxPkts1hDropAvg

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115675: fltTcaOpflexIDEpTxPkts1dDropAvg

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115676: fltTcaOpflexIDEpTxPkts1wDropAvg

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115677: fltTcaOpflexIDEpTxPkts1moDropAvg

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115678: fltTcaOpflexIDEpTxPkts1qtrDropAvg

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115679: fltTcaOpflexIDEpTxPkts1yearDropAvg

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115704: fltTcaOpflexIDEpTxPkts5minDropTr

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115705: fltTcaOpflexIDEpTxPkts15minDropTr

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115706: fltTcaOpflexIDEpTxPkts1hDropTr

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115707: fltTcaOpflexIDEpTxPkts1dDropTr

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115708: fltTcaOpflexIDEpTxPkts1wDropTr

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115709: fltTcaOpflexIDEpTxPkts1moDropTr

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115710: fltTcaOpflexIDEpTxPkts1qtrDropTr

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115711: fltTcaOpflexIDEpTxPkts1yearDropTr

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115712: fltTcaOpflexIDEpTxPkts5minDropRate

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115713: fltTcaOpflexIDEpTxPkts15minDropRate

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115714: fltTcaOpflexIDEpTxPkts1hDropRate

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115715: fltTcaOpflexIDEpTxPkts1dDropRate

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115716: fltTcaOpflexIDEpTxPkts1wDropRate

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115717: fltTcaOpflexIDEpTxPkts1moDropRate

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115718: fltTcaOpflexIDEpTxPkts1qtrDropRate

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115719: fltTcaOpflexIDEpTxPkts1yearDropRate

Severity: variable

Explanation: This fault is caused by "transmitted dropped packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted dropped packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115840: fltTcaOpflexIDEpTxPkts5minMcastLast

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115841: fltTcaOpflexIDEpTxPkts15minMcastLast

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115842: fltTcaOpflexIDEpTxPkts1hMcastLast

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115843: fltTcaOpflexIDEpTxPkts1dMcastLast

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115844: fltTcaOpflexIDEpTxPkts1wMcastLast

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115845: fltTcaOpflexIDEpTxPkts1moMcastLast

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115846: fltTcaOpflexIDEpTxPkts1qtrMcastLast

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115847: fltTcaOpflexIDEpTxPkts1yearMcastLast

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115856: fltTcaOpflexIDEpTxPkts5minMcastCum

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115857: fltTcaOpflexIDEpTxPkts15minMcastCum

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115858: fltTcaOpflexIDEpTxPkts1hMcastCum

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115859: fltTcaOpflexIDEpTxPkts1dMcastCum

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115860: fltTcaOpflexIDEpTxPkts1wMcastCum

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115861: fltTcaOpflexIDEpTxPkts1moMcastCum

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115862: fltTcaOpflexIDEpTxPkts1qtrMcastCum

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115863: fltTcaOpflexIDEpTxPkts1yearMcastCum

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115864: fltTcaOpflexIDEpTxPkts5minMcastPer

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115865: fltTcaOpflexIDEpTxPkts15minMcastPer

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115866: fltTcaOpflexIDEpTxPkts1hMcastPer

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115867: fltTcaOpflexIDEpTxPkts1dMcastPer

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115868: fltTcaOpflexIDEpTxPkts1wMcastPer

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115869: fltTcaOpflexIDEpTxPkts1moMcastPer

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115870: fltTcaOpflexIDEpTxPkts1qtrMcastPer

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115871: fltTcaOpflexIDEpTxPkts1yearMcastPer

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115872: fltTcaOpflexIDEpTxPkts5minMcastMin

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115873: fltTcaOpflexIDEpTxPkts15minMcastMin

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115874: fltTcaOpflexIDEpTxPkts1hMcastMin

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115875: fltTcaOpflexIDEpTxPkts1dMcastMin

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115876: fltTcaOpflexIDEpTxPkts1wMcastMin

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115877: fltTcaOpflexIDEpTxPkts1moMcastMin

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115878: fltTcaOpflexIDEpTxPkts1qtrMcastMin

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115879: fltTcaOpflexIDEpTxPkts1yearMcastMin

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115880: fltTcaOpflexIDEpTxPkts5minMcastMax

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115881: fltTcaOpflexIDEpTxPkts15minMcastMax

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115882: fltTcaOpflexIDEpTxPkts1hMcastMax

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115883: fltTcaOpflexIDEpTxPkts1dMcastMax

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115884: fltTcaOpflexIDEpTxPkts1wMcastMax

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115885: fltTcaOpflexIDEpTxPkts1moMcastMax

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115886: fltTcaOpflexIDEpTxPkts1qtrMcastMax

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115887: fltTcaOpflexIDEpTxPkts1yearMcastMax

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115888: fltTcaOpflexIDEpTxPkts5minMcastAvg

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115889: fltTcaOpflexIDEpTxPkts15minMcastAvg

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115890: fltTcaOpflexIDEpTxPkts1hMcastAvg

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115891: fltTcaOpflexIDEpTxPkts1dMcastAvg

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115892: fltTcaOpflexIDEpTxPkts1wMcastAvg

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115893: fltTcaOpflexIDEpTxPkts1moMcastAvg

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115894: fltTcaOpflexIDEpTxPkts1qtrMcastAvg

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115895: fltTcaOpflexIDEpTxPkts1yearMcastAvg

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115920: fltTcaOpflexIDEpTxPkts5minMcastTr

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115921: fltTcaOpflexIDEpTxPkts15minMcastTr

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115922: fltTcaOpflexIDEpTxPkts1hMcastTr

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115923: fltTcaOpflexIDEpTxPkts1dMcastTr

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115924: fltTcaOpflexIDEpTxPkts1wMcastTr

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115925: fltTcaOpflexIDEpTxPkts1moMcastTr

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115926: fltTcaOpflexIDEpTxPkts1qtrMcastTr

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115927: fltTcaOpflexIDEpTxPkts1yearMcastTr

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115928: fltTcaOpflexIDEpTxPkts5minMcastRate

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115929: fltTcaOpflexIDEpTxPkts15minMcastRate

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115930: fltTcaOpflexIDEpTxPkts1hMcastRate

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115931: fltTcaOpflexIDEpTxPkts1dMcastRate

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115932: fltTcaOpflexIDEpTxPkts1wMcastRate

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115933: fltTcaOpflexIDEpTxPkts1moMcastRate

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115934: fltTcaOpflexIDEpTxPkts1qtrMcastRate

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F115935: fltTcaOpflexIDEpTxPkts1yearMcastRate

Severity: variable

Explanation: This fault is caused by "transmitted multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116056: fltTcaOpflexIDEpTxPkts5minPktsLast

Severity: variable

Explanation: This fault is caused by "transmitted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116057: fltTcaOpflexIDEpTxPkts15minPktsLast

Severity: variable

Explanation: This fault is caused by "transmitted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116058: fltTcaOpflexIDEpTxPkts1hPktsLast

Severity: variable

Explanation: This fault is caused by "transmitted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116059: fltTcaOpflexIDEpTxPkts1dPktsLast

Severity: variable

Explanation: This fault is caused by "transmitted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116060: fltTcaOpflexIDEpTxPkts1wPktsLast

Severity: variable

Explanation: This fault is caused by "transmitted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116061: fltTcaOpflexIDEpTxPkts1moPktsLast

Severity: variable

Explanation: This fault is caused by "transmitted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116062: fltTcaOpflexIDEpTxPkts1qtrPktsLast

Severity: variable

Explanation: This fault is caused by "transmitted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116063: fltTcaOpflexIDEpTxPkts1yearPktsLast

Severity: variable

Explanation: This fault is caused by "transmitted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116072: fltTcaOpflexIDEpTxPkts5minPktsCum

Severity: variable

Explanation: This fault is caused by "transmitted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116073: fltTcaOpflexIDEpTxPkts15minPktsCum

Severity: variable

Explanation: This fault is caused by "transmitted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116074: fltTcaOpflexIDEpTxPkts1hPktsCum

Severity: variable

Explanation: This fault is caused by "transmitted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116075: fltTcaOpflexIDEpTxPkts1dPktsCum

Severity: variable

Explanation: This fault is caused by "transmitted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116076: fltTcaOpflexIDEpTxPkts1wPktsCum

Severity: variable

Explanation: This fault is caused by "transmitted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116077: fltTcaOpflexIDEpTxPkts1moPktsCum

Severity: variable

Explanation: This fault is caused by "transmitted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116078: fltTcaOpflexIDEpTxPkts1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "transmitted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116079: fltTcaOpflexIDEpTxPkts1yearPktsCum

Severity: variable

Explanation: This fault is caused by "transmitted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116080: fltTcaOpflexIDEpTxPkts5minPktsPer

Severity: variable

Explanation: This fault is caused by "transmitted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116081: fltTcaOpflexIDEpTxPkts15minPktsPer

Severity: variable

Explanation: This fault is caused by "transmitted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116082: fltTcaOpflexIDEpTxPkts1hPktsPer

Severity: variable

Explanation: This fault is caused by "transmitted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116083: fltTcaOpflexIDEpTxPkts1dPktsPer

Severity: variable

Explanation: This fault is caused by "transmitted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116084: fltTcaOpflexIDEpTxPkts1wPktsPer

Severity: variable

Explanation: This fault is caused by "transmitted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116085: fltTcaOpflexIDEpTxPkts1moPktsPer

Severity: variable

Explanation: This fault is caused by "transmitted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116086: fltTcaOpflexIDEpTxPkts1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "transmitted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116087: fltTcaOpflexIDEpTxPkts1yearPktsPer

Severity: variable

Explanation: This fault is caused by "transmitted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116088: fltTcaOpflexIDEpTxPkts5minPktsMin

Severity: variable

Explanation: This fault is caused by "transmitted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116089: fltTcaOpflexIDEpTxPkts15minPktsMin

Severity: variable

Explanation: This fault is caused by "transmitted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116090: fltTcaOpflexIDEpTxPkts1hPktsMin

Severity: variable

Explanation: This fault is caused by "transmitted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116091: fltTcaOpflexIDEpTxPkts1dPktsMin

Severity: variable

Explanation: This fault is caused by "transmitted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116092: fltTcaOpflexIDEpTxPkts1wPktsMin

Severity: variable

Explanation: This fault is caused by "transmitted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116093: fltTcaOpflexIDEpTxPkts1moPktsMin

Severity: variable

Explanation: This fault is caused by "transmitted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116094: fltTcaOpflexIDEpTxPkts1qtrPktsMin

Severity: variable

Explanation: This fault is caused by "transmitted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116095: fltTcaOpflexIDEpTxPkts1yearPktsMin

Severity: variable

Explanation: This fault is caused by "transmitted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116096: fltTcaOpflexIDEpTxPkts5minPktsMax

Severity: variable

Explanation: This fault is caused by "transmitted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116097: fltTcaOpflexIDEpTxPkts15minPktsMax

Severity: variable

Explanation: This fault is caused by "transmitted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116098: fltTcaOpflexIDEpTxPkts1hPktsMax

Severity: variable

Explanation: This fault is caused by "transmitted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116099: fltTcaOpflexIDEpTxPkts1dPktsMax

Severity: variable

Explanation: This fault is caused by "transmitted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116100: fltTcaOpflexIDEpTxPkts1wPktsMax

Severity: variable

Explanation: This fault is caused by "transmitted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116101: fltTcaOpflexIDEpTxPkts1moPktsMax

Severity: variable

Explanation: This fault is caused by "transmitted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116102: fltTcaOpflexIDEpTxPkts1qtrPktsMax

Severity: variable

Explanation: This fault is caused by "transmitted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116103: fltTcaOpflexIDEpTxPkts1yearPktsMax

Severity: variable

Explanation: This fault is caused by "transmitted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116104: fltTcaOpflexIDEpTxPkts5minPktsAvg

Severity: variable

Explanation: This fault is caused by "transmitted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116105: fltTcaOpflexIDEpTxPkts15minPktsAvg

Severity: variable

Explanation: This fault is caused by "transmitted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116106: fltTcaOpflexIDEpTxPkts1hPktsAvg

Severity: variable

Explanation: This fault is caused by "transmitted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116107: fltTcaOpflexIDEpTxPkts1dPktsAvg

Severity: variable

Explanation: This fault is caused by "transmitted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116108: fltTcaOpflexIDEpTxPkts1wPktsAvg

Severity: variable

Explanation: This fault is caused by "transmitted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116109: fltTcaOpflexIDEpTxPkts1moPktsAvg

Severity: variable

Explanation: This fault is caused by "transmitted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116110: fltTcaOpflexIDEpTxPkts1qtrPktsAvg

Severity: variable

Explanation: This fault is caused by "transmitted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116111: fltTcaOpflexIDEpTxPkts1yearPktsAvg

Severity: variable

Explanation: This fault is caused by "transmitted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116136: fltTcaOpflexIDEpTxPkts5minPktsTr

Severity: variable

Explanation: This fault is caused by "transmitted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116137: fltTcaOpflexIDEpTxPkts15minPktsTr

Severity: variable

Explanation: This fault is caused by "transmitted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116138: fltTcaOpflexIDEpTxPkts1hPktsTr

Severity: variable

Explanation: This fault is caused by "transmitted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116139: fltTcaOpflexIDEpTxPkts1dPktsTr

Severity: variable

Explanation: This fault is caused by "transmitted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116140: fltTcaOpflexIDEpTxPkts1wPktsTr

Severity: variable

Explanation: This fault is caused by "transmitted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116141: fltTcaOpflexIDEpTxPkts1moPktsTr

Severity: variable

Explanation: This fault is caused by "transmitted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116142: fltTcaOpflexIDEpTxPkts1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "transmitted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116143: fltTcaOpflexIDEpTxPkts1yearPktsTr

Severity: variable

Explanation: This fault is caused by "transmitted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116144: fltTcaOpflexIDEpTxPkts5minPktsRate

Severity: variable

Explanation: This fault is caused by "transmitted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116145: fltTcaOpflexIDEpTxPkts15minPktsRate

Severity: variable

Explanation: This fault is caused by "transmitted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116146: fltTcaOpflexIDEpTxPkts1hPktsRate

Severity: variable

Explanation: This fault is caused by "transmitted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116147: fltTcaOpflexIDEpTxPkts1dPktsRate

Severity: variable

Explanation: This fault is caused by "transmitted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116148: fltTcaOpflexIDEpTxPkts1wPktsRate

Severity: variable

Explanation: This fault is caused by "transmitted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116149: fltTcaOpflexIDEpTxPkts1moPktsRate

Severity: variable

Explanation: This fault is caused by "transmitted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116150: fltTcaOpflexIDEpTxPkts1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "transmitted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116151: fltTcaOpflexIDEpTxPkts1yearPktsRate

Severity: variable

Explanation: This fault is caused by "transmitted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116272: fltTcaOpflexIDEpTxPkts5minUcastLast

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116273: fltTcaOpflexIDEpTxPkts15minUcastLast

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116274: fltTcaOpflexIDEpTxPkts1hUcastLast

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116275: fltTcaOpflexIDEpTxPkts1dUcastLast

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116276: fltTcaOpflexIDEpTxPkts1wUcastLast

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116277: fltTcaOpflexIDEpTxPkts1moUcastLast

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116278: fltTcaOpflexIDEpTxPkts1qtrUcastLast

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116279: fltTcaOpflexIDEpTxPkts1yearUcastLast

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116288: fltTcaOpflexIDEpTxPkts5minUcastCum

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116289: fltTcaOpflexIDEpTxPkts15minUcastCum

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116290: fltTcaOpflexIDEpTxPkts1hUcastCum

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116291: fltTcaOpflexIDEpTxPkts1dUcastCum

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116292: fltTcaOpflexIDEpTxPkts1wUcastCum

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116293: fltTcaOpflexIDEpTxPkts1moUcastCum

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116294: fltTcaOpflexIDEpTxPkts1qtrUcastCum

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116295: fltTcaOpflexIDEpTxPkts1yearUcastCum

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116296: fltTcaOpflexIDEpTxPkts5minUcastPer

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116297: fltTcaOpflexIDEpTxPkts15minUcastPer

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116298: fltTcaOpflexIDEpTxPkts1hUcastPer

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116299: fltTcaOpflexIDEpTxPkts1dUcastPer

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116300: fltTcaOpflexIDEpTxPkts1wUcastPer

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116301: fltTcaOpflexIDEpTxPkts1moUcastPer

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116302: fltTcaOpflexIDEpTxPkts1qtrUcastPer

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116303: fltTcaOpflexIDEpTxPkts1yearUcastPer

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116304: fltTcaOpflexIDEpTxPkts5minUcastMin

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116305: fltTcaOpflexIDEpTxPkts15minUcastMin

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116306: fltTcaOpflexIDEpTxPkts1hUcastMin

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116307: fltTcaOpflexIDEpTxPkts1dUcastMin

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116308: fltTcaOpflexIDEpTxPkts1wUcastMin

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116309: fltTcaOpflexIDEpTxPkts1moUcastMin

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116310: fltTcaOpflexIDEpTxPkts1qtrUcastMin

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116311: fltTcaOpflexIDEpTxPkts1yearUcastMin

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116312: fltTcaOpflexIDEpTxPkts5minUcastMax

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116313: fltTcaOpflexIDEpTxPkts15minUcastMax

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116314: fltTcaOpflexIDEpTxPkts1hUcastMax

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116315: fltTcaOpflexIDEpTxPkts1dUcastMax

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116316: fltTcaOpflexIDEpTxPkts1wUcastMax

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116317: fltTcaOpflexIDEpTxPkts1moUcastMax

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116318: fltTcaOpflexIDEpTxPkts1qtrUcastMax

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116319: fltTcaOpflexIDEpTxPkts1yearUcastMax

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116320: fltTcaOpflexIDEpTxPkts5minUcastAvg

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116321: fltTcaOpflexIDEpTxPkts15minUcastAvg

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116322: fltTcaOpflexIDEpTxPkts1hUcastAvg

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116323: fltTcaOpflexIDEpTxPkts1dUcastAvg

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116324: fltTcaOpflexIDEpTxPkts1wUcastAvg

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116325: fltTcaOpflexIDEpTxPkts1moUcastAvg

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116326: fltTcaOpflexIDEpTxPkts1qtrUcastAvg

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116327: fltTcaOpflexIDEpTxPkts1yearUcastAvg

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116352: fltTcaOpflexIDEpTxPkts5minUcastTr

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116353: fltTcaOpflexIDEpTxPkts15minUcastTr

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116354: fltTcaOpflexIDEpTxPkts1hUcastTr

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116355: fltTcaOpflexIDEpTxPkts1dUcastTr

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116356: fltTcaOpflexIDEpTxPkts1wUcastTr

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116357: fltTcaOpflexIDEpTxPkts1moUcastTr

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116358: fltTcaOpflexIDEpTxPkts1qtrUcastTr

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116359: fltTcaOpflexIDEpTxPkts1yearUcastTr

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116360: fltTcaOpflexIDEpTxPkts5minUcastRate

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116361: fltTcaOpflexIDEpTxPkts15minUcastRate

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116362: fltTcaOpflexIDEpTxPkts1hUcastRate

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116363: fltTcaOpflexIDEpTxPkts1dUcastRate

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116364: fltTcaOpflexIDEpTxPkts1wUcastRate

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116365: fltTcaOpflexIDEpTxPkts1moUcastRate

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116366: fltTcaOpflexIDEpTxPkts1qtrUcastRate

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116367: fltTcaOpflexIDEpTxPkts1yearUcastRate

Severity: variable

Explanation: This fault is caused by "transmitted unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116488: fltTcaProcCPU5minCurrentLast

Severity: variable

Explanation: This fault is caused by "CPU Usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116489: fltTcaProcCPU15minCurrentLast

Severity: variable

Explanation: This fault is caused by "CPU Usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116490: fltTcaProcCPU1hCurrentLast

Severity: variable

Explanation: This fault is caused by "CPU Usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116491: fltTcaProcCPU1dCurrentLast

Severity: variable

Explanation: This fault is caused by "CPU Usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116492: fltTcaProcCPU1wCurrentLast

Severity: variable

Explanation: This fault is caused by "CPU Usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116493: fltTcaProcCPU1moCurrentLast

Severity: variable

Explanation: This fault is caused by "CPU Usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116494: fltTcaProcCPU1qtrCurrentLast

Severity: variable

Explanation: This fault is caused by "CPU Usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116495: fltTcaProcCPU1yearCurrentLast

Severity: variable

Explanation: This fault is caused by "CPU Usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116496: fltTcaProcCPU5minCurrentMin

Severity: variable

Explanation: This fault is caused by "CPU Usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116497: fltTcaProcCPU15minCurrentMin

Severity: variable

Explanation: This fault is caused by "CPU Usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116498: fltTcaProcCPU1hCurrentMin

Severity: variable

Explanation: This fault is caused by "CPU Usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116499: fltTcaProcCPU1dCurrentMin

Severity: variable

Explanation: This fault is caused by "CPU Usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116500: fltTcaProcCPU1wCurrentMin

Severity: variable

Explanation: This fault is caused by "CPU Usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116501: fltTcaProcCPU1moCurrentMin

Severity: variable

Explanation: This fault is caused by "CPU Usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116502: fltTcaProcCPU1qtrCurrentMin

Severity: variable

Explanation: This fault is caused by "CPU Usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116503: fltTcaProcCPU1yearCurrentMin

Severity: variable

Explanation: This fault is caused by "CPU Usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116504: fltTcaProcCPU5minCurrentMax

Severity: variable

Explanation: This fault is caused by "CPU Usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116505: fltTcaProcCPU15minCurrentMax

Severity: variable

Explanation: This fault is caused by "CPU Usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116506: fltTcaProcCPU1hCurrentMax

Severity: variable

Explanation: This fault is caused by "CPU Usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116507: fltTcaProcCPU1dCurrentMax

Severity: variable

Explanation: This fault is caused by "CPU Usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116508: fltTcaProcCPU1wCurrentMax

Severity: variable

Explanation: This fault is caused by "CPU Usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116509: fltTcaProcCPU1moCurrentMax

Severity: variable

Explanation: This fault is caused by "CPU Usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116510: fltTcaProcCPU1qtrCurrentMax

Severity: variable

Explanation: This fault is caused by "CPU Usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116511: fltTcaProcCPU1yearCurrentMax

Severity: variable

Explanation: This fault is caused by "CPU Usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116512: fltTcaProcCPU5minCurrentAvg

Severity: variable

Explanation: This fault is caused by "CPU Usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116513: fltTcaProcCPU15minCurrentAvg

Severity: variable

Explanation: This fault is caused by "CPU Usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116514: fltTcaProcCPU1hCurrentAvg

Severity: variable

Explanation: This fault is caused by "CPU Usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116515: fltTcaProcCPU1dCurrentAvg

Severity: variable

Explanation: This fault is caused by "CPU Usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116516: fltTcaProcCPU1wCurrentAvg

Severity: variable

Explanation: This fault is caused by "CPU Usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116517: fltTcaProcCPU1moCurrentAvg

Severity: variable

Explanation: This fault is caused by "CPU Usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116518: fltTcaProcCPU1qtrCurrentAvg

Severity: variable

Explanation: This fault is caused by "CPU Usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116519: fltTcaProcCPU1yearCurrentAvg

Severity: variable

Explanation: This fault is caused by "CPU Usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116552: fltTcaProcCPU5minCurrentTr

Severity: variable

Explanation: This fault is caused by "CPU Usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116553: fltTcaProcCPU15minCurrentTr

Severity: variable

Explanation: This fault is caused by "CPU Usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116554: fltTcaProcCPU1hCurrentTr

Severity: variable

Explanation: This fault is caused by "CPU Usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116555: fltTcaProcCPU1dCurrentTr

Severity: variable

Explanation: This fault is caused by "CPU Usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116556: fltTcaProcCPU1wCurrentTr

Severity: variable

Explanation: This fault is caused by "CPU Usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116557: fltTcaProcCPU1moCurrentTr

Severity: variable

Explanation: This fault is caused by "CPU Usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116558: fltTcaProcCPU1qtrCurrentTr

Severity: variable

Explanation: This fault is caused by "CPU Usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116559: fltTcaProcCPU1yearCurrentTr

Severity: variable

Explanation: This fault is caused by "CPU Usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116656: fltTcaProcMem5minCurrentLast

Severity: variable

Explanation: This fault is caused by "Memory Allocated current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Memory Allocated" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116657: fltTcaProcMem15minCurrentLast

Severity: variable

Explanation: This fault is caused by "Memory Allocated current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Memory Allocated" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116658: fltTcaProcMem1hCurrentLast

Severity: variable

Explanation: This fault is caused by "Memory Allocated current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Memory Allocated" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116659: fltTcaProcMem1dCurrentLast

Severity: variable

Explanation: This fault is caused by "Memory Allocated current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Memory Allocated" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116660: fltTcaProcMem1wCurrentLast

Severity: variable

Explanation: This fault is caused by "Memory Allocated current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Memory Allocated" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116661: fltTcaProcMem1moCurrentLast

Severity: variable

Explanation: This fault is caused by "Memory Allocated current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Memory Allocated" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116662: fltTcaProcMem1qtrCurrentLast

Severity: variable

Explanation: This fault is caused by "Memory Allocated current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Memory Allocated" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116663: fltTcaProcMem1yearCurrentLast

Severity: variable

Explanation: This fault is caused by "Memory Allocated current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Memory Allocated" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116664: fltTcaProcMem5minCurrentMin

Severity: variable

Explanation: This fault is caused by "Memory Allocated minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Memory Allocated" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116665: fltTcaProcMem15minCurrentMin

Severity: variable

Explanation: This fault is caused by "Memory Allocated minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Memory Allocated" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116666: fltTcaProcMem1hCurrentMin

Severity: variable

Explanation: This fault is caused by "Memory Allocated minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Memory Allocated" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116667: fltTcaProcMem1dCurrentMin

Severity: variable

Explanation: This fault is caused by "Memory Allocated minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Memory Allocated" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116668: fltTcaProcMem1wCurrentMin

Severity: variable

Explanation: This fault is caused by "Memory Allocated minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Memory Allocated" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116669: fltTcaProcMem1moCurrentMin

Severity: variable

Explanation: This fault is caused by "Memory Allocated minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Memory Allocated" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116670: fltTcaProcMem1qtrCurrentMin

Severity: variable

Explanation: This fault is caused by "Memory Allocated minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Memory Allocated" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116671: fltTcaProcMem1yearCurrentMin

Severity: variable

Explanation: This fault is caused by "Memory Allocated minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Memory Allocated" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116672: fltTcaProcMem5minCurrentMax

Severity: variable

Explanation: This fault is caused by "Memory Allocated maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Memory Allocated" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116673: fltTcaProcMem15minCurrentMax

Severity: variable

Explanation: This fault is caused by "Memory Allocated maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Memory Allocated" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116674: fltTcaProcMem1hCurrentMax

Severity: variable

Explanation: This fault is caused by "Memory Allocated maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Memory Allocated" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116675: fltTcaProcMem1dCurrentMax

Severity: variable

Explanation: This fault is caused by "Memory Allocated maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Memory Allocated" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116676: fltTcaProcMem1wCurrentMax

Severity: variable

Explanation: This fault is caused by "Memory Allocated maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Memory Allocated" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116677: fltTcaProcMem1moCurrentMax

Severity: variable

Explanation: This fault is caused by "Memory Allocated maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Memory Allocated" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116678: fltTcaProcMem1qtrCurrentMax

Severity: variable

Explanation: This fault is caused by "Memory Allocated maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Memory Allocated" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116679: fltTcaProcMem1yearCurrentMax

Severity: variable

Explanation: This fault is caused by "Memory Allocated maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Memory Allocated" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116680: fltTcaProcMem5minCurrentAvg

Severity: variable

Explanation: This fault is caused by "Memory Allocated average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Memory Allocated" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116681: fltTcaProcMem15minCurrentAvg

Severity: variable

Explanation: This fault is caused by "Memory Allocated average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Memory Allocated" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116682: fltTcaProcMem1hCurrentAvg

Severity: variable

Explanation: This fault is caused by "Memory Allocated average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Memory Allocated" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116683: fltTcaProcMem1dCurrentAvg

Severity: variable

Explanation: This fault is caused by "Memory Allocated average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Memory Allocated" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116684: fltTcaProcMem1wCurrentAvg

Severity: variable

Explanation: This fault is caused by "Memory Allocated average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Memory Allocated" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116685: fltTcaProcMem1moCurrentAvg

Severity: variable

Explanation: This fault is caused by "Memory Allocated average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Memory Allocated" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116686: fltTcaProcMem1qtrCurrentAvg

Severity: variable

Explanation: This fault is caused by "Memory Allocated average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Memory Allocated" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116687: fltTcaProcMem1yearCurrentAvg

Severity: variable

Explanation: This fault is caused by "Memory Allocated average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Memory Allocated" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116720: fltTcaProcMem5minCurrentTr

Severity: variable

Explanation: This fault is caused by "Memory Allocated trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Memory Allocated" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116721: fltTcaProcMem15minCurrentTr

Severity: variable

Explanation: This fault is caused by "Memory Allocated trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Memory Allocated" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116722: fltTcaProcMem1hCurrentTr

Severity: variable

Explanation: This fault is caused by "Memory Allocated trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Memory Allocated" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116723: fltTcaProcMem1dCurrentTr

Severity: variable

Explanation: This fault is caused by "Memory Allocated trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Memory Allocated" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116724: fltTcaProcMem1wCurrentTr

Severity: variable

Explanation: This fault is caused by "Memory Allocated trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Memory Allocated" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116725: fltTcaProcMem1moCurrentTr

Severity: variable

Explanation: This fault is caused by "Memory Allocated trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Memory Allocated" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116726: fltTcaProcMem1qtrCurrentTr

Severity: variable

Explanation: This fault is caused by "Memory Allocated trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Memory Allocated" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116727: fltTcaProcMem1yearCurrentTr

Severity: variable

Explanation: This fault is caused by "Memory Allocated trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Memory Allocated" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116824: fltTcaProcProcCPU5minAvgExecLast

Severity: variable

Explanation: This fault is caused by "average execution time current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116825: fltTcaProcProcCPU15minAvgExecLast

Severity: variable

Explanation: This fault is caused by "average execution time current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116826: fltTcaProcProcCPU1hAvgExecLast

Severity: variable

Explanation: This fault is caused by "average execution time current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116827: fltTcaProcProcCPU1dAvgExecLast

Severity: variable

Explanation: This fault is caused by "average execution time current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116828: fltTcaProcProcCPU1wAvgExecLast

Severity: variable

Explanation: This fault is caused by "average execution time current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116829: fltTcaProcProcCPU1moAvgExecLast

Severity: variable

Explanation: This fault is caused by "average execution time current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116830: fltTcaProcProcCPU1qtrAvgExecLast

Severity: variable

Explanation: This fault is caused by "average execution time current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116831: fltTcaProcProcCPU1yearAvgExecLast

Severity: variable

Explanation: This fault is caused by "average execution time current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116832: fltTcaProcProcCPU5minAvgExecMin

Severity: variable

Explanation: This fault is caused by "average execution time minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116833: fltTcaProcProcCPU15minAvgExecMin

Severity: variable

Explanation: This fault is caused by "average execution time minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116834: fltTcaProcProcCPU1hAvgExecMin

Severity: variable

Explanation: This fault is caused by "average execution time minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116835: fltTcaProcProcCPU1dAvgExecMin

Severity: variable

Explanation: This fault is caused by "average execution time minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116836: fltTcaProcProcCPU1wAvgExecMin

Severity: variable

Explanation: This fault is caused by "average execution time minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116837: fltTcaProcProcCPU1moAvgExecMin

Severity: variable

Explanation: This fault is caused by "average execution time minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116838: fltTcaProcProcCPU1qtrAvgExecMin

Severity: variable

Explanation: This fault is caused by "average execution time minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116839: fltTcaProcProcCPU1yearAvgExecMin

Severity: variable

Explanation: This fault is caused by "average execution time minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116840: fltTcaProcProcCPU5minAvgExecMax

Severity: variable

Explanation: This fault is caused by "average execution time maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116841: fltTcaProcProcCPU15minAvgExecMax

Severity: variable

Explanation: This fault is caused by "average execution time maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116842: fltTcaProcProcCPU1hAvgExecMax

Severity: variable

Explanation: This fault is caused by "average execution time maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116843: fltTcaProcProcCPU1dAvgExecMax

Severity: variable

Explanation: This fault is caused by "average execution time maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116844: fltTcaProcProcCPU1wAvgExecMax

Severity: variable

Explanation: This fault is caused by "average execution time maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116845: fltTcaProcProcCPU1moAvgExecMax

Severity: variable

Explanation: This fault is caused by "average execution time maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116846: fltTcaProcProcCPU1qtrAvgExecMax

Severity: variable

Explanation: This fault is caused by "average execution time maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116847: fltTcaProcProcCPU1yearAvgExecMax

Severity: variable

Explanation: This fault is caused by "average execution time maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116848: fltTcaProcProcCPU5minAvgExecAvg

Severity: variable

Explanation: This fault is caused by "average execution time average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116849: fltTcaProcProcCPU15minAvgExecAvg

Severity: variable

Explanation: This fault is caused by "average execution time average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116850: fltTcaProcProcCPU1hAvgExecAvg

Severity: variable

Explanation: This fault is caused by "average execution time average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116851: fltTcaProcProcCPU1dAvgExecAvg

Severity: variable

Explanation: This fault is caused by "average execution time average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116852: fltTcaProcProcCPU1wAvgExecAvg

Severity: variable

Explanation: This fault is caused by "average execution time average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116853: fltTcaProcProcCPU1moAvgExecAvg

Severity: variable

Explanation: This fault is caused by "average execution time average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116854: fltTcaProcProcCPU1qtrAvgExecAvg

Severity: variable

Explanation: This fault is caused by "average execution time average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116855: fltTcaProcProcCPU1yearAvgExecAvg

Severity: variable

Explanation: This fault is caused by "average execution time average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116888: fltTcaProcProcCPU5minAvgExecTr

Severity: variable

Explanation: This fault is caused by "average execution time trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116889: fltTcaProcProcCPU15minAvgExecTr

Severity: variable

Explanation: This fault is caused by "average execution time trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116890: fltTcaProcProcCPU1hAvgExecTr

Severity: variable

Explanation: This fault is caused by "average execution time trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116891: fltTcaProcProcCPU1dAvgExecTr

Severity: variable

Explanation: This fault is caused by "average execution time trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116892: fltTcaProcProcCPU1wAvgExecTr

Severity: variable

Explanation: This fault is caused by "average execution time trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116893: fltTcaProcProcCPU1moAvgExecTr

Severity: variable

Explanation: This fault is caused by "average execution time trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116894: fltTcaProcProcCPU1qtrAvgExecTr

Severity: variable

Explanation: This fault is caused by "average execution time trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116895: fltTcaProcProcCPU1yearAvgExecTr

Severity: variable

Explanation: This fault is caused by "average execution time trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116992: fltTcaProcProcCPU5minInvokedLast

Severity: variable

Explanation: This fault is caused by "invoked current value" statistical property crossing threshold level.

Recommended Action: Check the values of "invoked" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116993: fltTcaProcProcCPU15minInvokedLast

Severity: variable

Explanation: This fault is caused by "invoked current value" statistical property crossing threshold level.

Recommended Action: Check the values of "invoked" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116994: fltTcaProcProcCPU1hInvokedLast

Severity: variable

Explanation: This fault is caused by "invoked current value" statistical property crossing threshold level.

Recommended Action: Check the values of "invoked" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116995: fltTcaProcProcCPU1dInvokedLast

Severity: variable

Explanation: This fault is caused by "invoked current value" statistical property crossing threshold level.

Recommended Action: Check the values of "invoked" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116996: fltTcaProcProcCPU1wInvokedLast

Severity: variable

Explanation: This fault is caused by "invoked current value" statistical property crossing threshold level.

Recommended Action: Check the values of "invoked" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116997: fltTcaProcProcCPU1moInvokedLast

Severity: variable

Explanation: This fault is caused by "invoked current value" statistical property crossing threshold level.

Recommended Action: Check the values of "invoked" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116998: fltTcaProcProcCPU1qtrInvokedLast

Severity: variable

Explanation: This fault is caused by "invoked current value" statistical property crossing threshold level.

Recommended Action: Check the values of "invoked" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F116999: fltTcaProcProcCPU1yearInvokedLast

Severity: variable

Explanation: This fault is caused by "invoked current value" statistical property crossing threshold level.

Recommended Action: Check the values of "invoked" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117000: fltTcaProcProcCPU5minInvokedMin

Severity: variable

Explanation: This fault is caused by "invoked minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invoked" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117001: fltTcaProcProcCPU15minInvokedMin

Severity: variable

Explanation: This fault is caused by "invoked minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invoked" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117002: fltTcaProcProcCPU1hInvokedMin

Severity: variable

Explanation: This fault is caused by "invoked minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invoked" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117003: fltTcaProcProcCPU1dInvokedMin

Severity: variable

Explanation: This fault is caused by "invoked minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invoked" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117004: fltTcaProcProcCPU1wInvokedMin

Severity: variable

Explanation: This fault is caused by "invoked minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invoked" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117005: fltTcaProcProcCPU1moInvokedMin

Severity: variable

Explanation: This fault is caused by "invoked minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invoked" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117006: fltTcaProcProcCPU1qtrInvokedMin

Severity: variable

Explanation: This fault is caused by "invoked minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invoked" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117007: fltTcaProcProcCPU1yearInvokedMin

Severity: variable

Explanation: This fault is caused by "invoked minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invoked" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117008: fltTcaProcProcCPU5minInvokedMax

Severity: variable

Explanation: This fault is caused by "invoked maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invoked" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117009: fltTcaProcProcCPU15minInvokedMax

Severity: variable

Explanation: This fault is caused by "invoked maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invoked" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117010: fltTcaProcProcCPU1hInvokedMax

Severity: variable

Explanation: This fault is caused by "invoked maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invoked" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117011: fltTcaProcProcCPU1dInvokedMax

Severity: variable

Explanation: This fault is caused by "invoked maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invoked" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117012: fltTcaProcProcCPU1wInvokedMax

Severity: variable

Explanation: This fault is caused by "invoked maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invoked" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117013: fltTcaProcProcCPU1moInvokedMax

Severity: variable

Explanation: This fault is caused by "invoked maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invoked" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117014: fltTcaProcProcCPU1qtrInvokedMax

Severity: variable

Explanation: This fault is caused by "invoked maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invoked" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117015: fltTcaProcProcCPU1yearInvokedMax

Severity: variable

Explanation: This fault is caused by "invoked maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invoked" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117016: fltTcaProcProcCPU5minInvokedAvg

Severity: variable

Explanation: This fault is caused by "invoked average value" statistical property crossing threshold level.

Recommended Action: Check the values of "invoked" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117017: fltTcaProcProcCPU15minInvokedAvg

Severity: variable

Explanation: This fault is caused by "invoked average value" statistical property crossing threshold level.

Recommended Action: Check the values of "invoked" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117018: fltTcaProcProcCPU1hInvokedAvg

Severity: variable

Explanation: This fault is caused by "invoked average value" statistical property crossing threshold level.

Recommended Action: Check the values of "invoked" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117019: fltTcaProcProcCPU1dInvokedAvg

Severity: variable

Explanation: This fault is caused by "invoked average value" statistical property crossing threshold level.

Recommended Action: Check the values of "invoked" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117020: fltTcaProcProcCPU1wInvokedAvg

Severity: variable

Explanation: This fault is caused by "invoked average value" statistical property crossing threshold level.

Recommended Action: Check the values of "invoked" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117021: fltTcaProcProcCPU1moInvokedAvg

Severity: variable

Explanation: This fault is caused by "invoked average value" statistical property crossing threshold level.

Recommended Action: Check the values of "invoked" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117022: fltTcaProcProcCPU1qtrInvokedAvg

Severity: variable

Explanation: This fault is caused by "invoked average value" statistical property crossing threshold level.

Recommended Action: Check the values of "invoked" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117023: fltTcaProcProcCPU1yearInvokedAvg

Severity: variable

Explanation: This fault is caused by "invoked average value" statistical property crossing threshold level.

Recommended Action: Check the values of "invoked" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117056: fltTcaProcProcCPU5minInvokedTr

Severity: variable

Explanation: This fault is caused by "invoked trend" statistical property crossing threshold level.

Recommended Action: Check the values of "invoked" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117057: fltTcaProcProcCPU15minInvokedTr

Severity: variable

Explanation: This fault is caused by "invoked trend" statistical property crossing threshold level.

Recommended Action: Check the values of "invoked" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117058: fltTcaProcProcCPU1hInvokedTr

Severity: variable

Explanation: This fault is caused by "invoked trend" statistical property crossing threshold level.

Recommended Action: Check the values of "invoked" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117059: fltTcaProcProcCPU1dInvokedTr

Severity: variable

Explanation: This fault is caused by "invoked trend" statistical property crossing threshold level.

Recommended Action: Check the values of "invoked" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117060: fltTcaProcProcCPU1wInvokedTr

Severity: variable

Explanation: This fault is caused by "invoked trend" statistical property crossing threshold level.

Recommended Action: Check the values of "invoked" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117061: fltTcaProcProcCPU1moInvokedTr

Severity: variable

Explanation: This fault is caused by "invoked trend" statistical property crossing threshold level.

Recommended Action: Check the values of "invoked" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117062: fltTcaProcProcCPU1qtrInvokedTr

Severity: variable

Explanation: This fault is caused by "invoked trend" statistical property crossing threshold level.

Recommended Action: Check the values of "invoked" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117063: fltTcaProcProcCPU1yearInvokedTr

Severity: variable

Explanation: This fault is caused by "invoked trend" statistical property crossing threshold level.

Recommended Action: Check the values of "invoked" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117160: fltTcaProcProcCPU5minMaxExecLast

Severity: variable

Explanation: This fault is caused by "maximum execution time current value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117161: fltTcaProcProcCPU15minMaxExecLast

Severity: variable

Explanation: This fault is caused by "maximum execution time current value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117162: fltTcaProcProcCPU1hMaxExecLast

Severity: variable

Explanation: This fault is caused by "maximum execution time current value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117163: fltTcaProcProcCPU1dMaxExecLast

Severity: variable

Explanation: This fault is caused by "maximum execution time current value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117164: fltTcaProcProcCPU1wMaxExecLast

Severity: variable

Explanation: This fault is caused by "maximum execution time current value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117165: fltTcaProcProcCPU1moMaxExecLast

Severity: variable

Explanation: This fault is caused by "maximum execution time current value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117166: fltTcaProcProcCPU1qtrMaxExecLast

Severity: variable

Explanation: This fault is caused by "maximum execution time current value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117167: fltTcaProcProcCPU1yearMaxExecLast

Severity: variable

Explanation: This fault is caused by "maximum execution time current value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117168: fltTcaProcProcCPU5minMaxExecMin

Severity: variable

Explanation: This fault is caused by "maximum execution time minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117169: fltTcaProcProcCPU15minMaxExecMin

Severity: variable

Explanation: This fault is caused by "maximum execution time minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117170: fltTcaProcProcCPU1hMaxExecMin

Severity: variable

Explanation: This fault is caused by "maximum execution time minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117171: fltTcaProcProcCPU1dMaxExecMin

Severity: variable

Explanation: This fault is caused by "maximum execution time minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117172: fltTcaProcProcCPU1wMaxExecMin

Severity: variable

Explanation: This fault is caused by "maximum execution time minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117173: fltTcaProcProcCPU1moMaxExecMin

Severity: variable

Explanation: This fault is caused by "maximum execution time minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117174: fltTcaProcProcCPU1qtrMaxExecMin

Severity: variable

Explanation: This fault is caused by "maximum execution time minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117175: fltTcaProcProcCPU1yearMaxExecMin

Severity: variable

Explanation: This fault is caused by "maximum execution time minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117176: fltTcaProcProcCPU5minMaxExecMax

Severity: variable

Explanation: This fault is caused by "maximum execution time maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117177: fltTcaProcProcCPU15minMaxExecMax

Severity: variable

Explanation: This fault is caused by "maximum execution time maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117178: fltTcaProcProcCPU1hMaxExecMax

Severity: variable

Explanation: This fault is caused by "maximum execution time maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117179: fltTcaProcProcCPU1dMaxExecMax

Severity: variable

Explanation: This fault is caused by "maximum execution time maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117180: fltTcaProcProcCPU1wMaxExecMax

Severity: variable

Explanation: This fault is caused by "maximum execution time maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117181: fltTcaProcProcCPU1moMaxExecMax

Severity: variable

Explanation: This fault is caused by "maximum execution time maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117182: fltTcaProcProcCPU1qtrMaxExecMax

Severity: variable

Explanation: This fault is caused by "maximum execution time maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117183: fltTcaProcProcCPU1yearMaxExecMax

Severity: variable

Explanation: This fault is caused by "maximum execution time maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117184: fltTcaProcProcCPU5minMaxExecAvg

Severity: variable

Explanation: This fault is caused by "maximum execution time average value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117185: fltTcaProcProcCPU15minMaxExecAvg

Severity: variable

Explanation: This fault is caused by "maximum execution time average value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117186: fltTcaProcProcCPU1hMaxExecAvg

Severity: variable

Explanation: This fault is caused by "maximum execution time average value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117187: fltTcaProcProcCPU1dMaxExecAvg

Severity: variable

Explanation: This fault is caused by "maximum execution time average value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117188: fltTcaProcProcCPU1wMaxExecAvg

Severity: variable

Explanation: This fault is caused by "maximum execution time average value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117189: fltTcaProcProcCPU1moMaxExecAvg

Severity: variable

Explanation: This fault is caused by "maximum execution time average value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117190: fltTcaProcProcCPU1qtrMaxExecAvg

Severity: variable

Explanation: This fault is caused by "maximum execution time average value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117191: fltTcaProcProcCPU1yearMaxExecAvg

Severity: variable

Explanation: This fault is caused by "maximum execution time average value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117224: fltTcaProcProcCPU5minMaxExecTr

Severity: variable

Explanation: This fault is caused by "maximum execution time trend" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117225: fltTcaProcProcCPU15minMaxExecTr

Severity: variable

Explanation: This fault is caused by "maximum execution time trend" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117226: fltTcaProcProcCPU1hMaxExecTr

Severity: variable

Explanation: This fault is caused by "maximum execution time trend" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117227: fltTcaProcProcCPU1dMaxExecTr

Severity: variable

Explanation: This fault is caused by "maximum execution time trend" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117228: fltTcaProcProcCPU1wMaxExecTr

Severity: variable

Explanation: This fault is caused by "maximum execution time trend" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117229: fltTcaProcProcCPU1moMaxExecTr

Severity: variable

Explanation: This fault is caused by "maximum execution time trend" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117230: fltTcaProcProcCPU1qtrMaxExecTr

Severity: variable

Explanation: This fault is caused by "maximum execution time trend" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117231: fltTcaProcProcCPU1yearMaxExecTr

Severity: variable

Explanation: This fault is caused by "maximum execution time trend" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117328: fltTcaProcProcCPU5minTotalExecLast

Severity: variable

Explanation: This fault is caused by "total execution time current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117329: fltTcaProcProcCPU15minTotalExecLast

Severity: variable

Explanation: This fault is caused by "total execution time current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117330: fltTcaProcProcCPU1hTotalExecLast

Severity: variable

Explanation: This fault is caused by "total execution time current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117331: fltTcaProcProcCPU1dTotalExecLast

Severity: variable

Explanation: This fault is caused by "total execution time current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117332: fltTcaProcProcCPU1wTotalExecLast

Severity: variable

Explanation: This fault is caused by "total execution time current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117333: fltTcaProcProcCPU1moTotalExecLast

Severity: variable

Explanation: This fault is caused by "total execution time current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117334: fltTcaProcProcCPU1qtrTotalExecLast

Severity: variable

Explanation: This fault is caused by "total execution time current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117335: fltTcaProcProcCPU1yearTotalExecLast

Severity: variable

Explanation: This fault is caused by "total execution time current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117336: fltTcaProcProcCPU5minTotalExecMin

Severity: variable

Explanation: This fault is caused by "total execution time minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117337: fltTcaProcProcCPU15minTotalExecMin

Severity: variable

Explanation: This fault is caused by "total execution time minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117338: fltTcaProcProcCPU1hTotalExecMin

Severity: variable

Explanation: This fault is caused by "total execution time minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117339: fltTcaProcProcCPU1dTotalExecMin

Severity: variable

Explanation: This fault is caused by "total execution time minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117340: fltTcaProcProcCPU1wTotalExecMin

Severity: variable

Explanation: This fault is caused by "total execution time minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117341: fltTcaProcProcCPU1moTotalExecMin

Severity: variable

Explanation: This fault is caused by "total execution time minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117342: fltTcaProcProcCPU1qtrTotalExecMin

Severity: variable

Explanation: This fault is caused by "total execution time minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117343: fltTcaProcProcCPU1yearTotalExecMin

Severity: variable

Explanation: This fault is caused by "total execution time minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117344: fltTcaProcProcCPU5minTotalExecMax

Severity: variable

Explanation: This fault is caused by "total execution time maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117345: fltTcaProcProcCPU15minTotalExecMax

Severity: variable

Explanation: This fault is caused by "total execution time maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117346: fltTcaProcProcCPU1hTotalExecMax

Severity: variable

Explanation: This fault is caused by "total execution time maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117347: fltTcaProcProcCPU1dTotalExecMax

Severity: variable

Explanation: This fault is caused by "total execution time maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117348: fltTcaProcProcCPU1wTotalExecMax

Severity: variable

Explanation: This fault is caused by "total execution time maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117349: fltTcaProcProcCPU1moTotalExecMax

Severity: variable

Explanation: This fault is caused by "total execution time maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117350: fltTcaProcProcCPU1qtrTotalExecMax

Severity: variable

Explanation: This fault is caused by "total execution time maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117351: fltTcaProcProcCPU1yearTotalExecMax

Severity: variable

Explanation: This fault is caused by "total execution time maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117352: fltTcaProcProcCPU5minTotalExecAvg

Severity: variable

Explanation: This fault is caused by "total execution time average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117353: fltTcaProcProcCPU15minTotalExecAvg

Severity: variable

Explanation: This fault is caused by "total execution time average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117354: fltTcaProcProcCPU1hTotalExecAvg

Severity: variable

Explanation: This fault is caused by "total execution time average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117355: fltTcaProcProcCPU1dTotalExecAvg

Severity: variable

Explanation: This fault is caused by "total execution time average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117356: fltTcaProcProcCPU1wTotalExecAvg

Severity: variable

Explanation: This fault is caused by "total execution time average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117357: fltTcaProcProcCPU1moTotalExecAvg

Severity: variable

Explanation: This fault is caused by "total execution time average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117358: fltTcaProcProcCPU1qtrTotalExecAvg

Severity: variable

Explanation: This fault is caused by "total execution time average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117359: fltTcaProcProcCPU1yearTotalExecAvg

Severity: variable

Explanation: This fault is caused by "total execution time average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117392: fltTcaProcProcCPU5minTotalExecTr

Severity: variable

Explanation: This fault is caused by "total execution time trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117393: fltTcaProcProcCPU15minTotalExecTr

Severity: variable

Explanation: This fault is caused by "total execution time trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117394: fltTcaProcProcCPU1hTotalExecTr

Severity: variable

Explanation: This fault is caused by "total execution time trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117395: fltTcaProcProcCPU1dTotalExecTr

Severity: variable

Explanation: This fault is caused by "total execution time trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117396: fltTcaProcProcCPU1wTotalExecTr

Severity: variable

Explanation: This fault is caused by "total execution time trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117397: fltTcaProcProcCPU1moTotalExecTr

Severity: variable

Explanation: This fault is caused by "total execution time trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117398: fltTcaProcProcCPU1qtrTotalExecTr

Severity: variable

Explanation: This fault is caused by "total execution time trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117399: fltTcaProcProcCPU1yearTotalExecTr

Severity: variable

Explanation: This fault is caused by "total execution time trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total execution time" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117496: fltTcaProcProcCPU5minUsageLast

Severity: variable

Explanation: This fault is caused by "CPU usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117497: fltTcaProcProcCPU15minUsageLast

Severity: variable

Explanation: This fault is caused by "CPU usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117498: fltTcaProcProcCPU1hUsageLast

Severity: variable

Explanation: This fault is caused by "CPU usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117499: fltTcaProcProcCPU1dUsageLast

Severity: variable

Explanation: This fault is caused by "CPU usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117500: fltTcaProcProcCPU1wUsageLast

Severity: variable

Explanation: This fault is caused by "CPU usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117501: fltTcaProcProcCPU1moUsageLast

Severity: variable

Explanation: This fault is caused by "CPU usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117502: fltTcaProcProcCPU1qtrUsageLast

Severity: variable

Explanation: This fault is caused by "CPU usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117503: fltTcaProcProcCPU1yearUsageLast

Severity: variable

Explanation: This fault is caused by "CPU usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117504: fltTcaProcProcCPU5minUsageMin

Severity: variable

Explanation: This fault is caused by "CPU usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117505: fltTcaProcProcCPU15minUsageMin

Severity: variable

Explanation: This fault is caused by "CPU usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117506: fltTcaProcProcCPU1hUsageMin

Severity: variable

Explanation: This fault is caused by "CPU usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117507: fltTcaProcProcCPU1dUsageMin

Severity: variable

Explanation: This fault is caused by "CPU usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117508: fltTcaProcProcCPU1wUsageMin

Severity: variable

Explanation: This fault is caused by "CPU usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117509: fltTcaProcProcCPU1moUsageMin

Severity: variable

Explanation: This fault is caused by "CPU usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117510: fltTcaProcProcCPU1qtrUsageMin

Severity: variable

Explanation: This fault is caused by "CPU usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117511: fltTcaProcProcCPU1yearUsageMin

Severity: variable

Explanation: This fault is caused by "CPU usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117512: fltTcaProcProcCPU5minUsageMax

Severity: variable

Explanation: This fault is caused by "CPU usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117513: fltTcaProcProcCPU15minUsageMax

Severity: variable

Explanation: This fault is caused by "CPU usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117514: fltTcaProcProcCPU1hUsageMax

Severity: variable

Explanation: This fault is caused by "CPU usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117515: fltTcaProcProcCPU1dUsageMax

Severity: variable

Explanation: This fault is caused by "CPU usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117516: fltTcaProcProcCPU1wUsageMax

Severity: variable

Explanation: This fault is caused by "CPU usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117517: fltTcaProcProcCPU1moUsageMax

Severity: variable

Explanation: This fault is caused by "CPU usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117518: fltTcaProcProcCPU1qtrUsageMax

Severity: variable

Explanation: This fault is caused by "CPU usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117519: fltTcaProcProcCPU1yearUsageMax

Severity: variable

Explanation: This fault is caused by "CPU usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117520: fltTcaProcProcCPU5minUsageAvg

Severity: variable

Explanation: This fault is caused by "CPU usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117521: fltTcaProcProcCPU15minUsageAvg

Severity: variable

Explanation: This fault is caused by "CPU usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117522: fltTcaProcProcCPU1hUsageAvg

Severity: variable

Explanation: This fault is caused by "CPU usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117523: fltTcaProcProcCPU1dUsageAvg

Severity: variable

Explanation: This fault is caused by "CPU usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117524: fltTcaProcProcCPU1wUsageAvg

Severity: variable

Explanation: This fault is caused by "CPU usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117525: fltTcaProcProcCPU1moUsageAvg

Severity: variable

Explanation: This fault is caused by "CPU usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117526: fltTcaProcProcCPU1qtrUsageAvg

Severity: variable

Explanation: This fault is caused by "CPU usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117527: fltTcaProcProcCPU1yearUsageAvg

Severity: variable

Explanation: This fault is caused by "CPU usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117560: fltTcaProcProcCPU5minUsageTr

Severity: variable

Explanation: This fault is caused by "CPU usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117561: fltTcaProcProcCPU15minUsageTr

Severity: variable

Explanation: This fault is caused by "CPU usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117562: fltTcaProcProcCPU1hUsageTr

Severity: variable

Explanation: This fault is caused by "CPU usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117563: fltTcaProcProcCPU1dUsageTr

Severity: variable

Explanation: This fault is caused by "CPU usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117564: fltTcaProcProcCPU1wUsageTr

Severity: variable

Explanation: This fault is caused by "CPU usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117565: fltTcaProcProcCPU1moUsageTr

Severity: variable

Explanation: This fault is caused by "CPU usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117566: fltTcaProcProcCPU1qtrUsageTr

Severity: variable

Explanation: This fault is caused by "CPU usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117567: fltTcaProcProcCPU1yearUsageTr

Severity: variable

Explanation: This fault is caused by "CPU usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117664: fltTcaProcProcMem5minAllocedLast

Severity: variable

Explanation: This fault is caused by "Allocated memory current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allocated memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117665: fltTcaProcProcMem15minAllocedLast

Severity: variable

Explanation: This fault is caused by "Allocated memory current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allocated memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117666: fltTcaProcProcMem1hAllocedLast

Severity: variable

Explanation: This fault is caused by "Allocated memory current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allocated memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117667: fltTcaProcProcMem1dAllocedLast

Severity: variable

Explanation: This fault is caused by "Allocated memory current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allocated memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117668: fltTcaProcProcMem1wAllocedLast

Severity: variable

Explanation: This fault is caused by "Allocated memory current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allocated memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117669: fltTcaProcProcMem1moAllocedLast

Severity: variable

Explanation: This fault is caused by "Allocated memory current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allocated memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117670: fltTcaProcProcMem1qtrAllocedLast

Severity: variable

Explanation: This fault is caused by "Allocated memory current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allocated memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117671: fltTcaProcProcMem1yearAllocedLast

Severity: variable

Explanation: This fault is caused by "Allocated memory current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allocated memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117672: fltTcaProcProcMem5minAllocedMin

Severity: variable

Explanation: This fault is caused by "Allocated memory minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allocated memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117673: fltTcaProcProcMem15minAllocedMin

Severity: variable

Explanation: This fault is caused by "Allocated memory minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allocated memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117674: fltTcaProcProcMem1hAllocedMin

Severity: variable

Explanation: This fault is caused by "Allocated memory minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allocated memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117675: fltTcaProcProcMem1dAllocedMin

Severity: variable

Explanation: This fault is caused by "Allocated memory minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allocated memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117676: fltTcaProcProcMem1wAllocedMin

Severity: variable

Explanation: This fault is caused by "Allocated memory minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allocated memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117677: fltTcaProcProcMem1moAllocedMin

Severity: variable

Explanation: This fault is caused by "Allocated memory minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allocated memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117678: fltTcaProcProcMem1qtrAllocedMin

Severity: variable

Explanation: This fault is caused by "Allocated memory minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allocated memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117679: fltTcaProcProcMem1yearAllocedMin

Severity: variable

Explanation: This fault is caused by "Allocated memory minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allocated memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117680: fltTcaProcProcMem5minAllocedMax

Severity: variable

Explanation: This fault is caused by "Allocated memory maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allocated memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117681: fltTcaProcProcMem15minAllocedMax

Severity: variable

Explanation: This fault is caused by "Allocated memory maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allocated memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117682: fltTcaProcProcMem1hAllocedMax

Severity: variable

Explanation: This fault is caused by "Allocated memory maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allocated memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117683: fltTcaProcProcMem1dAllocedMax

Severity: variable

Explanation: This fault is caused by "Allocated memory maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allocated memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117684: fltTcaProcProcMem1wAllocedMax

Severity: variable

Explanation: This fault is caused by "Allocated memory maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allocated memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117685: fltTcaProcProcMem1moAllocedMax

Severity: variable

Explanation: This fault is caused by "Allocated memory maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allocated memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117686: fltTcaProcProcMem1qtrAllocedMax

Severity: variable

Explanation: This fault is caused by "Allocated memory maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allocated memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117687: fltTcaProcProcMem1yearAllocedMax

Severity: variable

Explanation: This fault is caused by "Allocated memory maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allocated memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117688: fltTcaProcProcMem5minAllocedAvg

Severity: variable

Explanation: This fault is caused by "Allocated memory average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allocated memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117689: fltTcaProcProcMem15minAllocedAvg

Severity: variable

Explanation: This fault is caused by "Allocated memory average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allocated memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117690: fltTcaProcProcMem1hAllocedAvg

Severity: variable

Explanation: This fault is caused by "Allocated memory average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allocated memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117691: fltTcaProcProcMem1dAllocedAvg

Severity: variable

Explanation: This fault is caused by "Allocated memory average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allocated memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117692: fltTcaProcProcMem1wAllocedAvg

Severity: variable

Explanation: This fault is caused by "Allocated memory average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allocated memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117693: fltTcaProcProcMem1moAllocedAvg

Severity: variable

Explanation: This fault is caused by "Allocated memory average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allocated memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117694: fltTcaProcProcMem1qtrAllocedAvg

Severity: variable

Explanation: This fault is caused by "Allocated memory average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allocated memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117695: fltTcaProcProcMem1yearAllocedAvg

Severity: variable

Explanation: This fault is caused by "Allocated memory average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allocated memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117728: fltTcaProcProcMem5minAllocedTr

Severity: variable

Explanation: This fault is caused by "Allocated memory trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Allocated memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117729: fltTcaProcProcMem15minAllocedTr

Severity: variable

Explanation: This fault is caused by "Allocated memory trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Allocated memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117730: fltTcaProcProcMem1hAllocedTr

Severity: variable

Explanation: This fault is caused by "Allocated memory trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Allocated memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117731: fltTcaProcProcMem1dAllocedTr

Severity: variable

Explanation: This fault is caused by "Allocated memory trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Allocated memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117732: fltTcaProcProcMem1wAllocedTr

Severity: variable

Explanation: This fault is caused by "Allocated memory trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Allocated memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117733: fltTcaProcProcMem1moAllocedTr

Severity: variable

Explanation: This fault is caused by "Allocated memory trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Allocated memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117734: fltTcaProcProcMem1qtrAllocedTr

Severity: variable

Explanation: This fault is caused by "Allocated memory trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Allocated memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117735: fltTcaProcProcMem1yearAllocedTr

Severity: variable

Explanation: This fault is caused by "Allocated memory trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Allocated memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117832: fltTcaProcProcMem5minUsedLast

Severity: variable

Explanation: This fault is caused by "Used memory current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117833: fltTcaProcProcMem15minUsedLast

Severity: variable

Explanation: This fault is caused by "Used memory current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117834: fltTcaProcProcMem1hUsedLast

Severity: variable

Explanation: This fault is caused by "Used memory current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117835: fltTcaProcProcMem1dUsedLast

Severity: variable

Explanation: This fault is caused by "Used memory current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117836: fltTcaProcProcMem1wUsedLast

Severity: variable

Explanation: This fault is caused by "Used memory current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117837: fltTcaProcProcMem1moUsedLast

Severity: variable

Explanation: This fault is caused by "Used memory current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117838: fltTcaProcProcMem1qtrUsedLast

Severity: variable

Explanation: This fault is caused by "Used memory current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117839: fltTcaProcProcMem1yearUsedLast

Severity: variable

Explanation: This fault is caused by "Used memory current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117840: fltTcaProcProcMem5minUsedMin

Severity: variable

Explanation: This fault is caused by "Used memory minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117841: fltTcaProcProcMem15minUsedMin

Severity: variable

Explanation: This fault is caused by "Used memory minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117842: fltTcaProcProcMem1hUsedMin

Severity: variable

Explanation: This fault is caused by "Used memory minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117843: fltTcaProcProcMem1dUsedMin

Severity: variable

Explanation: This fault is caused by "Used memory minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117844: fltTcaProcProcMem1wUsedMin

Severity: variable

Explanation: This fault is caused by "Used memory minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117845: fltTcaProcProcMem1moUsedMin

Severity: variable

Explanation: This fault is caused by "Used memory minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117846: fltTcaProcProcMem1qtrUsedMin

Severity: variable

Explanation: This fault is caused by "Used memory minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117847: fltTcaProcProcMem1yearUsedMin

Severity: variable

Explanation: This fault is caused by "Used memory minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117848: fltTcaProcProcMem5minUsedMax

Severity: variable

Explanation: This fault is caused by "Used memory maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117849: fltTcaProcProcMem15minUsedMax

Severity: variable

Explanation: This fault is caused by "Used memory maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117850: fltTcaProcProcMem1hUsedMax

Severity: variable

Explanation: This fault is caused by "Used memory maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117851: fltTcaProcProcMem1dUsedMax

Severity: variable

Explanation: This fault is caused by "Used memory maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117852: fltTcaProcProcMem1wUsedMax

Severity: variable

Explanation: This fault is caused by "Used memory maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117853: fltTcaProcProcMem1moUsedMax

Severity: variable

Explanation: This fault is caused by "Used memory maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117854: fltTcaProcProcMem1qtrUsedMax

Severity: variable

Explanation: This fault is caused by "Used memory maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117855: fltTcaProcProcMem1yearUsedMax

Severity: variable

Explanation: This fault is caused by "Used memory maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117856: fltTcaProcProcMem5minUsedAvg

Severity: variable

Explanation: This fault is caused by "Used memory average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117857: fltTcaProcProcMem15minUsedAvg

Severity: variable

Explanation: This fault is caused by "Used memory average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117858: fltTcaProcProcMem1hUsedAvg

Severity: variable

Explanation: This fault is caused by "Used memory average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117859: fltTcaProcProcMem1dUsedAvg

Severity: variable

Explanation: This fault is caused by "Used memory average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117860: fltTcaProcProcMem1wUsedAvg

Severity: variable

Explanation: This fault is caused by "Used memory average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117861: fltTcaProcProcMem1moUsedAvg

Severity: variable

Explanation: This fault is caused by "Used memory average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117862: fltTcaProcProcMem1qtrUsedAvg

Severity: variable

Explanation: This fault is caused by "Used memory average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117863: fltTcaProcProcMem1yearUsedAvg

Severity: variable

Explanation: This fault is caused by "Used memory average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117896: fltTcaProcProcMem5minUsedTr

Severity: variable

Explanation: This fault is caused by "Used memory trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117897: fltTcaProcProcMem15minUsedTr

Severity: variable

Explanation: This fault is caused by "Used memory trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117898: fltTcaProcProcMem1hUsedTr

Severity: variable

Explanation: This fault is caused by "Used memory trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117899: fltTcaProcProcMem1dUsedTr

Severity: variable

Explanation: This fault is caused by "Used memory trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117900: fltTcaProcProcMem1wUsedTr

Severity: variable

Explanation: This fault is caused by "Used memory trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117901: fltTcaProcProcMem1moUsedTr

Severity: variable

Explanation: This fault is caused by "Used memory trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117902: fltTcaProcProcMem1qtrUsedTr

Severity: variable

Explanation: This fault is caused by "Used memory trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F117903: fltTcaProcProcMem1yearUsedTr

Severity: variable

Explanation: This fault is caused by "Used memory trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118000: fltTcaProcSysCPU5minIdleLast

Severity: variable

Explanation: This fault is caused by "idle CPU current value" statistical property crossing threshold level.

Recommended Action: Check the values of "idle CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118001: fltTcaProcSysCPU15minIdleLast

Severity: variable

Explanation: This fault is caused by "idle CPU current value" statistical property crossing threshold level.

Recommended Action: Check the values of "idle CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118002: fltTcaProcSysCPU1hIdleLast

Severity: variable

Explanation: This fault is caused by "idle CPU current value" statistical property crossing threshold level.

Recommended Action: Check the values of "idle CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118003: fltTcaProcSysCPU1dIdleLast

Severity: variable

Explanation: This fault is caused by "idle CPU current value" statistical property crossing threshold level.

Recommended Action: Check the values of "idle CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118004: fltTcaProcSysCPU1wIdleLast

Severity: variable

Explanation: This fault is caused by "idle CPU current value" statistical property crossing threshold level.

Recommended Action: Check the values of "idle CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118005: fltTcaProcSysCPU1moIdleLast

Severity: variable

Explanation: This fault is caused by "idle CPU current value" statistical property crossing threshold level.

Recommended Action: Check the values of "idle CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118006: fltTcaProcSysCPU1qtrIdleLast

Severity: variable

Explanation: This fault is caused by "idle CPU current value" statistical property crossing threshold level.

Recommended Action: Check the values of "idle CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118007: fltTcaProcSysCPU1yearIdleLast

Severity: variable

Explanation: This fault is caused by "idle CPU current value" statistical property crossing threshold level.

Recommended Action: Check the values of "idle CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118008: fltTcaProcSysCPU5minIdleMin

Severity: variable

Explanation: This fault is caused by "idle CPU minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "idle CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118009: fltTcaProcSysCPU15minIdleMin

Severity: variable

Explanation: This fault is caused by "idle CPU minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "idle CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118010: fltTcaProcSysCPU1hIdleMin

Severity: variable

Explanation: This fault is caused by "idle CPU minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "idle CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118011: fltTcaProcSysCPU1dIdleMin

Severity: variable

Explanation: This fault is caused by "idle CPU minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "idle CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118012: fltTcaProcSysCPU1wIdleMin

Severity: variable

Explanation: This fault is caused by "idle CPU minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "idle CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118013: fltTcaProcSysCPU1moIdleMin

Severity: variable

Explanation: This fault is caused by "idle CPU minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "idle CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118014: fltTcaProcSysCPU1qtrIdleMin

Severity: variable

Explanation: This fault is caused by "idle CPU minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "idle CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118015: fltTcaProcSysCPU1yearIdleMin

Severity: variable

Explanation: This fault is caused by "idle CPU minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "idle CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118016: fltTcaProcSysCPU5minIdleMax

Severity: variable

Explanation: This fault is caused by "idle CPU maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "idle CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118017: fltTcaProcSysCPU15minIdleMax

Severity: variable

Explanation: This fault is caused by "idle CPU maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "idle CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118018: fltTcaProcSysCPU1hIdleMax

Severity: variable

Explanation: This fault is caused by "idle CPU maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "idle CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118019: fltTcaProcSysCPU1dIdleMax

Severity: variable

Explanation: This fault is caused by "idle CPU maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "idle CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118020: fltTcaProcSysCPU1wIdleMax

Severity: variable

Explanation: This fault is caused by "idle CPU maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "idle CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118021: fltTcaProcSysCPU1moIdleMax

Severity: variable

Explanation: This fault is caused by "idle CPU maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "idle CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118022: fltTcaProcSysCPU1qtrIdleMax

Severity: variable

Explanation: This fault is caused by "idle CPU maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "idle CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118023: fltTcaProcSysCPU1yearIdleMax

Severity: variable

Explanation: This fault is caused by "idle CPU maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "idle CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118024: fltTcaProcSysCPU5minIdleAvg

Severity: variable

Explanation: This fault is caused by "idle CPU average value" statistical property crossing threshold level.

Recommended Action: Check the values of "idle CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118025: fltTcaProcSysCPU15minIdleAvg

Severity: variable

Explanation: This fault is caused by "idle CPU average value" statistical property crossing threshold level.

Recommended Action: Check the values of "idle CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118026: fltTcaProcSysCPU1hIdleAvg

Severity: variable

Explanation: This fault is caused by "idle CPU average value" statistical property crossing threshold level.

Recommended Action: Check the values of "idle CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118027: fltTcaProcSysCPU1dIdleAvg

Severity: variable

Explanation: This fault is caused by "idle CPU average value" statistical property crossing threshold level.

Recommended Action: Check the values of "idle CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118028: fltTcaProcSysCPU1wIdleAvg

Severity: variable

Explanation: This fault is caused by "idle CPU average value" statistical property crossing threshold level.

Recommended Action: Check the values of "idle CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118029: fltTcaProcSysCPU1moIdleAvg

Severity: variable

Explanation: This fault is caused by "idle CPU average value" statistical property crossing threshold level.

Recommended Action: Check the values of "idle CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118030: fltTcaProcSysCPU1qtrIdleAvg

Severity: variable

Explanation: This fault is caused by "idle CPU average value" statistical property crossing threshold level.

Recommended Action: Check the values of "idle CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118031: fltTcaProcSysCPU1yearIdleAvg

Severity: variable

Explanation: This fault is caused by "idle CPU average value" statistical property crossing threshold level.

Recommended Action: Check the values of "idle CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118064: fltTcaProcSysCPU5minIdleTr

Severity: variable

Explanation: This fault is caused by "idle CPU trend" statistical property crossing threshold level.

Recommended Action: Check the values of "idle CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118065: fltTcaProcSysCPU15minIdleTr

Severity: variable

Explanation: This fault is caused by "idle CPU trend" statistical property crossing threshold level.

Recommended Action: Check the values of "idle CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118066: fltTcaProcSysCPU1hIdleTr

Severity: variable

Explanation: This fault is caused by "idle CPU trend" statistical property crossing threshold level.

Recommended Action: Check the values of "idle CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118067: fltTcaProcSysCPU1dIdleTr

Severity: variable

Explanation: This fault is caused by "idle CPU trend" statistical property crossing threshold level.

Recommended Action: Check the values of "idle CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118068: fltTcaProcSysCPU1wIdleTr

Severity: variable

Explanation: This fault is caused by "idle CPU trend" statistical property crossing threshold level.

Recommended Action: Check the values of "idle CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118069: fltTcaProcSysCPU1moIdleTr

Severity: variable

Explanation: This fault is caused by "idle CPU trend" statistical property crossing threshold level.

Recommended Action: Check the values of "idle CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118070: fltTcaProcSysCPU1qtrIdleTr

Severity: variable

Explanation: This fault is caused by "idle CPU trend" statistical property crossing threshold level.

Recommended Action: Check the values of "idle CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118071: fltTcaProcSysCPU1yearIdleTr

Severity: variable

Explanation: This fault is caused by "idle CPU trend" statistical property crossing threshold level.

Recommended Action: Check the values of "idle CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118168: fltTcaProcSysCPU5minKernelLast

Severity: variable

Explanation: This fault is caused by "kernel CPU current value" statistical property crossing threshold level.

Recommended Action: Check the values of "kernel CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118169: fltTcaProcSysCPU15minKernelLast

Severity: variable

Explanation: This fault is caused by "kernel CPU current value" statistical property crossing threshold level.

Recommended Action: Check the values of "kernel CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118170: fltTcaProcSysCPU1hKernelLast

Severity: variable

Explanation: This fault is caused by "kernel CPU current value" statistical property crossing threshold level.

Recommended Action: Check the values of "kernel CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118171: fltTcaProcSysCPU1dKernelLast

Severity: variable

Explanation: This fault is caused by "kernel CPU current value" statistical property crossing threshold level.

Recommended Action: Check the values of "kernel CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118172: fltTcaProcSysCPU1wKernelLast

Severity: variable

Explanation: This fault is caused by "kernel CPU current value" statistical property crossing threshold level.

Recommended Action: Check the values of "kernel CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118173: fltTcaProcSysCPU1moKernelLast

Severity: variable

Explanation: This fault is caused by "kernel CPU current value" statistical property crossing threshold level.

Recommended Action: Check the values of "kernel CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118174: fltTcaProcSysCPU1qtrKernelLast

Severity: variable

Explanation: This fault is caused by "kernel CPU current value" statistical property crossing threshold level.

Recommended Action: Check the values of "kernel CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118175: fltTcaProcSysCPU1yearKernelLast

Severity: variable

Explanation: This fault is caused by "kernel CPU current value" statistical property crossing threshold level.

Recommended Action: Check the values of "kernel CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118176: fltTcaProcSysCPU5minKernelMin

Severity: variable

Explanation: This fault is caused by "kernel CPU minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "kernel CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118177: fltTcaProcSysCPU15minKernelMin

Severity: variable

Explanation: This fault is caused by "kernel CPU minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "kernel CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118178: fltTcaProcSysCPU1hKernelMin

Severity: variable

Explanation: This fault is caused by "kernel CPU minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "kernel CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118179: fltTcaProcSysCPU1dKernelMin

Severity: variable

Explanation: This fault is caused by "kernel CPU minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "kernel CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118180: fltTcaProcSysCPU1wKernelMin

Severity: variable

Explanation: This fault is caused by "kernel CPU minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "kernel CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118181: fltTcaProcSysCPU1moKernelMin

Severity: variable

Explanation: This fault is caused by "kernel CPU minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "kernel CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118182: fltTcaProcSysCPU1qtrKernelMin

Severity: variable

Explanation: This fault is caused by "kernel CPU minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "kernel CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118183: fltTcaProcSysCPU1yearKernelMin

Severity: variable

Explanation: This fault is caused by "kernel CPU minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "kernel CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118184: fltTcaProcSysCPU5minKernelMax

Severity: variable

Explanation: This fault is caused by "kernel CPU maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "kernel CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118185: fltTcaProcSysCPU15minKernelMax

Severity: variable

Explanation: This fault is caused by "kernel CPU maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "kernel CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118186: fltTcaProcSysCPU1hKernelMax

Severity: variable

Explanation: This fault is caused by "kernel CPU maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "kernel CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118187: fltTcaProcSysCPU1dKernelMax

Severity: variable

Explanation: This fault is caused by "kernel CPU maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "kernel CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118188: fltTcaProcSysCPU1wKernelMax

Severity: variable

Explanation: This fault is caused by "kernel CPU maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "kernel CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118189: fltTcaProcSysCPU1moKernelMax

Severity: variable

Explanation: This fault is caused by "kernel CPU maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "kernel CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118190: fltTcaProcSysCPU1qtrKernelMax

Severity: variable

Explanation: This fault is caused by "kernel CPU maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "kernel CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118191: fltTcaProcSysCPU1yearKernelMax

Severity: variable

Explanation: This fault is caused by "kernel CPU maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "kernel CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118192: fltTcaProcSysCPU5minKernelAvg

Severity: variable

Explanation: This fault is caused by "kernel CPU average value" statistical property crossing threshold level.

Recommended Action: Check the values of "kernel CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118193: fltTcaProcSysCPU15minKernelAvg

Severity: variable

Explanation: This fault is caused by "kernel CPU average value" statistical property crossing threshold level.

Recommended Action: Check the values of "kernel CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118194: fltTcaProcSysCPU1hKernelAvg

Severity: variable

Explanation: This fault is caused by "kernel CPU average value" statistical property crossing threshold level.

Recommended Action: Check the values of "kernel CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118195: fltTcaProcSysCPU1dKernelAvg

Severity: variable

Explanation: This fault is caused by "kernel CPU average value" statistical property crossing threshold level.

Recommended Action: Check the values of "kernel CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118196: fltTcaProcSysCPU1wKernelAvg

Severity: variable

Explanation: This fault is caused by "kernel CPU average value" statistical property crossing threshold level.

Recommended Action: Check the values of "kernel CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118197: fltTcaProcSysCPU1moKernelAvg

Severity: variable

Explanation: This fault is caused by "kernel CPU average value" statistical property crossing threshold level.

Recommended Action: Check the values of "kernel CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118198: fltTcaProcSysCPU1qtrKernelAvg

Severity: variable

Explanation: This fault is caused by "kernel CPU average value" statistical property crossing threshold level.

Recommended Action: Check the values of "kernel CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118199: fltTcaProcSysCPU1yearKernelAvg

Severity: variable

Explanation: This fault is caused by "kernel CPU average value" statistical property crossing threshold level.

Recommended Action: Check the values of "kernel CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1182: fltL2DomVlanmgrCfgCtrl

Severity: warning

Explanation: This fault is caused by a hardware programming failure

Recommended Action: The system will periodically retry to program the hardware. If the failure is due to lack of hardware resources, free up resources by removing or simplifying existing configuration. One of the reasons for lack of hardware resources is exhaustion of VLANs in ToR. These hardware resources can be examined by looking at capacity dashboard under OPERATIONS tab. Please check entry against the number of VLANs in output of command show vlan summary issued at node where fault is generated to check whether it exceeds above advertised node capacity.

F118232: fltTcaProcSysCPU5minKernelTr

Severity: variable

Explanation: This fault is caused by "kernel CPU trend" statistical property crossing threshold level.

Recommended Action: Check the values of "kernel CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118233: fltTcaProcSysCPU15minKernelTr

Severity: variable

Explanation: This fault is caused by "kernel CPU trend" statistical property crossing threshold level.

Recommended Action: Check the values of "kernel CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118234: fltTcaProcSysCPU1hKernelTr

Severity: variable

Explanation: This fault is caused by "kernel CPU trend" statistical property crossing threshold level.

Recommended Action: Check the values of "kernel CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118235: fltTcaProcSysCPU1dKernelTr

Severity: variable

Explanation: This fault is caused by "kernel CPU trend" statistical property crossing threshold level.

Recommended Action: Check the values of "kernel CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118236: fltTcaProcSysCPU1wKernelTr

Severity: variable

Explanation: This fault is caused by "kernel CPU trend" statistical property crossing threshold level.

Recommended Action: Check the values of "kernel CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118237: fltTcaProcSysCPU1moKernelTr

Severity: variable

Explanation: This fault is caused by "kernel CPU trend" statistical property crossing threshold level.

Recommended Action: Check the values of "kernel CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118238: fltTcaProcSysCPU1qtrKernelTr

Severity: variable

Explanation: This fault is caused by "kernel CPU trend" statistical property crossing threshold level.

Recommended Action: Check the values of "kernel CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118239: fltTcaProcSysCPU1yearKernelTr

Severity: variable

Explanation: This fault is caused by "kernel CPU trend" statistical property crossing threshold level.

Recommended Action: Check the values of "kernel CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1183: fltL3DomL3vmCfgCtrl

Severity: warning

Explanation: This fault is caused by a hardware programming failure

Recommended Action: The system will periodically retry to program the hardware. If the failure is due to lack of hardware resources, free up resources by removing or simplifying existing configuration. One of the reasons for lack of hardware resources is exhaustion of VLANs in ToR. These hardware resources can be examined by looking at capacity dashboard under OPERATIONS tab. Please check entry against the number of VLANs in output of command show vlan summary issued at node where fault is generated to check whether it exceeds above advertised node capacity.

F118336: fltTcaProcSysCPU5minUserLast

Severity: variable

Explanation: This fault is caused by "user CPU current value" statistical property crossing threshold level.

Recommended Action: Check the values of "user CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118337: fltTcaProcSysCPU15minUserLast

Severity: variable

Explanation: This fault is caused by "user CPU current value" statistical property crossing threshold level.

Recommended Action: Check the values of "user CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118338: fltTcaProcSysCPU1hUserLast

Severity: variable

Explanation: This fault is caused by "user CPU current value" statistical property crossing threshold level.

Recommended Action: Check the values of "user CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118339: fltTcaProcSysCPU1dUserLast

Severity: variable

Explanation: This fault is caused by "user CPU current value" statistical property crossing threshold level.

Recommended Action: Check the values of "user CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118340: fltTcaProcSysCPU1wUserLast

Severity: variable

Explanation: This fault is caused by "user CPU current value" statistical property crossing threshold level.

Recommended Action: Check the values of "user CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118341: fltTcaProcSysCPU1moUserLast

Severity: variable

Explanation: This fault is caused by "user CPU current value" statistical property crossing threshold level.

Recommended Action: Check the values of "user CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118342: fltTcaProcSysCPU1qtrUserLast

Severity: variable

Explanation: This fault is caused by "user CPU current value" statistical property crossing threshold level.

Recommended Action: Check the values of "user CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118343: fltTcaProcSysCPU1yearUserLast

Severity: variable

Explanation: This fault is caused by "user CPU current value" statistical property crossing threshold level.

Recommended Action: Check the values of "user CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118344: fltTcaProcSysCPU5minUserMin

Severity: variable

Explanation: This fault is caused by "user CPU minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "user CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118345: fltTcaProcSysCPU15minUserMin

Severity: variable

Explanation: This fault is caused by "user CPU minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "user CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118346: fltTcaProcSysCPU1hUserMin

Severity: variable

Explanation: This fault is caused by "user CPU minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "user CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118347: fltTcaProcSysCPU1dUserMin

Severity: variable

Explanation: This fault is caused by "user CPU minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "user CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118348: fltTcaProcSysCPU1wUserMin

Severity: variable

Explanation: This fault is caused by "user CPU minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "user CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118349: fltTcaProcSysCPU1moUserMin

Severity: variable

Explanation: This fault is caused by "user CPU minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "user CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118350: fltTcaProcSysCPU1qtrUserMin

Severity: variable

Explanation: This fault is caused by "user CPU minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "user CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118351: fltTcaProcSysCPU1yearUserMin

Severity: variable

Explanation: This fault is caused by "user CPU minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "user CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118352: fltTcaProcSysCPU5minUserMax

Severity: variable

Explanation: This fault is caused by "user CPU maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "user CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118353: fltTcaProcSysCPU15minUserMax

Severity: variable

Explanation: This fault is caused by "user CPU maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "user CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118354: fltTcaProcSysCPU1hUserMax

Severity: variable

Explanation: This fault is caused by "user CPU maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "user CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118355: fltTcaProcSysCPU1dUserMax

Severity: variable

Explanation: This fault is caused by "user CPU maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "user CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118356: fltTcaProcSysCPU1wUserMax

Severity: variable

Explanation: This fault is caused by "user CPU maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "user CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118357: fltTcaProcSysCPU1moUserMax

Severity: variable

Explanation: This fault is caused by "user CPU maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "user CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118358: fltTcaProcSysCPU1qtrUserMax

Severity: variable

Explanation: This fault is caused by "user CPU maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "user CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118359: fltTcaProcSysCPU1yearUserMax

Severity: variable

Explanation: This fault is caused by "user CPU maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "user CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118360: fltTcaProcSysCPU5minUserAvg

Severity: variable

Explanation: This fault is caused by "user CPU average value" statistical property crossing threshold level.

Recommended Action: Check the values of "user CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118361: fltTcaProcSysCPU15minUserAvg

Severity: variable

Explanation: This fault is caused by "user CPU average value" statistical property crossing threshold level.

Recommended Action: Check the values of "user CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118362: fltTcaProcSysCPU1hUserAvg

Severity: variable

Explanation: This fault is caused by "user CPU average value" statistical property crossing threshold level.

Recommended Action: Check the values of "user CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118363: fltTcaProcSysCPU1dUserAvg

Severity: variable

Explanation: This fault is caused by "user CPU average value" statistical property crossing threshold level.

Recommended Action: Check the values of "user CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118364: fltTcaProcSysCPU1wUserAvg

Severity: variable

Explanation: This fault is caused by "user CPU average value" statistical property crossing threshold level.

Recommended Action: Check the values of "user CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118365: fltTcaProcSysCPU1moUserAvg

Severity: variable

Explanation: This fault is caused by "user CPU average value" statistical property crossing threshold level.

Recommended Action: Check the values of "user CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118366: fltTcaProcSysCPU1qtrUserAvg

Severity: variable

Explanation: This fault is caused by "user CPU average value" statistical property crossing threshold level.

Recommended Action: Check the values of "user CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118367: fltTcaProcSysCPU1yearUserAvg

Severity: variable

Explanation: This fault is caused by "user CPU average value" statistical property crossing threshold level.

Recommended Action: Check the values of "user CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1184: fltVpcDomVpcCfgCtrl

Severity: warning

Explanation: This fault is caused by a hardware programming failure

Recommended Action: The system will periodically retry to program the hardware. If the failure is due to lack of hardware resources, free up resources by removing or simplifying existing configuration. One of the reasons for lack of hardware resources is exhaustion of VLANs in ToR. These hardware resources can be examined by looking at capacity dashboard under OPERATIONS tab. Please check entry against the number of VLANs in output of command show vlan summary issued at node where fault is generated to check whether it exceeds above advertised node capacity.

F118400: fltTcaProcSysCPU5minUserTr

Severity: variable

Explanation: This fault is caused by "user CPU trend" statistical property crossing threshold level.

Recommended Action: Check the values of "user CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118401: fltTcaProcSysCPU15minUserTr

Severity: variable

Explanation: This fault is caused by "user CPU trend" statistical property crossing threshold level.

Recommended Action: Check the values of "user CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118402: fltTcaProcSysCPU1hUserTr

Severity: variable

Explanation: This fault is caused by "user CPU trend" statistical property crossing threshold level.

Recommended Action: Check the values of "user CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118403: fltTcaProcSysCPU1dUserTr

Severity: variable

Explanation: This fault is caused by "user CPU trend" statistical property crossing threshold level.

Recommended Action: Check the values of "user CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118404: fltTcaProcSysCPU1wUserTr

Severity: variable

Explanation: This fault is caused by "user CPU trend" statistical property crossing threshold level.

Recommended Action: Check the values of "user CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118405: fltTcaProcSysCPU1moUserTr

Severity: variable

Explanation: This fault is caused by "user CPU trend" statistical property crossing threshold level.

Recommended Action: Check the values of "user CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118406: fltTcaProcSysCPU1qtrUserTr

Severity: variable

Explanation: This fault is caused by "user CPU trend" statistical property crossing threshold level.

Recommended Action: Check the values of "user CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118407: fltTcaProcSysCPU1yearUserTr

Severity: variable

Explanation: This fault is caused by "user CPU trend" statistical property crossing threshold level.

Recommended Action: Check the values of "user CPU" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1185: fltVpcKeepaliveVpcCfgCtrl

Severity: warning

Explanation: This fault is caused by a hardware programming failure

Recommended Action: The system will periodically retry to program the hardware. If the failure is due to lack of hardware resources, free up resources by removing or simplifying existing configuration. One of the reasons for lack of hardware resources is exhaustion of VLANs in ToR. These hardware resources can be examined by looking at capacity dashboard under OPERATIONS tab. Please check entry against the number of VLANs in output of command show vlan summary issued at node where fault is generated to check whether it exceeds above advertised node capacity.

F118504: fltTcaProcSysLoad5minLoadAverage15mLast

Severity: variable

Explanation: This fault is caused by "15 minute average load current value" statistical property crossing threshold level.

Recommended Action: Check the values of "15 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118505: fltTcaProcSysLoad15minLoadAverage15mLast

Severity: variable

Explanation: This fault is caused by "15 minute average load current value" statistical property crossing threshold level.

Recommended Action: Check the values of "15 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118506: fltTcaProcSysLoad1hLoadAverage15mLast

Severity: variable

Explanation: This fault is caused by "15 minute average load current value" statistical property crossing threshold level.

Recommended Action: Check the values of "15 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118507: fltTcaProcSysLoad1dLoadAverage15mLast

Severity: variable

Explanation: This fault is caused by "15 minute average load current value" statistical property crossing threshold level.

Recommended Action: Check the values of "15 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118508: fltTcaProcSysLoad1wLoadAverage15mLast

Severity: variable

Explanation: This fault is caused by "15 minute average load current value" statistical property crossing threshold level.

Recommended Action: Check the values of "15 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118509: fltTcaProcSysLoad1moLoadAverage15mLast

Severity: variable

Explanation: This fault is caused by "15 minute average load current value" statistical property crossing threshold level.

Recommended Action: Check the values of "15 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118510: fltTcaProcSysLoad1qtrLoadAverage15mLast

Severity: variable

Explanation: This fault is caused by "15 minute average load current value" statistical property crossing threshold level.

Recommended Action: Check the values of "15 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118511: fltTcaProcSysLoad1yearLoadAverage15mLast

Severity: variable

Explanation: This fault is caused by "15 minute average load current value" statistical property crossing threshold level.

Recommended Action: Check the values of "15 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118512: fltTcaProcSysLoad5minLoadAverage15mMin

Severity: variable

Explanation: This fault is caused by "15 minute average load minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "15 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118513: fltTcaProcSysLoad15minLoadAverage15mMin

Severity: variable

Explanation: This fault is caused by "15 minute average load minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "15 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118514: fltTcaProcSysLoad1hLoadAverage15mMin

Severity: variable

Explanation: This fault is caused by "15 minute average load minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "15 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118515: fltTcaProcSysLoad1dLoadAverage15mMin

Severity: variable

Explanation: This fault is caused by "15 minute average load minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "15 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118516: fltTcaProcSysLoad1wLoadAverage15mMin

Severity: variable

Explanation: This fault is caused by "15 minute average load minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "15 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118517: fltTcaProcSysLoad1moLoadAverage15mMin

Severity: variable

Explanation: This fault is caused by "15 minute average load minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "15 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118518: fltTcaProcSysLoad1qtrLoadAverage15mMin

Severity: variable

Explanation: This fault is caused by "15 minute average load minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "15 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118519: fltTcaProcSysLoad1yearLoadAverage15mMin

Severity: variable

Explanation: This fault is caused by "15 minute average load minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "15 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118520: fltTcaProcSysLoad5minLoadAverage15mMax

Severity: variable

Explanation: This fault is caused by "15 minute average load maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "15 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118521: fltTcaProcSysLoad15minLoadAverage15mMax

Severity: variable

Explanation: This fault is caused by "15 minute average load maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "15 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118522: fltTcaProcSysLoad1hLoadAverage15mMax

Severity: variable

Explanation: This fault is caused by "15 minute average load maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "15 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118523: fltTcaProcSysLoad1dLoadAverage15mMax

Severity: variable

Explanation: This fault is caused by "15 minute average load maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "15 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118524: fltTcaProcSysLoad1wLoadAverage15mMax

Severity: variable

Explanation: This fault is caused by "15 minute average load maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "15 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118525: fltTcaProcSysLoad1moLoadAverage15mMax

Severity: variable

Explanation: This fault is caused by "15 minute average load maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "15 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118526: fltTcaProcSysLoad1qtrLoadAverage15mMax

Severity: variable

Explanation: This fault is caused by "15 minute average load maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "15 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118527: fltTcaProcSysLoad1yearLoadAverage15mMax

Severity: variable

Explanation: This fault is caused by "15 minute average load maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "15 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118528: fltTcaProcSysLoad5minLoadAverage15mAvg

Severity: variable

Explanation: This fault is caused by "15 minute average load average value" statistical property crossing threshold level.

Recommended Action: Check the values of "15 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118529: fltTcaProcSysLoad15minLoadAverage15mAvg

Severity: variable

Explanation: This fault is caused by "15 minute average load average value" statistical property crossing threshold level.

Recommended Action: Check the values of "15 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118530: fltTcaProcSysLoad1hLoadAverage15mAvg

Severity: variable

Explanation: This fault is caused by "15 minute average load average value" statistical property crossing threshold level.

Recommended Action: Check the values of "15 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118531: fltTcaProcSysLoad1dLoadAverage15mAvg

Severity: variable

Explanation: This fault is caused by "15 minute average load average value" statistical property crossing threshold level.

Recommended Action: Check the values of "15 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118532: fltTcaProcSysLoad1wLoadAverage15mAvg

Severity: variable

Explanation: This fault is caused by "15 minute average load average value" statistical property crossing threshold level.

Recommended Action: Check the values of "15 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118533: fltTcaProcSysLoad1moLoadAverage15mAvg

Severity: variable

Explanation: This fault is caused by "15 minute average load average value" statistical property crossing threshold level.

Recommended Action: Check the values of "15 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118534: fltTcaProcSysLoad1qtrLoadAverage15mAvg

Severity: variable

Explanation: This fault is caused by "15 minute average load average value" statistical property crossing threshold level.

Recommended Action: Check the values of "15 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118535: fltTcaProcSysLoad1yearLoadAverage15mAvg

Severity: variable

Explanation: This fault is caused by "15 minute average load average value" statistical property crossing threshold level.

Recommended Action: Check the values of "15 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118568: fltTcaProcSysLoad5minLoadAverage15mTr

Severity: variable

Explanation: This fault is caused by "15 minute average load trend" statistical property crossing threshold level.

Recommended Action: Check the values of "15 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118569: fltTcaProcSysLoad15minLoadAverage15mTr

Severity: variable

Explanation: This fault is caused by "15 minute average load trend" statistical property crossing threshold level.

Recommended Action: Check the values of "15 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118570: fltTcaProcSysLoad1hLoadAverage15mTr

Severity: variable

Explanation: This fault is caused by "15 minute average load trend" statistical property crossing threshold level.

Recommended Action: Check the values of "15 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118571: fltTcaProcSysLoad1dLoadAverage15mTr

Severity: variable

Explanation: This fault is caused by "15 minute average load trend" statistical property crossing threshold level.

Recommended Action: Check the values of "15 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118572: fltTcaProcSysLoad1wLoadAverage15mTr

Severity: variable

Explanation: This fault is caused by "15 minute average load trend" statistical property crossing threshold level.

Recommended Action: Check the values of "15 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118573: fltTcaProcSysLoad1moLoadAverage15mTr

Severity: variable

Explanation: This fault is caused by "15 minute average load trend" statistical property crossing threshold level.

Recommended Action: Check the values of "15 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118574: fltTcaProcSysLoad1qtrLoadAverage15mTr

Severity: variable

Explanation: This fault is caused by "15 minute average load trend" statistical property crossing threshold level.

Recommended Action: Check the values of "15 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118575: fltTcaProcSysLoad1yearLoadAverage15mTr

Severity: variable

Explanation: This fault is caused by "15 minute average load trend" statistical property crossing threshold level.

Recommended Action: Check the values of "15 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1186: fltL1PhysIfEthpmCfgCtrl

Severity: warning

Explanation: This fault is caused by a hardware programming failure

Recommended Action: The system will periodically retry to program the hardware. If the failure is due to lack of hardware resources, free up resources by removing or simplifying existing configuration. One of the reasons for lack of hardware resources is exhaustion of VLANs in ToR. These hardware resources can be examined by looking at capacity dashboard under OPERATIONS tab. Please check entry against the number of VLANs in output of command show vlan summary issued at node where fault is generated to check whether it exceeds above advertised node capacity.

F118672: fltTcaProcSysLoad5minLoadAverage1mLast

Severity: variable

Explanation: This fault is caused by "1 minute average load current value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118673: fltTcaProcSysLoad15minLoadAverage1mLast

Severity: variable

Explanation: This fault is caused by "1 minute average load current value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118674: fltTcaProcSysLoad1hLoadAverage1mLast

Severity: variable

Explanation: This fault is caused by "1 minute average load current value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118675: fltTcaProcSysLoad1dLoadAverage1mLast

Severity: variable

Explanation: This fault is caused by "1 minute average load current value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118676: fltTcaProcSysLoad1wLoadAverage1mLast

Severity: variable

Explanation: This fault is caused by "1 minute average load current value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118677: fltTcaProcSysLoad1moLoadAverage1mLast

Severity: variable

Explanation: This fault is caused by "1 minute average load current value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118678: fltTcaProcSysLoad1qtrLoadAverage1mLast

Severity: variable

Explanation: This fault is caused by "1 minute average load current value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118679: fltTcaProcSysLoad1yearLoadAverage1mLast

Severity: variable

Explanation: This fault is caused by "1 minute average load current value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118680: fltTcaProcSysLoad5minLoadAverage1mMin

Severity: variable

Explanation: This fault is caused by "1 minute average load minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118681: fltTcaProcSysLoad15minLoadAverage1mMin

Severity: variable

Explanation: This fault is caused by "1 minute average load minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118682: fltTcaProcSysLoad1hLoadAverage1mMin

Severity: variable

Explanation: This fault is caused by "1 minute average load minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118683: fltTcaProcSysLoad1dLoadAverage1mMin

Severity: variable

Explanation: This fault is caused by "1 minute average load minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118684: fltTcaProcSysLoad1wLoadAverage1mMin

Severity: variable

Explanation: This fault is caused by "1 minute average load minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118685: fltTcaProcSysLoad1moLoadAverage1mMin

Severity: variable

Explanation: This fault is caused by "1 minute average load minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118686: fltTcaProcSysLoad1qtrLoadAverage1mMin

Severity: variable

Explanation: This fault is caused by "1 minute average load minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118687: fltTcaProcSysLoad1yearLoadAverage1mMin

Severity: variable

Explanation: This fault is caused by "1 minute average load minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118688: fltTcaProcSysLoad5minLoadAverage1mMax

Severity: variable

Explanation: This fault is caused by "1 minute average load maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118689: fltTcaProcSysLoad15minLoadAverage1mMax

Severity: variable

Explanation: This fault is caused by "1 minute average load maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118690: fltTcaProcSysLoad1hLoadAverage1mMax

Severity: variable

Explanation: This fault is caused by "1 minute average load maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118691: fltTcaProcSysLoad1dLoadAverage1mMax

Severity: variable

Explanation: This fault is caused by "1 minute average load maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118692: fltTcaProcSysLoad1wLoadAverage1mMax

Severity: variable

Explanation: This fault is caused by "1 minute average load maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118693: fltTcaProcSysLoad1moLoadAverage1mMax

Severity: variable

Explanation: This fault is caused by "1 minute average load maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118694: fltTcaProcSysLoad1qtrLoadAverage1mMax

Severity: variable

Explanation: This fault is caused by "1 minute average load maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118695: fltTcaProcSysLoad1yearLoadAverage1mMax

Severity: variable

Explanation: This fault is caused by "1 minute average load maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118696: fltTcaProcSysLoad5minLoadAverage1mAvg

Severity: variable

Explanation: This fault is caused by "1 minute average load average value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118697: fltTcaProcSysLoad15minLoadAverage1mAvg

Severity: variable

Explanation: This fault is caused by "1 minute average load average value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118698: fltTcaProcSysLoad1hLoadAverage1mAvg

Severity: variable

Explanation: This fault is caused by "1 minute average load average value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118699: fltTcaProcSysLoad1dLoadAverage1mAvg

Severity: variable

Explanation: This fault is caused by "1 minute average load average value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1187: fltPcAggrIfPcmCfgCtrl

Severity: warning

Explanation: This fault is caused by a hardware programming failure

Recommended Action: The system will periodically retry to program the hardware. If the failure is due to lack of hardware resources, free up resources by removing or simplifying existing configuration. One of the reasons for lack of hardware resources is exhaustion of VLANs in ToR. These hardware resources can be examined by looking at capacity dashboard under OPERATIONS tab. Please check entry against the number of VLANs in output of command show vlan summary issued at node where fault is generated to check whether it exceeds above advertised node capacity.

F118700: fltTcaProcSysLoad1wLoadAverage1mAvg

Severity: variable

Explanation: This fault is caused by "1 minute average load average value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118701: fltTcaProcSysLoad1moLoadAverage1mAvg

Severity: variable

Explanation: This fault is caused by "1 minute average load average value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118702: fltTcaProcSysLoad1qtrLoadAverage1mAvg

Severity: variable

Explanation: This fault is caused by "1 minute average load average value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118703: fltTcaProcSysLoad1yearLoadAverage1mAvg

Severity: variable

Explanation: This fault is caused by "1 minute average load average value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118736: fltTcaProcSysLoad5minLoadAverage1mTr

Severity: variable

Explanation: This fault is caused by "1 minute average load trend" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118737: fltTcaProcSysLoad15minLoadAverage1mTr

Severity: variable

Explanation: This fault is caused by "1 minute average load trend" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118738: fltTcaProcSysLoad1hLoadAverage1mTr

Severity: variable

Explanation: This fault is caused by "1 minute average load trend" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118739: fltTcaProcSysLoad1dLoadAverage1mTr

Severity: variable

Explanation: This fault is caused by "1 minute average load trend" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118740: fltTcaProcSysLoad1wLoadAverage1mTr

Severity: variable

Explanation: This fault is caused by "1 minute average load trend" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118741: fltTcaProcSysLoad1moLoadAverage1mTr

Severity: variable

Explanation: This fault is caused by "1 minute average load trend" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118742: fltTcaProcSysLoad1qtrLoadAverage1mTr

Severity: variable

Explanation: This fault is caused by "1 minute average load trend" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118743: fltTcaProcSysLoad1yearLoadAverage1mTr

Severity: variable

Explanation: This fault is caused by "1 minute average load trend" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1188: fltTunnelIfTmCfgCtrl

Severity: warning

Explanation: This fault is caused by a hardware programming failure

Recommended Action: The system will periodically retry to program the hardware. If the failure is due to lack of hardware resources, free up resources by removing or simplifying existing configuration. One of the reasons for lack of hardware resources is exhaustion of VLANs in ToR. These hardware resources can be examined by looking at capacity dashboard under OPERATIONS tab. Please check entry against the number of VLANs in output of command show vlan summary issued at node where fault is generated to check whether it exceeds above advertised node capacity.

F118840: fltTcaProcSysLoad5minLoadAverage5mLast

Severity: variable

Explanation: This fault is caused by "5 minute average load current value" statistical property crossing threshold level.

Recommended Action: Check the values of "5 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118841: fltTcaProcSysLoad15minLoadAverage5mLast

Severity: variable

Explanation: This fault is caused by "5 minute average load current value" statistical property crossing threshold level.

Recommended Action: Check the values of "5 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118842: fltTcaProcSysLoad1hLoadAverage5mLast

Severity: variable

Explanation: This fault is caused by "5 minute average load current value" statistical property crossing threshold level.

Recommended Action: Check the values of "5 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118843: fltTcaProcSysLoad1dLoadAverage5mLast

Severity: variable

Explanation: This fault is caused by "5 minute average load current value" statistical property crossing threshold level.

Recommended Action: Check the values of "5 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118844: fltTcaProcSysLoad1wLoadAverage5mLast

Severity: variable

Explanation: This fault is caused by "5 minute average load current value" statistical property crossing threshold level.

Recommended Action: Check the values of "5 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118845: fltTcaProcSysLoad1moLoadAverage5mLast

Severity: variable

Explanation: This fault is caused by "5 minute average load current value" statistical property crossing threshold level.

Recommended Action: Check the values of "5 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118846: fltTcaProcSysLoad1qtrLoadAverage5mLast

Severity: variable

Explanation: This fault is caused by "5 minute average load current value" statistical property crossing threshold level.

Recommended Action: Check the values of "5 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118847: fltTcaProcSysLoad1yearLoadAverage5mLast

Severity: variable

Explanation: This fault is caused by "5 minute average load current value" statistical property crossing threshold level.

Recommended Action: Check the values of "5 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118848: fltTcaProcSysLoad5minLoadAverage5mMin

Severity: variable

Explanation: This fault is caused by "5 minute average load minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "5 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118849: fltTcaProcSysLoad15minLoadAverage5mMin

Severity: variable

Explanation: This fault is caused by "5 minute average load minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "5 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118850: fltTcaProcSysLoad1hLoadAverage5mMin

Severity: variable

Explanation: This fault is caused by "5 minute average load minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "5 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118851: fltTcaProcSysLoad1dLoadAverage5mMin

Severity: variable

Explanation: This fault is caused by "5 minute average load minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "5 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118852: fltTcaProcSysLoad1wLoadAverage5mMin

Severity: variable

Explanation: This fault is caused by "5 minute average load minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "5 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118853: fltTcaProcSysLoad1moLoadAverage5mMin

Severity: variable

Explanation: This fault is caused by "5 minute average load minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "5 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118854: fltTcaProcSysLoad1qtrLoadAverage5mMin

Severity: variable

Explanation: This fault is caused by "5 minute average load minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "5 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118855: fltTcaProcSysLoad1yearLoadAverage5mMin

Severity: variable

Explanation: This fault is caused by "5 minute average load minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "5 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118856: fltTcaProcSysLoad5minLoadAverage5mMax

Severity: variable

Explanation: This fault is caused by "5 minute average load maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "5 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118857: fltTcaProcSysLoad15minLoadAverage5mMax

Severity: variable

Explanation: This fault is caused by "5 minute average load maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "5 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118858: fltTcaProcSysLoad1hLoadAverage5mMax

Severity: variable

Explanation: This fault is caused by "5 minute average load maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "5 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118859: fltTcaProcSysLoad1dLoadAverage5mMax

Severity: variable

Explanation: This fault is caused by "5 minute average load maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "5 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118860: fltTcaProcSysLoad1wLoadAverage5mMax

Severity: variable

Explanation: This fault is caused by "5 minute average load maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "5 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118861: fltTcaProcSysLoad1moLoadAverage5mMax

Severity: variable

Explanation: This fault is caused by "5 minute average load maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "5 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118862: fltTcaProcSysLoad1qtrLoadAverage5mMax

Severity: variable

Explanation: This fault is caused by "5 minute average load maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "5 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118863: fltTcaProcSysLoad1yearLoadAverage5mMax

Severity: variable

Explanation: This fault is caused by "5 minute average load maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "5 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118864: fltTcaProcSysLoad5minLoadAverage5mAvg

Severity: variable

Explanation: This fault is caused by "5 minute average load average value" statistical property crossing threshold level.

Recommended Action: Check the values of "5 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118865: fltTcaProcSysLoad15minLoadAverage5mAvg

Severity: variable

Explanation: This fault is caused by "5 minute average load average value" statistical property crossing threshold level.

Recommended Action: Check the values of "5 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118866: fltTcaProcSysLoad1hLoadAverage5mAvg

Severity: variable

Explanation: This fault is caused by "5 minute average load average value" statistical property crossing threshold level.

Recommended Action: Check the values of "5 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118867: fltTcaProcSysLoad1dLoadAverage5mAvg

Severity: variable

Explanation: This fault is caused by "5 minute average load average value" statistical property crossing threshold level.

Recommended Action: Check the values of "5 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118868: fltTcaProcSysLoad1wLoadAverage5mAvg

Severity: variable

Explanation: This fault is caused by "5 minute average load average value" statistical property crossing threshold level.

Recommended Action: Check the values of "5 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118869: fltTcaProcSysLoad1moLoadAverage5mAvg

Severity: variable

Explanation: This fault is caused by "5 minute average load average value" statistical property crossing threshold level.

Recommended Action: Check the values of "5 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118870: fltTcaProcSysLoad1qtrLoadAverage5mAvg

Severity: variable

Explanation: This fault is caused by "5 minute average load average value" statistical property crossing threshold level.

Recommended Action: Check the values of "5 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118871: fltTcaProcSysLoad1yearLoadAverage5mAvg

Severity: variable

Explanation: This fault is caused by "5 minute average load average value" statistical property crossing threshold level.

Recommended Action: Check the values of "5 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1189: fltL3EncRtdIfEthpmCfgCtrl

Severity: warning

Explanation: This fault is caused by a hardware programming failure

Recommended Action: The system will periodically retry to program the hardware. If the failure is due to lack of hardware resources, free up resources by removing or simplifying existing configuration. One of the reasons for lack of hardware resources is exhaustion of VLANs in ToR. These hardware resources can be examined by looking at capacity dashboard under OPERATIONS tab. Please check entry against the number of VLANs in output of command show vlan summary issued at node where fault is generated to check whether it exceeds above advertised node capacity.

F118904: fltTcaProcSysLoad5minLoadAverage5mTr

Severity: variable

Explanation: This fault is caused by "5 minute average load trend" statistical property crossing threshold level.

Recommended Action: Check the values of "5 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118905: fltTcaProcSysLoad15minLoadAverage5mTr

Severity: variable

Explanation: This fault is caused by "5 minute average load trend" statistical property crossing threshold level.

Recommended Action: Check the values of "5 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118906: fltTcaProcSysLoad1hLoadAverage5mTr

Severity: variable

Explanation: This fault is caused by "5 minute average load trend" statistical property crossing threshold level.

Recommended Action: Check the values of "5 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118907: fltTcaProcSysLoad1dLoadAverage5mTr

Severity: variable

Explanation: This fault is caused by "5 minute average load trend" statistical property crossing threshold level.

Recommended Action: Check the values of "5 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118908: fltTcaProcSysLoad1wLoadAverage5mTr

Severity: variable

Explanation: This fault is caused by "5 minute average load trend" statistical property crossing threshold level.

Recommended Action: Check the values of "5 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118909: fltTcaProcSysLoad1moLoadAverage5mTr

Severity: variable

Explanation: This fault is caused by "5 minute average load trend" statistical property crossing threshold level.

Recommended Action: Check the values of "5 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118910: fltTcaProcSysLoad1qtrLoadAverage5mTr

Severity: variable

Explanation: This fault is caused by "5 minute average load trend" statistical property crossing threshold level.

Recommended Action: Check the values of "5 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F118911: fltTcaProcSysLoad1yearLoadAverage5mTr

Severity: variable

Explanation: This fault is caused by "5 minute average load trend" statistical property crossing threshold level.

Recommended Action: Check the values of "5 minute average load" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1190: fltL2RsPathDomAttVlanmgrCfgCtrl

Severity: warning

Explanation: This fault is caused by a hardware programming failure

Recommended Action: The system will periodically retry to program the hardware. If the failure is due to lack of hardware resources, free up resources by removing or simplifying existing configuration. One of the reasons for lack of hardware resources is exhaustion of VLANs in ToR. These hardware resources can be examined by looking at capacity dashboard under OPERATIONS tab. Please check entry against the number of VLANs in output of command show vlan summary issued at node where fault is generated to check whether it exceeds above advertised node capacity.

F119008: fltTcaProcSysLoad5minRunProcLast

Severity: variable

Explanation: This fault is caused by "running processes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "running processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119009: fltTcaProcSysLoad15minRunProcLast

Severity: variable

Explanation: This fault is caused by "running processes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "running processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119010: fltTcaProcSysLoad1hRunProcLast

Severity: variable

Explanation: This fault is caused by "running processes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "running processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119011: fltTcaProcSysLoad1dRunProcLast

Severity: variable

Explanation: This fault is caused by "running processes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "running processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119012: fltTcaProcSysLoad1wRunProcLast

Severity: variable

Explanation: This fault is caused by "running processes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "running processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119013: fltTcaProcSysLoad1moRunProcLast

Severity: variable

Explanation: This fault is caused by "running processes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "running processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119014: fltTcaProcSysLoad1qtrRunProcLast

Severity: variable

Explanation: This fault is caused by "running processes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "running processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119015: fltTcaProcSysLoad1yearRunProcLast

Severity: variable

Explanation: This fault is caused by "running processes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "running processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119016: fltTcaProcSysLoad5minRunProcMin

Severity: variable

Explanation: This fault is caused by "running processes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "running processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119017: fltTcaProcSysLoad15minRunProcMin

Severity: variable

Explanation: This fault is caused by "running processes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "running processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119018: fltTcaProcSysLoad1hRunProcMin

Severity: variable

Explanation: This fault is caused by "running processes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "running processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119019: fltTcaProcSysLoad1dRunProcMin

Severity: variable

Explanation: This fault is caused by "running processes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "running processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119020: fltTcaProcSysLoad1wRunProcMin

Severity: variable

Explanation: This fault is caused by "running processes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "running processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119021: fltTcaProcSysLoad1moRunProcMin

Severity: variable

Explanation: This fault is caused by "running processes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "running processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119022: fltTcaProcSysLoad1qtrRunProcMin

Severity: variable

Explanation: This fault is caused by "running processes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "running processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119023: fltTcaProcSysLoad1yearRunProcMin

Severity: variable

Explanation: This fault is caused by "running processes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "running processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119024: fltTcaProcSysLoad5minRunProcMax

Severity: variable

Explanation: This fault is caused by "running processes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "running processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119025: fltTcaProcSysLoad15minRunProcMax

Severity: variable

Explanation: This fault is caused by "running processes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "running processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119026: fltTcaProcSysLoad1hRunProcMax

Severity: variable

Explanation: This fault is caused by "running processes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "running processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119027: fltTcaProcSysLoad1dRunProcMax

Severity: variable

Explanation: This fault is caused by "running processes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "running processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119028: fltTcaProcSysLoad1wRunProcMax

Severity: variable

Explanation: This fault is caused by "running processes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "running processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119029: fltTcaProcSysLoad1moRunProcMax

Severity: variable

Explanation: This fault is caused by "running processes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "running processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119030: fltTcaProcSysLoad1qtrRunProcMax

Severity: variable

Explanation: This fault is caused by "running processes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "running processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119031: fltTcaProcSysLoad1yearRunProcMax

Severity: variable

Explanation: This fault is caused by "running processes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "running processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119032: fltTcaProcSysLoad5minRunProcAvg

Severity: variable

Explanation: This fault is caused by "running processes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "running processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119033: fltTcaProcSysLoad15minRunProcAvg

Severity: variable

Explanation: This fault is caused by "running processes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "running processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119034: fltTcaProcSysLoad1hRunProcAvg

Severity: variable

Explanation: This fault is caused by "running processes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "running processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119035: fltTcaProcSysLoad1dRunProcAvg

Severity: variable

Explanation: This fault is caused by "running processes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "running processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119036: fltTcaProcSysLoad1wRunProcAvg

Severity: variable

Explanation: This fault is caused by "running processes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "running processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119037: fltTcaProcSysLoad1moRunProcAvg

Severity: variable

Explanation: This fault is caused by "running processes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "running processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119038: fltTcaProcSysLoad1qtrRunProcAvg

Severity: variable

Explanation: This fault is caused by "running processes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "running processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119039: fltTcaProcSysLoad1yearRunProcAvg

Severity: variable

Explanation: This fault is caused by "running processes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "running processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119072: fltTcaProcSysLoad5minRunProcTr

Severity: variable

Explanation: This fault is caused by "running processes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "running processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119073: fltTcaProcSysLoad15minRunProcTr

Severity: variable

Explanation: This fault is caused by "running processes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "running processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119074: fltTcaProcSysLoad1hRunProcTr

Severity: variable

Explanation: This fault is caused by "running processes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "running processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119075: fltTcaProcSysLoad1dRunProcTr

Severity: variable

Explanation: This fault is caused by "running processes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "running processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119076: fltTcaProcSysLoad1wRunProcTr

Severity: variable

Explanation: This fault is caused by "running processes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "running processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119077: fltTcaProcSysLoad1moRunProcTr

Severity: variable

Explanation: This fault is caused by "running processes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "running processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119078: fltTcaProcSysLoad1qtrRunProcTr

Severity: variable

Explanation: This fault is caused by "running processes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "running processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119079: fltTcaProcSysLoad1yearRunProcTr

Severity: variable

Explanation: This fault is caused by "running processes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "running processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1191: fltVpcRsVpcConfVpcCfgCtrl

Severity: warning

Explanation: This fault is caused by a hardware programming failure

Recommended Action: The system will periodically retry to program the hardware. If the failure is due to lack of hardware resources, free up resources by removing or simplifying existing configuration. One of the reasons for lack of hardware resources is exhaustion of VLANs in ToR. These hardware resources can be examined by looking at capacity dashboard under OPERATIONS tab. Please check entry against the number of VLANs in output of command show vlan summary issued at node where fault is generated to check whether it exceeds above advertised node capacity.

F119176: fltTcaProcSysLoad5minTotalProcLast

Severity: variable

Explanation: This fault is caused by "total processes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119177: fltTcaProcSysLoad15minTotalProcLast

Severity: variable

Explanation: This fault is caused by "total processes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119178: fltTcaProcSysLoad1hTotalProcLast

Severity: variable

Explanation: This fault is caused by "total processes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119179: fltTcaProcSysLoad1dTotalProcLast

Severity: variable

Explanation: This fault is caused by "total processes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119180: fltTcaProcSysLoad1wTotalProcLast

Severity: variable

Explanation: This fault is caused by "total processes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119181: fltTcaProcSysLoad1moTotalProcLast

Severity: variable

Explanation: This fault is caused by "total processes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119182: fltTcaProcSysLoad1qtrTotalProcLast

Severity: variable

Explanation: This fault is caused by "total processes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119183: fltTcaProcSysLoad1yearTotalProcLast

Severity: variable

Explanation: This fault is caused by "total processes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119184: fltTcaProcSysLoad5minTotalProcMin

Severity: variable

Explanation: This fault is caused by "total processes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119185: fltTcaProcSysLoad15minTotalProcMin

Severity: variable

Explanation: This fault is caused by "total processes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119186: fltTcaProcSysLoad1hTotalProcMin

Severity: variable

Explanation: This fault is caused by "total processes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119187: fltTcaProcSysLoad1dTotalProcMin

Severity: variable

Explanation: This fault is caused by "total processes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119188: fltTcaProcSysLoad1wTotalProcMin

Severity: variable

Explanation: This fault is caused by "total processes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119189: fltTcaProcSysLoad1moTotalProcMin

Severity: variable

Explanation: This fault is caused by "total processes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119190: fltTcaProcSysLoad1qtrTotalProcMin

Severity: variable

Explanation: This fault is caused by "total processes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119191: fltTcaProcSysLoad1yearTotalProcMin

Severity: variable

Explanation: This fault is caused by "total processes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119192: fltTcaProcSysLoad5minTotalProcMax

Severity: variable

Explanation: This fault is caused by "total processes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119193: fltTcaProcSysLoad15minTotalProcMax

Severity: variable

Explanation: This fault is caused by "total processes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119194: fltTcaProcSysLoad1hTotalProcMax

Severity: variable

Explanation: This fault is caused by "total processes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119195: fltTcaProcSysLoad1dTotalProcMax

Severity: variable

Explanation: This fault is caused by "total processes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119196: fltTcaProcSysLoad1wTotalProcMax

Severity: variable

Explanation: This fault is caused by "total processes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119197: fltTcaProcSysLoad1moTotalProcMax

Severity: variable

Explanation: This fault is caused by "total processes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119198: fltTcaProcSysLoad1qtrTotalProcMax

Severity: variable

Explanation: This fault is caused by "total processes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119199: fltTcaProcSysLoad1yearTotalProcMax

Severity: variable

Explanation: This fault is caused by "total processes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1192: fltPcRsMbrIfsPcmCfgCtrl

Severity: warning

Explanation: This fault is caused by a hardware programming failure

Recommended Action: The system will periodically retry to program the hardware. If the failure is due to lack of hardware resources, free up resources by removing or simplifying existing configuration. One of the reasons for lack of hardware resources is exhaustion of VLANs in ToR. These hardware resources can be examined by looking at capacity dashboard under OPERATIONS tab. Please check entry against the number of VLANs in output of command show vlan summary issued at node where fault is generated to check whether it exceeds above advertised node capacity.

F119200: fltTcaProcSysLoad5minTotalProcAvg

Severity: variable

Explanation: This fault is caused by "total processes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119201: fltTcaProcSysLoad15minTotalProcAvg

Severity: variable

Explanation: This fault is caused by "total processes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119202: fltTcaProcSysLoad1hTotalProcAvg

Severity: variable

Explanation: This fault is caused by "total processes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119203: fltTcaProcSysLoad1dTotalProcAvg

Severity: variable

Explanation: This fault is caused by "total processes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119204: fltTcaProcSysLoad1wTotalProcAvg

Severity: variable

Explanation: This fault is caused by "total processes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119205: fltTcaProcSysLoad1moTotalProcAvg

Severity: variable

Explanation: This fault is caused by "total processes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119206: fltTcaProcSysLoad1qtrTotalProcAvg

Severity: variable

Explanation: This fault is caused by "total processes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119207: fltTcaProcSysLoad1yearTotalProcAvg

Severity: variable

Explanation: This fault is caused by "total processes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119240: fltTcaProcSysLoad5minTotalProcTr

Severity: variable

Explanation: This fault is caused by "total processes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119241: fltTcaProcSysLoad15minTotalProcTr

Severity: variable

Explanation: This fault is caused by "total processes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119242: fltTcaProcSysLoad1hTotalProcTr

Severity: variable

Explanation: This fault is caused by "total processes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119243: fltTcaProcSysLoad1dTotalProcTr

Severity: variable

Explanation: This fault is caused by "total processes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119244: fltTcaProcSysLoad1wTotalProcTr

Severity: variable

Explanation: This fault is caused by "total processes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119245: fltTcaProcSysLoad1moTotalProcTr

Severity: variable

Explanation: This fault is caused by "total processes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119246: fltTcaProcSysLoad1qtrTotalProcTr

Severity: variable

Explanation: This fault is caused by "total processes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119247: fltTcaProcSysLoad1yearTotalProcTr

Severity: variable

Explanation: This fault is caused by "total processes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total processes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119344: fltTcaProcSysMem5minFreeLast

Severity: variable

Explanation: This fault is caused by "free memory current value" statistical property crossing threshold level.

Recommended Action: Check the values of "free memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119345: fltTcaProcSysMem15minFreeLast

Severity: variable

Explanation: This fault is caused by "free memory current value" statistical property crossing threshold level.

Recommended Action: Check the values of "free memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119346: fltTcaProcSysMem1hFreeLast

Severity: variable

Explanation: This fault is caused by "free memory current value" statistical property crossing threshold level.

Recommended Action: Check the values of "free memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119347: fltTcaProcSysMem1dFreeLast

Severity: variable

Explanation: This fault is caused by "free memory current value" statistical property crossing threshold level.

Recommended Action: Check the values of "free memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119348: fltTcaProcSysMem1wFreeLast

Severity: variable

Explanation: This fault is caused by "free memory current value" statistical property crossing threshold level.

Recommended Action: Check the values of "free memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119349: fltTcaProcSysMem1moFreeLast

Severity: variable

Explanation: This fault is caused by "free memory current value" statistical property crossing threshold level.

Recommended Action: Check the values of "free memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119350: fltTcaProcSysMem1qtrFreeLast

Severity: variable

Explanation: This fault is caused by "free memory current value" statistical property crossing threshold level.

Recommended Action: Check the values of "free memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119351: fltTcaProcSysMem1yearFreeLast

Severity: variable

Explanation: This fault is caused by "free memory current value" statistical property crossing threshold level.

Recommended Action: Check the values of "free memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119352: fltTcaProcSysMem5minFreeMin

Severity: variable

Explanation: This fault is caused by "free memory minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "free memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119353: fltTcaProcSysMem15minFreeMin

Severity: variable

Explanation: This fault is caused by "free memory minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "free memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119354: fltTcaProcSysMem1hFreeMin

Severity: variable

Explanation: This fault is caused by "free memory minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "free memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119355: fltTcaProcSysMem1dFreeMin

Severity: variable

Explanation: This fault is caused by "free memory minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "free memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119356: fltTcaProcSysMem1wFreeMin

Severity: variable

Explanation: This fault is caused by "free memory minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "free memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119357: fltTcaProcSysMem1moFreeMin

Severity: variable

Explanation: This fault is caused by "free memory minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "free memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119358: fltTcaProcSysMem1qtrFreeMin

Severity: variable

Explanation: This fault is caused by "free memory minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "free memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119359: fltTcaProcSysMem1yearFreeMin

Severity: variable

Explanation: This fault is caused by "free memory minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "free memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119360: fltTcaProcSysMem5minFreeMax

Severity: variable

Explanation: This fault is caused by "free memory maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "free memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119361: fltTcaProcSysMem15minFreeMax

Severity: variable

Explanation: This fault is caused by "free memory maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "free memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119362: fltTcaProcSysMem1hFreeMax

Severity: variable

Explanation: This fault is caused by "free memory maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "free memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119363: fltTcaProcSysMem1dFreeMax

Severity: variable

Explanation: This fault is caused by "free memory maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "free memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119364: fltTcaProcSysMem1wFreeMax

Severity: variable

Explanation: This fault is caused by "free memory maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "free memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119365: fltTcaProcSysMem1moFreeMax

Severity: variable

Explanation: This fault is caused by "free memory maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "free memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119366: fltTcaProcSysMem1qtrFreeMax

Severity: variable

Explanation: This fault is caused by "free memory maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "free memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119367: fltTcaProcSysMem1yearFreeMax

Severity: variable

Explanation: This fault is caused by "free memory maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "free memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119368: fltTcaProcSysMem5minFreeAvg

Severity: variable

Explanation: This fault is caused by "free memory average value" statistical property crossing threshold level.

Recommended Action: Check the values of "free memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119369: fltTcaProcSysMem15minFreeAvg

Severity: variable

Explanation: This fault is caused by "free memory average value" statistical property crossing threshold level.

Recommended Action: Check the values of "free memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119370: fltTcaProcSysMem1hFreeAvg

Severity: variable

Explanation: This fault is caused by "free memory average value" statistical property crossing threshold level.

Recommended Action: Check the values of "free memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119371: fltTcaProcSysMem1dFreeAvg

Severity: variable

Explanation: This fault is caused by "free memory average value" statistical property crossing threshold level.

Recommended Action: Check the values of "free memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119372: fltTcaProcSysMem1wFreeAvg

Severity: variable

Explanation: This fault is caused by "free memory average value" statistical property crossing threshold level.

Recommended Action: Check the values of "free memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119373: fltTcaProcSysMem1moFreeAvg

Severity: variable

Explanation: This fault is caused by "free memory average value" statistical property crossing threshold level.

Recommended Action: Check the values of "free memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119374: fltTcaProcSysMem1qtrFreeAvg

Severity: variable

Explanation: This fault is caused by "free memory average value" statistical property crossing threshold level.

Recommended Action: Check the values of "free memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119375: fltTcaProcSysMem1yearFreeAvg

Severity: variable

Explanation: This fault is caused by "free memory average value" statistical property crossing threshold level.

Recommended Action: Check the values of "free memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1194: fltQospClassOperStFailed

Severity: major

Explanation: This fault occurs when qos manager fails to activate a class due to hardware programming failure

Recommended Action: To recover from this fault, try the following actions:

1. Look at any configuration issues

2. Verify the configuration is correct/complete

3. Delete the qos class and add it back

4. If the above actions did not resolve the issue, try rebooting the switch using CLI or GUI.

5. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F119408: fltTcaProcSysMem5minFreeTr

Severity: variable

Explanation: This fault is caused by "free memory trend" statistical property crossing threshold level.

Recommended Action: Check the values of "free memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119409: fltTcaProcSysMem15minFreeTr

Severity: variable

Explanation: This fault is caused by "free memory trend" statistical property crossing threshold level.

Recommended Action: Check the values of "free memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119410: fltTcaProcSysMem1hFreeTr

Severity: variable

Explanation: This fault is caused by "free memory trend" statistical property crossing threshold level.

Recommended Action: Check the values of "free memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119411: fltTcaProcSysMem1dFreeTr

Severity: variable

Explanation: This fault is caused by "free memory trend" statistical property crossing threshold level.

Recommended Action: Check the values of "free memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119412: fltTcaProcSysMem1wFreeTr

Severity: variable

Explanation: This fault is caused by "free memory trend" statistical property crossing threshold level.

Recommended Action: Check the values of "free memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119413: fltTcaProcSysMem1moFreeTr

Severity: variable

Explanation: This fault is caused by "free memory trend" statistical property crossing threshold level.

Recommended Action: Check the values of "free memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119414: fltTcaProcSysMem1qtrFreeTr

Severity: variable

Explanation: This fault is caused by "free memory trend" statistical property crossing threshold level.

Recommended Action: Check the values of "free memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119415: fltTcaProcSysMem1yearFreeTr

Severity: variable

Explanation: This fault is caused by "free memory trend" statistical property crossing threshold level.

Recommended Action: Check the values of "free memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1195: fltQospDscpRuleOperStFailed

Severity: major

Explanation: This fault occurs when qos manager fails to activate a dscp rule due to hardware programming failure

Recommended Action: To recover from this fault, try the following actions:

1. Look at any configuration issues

2. Verify the configuration is correct/complete

3. Reduce the number of rules and retry

F119512: fltTcaProcSysMem5minTotalLast

Severity: variable

Explanation: This fault is caused by "total memory current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119513: fltTcaProcSysMem15minTotalLast

Severity: variable

Explanation: This fault is caused by "total memory current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119514: fltTcaProcSysMem1hTotalLast

Severity: variable

Explanation: This fault is caused by "total memory current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119515: fltTcaProcSysMem1dTotalLast

Severity: variable

Explanation: This fault is caused by "total memory current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119516: fltTcaProcSysMem1wTotalLast

Severity: variable

Explanation: This fault is caused by "total memory current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119517: fltTcaProcSysMem1moTotalLast

Severity: variable

Explanation: This fault is caused by "total memory current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119518: fltTcaProcSysMem1qtrTotalLast

Severity: variable

Explanation: This fault is caused by "total memory current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119519: fltTcaProcSysMem1yearTotalLast

Severity: variable

Explanation: This fault is caused by "total memory current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119520: fltTcaProcSysMem5minTotalMin

Severity: variable

Explanation: This fault is caused by "total memory minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119521: fltTcaProcSysMem15minTotalMin

Severity: variable

Explanation: This fault is caused by "total memory minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119522: fltTcaProcSysMem1hTotalMin

Severity: variable

Explanation: This fault is caused by "total memory minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119523: fltTcaProcSysMem1dTotalMin

Severity: variable

Explanation: This fault is caused by "total memory minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119524: fltTcaProcSysMem1wTotalMin

Severity: variable

Explanation: This fault is caused by "total memory minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119525: fltTcaProcSysMem1moTotalMin

Severity: variable

Explanation: This fault is caused by "total memory minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119526: fltTcaProcSysMem1qtrTotalMin

Severity: variable

Explanation: This fault is caused by "total memory minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119527: fltTcaProcSysMem1yearTotalMin

Severity: variable

Explanation: This fault is caused by "total memory minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119528: fltTcaProcSysMem5minTotalMax

Severity: variable

Explanation: This fault is caused by "total memory maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119529: fltTcaProcSysMem15minTotalMax

Severity: variable

Explanation: This fault is caused by "total memory maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119530: fltTcaProcSysMem1hTotalMax

Severity: variable

Explanation: This fault is caused by "total memory maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119531: fltTcaProcSysMem1dTotalMax

Severity: variable

Explanation: This fault is caused by "total memory maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119532: fltTcaProcSysMem1wTotalMax

Severity: variable

Explanation: This fault is caused by "total memory maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119533: fltTcaProcSysMem1moTotalMax

Severity: variable

Explanation: This fault is caused by "total memory maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119534: fltTcaProcSysMem1qtrTotalMax

Severity: variable

Explanation: This fault is caused by "total memory maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119535: fltTcaProcSysMem1yearTotalMax

Severity: variable

Explanation: This fault is caused by "total memory maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119536: fltTcaProcSysMem5minTotalAvg

Severity: variable

Explanation: This fault is caused by "total memory average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119537: fltTcaProcSysMem15minTotalAvg

Severity: variable

Explanation: This fault is caused by "total memory average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119538: fltTcaProcSysMem1hTotalAvg

Severity: variable

Explanation: This fault is caused by "total memory average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119539: fltTcaProcSysMem1dTotalAvg

Severity: variable

Explanation: This fault is caused by "total memory average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119540: fltTcaProcSysMem1wTotalAvg

Severity: variable

Explanation: This fault is caused by "total memory average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119541: fltTcaProcSysMem1moTotalAvg

Severity: variable

Explanation: This fault is caused by "total memory average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119542: fltTcaProcSysMem1qtrTotalAvg

Severity: variable

Explanation: This fault is caused by "total memory average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119543: fltTcaProcSysMem1yearTotalAvg

Severity: variable

Explanation: This fault is caused by "total memory average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119576: fltTcaProcSysMem5minTotalTr

Severity: variable

Explanation: This fault is caused by "total memory trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119577: fltTcaProcSysMem15minTotalTr

Severity: variable

Explanation: This fault is caused by "total memory trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119578: fltTcaProcSysMem1hTotalTr

Severity: variable

Explanation: This fault is caused by "total memory trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119579: fltTcaProcSysMem1dTotalTr

Severity: variable

Explanation: This fault is caused by "total memory trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119580: fltTcaProcSysMem1wTotalTr

Severity: variable

Explanation: This fault is caused by "total memory trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119581: fltTcaProcSysMem1moTotalTr

Severity: variable

Explanation: This fault is caused by "total memory trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119582: fltTcaProcSysMem1qtrTotalTr

Severity: variable

Explanation: This fault is caused by "total memory trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119583: fltTcaProcSysMem1yearTotalTr

Severity: variable

Explanation: This fault is caused by "total memory trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1196: fltQospDot1pRuleOperStFailed

Severity: major

Explanation: This fault occurs when qos manager fails to activate a dot1p rule due to hardware programming failure

Recommended Action: To recover from this fault, try the following actions:

1. Look at any configuration issues

2. Verify the configuration is correct/complete

3. Reduce the number of rules and retry

F119680: fltTcaProcSysMem5minUsedLast

Severity: variable

Explanation: This fault is caused by "used memory current value" statistical property crossing threshold level.

Recommended Action: Check the values of "used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119681: fltTcaProcSysMem15minUsedLast

Severity: variable

Explanation: This fault is caused by "used memory current value" statistical property crossing threshold level.

Recommended Action: Check the values of "used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119682: fltTcaProcSysMem1hUsedLast

Severity: variable

Explanation: This fault is caused by "used memory current value" statistical property crossing threshold level.

Recommended Action: Check the values of "used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119683: fltTcaProcSysMem1dUsedLast

Severity: variable

Explanation: This fault is caused by "used memory current value" statistical property crossing threshold level.

Recommended Action: Check the values of "used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119684: fltTcaProcSysMem1wUsedLast

Severity: variable

Explanation: This fault is caused by "used memory current value" statistical property crossing threshold level.

Recommended Action: Check the values of "used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119685: fltTcaProcSysMem1moUsedLast

Severity: variable

Explanation: This fault is caused by "used memory current value" statistical property crossing threshold level.

Recommended Action: Check the values of "used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119686: fltTcaProcSysMem1qtrUsedLast

Severity: variable

Explanation: This fault is caused by "used memory current value" statistical property crossing threshold level.

Recommended Action: Check the values of "used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119687: fltTcaProcSysMem1yearUsedLast

Severity: variable

Explanation: This fault is caused by "used memory current value" statistical property crossing threshold level.

Recommended Action: Check the values of "used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119688: fltTcaProcSysMem5minUsedMin

Severity: variable

Explanation: This fault is caused by "used memory minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119689: fltTcaProcSysMem15minUsedMin

Severity: variable

Explanation: This fault is caused by "used memory minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119690: fltTcaProcSysMem1hUsedMin

Severity: variable

Explanation: This fault is caused by "used memory minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119691: fltTcaProcSysMem1dUsedMin

Severity: variable

Explanation: This fault is caused by "used memory minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119692: fltTcaProcSysMem1wUsedMin

Severity: variable

Explanation: This fault is caused by "used memory minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119693: fltTcaProcSysMem1moUsedMin

Severity: variable

Explanation: This fault is caused by "used memory minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119694: fltTcaProcSysMem1qtrUsedMin

Severity: variable

Explanation: This fault is caused by "used memory minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119695: fltTcaProcSysMem1yearUsedMin

Severity: variable

Explanation: This fault is caused by "used memory minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119696: fltTcaProcSysMem5minUsedMax

Severity: variable

Explanation: This fault is caused by "used memory maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119697: fltTcaProcSysMem15minUsedMax

Severity: variable

Explanation: This fault is caused by "used memory maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119698: fltTcaProcSysMem1hUsedMax

Severity: variable

Explanation: This fault is caused by "used memory maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119699: fltTcaProcSysMem1dUsedMax

Severity: variable

Explanation: This fault is caused by "used memory maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1197: fltL2BDLearningDisabled

Severity: major

Explanation: This fault occurs when the ep learning is disabled

Recommended Action: If this fault is consistently happening, try the following actions:

1. Check network connectivity for stp flaps

2. If the network connectivity is fine, generate the show tech-support file and contact Cisco TAC.

F119700: fltTcaProcSysMem1wUsedMax

Severity: variable

Explanation: This fault is caused by "used memory maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119701: fltTcaProcSysMem1moUsedMax

Severity: variable

Explanation: This fault is caused by "used memory maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119702: fltTcaProcSysMem1qtrUsedMax

Severity: variable

Explanation: This fault is caused by "used memory maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119703: fltTcaProcSysMem1yearUsedMax

Severity: variable

Explanation: This fault is caused by "used memory maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119704: fltTcaProcSysMem5minUsedAvg

Severity: variable

Explanation: This fault is caused by "used memory average value" statistical property crossing threshold level.

Recommended Action: Check the values of "used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119705: fltTcaProcSysMem15minUsedAvg

Severity: variable

Explanation: This fault is caused by "used memory average value" statistical property crossing threshold level.

Recommended Action: Check the values of "used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119706: fltTcaProcSysMem1hUsedAvg

Severity: variable

Explanation: This fault is caused by "used memory average value" statistical property crossing threshold level.

Recommended Action: Check the values of "used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119707: fltTcaProcSysMem1dUsedAvg

Severity: variable

Explanation: This fault is caused by "used memory average value" statistical property crossing threshold level.

Recommended Action: Check the values of "used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119708: fltTcaProcSysMem1wUsedAvg

Severity: variable

Explanation: This fault is caused by "used memory average value" statistical property crossing threshold level.

Recommended Action: Check the values of "used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119709: fltTcaProcSysMem1moUsedAvg

Severity: variable

Explanation: This fault is caused by "used memory average value" statistical property crossing threshold level.

Recommended Action: Check the values of "used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119710: fltTcaProcSysMem1qtrUsedAvg

Severity: variable

Explanation: This fault is caused by "used memory average value" statistical property crossing threshold level.

Recommended Action: Check the values of "used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119711: fltTcaProcSysMem1yearUsedAvg

Severity: variable

Explanation: This fault is caused by "used memory average value" statistical property crossing threshold level.

Recommended Action: Check the values of "used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119744: fltTcaProcSysMem5minUsedTr

Severity: variable

Explanation: This fault is caused by "used memory trend" statistical property crossing threshold level.

Recommended Action: Check the values of "used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119745: fltTcaProcSysMem15minUsedTr

Severity: variable

Explanation: This fault is caused by "used memory trend" statistical property crossing threshold level.

Recommended Action: Check the values of "used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119746: fltTcaProcSysMem1hUsedTr

Severity: variable

Explanation: This fault is caused by "used memory trend" statistical property crossing threshold level.

Recommended Action: Check the values of "used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119747: fltTcaProcSysMem1dUsedTr

Severity: variable

Explanation: This fault is caused by "used memory trend" statistical property crossing threshold level.

Recommended Action: Check the values of "used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119748: fltTcaProcSysMem1wUsedTr

Severity: variable

Explanation: This fault is caused by "used memory trend" statistical property crossing threshold level.

Recommended Action: Check the values of "used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119749: fltTcaProcSysMem1moUsedTr

Severity: variable

Explanation: This fault is caused by "used memory trend" statistical property crossing threshold level.

Recommended Action: Check the values of "used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119750: fltTcaProcSysMem1qtrUsedTr

Severity: variable

Explanation: This fault is caused by "used memory trend" statistical property crossing threshold level.

Recommended Action: Check the values of "used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119751: fltTcaProcSysMem1yearUsedTr

Severity: variable

Explanation: This fault is caused by "used memory trend" statistical property crossing threshold level.

Recommended Action: Check the values of "used memory" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119848: fltTcaQosmEgrPkts5minDropLast

Severity: variable

Explanation: This fault is caused by "egress drop packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119849: fltTcaQosmEgrPkts15minDropLast

Severity: variable

Explanation: This fault is caused by "egress drop packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119850: fltTcaQosmEgrPkts1hDropLast

Severity: variable

Explanation: This fault is caused by "egress drop packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119851: fltTcaQosmEgrPkts1dDropLast

Severity: variable

Explanation: This fault is caused by "egress drop packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119852: fltTcaQosmEgrPkts1wDropLast

Severity: variable

Explanation: This fault is caused by "egress drop packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119853: fltTcaQosmEgrPkts1moDropLast

Severity: variable

Explanation: This fault is caused by "egress drop packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119854: fltTcaQosmEgrPkts1qtrDropLast

Severity: variable

Explanation: This fault is caused by "egress drop packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119855: fltTcaQosmEgrPkts1yearDropLast

Severity: variable

Explanation: This fault is caused by "egress drop packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119864: fltTcaQosmEgrPkts5minDropCum

Severity: variable

Explanation: This fault is caused by "egress drop packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119865: fltTcaQosmEgrPkts15minDropCum

Severity: variable

Explanation: This fault is caused by "egress drop packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119866: fltTcaQosmEgrPkts1hDropCum

Severity: variable

Explanation: This fault is caused by "egress drop packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119867: fltTcaQosmEgrPkts1dDropCum

Severity: variable

Explanation: This fault is caused by "egress drop packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119868: fltTcaQosmEgrPkts1wDropCum

Severity: variable

Explanation: This fault is caused by "egress drop packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119869: fltTcaQosmEgrPkts1moDropCum

Severity: variable

Explanation: This fault is caused by "egress drop packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119870: fltTcaQosmEgrPkts1qtrDropCum

Severity: variable

Explanation: This fault is caused by "egress drop packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119871: fltTcaQosmEgrPkts1yearDropCum

Severity: variable

Explanation: This fault is caused by "egress drop packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119872: fltTcaQosmEgrPkts5minDropPer

Severity: variable

Explanation: This fault is caused by "egress drop packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119873: fltTcaQosmEgrPkts15minDropPer

Severity: variable

Explanation: This fault is caused by "egress drop packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119874: fltTcaQosmEgrPkts1hDropPer

Severity: variable

Explanation: This fault is caused by "egress drop packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119875: fltTcaQosmEgrPkts1dDropPer

Severity: variable

Explanation: This fault is caused by "egress drop packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119876: fltTcaQosmEgrPkts1wDropPer

Severity: variable

Explanation: This fault is caused by "egress drop packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119877: fltTcaQosmEgrPkts1moDropPer

Severity: variable

Explanation: This fault is caused by "egress drop packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119878: fltTcaQosmEgrPkts1qtrDropPer

Severity: variable

Explanation: This fault is caused by "egress drop packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119879: fltTcaQosmEgrPkts1yearDropPer

Severity: variable

Explanation: This fault is caused by "egress drop packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119880: fltTcaQosmEgrPkts5minDropMin

Severity: variable

Explanation: This fault is caused by "egress drop packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119881: fltTcaQosmEgrPkts15minDropMin

Severity: variable

Explanation: This fault is caused by "egress drop packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119882: fltTcaQosmEgrPkts1hDropMin

Severity: variable

Explanation: This fault is caused by "egress drop packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119883: fltTcaQosmEgrPkts1dDropMin

Severity: variable

Explanation: This fault is caused by "egress drop packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119884: fltTcaQosmEgrPkts1wDropMin

Severity: variable

Explanation: This fault is caused by "egress drop packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119885: fltTcaQosmEgrPkts1moDropMin

Severity: variable

Explanation: This fault is caused by "egress drop packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119886: fltTcaQosmEgrPkts1qtrDropMin

Severity: variable

Explanation: This fault is caused by "egress drop packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119887: fltTcaQosmEgrPkts1yearDropMin

Severity: variable

Explanation: This fault is caused by "egress drop packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119888: fltTcaQosmEgrPkts5minDropMax

Severity: variable

Explanation: This fault is caused by "egress drop packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119889: fltTcaQosmEgrPkts15minDropMax

Severity: variable

Explanation: This fault is caused by "egress drop packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119890: fltTcaQosmEgrPkts1hDropMax

Severity: variable

Explanation: This fault is caused by "egress drop packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119891: fltTcaQosmEgrPkts1dDropMax

Severity: variable

Explanation: This fault is caused by "egress drop packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119892: fltTcaQosmEgrPkts1wDropMax

Severity: variable

Explanation: This fault is caused by "egress drop packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119893: fltTcaQosmEgrPkts1moDropMax

Severity: variable

Explanation: This fault is caused by "egress drop packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119894: fltTcaQosmEgrPkts1qtrDropMax

Severity: variable

Explanation: This fault is caused by "egress drop packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119895: fltTcaQosmEgrPkts1yearDropMax

Severity: variable

Explanation: This fault is caused by "egress drop packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119896: fltTcaQosmEgrPkts5minDropAvg

Severity: variable

Explanation: This fault is caused by "egress drop packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119897: fltTcaQosmEgrPkts15minDropAvg

Severity: variable

Explanation: This fault is caused by "egress drop packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119898: fltTcaQosmEgrPkts1hDropAvg

Severity: variable

Explanation: This fault is caused by "egress drop packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119899: fltTcaQosmEgrPkts1dDropAvg

Severity: variable

Explanation: This fault is caused by "egress drop packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1199: fltSpanRsSpanSrcToL1IfAttOperStFailed

Severity: major

Explanation: This fault occurs when span source on a port goes to failed state

Recommended Action: To recover from this fault, try the following actions:

1. Look at any configuration issues

2. Verify the configuration is correct/complete

3. Check network connectivity and ensure the port is up

F119900: fltTcaQosmEgrPkts1wDropAvg

Severity: variable

Explanation: This fault is caused by "egress drop packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119901: fltTcaQosmEgrPkts1moDropAvg

Severity: variable

Explanation: This fault is caused by "egress drop packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119902: fltTcaQosmEgrPkts1qtrDropAvg

Severity: variable

Explanation: This fault is caused by "egress drop packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119903: fltTcaQosmEgrPkts1yearDropAvg

Severity: variable

Explanation: This fault is caused by "egress drop packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119928: fltTcaQosmEgrPkts5minDropTr

Severity: variable

Explanation: This fault is caused by "egress drop packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119929: fltTcaQosmEgrPkts15minDropTr

Severity: variable

Explanation: This fault is caused by "egress drop packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119930: fltTcaQosmEgrPkts1hDropTr

Severity: variable

Explanation: This fault is caused by "egress drop packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119931: fltTcaQosmEgrPkts1dDropTr

Severity: variable

Explanation: This fault is caused by "egress drop packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119932: fltTcaQosmEgrPkts1wDropTr

Severity: variable

Explanation: This fault is caused by "egress drop packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119933: fltTcaQosmEgrPkts1moDropTr

Severity: variable

Explanation: This fault is caused by "egress drop packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119934: fltTcaQosmEgrPkts1qtrDropTr

Severity: variable

Explanation: This fault is caused by "egress drop packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119935: fltTcaQosmEgrPkts1yearDropTr

Severity: variable

Explanation: This fault is caused by "egress drop packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119936: fltTcaQosmEgrPkts5minDropRate

Severity: variable

Explanation: This fault is caused by "egress drop packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119937: fltTcaQosmEgrPkts15minDropRate

Severity: variable

Explanation: This fault is caused by "egress drop packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119938: fltTcaQosmEgrPkts1hDropRate

Severity: variable

Explanation: This fault is caused by "egress drop packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119939: fltTcaQosmEgrPkts1dDropRate

Severity: variable

Explanation: This fault is caused by "egress drop packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119940: fltTcaQosmEgrPkts1wDropRate

Severity: variable

Explanation: This fault is caused by "egress drop packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119941: fltTcaQosmEgrPkts1moDropRate

Severity: variable

Explanation: This fault is caused by "egress drop packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119942: fltTcaQosmEgrPkts1qtrDropRate

Severity: variable

Explanation: This fault is caused by "egress drop packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F119943: fltTcaQosmEgrPkts1yearDropRate

Severity: variable

Explanation: This fault is caused by "egress drop packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1200: fltSpanRsSpanSrcToL2CktEpAttOperStFailed

Severity: major

Explanation: This fault occurs when scale limit is reached on a span hw resource

Recommended Action: To recover from this fault, try the following actions:

1. Reduce the number of ports being used as Span srcs

2. Reduce the number of BDs/VRFs being used as Span src filters

3. Reduce the number of Filter entries in Span Filter Groups

4. Reduce the number of Span srcs shared between Span Src Groups

F120064: fltTcaQosmIngrPkts5minAdmitLast

Severity: variable

Explanation: This fault is caused by "ingress admit packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120065: fltTcaQosmIngrPkts15minAdmitLast

Severity: variable

Explanation: This fault is caused by "ingress admit packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120066: fltTcaQosmIngrPkts1hAdmitLast

Severity: variable

Explanation: This fault is caused by "ingress admit packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120067: fltTcaQosmIngrPkts1dAdmitLast

Severity: variable

Explanation: This fault is caused by "ingress admit packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120068: fltTcaQosmIngrPkts1wAdmitLast

Severity: variable

Explanation: This fault is caused by "ingress admit packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120069: fltTcaQosmIngrPkts1moAdmitLast

Severity: variable

Explanation: This fault is caused by "ingress admit packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120070: fltTcaQosmIngrPkts1qtrAdmitLast

Severity: variable

Explanation: This fault is caused by "ingress admit packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120071: fltTcaQosmIngrPkts1yearAdmitLast

Severity: variable

Explanation: This fault is caused by "ingress admit packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120080: fltTcaQosmIngrPkts5minAdmitCum

Severity: variable

Explanation: This fault is caused by "ingress admit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120081: fltTcaQosmIngrPkts15minAdmitCum

Severity: variable

Explanation: This fault is caused by "ingress admit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120082: fltTcaQosmIngrPkts1hAdmitCum

Severity: variable

Explanation: This fault is caused by "ingress admit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120083: fltTcaQosmIngrPkts1dAdmitCum

Severity: variable

Explanation: This fault is caused by "ingress admit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120084: fltTcaQosmIngrPkts1wAdmitCum

Severity: variable

Explanation: This fault is caused by "ingress admit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120085: fltTcaQosmIngrPkts1moAdmitCum

Severity: variable

Explanation: This fault is caused by "ingress admit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120086: fltTcaQosmIngrPkts1qtrAdmitCum

Severity: variable

Explanation: This fault is caused by "ingress admit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120087: fltTcaQosmIngrPkts1yearAdmitCum

Severity: variable

Explanation: This fault is caused by "ingress admit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120088: fltTcaQosmIngrPkts5minAdmitPer

Severity: variable

Explanation: This fault is caused by "ingress admit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120089: fltTcaQosmIngrPkts15minAdmitPer

Severity: variable

Explanation: This fault is caused by "ingress admit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120090: fltTcaQosmIngrPkts1hAdmitPer

Severity: variable

Explanation: This fault is caused by "ingress admit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120091: fltTcaQosmIngrPkts1dAdmitPer

Severity: variable

Explanation: This fault is caused by "ingress admit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120092: fltTcaQosmIngrPkts1wAdmitPer

Severity: variable

Explanation: This fault is caused by "ingress admit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120093: fltTcaQosmIngrPkts1moAdmitPer

Severity: variable

Explanation: This fault is caused by "ingress admit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120094: fltTcaQosmIngrPkts1qtrAdmitPer

Severity: variable

Explanation: This fault is caused by "ingress admit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120095: fltTcaQosmIngrPkts1yearAdmitPer

Severity: variable

Explanation: This fault is caused by "ingress admit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120096: fltTcaQosmIngrPkts5minAdmitMin

Severity: variable

Explanation: This fault is caused by "ingress admit packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120097: fltTcaQosmIngrPkts15minAdmitMin

Severity: variable

Explanation: This fault is caused by "ingress admit packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120098: fltTcaQosmIngrPkts1hAdmitMin

Severity: variable

Explanation: This fault is caused by "ingress admit packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120099: fltTcaQosmIngrPkts1dAdmitMin

Severity: variable

Explanation: This fault is caused by "ingress admit packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1201: fltSpanDestinationOperStFailed

Severity: major

Explanation: This fault occurs when span destination goes to failed state

Recommended Action: To recover from this fault, try the following actions:

1. Look at any configuration issues

2. Verify the configuration is correct/complete

3. Reduce the number of span sessions and retry

F120100: fltTcaQosmIngrPkts1wAdmitMin

Severity: variable

Explanation: This fault is caused by "ingress admit packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120101: fltTcaQosmIngrPkts1moAdmitMin

Severity: variable

Explanation: This fault is caused by "ingress admit packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120102: fltTcaQosmIngrPkts1qtrAdmitMin

Severity: variable

Explanation: This fault is caused by "ingress admit packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120103: fltTcaQosmIngrPkts1yearAdmitMin

Severity: variable

Explanation: This fault is caused by "ingress admit packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120104: fltTcaQosmIngrPkts5minAdmitMax

Severity: variable

Explanation: This fault is caused by "ingress admit packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120105: fltTcaQosmIngrPkts15minAdmitMax

Severity: variable

Explanation: This fault is caused by "ingress admit packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120106: fltTcaQosmIngrPkts1hAdmitMax

Severity: variable

Explanation: This fault is caused by "ingress admit packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120107: fltTcaQosmIngrPkts1dAdmitMax

Severity: variable

Explanation: This fault is caused by "ingress admit packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120108: fltTcaQosmIngrPkts1wAdmitMax

Severity: variable

Explanation: This fault is caused by "ingress admit packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120109: fltTcaQosmIngrPkts1moAdmitMax

Severity: variable

Explanation: This fault is caused by "ingress admit packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120110: fltTcaQosmIngrPkts1qtrAdmitMax

Severity: variable

Explanation: This fault is caused by "ingress admit packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120111: fltTcaQosmIngrPkts1yearAdmitMax

Severity: variable

Explanation: This fault is caused by "ingress admit packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120112: fltTcaQosmIngrPkts5minAdmitAvg

Severity: variable

Explanation: This fault is caused by "ingress admit packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120113: fltTcaQosmIngrPkts15minAdmitAvg

Severity: variable

Explanation: This fault is caused by "ingress admit packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120114: fltTcaQosmIngrPkts1hAdmitAvg

Severity: variable

Explanation: This fault is caused by "ingress admit packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120115: fltTcaQosmIngrPkts1dAdmitAvg

Severity: variable

Explanation: This fault is caused by "ingress admit packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120116: fltTcaQosmIngrPkts1wAdmitAvg

Severity: variable

Explanation: This fault is caused by "ingress admit packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120117: fltTcaQosmIngrPkts1moAdmitAvg

Severity: variable

Explanation: This fault is caused by "ingress admit packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120118: fltTcaQosmIngrPkts1qtrAdmitAvg

Severity: variable

Explanation: This fault is caused by "ingress admit packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120119: fltTcaQosmIngrPkts1yearAdmitAvg

Severity: variable

Explanation: This fault is caused by "ingress admit packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120144: fltTcaQosmIngrPkts5minAdmitTr

Severity: variable

Explanation: This fault is caused by "ingress admit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120145: fltTcaQosmIngrPkts15minAdmitTr

Severity: variable

Explanation: This fault is caused by "ingress admit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120146: fltTcaQosmIngrPkts1hAdmitTr

Severity: variable

Explanation: This fault is caused by "ingress admit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120147: fltTcaQosmIngrPkts1dAdmitTr

Severity: variable

Explanation: This fault is caused by "ingress admit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120148: fltTcaQosmIngrPkts1wAdmitTr

Severity: variable

Explanation: This fault is caused by "ingress admit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120149: fltTcaQosmIngrPkts1moAdmitTr

Severity: variable

Explanation: This fault is caused by "ingress admit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120150: fltTcaQosmIngrPkts1qtrAdmitTr

Severity: variable

Explanation: This fault is caused by "ingress admit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120151: fltTcaQosmIngrPkts1yearAdmitTr

Severity: variable

Explanation: This fault is caused by "ingress admit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120152: fltTcaQosmIngrPkts5minAdmitRate

Severity: variable

Explanation: This fault is caused by "ingress admit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120153: fltTcaQosmIngrPkts15minAdmitRate

Severity: variable

Explanation: This fault is caused by "ingress admit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120154: fltTcaQosmIngrPkts1hAdmitRate

Severity: variable

Explanation: This fault is caused by "ingress admit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120155: fltTcaQosmIngrPkts1dAdmitRate

Severity: variable

Explanation: This fault is caused by "ingress admit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120156: fltTcaQosmIngrPkts1wAdmitRate

Severity: variable

Explanation: This fault is caused by "ingress admit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120157: fltTcaQosmIngrPkts1moAdmitRate

Severity: variable

Explanation: This fault is caused by "ingress admit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120158: fltTcaQosmIngrPkts1qtrAdmitRate

Severity: variable

Explanation: This fault is caused by "ingress admit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120159: fltTcaQosmIngrPkts1yearAdmitRate

Severity: variable

Explanation: This fault is caused by "ingress admit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress admit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120280: fltTcaQosmIngrPkts5minDropLast

Severity: variable

Explanation: This fault is caused by "ingress drop packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120281: fltTcaQosmIngrPkts15minDropLast

Severity: variable

Explanation: This fault is caused by "ingress drop packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120282: fltTcaQosmIngrPkts1hDropLast

Severity: variable

Explanation: This fault is caused by "ingress drop packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120283: fltTcaQosmIngrPkts1dDropLast

Severity: variable

Explanation: This fault is caused by "ingress drop packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120284: fltTcaQosmIngrPkts1wDropLast

Severity: variable

Explanation: This fault is caused by "ingress drop packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120285: fltTcaQosmIngrPkts1moDropLast

Severity: variable

Explanation: This fault is caused by "ingress drop packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120286: fltTcaQosmIngrPkts1qtrDropLast

Severity: variable

Explanation: This fault is caused by "ingress drop packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120287: fltTcaQosmIngrPkts1yearDropLast

Severity: variable

Explanation: This fault is caused by "ingress drop packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120296: fltTcaQosmIngrPkts5minDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120297: fltTcaQosmIngrPkts15minDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120298: fltTcaQosmIngrPkts1hDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120299: fltTcaQosmIngrPkts1dDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120300: fltTcaQosmIngrPkts1wDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120301: fltTcaQosmIngrPkts1moDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120302: fltTcaQosmIngrPkts1qtrDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120303: fltTcaQosmIngrPkts1yearDropCum

Severity: variable

Explanation: This fault is caused by "ingress drop packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120304: fltTcaQosmIngrPkts5minDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120305: fltTcaQosmIngrPkts15minDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120306: fltTcaQosmIngrPkts1hDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120307: fltTcaQosmIngrPkts1dDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120308: fltTcaQosmIngrPkts1wDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120309: fltTcaQosmIngrPkts1moDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120310: fltTcaQosmIngrPkts1qtrDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120311: fltTcaQosmIngrPkts1yearDropPer

Severity: variable

Explanation: This fault is caused by "ingress drop packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120312: fltTcaQosmIngrPkts5minDropMin

Severity: variable

Explanation: This fault is caused by "ingress drop packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120313: fltTcaQosmIngrPkts15minDropMin

Severity: variable

Explanation: This fault is caused by "ingress drop packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120314: fltTcaQosmIngrPkts1hDropMin

Severity: variable

Explanation: This fault is caused by "ingress drop packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120315: fltTcaQosmIngrPkts1dDropMin

Severity: variable

Explanation: This fault is caused by "ingress drop packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120316: fltTcaQosmIngrPkts1wDropMin

Severity: variable

Explanation: This fault is caused by "ingress drop packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120317: fltTcaQosmIngrPkts1moDropMin

Severity: variable

Explanation: This fault is caused by "ingress drop packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120318: fltTcaQosmIngrPkts1qtrDropMin

Severity: variable

Explanation: This fault is caused by "ingress drop packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120319: fltTcaQosmIngrPkts1yearDropMin

Severity: variable

Explanation: This fault is caused by "ingress drop packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120320: fltTcaQosmIngrPkts5minDropMax

Severity: variable

Explanation: This fault is caused by "ingress drop packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120321: fltTcaQosmIngrPkts15minDropMax

Severity: variable

Explanation: This fault is caused by "ingress drop packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120322: fltTcaQosmIngrPkts1hDropMax

Severity: variable

Explanation: This fault is caused by "ingress drop packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120323: fltTcaQosmIngrPkts1dDropMax

Severity: variable

Explanation: This fault is caused by "ingress drop packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120324: fltTcaQosmIngrPkts1wDropMax

Severity: variable

Explanation: This fault is caused by "ingress drop packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120325: fltTcaQosmIngrPkts1moDropMax

Severity: variable

Explanation: This fault is caused by "ingress drop packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120326: fltTcaQosmIngrPkts1qtrDropMax

Severity: variable

Explanation: This fault is caused by "ingress drop packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120327: fltTcaQosmIngrPkts1yearDropMax

Severity: variable

Explanation: This fault is caused by "ingress drop packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120328: fltTcaQosmIngrPkts5minDropAvg

Severity: variable

Explanation: This fault is caused by "ingress drop packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120329: fltTcaQosmIngrPkts15minDropAvg

Severity: variable

Explanation: This fault is caused by "ingress drop packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120330: fltTcaQosmIngrPkts1hDropAvg

Severity: variable

Explanation: This fault is caused by "ingress drop packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120331: fltTcaQosmIngrPkts1dDropAvg

Severity: variable

Explanation: This fault is caused by "ingress drop packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120332: fltTcaQosmIngrPkts1wDropAvg

Severity: variable

Explanation: This fault is caused by "ingress drop packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120333: fltTcaQosmIngrPkts1moDropAvg

Severity: variable

Explanation: This fault is caused by "ingress drop packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120334: fltTcaQosmIngrPkts1qtrDropAvg

Severity: variable

Explanation: This fault is caused by "ingress drop packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120335: fltTcaQosmIngrPkts1yearDropAvg

Severity: variable

Explanation: This fault is caused by "ingress drop packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120360: fltTcaQosmIngrPkts5minDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120361: fltTcaQosmIngrPkts15minDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120362: fltTcaQosmIngrPkts1hDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120363: fltTcaQosmIngrPkts1dDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120364: fltTcaQosmIngrPkts1wDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120365: fltTcaQosmIngrPkts1moDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120366: fltTcaQosmIngrPkts1qtrDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120367: fltTcaQosmIngrPkts1yearDropTr

Severity: variable

Explanation: This fault is caused by "ingress drop packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120368: fltTcaQosmIngrPkts5minDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120369: fltTcaQosmIngrPkts15minDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120370: fltTcaQosmIngrPkts1hDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120371: fltTcaQosmIngrPkts1dDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120372: fltTcaQosmIngrPkts1wDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120373: fltTcaQosmIngrPkts1moDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120374: fltTcaQosmIngrPkts1qtrDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120375: fltTcaQosmIngrPkts1yearDropRate

Severity: variable

Explanation: This fault is caused by "ingress drop packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress drop packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1207: fltArpStAdjEpOperStDown

Severity: warning

Explanation: This fault occurs when the operational state of the arp adjacency is down.

Recommended Action: To recover from this fault, try the following actions:

1. Look at any configuration issues

2. Verify the configuration is correct/complete

3. Ensure the port is up on which ARP is configured

F1209: fltFabricOosPathIssuesConfig-failed

Severity: minor

Explanation: This fault occurs when an out-of-service policy is incorrectly configured.

Recommended Action: If you see this fault, take the following actions:

1. Look at the configuration for issues

2. For invalid-path, confirm that the specified interface is correct

3. For further details, refer to the documentation for fabric:PathIssues

4. Verify the fabric selector configuration is correct and complete

5. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F120928: fltTcaVnsRxPkts5minRxdropsLast

Severity: variable

Explanation: This fault is caused by "Rx Dropped current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120929: fltTcaVnsRxPkts15minRxdropsLast

Severity: variable

Explanation: This fault is caused by "Rx Dropped current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120930: fltTcaVnsRxPkts1hRxdropsLast

Severity: variable

Explanation: This fault is caused by "Rx Dropped current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120931: fltTcaVnsRxPkts1dRxdropsLast

Severity: variable

Explanation: This fault is caused by "Rx Dropped current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120932: fltTcaVnsRxPkts1wRxdropsLast

Severity: variable

Explanation: This fault is caused by "Rx Dropped current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120933: fltTcaVnsRxPkts1moRxdropsLast

Severity: variable

Explanation: This fault is caused by "Rx Dropped current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120934: fltTcaVnsRxPkts1qtrRxdropsLast

Severity: variable

Explanation: This fault is caused by "Rx Dropped current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120935: fltTcaVnsRxPkts1yearRxdropsLast

Severity: variable

Explanation: This fault is caused by "Rx Dropped current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120944: fltTcaVnsRxPkts5minRxdropsCum

Severity: variable

Explanation: This fault is caused by "Rx Dropped cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120945: fltTcaVnsRxPkts15minRxdropsCum

Severity: variable

Explanation: This fault is caused by "Rx Dropped cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120946: fltTcaVnsRxPkts1hRxdropsCum

Severity: variable

Explanation: This fault is caused by "Rx Dropped cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120947: fltTcaVnsRxPkts1dRxdropsCum

Severity: variable

Explanation: This fault is caused by "Rx Dropped cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120948: fltTcaVnsRxPkts1wRxdropsCum

Severity: variable

Explanation: This fault is caused by "Rx Dropped cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120949: fltTcaVnsRxPkts1moRxdropsCum

Severity: variable

Explanation: This fault is caused by "Rx Dropped cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120950: fltTcaVnsRxPkts1qtrRxdropsCum

Severity: variable

Explanation: This fault is caused by "Rx Dropped cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120951: fltTcaVnsRxPkts1yearRxdropsCum

Severity: variable

Explanation: This fault is caused by "Rx Dropped cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120952: fltTcaVnsRxPkts5minRxdropsPer

Severity: variable

Explanation: This fault is caused by "Rx Dropped periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120953: fltTcaVnsRxPkts15minRxdropsPer

Severity: variable

Explanation: This fault is caused by "Rx Dropped periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120954: fltTcaVnsRxPkts1hRxdropsPer

Severity: variable

Explanation: This fault is caused by "Rx Dropped periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120955: fltTcaVnsRxPkts1dRxdropsPer

Severity: variable

Explanation: This fault is caused by "Rx Dropped periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120956: fltTcaVnsRxPkts1wRxdropsPer

Severity: variable

Explanation: This fault is caused by "Rx Dropped periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120957: fltTcaVnsRxPkts1moRxdropsPer

Severity: variable

Explanation: This fault is caused by "Rx Dropped periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120958: fltTcaVnsRxPkts1qtrRxdropsPer

Severity: variable

Explanation: This fault is caused by "Rx Dropped periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120959: fltTcaVnsRxPkts1yearRxdropsPer

Severity: variable

Explanation: This fault is caused by "Rx Dropped periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120960: fltTcaVnsRxPkts5minRxdropsMin

Severity: variable

Explanation: This fault is caused by "Rx Dropped minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120961: fltTcaVnsRxPkts15minRxdropsMin

Severity: variable

Explanation: This fault is caused by "Rx Dropped minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120962: fltTcaVnsRxPkts1hRxdropsMin

Severity: variable

Explanation: This fault is caused by "Rx Dropped minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120963: fltTcaVnsRxPkts1dRxdropsMin

Severity: variable

Explanation: This fault is caused by "Rx Dropped minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120964: fltTcaVnsRxPkts1wRxdropsMin

Severity: variable

Explanation: This fault is caused by "Rx Dropped minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120965: fltTcaVnsRxPkts1moRxdropsMin

Severity: variable

Explanation: This fault is caused by "Rx Dropped minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120966: fltTcaVnsRxPkts1qtrRxdropsMin

Severity: variable

Explanation: This fault is caused by "Rx Dropped minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120967: fltTcaVnsRxPkts1yearRxdropsMin

Severity: variable

Explanation: This fault is caused by "Rx Dropped minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120968: fltTcaVnsRxPkts5minRxdropsMax

Severity: variable

Explanation: This fault is caused by "Rx Dropped maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120969: fltTcaVnsRxPkts15minRxdropsMax

Severity: variable

Explanation: This fault is caused by "Rx Dropped maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120970: fltTcaVnsRxPkts1hRxdropsMax

Severity: variable

Explanation: This fault is caused by "Rx Dropped maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120971: fltTcaVnsRxPkts1dRxdropsMax

Severity: variable

Explanation: This fault is caused by "Rx Dropped maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120972: fltTcaVnsRxPkts1wRxdropsMax

Severity: variable

Explanation: This fault is caused by "Rx Dropped maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120973: fltTcaVnsRxPkts1moRxdropsMax

Severity: variable

Explanation: This fault is caused by "Rx Dropped maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120974: fltTcaVnsRxPkts1qtrRxdropsMax

Severity: variable

Explanation: This fault is caused by "Rx Dropped maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120975: fltTcaVnsRxPkts1yearRxdropsMax

Severity: variable

Explanation: This fault is caused by "Rx Dropped maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120976: fltTcaVnsRxPkts5minRxdropsAvg

Severity: variable

Explanation: This fault is caused by "Rx Dropped average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120977: fltTcaVnsRxPkts15minRxdropsAvg

Severity: variable

Explanation: This fault is caused by "Rx Dropped average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120978: fltTcaVnsRxPkts1hRxdropsAvg

Severity: variable

Explanation: This fault is caused by "Rx Dropped average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120979: fltTcaVnsRxPkts1dRxdropsAvg

Severity: variable

Explanation: This fault is caused by "Rx Dropped average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120980: fltTcaVnsRxPkts1wRxdropsAvg

Severity: variable

Explanation: This fault is caused by "Rx Dropped average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120981: fltTcaVnsRxPkts1moRxdropsAvg

Severity: variable

Explanation: This fault is caused by "Rx Dropped average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120982: fltTcaVnsRxPkts1qtrRxdropsAvg

Severity: variable

Explanation: This fault is caused by "Rx Dropped average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F120983: fltTcaVnsRxPkts1yearRxdropsAvg

Severity: variable

Explanation: This fault is caused by "Rx Dropped average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121008: fltTcaVnsRxPkts5minRxdropsTr

Severity: variable

Explanation: This fault is caused by "Rx Dropped trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121009: fltTcaVnsRxPkts15minRxdropsTr

Severity: variable

Explanation: This fault is caused by "Rx Dropped trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121010: fltTcaVnsRxPkts1hRxdropsTr

Severity: variable

Explanation: This fault is caused by "Rx Dropped trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121011: fltTcaVnsRxPkts1dRxdropsTr

Severity: variable

Explanation: This fault is caused by "Rx Dropped trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121012: fltTcaVnsRxPkts1wRxdropsTr

Severity: variable

Explanation: This fault is caused by "Rx Dropped trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121013: fltTcaVnsRxPkts1moRxdropsTr

Severity: variable

Explanation: This fault is caused by "Rx Dropped trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121014: fltTcaVnsRxPkts1qtrRxdropsTr

Severity: variable

Explanation: This fault is caused by "Rx Dropped trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121015: fltTcaVnsRxPkts1yearRxdropsTr

Severity: variable

Explanation: This fault is caused by "Rx Dropped trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121016: fltTcaVnsRxPkts5minRxdropsRate

Severity: variable

Explanation: This fault is caused by "Rx Dropped rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121017: fltTcaVnsRxPkts15minRxdropsRate

Severity: variable

Explanation: This fault is caused by "Rx Dropped rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121018: fltTcaVnsRxPkts1hRxdropsRate

Severity: variable

Explanation: This fault is caused by "Rx Dropped rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121019: fltTcaVnsRxPkts1dRxdropsRate

Severity: variable

Explanation: This fault is caused by "Rx Dropped rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121020: fltTcaVnsRxPkts1wRxdropsRate

Severity: variable

Explanation: This fault is caused by "Rx Dropped rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121021: fltTcaVnsRxPkts1moRxdropsRate

Severity: variable

Explanation: This fault is caused by "Rx Dropped rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121022: fltTcaVnsRxPkts1qtrRxdropsRate

Severity: variable

Explanation: This fault is caused by "Rx Dropped rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121023: fltTcaVnsRxPkts1yearRxdropsRate

Severity: variable

Explanation: This fault is caused by "Rx Dropped rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121144: fltTcaVnsRxPkts5minRxerrorsLast

Severity: variable

Explanation: This fault is caused by "Rx Errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121145: fltTcaVnsRxPkts15minRxerrorsLast

Severity: variable

Explanation: This fault is caused by "Rx Errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121146: fltTcaVnsRxPkts1hRxerrorsLast

Severity: variable

Explanation: This fault is caused by "Rx Errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121147: fltTcaVnsRxPkts1dRxerrorsLast

Severity: variable

Explanation: This fault is caused by "Rx Errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121148: fltTcaVnsRxPkts1wRxerrorsLast

Severity: variable

Explanation: This fault is caused by "Rx Errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121149: fltTcaVnsRxPkts1moRxerrorsLast

Severity: variable

Explanation: This fault is caused by "Rx Errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121150: fltTcaVnsRxPkts1qtrRxerrorsLast

Severity: variable

Explanation: This fault is caused by "Rx Errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121151: fltTcaVnsRxPkts1yearRxerrorsLast

Severity: variable

Explanation: This fault is caused by "Rx Errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121160: fltTcaVnsRxPkts5minRxerrorsCum

Severity: variable

Explanation: This fault is caused by "Rx Errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121161: fltTcaVnsRxPkts15minRxerrorsCum

Severity: variable

Explanation: This fault is caused by "Rx Errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121162: fltTcaVnsRxPkts1hRxerrorsCum

Severity: variable

Explanation: This fault is caused by "Rx Errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121163: fltTcaVnsRxPkts1dRxerrorsCum

Severity: variable

Explanation: This fault is caused by "Rx Errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121164: fltTcaVnsRxPkts1wRxerrorsCum

Severity: variable

Explanation: This fault is caused by "Rx Errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121165: fltTcaVnsRxPkts1moRxerrorsCum

Severity: variable

Explanation: This fault is caused by "Rx Errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121166: fltTcaVnsRxPkts1qtrRxerrorsCum

Severity: variable

Explanation: This fault is caused by "Rx Errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121167: fltTcaVnsRxPkts1yearRxerrorsCum

Severity: variable

Explanation: This fault is caused by "Rx Errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121168: fltTcaVnsRxPkts5minRxerrorsPer

Severity: variable

Explanation: This fault is caused by "Rx Errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121169: fltTcaVnsRxPkts15minRxerrorsPer

Severity: variable

Explanation: This fault is caused by "Rx Errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121170: fltTcaVnsRxPkts1hRxerrorsPer

Severity: variable

Explanation: This fault is caused by "Rx Errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121171: fltTcaVnsRxPkts1dRxerrorsPer

Severity: variable

Explanation: This fault is caused by "Rx Errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121172: fltTcaVnsRxPkts1wRxerrorsPer

Severity: variable

Explanation: This fault is caused by "Rx Errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121173: fltTcaVnsRxPkts1moRxerrorsPer

Severity: variable

Explanation: This fault is caused by "Rx Errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121174: fltTcaVnsRxPkts1qtrRxerrorsPer

Severity: variable

Explanation: This fault is caused by "Rx Errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121175: fltTcaVnsRxPkts1yearRxerrorsPer

Severity: variable

Explanation: This fault is caused by "Rx Errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121176: fltTcaVnsRxPkts5minRxerrorsMin

Severity: variable

Explanation: This fault is caused by "Rx Errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121177: fltTcaVnsRxPkts15minRxerrorsMin

Severity: variable

Explanation: This fault is caused by "Rx Errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121178: fltTcaVnsRxPkts1hRxerrorsMin

Severity: variable

Explanation: This fault is caused by "Rx Errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121179: fltTcaVnsRxPkts1dRxerrorsMin

Severity: variable

Explanation: This fault is caused by "Rx Errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121180: fltTcaVnsRxPkts1wRxerrorsMin

Severity: variable

Explanation: This fault is caused by "Rx Errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121181: fltTcaVnsRxPkts1moRxerrorsMin

Severity: variable

Explanation: This fault is caused by "Rx Errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121182: fltTcaVnsRxPkts1qtrRxerrorsMin

Severity: variable

Explanation: This fault is caused by "Rx Errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121183: fltTcaVnsRxPkts1yearRxerrorsMin

Severity: variable

Explanation: This fault is caused by "Rx Errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121184: fltTcaVnsRxPkts5minRxerrorsMax

Severity: variable

Explanation: This fault is caused by "Rx Errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121185: fltTcaVnsRxPkts15minRxerrorsMax

Severity: variable

Explanation: This fault is caused by "Rx Errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121186: fltTcaVnsRxPkts1hRxerrorsMax

Severity: variable

Explanation: This fault is caused by "Rx Errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121187: fltTcaVnsRxPkts1dRxerrorsMax

Severity: variable

Explanation: This fault is caused by "Rx Errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121188: fltTcaVnsRxPkts1wRxerrorsMax

Severity: variable

Explanation: This fault is caused by "Rx Errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121189: fltTcaVnsRxPkts1moRxerrorsMax

Severity: variable

Explanation: This fault is caused by "Rx Errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121190: fltTcaVnsRxPkts1qtrRxerrorsMax

Severity: variable

Explanation: This fault is caused by "Rx Errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121191: fltTcaVnsRxPkts1yearRxerrorsMax

Severity: variable

Explanation: This fault is caused by "Rx Errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121192: fltTcaVnsRxPkts5minRxerrorsAvg

Severity: variable

Explanation: This fault is caused by "Rx Errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121193: fltTcaVnsRxPkts15minRxerrorsAvg

Severity: variable

Explanation: This fault is caused by "Rx Errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121194: fltTcaVnsRxPkts1hRxerrorsAvg

Severity: variable

Explanation: This fault is caused by "Rx Errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121195: fltTcaVnsRxPkts1dRxerrorsAvg

Severity: variable

Explanation: This fault is caused by "Rx Errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121196: fltTcaVnsRxPkts1wRxerrorsAvg

Severity: variable

Explanation: This fault is caused by "Rx Errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121197: fltTcaVnsRxPkts1moRxerrorsAvg

Severity: variable

Explanation: This fault is caused by "Rx Errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121198: fltTcaVnsRxPkts1qtrRxerrorsAvg

Severity: variable

Explanation: This fault is caused by "Rx Errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121199: fltTcaVnsRxPkts1yearRxerrorsAvg

Severity: variable

Explanation: This fault is caused by "Rx Errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121224: fltTcaVnsRxPkts5minRxerrorsTr

Severity: variable

Explanation: This fault is caused by "Rx Errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121225: fltTcaVnsRxPkts15minRxerrorsTr

Severity: variable

Explanation: This fault is caused by "Rx Errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121226: fltTcaVnsRxPkts1hRxerrorsTr

Severity: variable

Explanation: This fault is caused by "Rx Errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121227: fltTcaVnsRxPkts1dRxerrorsTr

Severity: variable

Explanation: This fault is caused by "Rx Errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121228: fltTcaVnsRxPkts1wRxerrorsTr

Severity: variable

Explanation: This fault is caused by "Rx Errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121229: fltTcaVnsRxPkts1moRxerrorsTr

Severity: variable

Explanation: This fault is caused by "Rx Errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121230: fltTcaVnsRxPkts1qtrRxerrorsTr

Severity: variable

Explanation: This fault is caused by "Rx Errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121231: fltTcaVnsRxPkts1yearRxerrorsTr

Severity: variable

Explanation: This fault is caused by "Rx Errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121232: fltTcaVnsRxPkts5minRxerrorsRate

Severity: variable

Explanation: This fault is caused by "Rx Errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121233: fltTcaVnsRxPkts15minRxerrorsRate

Severity: variable

Explanation: This fault is caused by "Rx Errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121234: fltTcaVnsRxPkts1hRxerrorsRate

Severity: variable

Explanation: This fault is caused by "Rx Errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121235: fltTcaVnsRxPkts1dRxerrorsRate

Severity: variable

Explanation: This fault is caused by "Rx Errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121236: fltTcaVnsRxPkts1wRxerrorsRate

Severity: variable

Explanation: This fault is caused by "Rx Errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121237: fltTcaVnsRxPkts1moRxerrorsRate

Severity: variable

Explanation: This fault is caused by "Rx Errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121238: fltTcaVnsRxPkts1qtrRxerrorsRate

Severity: variable

Explanation: This fault is caused by "Rx Errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121239: fltTcaVnsRxPkts1yearRxerrorsRate

Severity: variable

Explanation: This fault is caused by "Rx Errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1213: fltBgpInstMemAlertCritical

Severity: warning

Explanation: This fault occurs when the bgp instance memory alert is critical

Recommended Action: To recover from this fault, try the following actions:

1. Look at any configuration issues

2. Verify the configuration is correct/complete

3. Reduce the number of peers in bgp configuration

4. Reduce the number of prefixes exported into bgp

5. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F121360: fltTcaVnsRxPkts5minRxpacketsLast

Severity: variable

Explanation: This fault is caused by "Rx current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121361: fltTcaVnsRxPkts15minRxpacketsLast

Severity: variable

Explanation: This fault is caused by "Rx current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121362: fltTcaVnsRxPkts1hRxpacketsLast

Severity: variable

Explanation: This fault is caused by "Rx current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121363: fltTcaVnsRxPkts1dRxpacketsLast

Severity: variable

Explanation: This fault is caused by "Rx current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121364: fltTcaVnsRxPkts1wRxpacketsLast

Severity: variable

Explanation: This fault is caused by "Rx current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121365: fltTcaVnsRxPkts1moRxpacketsLast

Severity: variable

Explanation: This fault is caused by "Rx current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121366: fltTcaVnsRxPkts1qtrRxpacketsLast

Severity: variable

Explanation: This fault is caused by "Rx current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121367: fltTcaVnsRxPkts1yearRxpacketsLast

Severity: variable

Explanation: This fault is caused by "Rx current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121376: fltTcaVnsRxPkts5minRxpacketsCum

Severity: variable

Explanation: This fault is caused by "Rx cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121377: fltTcaVnsRxPkts15minRxpacketsCum

Severity: variable

Explanation: This fault is caused by "Rx cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121378: fltTcaVnsRxPkts1hRxpacketsCum

Severity: variable

Explanation: This fault is caused by "Rx cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121379: fltTcaVnsRxPkts1dRxpacketsCum

Severity: variable

Explanation: This fault is caused by "Rx cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121380: fltTcaVnsRxPkts1wRxpacketsCum

Severity: variable

Explanation: This fault is caused by "Rx cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121381: fltTcaVnsRxPkts1moRxpacketsCum

Severity: variable

Explanation: This fault is caused by "Rx cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121382: fltTcaVnsRxPkts1qtrRxpacketsCum

Severity: variable

Explanation: This fault is caused by "Rx cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121383: fltTcaVnsRxPkts1yearRxpacketsCum

Severity: variable

Explanation: This fault is caused by "Rx cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121384: fltTcaVnsRxPkts5minRxpacketsPer

Severity: variable

Explanation: This fault is caused by "Rx periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121385: fltTcaVnsRxPkts15minRxpacketsPer

Severity: variable

Explanation: This fault is caused by "Rx periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121386: fltTcaVnsRxPkts1hRxpacketsPer

Severity: variable

Explanation: This fault is caused by "Rx periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121387: fltTcaVnsRxPkts1dRxpacketsPer

Severity: variable

Explanation: This fault is caused by "Rx periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121388: fltTcaVnsRxPkts1wRxpacketsPer

Severity: variable

Explanation: This fault is caused by "Rx periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121389: fltTcaVnsRxPkts1moRxpacketsPer

Severity: variable

Explanation: This fault is caused by "Rx periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121390: fltTcaVnsRxPkts1qtrRxpacketsPer

Severity: variable

Explanation: This fault is caused by "Rx periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121391: fltTcaVnsRxPkts1yearRxpacketsPer

Severity: variable

Explanation: This fault is caused by "Rx periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121392: fltTcaVnsRxPkts5minRxpacketsMin

Severity: variable

Explanation: This fault is caused by "Rx minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121393: fltTcaVnsRxPkts15minRxpacketsMin

Severity: variable

Explanation: This fault is caused by "Rx minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121394: fltTcaVnsRxPkts1hRxpacketsMin

Severity: variable

Explanation: This fault is caused by "Rx minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121395: fltTcaVnsRxPkts1dRxpacketsMin

Severity: variable

Explanation: This fault is caused by "Rx minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121396: fltTcaVnsRxPkts1wRxpacketsMin

Severity: variable

Explanation: This fault is caused by "Rx minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121397: fltTcaVnsRxPkts1moRxpacketsMin

Severity: variable

Explanation: This fault is caused by "Rx minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121398: fltTcaVnsRxPkts1qtrRxpacketsMin

Severity: variable

Explanation: This fault is caused by "Rx minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121399: fltTcaVnsRxPkts1yearRxpacketsMin

Severity: variable

Explanation: This fault is caused by "Rx minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1214: fltBgpPeerEntryOperStShut

Severity: warning

Explanation: This fault occurs when the peer is shut down because the prefix limit is exceeded or no memory

Recommended Action: To recover from this fault, try the following actions:

1. Look at any configuration issues

2. Verify the configuration is correct/complete

3. Reduce the number of prefixes exported into bgp

4. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F121400: fltTcaVnsRxPkts5minRxpacketsMax

Severity: variable

Explanation: This fault is caused by "Rx maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121401: fltTcaVnsRxPkts15minRxpacketsMax

Severity: variable

Explanation: This fault is caused by "Rx maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121402: fltTcaVnsRxPkts1hRxpacketsMax

Severity: variable

Explanation: This fault is caused by "Rx maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121403: fltTcaVnsRxPkts1dRxpacketsMax

Severity: variable

Explanation: This fault is caused by "Rx maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121404: fltTcaVnsRxPkts1wRxpacketsMax

Severity: variable

Explanation: This fault is caused by "Rx maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121405: fltTcaVnsRxPkts1moRxpacketsMax

Severity: variable

Explanation: This fault is caused by "Rx maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121406: fltTcaVnsRxPkts1qtrRxpacketsMax

Severity: variable

Explanation: This fault is caused by "Rx maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121407: fltTcaVnsRxPkts1yearRxpacketsMax

Severity: variable

Explanation: This fault is caused by "Rx maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121408: fltTcaVnsRxPkts5minRxpacketsAvg

Severity: variable

Explanation: This fault is caused by "Rx average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121409: fltTcaVnsRxPkts15minRxpacketsAvg

Severity: variable

Explanation: This fault is caused by "Rx average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121410: fltTcaVnsRxPkts1hRxpacketsAvg

Severity: variable

Explanation: This fault is caused by "Rx average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121411: fltTcaVnsRxPkts1dRxpacketsAvg

Severity: variable

Explanation: This fault is caused by "Rx average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121412: fltTcaVnsRxPkts1wRxpacketsAvg

Severity: variable

Explanation: This fault is caused by "Rx average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121413: fltTcaVnsRxPkts1moRxpacketsAvg

Severity: variable

Explanation: This fault is caused by "Rx average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121414: fltTcaVnsRxPkts1qtrRxpacketsAvg

Severity: variable

Explanation: This fault is caused by "Rx average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121415: fltTcaVnsRxPkts1yearRxpacketsAvg

Severity: variable

Explanation: This fault is caused by "Rx average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121440: fltTcaVnsRxPkts5minRxpacketsTr

Severity: variable

Explanation: This fault is caused by "Rx trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121441: fltTcaVnsRxPkts15minRxpacketsTr

Severity: variable

Explanation: This fault is caused by "Rx trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121442: fltTcaVnsRxPkts1hRxpacketsTr

Severity: variable

Explanation: This fault is caused by "Rx trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121443: fltTcaVnsRxPkts1dRxpacketsTr

Severity: variable

Explanation: This fault is caused by "Rx trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121444: fltTcaVnsRxPkts1wRxpacketsTr

Severity: variable

Explanation: This fault is caused by "Rx trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121445: fltTcaVnsRxPkts1moRxpacketsTr

Severity: variable

Explanation: This fault is caused by "Rx trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121446: fltTcaVnsRxPkts1qtrRxpacketsTr

Severity: variable

Explanation: This fault is caused by "Rx trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121447: fltTcaVnsRxPkts1yearRxpacketsTr

Severity: variable

Explanation: This fault is caused by "Rx trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121448: fltTcaVnsRxPkts5minRxpacketsRate

Severity: variable

Explanation: This fault is caused by "Rx rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121449: fltTcaVnsRxPkts15minRxpacketsRate

Severity: variable

Explanation: This fault is caused by "Rx rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121450: fltTcaVnsRxPkts1hRxpacketsRate

Severity: variable

Explanation: This fault is caused by "Rx rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121451: fltTcaVnsRxPkts1dRxpacketsRate

Severity: variable

Explanation: This fault is caused by "Rx rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121452: fltTcaVnsRxPkts1wRxpacketsRate

Severity: variable

Explanation: This fault is caused by "Rx rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121453: fltTcaVnsRxPkts1moRxpacketsRate

Severity: variable

Explanation: This fault is caused by "Rx rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121454: fltTcaVnsRxPkts1qtrRxpacketsRate

Severity: variable

Explanation: This fault is caused by "Rx rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121455: fltTcaVnsRxPkts1yearRxpacketsRate

Severity: variable

Explanation: This fault is caused by "Rx rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Rx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1215: fltBgpPeerAfEntryAfPfxLimitExceeded

Severity: warning

Explanation: This fault occurs when the accepted prefixes from the peer is greater than the configured limit

Recommended Action: To recover from this fault, try the following actions:

1. Look at any configuration issues

2. Verify the configuration is correct/complete

3. Reduce the number of prefixes exported into bgp

4. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F121576: fltTcaVnsTxPkts5minTxdropsLast

Severity: variable

Explanation: This fault is caused by "Tx Dropped current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121577: fltTcaVnsTxPkts15minTxdropsLast

Severity: variable

Explanation: This fault is caused by "Tx Dropped current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121578: fltTcaVnsTxPkts1hTxdropsLast

Severity: variable

Explanation: This fault is caused by "Tx Dropped current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121579: fltTcaVnsTxPkts1dTxdropsLast

Severity: variable

Explanation: This fault is caused by "Tx Dropped current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121580: fltTcaVnsTxPkts1wTxdropsLast

Severity: variable

Explanation: This fault is caused by "Tx Dropped current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121581: fltTcaVnsTxPkts1moTxdropsLast

Severity: variable

Explanation: This fault is caused by "Tx Dropped current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121582: fltTcaVnsTxPkts1qtrTxdropsLast

Severity: variable

Explanation: This fault is caused by "Tx Dropped current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121583: fltTcaVnsTxPkts1yearTxdropsLast

Severity: variable

Explanation: This fault is caused by "Tx Dropped current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121592: fltTcaVnsTxPkts5minTxdropsCum

Severity: variable

Explanation: This fault is caused by "Tx Dropped cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121593: fltTcaVnsTxPkts15minTxdropsCum

Severity: variable

Explanation: This fault is caused by "Tx Dropped cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121594: fltTcaVnsTxPkts1hTxdropsCum

Severity: variable

Explanation: This fault is caused by "Tx Dropped cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121595: fltTcaVnsTxPkts1dTxdropsCum

Severity: variable

Explanation: This fault is caused by "Tx Dropped cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121596: fltTcaVnsTxPkts1wTxdropsCum

Severity: variable

Explanation: This fault is caused by "Tx Dropped cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121597: fltTcaVnsTxPkts1moTxdropsCum

Severity: variable

Explanation: This fault is caused by "Tx Dropped cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121598: fltTcaVnsTxPkts1qtrTxdropsCum

Severity: variable

Explanation: This fault is caused by "Tx Dropped cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121599: fltTcaVnsTxPkts1yearTxdropsCum

Severity: variable

Explanation: This fault is caused by "Tx Dropped cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121600: fltTcaVnsTxPkts5minTxdropsPer

Severity: variable

Explanation: This fault is caused by "Tx Dropped periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121601: fltTcaVnsTxPkts15minTxdropsPer

Severity: variable

Explanation: This fault is caused by "Tx Dropped periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121602: fltTcaVnsTxPkts1hTxdropsPer

Severity: variable

Explanation: This fault is caused by "Tx Dropped periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121603: fltTcaVnsTxPkts1dTxdropsPer

Severity: variable

Explanation: This fault is caused by "Tx Dropped periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121604: fltTcaVnsTxPkts1wTxdropsPer

Severity: variable

Explanation: This fault is caused by "Tx Dropped periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121605: fltTcaVnsTxPkts1moTxdropsPer

Severity: variable

Explanation: This fault is caused by "Tx Dropped periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121606: fltTcaVnsTxPkts1qtrTxdropsPer

Severity: variable

Explanation: This fault is caused by "Tx Dropped periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121607: fltTcaVnsTxPkts1yearTxdropsPer

Severity: variable

Explanation: This fault is caused by "Tx Dropped periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121608: fltTcaVnsTxPkts5minTxdropsMin

Severity: variable

Explanation: This fault is caused by "Tx Dropped minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121609: fltTcaVnsTxPkts15minTxdropsMin

Severity: variable

Explanation: This fault is caused by "Tx Dropped minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121610: fltTcaVnsTxPkts1hTxdropsMin

Severity: variable

Explanation: This fault is caused by "Tx Dropped minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121611: fltTcaVnsTxPkts1dTxdropsMin

Severity: variable

Explanation: This fault is caused by "Tx Dropped minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121612: fltTcaVnsTxPkts1wTxdropsMin

Severity: variable

Explanation: This fault is caused by "Tx Dropped minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121613: fltTcaVnsTxPkts1moTxdropsMin

Severity: variable

Explanation: This fault is caused by "Tx Dropped minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121614: fltTcaVnsTxPkts1qtrTxdropsMin

Severity: variable

Explanation: This fault is caused by "Tx Dropped minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121615: fltTcaVnsTxPkts1yearTxdropsMin

Severity: variable

Explanation: This fault is caused by "Tx Dropped minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121616: fltTcaVnsTxPkts5minTxdropsMax

Severity: variable

Explanation: This fault is caused by "Tx Dropped maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121617: fltTcaVnsTxPkts15minTxdropsMax

Severity: variable

Explanation: This fault is caused by "Tx Dropped maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121618: fltTcaVnsTxPkts1hTxdropsMax

Severity: variable

Explanation: This fault is caused by "Tx Dropped maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121619: fltTcaVnsTxPkts1dTxdropsMax

Severity: variable

Explanation: This fault is caused by "Tx Dropped maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121620: fltTcaVnsTxPkts1wTxdropsMax

Severity: variable

Explanation: This fault is caused by "Tx Dropped maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121621: fltTcaVnsTxPkts1moTxdropsMax

Severity: variable

Explanation: This fault is caused by "Tx Dropped maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121622: fltTcaVnsTxPkts1qtrTxdropsMax

Severity: variable

Explanation: This fault is caused by "Tx Dropped maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121623: fltTcaVnsTxPkts1yearTxdropsMax

Severity: variable

Explanation: This fault is caused by "Tx Dropped maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121624: fltTcaVnsTxPkts5minTxdropsAvg

Severity: variable

Explanation: This fault is caused by "Tx Dropped average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121625: fltTcaVnsTxPkts15minTxdropsAvg

Severity: variable

Explanation: This fault is caused by "Tx Dropped average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121626: fltTcaVnsTxPkts1hTxdropsAvg

Severity: variable

Explanation: This fault is caused by "Tx Dropped average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121627: fltTcaVnsTxPkts1dTxdropsAvg

Severity: variable

Explanation: This fault is caused by "Tx Dropped average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121628: fltTcaVnsTxPkts1wTxdropsAvg

Severity: variable

Explanation: This fault is caused by "Tx Dropped average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121629: fltTcaVnsTxPkts1moTxdropsAvg

Severity: variable

Explanation: This fault is caused by "Tx Dropped average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121630: fltTcaVnsTxPkts1qtrTxdropsAvg

Severity: variable

Explanation: This fault is caused by "Tx Dropped average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121631: fltTcaVnsTxPkts1yearTxdropsAvg

Severity: variable

Explanation: This fault is caused by "Tx Dropped average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121656: fltTcaVnsTxPkts5minTxdropsTr

Severity: variable

Explanation: This fault is caused by "Tx Dropped trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121657: fltTcaVnsTxPkts15minTxdropsTr

Severity: variable

Explanation: This fault is caused by "Tx Dropped trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121658: fltTcaVnsTxPkts1hTxdropsTr

Severity: variable

Explanation: This fault is caused by "Tx Dropped trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121659: fltTcaVnsTxPkts1dTxdropsTr

Severity: variable

Explanation: This fault is caused by "Tx Dropped trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121660: fltTcaVnsTxPkts1wTxdropsTr

Severity: variable

Explanation: This fault is caused by "Tx Dropped trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121661: fltTcaVnsTxPkts1moTxdropsTr

Severity: variable

Explanation: This fault is caused by "Tx Dropped trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121662: fltTcaVnsTxPkts1qtrTxdropsTr

Severity: variable

Explanation: This fault is caused by "Tx Dropped trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121663: fltTcaVnsTxPkts1yearTxdropsTr

Severity: variable

Explanation: This fault is caused by "Tx Dropped trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121664: fltTcaVnsTxPkts5minTxdropsRate

Severity: variable

Explanation: This fault is caused by "Tx Dropped rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121665: fltTcaVnsTxPkts15minTxdropsRate

Severity: variable

Explanation: This fault is caused by "Tx Dropped rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121666: fltTcaVnsTxPkts1hTxdropsRate

Severity: variable

Explanation: This fault is caused by "Tx Dropped rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121667: fltTcaVnsTxPkts1dTxdropsRate

Severity: variable

Explanation: This fault is caused by "Tx Dropped rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121668: fltTcaVnsTxPkts1wTxdropsRate

Severity: variable

Explanation: This fault is caused by "Tx Dropped rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121669: fltTcaVnsTxPkts1moTxdropsRate

Severity: variable

Explanation: This fault is caused by "Tx Dropped rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121670: fltTcaVnsTxPkts1qtrTxdropsRate

Severity: variable

Explanation: This fault is caused by "Tx Dropped rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121671: fltTcaVnsTxPkts1yearTxdropsRate

Severity: variable

Explanation: This fault is caused by "Tx Dropped rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Dropped" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121792: fltTcaVnsTxPkts5minTxerrorsLast

Severity: variable

Explanation: This fault is caused by "Tx Errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121793: fltTcaVnsTxPkts15minTxerrorsLast

Severity: variable

Explanation: This fault is caused by "Tx Errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121794: fltTcaVnsTxPkts1hTxerrorsLast

Severity: variable

Explanation: This fault is caused by "Tx Errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121795: fltTcaVnsTxPkts1dTxerrorsLast

Severity: variable

Explanation: This fault is caused by "Tx Errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121796: fltTcaVnsTxPkts1wTxerrorsLast

Severity: variable

Explanation: This fault is caused by "Tx Errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121797: fltTcaVnsTxPkts1moTxerrorsLast

Severity: variable

Explanation: This fault is caused by "Tx Errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121798: fltTcaVnsTxPkts1qtrTxerrorsLast

Severity: variable

Explanation: This fault is caused by "Tx Errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121799: fltTcaVnsTxPkts1yearTxerrorsLast

Severity: variable

Explanation: This fault is caused by "Tx Errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121808: fltTcaVnsTxPkts5minTxerrorsCum

Severity: variable

Explanation: This fault is caused by "Tx Errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121809: fltTcaVnsTxPkts15minTxerrorsCum

Severity: variable

Explanation: This fault is caused by "Tx Errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121810: fltTcaVnsTxPkts1hTxerrorsCum

Severity: variable

Explanation: This fault is caused by "Tx Errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121811: fltTcaVnsTxPkts1dTxerrorsCum

Severity: variable

Explanation: This fault is caused by "Tx Errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121812: fltTcaVnsTxPkts1wTxerrorsCum

Severity: variable

Explanation: This fault is caused by "Tx Errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121813: fltTcaVnsTxPkts1moTxerrorsCum

Severity: variable

Explanation: This fault is caused by "Tx Errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121814: fltTcaVnsTxPkts1qtrTxerrorsCum

Severity: variable

Explanation: This fault is caused by "Tx Errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121815: fltTcaVnsTxPkts1yearTxerrorsCum

Severity: variable

Explanation: This fault is caused by "Tx Errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121816: fltTcaVnsTxPkts5minTxerrorsPer

Severity: variable

Explanation: This fault is caused by "Tx Errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121817: fltTcaVnsTxPkts15minTxerrorsPer

Severity: variable

Explanation: This fault is caused by "Tx Errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121818: fltTcaVnsTxPkts1hTxerrorsPer

Severity: variable

Explanation: This fault is caused by "Tx Errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121819: fltTcaVnsTxPkts1dTxerrorsPer

Severity: variable

Explanation: This fault is caused by "Tx Errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121820: fltTcaVnsTxPkts1wTxerrorsPer

Severity: variable

Explanation: This fault is caused by "Tx Errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121821: fltTcaVnsTxPkts1moTxerrorsPer

Severity: variable

Explanation: This fault is caused by "Tx Errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121822: fltTcaVnsTxPkts1qtrTxerrorsPer

Severity: variable

Explanation: This fault is caused by "Tx Errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121823: fltTcaVnsTxPkts1yearTxerrorsPer

Severity: variable

Explanation: This fault is caused by "Tx Errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121824: fltTcaVnsTxPkts5minTxerrorsMin

Severity: variable

Explanation: This fault is caused by "Tx Errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121825: fltTcaVnsTxPkts15minTxerrorsMin

Severity: variable

Explanation: This fault is caused by "Tx Errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121826: fltTcaVnsTxPkts1hTxerrorsMin

Severity: variable

Explanation: This fault is caused by "Tx Errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121827: fltTcaVnsTxPkts1dTxerrorsMin

Severity: variable

Explanation: This fault is caused by "Tx Errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121828: fltTcaVnsTxPkts1wTxerrorsMin

Severity: variable

Explanation: This fault is caused by "Tx Errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121829: fltTcaVnsTxPkts1moTxerrorsMin

Severity: variable

Explanation: This fault is caused by "Tx Errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121830: fltTcaVnsTxPkts1qtrTxerrorsMin

Severity: variable

Explanation: This fault is caused by "Tx Errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121831: fltTcaVnsTxPkts1yearTxerrorsMin

Severity: variable

Explanation: This fault is caused by "Tx Errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121832: fltTcaVnsTxPkts5minTxerrorsMax

Severity: variable

Explanation: This fault is caused by "Tx Errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121833: fltTcaVnsTxPkts15minTxerrorsMax

Severity: variable

Explanation: This fault is caused by "Tx Errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121834: fltTcaVnsTxPkts1hTxerrorsMax

Severity: variable

Explanation: This fault is caused by "Tx Errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121835: fltTcaVnsTxPkts1dTxerrorsMax

Severity: variable

Explanation: This fault is caused by "Tx Errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121836: fltTcaVnsTxPkts1wTxerrorsMax

Severity: variable

Explanation: This fault is caused by "Tx Errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121837: fltTcaVnsTxPkts1moTxerrorsMax

Severity: variable

Explanation: This fault is caused by "Tx Errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121838: fltTcaVnsTxPkts1qtrTxerrorsMax

Severity: variable

Explanation: This fault is caused by "Tx Errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121839: fltTcaVnsTxPkts1yearTxerrorsMax

Severity: variable

Explanation: This fault is caused by "Tx Errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121840: fltTcaVnsTxPkts5minTxerrorsAvg

Severity: variable

Explanation: This fault is caused by "Tx Errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121841: fltTcaVnsTxPkts15minTxerrorsAvg

Severity: variable

Explanation: This fault is caused by "Tx Errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121842: fltTcaVnsTxPkts1hTxerrorsAvg

Severity: variable

Explanation: This fault is caused by "Tx Errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121843: fltTcaVnsTxPkts1dTxerrorsAvg

Severity: variable

Explanation: This fault is caused by "Tx Errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121844: fltTcaVnsTxPkts1wTxerrorsAvg

Severity: variable

Explanation: This fault is caused by "Tx Errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121845: fltTcaVnsTxPkts1moTxerrorsAvg

Severity: variable

Explanation: This fault is caused by "Tx Errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121846: fltTcaVnsTxPkts1qtrTxerrorsAvg

Severity: variable

Explanation: This fault is caused by "Tx Errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121847: fltTcaVnsTxPkts1yearTxerrorsAvg

Severity: variable

Explanation: This fault is caused by "Tx Errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121872: fltTcaVnsTxPkts5minTxerrorsTr

Severity: variable

Explanation: This fault is caused by "Tx Errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121873: fltTcaVnsTxPkts15minTxerrorsTr

Severity: variable

Explanation: This fault is caused by "Tx Errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121874: fltTcaVnsTxPkts1hTxerrorsTr

Severity: variable

Explanation: This fault is caused by "Tx Errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121875: fltTcaVnsTxPkts1dTxerrorsTr

Severity: variable

Explanation: This fault is caused by "Tx Errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121876: fltTcaVnsTxPkts1wTxerrorsTr

Severity: variable

Explanation: This fault is caused by "Tx Errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121877: fltTcaVnsTxPkts1moTxerrorsTr

Severity: variable

Explanation: This fault is caused by "Tx Errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121878: fltTcaVnsTxPkts1qtrTxerrorsTr

Severity: variable

Explanation: This fault is caused by "Tx Errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121879: fltTcaVnsTxPkts1yearTxerrorsTr

Severity: variable

Explanation: This fault is caused by "Tx Errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121880: fltTcaVnsTxPkts5minTxerrorsRate

Severity: variable

Explanation: This fault is caused by "Tx Errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121881: fltTcaVnsTxPkts15minTxerrorsRate

Severity: variable

Explanation: This fault is caused by "Tx Errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121882: fltTcaVnsTxPkts1hTxerrorsRate

Severity: variable

Explanation: This fault is caused by "Tx Errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121883: fltTcaVnsTxPkts1dTxerrorsRate

Severity: variable

Explanation: This fault is caused by "Tx Errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121884: fltTcaVnsTxPkts1wTxerrorsRate

Severity: variable

Explanation: This fault is caused by "Tx Errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121885: fltTcaVnsTxPkts1moTxerrorsRate

Severity: variable

Explanation: This fault is caused by "Tx Errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121886: fltTcaVnsTxPkts1qtrTxerrorsRate

Severity: variable

Explanation: This fault is caused by "Tx Errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F121887: fltTcaVnsTxPkts1yearTxerrorsRate

Severity: variable

Explanation: This fault is caused by "Tx Errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122008: fltTcaVnsTxPkts5minTxpacketsLast

Severity: variable

Explanation: This fault is caused by "Tx current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122009: fltTcaVnsTxPkts15minTxpacketsLast

Severity: variable

Explanation: This fault is caused by "Tx current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122010: fltTcaVnsTxPkts1hTxpacketsLast

Severity: variable

Explanation: This fault is caused by "Tx current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122011: fltTcaVnsTxPkts1dTxpacketsLast

Severity: variable

Explanation: This fault is caused by "Tx current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122012: fltTcaVnsTxPkts1wTxpacketsLast

Severity: variable

Explanation: This fault is caused by "Tx current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122013: fltTcaVnsTxPkts1moTxpacketsLast

Severity: variable

Explanation: This fault is caused by "Tx current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122014: fltTcaVnsTxPkts1qtrTxpacketsLast

Severity: variable

Explanation: This fault is caused by "Tx current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122015: fltTcaVnsTxPkts1yearTxpacketsLast

Severity: variable

Explanation: This fault is caused by "Tx current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122024: fltTcaVnsTxPkts5minTxpacketsCum

Severity: variable

Explanation: This fault is caused by "Tx cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122025: fltTcaVnsTxPkts15minTxpacketsCum

Severity: variable

Explanation: This fault is caused by "Tx cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122026: fltTcaVnsTxPkts1hTxpacketsCum

Severity: variable

Explanation: This fault is caused by "Tx cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122027: fltTcaVnsTxPkts1dTxpacketsCum

Severity: variable

Explanation: This fault is caused by "Tx cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122028: fltTcaVnsTxPkts1wTxpacketsCum

Severity: variable

Explanation: This fault is caused by "Tx cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122029: fltTcaVnsTxPkts1moTxpacketsCum

Severity: variable

Explanation: This fault is caused by "Tx cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122030: fltTcaVnsTxPkts1qtrTxpacketsCum

Severity: variable

Explanation: This fault is caused by "Tx cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122031: fltTcaVnsTxPkts1yearTxpacketsCum

Severity: variable

Explanation: This fault is caused by "Tx cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122032: fltTcaVnsTxPkts5minTxpacketsPer

Severity: variable

Explanation: This fault is caused by "Tx periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122033: fltTcaVnsTxPkts15minTxpacketsPer

Severity: variable

Explanation: This fault is caused by "Tx periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122034: fltTcaVnsTxPkts1hTxpacketsPer

Severity: variable

Explanation: This fault is caused by "Tx periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122035: fltTcaVnsTxPkts1dTxpacketsPer

Severity: variable

Explanation: This fault is caused by "Tx periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122036: fltTcaVnsTxPkts1wTxpacketsPer

Severity: variable

Explanation: This fault is caused by "Tx periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122037: fltTcaVnsTxPkts1moTxpacketsPer

Severity: variable

Explanation: This fault is caused by "Tx periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122038: fltTcaVnsTxPkts1qtrTxpacketsPer

Severity: variable

Explanation: This fault is caused by "Tx periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122039: fltTcaVnsTxPkts1yearTxpacketsPer

Severity: variable

Explanation: This fault is caused by "Tx periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122040: fltTcaVnsTxPkts5minTxpacketsMin

Severity: variable

Explanation: This fault is caused by "Tx minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122041: fltTcaVnsTxPkts15minTxpacketsMin

Severity: variable

Explanation: This fault is caused by "Tx minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122042: fltTcaVnsTxPkts1hTxpacketsMin

Severity: variable

Explanation: This fault is caused by "Tx minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122043: fltTcaVnsTxPkts1dTxpacketsMin

Severity: variable

Explanation: This fault is caused by "Tx minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122044: fltTcaVnsTxPkts1wTxpacketsMin

Severity: variable

Explanation: This fault is caused by "Tx minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122045: fltTcaVnsTxPkts1moTxpacketsMin

Severity: variable

Explanation: This fault is caused by "Tx minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122046: fltTcaVnsTxPkts1qtrTxpacketsMin

Severity: variable

Explanation: This fault is caused by "Tx minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122047: fltTcaVnsTxPkts1yearTxpacketsMin

Severity: variable

Explanation: This fault is caused by "Tx minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122048: fltTcaVnsTxPkts5minTxpacketsMax

Severity: variable

Explanation: This fault is caused by "Tx maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122049: fltTcaVnsTxPkts15minTxpacketsMax

Severity: variable

Explanation: This fault is caused by "Tx maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122050: fltTcaVnsTxPkts1hTxpacketsMax

Severity: variable

Explanation: This fault is caused by "Tx maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122051: fltTcaVnsTxPkts1dTxpacketsMax

Severity: variable

Explanation: This fault is caused by "Tx maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122052: fltTcaVnsTxPkts1wTxpacketsMax

Severity: variable

Explanation: This fault is caused by "Tx maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122053: fltTcaVnsTxPkts1moTxpacketsMax

Severity: variable

Explanation: This fault is caused by "Tx maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122054: fltTcaVnsTxPkts1qtrTxpacketsMax

Severity: variable

Explanation: This fault is caused by "Tx maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122055: fltTcaVnsTxPkts1yearTxpacketsMax

Severity: variable

Explanation: This fault is caused by "Tx maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122056: fltTcaVnsTxPkts5minTxpacketsAvg

Severity: variable

Explanation: This fault is caused by "Tx average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122057: fltTcaVnsTxPkts15minTxpacketsAvg

Severity: variable

Explanation: This fault is caused by "Tx average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122058: fltTcaVnsTxPkts1hTxpacketsAvg

Severity: variable

Explanation: This fault is caused by "Tx average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122059: fltTcaVnsTxPkts1dTxpacketsAvg

Severity: variable

Explanation: This fault is caused by "Tx average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122060: fltTcaVnsTxPkts1wTxpacketsAvg

Severity: variable

Explanation: This fault is caused by "Tx average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122061: fltTcaVnsTxPkts1moTxpacketsAvg

Severity: variable

Explanation: This fault is caused by "Tx average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122062: fltTcaVnsTxPkts1qtrTxpacketsAvg

Severity: variable

Explanation: This fault is caused by "Tx average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122063: fltTcaVnsTxPkts1yearTxpacketsAvg

Severity: variable

Explanation: This fault is caused by "Tx average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122088: fltTcaVnsTxPkts5minTxpacketsTr

Severity: variable

Explanation: This fault is caused by "Tx trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122089: fltTcaVnsTxPkts15minTxpacketsTr

Severity: variable

Explanation: This fault is caused by "Tx trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122090: fltTcaVnsTxPkts1hTxpacketsTr

Severity: variable

Explanation: This fault is caused by "Tx trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122091: fltTcaVnsTxPkts1dTxpacketsTr

Severity: variable

Explanation: This fault is caused by "Tx trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122092: fltTcaVnsTxPkts1wTxpacketsTr

Severity: variable

Explanation: This fault is caused by "Tx trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122093: fltTcaVnsTxPkts1moTxpacketsTr

Severity: variable

Explanation: This fault is caused by "Tx trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122094: fltTcaVnsTxPkts1qtrTxpacketsTr

Severity: variable

Explanation: This fault is caused by "Tx trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122095: fltTcaVnsTxPkts1yearTxpacketsTr

Severity: variable

Explanation: This fault is caused by "Tx trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122096: fltTcaVnsTxPkts5minTxpacketsRate

Severity: variable

Explanation: This fault is caused by "Tx rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122097: fltTcaVnsTxPkts15minTxpacketsRate

Severity: variable

Explanation: This fault is caused by "Tx rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122098: fltTcaVnsTxPkts1hTxpacketsRate

Severity: variable

Explanation: This fault is caused by "Tx rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122099: fltTcaVnsTxPkts1dTxpacketsRate

Severity: variable

Explanation: This fault is caused by "Tx rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122100: fltTcaVnsTxPkts1wTxpacketsRate

Severity: variable

Explanation: This fault is caused by "Tx rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122101: fltTcaVnsTxPkts1moTxpacketsRate

Severity: variable

Explanation: This fault is caused by "Tx rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122102: fltTcaVnsTxPkts1qtrTxpacketsRate

Severity: variable

Explanation: This fault is caused by "Tx rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F122103: fltTcaVnsTxPkts1yearTxpacketsRate

Severity: variable

Explanation: This fault is caused by "Tx rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Tx" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1224: fltSviIfPortDown

Severity: major

Explanation: This fault occurs when the svi bring up failed because of hardware programming failure

Recommended Action: To recover from this fault, try the following actions:

1. Try reconfiguring the SVI.

2. If the above action did not resolve the issue, try rebooting the switch using CLI or GUI.

3. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F1233: fltInfraAttEntityPConfigFailed

Severity: major

Explanation: Infra Policy fault is raised when both CDP and LLDP policies are configured for the same Attached Entity Profile.

Recommended Action: If you see this fault, take the following actions:

1. Review the fault message to identify configuration issue.

2. Modify configuration to remove any invalid configuration parameters.

3. If the listed recommendations do not resolve the issue, collect tech-support file and contact Cisco TAC.

F1236: fltInfraRsMonFexInfraPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1237: fltVmmRsDomMcastAddrNsResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1239: fltFabricLinkFailed

Severity: critical

Explanation: This fault occurs when a link state is not ok

Recommended Action: If you see this fault, take the following action:

1. Check if connectivity between the nodes for the link is ok.

2. Check if there is any mismatch of fabricDomain and infraVlan between APIC and leaf.

3. fabricDomain and infraVlan mismatch usually happens when a new leaf/APIC added to the existing fabric.

4. If a new leaf from another fabric with different fabricDomain and infraVlan added then clean reboot the leaf.

5. If a new APIC added then the fabricID and infraVlan should match with existing fabric.

6. If the above action did not resolve the issue, create a show tech-support file and contact Cisco TAC.

F1240: fltVzTabooConfigurationFailed

Severity: minor

Explanation: This fault occurs when a Taboo list is incompletely / incorrectly configured.

Recommended Action: If you see this fault, take the following actions:

1. Look at configIssues

2. Verify the configuration is correct / complete and rectify any of the configIssues

3. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F1241: fltFabricRsApplTechSupOnDResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1258: fltInfraRsFabricNodeResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1259: fltActrlMgmtRuleSwProgFailed

Severity: major

Explanation: This fault occurs when policy manager fails to activate a management rule due to software programming failure

Recommended Action: To recover from this fault, try the following actions:

1. Look at any configuration issues

2. Verify the configuration is correct/complete

3. If the above are fine, remove unsued rules and retry

F1261: fltInfraNsIssuesConfig-failed

Severity: minor

Explanation: This fault occurs when a encap namespace (VLAN/VXLAN namespace etc.) is incorrectly configured.

Recommended Action: If you see this fault, take the following actions:

1. Look at the configuration for issues

2. For overlapping-encap-namespace, check the VLAN/VXLAN Instance Profiles and the associated domain configurations. Two overlapping instance profiles are not allowed to be pushed to the same node.

3. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F1262: fltInfraServiceOptimalLeadership

Severity: minor

Explanation: This fault occurs when a controller reports some services do not have ideal replica leaders for some of the internal database partitions (shards).

Recommended Action: If you see this fault, take the following actions:

1. Ensure that you have a minimum of 3 APICs

2. Verify that all the APICs are reported as available and Fully-Fit in cluster.

3. If the above actions did not resolve the issue, create a tech-support file and contact Cisco TAC.

F1284: fltVmmRsDefaultLacpLagPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1286: fltTraceroutepTrNodeInvalidSrcOrDst

Severity: minor

Explanation: This fault occurs when a Spine node is used as a source or destination in a traceroute.

Recommended Action: If you see this fault, take the following actions:

1. Verify that the policy for traceroute is applied to the correct Node by making sure the proper Node ID is in the "Target DN" property.

2. Verify that the correct Nodes have been chosen as sources and destinations.

3. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F1295: fltDatetimeConfIssuesConfig-failed

Severity: minor

Explanation: This fault is raised when a Date and Time Policy (datetime:Pol) fails to apply due to configuration issues.

Recommended Action: If you see this fault, take the following actions:

1. Ensure that the path (over the inband or out-of-band managment network) that the date and time policy would use to get to the date and time server is configured properly and accessible.

2. Ensure that the End Point Group is configured properly for the date and time policy.

3. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F1296: fltVpcIfIfDown

Severity: major

Explanation: This fault occurs when vpc interface goes down while peer interface is also down.

Recommended Action: Please verify the port connectivity.

F1297: fltOamRsSrcEncapResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1298: fltFvPolDeliveryStatusConfigurationFailed

Severity: minor

Explanation: : This fault occurs when deliverying EPg policies to a node has failed

Recommended Action: : If you see this fault, take the following actions:

- Verify node is reachable by pinging the TEP address from the APIC

- Verify node can deploy this type of policy (spine can deploy only mgmt EPg)

- If Node is decomissioned: recomission the node again to rectify the fault. Decomission status of Node can be checked by looking at APIC GUI (https://apic-controller-ip-addr) -> Fabric -> Fabric Policies -> Fabric Membership, find the node-id and check its corresponding 'decomissioned' column value.

- Check whether node is not in unreachable status by looking at APIC GUI - > Fabric -> Unreachables Nodes. If node is part of unreachable node list, then physically check whether node is wired up to SPINE and recheck the fault again. Check node is not in loader> prompt and booted successfully via physical console cable.

If the above conditions did not resolve the issue, create a tech-support file and contact Cisco TAC.

F1299: fltFabricCreatedByConfigurationFailed

Severity: minor

Explanation: This fault occurs when a selector level policy has been created, all policies in the corresponding policy group should be deployed on all fabric nodes in that selector level policy but those selector level policies have not been deployed to one or more fabric nodes.

Recommended Action: If you see this fault, take the following actions:

1. Verify that corresponding fabric node is ready to receive policies

2. Verify that corresponding fabric node is capable of handling those selector level policies

3. If the above actions did not resolve the issue, create a tech-support file and contact Cisco TAC.

F1300: fltFabricRsNodeGroupConfigurationFailed

Severity: minor

Explanation: This fault occurs when a Fabric Node Group (fabricNodeGrp) has been created, all the policies targeted by the policy group should have been deployed on all the fabric nodes in that group, however some of those policies have not been deployed to a fabric node.

Recommended Action: If you see this fault, take the following actions:

1. Verify that corresponding fabric node is ready to receive policies

2. Verify that corresponding fabric node is capable of handling those fabric node group level policies

3. If the above actions did not resolve the issue, create a tech-support file and contact Cisco TAC.

F1301: fltSnmpRsCommToCtxAttResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1305: fltSnmpConfIssuesConfig-failed

Severity: minor

Explanation: This fault occurs when SNMP policy configuration failed to apply.

Recommended Action: If you see this fault, take the following actions:

1. For access-epg-not-specified, ensure that the SNMP policy has a correctly configured relationship to the management EPG.

2. For access-epp-is-not-available, confirm the affected endpoint is reachable in the management EPG and management tenant with selected EPG is correctly configured on endpoint.

3. For context-info-is-not-present-in-epp, confirm the management tenant is correctly configured with a context/network

4. For community-is-not-configured-in-snmp-policy, check that the SNMP community specified in the tenant configuration exists in the SNMP policy for the fabric.

5. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F1307: fltVnsRsMConnAttInstResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1310: fltVnsRsVDevToDomainRefResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1313: fltCompHpNicOperationalIssues

Severity: major

Explanation: This fault is raised when remote or external disruptive operations are performed on Host Physical NIC from within the Controller.

Recommended Action: If you see this fault, take the following actions:

1. Restore the NIC to the original state.

2. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F1314: fltVnsAL4L7ServiceFaultServiceWarningFault

Severity: warning

Explanation: This fault occurs when the L4-L7 service returns a warning fault

Recommended Action: If you see this fault, please refer to L4-L7 device vendor documentation.

F1315: fltVnsAL4L7ServiceFaultServiceCriticalFault

Severity: critical

Explanation: This fault occurs when the L4-L7 service returns a critical fault

Recommended Action: If you see this fault, please refer to L4-L7 device vendor documentation.

F1317: fltEqptPsgPNonRedun

Severity: major

Explanation: This fault occurs when there is a single power supply in the chassis or there are mismatchd power supplies in the chassis

Recommended Action: To recover from this fault, try the following actions:

1. Add more power supplies

2. Remove mismatched power supplies

3. If the above actions did not resolve the issue, create a show tech-support file and contact Cisco TAC

F1318: fltEqptPsgPZeroPwr

Severity: major

Explanation: This fault occurs when PSU are not detected correctly

Recommended Action: To recover from this fault, try the following actions:

1. Properly seat the power supplies

2. Remove mismatched power supplies

3. If the above actions did not resolve the issue, create a show tech-support file and contact Cisco TAC

F1321: fltEqptFtFanTrayFailed

Severity: major

Explanation: This fault occurs when a fan tray fails

Recommended Action: To recover from this fault, try the following actions:

1. Replace the fan tray that failed

2. If the above actions did not resolve the issue, create a show tech-support file and contact Cisco TAC

F1322: fltEqptFanFanFailed

Severity: warning

Explanation: This fault occurs when a fan fails

Recommended Action: To recover from this fault, try the following actions:

1. Check the fan tray to see if it is still fully operational; if not, replace it

2. If the above actions did not resolve the issue, create a show tech-support file and contact Cisco TAC

F1323: fltEqptFtSlotFanTrayMissing

Severity: major

Explanation: This fault occurs when a fan tray is missing

Recommended Action: To recover from this fault, try the following actions:

1. Insert the fan tray

2. If the above actions did not resolve the issue, create a show tech-support file and contact Cisco TAC

F1324: fltVnsCMgmtProxyCMgmtProxy

Severity: major

Explanation: This fault occurs when the there is a failure in setting up the management interface to a service node

Recommended Action: If you see this fault, please try with deleting management interface related configuration and then reposting it back.

F1325: fltVnsCtrlrEpProxyCtrlrEpProxy

Severity: major

Explanation: This fault occurs when there is a failure in setting up the management interface on the controller which is used to communicate to the service node

Recommended Action: If you see this fault, please try with deleting management interface related configuration and then reposting it back.

F1329: fltStatsAExportJobIfc-export-skipped

Severity: minor

Explanation: This fault occurs due to a Stats Export Policy session failure.

Recommended Action: If you see this fault, please check the stats export configuration parameters and health of the destination export server.

F1330: fltStatsAExportJobSw-export-skipped

Severity: minor

Explanation: This fault occurs due to a Stats Export Policy session failure.

Recommended Action: If you see this fault, please check the Stats Export Policy configuration parameters and health of the destination export server.

F1332: fltCallhomeDestStateCallhomeDestState

Severity: minor

Explanation: This fault occurs when sending a callhome message to destination does not succeed.

Recommended Action: If you see this fault, take the following actions:

1. Verify destination information is correct.

2. Ensure it is reachable (ping/ssh) from the fabric and DNS entries have been configured correctly.

3. You may remove and reconfigure the callhome destination.

4. Disable RFC compliant option if enabled.

5. If the above action did not resolve the issue, contact Cisco TAC.

F1336: fltVnsAbsFuncProfValidationFailed

Severity: minor

Explanation: This fault occurs due to an invalid abstract function profile configuration.

Recommended Action: If you see this fault, please ensure that the abstract function profile is valid.

F1339: fltVzSubjConfigurationMissing

Severity: minor

Explanation: This fault occurs when a Subject has a Label, but there is no EPG associated to a Contract that is also associated to that Subject.

Recommended Action: If you see this fault, take the following actions:

1. Look at config issues

2. Verify the configuration is correct / complete

3. For subject-not-in-use-due-to-label, check if the configured label is correct

4. For further details, refer to the documentation for vz:ConfigIssues

5. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F1340: fltFvnsMcastAddrInstPConfigFailed

Severity: minor

Explanation: This fault is raised when a Multicast Address pool cannot be deployed due to a missing or invalid configuration.

Recommended Action: If you see this fault, take the following actions:

1. Review the fault message and correct the invalid configuration.

2. If the above actions did not resolve the issue, collect a tech-support file and contact Cisco TAC.

F1342: fltL2RsDot1pRuleAttConfig-failed

Severity: major

Explanation: This fault occurs when qos manager fails to activate a dot1p rule due to hardware programming failure

Recommended Action: To recover from this fault, try the following actions:

1. Look at any configuration issues

2. Verify the configuration is correct/complete

3. Reduce the number of rules and retry

F1343: fltL2RsDscpRuleAttConfig-failed

Severity: major

Explanation: This fault occurs when qos manager fails to activate a dscp rule due to hardware programming failure

Recommended Action: To recover from this fault, try the following actions:

1. Look at any configuration issues

2. Verify the configuration is correct/complete

3. Reduce the number of rules and retry

F1344: fltIpv4AddrIpv4CfgCtrl

Severity: warning

Explanation: This fault is caused by a hardware programming failure

Recommended Action: The system will periodically retry to program the hardware. If the failure is due to lack of hardware resources, free up resources by removing or simplifying existing configuration. One of the reasons for lack of hardware resources is exhaustion of VLANs in ToR. These hardware resources can be examined by looking at capacity dashboard under OPERATIONS tab. Please check entry against the number of VLANs in output of command show vlan summary issued at node where fault is generated to check whether it exceeds above advertised node capacity.

F1345: fltDbgacRsToEpIpForEpToEpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1346: fltDbgacRsFromEpIpForEpToEpgResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1347: fltDbgacRsToEpIpForEpgToEpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1348: fltDbgacRsFromEpIpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1349: fltDbgacRsToEpIpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1350: fltTraceroutepRsTrEpIpDstResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1351: fltTraceroutepRsTrEpIpSrcResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1353: fltFileRsARemoteHostToEppResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1360: fltCoopAdjEpCoopAdjEpDown

Severity: warning

Explanation: This fault occurs when the operational state of the coop adjacency is down

Recommended Action: To recover from this fault, try the following actions:

1. Get the IP address captured part of "Affected Object" of the fault Code F1360

2. Go to Fabric->Inventory->Fabric Membership and look for the IP address.

3. Check whether that TOR/Spine is inactive.If the status is 'inactive', bring it to the 'active' state. Remove TOR/Spine from ACI Fabric if the TOR/Spine is no longer going to be commissioned again.

F1362: fltSatmFabPFexIncompatible

Severity: warning

Explanation: This fault occurs when there is an incompatibility between the leaf and the attached FEX

Recommended Action: None set.

F1364: fltL2BDNoOptArpFwdWithUnkMacFlood

Severity: warning

Explanation: This fault occurs when the arp flood knob is not set in bridge only mode

Recommended Action: To recover from this fault, try the following actions:

1. Set the arp flood knob for this BD

2. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F1368: fltSnmpClientProgFailed

Severity: major

Explanation: This fault occurs when snmp client security programming fails

Recommended Action: To recover from this fault, try the following actions:

1. Look at any configuration issues.

2. Confirm the affected endpoint is reachable in the management EPG

3. and management tenant with selected EPG is correctly configured on endpoint.

4. If the above are fine, please retry

F1369: fltSnmpUserSecPConfigFailed

Severity: major

Explanation: This fault occurs when snmp user programming fails

Recommended Action: To recover from this fault, try the following actions:

1. Look at any configuration issues

2. Verify the configuration is correct/complete

3. If the above are fine, please retry

F1370: fltInfraIlClMsgSrcOutsider

Severity: critical

Explanation: This fault occurs when keepalive messages arrive periodically from controllers that are considered illegitimate by the controller cluster.

Recommended Action: If you see this fault, take the following actions:

1. The message included with the fault will also include a reason the controller messages are considered illegitimate. Investigate the reason and correct it.

2. If you encounter this fault while trying to add a new controller to cluster, ensure following:

1. If fault is due to a mismatched parameter like fabric domain, TEP pool etc, please setup the new controller again with correct parameters.

2. If you are expanding the cluster(increasing cluster size), please ensure new controller has ID = current cluster size +1.

3. If new controller is replacing an old controller, please ensure decommission, wait for few min and commission back was done for old controller slot.

4. If new controller was part of other cluster, please ensure new controller is cleaned and setup with new cluster parameters.

5. Ensure new controller is running same version as the existing cluster

6. Ensure new controller is not configured as standby

3. Ensure decommissioned controllers don't stay up and connected to the fabric.

4. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F1371: fltPconsRADeploymentStatus

Severity: major

Explanation: This fault occurs when deployment of policy to a leaf/spine fails.

Recommended Action: Check the state of leaf/spine using "acidiag fnvread" and make sure the state of the leaf/spine is active. If not active:

1. Check if leaf/spine is down

2. Check network connectivity of leaf/spine to controllers

3. If above options did not solve, create tech-support and contact Cisco TAC

If active:

1. Create a tech-support file and contact Cisco TAC

F1373: fltCompRsCtrlrPDeployFailed

Severity: major

Explanation: This fault is raised when the Endpoint Group cannot be deployed on a VMM Controller due to a missing or invalid configuration.

Recommended Action: If you see this fault, take the following actions:

1. Review the faults on the associated VMM Controller.

2. Review the fault message and add missing or remove invalid configuration.

3. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F1374: fltVnsRsLIfCtxToBDResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1377: fltVnsFolderInstValidationFailed

Severity: minor

Explanation: This fault occurs when a Folder configuration is invalid.The config issues indicate the exact reason for the error.

Recommended Action: If you see this fault, please modify configuration to resolve the cause of fault.

F1378: fltVnsParamInstValidationFailed

Severity: minor

Explanation: This fault occurs when a Parameter configuration is invalid.The config issues indicate the exact reason for the error.

Recommended Action: If you see this fault, please modify configuration to resolve the cause of fault.

F1379: fltVnsCfgRelInstValidationFailed

Severity: minor

Explanation: This fault occurs when a Relation configuration is invalid.The config issues indicate the exact reason for the error.

Recommended Action: If you see this fault, please modify configuration to resolve the cause of fault.

F1385: fltOspfAdjEpFailed

Severity: warning

Explanation: This fault occurs when the adjacency state is not up

Recommended Action: To recover from this fault, try the following actions:

1. Look at any configuration issues

2. Verify the configuration is correct/complete

3. Check network connectivity to the peer

4. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F1386: fltFvBDNoOptArpFwdWithUnkMacFlood

Severity: warning

Explanation: This fault occurs when the bridge domain ARP flood is not enabled and the L2 unknown unicast is set to flood

Recommended Action: If you see this fault, take the following actions:

1. Enable ARP flood for this BD

2. If the above action did not resolve the issue, create a tech-support. file and contact Cisco TAC

F1387: fltPcAggrIfEthpmCfgCtrl

Severity: warning

Explanation: This fault is caused by a hardware programming failure

Recommended Action: The system will periodically retry to program the hardware. If the failure is due to lack of hardware resources, free up resources by removing or simplifying existing configuration. One of the reasons for lack of hardware resources is exhaustion of VLANs in ToR. These hardware resources can be examined by looking at capacity dashboard under OPERATIONS tab. Please check entry against the number of VLANs in output of command show vlan summary issued at node where fault is generated to check whether it exceeds above advertised node capacity.

F1394: fltEthpmIfPortDownFabric

Severity: minor

Explanation: This fault occurs when a port is down and is in use for fabric

Recommended Action: If you see this fault, take the following actions:

1. Check the port connectivity

2. Administratively shut the port if the port is not in use

3. For mcp-loop-err-disable, this could be due to a loop in the network. Check the config to resolve any loops

4. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F1397: fltMgmtRsOoBCtxResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1399: fltCommRsKeyRingResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1400: fltMgmtRsInstPCtxResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1410: fltInfraClSzEqObstClusterSizeEqualization

Severity: critical

Explanation: This fault occurs when the operational size for a controller cluster can not reach the configured target size.

Recommended Action: If you see this fault, take the following actions:

1. Ensure that the controller cluster is contiguous, it must grow from the end and can not have any gaps in the cluster numbering.

2. If this happens during expansion(target size &gt; operational size), please ensure following:

1. Cluster is fully-fit

2. New controllers are setup with correct ID i.e. from operational size +1, +2..to target size.

3. Look for operational faults with cause "intrusion" and correct them.

3. If this happens during shrink(target size &lt; operational size), please ensure following:

1. Cluster is fully-fit

2. APIC ID = operational size is decommissioned

4. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F1414: fltSyslogDestStateSyslogDestState

Severity: minor

Explanation: This fault occurs when a configured syslog server is not resolvable.

Recommended Action: If you see this fault, take the following actions:

1. Verify destination information is correct.

2. Make sure that the hostname is resolvabale by the DNS.

3. You may remove and reconfigure the syslog destination.

4. If the above action did not resolve the issue, contact Cisco TAC.

F1416: fltVnsAbsFuncConnValidationFailed

Severity: minor

Explanation: This fault occurs when an Abstract Function Connector (AbsFuncConn) has an error.The config issues the exact reason for the error.

Recommended Action: If you see this fault, please modify configuration to resolve the cause of fault.

F1419: fltProcEntryServiceFailed

Severity: major

Explanation: This fault occurs when a Data Management Engine (DME) process fails on a controller

Recommended Action: If you see this fault, take the following actions:

1. Collect the core files, if any.

2. Create a show tech-support file.

3. Contact Cisco TAC.

F1425: fltIpv4AddrOperStDown

Severity: major

Explanation: This fault occurs when the operational state of the ipv4 address state is changed to subnet-overlap/no primary/addr already confgd as next hop in a static route

Recommended Action: To recover from this fault, try the following actions:

1. Look at any configuration issues

2. Verify the configuration is correct/complete

3. If the interface is down, fix connectivity/config to make the interface state up

F1427: fltInfraRsVipAddrNsResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1432: fltMaintUpgStatusSchedulerPausedOnMemberUpgradeFailure

Severity: major

Explanation: This fault occurs when upgrade is paused on a group due to one or more members of the group failing to be upgraded and the maintenance policy specifies that it should pause when there is a failure (pauseOnFailure) or the user manually pauses the scheduler

Recommended Action: If you see this fault, take the following actions:

1. If the scheduler was manually paused, unpause the scheduler

2. Look for individual node faults indicating why the upgrade failed. Try to understand why the upgrade failed. Once you have identified and corrected the reason for the upgrade failure, then unpause the scheduler on this maintenance group.

3. If upgrading in GIR mode and there is no upgrade failure, check if all the spines in a POD are upgrading together. Make sure atleast one spine in a POD is active during upgrade and unpause the scheduler on this maintenance group.

4. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F1433: fltMaintUpgStatusSchedulerPausedOnClusterHealth

Severity: major

Explanation: This fault occurs when upgrade is paused due to cluster not being healthy

Recommended Action: If you see this fault, take the following actions:

1. Look for other faults indicating why the cluster is not healthy. Try to understand why the cluster is not healthy and correct that. Once you have identified and corrected the unhealthy controller cluster, the fault will clear automatically on the next upgrade attempt.

2. If the above action did not resolve the issue, create a show tech-support file and contact Cisco TAC.

F1434: fltMaintRsReltomaintpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1435: fltSpanRsDestToVPortDefResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1436: fltSpanRsSrcToVPortDefResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1449: fltSnmpTrapDestSnmpTrapDestVrfName

Severity: minor

Explanation: This fault occurs when the configured SNMP trap destination endpoint cannot be resolved by the switch.

Recommended Action: If you see this fault, take the following actions:

1. Verify destination information is correct.

2. Verify EPG is configured correctly.

3. Ensure destination is reachable (via ping/ssh) from the fabric and DNS entries have been configured correctly.

4. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F1450: fltSnmpTrapDestSnmpTrapDestEpgDn

Severity: minor

Explanation: This fault occurs when SNMP Trap Destination does not have a valid Endpoint Group Destination configured.

Recommended Action: If you see this fault, take the following actions:

1. Configure EpGDn property of the SNMP Trap Destination.

2. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F1451: fltEqptPsuShut

Severity: minor

Explanation: This fault occurs when psu is shut down

Recommended Action: To recover from this fault, try the following actions:

1. Connect a power supply to this PSU

2. If the above actions did not resolve the issue, create a show tech-support file and contact Cisco TAC

F1467: fltInfraRsStormctrlIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1471: fltVmmPlInfDeployFailed

Severity: major

Explanation: This fault is raised when the SCVMM plugin encounters an exception.

Recommended Action: If you see this fault, take the following action:

1. Check the system events in the SCVMM or WAP machine for details.

F1472: fltSpanRsSessionToDomainRefResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1473: fltVnsScriptRTInfoDownloadState

Severity: major

Explanation: This fault occurs when there is missing function in device package

Recommended Action: If you see this fault, please contact L4-L7 device vendor for a more recent verion of device package.

F1477: fltIpv4NexthopOperStDown

Severity: major

Explanation: This fault occurs when the operational state of the ipv4 Nexthop is down due to Nexthop configured as local address or when a probe is inactive or trackMember goes down

Recommended Action: To recover from this fault, try the following actions:

1. Look at any configuration issues

2. Verify the configuration is correct/complete

3. If NextHop address is configured as local address, fix the Nexthop address to make configuration correct

4. If Nexthop is down because of invalid track-id, fix the track-id with valid ID

5. If Nexthop is down because of track state down, the secondary route will be used to forward all the traffic

F1480: fltMaintUpgJobFaultFailed

Severity: major

Explanation: This fault occurs when a software upgrade fails on a fabric node.

Recommended Action: If you see this fault, take the following actions:

1. Check the target firmware/software release notes whether the node hardware is supported by the particular release.

2. Reboot the fabric node and retry the software installation using a policy upgrade.

3. Reboot the fabric node and retry the software installation using the command line interface.

4. If above actions did not resolve the issue, create a show tech-support file and contact Cisco TAC.

F1483: fltBfdSessSessDown

Severity: major

Explanation: This fault occurs when a bfd session is down.

Recommended Action: Please check the forwarding path to the peer.

F1484: fltOspfv3InstInstMemAlertCritical

Severity: warning

Explanation: This fault occurs when the ospfv3 instance memory alert is critical

Recommended Action: To recover from this fault, try the following actions:

1. Look at any configuration issues

2. Verify the configuration is correct/complete

3. Reduce the number of ospfv3 enabled interfaces

4. Reduce the number of routes into ospfv3

5. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F1486: fltInfraRsMcpIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1487: fltInfraRsOverrideMcpIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1500: fltFvRsCtxToBgpCtxAfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1501: fltFvRsCtxToOspfCtxPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1507: fltL3FwdCtxUneqExtRmac

Severity: warning

Explanation: This fault occurs when all the external L3 interfaces (created for external connectivity) are not configured with the same router mac. This might affect packet forwarding between the external L3 interfaces.

Recommended Action: To recover from this fault, try the following actions:

1. Reconfigure all the external l3 interface router macs with the same value

2. If the above action did not resolve the issue, try rebooting the switch using CLI or GUI.

3. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F1509: fltTopSystemInvalidIBMgmtEncap

Severity: major

Explanation: This fault occurs when APIC inband management encap vlan is invalid/missing

Recommended Action: If you see this fault, take the following action:

1. Modify/Configure the inband mgmt encap

F1510: fltL3extRsInstPToProfileResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1511: fltIpv4NexthopIpv4CfgCtrl

Severity: warning

Explanation: This fault is caused by a hardware programming failure

Recommended Action: The system will periodically retry to program the hardware. If the failure is due to lack of hardware resources, free up resources by removing or simplifying existing configuration. One of the reasons for lack of hardware resources is exhaustion of VLANs in ToR. These hardware resources can be examined by looking at capacity dashboard under OPERATIONS tab. Please check entry against the number of VLANs in output of command show vlan summary issued at node where fault is generated to check whether it exceeds above advertised node capacity.

F1526: fltEqptSlotFailed

Severity: critical

Explanation: This fault occurs when a card sees a fatal error during runtime. The card is put in a fail state and cannot be put back in operation.

Recommended Action: If a card is found in a fail state, collect the show techsupport command output on the switch and contact Cisco TAC to eliminate any known software issues before replacing the hardware.

F1527: fltEqptStorageFull-Warning

Severity: warning

Explanation: This fault occurs when the utilization of storage capacity on a controller is greater than 75%

Recommended Action: If you see this fault, take the following actions:

1. Cleanup any files created by the user on the partition on the storage device that the fault was produced on to free up space.

2. Cleaning of old core files (which are not needed for any investigation) can be accomplished as follows:

3. In the UI, go to Admin - Import/Export - Export Policies - Core - default - Operational, then click on old core files which are not needed for further use and delete.

4. Cleaning of techsupport files can be accompolished as follows:

5. In the UI, go to Admin - Import/Export - Export Policies - default - Operational, then click on individual techsupport files and delete.

6. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F1528: fltEqptStorageFull-Major

Severity: major

Explanation: This fault occurs when storage capacity utilization is between 85% and 90%

Recommended Action: If you see this fault, take the following action:

1. Cleanup any files created by the user on the partition on the storage device that the fault was produced on to free up space

2. Cleaning of old core files (which are not needed for any investigation) can be accomplished as follows:

3. In the UI, go to Admin -> Import/Export -> Export Policies -> Core -> default -> Operational, then click on old core files which are not needed for further use and delete.

4. Cleaning of techsupport files can be accompolished as follows:

5. In the UI, go to Admin -> Import/Export -> Export Policies -> default -> Operational, then click on individual techsupport files and delete.

6. If the above action did not resolve the issue, create a show tech-support file and contact Cisco TAC.

F1529: fltEqptStorageFull-Critical

Severity: critical

Explanation: This fault occurs when storage capacity utilization is greater than 90%

Recommended Action: If you see this fault, take the following actions:

1. Cleanup any files created by the user on the partition on the storage device that the fault was produced on to free up space

2. 1) Cleaning of old core files (which are not needed for any investigation) can be accomplished as follows:

3. In the UI, go to Admin - Import/Export - Export Policies - Core - default - Operational, then click on old core files which are not needed for further use and delete.

4. 2) Cleaning of techsupport files can be accompolished as follows:

5. In the UI, go to Admin - Import/Export - Export Policies - default - Operational, then click on individual techsupport files and delete.

6. 3) Cleaning of Old Image files can be accomplished as follows:

7. In the UI, go to Admin - Firmware - Images, then click on individual Image files and delete.

8. If the above action did not resolve the issue, create a show tech-support file and contact Cisco TAC.

F1534: fltFvRsBDToNdPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1539: fltVnsRsLIfCtxToOutResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1543: fltFabricNodeInactive

Severity: critical

Explanation: This fault occurs when a node is not reachable

Recommended Action: If you see this fault, take the following action:

1. Check the connectivity of the node that cannot be reached.

2. Check if the node is powered up.

3. If the node is decommissioned, clean reboot the node manually as a workaround

4. If the above actions did not resolve the issue, create a show tech-support file and contact Cisco TAC.

F1544: fltFabricNodeUnsupported

Severity: critical

Explanation: This fault occurs when an unsupprted node is connected to the fabric

Recommended Action: If you see this fault, take the following action:

1. Check if the node is a supported model and has been cabled correctly

2. If the above actions did not resolve the issue, create a show tech-support file and contact Cisco TAC.

F1545: fltDbgAcPathAOnGoingAtomicCounterDropsMajor

Severity: major

Explanation: This fault occurs when a significant number of packet drops are detected by a configured and enabled Atomic Counter

Recommended Action: If you see this fault, take the following actions:

1. Check the network configuration in the packet path where this Atomic Counter Policy is configured.

2. Check for any CRC, etc errors in the packet path where this Atomic Counter Policy is configured.

3. Check interface counters and rates in the packet path where this Atomic Counter Policy is configured to make sure there is no oversubscription.

4. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F1546: fltDbgAcPathAOnGoingAtomicCounterDropsMinor

Severity: minor

Explanation: This fault occurs when a small number of packet drops are detected by a configured and enabled Atomic Counter

Recommended Action: If you see this fault, take the following actions:

1. Check the network configuration in the packet path where this Atomic Counter Policy is configured.

2. Check for any CRC, etc errors in the packet path where this Atomic Counter Policy is configured.

3. Check interface counters and rates in the packet path where this Atomic Counter Policy is configured to make sure there is no oversubscription.

4. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F1547: fltDbgAcPathAOnGoingAtomicCounterExcessMajor

Severity: major

Explanation: This fault occurs when a significant number of excess packets are detected by a configured and enabled Atomic Counter

Recommended Action: If you see this fault, take the following actions:

1. Check the network configuration in the packet path where this Atomic Counter Policy is configured.

2. Check interface counters and rates in the packet path where this Atomic Counter Policy is configured to make sure there is no oversubscription.

3. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F154712: fltTcaEqptIngrTotal5minPktsRateLast

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F154713: fltTcaEqptIngrTotal15minPktsRateLast

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F154714: fltTcaEqptIngrTotal1hPktsRateLast

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F154715: fltTcaEqptIngrTotal1dPktsRateLast

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F154716: fltTcaEqptIngrTotal1wPktsRateLast

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F154717: fltTcaEqptIngrTotal1moPktsRateLast

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F154718: fltTcaEqptIngrTotal1qtrPktsRateLast

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F154719: fltTcaEqptIngrTotal1yearPktsRateLast

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F154720: fltTcaEqptIngrTotal5minPktsRateMin

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F154721: fltTcaEqptIngrTotal15minPktsRateMin

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F154722: fltTcaEqptIngrTotal1hPktsRateMin

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F154723: fltTcaEqptIngrTotal1dPktsRateMin

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F154724: fltTcaEqptIngrTotal1wPktsRateMin

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F154725: fltTcaEqptIngrTotal1moPktsRateMin

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F154726: fltTcaEqptIngrTotal1qtrPktsRateMin

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F154727: fltTcaEqptIngrTotal1yearPktsRateMin

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F154728: fltTcaEqptIngrTotal5minPktsRateMax

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F154729: fltTcaEqptIngrTotal15minPktsRateMax

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F154730: fltTcaEqptIngrTotal1hPktsRateMax

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F154731: fltTcaEqptIngrTotal1dPktsRateMax

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F154732: fltTcaEqptIngrTotal1wPktsRateMax

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F154733: fltTcaEqptIngrTotal1moPktsRateMax

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F154734: fltTcaEqptIngrTotal1qtrPktsRateMax

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F154735: fltTcaEqptIngrTotal1yearPktsRateMax

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F154736: fltTcaEqptIngrTotal5minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F154737: fltTcaEqptIngrTotal15minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F154738: fltTcaEqptIngrTotal1hPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F154739: fltTcaEqptIngrTotal1dPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F154740: fltTcaEqptIngrTotal1wPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F154741: fltTcaEqptIngrTotal1moPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F154742: fltTcaEqptIngrTotal1qtrPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F154743: fltTcaEqptIngrTotal1yearPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F154776: fltTcaEqptIngrTotal5minPktsRateTr

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F154777: fltTcaEqptIngrTotal15minPktsRateTr

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F154778: fltTcaEqptIngrTotal1hPktsRateTr

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F154779: fltTcaEqptIngrTotal1dPktsRateTr

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F154780: fltTcaEqptIngrTotal1wPktsRateTr

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F154781: fltTcaEqptIngrTotal1moPktsRateTr

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F154782: fltTcaEqptIngrTotal1qtrPktsRateTr

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F154783: fltTcaEqptIngrTotal1yearPktsRateTr

Severity: variable

Explanation: This fault is caused by "Total Ingress Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Ingress Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1548: fltDbgAcPathAOnGoingAtomicCounterExcessMinor

Severity: minor

Explanation: This fault occurs when a small number of excess packets are detected by a configured and enabled Atomic Counter

Recommended Action: If you see this fault, take the following actions:

1. Check the network configuration in the packet path where this Atomic Counter Policy is configured.

2. Check interface counters and rates in the packet path where this Atomic Counter Policy is configured to make sure there is no oversubscription.

3. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F1549: fltDbgAcTrailOnGoingAtomicCounterTrailDropsMajor

Severity: major

Explanation: This fault occurs when a significant number of packet drops are detected by a configured and enabled Atomic Counter

Recommended Action: If you see this fault, take the following actions:

1. Check the network configuration in the packet path where this Atomic Counter Policy is configured.

2. Check for any CRC, etc errors in the packet path where this Atomic Counter Policy is configured.

3. Check interface counters and rates in the packet path where this Atomic Counter Policy is configured to make sure there is no oversubscription.

4. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F1550: fltDbgAcTrailOnGoingAtomicCounterTrailDropsMinor

Severity: minor

Explanation: This fault occurs when a small number of packet drops are detected by a configured and enabled Atomic Counter

Recommended Action: If you see this fault, take the following actions:

1. Check the network configuration in the packet path where this Atomic Counter Policy is configured.

2. Check for any CRC, etc errors in the packet path where this Atomic Counter Policy is configured.

3. Check interface counters and rates in the packet path where this Atomic Counter Policy is configured to make sure there is no oversubscription.

4. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F1551: fltDbgAcTrailOnGoingAtomicCounterTrailExcessMajor

Severity: major

Explanation: This fault occurs when a significant number of excess packets are detected by a configured and enabled Atomic Counter

Recommended Action: If you see this fault, take the following actions:

1. Check the network configuration in the packet path where this Atomic Counter Policy is configured.

2. Check interface counters and rates in the packet path where this Atomic Counter Policy is configured to make sure there is no oversubscription.

3. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F1552: fltDbgAcTrailOnGoingAtomicCounterTrailExcessMinor

Severity: minor

Explanation: This fault occurs when a small number of excess packets are detected by a configured and enabled Atomic Counter

Recommended Action: If you see this fault, take the following actions:

1. Check the network configuration in the packet path where this Atomic Counter Policy is configured.

2. Check interface counters and rates in the packet path where this Atomic Counter Policy is configured to make sure there is no oversubscription.

3. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F1553: fltSpanRsSrcToEpPConfigFailed

Severity: major

Explanation: This fault is raised when the span policy failed to get deployed.

Recommended Action: If you see this fault, take the following actions:

1. Verify that the EPG in the relation's target DN is valid and present.

2. Review the fault message and add missing or remove invalid configuration

3. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F1554: fltSpanRsSrcToCtxDefConfigFailed

Severity: major

Explanation: This fault is raised when the fabric span policy failed to get deployed due to missing Ctx.

Recommended Action: If you see this fault, take the following actions:

1. Verify that the Ctx in the relation's target DN is valid and present.

2. Review the fault message and add missing or remove invalid configuration

3. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F1555: fltSpanRsSrcToBDDefConfigFailed

Severity: major

Explanation: This fault is raised when the fabric span policy failed to get deployed due to missing BD.

Recommended Action: If you see this fault, take the following actions:

1. Verify that the BD in the relation's target DN is valid and present.

2. Review the fault message and add missing or remove invalid configuration

3. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F1556: fltSpanRsDestPathEpConfigFailed

Severity: major

Explanation: This fault is raised when the span policy failed to get deployed.

Recommended Action: If you see this fault, take the following actions:

1. Verify that the PathEp in the relation's target DN contains local ports in the node where SrcGroup resides

2. Review the fault message and add missing or remove invalid configuration

3. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F1557: fltSpanRsProvDestGrpConfigFailed

Severity: warning

Explanation: This fault is raised when the span policy failed to get deployed.

Recommended Action: If you see this fault, take the following actions:

1. Verify that the destionation group in the relation's target DN is present in the fabric.

2. Review the fault message and add missing configuration

3. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F1558: fltSpanAcctSessionOverflown

Severity: major

Explanation: This fault is raised when the number of span sessions deployed exceeds the maximum number allowed .

Recommended Action: If you see this fault, take the following actions:

1. Verify that the number of span sessions deployed is less than the maximum number allowed

2. Review the fault message and add missing configuration

3. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F1559: fltSpanDestConfigFailed

Severity: major

Explanation: This fault is raised when there is a SPAN destination related configuration issue.

Recommended Action: If you see this fault, take the following actions:

1. Verify that the dest related configuration is correct.

2. Review the fault message and add missing configuration

3. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F1560: fltSpanASrcGrpConfigFailed

Severity: major

Explanation: This fault is raised when there is a SPAN source group related configuration issue.

Recommended Action: If you see this fault, take the following actions:

1. Verify that the dest related configuration is correct.

2. Review the fault message and add missing configuration

3. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F1561: fltSpanASrcConfigFailed

Severity: major

Explanation: This fault is raised when there is an individual SPAN source related configuration issue.

Recommended Action: If you see this fault, take the following actions:

1. Verify that the source related configuration is correct.

2. Review the fault message and add missing configuration

3. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F1562: fltSpanRsSrcToPathEpConfigFailed

Severity: major

Explanation: This fault is raised when there is an individual RsSrcToPathEp related configuration issue.

Recommended Action: If you see this fault, take the following actions:

1. Verify that the Src to PathEp related configuration is correct.

2. Review the fault message and add missing configuration

3. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F1563: fltSyntheticCTestObjDn-location-ctest-pm

Severity: major

Explanation: This fault is for testing purpose. It is to test if EM framework can raise and clear fault correclty.

Recommended Action: This fault will not be raised on customer or QA test bed:

1. This fault is for testing purpose. It is to test if EM framework can raise and clear fault correclty.

F1564: fltSyntheticCTestObjDn-location-ctest-pe

Severity: major

Explanation: This fault is for testing purpose. It is to test if EM framework can raise and clear fault correclty.

Recommended Action: This fault will not be raised on customer or QA test bed:

1. This fault is for testing purpose. It is to test if EM framework can raise and clear fault correclty.

F1565: fltVnsCDevStateCDevValidateFailure

Severity: minor

Explanation: This fault occurs when the L4-L7 service node configuration fails

Recommended Action: If you see this fault, please make sure that the device has the correct IP and is supported by the package.

F1566: fltVnsCDevStateCDevModifyFailure

Severity: minor

Explanation: This fault occurs when the L4-L7 service node configuration fails

Recommended Action: If you see this fault, please check for faults in the device configuration.

F1567: fltVnsCDevStateCDevAuditFailure

Severity: minor

Explanation: This fault occurs when the L4-L7 service node configuration fails

Recommended Action: If you see this fault, please check for faults in the device configuration.

F1569: fltEqptSlotMismatched

Severity: critical

Explanation: This fault occurs when a wrong type of card is inserted in the chassis

Recommended Action: If a card is found in mismatch state, then the card has to be replaced

F1570: fltSpanRsSrcToEpgConfigFailed

Severity: major

Explanation: This fault occurs when a Span Policy fails to deploy due to a missing or invalid source EPG

Recommended Action: If you see this fault, take the following actions:

1. Verify that the configured source EPG in the Span Policy exists and is correct

2. Review the fault message and add missing or remove invalid configuration

3. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F1571: fltSpanRsDestEpgConfigFailed

Severity: major

Explanation: This fault occurs when a Span Policy fails to deploy due to a missing or invalid destination EPG

Recommended Action: If you see this fault, take the following actions:

1. Verify that the configured destination EPG in the Span Policy exists and is correct

2. Review the fault message and add missing or remove invalid configuration

3. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F1572: fltSyntheticCTestObjFor-subclass-ctest-pm

Severity: major

Explanation: This fault is for testing purpose. It is to test if EM framework can raise and clear fault correclty.

Recommended Action: This fault will not be raised on customer or QA test bed:

1. This fault is for testing purpose. It is to test if EM framework can raise and clear fault correclty.

F1573: fltSyntheticCTestObjFor-subclass-ctest-pe

Severity: major

Explanation: This fault is for testing purpose. It is to test if EM framework can raise and clear fault correclty.

Recommended Action: This fault will not be raised on customer or QA test bed:

1. This fault is for testing purpose. It is to test if EM framework can raise and clear fault correclty.

F1574: fltDatetimeNtpqFailed

Severity: critical

Explanation: This fault occurs when a ntp provider in the ntp configuration on a controller has problems

Recommended Action: If you see this fault, take the following actions:

1. Go to Fabric -> Fabric Policies -> Policies -> Pod ->Date and Time

2. Verify that the ntp peers are correctly configured and are reachable.

3. Verify that the ntp peers have the correct keys.

4. Configure multiple NTP servers for to guarantee availability of a valid NTP Server for synchronization.

5. If NTP Servers are configured with a DNS Name and not an IP Address, Verify if it's a valid domain name and verify if the policy with DNS providers are configured.

6. If there is a firewall in-between the ACI Fabric and NTP Servers, make sure that the firewall allows NTP traffic.

7. Verify whether NTP daemon is running in all or some of the NTP servers.

8. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F1582: fltFirmwareCompRunningOperStFailed

Severity: minor

Explanation: This fault occurs when the running FPGA firmware version is earlier than the expected version.

Recommended Action: Update the running FPGA firmware to the version bundled up with the current running image.

F1583: fltFirmwareCardRunningOperStFailed

Severity: minor

Explanation: This fault occurs when the running BIOS firmware is earlier than the expected version.

Recommended Action: Update the running BIOS firmware to the version recommended for the current running image.

F159880: fltTcaOpflexIDEpBcastPkts5minRxLast

Severity: variable

Explanation: This fault is caused by "received broadcast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159881: fltTcaOpflexIDEpBcastPkts15minRxLast

Severity: variable

Explanation: This fault is caused by "received broadcast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159882: fltTcaOpflexIDEpBcastPkts1hRxLast

Severity: variable

Explanation: This fault is caused by "received broadcast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159883: fltTcaOpflexIDEpBcastPkts1dRxLast

Severity: variable

Explanation: This fault is caused by "received broadcast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159884: fltTcaOpflexIDEpBcastPkts1wRxLast

Severity: variable

Explanation: This fault is caused by "received broadcast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159885: fltTcaOpflexIDEpBcastPkts1moRxLast

Severity: variable

Explanation: This fault is caused by "received broadcast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159886: fltTcaOpflexIDEpBcastPkts1qtrRxLast

Severity: variable

Explanation: This fault is caused by "received broadcast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159887: fltTcaOpflexIDEpBcastPkts1yearRxLast

Severity: variable

Explanation: This fault is caused by "received broadcast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159896: fltTcaOpflexIDEpBcastPkts5minRxCum

Severity: variable

Explanation: This fault is caused by "received broadcast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159897: fltTcaOpflexIDEpBcastPkts15minRxCum

Severity: variable

Explanation: This fault is caused by "received broadcast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159898: fltTcaOpflexIDEpBcastPkts1hRxCum

Severity: variable

Explanation: This fault is caused by "received broadcast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159899: fltTcaOpflexIDEpBcastPkts1dRxCum

Severity: variable

Explanation: This fault is caused by "received broadcast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159900: fltTcaOpflexIDEpBcastPkts1wRxCum

Severity: variable

Explanation: This fault is caused by "received broadcast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159901: fltTcaOpflexIDEpBcastPkts1moRxCum

Severity: variable

Explanation: This fault is caused by "received broadcast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159902: fltTcaOpflexIDEpBcastPkts1qtrRxCum

Severity: variable

Explanation: This fault is caused by "received broadcast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159903: fltTcaOpflexIDEpBcastPkts1yearRxCum

Severity: variable

Explanation: This fault is caused by "received broadcast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159904: fltTcaOpflexIDEpBcastPkts5minRxPer

Severity: variable

Explanation: This fault is caused by "received broadcast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159905: fltTcaOpflexIDEpBcastPkts15minRxPer

Severity: variable

Explanation: This fault is caused by "received broadcast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159906: fltTcaOpflexIDEpBcastPkts1hRxPer

Severity: variable

Explanation: This fault is caused by "received broadcast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159907: fltTcaOpflexIDEpBcastPkts1dRxPer

Severity: variable

Explanation: This fault is caused by "received broadcast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159908: fltTcaOpflexIDEpBcastPkts1wRxPer

Severity: variable

Explanation: This fault is caused by "received broadcast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159909: fltTcaOpflexIDEpBcastPkts1moRxPer

Severity: variable

Explanation: This fault is caused by "received broadcast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159910: fltTcaOpflexIDEpBcastPkts1qtrRxPer

Severity: variable

Explanation: This fault is caused by "received broadcast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159911: fltTcaOpflexIDEpBcastPkts1yearRxPer

Severity: variable

Explanation: This fault is caused by "received broadcast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159912: fltTcaOpflexIDEpBcastPkts5minRxMin

Severity: variable

Explanation: This fault is caused by "received broadcast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159913: fltTcaOpflexIDEpBcastPkts15minRxMin

Severity: variable

Explanation: This fault is caused by "received broadcast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159914: fltTcaOpflexIDEpBcastPkts1hRxMin

Severity: variable

Explanation: This fault is caused by "received broadcast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159915: fltTcaOpflexIDEpBcastPkts1dRxMin

Severity: variable

Explanation: This fault is caused by "received broadcast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159916: fltTcaOpflexIDEpBcastPkts1wRxMin

Severity: variable

Explanation: This fault is caused by "received broadcast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159917: fltTcaOpflexIDEpBcastPkts1moRxMin

Severity: variable

Explanation: This fault is caused by "received broadcast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159918: fltTcaOpflexIDEpBcastPkts1qtrRxMin

Severity: variable

Explanation: This fault is caused by "received broadcast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159919: fltTcaOpflexIDEpBcastPkts1yearRxMin

Severity: variable

Explanation: This fault is caused by "received broadcast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159920: fltTcaOpflexIDEpBcastPkts5minRxMax

Severity: variable

Explanation: This fault is caused by "received broadcast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159921: fltTcaOpflexIDEpBcastPkts15minRxMax

Severity: variable

Explanation: This fault is caused by "received broadcast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159922: fltTcaOpflexIDEpBcastPkts1hRxMax

Severity: variable

Explanation: This fault is caused by "received broadcast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159923: fltTcaOpflexIDEpBcastPkts1dRxMax

Severity: variable

Explanation: This fault is caused by "received broadcast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159924: fltTcaOpflexIDEpBcastPkts1wRxMax

Severity: variable

Explanation: This fault is caused by "received broadcast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159925: fltTcaOpflexIDEpBcastPkts1moRxMax

Severity: variable

Explanation: This fault is caused by "received broadcast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159926: fltTcaOpflexIDEpBcastPkts1qtrRxMax

Severity: variable

Explanation: This fault is caused by "received broadcast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159927: fltTcaOpflexIDEpBcastPkts1yearRxMax

Severity: variable

Explanation: This fault is caused by "received broadcast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159928: fltTcaOpflexIDEpBcastPkts5minRxAvg

Severity: variable

Explanation: This fault is caused by "received broadcast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159929: fltTcaOpflexIDEpBcastPkts15minRxAvg

Severity: variable

Explanation: This fault is caused by "received broadcast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159930: fltTcaOpflexIDEpBcastPkts1hRxAvg

Severity: variable

Explanation: This fault is caused by "received broadcast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159931: fltTcaOpflexIDEpBcastPkts1dRxAvg

Severity: variable

Explanation: This fault is caused by "received broadcast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159932: fltTcaOpflexIDEpBcastPkts1wRxAvg

Severity: variable

Explanation: This fault is caused by "received broadcast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159933: fltTcaOpflexIDEpBcastPkts1moRxAvg

Severity: variable

Explanation: This fault is caused by "received broadcast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159934: fltTcaOpflexIDEpBcastPkts1qtrRxAvg

Severity: variable

Explanation: This fault is caused by "received broadcast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159935: fltTcaOpflexIDEpBcastPkts1yearRxAvg

Severity: variable

Explanation: This fault is caused by "received broadcast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159960: fltTcaOpflexIDEpBcastPkts5minRxTr

Severity: variable

Explanation: This fault is caused by "received broadcast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159961: fltTcaOpflexIDEpBcastPkts15minRxTr

Severity: variable

Explanation: This fault is caused by "received broadcast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159962: fltTcaOpflexIDEpBcastPkts1hRxTr

Severity: variable

Explanation: This fault is caused by "received broadcast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159963: fltTcaOpflexIDEpBcastPkts1dRxTr

Severity: variable

Explanation: This fault is caused by "received broadcast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159964: fltTcaOpflexIDEpBcastPkts1wRxTr

Severity: variable

Explanation: This fault is caused by "received broadcast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159965: fltTcaOpflexIDEpBcastPkts1moRxTr

Severity: variable

Explanation: This fault is caused by "received broadcast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159966: fltTcaOpflexIDEpBcastPkts1qtrRxTr

Severity: variable

Explanation: This fault is caused by "received broadcast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159967: fltTcaOpflexIDEpBcastPkts1yearRxTr

Severity: variable

Explanation: This fault is caused by "received broadcast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159968: fltTcaOpflexIDEpBcastPkts5minRxRate

Severity: variable

Explanation: This fault is caused by "received broadcast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159969: fltTcaOpflexIDEpBcastPkts15minRxRate

Severity: variable

Explanation: This fault is caused by "received broadcast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159970: fltTcaOpflexIDEpBcastPkts1hRxRate

Severity: variable

Explanation: This fault is caused by "received broadcast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159971: fltTcaOpflexIDEpBcastPkts1dRxRate

Severity: variable

Explanation: This fault is caused by "received broadcast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159972: fltTcaOpflexIDEpBcastPkts1wRxRate

Severity: variable

Explanation: This fault is caused by "received broadcast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159973: fltTcaOpflexIDEpBcastPkts1moRxRate

Severity: variable

Explanation: This fault is caused by "received broadcast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159974: fltTcaOpflexIDEpBcastPkts1qtrRxRate

Severity: variable

Explanation: This fault is caused by "received broadcast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F159975: fltTcaOpflexIDEpBcastPkts1yearRxRate

Severity: variable

Explanation: This fault is caused by "received broadcast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1600: fltEigrpRsIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F160048: fltTcaOpflexIDEpBcastPkts5minTxLast

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160049: fltTcaOpflexIDEpBcastPkts15minTxLast

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160050: fltTcaOpflexIDEpBcastPkts1hTxLast

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160051: fltTcaOpflexIDEpBcastPkts1dTxLast

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160052: fltTcaOpflexIDEpBcastPkts1wTxLast

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160053: fltTcaOpflexIDEpBcastPkts1moTxLast

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160054: fltTcaOpflexIDEpBcastPkts1qtrTxLast

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160055: fltTcaOpflexIDEpBcastPkts1yearTxLast

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160064: fltTcaOpflexIDEpBcastPkts5minTxCum

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160065: fltTcaOpflexIDEpBcastPkts15minTxCum

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160066: fltTcaOpflexIDEpBcastPkts1hTxCum

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160067: fltTcaOpflexIDEpBcastPkts1dTxCum

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160068: fltTcaOpflexIDEpBcastPkts1wTxCum

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160069: fltTcaOpflexIDEpBcastPkts1moTxCum

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160070: fltTcaOpflexIDEpBcastPkts1qtrTxCum

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160071: fltTcaOpflexIDEpBcastPkts1yearTxCum

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160072: fltTcaOpflexIDEpBcastPkts5minTxPer

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160073: fltTcaOpflexIDEpBcastPkts15minTxPer

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160074: fltTcaOpflexIDEpBcastPkts1hTxPer

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160075: fltTcaOpflexIDEpBcastPkts1dTxPer

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160076: fltTcaOpflexIDEpBcastPkts1wTxPer

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160077: fltTcaOpflexIDEpBcastPkts1moTxPer

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160078: fltTcaOpflexIDEpBcastPkts1qtrTxPer

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160079: fltTcaOpflexIDEpBcastPkts1yearTxPer

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160080: fltTcaOpflexIDEpBcastPkts5minTxMin

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160081: fltTcaOpflexIDEpBcastPkts15minTxMin

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160082: fltTcaOpflexIDEpBcastPkts1hTxMin

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160083: fltTcaOpflexIDEpBcastPkts1dTxMin

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160084: fltTcaOpflexIDEpBcastPkts1wTxMin

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160085: fltTcaOpflexIDEpBcastPkts1moTxMin

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160086: fltTcaOpflexIDEpBcastPkts1qtrTxMin

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160087: fltTcaOpflexIDEpBcastPkts1yearTxMin

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160088: fltTcaOpflexIDEpBcastPkts5minTxMax

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160089: fltTcaOpflexIDEpBcastPkts15minTxMax

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160090: fltTcaOpflexIDEpBcastPkts1hTxMax

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160091: fltTcaOpflexIDEpBcastPkts1dTxMax

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160092: fltTcaOpflexIDEpBcastPkts1wTxMax

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160093: fltTcaOpflexIDEpBcastPkts1moTxMax

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160094: fltTcaOpflexIDEpBcastPkts1qtrTxMax

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160095: fltTcaOpflexIDEpBcastPkts1yearTxMax

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160096: fltTcaOpflexIDEpBcastPkts5minTxAvg

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160097: fltTcaOpflexIDEpBcastPkts15minTxAvg

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160098: fltTcaOpflexIDEpBcastPkts1hTxAvg

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160099: fltTcaOpflexIDEpBcastPkts1dTxAvg

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1601: fltFvRsCtxToEigrpCtxAfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F160100: fltTcaOpflexIDEpBcastPkts1wTxAvg

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160101: fltTcaOpflexIDEpBcastPkts1moTxAvg

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160102: fltTcaOpflexIDEpBcastPkts1qtrTxAvg

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160103: fltTcaOpflexIDEpBcastPkts1yearTxAvg

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160128: fltTcaOpflexIDEpBcastPkts5minTxTr

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160129: fltTcaOpflexIDEpBcastPkts15minTxTr

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160130: fltTcaOpflexIDEpBcastPkts1hTxTr

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160131: fltTcaOpflexIDEpBcastPkts1dTxTr

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160132: fltTcaOpflexIDEpBcastPkts1wTxTr

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160133: fltTcaOpflexIDEpBcastPkts1moTxTr

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160134: fltTcaOpflexIDEpBcastPkts1qtrTxTr

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160135: fltTcaOpflexIDEpBcastPkts1yearTxTr

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160136: fltTcaOpflexIDEpBcastPkts5minTxRate

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160137: fltTcaOpflexIDEpBcastPkts15minTxRate

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160138: fltTcaOpflexIDEpBcastPkts1hTxRate

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160139: fltTcaOpflexIDEpBcastPkts1dTxRate

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160140: fltTcaOpflexIDEpBcastPkts1wTxRate

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160141: fltTcaOpflexIDEpBcastPkts1moTxRate

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160142: fltTcaOpflexIDEpBcastPkts1qtrTxRate

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F160143: fltTcaOpflexIDEpBcastPkts1yearTxRate

Severity: variable

Explanation: This fault is caused by "transmitted broadcast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1603: fltIpv6AddrIpv6CfgCtrl

Severity: warning

Explanation: This fault is caused by a hardware programming failure

Recommended Action: The system will periodically retry to program the hardware. If the failure is due to lack of hardware resources, free up resources by removing or simplifying existing configuration. One of the reasons for lack of hardware resources is exhaustion of VLANs in ToR. These hardware resources can be examined by looking at capacity dashboard under OPERATIONS tab. Please check entry against the number of VLANs in output of command show vlan summary issued at node where fault is generated to check whether it exceeds above advertised node capacity.

F1604: fltIpv6NexthopIpv6CfgCtrl

Severity: warning

Explanation: This fault is caused by a hardware programming failure

Recommended Action: The system will periodically retry to program the hardware. If the failure is due to lack of hardware resources, free up resources by removing or simplifying existing configuration. One of the reasons for lack of hardware resources is exhaustion of VLANs in ToR. These hardware resources can be examined by looking at capacity dashboard under OPERATIONS tab. Please check entry against the number of VLANs in output of command show vlan summary issued at node where fault is generated to check whether it exceeds above advertised node capacity.

F1606: fltHvsExtPolOperIssues

Severity: minor

Explanation: This fault is raised when issues are detected with portgroups learned from vCenter. E.g. missing EPg policy

Recommended Action: If you see this fault, take the following actions:

1. Fix the issue by creating the policy based on the fault description

2. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F1613: fltVnsCtrlrMgmtPolConfMismatch

Severity: minor

Explanation: This fault occurs when the inband mgmt policy posted by the user is incorrect. The config issues indicate the exact reason for the error.

Recommended Action: If you see this fault, please modify the configuration to resolve cause of fault.

F1614: fltVnsRsVDevDomainRefContToDomainRefResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1615: fltIpv6AddrOperStDown

Severity: major

Explanation: This fault occurs when the operational state of the ipv6 address state is changed to subnet-overlap/no primary/addr already confgd as next hop in a static route/interface address count limit exceeded. This can also happen if BD is not getting programmed in the node/switch when number of vlan address space in the node/switch is exceeded

Recommended Action: To recover from this fault, try the following actions:

1. Look at any configuration issues

2. Verify the configuration is correct/complete

3. Check if the vlans per node/switch is not exceeded than the advertised limit either through capacity dashboard or through the command "show vlan summary" for the field "Number of existing VLANs" at the node/switch where the fault is generated

4. Check if the number of addresses configured for the interface do not exceed the advertised limit (512)

F1616: fltIpv6NexthopOperStDown

Severity: major

Explanation: This fault occurs when the operational state of the next hop is changed to down due to various config or operational reasons

Recommended Action: To recover from this fault, try the following actions:

1. For rt-unreachable fault check if the nexthop can be resolved by oter routes and resolved nexthop is reachable via a directly connected subnet

2. For vrf-down fault check the operational state of nexthop vrf and ensure it is up

3. For link-local-pfx fault check if the route pfx is a link local pfx, if yes change to a non link local pfx

4. For invalid-pfx-mask fault check if the route pfx and mask combination is a invalid, if yes change to a valid pfx mask combination

5. For invalid-nh, invalid-nh-mask fault(s) check if the next hop pfx or/and mask combination is invalid, if yes change to a valid next hop pfx and mask

6. For local-nh fault check if the route pfx is a local address, if yes chage it to a non local address

7. For mcast-nh fault check if the next hop is a multicast address, if yes change ot to a non mcast address

8. For lo-addr fault check if the route pfx is a loopback address if yes change it to a non loopback address

9. For max-nh-exceeded fault check if the maximum number of nexthops (16) per route limit is reached, if yes delete some next hop(s) configured for the route

F1617: fltVnsRsLIfCtxToInstPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1629: fltFabricRsPathToLePortPGrpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1630: fltFabricRsPathToSpPortPGrpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1631: fltInfraRsPathToAccBaseGrpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1639: fltFvRsNdPfxPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1640: fltL3extRsNdIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F16438: fsmStFailCompCtrlrAdd:SubscribeEvents

Severity: warning

Explanation: This fault is raised when Subscribe Events Stage fails.

Recommended Action: Please collect tech-support file and contact Cisco TAC

F1648: fltInfraRsL2IfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1649: fltVnsRTInfoConfMismatch

Severity: major

Explanation: This fault occurs when an operation on device package fails. The config issues indicate the exact reason for the error.

Recommended Action: If you see this fault, please capture tech-support file, delete device package and repost the device package again.

F1651: fltDbgexpPolicyStatusExportData

Severity: minor

Explanation: This fault occurs when export operation for techsupport or core files did not succeed.

Recommended Action: If you see this fault, take the following actions:

1. look at techsupport status and figure out which IFC/node is erroring out.

2. Verify the destination it is trying to export data to is healthy/reachable

3. If the above action did not resolve the issue, contact Cisco TAC.

F1654: fltVnsRsALDevToDevMgrResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1655: fltVnsRsCDevToChassisResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1656: fltVnsRsChassisEpgResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1657: fltVnsRsChassisToMChassisResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1658: fltVnsRsDevMgrEpgResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1659: fltVnsRsDevMgrToMDevMgrResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1660: fltVnsRsMChassisToMDevResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F166024: fltTcaCoppAllow5minBytesLast

Severity: variable

Explanation: This fault is caused by "Allowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166025: fltTcaCoppAllow15minBytesLast

Severity: variable

Explanation: This fault is caused by "Allowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166026: fltTcaCoppAllow1hBytesLast

Severity: variable

Explanation: This fault is caused by "Allowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166027: fltTcaCoppAllow1dBytesLast

Severity: variable

Explanation: This fault is caused by "Allowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166028: fltTcaCoppAllow1wBytesLast

Severity: variable

Explanation: This fault is caused by "Allowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166029: fltTcaCoppAllow1moBytesLast

Severity: variable

Explanation: This fault is caused by "Allowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166030: fltTcaCoppAllow1qtrBytesLast

Severity: variable

Explanation: This fault is caused by "Allowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166031: fltTcaCoppAllow1yearBytesLast

Severity: variable

Explanation: This fault is caused by "Allowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166040: fltTcaCoppAllow5minBytesCum

Severity: variable

Explanation: This fault is caused by "Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166041: fltTcaCoppAllow15minBytesCum

Severity: variable

Explanation: This fault is caused by "Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166042: fltTcaCoppAllow1hBytesCum

Severity: variable

Explanation: This fault is caused by "Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166043: fltTcaCoppAllow1dBytesCum

Severity: variable

Explanation: This fault is caused by "Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166044: fltTcaCoppAllow1wBytesCum

Severity: variable

Explanation: This fault is caused by "Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166045: fltTcaCoppAllow1moBytesCum

Severity: variable

Explanation: This fault is caused by "Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166046: fltTcaCoppAllow1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166047: fltTcaCoppAllow1yearBytesCum

Severity: variable

Explanation: This fault is caused by "Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166048: fltTcaCoppAllow5minBytesPer

Severity: variable

Explanation: This fault is caused by "Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166049: fltTcaCoppAllow15minBytesPer

Severity: variable

Explanation: This fault is caused by "Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166050: fltTcaCoppAllow1hBytesPer

Severity: variable

Explanation: This fault is caused by "Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166051: fltTcaCoppAllow1dBytesPer

Severity: variable

Explanation: This fault is caused by "Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166052: fltTcaCoppAllow1wBytesPer

Severity: variable

Explanation: This fault is caused by "Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166053: fltTcaCoppAllow1moBytesPer

Severity: variable

Explanation: This fault is caused by "Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166054: fltTcaCoppAllow1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166055: fltTcaCoppAllow1yearBytesPer

Severity: variable

Explanation: This fault is caused by "Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166056: fltTcaCoppAllow5minBytesMin

Severity: variable

Explanation: This fault is caused by "Allowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166057: fltTcaCoppAllow15minBytesMin

Severity: variable

Explanation: This fault is caused by "Allowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166058: fltTcaCoppAllow1hBytesMin

Severity: variable

Explanation: This fault is caused by "Allowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166059: fltTcaCoppAllow1dBytesMin

Severity: variable

Explanation: This fault is caused by "Allowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166060: fltTcaCoppAllow1wBytesMin

Severity: variable

Explanation: This fault is caused by "Allowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166061: fltTcaCoppAllow1moBytesMin

Severity: variable

Explanation: This fault is caused by "Allowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166062: fltTcaCoppAllow1qtrBytesMin

Severity: variable

Explanation: This fault is caused by "Allowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166063: fltTcaCoppAllow1yearBytesMin

Severity: variable

Explanation: This fault is caused by "Allowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166064: fltTcaCoppAllow5minBytesMax

Severity: variable

Explanation: This fault is caused by "Allowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166065: fltTcaCoppAllow15minBytesMax

Severity: variable

Explanation: This fault is caused by "Allowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166066: fltTcaCoppAllow1hBytesMax

Severity: variable

Explanation: This fault is caused by "Allowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166067: fltTcaCoppAllow1dBytesMax

Severity: variable

Explanation: This fault is caused by "Allowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166068: fltTcaCoppAllow1wBytesMax

Severity: variable

Explanation: This fault is caused by "Allowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166069: fltTcaCoppAllow1moBytesMax

Severity: variable

Explanation: This fault is caused by "Allowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166070: fltTcaCoppAllow1qtrBytesMax

Severity: variable

Explanation: This fault is caused by "Allowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166071: fltTcaCoppAllow1yearBytesMax

Severity: variable

Explanation: This fault is caused by "Allowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166072: fltTcaCoppAllow5minBytesAvg

Severity: variable

Explanation: This fault is caused by "Allowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166073: fltTcaCoppAllow15minBytesAvg

Severity: variable

Explanation: This fault is caused by "Allowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166074: fltTcaCoppAllow1hBytesAvg

Severity: variable

Explanation: This fault is caused by "Allowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166075: fltTcaCoppAllow1dBytesAvg

Severity: variable

Explanation: This fault is caused by "Allowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166076: fltTcaCoppAllow1wBytesAvg

Severity: variable

Explanation: This fault is caused by "Allowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166077: fltTcaCoppAllow1moBytesAvg

Severity: variable

Explanation: This fault is caused by "Allowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166078: fltTcaCoppAllow1qtrBytesAvg

Severity: variable

Explanation: This fault is caused by "Allowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166079: fltTcaCoppAllow1yearBytesAvg

Severity: variable

Explanation: This fault is caused by "Allowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1661: fltVnsRsMDevMgrToMDevResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F166104: fltTcaCoppAllow5minBytesTr

Severity: variable

Explanation: This fault is caused by "Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166105: fltTcaCoppAllow15minBytesTr

Severity: variable

Explanation: This fault is caused by "Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166106: fltTcaCoppAllow1hBytesTr

Severity: variable

Explanation: This fault is caused by "Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166107: fltTcaCoppAllow1dBytesTr

Severity: variable

Explanation: This fault is caused by "Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166108: fltTcaCoppAllow1wBytesTr

Severity: variable

Explanation: This fault is caused by "Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166109: fltTcaCoppAllow1moBytesTr

Severity: variable

Explanation: This fault is caused by "Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166110: fltTcaCoppAllow1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166111: fltTcaCoppAllow1yearBytesTr

Severity: variable

Explanation: This fault is caused by "Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166112: fltTcaCoppAllow5minBytesRate

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166113: fltTcaCoppAllow15minBytesRate

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166114: fltTcaCoppAllow1hBytesRate

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166115: fltTcaCoppAllow1dBytesRate

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166116: fltTcaCoppAllow1wBytesRate

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166117: fltTcaCoppAllow1moBytesRate

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166118: fltTcaCoppAllow1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166119: fltTcaCoppAllow1yearBytesRate

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166192: fltTcaCoppAllow5minBytesRateLast

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166193: fltTcaCoppAllow15minBytesRateLast

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166194: fltTcaCoppAllow1hBytesRateLast

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166195: fltTcaCoppAllow1dBytesRateLast

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166196: fltTcaCoppAllow1wBytesRateLast

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166197: fltTcaCoppAllow1moBytesRateLast

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166198: fltTcaCoppAllow1qtrBytesRateLast

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166199: fltTcaCoppAllow1yearBytesRateLast

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1662: fltCoopDomCoopDomCitizenVersionLower

Severity: warning

Explanation: This fault occurs when the version of the Council Of Oracles Protocol (COOP) running on a leaf (citizen node) is determined by the spine (oracle node) to be lower than what is currently supported. No impact to connectivity should be seen due to running at lower version. However, failure to upgrade to the fabric node firmware on the leaf that contains highest supported version of coop may impact coop performance or coop may not operate with supported functionalities introduced in the higher coop version.

Recommended Action: To recover from this fault, try the following actions:

1. Verify there is no leaf (citizen node) with a lower coop version than highest supported version running in the fabric. To verify the leaf with lower version:

- Use the GUI to examine the maxVersion value under Fabric > Inventory > Pod > Leaf > Protocols > COOP > [domain-name] ; or

- Use REST API to examine the maxVersion value from https://[leaf-ip]/api/mo/sys/coop/inst/dom-[domain-name].xml; or

- Use CLI to examine the maxVersion value in file /mit/sys/coop/inst/dom-[domain-name]

2. Upgrade the fabric node software on the leaf in question to a version that has the highest supported coop version running in the fabric. You can examine other leafs to determine what switch firmware version to upgrade to.

3. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F166200: fltTcaCoppAllow5minBytesRateMin

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166201: fltTcaCoppAllow15minBytesRateMin

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166202: fltTcaCoppAllow1hBytesRateMin

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166203: fltTcaCoppAllow1dBytesRateMin

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166204: fltTcaCoppAllow1wBytesRateMin

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166205: fltTcaCoppAllow1moBytesRateMin

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166206: fltTcaCoppAllow1qtrBytesRateMin

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166207: fltTcaCoppAllow1yearBytesRateMin

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166208: fltTcaCoppAllow5minBytesRateMax

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166209: fltTcaCoppAllow15minBytesRateMax

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166210: fltTcaCoppAllow1hBytesRateMax

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166211: fltTcaCoppAllow1dBytesRateMax

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166212: fltTcaCoppAllow1wBytesRateMax

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166213: fltTcaCoppAllow1moBytesRateMax

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166214: fltTcaCoppAllow1qtrBytesRateMax

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166215: fltTcaCoppAllow1yearBytesRateMax

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166216: fltTcaCoppAllow5minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166217: fltTcaCoppAllow15minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166218: fltTcaCoppAllow1hBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166219: fltTcaCoppAllow1dBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166220: fltTcaCoppAllow1wBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166221: fltTcaCoppAllow1moBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166222: fltTcaCoppAllow1qtrBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166223: fltTcaCoppAllow1yearBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166256: fltTcaCoppAllow5minBytesRateTr

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166257: fltTcaCoppAllow15minBytesRateTr

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166258: fltTcaCoppAllow1hBytesRateTr

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166259: fltTcaCoppAllow1dBytesRateTr

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166260: fltTcaCoppAllow1wBytesRateTr

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166261: fltTcaCoppAllow1moBytesRateTr

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166262: fltTcaCoppAllow1qtrBytesRateTr

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166263: fltTcaCoppAllow1yearBytesRateTr

Severity: variable

Explanation: This fault is caused by "Allowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1663: fltCoopDomCoopDomOracleVersionLower

Severity: warning

Explanation: This fault occurs when the version of the Council Of Oracles Protocol (COOP) running on a spine (oracle node) is determined by another spine to be lower than what is currently supported. No impact to connectivity should be seen due to running at lower version. However, failure to upgrade the fabric node firmware on the spine that contains highest supported version of coop may impact coop performance or coop may not operate with supported functionalities introduced in the higher coop version.

Recommended Action: To recover from this fault, try the following actions:

1. Verify there is no spine (oracle node) with a lower coop version than highest supported version running in the fabric. To verify the spine with the lower version:

- Use the GUI to examine the maxVersion value under Fabric > Inventory > Pod > Leaf > Protocols > COOP > [domain-name] > Oracle Adjacencies > [spine ip]; or

- Use REST API to examine the maxVersion value from https://[spine-ip]/api/mo/sys/coop/inst/dom-[domain-name].xml?query-target=subtree&target-subtree-class=coopOracleAdj; or

- Use CLI to examine the maxVersion value in file /mit/sys/coop/inst/dom-[domain-name]/oracle-[spine-ip]

2. Upgrade the fabric node software on the spine in question to a version that has the highest supported coop version running in the fabric. You can examine other spines to determine what switch firmware version to upgrade to.

3. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F166312: fltTcaCoppAllow5minPktsLast

Severity: variable

Explanation: This fault is caused by "Allowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166313: fltTcaCoppAllow15minPktsLast

Severity: variable

Explanation: This fault is caused by "Allowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166314: fltTcaCoppAllow1hPktsLast

Severity: variable

Explanation: This fault is caused by "Allowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166315: fltTcaCoppAllow1dPktsLast

Severity: variable

Explanation: This fault is caused by "Allowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166316: fltTcaCoppAllow1wPktsLast

Severity: variable

Explanation: This fault is caused by "Allowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166317: fltTcaCoppAllow1moPktsLast

Severity: variable

Explanation: This fault is caused by "Allowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166318: fltTcaCoppAllow1qtrPktsLast

Severity: variable

Explanation: This fault is caused by "Allowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166319: fltTcaCoppAllow1yearPktsLast

Severity: variable

Explanation: This fault is caused by "Allowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166328: fltTcaCoppAllow5minPktsCum

Severity: variable

Explanation: This fault is caused by "Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166329: fltTcaCoppAllow15minPktsCum

Severity: variable

Explanation: This fault is caused by "Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166330: fltTcaCoppAllow1hPktsCum

Severity: variable

Explanation: This fault is caused by "Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166331: fltTcaCoppAllow1dPktsCum

Severity: variable

Explanation: This fault is caused by "Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166332: fltTcaCoppAllow1wPktsCum

Severity: variable

Explanation: This fault is caused by "Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166333: fltTcaCoppAllow1moPktsCum

Severity: variable

Explanation: This fault is caused by "Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166334: fltTcaCoppAllow1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166335: fltTcaCoppAllow1yearPktsCum

Severity: variable

Explanation: This fault is caused by "Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166336: fltTcaCoppAllow5minPktsPer

Severity: variable

Explanation: This fault is caused by "Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166337: fltTcaCoppAllow15minPktsPer

Severity: variable

Explanation: This fault is caused by "Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166338: fltTcaCoppAllow1hPktsPer

Severity: variable

Explanation: This fault is caused by "Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166339: fltTcaCoppAllow1dPktsPer

Severity: variable

Explanation: This fault is caused by "Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166340: fltTcaCoppAllow1wPktsPer

Severity: variable

Explanation: This fault is caused by "Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166341: fltTcaCoppAllow1moPktsPer

Severity: variable

Explanation: This fault is caused by "Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166342: fltTcaCoppAllow1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166343: fltTcaCoppAllow1yearPktsPer

Severity: variable

Explanation: This fault is caused by "Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166344: fltTcaCoppAllow5minPktsMin

Severity: variable

Explanation: This fault is caused by "Allowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166345: fltTcaCoppAllow15minPktsMin

Severity: variable

Explanation: This fault is caused by "Allowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166346: fltTcaCoppAllow1hPktsMin

Severity: variable

Explanation: This fault is caused by "Allowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166347: fltTcaCoppAllow1dPktsMin

Severity: variable

Explanation: This fault is caused by "Allowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166348: fltTcaCoppAllow1wPktsMin

Severity: variable

Explanation: This fault is caused by "Allowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166349: fltTcaCoppAllow1moPktsMin

Severity: variable

Explanation: This fault is caused by "Allowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166350: fltTcaCoppAllow1qtrPktsMin

Severity: variable

Explanation: This fault is caused by "Allowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166351: fltTcaCoppAllow1yearPktsMin

Severity: variable

Explanation: This fault is caused by "Allowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166352: fltTcaCoppAllow5minPktsMax

Severity: variable

Explanation: This fault is caused by "Allowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166353: fltTcaCoppAllow15minPktsMax

Severity: variable

Explanation: This fault is caused by "Allowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166354: fltTcaCoppAllow1hPktsMax

Severity: variable

Explanation: This fault is caused by "Allowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166355: fltTcaCoppAllow1dPktsMax

Severity: variable

Explanation: This fault is caused by "Allowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166356: fltTcaCoppAllow1wPktsMax

Severity: variable

Explanation: This fault is caused by "Allowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166357: fltTcaCoppAllow1moPktsMax

Severity: variable

Explanation: This fault is caused by "Allowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166358: fltTcaCoppAllow1qtrPktsMax

Severity: variable

Explanation: This fault is caused by "Allowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166359: fltTcaCoppAllow1yearPktsMax

Severity: variable

Explanation: This fault is caused by "Allowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166360: fltTcaCoppAllow5minPktsAvg

Severity: variable

Explanation: This fault is caused by "Allowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166361: fltTcaCoppAllow15minPktsAvg

Severity: variable

Explanation: This fault is caused by "Allowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166362: fltTcaCoppAllow1hPktsAvg

Severity: variable

Explanation: This fault is caused by "Allowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166363: fltTcaCoppAllow1dPktsAvg

Severity: variable

Explanation: This fault is caused by "Allowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166364: fltTcaCoppAllow1wPktsAvg

Severity: variable

Explanation: This fault is caused by "Allowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166365: fltTcaCoppAllow1moPktsAvg

Severity: variable

Explanation: This fault is caused by "Allowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166366: fltTcaCoppAllow1qtrPktsAvg

Severity: variable

Explanation: This fault is caused by "Allowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166367: fltTcaCoppAllow1yearPktsAvg

Severity: variable

Explanation: This fault is caused by "Allowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166392: fltTcaCoppAllow5minPktsTr

Severity: variable

Explanation: This fault is caused by "Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166393: fltTcaCoppAllow15minPktsTr

Severity: variable

Explanation: This fault is caused by "Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166394: fltTcaCoppAllow1hPktsTr

Severity: variable

Explanation: This fault is caused by "Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166395: fltTcaCoppAllow1dPktsTr

Severity: variable

Explanation: This fault is caused by "Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166396: fltTcaCoppAllow1wPktsTr

Severity: variable

Explanation: This fault is caused by "Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166397: fltTcaCoppAllow1moPktsTr

Severity: variable

Explanation: This fault is caused by "Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166398: fltTcaCoppAllow1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166399: fltTcaCoppAllow1yearPktsTr

Severity: variable

Explanation: This fault is caused by "Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1664: fltCoopDomCoopDomVersionLower

Severity: warning

Explanation: This fault occurs when the version of the Council Of Oracles Protocol (COOP) running on a leaf (citizen node) or spine (oracle node) is determined by a leaf to be lower than what is currently supported. No impact to connectivity should be seen due to running at lower version. However, failure to upgrade the fabric node firmware on the node in question to the highest supported version of coop may impact coop performance or coop may not operate with supported functionalities introduced in the higher coop version.

Recommended Action: To recover from this fault, try the following actions:

1. Verify there is no spine (oracle node) with a lower coop version than highest supported version running in the fabric. To verify the spine with lower version:

- Use the GUI to examine the maxVersion value under Fabric > Inventory > Pod > Leaf > Protocols > COOP > [domain-name] > Oracle Adjacencies > [spine ip]; or

- Use REST API to examine the maxVersion value from https://[spine-ip]/api/mo/sys/coop/inst/dom-[name].xml?query-target=subtree&target-subtree-class=coopOracleAdj; or

- Use CLI to examine the maxVersion value in file /mit/sys/coop/inst/dom-[domain-name]/oracle-[spine-ip]

2. Upgrade the fabric node software on the spine in question to a version that has the highest supported coop version running in the fabric. You can examine other spines to determine what switch firmware version to upgrade to.

3. Verify there is no leaf (citizen node) with a lower coop version than highest supported version running in the fabric. Identify the leaf node that has a lower coop version by doing the following on any spine:

- Use the GUI to examine the lastLowerVersionAddr under Fabric > Inventory > Pod > Leaf > Protocols > COOP > [domain-name] ; or

- Use REST API to examine the lastLowerVersionAddr value from https://[spine-ip]/api/mo/sys/coop/inst/dom-[domain-name].xml; or

- Use CLI to examine the lastLowerVersionAddr value in file /mit/sys/coop/inst/dom-[domain-name]

Now confirm the supported highest version for the leaf node, identified from above, is lower than highest supported in fabric as follows:

- Use the GUI to examine the maxVersion under Fabric > Inventory > Pod > Leaf > Protocols > COOP > [domain-name]; or

- Use REST API to examine the maxVersion value from https://[leaf-ip]/api/mo/sys/coop/inst/dom-[domain-name].xml; or

- Use CLI to examine the maxVersion value in file /mit/sys/coop/inst/dom-[domain-name]

4. Upgrade the fabric node software on the leaf in question to a version that has the highest supported coop version running in the fabric. You can examine other leafs to determine what switch firmware version to upgrade to.

5. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F166400: fltTcaCoppAllow5minPktsRate

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166401: fltTcaCoppAllow15minPktsRate

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166402: fltTcaCoppAllow1hPktsRate

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166403: fltTcaCoppAllow1dPktsRate

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166404: fltTcaCoppAllow1wPktsRate

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166405: fltTcaCoppAllow1moPktsRate

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166406: fltTcaCoppAllow1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166407: fltTcaCoppAllow1yearPktsRate

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166480: fltTcaCoppAllow5minPktsRateLast

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166481: fltTcaCoppAllow15minPktsRateLast

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166482: fltTcaCoppAllow1hPktsRateLast

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166483: fltTcaCoppAllow1dPktsRateLast

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166484: fltTcaCoppAllow1wPktsRateLast

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166485: fltTcaCoppAllow1moPktsRateLast

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166486: fltTcaCoppAllow1qtrPktsRateLast

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166487: fltTcaCoppAllow1yearPktsRateLast

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166488: fltTcaCoppAllow5minPktsRateMin

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166489: fltTcaCoppAllow15minPktsRateMin

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166490: fltTcaCoppAllow1hPktsRateMin

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166491: fltTcaCoppAllow1dPktsRateMin

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166492: fltTcaCoppAllow1wPktsRateMin

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166493: fltTcaCoppAllow1moPktsRateMin

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166494: fltTcaCoppAllow1qtrPktsRateMin

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166495: fltTcaCoppAllow1yearPktsRateMin

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166496: fltTcaCoppAllow5minPktsRateMax

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166497: fltTcaCoppAllow15minPktsRateMax

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166498: fltTcaCoppAllow1hPktsRateMax

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166499: fltTcaCoppAllow1dPktsRateMax

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1665: fltConfigRsRemotePathResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F166500: fltTcaCoppAllow1wPktsRateMax

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166501: fltTcaCoppAllow1moPktsRateMax

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166502: fltTcaCoppAllow1qtrPktsRateMax

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166503: fltTcaCoppAllow1yearPktsRateMax

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166504: fltTcaCoppAllow5minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166505: fltTcaCoppAllow15minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166506: fltTcaCoppAllow1hPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166507: fltTcaCoppAllow1dPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166508: fltTcaCoppAllow1wPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166509: fltTcaCoppAllow1moPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166510: fltTcaCoppAllow1qtrPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166511: fltTcaCoppAllow1yearPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166544: fltTcaCoppAllow5minPktsRateTr

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166545: fltTcaCoppAllow15minPktsRateTr

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166546: fltTcaCoppAllow1hPktsRateTr

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166547: fltTcaCoppAllow1dPktsRateTr

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166548: fltTcaCoppAllow1wPktsRateTr

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166549: fltTcaCoppAllow1moPktsRateTr

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166550: fltTcaCoppAllow1qtrPktsRateTr

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166551: fltTcaCoppAllow1yearPktsRateTr

Severity: variable

Explanation: This fault is caused by "Allowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166600: fltTcaCoppDrop5minBytesLast

Severity: variable

Explanation: This fault is caused by "Dropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166601: fltTcaCoppDrop15minBytesLast

Severity: variable

Explanation: This fault is caused by "Dropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166602: fltTcaCoppDrop1hBytesLast

Severity: variable

Explanation: This fault is caused by "Dropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166603: fltTcaCoppDrop1dBytesLast

Severity: variable

Explanation: This fault is caused by "Dropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166604: fltTcaCoppDrop1wBytesLast

Severity: variable

Explanation: This fault is caused by "Dropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166605: fltTcaCoppDrop1moBytesLast

Severity: variable

Explanation: This fault is caused by "Dropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166606: fltTcaCoppDrop1qtrBytesLast

Severity: variable

Explanation: This fault is caused by "Dropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166607: fltTcaCoppDrop1yearBytesLast

Severity: variable

Explanation: This fault is caused by "Dropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166616: fltTcaCoppDrop5minBytesCum

Severity: variable

Explanation: This fault is caused by "Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166617: fltTcaCoppDrop15minBytesCum

Severity: variable

Explanation: This fault is caused by "Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166618: fltTcaCoppDrop1hBytesCum

Severity: variable

Explanation: This fault is caused by "Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166619: fltTcaCoppDrop1dBytesCum

Severity: variable

Explanation: This fault is caused by "Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166620: fltTcaCoppDrop1wBytesCum

Severity: variable

Explanation: This fault is caused by "Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166621: fltTcaCoppDrop1moBytesCum

Severity: variable

Explanation: This fault is caused by "Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166622: fltTcaCoppDrop1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166623: fltTcaCoppDrop1yearBytesCum

Severity: variable

Explanation: This fault is caused by "Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166624: fltTcaCoppDrop5minBytesPer

Severity: variable

Explanation: This fault is caused by "Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166625: fltTcaCoppDrop15minBytesPer

Severity: variable

Explanation: This fault is caused by "Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166626: fltTcaCoppDrop1hBytesPer

Severity: variable

Explanation: This fault is caused by "Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166627: fltTcaCoppDrop1dBytesPer

Severity: variable

Explanation: This fault is caused by "Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166628: fltTcaCoppDrop1wBytesPer

Severity: variable

Explanation: This fault is caused by "Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166629: fltTcaCoppDrop1moBytesPer

Severity: variable

Explanation: This fault is caused by "Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166630: fltTcaCoppDrop1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166631: fltTcaCoppDrop1yearBytesPer

Severity: variable

Explanation: This fault is caused by "Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166632: fltTcaCoppDrop5minBytesMin

Severity: variable

Explanation: This fault is caused by "Dropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166633: fltTcaCoppDrop15minBytesMin

Severity: variable

Explanation: This fault is caused by "Dropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166634: fltTcaCoppDrop1hBytesMin

Severity: variable

Explanation: This fault is caused by "Dropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166635: fltTcaCoppDrop1dBytesMin

Severity: variable

Explanation: This fault is caused by "Dropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166636: fltTcaCoppDrop1wBytesMin

Severity: variable

Explanation: This fault is caused by "Dropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166637: fltTcaCoppDrop1moBytesMin

Severity: variable

Explanation: This fault is caused by "Dropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166638: fltTcaCoppDrop1qtrBytesMin

Severity: variable

Explanation: This fault is caused by "Dropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166639: fltTcaCoppDrop1yearBytesMin

Severity: variable

Explanation: This fault is caused by "Dropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166640: fltTcaCoppDrop5minBytesMax

Severity: variable

Explanation: This fault is caused by "Dropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166641: fltTcaCoppDrop15minBytesMax

Severity: variable

Explanation: This fault is caused by "Dropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166642: fltTcaCoppDrop1hBytesMax

Severity: variable

Explanation: This fault is caused by "Dropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166643: fltTcaCoppDrop1dBytesMax

Severity: variable

Explanation: This fault is caused by "Dropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166644: fltTcaCoppDrop1wBytesMax

Severity: variable

Explanation: This fault is caused by "Dropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166645: fltTcaCoppDrop1moBytesMax

Severity: variable

Explanation: This fault is caused by "Dropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166646: fltTcaCoppDrop1qtrBytesMax

Severity: variable

Explanation: This fault is caused by "Dropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166647: fltTcaCoppDrop1yearBytesMax

Severity: variable

Explanation: This fault is caused by "Dropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166648: fltTcaCoppDrop5minBytesAvg

Severity: variable

Explanation: This fault is caused by "Dropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166649: fltTcaCoppDrop15minBytesAvg

Severity: variable

Explanation: This fault is caused by "Dropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166650: fltTcaCoppDrop1hBytesAvg

Severity: variable

Explanation: This fault is caused by "Dropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166651: fltTcaCoppDrop1dBytesAvg

Severity: variable

Explanation: This fault is caused by "Dropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166652: fltTcaCoppDrop1wBytesAvg

Severity: variable

Explanation: This fault is caused by "Dropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166653: fltTcaCoppDrop1moBytesAvg

Severity: variable

Explanation: This fault is caused by "Dropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166654: fltTcaCoppDrop1qtrBytesAvg

Severity: variable

Explanation: This fault is caused by "Dropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166655: fltTcaCoppDrop1yearBytesAvg

Severity: variable

Explanation: This fault is caused by "Dropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166680: fltTcaCoppDrop5minBytesTr

Severity: variable

Explanation: This fault is caused by "Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166681: fltTcaCoppDrop15minBytesTr

Severity: variable

Explanation: This fault is caused by "Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166682: fltTcaCoppDrop1hBytesTr

Severity: variable

Explanation: This fault is caused by "Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166683: fltTcaCoppDrop1dBytesTr

Severity: variable

Explanation: This fault is caused by "Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166684: fltTcaCoppDrop1wBytesTr

Severity: variable

Explanation: This fault is caused by "Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166685: fltTcaCoppDrop1moBytesTr

Severity: variable

Explanation: This fault is caused by "Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166686: fltTcaCoppDrop1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166687: fltTcaCoppDrop1yearBytesTr

Severity: variable

Explanation: This fault is caused by "Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166688: fltTcaCoppDrop5minBytesRate

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166689: fltTcaCoppDrop15minBytesRate

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166690: fltTcaCoppDrop1hBytesRate

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166691: fltTcaCoppDrop1dBytesRate

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166692: fltTcaCoppDrop1wBytesRate

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166693: fltTcaCoppDrop1moBytesRate

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166694: fltTcaCoppDrop1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166695: fltTcaCoppDrop1yearBytesRate

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166768: fltTcaCoppDrop5minBytesRateLast

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166769: fltTcaCoppDrop15minBytesRateLast

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166770: fltTcaCoppDrop1hBytesRateLast

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166771: fltTcaCoppDrop1dBytesRateLast

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166772: fltTcaCoppDrop1wBytesRateLast

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166773: fltTcaCoppDrop1moBytesRateLast

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166774: fltTcaCoppDrop1qtrBytesRateLast

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166775: fltTcaCoppDrop1yearBytesRateLast

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166776: fltTcaCoppDrop5minBytesRateMin

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166777: fltTcaCoppDrop15minBytesRateMin

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166778: fltTcaCoppDrop1hBytesRateMin

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166779: fltTcaCoppDrop1dBytesRateMin

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166780: fltTcaCoppDrop1wBytesRateMin

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166781: fltTcaCoppDrop1moBytesRateMin

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166782: fltTcaCoppDrop1qtrBytesRateMin

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166783: fltTcaCoppDrop1yearBytesRateMin

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166784: fltTcaCoppDrop5minBytesRateMax

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166785: fltTcaCoppDrop15minBytesRateMax

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166786: fltTcaCoppDrop1hBytesRateMax

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166787: fltTcaCoppDrop1dBytesRateMax

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166788: fltTcaCoppDrop1wBytesRateMax

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166789: fltTcaCoppDrop1moBytesRateMax

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166790: fltTcaCoppDrop1qtrBytesRateMax

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166791: fltTcaCoppDrop1yearBytesRateMax

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166792: fltTcaCoppDrop5minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166793: fltTcaCoppDrop15minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166794: fltTcaCoppDrop1hBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166795: fltTcaCoppDrop1dBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166796: fltTcaCoppDrop1wBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166797: fltTcaCoppDrop1moBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166798: fltTcaCoppDrop1qtrBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166799: fltTcaCoppDrop1yearBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166832: fltTcaCoppDrop5minBytesRateTr

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166833: fltTcaCoppDrop15minBytesRateTr

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166834: fltTcaCoppDrop1hBytesRateTr

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166835: fltTcaCoppDrop1dBytesRateTr

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166836: fltTcaCoppDrop1wBytesRateTr

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166837: fltTcaCoppDrop1moBytesRateTr

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166838: fltTcaCoppDrop1qtrBytesRateTr

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166839: fltTcaCoppDrop1yearBytesRateTr

Severity: variable

Explanation: This fault is caused by "Dropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166888: fltTcaCoppDrop5minPktsLast

Severity: variable

Explanation: This fault is caused by "Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166889: fltTcaCoppDrop15minPktsLast

Severity: variable

Explanation: This fault is caused by "Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166890: fltTcaCoppDrop1hPktsLast

Severity: variable

Explanation: This fault is caused by "Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166891: fltTcaCoppDrop1dPktsLast

Severity: variable

Explanation: This fault is caused by "Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166892: fltTcaCoppDrop1wPktsLast

Severity: variable

Explanation: This fault is caused by "Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166893: fltTcaCoppDrop1moPktsLast

Severity: variable

Explanation: This fault is caused by "Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166894: fltTcaCoppDrop1qtrPktsLast

Severity: variable

Explanation: This fault is caused by "Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166895: fltTcaCoppDrop1yearPktsLast

Severity: variable

Explanation: This fault is caused by "Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1669: fltVmmCtrlrPMsftConfigFailed

Severity: minor

Explanation: This fault is raised when the SCVMM plugin encounters an exception in provisioning vmmCtrlrP.

Recommended Action: If you see this fault, take the following actions:

1. Check the system events in the SCVMM or WAP machine for details.

F166904: fltTcaCoppDrop5minPktsCum

Severity: variable

Explanation: This fault is caused by "Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166905: fltTcaCoppDrop15minPktsCum

Severity: variable

Explanation: This fault is caused by "Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166906: fltTcaCoppDrop1hPktsCum

Severity: variable

Explanation: This fault is caused by "Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166907: fltTcaCoppDrop1dPktsCum

Severity: variable

Explanation: This fault is caused by "Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166908: fltTcaCoppDrop1wPktsCum

Severity: variable

Explanation: This fault is caused by "Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166909: fltTcaCoppDrop1moPktsCum

Severity: variable

Explanation: This fault is caused by "Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166910: fltTcaCoppDrop1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166911: fltTcaCoppDrop1yearPktsCum

Severity: variable

Explanation: This fault is caused by "Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166912: fltTcaCoppDrop5minPktsPer

Severity: variable

Explanation: This fault is caused by "Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166913: fltTcaCoppDrop15minPktsPer

Severity: variable

Explanation: This fault is caused by "Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166914: fltTcaCoppDrop1hPktsPer

Severity: variable

Explanation: This fault is caused by "Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166915: fltTcaCoppDrop1dPktsPer

Severity: variable

Explanation: This fault is caused by "Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166916: fltTcaCoppDrop1wPktsPer

Severity: variable

Explanation: This fault is caused by "Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166917: fltTcaCoppDrop1moPktsPer

Severity: variable

Explanation: This fault is caused by "Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166918: fltTcaCoppDrop1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166919: fltTcaCoppDrop1yearPktsPer

Severity: variable

Explanation: This fault is caused by "Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166920: fltTcaCoppDrop5minPktsMin

Severity: variable

Explanation: This fault is caused by "Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166921: fltTcaCoppDrop15minPktsMin

Severity: variable

Explanation: This fault is caused by "Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166922: fltTcaCoppDrop1hPktsMin

Severity: variable

Explanation: This fault is caused by "Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166923: fltTcaCoppDrop1dPktsMin

Severity: variable

Explanation: This fault is caused by "Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166924: fltTcaCoppDrop1wPktsMin

Severity: variable

Explanation: This fault is caused by "Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166925: fltTcaCoppDrop1moPktsMin

Severity: variable

Explanation: This fault is caused by "Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166926: fltTcaCoppDrop1qtrPktsMin

Severity: variable

Explanation: This fault is caused by "Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166927: fltTcaCoppDrop1yearPktsMin

Severity: variable

Explanation: This fault is caused by "Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166928: fltTcaCoppDrop5minPktsMax

Severity: variable

Explanation: This fault is caused by "Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166929: fltTcaCoppDrop15minPktsMax

Severity: variable

Explanation: This fault is caused by "Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166930: fltTcaCoppDrop1hPktsMax

Severity: variable

Explanation: This fault is caused by "Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166931: fltTcaCoppDrop1dPktsMax

Severity: variable

Explanation: This fault is caused by "Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166932: fltTcaCoppDrop1wPktsMax

Severity: variable

Explanation: This fault is caused by "Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166933: fltTcaCoppDrop1moPktsMax

Severity: variable

Explanation: This fault is caused by "Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166934: fltTcaCoppDrop1qtrPktsMax

Severity: variable

Explanation: This fault is caused by "Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166935: fltTcaCoppDrop1yearPktsMax

Severity: variable

Explanation: This fault is caused by "Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166936: fltTcaCoppDrop5minPktsAvg

Severity: variable

Explanation: This fault is caused by "Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166937: fltTcaCoppDrop15minPktsAvg

Severity: variable

Explanation: This fault is caused by "Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166938: fltTcaCoppDrop1hPktsAvg

Severity: variable

Explanation: This fault is caused by "Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166939: fltTcaCoppDrop1dPktsAvg

Severity: variable

Explanation: This fault is caused by "Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166940: fltTcaCoppDrop1wPktsAvg

Severity: variable

Explanation: This fault is caused by "Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166941: fltTcaCoppDrop1moPktsAvg

Severity: variable

Explanation: This fault is caused by "Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166942: fltTcaCoppDrop1qtrPktsAvg

Severity: variable

Explanation: This fault is caused by "Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166943: fltTcaCoppDrop1yearPktsAvg

Severity: variable

Explanation: This fault is caused by "Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166968: fltTcaCoppDrop5minPktsTr

Severity: variable

Explanation: This fault is caused by "Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166969: fltTcaCoppDrop15minPktsTr

Severity: variable

Explanation: This fault is caused by "Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166970: fltTcaCoppDrop1hPktsTr

Severity: variable

Explanation: This fault is caused by "Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166971: fltTcaCoppDrop1dPktsTr

Severity: variable

Explanation: This fault is caused by "Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166972: fltTcaCoppDrop1wPktsTr

Severity: variable

Explanation: This fault is caused by "Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166973: fltTcaCoppDrop1moPktsTr

Severity: variable

Explanation: This fault is caused by "Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166974: fltTcaCoppDrop1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166975: fltTcaCoppDrop1yearPktsTr

Severity: variable

Explanation: This fault is caused by "Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166976: fltTcaCoppDrop5minPktsRate

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166977: fltTcaCoppDrop15minPktsRate

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166978: fltTcaCoppDrop1hPktsRate

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166979: fltTcaCoppDrop1dPktsRate

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166980: fltTcaCoppDrop1wPktsRate

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166981: fltTcaCoppDrop1moPktsRate

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166982: fltTcaCoppDrop1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F166983: fltTcaCoppDrop1yearPktsRate

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F167056: fltTcaCoppDrop5minPktsRateLast

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F167057: fltTcaCoppDrop15minPktsRateLast

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F167058: fltTcaCoppDrop1hPktsRateLast

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F167059: fltTcaCoppDrop1dPktsRateLast

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F167060: fltTcaCoppDrop1wPktsRateLast

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F167061: fltTcaCoppDrop1moPktsRateLast

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F167062: fltTcaCoppDrop1qtrPktsRateLast

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F167063: fltTcaCoppDrop1yearPktsRateLast

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F167064: fltTcaCoppDrop5minPktsRateMin

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F167065: fltTcaCoppDrop15minPktsRateMin

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F167066: fltTcaCoppDrop1hPktsRateMin

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F167067: fltTcaCoppDrop1dPktsRateMin

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F167068: fltTcaCoppDrop1wPktsRateMin

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F167069: fltTcaCoppDrop1moPktsRateMin

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F167070: fltTcaCoppDrop1qtrPktsRateMin

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F167071: fltTcaCoppDrop1yearPktsRateMin

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F167072: fltTcaCoppDrop5minPktsRateMax

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F167073: fltTcaCoppDrop15minPktsRateMax

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F167074: fltTcaCoppDrop1hPktsRateMax

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F167075: fltTcaCoppDrop1dPktsRateMax

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F167076: fltTcaCoppDrop1wPktsRateMax

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F167077: fltTcaCoppDrop1moPktsRateMax

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F167078: fltTcaCoppDrop1qtrPktsRateMax

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F167079: fltTcaCoppDrop1yearPktsRateMax

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F167080: fltTcaCoppDrop5minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F167081: fltTcaCoppDrop15minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F167082: fltTcaCoppDrop1hPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F167083: fltTcaCoppDrop1dPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F167084: fltTcaCoppDrop1wPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F167085: fltTcaCoppDrop1moPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F167086: fltTcaCoppDrop1qtrPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F167087: fltTcaCoppDrop1yearPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F167120: fltTcaCoppDrop5minPktsRateTr

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F167121: fltTcaCoppDrop15minPktsRateTr

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F167122: fltTcaCoppDrop1hPktsRateTr

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F167123: fltTcaCoppDrop1dPktsRateTr

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F167124: fltTcaCoppDrop1wPktsRateTr

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F167125: fltTcaCoppDrop1moPktsRateTr

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F167126: fltTcaCoppDrop1qtrPktsRateTr

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F167127: fltTcaCoppDrop1yearPktsRateTr

Severity: variable

Explanation: This fault is caused by "Dropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1674: fltSpanRsDestApicResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1676: fltVmmAgtStatusConnectFailed

Severity: major

Explanation: This fault is raised when the VMM Controller Agent is not able to communicate with the APIC.

Recommended Action: If you see this fault, take the following actions:

1. Verify that the SCVMM server is online.

2. Verify that the ACI SCVMM Agent is running on the SCVMM Server

3. Review the HostnameOrIp configuration. Connections to an SCVMM HA setup should be configured with the SCVMM HA IP or FQDN, not the individual Cluster Node infromation nor the Windows Failover Cluster information.

4. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F1678: fltFvRsCtxToExtRouteTagPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1680: fltAcRuleIpOperStFailed

Severity: minor

Explanation: This fault occurs when either the total Atomic Counter or Latency rule reaches maximum programmable limit or an unsupported modification is made on an Atomic counter or Latency policy. The acRule does not get programmed and is instead stuck in failed state.

Recommended Action: To recover from this fault, try the following actions:

1. If the fault occurred because of a policy modification, disable and re-enable the atomic counter/latency policy with the changes.

2. If the fault occurred because the maximum limit was reached, remove unneeded Atomic Counter/Latency configuration policies to accommodate new policies.

3. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F1686: fltNdRsRaSubnetToNdPfxPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1688: fltEthpmFcotDefectiveTransceiver

Severity: critical

Explanation: This fault occurs when a transceiver is defective and unable to be used in the system

Recommended Action: To recover from this fault, try the following actions:

1. Remove the defective transceiver

F1690: fltVnsConfIssueConfIssue

Severity: minor

Explanation: This fault occurs when there is incomplete or incorrect configuration, intermittent system errors.

Recommended Action: If you see this fault, take the following actions:

1. Look at the configuration for issues. Refer to the help on (vns:ConfIssue:issue) property for error explanantion

2. Verify the configuration is correct and complete to resolve configuration related issues.

3. The system should automatically recover from intermittent system errors and no action needs to be taken here.

4. If the issue persists, create a tech-support file and contact Cisco TAC.

F1691: fltDbgacRsFromAbsEpgResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1692: fltDbgacRsToAbsEpgResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1693: fltTroubleshootRsSessionSchedulerResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1696: fltL1PhysIfPortEPGSpanInvalid

Severity: warning

Explanation: This fault occurs when a port is set to epg and also a span destination which is invalid.

Recommended Action: To recover from this fault, try the following actions:

1. Remove port from epg

2. Remove port as a span destination

F1698: fltOpflexODevODevMissHeartbeat

Severity: major

Explanation: This fault is raised when there is an issue with respect to the OpFlex device

Recommended Action: If you see this fault, take the following actions:

1. To restore, delete and re-add the OpFlex device.

2. Check connectivity to the OpFlex device.

3. Try restarting the device.

4. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F1699: fltDatetimeNtpProviderStatusNtp-prov-fault

Severity: warning

Explanation: This fault occurs when a ntp configuration on a switch has problems

Recommended Action: If you see this fault, take the following actions:

1. Verify that the ntp peers are correctly configured and are reachable.

2. Verify that the ntp peers have the correct keys.

3. Configure multiple NTP servers for to guarantee availability of a valid NTP Server for synchronization.

4. If NTP Servers are configured with a DNS Name and not an IP Address, Verify if it's a valid domain name and verify if the policy with DNS providers are configured.

5. If there is a firewall in-between the ACI Fabric and NTP Servers, make sure that the firewall allows NTP traffic.

6. Verify whether NTP daemon is running in all or some of the NTP servers.

7. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F1700: fltDatetimeClkPolNtp-prov-fault

Severity: minor

Explanation: This fault occurs when a ntp configuration on a controller has problems

Recommended Action: If you see this fault, take the following actions:

1. Verify that the ntp peers are correctly configured and are reachable.

2. Verify that the ntp peers have the correct keys.

3. Configure multiple NTP servers for to guarantee availability of a valid NTP Server for synchronization.

4. If NTP Servers are configured with a DNS Name and not an IP Address, Verify if it's a valid domain name and verify if the policy with DNS providers are configured.

5. If there is a firewall in-between the ACI Fabric and NTP Servers, make sure that the firewall allows NTP traffic.

6. Verify whether NTP daemon is running in all or some of the NTP servers.

7. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F1703: fltTraceroutepRsTrEpExtIpSrcResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1706: fltInfraRsOverrideFwPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1707: fltVmmRsDefaultFwPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1712: fltFvOrchsInfoVipNotAllocated

Severity: major

Explanation: This fault occurs when an IP Address could not be allocated from the IP Address Pool.

Recommended Action: If you see this fault, take the following actions:

1. Add additional IP Addresses to the IP Address Pool

2. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC

F1722: fltVnsRsLDevCtxToRtrCfgResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1726: fltMgmtConfigAddrDuplicateMgmtAddr

Severity: minor

Explanation: This fault occurs when the same IP address is configured on multiple nodes.

Recommended Action: If you see this fault, take the following actions:

1. Identify the nodes that are using the same IP address.

2. Fix address pools, or the static IP that is assigned to the conflicting nodes.

3. If above actions did not resolve the issue, create a tech-support file and contact Cisco TAC.

F1729: fltOspfv3AdjEpFailed

Severity: warning

Explanation: This fault occurs when the adjacency state is not up

Recommended Action: To recover from this fault, try the following actions:

1. Look at any configuration issues

2. Verify the configuration is correct/complete

3. Check network connectivity to the peer

4. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F1731: fltInfraRsOverrideStpPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F177088: fltTcaEqptIngrStorm5minDropBytesLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177089: fltTcaEqptIngrStorm15minDropBytesLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177090: fltTcaEqptIngrStorm1hDropBytesLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177091: fltTcaEqptIngrStorm1dDropBytesLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177092: fltTcaEqptIngrStorm1wDropBytesLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177093: fltTcaEqptIngrStorm1moDropBytesLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177094: fltTcaEqptIngrStorm1qtrDropBytesLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177095: fltTcaEqptIngrStorm1yearDropBytesLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177104: fltTcaEqptIngrStorm5minDropBytesCum

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177105: fltTcaEqptIngrStorm15minDropBytesCum

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177106: fltTcaEqptIngrStorm1hDropBytesCum

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177107: fltTcaEqptIngrStorm1dDropBytesCum

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177108: fltTcaEqptIngrStorm1wDropBytesCum

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177109: fltTcaEqptIngrStorm1moDropBytesCum

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177110: fltTcaEqptIngrStorm1qtrDropBytesCum

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177111: fltTcaEqptIngrStorm1yearDropBytesCum

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177112: fltTcaEqptIngrStorm5minDropBytesPer

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177113: fltTcaEqptIngrStorm15minDropBytesPer

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177114: fltTcaEqptIngrStorm1hDropBytesPer

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177115: fltTcaEqptIngrStorm1dDropBytesPer

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177116: fltTcaEqptIngrStorm1wDropBytesPer

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177117: fltTcaEqptIngrStorm1moDropBytesPer

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177118: fltTcaEqptIngrStorm1qtrDropBytesPer

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177119: fltTcaEqptIngrStorm1yearDropBytesPer

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177120: fltTcaEqptIngrStorm5minDropBytesMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177121: fltTcaEqptIngrStorm15minDropBytesMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177122: fltTcaEqptIngrStorm1hDropBytesMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177123: fltTcaEqptIngrStorm1dDropBytesMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177124: fltTcaEqptIngrStorm1wDropBytesMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177125: fltTcaEqptIngrStorm1moDropBytesMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177126: fltTcaEqptIngrStorm1qtrDropBytesMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177127: fltTcaEqptIngrStorm1yearDropBytesMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177128: fltTcaEqptIngrStorm5minDropBytesMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177129: fltTcaEqptIngrStorm15minDropBytesMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177130: fltTcaEqptIngrStorm1hDropBytesMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177131: fltTcaEqptIngrStorm1dDropBytesMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177132: fltTcaEqptIngrStorm1wDropBytesMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177133: fltTcaEqptIngrStorm1moDropBytesMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177134: fltTcaEqptIngrStorm1qtrDropBytesMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177135: fltTcaEqptIngrStorm1yearDropBytesMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177136: fltTcaEqptIngrStorm5minDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177137: fltTcaEqptIngrStorm15minDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177138: fltTcaEqptIngrStorm1hDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177139: fltTcaEqptIngrStorm1dDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177140: fltTcaEqptIngrStorm1wDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177141: fltTcaEqptIngrStorm1moDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177142: fltTcaEqptIngrStorm1qtrDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177143: fltTcaEqptIngrStorm1yearDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177168: fltTcaEqptIngrStorm5minDropBytesTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177169: fltTcaEqptIngrStorm15minDropBytesTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177170: fltTcaEqptIngrStorm1hDropBytesTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177171: fltTcaEqptIngrStorm1dDropBytesTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177172: fltTcaEqptIngrStorm1wDropBytesTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177173: fltTcaEqptIngrStorm1moDropBytesTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177174: fltTcaEqptIngrStorm1qtrDropBytesTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177175: fltTcaEqptIngrStorm1yearDropBytesTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177176: fltTcaEqptIngrStorm5minDropBytesRate

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177177: fltTcaEqptIngrStorm15minDropBytesRate

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177178: fltTcaEqptIngrStorm1hDropBytesRate

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177179: fltTcaEqptIngrStorm1dDropBytesRate

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177180: fltTcaEqptIngrStorm1wDropBytesRate

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177181: fltTcaEqptIngrStorm1moDropBytesRate

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177182: fltTcaEqptIngrStorm1qtrDropBytesRate

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177183: fltTcaEqptIngrStorm1yearDropBytesRate

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177256: fltTcaEqptIngrStorm5minDropBytesRateLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177257: fltTcaEqptIngrStorm15minDropBytesRateLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177258: fltTcaEqptIngrStorm1hDropBytesRateLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177259: fltTcaEqptIngrStorm1dDropBytesRateLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177260: fltTcaEqptIngrStorm1wDropBytesRateLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177261: fltTcaEqptIngrStorm1moDropBytesRateLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177262: fltTcaEqptIngrStorm1qtrDropBytesRateLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177263: fltTcaEqptIngrStorm1yearDropBytesRateLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177264: fltTcaEqptIngrStorm5minDropBytesRateMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177265: fltTcaEqptIngrStorm15minDropBytesRateMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177266: fltTcaEqptIngrStorm1hDropBytesRateMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177267: fltTcaEqptIngrStorm1dDropBytesRateMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177268: fltTcaEqptIngrStorm1wDropBytesRateMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177269: fltTcaEqptIngrStorm1moDropBytesRateMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177270: fltTcaEqptIngrStorm1qtrDropBytesRateMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177271: fltTcaEqptIngrStorm1yearDropBytesRateMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177272: fltTcaEqptIngrStorm5minDropBytesRateMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177273: fltTcaEqptIngrStorm15minDropBytesRateMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177274: fltTcaEqptIngrStorm1hDropBytesRateMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177275: fltTcaEqptIngrStorm1dDropBytesRateMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177276: fltTcaEqptIngrStorm1wDropBytesRateMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177277: fltTcaEqptIngrStorm1moDropBytesRateMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177278: fltTcaEqptIngrStorm1qtrDropBytesRateMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177279: fltTcaEqptIngrStorm1yearDropBytesRateMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177280: fltTcaEqptIngrStorm5minDropBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177281: fltTcaEqptIngrStorm15minDropBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177282: fltTcaEqptIngrStorm1hDropBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177283: fltTcaEqptIngrStorm1dDropBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177284: fltTcaEqptIngrStorm1wDropBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177285: fltTcaEqptIngrStorm1moDropBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177286: fltTcaEqptIngrStorm1qtrDropBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177287: fltTcaEqptIngrStorm1yearDropBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177320: fltTcaEqptIngrStorm5minDropBytesRateTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177321: fltTcaEqptIngrStorm15minDropBytesRateTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177322: fltTcaEqptIngrStorm1hDropBytesRateTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177323: fltTcaEqptIngrStorm1dDropBytesRateTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177324: fltTcaEqptIngrStorm1wDropBytesRateTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177325: fltTcaEqptIngrStorm1moDropBytesRateTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177326: fltTcaEqptIngrStorm1qtrDropBytesRateTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F177327: fltTcaEqptIngrStorm1yearDropBytesRateTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1778: fltVnsRsCDevToCtrlrPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1781: fltMgmtConfigNodeDuplicateMgmtAddr

Severity: minor

Explanation: This fault occurs when the same node is configured with mulitple addresses.

Recommended Action: If you see this fault, take the following actions:

1. Identify the node that has duplicate addresses.

2. Fix address pools, management groups that assign multiple addresses to the same node.

3. If above actions did not resolve the issue, create a tech-support file and contact Cisco TAC.

F1782: fltSyntheticRsToAObjResolveFail

Severity: warning

Explanation: This is a custom explanation for a relation fault.

Recommended Action: This is a custom recommended action for a relation fault

F1783: fltVnsCtrlrEpConfMismatch

Severity: minor

Explanation: This fault occurs when the system could not allocate an ip address for one or more nodes in the cluster. The configIssues indicate the exact reason for the error.

Recommended Action: If you see this fault, please check if the address range (fvns:AddrInst) is valid and sufficient for the cluster.

F1786: fltVnsRsConnToAConnResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1787: fltVnsRsConnToAConnInstResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1792: fltOspfv3MaxLsaPLsaLimitExceeded

Severity: warning

Explanation: This fault occurs when the number of non-self-originated LSAs from the neighbor is greater than the configured limit

Recommended Action: None set.

F1793: fltOspfMaxLsaPLsaLimitExceeded

Severity: warning

Explanation: This fault occurs when the number of non-self-originated LSAs from the neighbor is greater than the configured limit

Recommended Action: None set.

F1794: fltL2BDOptFloodIgnored

Severity: warning

Explanation: This fault occurs when the optimized flood mode is ignored on the BD because of resource limitations. The current limit for optimized flood is 50 BDs deployed on the node

Recommended Action: If this fault is consistently happening, try the following actions:

1. Change the unknown multicast destination action to flood mode

2. Reduce the number of BDs with unknown multicast destination action in opt-flood mode

F1798: fltIpv6IfOperStDown

Severity: major

Explanation: This fault occurs when the operational state of the ipv6 LL address state is changed to subnet-overlap/no primary/addr already confgd as next hop in a static route

Recommended Action: To recover from this fault, try the following actions:

1. Look at any configuration issues

2. Verify the configuration is correct/complete

F1799: fltVnsRsNodeToLDevResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1806: fltConditionRsToNodePolGrpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1807: fltDhcpRsToNodeGrpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1808: fltFabricRsLeNodePResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1809: fltFabricRsSpNodePResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1810: fltFirmwareRsToFwGrpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1811: fltInfraRsNodePResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1812: fltMaintRsToMaintGrpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1813: fltMgmtRsToNodeGrpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1815: fltEthpmFcotBaseInvalidTransceiver

Severity: critical

Explanation: This fault occurs when a transceiver is invalid or has hardware issues.

Recommended Action: To recover from this fault, try the following actions:

1. Remove the defective transceiver and replace with valid one.

2. Ensure that the transceiver is properly coneected.

F1816: fltIsisDomIsisDomOperStFailed

Severity: major

Explanation: This fault usually occurs when protocol bring up on a VRF fails.

Recommended Action: If you see this fault, take the following actions:

1. Try shutting down and restarting the ISIS instance.

2. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F1817: fltSpanAcctConfigFailed

Severity: major

Explanation: This fault is raised when the span policy failed to get deployed.

Recommended Action: If you see this fault, take the following actions:

1. Verify that there are too many sessions configured.

2. Review the fault message and remove some unused span configuration

3. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F1819: fltSatmFabPInvalidTransceiver

Severity: critical

Explanation: This fault occurs when an unsupported transceiver is used to attach to to the fabric link of a fex

Recommended Action: None set.

F1820: fltEqptcapacityFSPartitionFsPartitionLimitsExceededMinor

Severity: minor

Explanation: This fault occurs when the disk usage of a partiton increases beyond its threshold

Recommended Action: To recover from this fault, try the following action:

1. Free up space from affected disk partition

F1821: fltEqptcapacityFSPartitionFsPartitionLimitsExceededMajor

Severity: major

Explanation: This fault occurs when the disk usage of a partiton increases beyond its threshold

Recommended Action: To recover from this fault, try the following action:

1. Free up space from affected disk partition

F1822: fltEqptcapacityFSPartitionFsPartitionLimitsExceededCritical

Severity: critical

Explanation: This fault occurs when the disk usage of a partiton increases beyond its threshold

Recommended Action: To recover from this fault, try the following action:

1. Free up space from affected disk partition

F1823: fltVnsRsLIfCtxToSvcRedirectPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1824: fltInfraIncmptblClsPeerIncompatiblePeer

Severity: critical

Explanation: This fault occurs when a controller is recognized as incompatible.

Recommended Action: If you see this fault, take the following actions:

1. The message included with the fault will also include a reason that the controller is recognized as incompatible. Investigate the reason and correct it.

2. This issue is mostly seen when controllers in a cluster are running different versions of firmware. Use the command acidiag version to find the APIC version.

3. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F1827: fltPlannerRsBdVrfResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1828: fltPlannerRsEpgBdResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1830: fltPlannerRsGraphBdResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1831: fltPlannerRsGraphL3OutResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1832: fltPlannerRsToConsumerBdResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1833: fltPlannerRsToConsumerL3OutResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1834: fltPlannerRsToProviderBdResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1835: fltPlannerRsToProviderL3OutResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1836: fltPlannerRsL2OutBdResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1837: fltPlannerRsL3OutVrfResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1838: fltPlannerRsConsumedContractsResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1839: fltPlannerRsGraphContractsResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1840: fltPlannerRsProvidedContractsResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1852: fltPlannerRsDeployedObjectResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1853: fltPolGCountLimitExceeded

Severity: warning

Explanation: This fault occurs when the number of policies of this type exceed the supported fabric-wide limit.

Recommended Action: If you see this fault, take the following actions:

1. Modify your configuration so that the total number of these policies are under the supported limit.

F1859: fltPlannerRsDeployedFexResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F185984: fltTcaOpflexIDEpDfwConn5minAgedLast

Severity: variable

Explanation: This fault is caused by "aged connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F185985: fltTcaOpflexIDEpDfwConn15minAgedLast

Severity: variable

Explanation: This fault is caused by "aged connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F185986: fltTcaOpflexIDEpDfwConn1hAgedLast

Severity: variable

Explanation: This fault is caused by "aged connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F185987: fltTcaOpflexIDEpDfwConn1dAgedLast

Severity: variable

Explanation: This fault is caused by "aged connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F185988: fltTcaOpflexIDEpDfwConn1wAgedLast

Severity: variable

Explanation: This fault is caused by "aged connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F185989: fltTcaOpflexIDEpDfwConn1moAgedLast

Severity: variable

Explanation: This fault is caused by "aged connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F185990: fltTcaOpflexIDEpDfwConn1qtrAgedLast

Severity: variable

Explanation: This fault is caused by "aged connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F185991: fltTcaOpflexIDEpDfwConn1yearAgedLast

Severity: variable

Explanation: This fault is caused by "aged connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186000: fltTcaOpflexIDEpDfwConn5minAgedCum

Severity: variable

Explanation: This fault is caused by "aged connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186001: fltTcaOpflexIDEpDfwConn15minAgedCum

Severity: variable

Explanation: This fault is caused by "aged connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186002: fltTcaOpflexIDEpDfwConn1hAgedCum

Severity: variable

Explanation: This fault is caused by "aged connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186003: fltTcaOpflexIDEpDfwConn1dAgedCum

Severity: variable

Explanation: This fault is caused by "aged connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186004: fltTcaOpflexIDEpDfwConn1wAgedCum

Severity: variable

Explanation: This fault is caused by "aged connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186005: fltTcaOpflexIDEpDfwConn1moAgedCum

Severity: variable

Explanation: This fault is caused by "aged connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186006: fltTcaOpflexIDEpDfwConn1qtrAgedCum

Severity: variable

Explanation: This fault is caused by "aged connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186007: fltTcaOpflexIDEpDfwConn1yearAgedCum

Severity: variable

Explanation: This fault is caused by "aged connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186008: fltTcaOpflexIDEpDfwConn5minAgedPer

Severity: variable

Explanation: This fault is caused by "aged connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186009: fltTcaOpflexIDEpDfwConn15minAgedPer

Severity: variable

Explanation: This fault is caused by "aged connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186010: fltTcaOpflexIDEpDfwConn1hAgedPer

Severity: variable

Explanation: This fault is caused by "aged connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186011: fltTcaOpflexIDEpDfwConn1dAgedPer

Severity: variable

Explanation: This fault is caused by "aged connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186012: fltTcaOpflexIDEpDfwConn1wAgedPer

Severity: variable

Explanation: This fault is caused by "aged connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186013: fltTcaOpflexIDEpDfwConn1moAgedPer

Severity: variable

Explanation: This fault is caused by "aged connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186014: fltTcaOpflexIDEpDfwConn1qtrAgedPer

Severity: variable

Explanation: This fault is caused by "aged connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186015: fltTcaOpflexIDEpDfwConn1yearAgedPer

Severity: variable

Explanation: This fault is caused by "aged connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186016: fltTcaOpflexIDEpDfwConn5minAgedMin

Severity: variable

Explanation: This fault is caused by "aged connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186017: fltTcaOpflexIDEpDfwConn15minAgedMin

Severity: variable

Explanation: This fault is caused by "aged connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186018: fltTcaOpflexIDEpDfwConn1hAgedMin

Severity: variable

Explanation: This fault is caused by "aged connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186019: fltTcaOpflexIDEpDfwConn1dAgedMin

Severity: variable

Explanation: This fault is caused by "aged connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186020: fltTcaOpflexIDEpDfwConn1wAgedMin

Severity: variable

Explanation: This fault is caused by "aged connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186021: fltTcaOpflexIDEpDfwConn1moAgedMin

Severity: variable

Explanation: This fault is caused by "aged connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186022: fltTcaOpflexIDEpDfwConn1qtrAgedMin

Severity: variable

Explanation: This fault is caused by "aged connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186023: fltTcaOpflexIDEpDfwConn1yearAgedMin

Severity: variable

Explanation: This fault is caused by "aged connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186024: fltTcaOpflexIDEpDfwConn5minAgedMax

Severity: variable

Explanation: This fault is caused by "aged connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186025: fltTcaOpflexIDEpDfwConn15minAgedMax

Severity: variable

Explanation: This fault is caused by "aged connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186026: fltTcaOpflexIDEpDfwConn1hAgedMax

Severity: variable

Explanation: This fault is caused by "aged connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186027: fltTcaOpflexIDEpDfwConn1dAgedMax

Severity: variable

Explanation: This fault is caused by "aged connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186028: fltTcaOpflexIDEpDfwConn1wAgedMax

Severity: variable

Explanation: This fault is caused by "aged connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186029: fltTcaOpflexIDEpDfwConn1moAgedMax

Severity: variable

Explanation: This fault is caused by "aged connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186030: fltTcaOpflexIDEpDfwConn1qtrAgedMax

Severity: variable

Explanation: This fault is caused by "aged connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186031: fltTcaOpflexIDEpDfwConn1yearAgedMax

Severity: variable

Explanation: This fault is caused by "aged connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186032: fltTcaOpflexIDEpDfwConn5minAgedAvg

Severity: variable

Explanation: This fault is caused by "aged connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186033: fltTcaOpflexIDEpDfwConn15minAgedAvg

Severity: variable

Explanation: This fault is caused by "aged connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186034: fltTcaOpflexIDEpDfwConn1hAgedAvg

Severity: variable

Explanation: This fault is caused by "aged connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186035: fltTcaOpflexIDEpDfwConn1dAgedAvg

Severity: variable

Explanation: This fault is caused by "aged connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186036: fltTcaOpflexIDEpDfwConn1wAgedAvg

Severity: variable

Explanation: This fault is caused by "aged connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186037: fltTcaOpflexIDEpDfwConn1moAgedAvg

Severity: variable

Explanation: This fault is caused by "aged connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186038: fltTcaOpflexIDEpDfwConn1qtrAgedAvg

Severity: variable

Explanation: This fault is caused by "aged connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186039: fltTcaOpflexIDEpDfwConn1yearAgedAvg

Severity: variable

Explanation: This fault is caused by "aged connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186064: fltTcaOpflexIDEpDfwConn5minAgedTr

Severity: variable

Explanation: This fault is caused by "aged connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186065: fltTcaOpflexIDEpDfwConn15minAgedTr

Severity: variable

Explanation: This fault is caused by "aged connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186066: fltTcaOpflexIDEpDfwConn1hAgedTr

Severity: variable

Explanation: This fault is caused by "aged connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186067: fltTcaOpflexIDEpDfwConn1dAgedTr

Severity: variable

Explanation: This fault is caused by "aged connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186068: fltTcaOpflexIDEpDfwConn1wAgedTr

Severity: variable

Explanation: This fault is caused by "aged connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186069: fltTcaOpflexIDEpDfwConn1moAgedTr

Severity: variable

Explanation: This fault is caused by "aged connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186070: fltTcaOpflexIDEpDfwConn1qtrAgedTr

Severity: variable

Explanation: This fault is caused by "aged connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186071: fltTcaOpflexIDEpDfwConn1yearAgedTr

Severity: variable

Explanation: This fault is caused by "aged connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186072: fltTcaOpflexIDEpDfwConn5minAgedRate

Severity: variable

Explanation: This fault is caused by "aged connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186073: fltTcaOpflexIDEpDfwConn15minAgedRate

Severity: variable

Explanation: This fault is caused by "aged connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186074: fltTcaOpflexIDEpDfwConn1hAgedRate

Severity: variable

Explanation: This fault is caused by "aged connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186075: fltTcaOpflexIDEpDfwConn1dAgedRate

Severity: variable

Explanation: This fault is caused by "aged connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186076: fltTcaOpflexIDEpDfwConn1wAgedRate

Severity: variable

Explanation: This fault is caused by "aged connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186077: fltTcaOpflexIDEpDfwConn1moAgedRate

Severity: variable

Explanation: This fault is caused by "aged connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186078: fltTcaOpflexIDEpDfwConn1qtrAgedRate

Severity: variable

Explanation: This fault is caused by "aged connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186079: fltTcaOpflexIDEpDfwConn1yearAgedRate

Severity: variable

Explanation: This fault is caused by "aged connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "aged connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1861: fltPlannerRsEpgLabelResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F186152: fltTcaOpflexIDEpDfwConn5minCreatedLast

Severity: variable

Explanation: This fault is caused by "created connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186153: fltTcaOpflexIDEpDfwConn15minCreatedLast

Severity: variable

Explanation: This fault is caused by "created connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186154: fltTcaOpflexIDEpDfwConn1hCreatedLast

Severity: variable

Explanation: This fault is caused by "created connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186155: fltTcaOpflexIDEpDfwConn1dCreatedLast

Severity: variable

Explanation: This fault is caused by "created connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186156: fltTcaOpflexIDEpDfwConn1wCreatedLast

Severity: variable

Explanation: This fault is caused by "created connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186157: fltTcaOpflexIDEpDfwConn1moCreatedLast

Severity: variable

Explanation: This fault is caused by "created connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186158: fltTcaOpflexIDEpDfwConn1qtrCreatedLast

Severity: variable

Explanation: This fault is caused by "created connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186159: fltTcaOpflexIDEpDfwConn1yearCreatedLast

Severity: variable

Explanation: This fault is caused by "created connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186168: fltTcaOpflexIDEpDfwConn5minCreatedCum

Severity: variable

Explanation: This fault is caused by "created connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186169: fltTcaOpflexIDEpDfwConn15minCreatedCum

Severity: variable

Explanation: This fault is caused by "created connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186170: fltTcaOpflexIDEpDfwConn1hCreatedCum

Severity: variable

Explanation: This fault is caused by "created connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186171: fltTcaOpflexIDEpDfwConn1dCreatedCum

Severity: variable

Explanation: This fault is caused by "created connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186172: fltTcaOpflexIDEpDfwConn1wCreatedCum

Severity: variable

Explanation: This fault is caused by "created connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186173: fltTcaOpflexIDEpDfwConn1moCreatedCum

Severity: variable

Explanation: This fault is caused by "created connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186174: fltTcaOpflexIDEpDfwConn1qtrCreatedCum

Severity: variable

Explanation: This fault is caused by "created connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186175: fltTcaOpflexIDEpDfwConn1yearCreatedCum

Severity: variable

Explanation: This fault is caused by "created connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186176: fltTcaOpflexIDEpDfwConn5minCreatedPer

Severity: variable

Explanation: This fault is caused by "created connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186177: fltTcaOpflexIDEpDfwConn15minCreatedPer

Severity: variable

Explanation: This fault is caused by "created connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186178: fltTcaOpflexIDEpDfwConn1hCreatedPer

Severity: variable

Explanation: This fault is caused by "created connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186179: fltTcaOpflexIDEpDfwConn1dCreatedPer

Severity: variable

Explanation: This fault is caused by "created connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186180: fltTcaOpflexIDEpDfwConn1wCreatedPer

Severity: variable

Explanation: This fault is caused by "created connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186181: fltTcaOpflexIDEpDfwConn1moCreatedPer

Severity: variable

Explanation: This fault is caused by "created connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186182: fltTcaOpflexIDEpDfwConn1qtrCreatedPer

Severity: variable

Explanation: This fault is caused by "created connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186183: fltTcaOpflexIDEpDfwConn1yearCreatedPer

Severity: variable

Explanation: This fault is caused by "created connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186184: fltTcaOpflexIDEpDfwConn5minCreatedMin

Severity: variable

Explanation: This fault is caused by "created connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186185: fltTcaOpflexIDEpDfwConn15minCreatedMin

Severity: variable

Explanation: This fault is caused by "created connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186186: fltTcaOpflexIDEpDfwConn1hCreatedMin

Severity: variable

Explanation: This fault is caused by "created connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186187: fltTcaOpflexIDEpDfwConn1dCreatedMin

Severity: variable

Explanation: This fault is caused by "created connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186188: fltTcaOpflexIDEpDfwConn1wCreatedMin

Severity: variable

Explanation: This fault is caused by "created connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186189: fltTcaOpflexIDEpDfwConn1moCreatedMin

Severity: variable

Explanation: This fault is caused by "created connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186190: fltTcaOpflexIDEpDfwConn1qtrCreatedMin

Severity: variable

Explanation: This fault is caused by "created connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186191: fltTcaOpflexIDEpDfwConn1yearCreatedMin

Severity: variable

Explanation: This fault is caused by "created connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186192: fltTcaOpflexIDEpDfwConn5minCreatedMax

Severity: variable

Explanation: This fault is caused by "created connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186193: fltTcaOpflexIDEpDfwConn15minCreatedMax

Severity: variable

Explanation: This fault is caused by "created connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186194: fltTcaOpflexIDEpDfwConn1hCreatedMax

Severity: variable

Explanation: This fault is caused by "created connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186195: fltTcaOpflexIDEpDfwConn1dCreatedMax

Severity: variable

Explanation: This fault is caused by "created connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186196: fltTcaOpflexIDEpDfwConn1wCreatedMax

Severity: variable

Explanation: This fault is caused by "created connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186197: fltTcaOpflexIDEpDfwConn1moCreatedMax

Severity: variable

Explanation: This fault is caused by "created connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186198: fltTcaOpflexIDEpDfwConn1qtrCreatedMax

Severity: variable

Explanation: This fault is caused by "created connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186199: fltTcaOpflexIDEpDfwConn1yearCreatedMax

Severity: variable

Explanation: This fault is caused by "created connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1862: fltPlannerRsConnectedLeafResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F186200: fltTcaOpflexIDEpDfwConn5minCreatedAvg

Severity: variable

Explanation: This fault is caused by "created connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186201: fltTcaOpflexIDEpDfwConn15minCreatedAvg

Severity: variable

Explanation: This fault is caused by "created connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186202: fltTcaOpflexIDEpDfwConn1hCreatedAvg

Severity: variable

Explanation: This fault is caused by "created connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186203: fltTcaOpflexIDEpDfwConn1dCreatedAvg

Severity: variable

Explanation: This fault is caused by "created connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186204: fltTcaOpflexIDEpDfwConn1wCreatedAvg

Severity: variable

Explanation: This fault is caused by "created connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186205: fltTcaOpflexIDEpDfwConn1moCreatedAvg

Severity: variable

Explanation: This fault is caused by "created connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186206: fltTcaOpflexIDEpDfwConn1qtrCreatedAvg

Severity: variable

Explanation: This fault is caused by "created connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186207: fltTcaOpflexIDEpDfwConn1yearCreatedAvg

Severity: variable

Explanation: This fault is caused by "created connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186232: fltTcaOpflexIDEpDfwConn5minCreatedTr

Severity: variable

Explanation: This fault is caused by "created connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186233: fltTcaOpflexIDEpDfwConn15minCreatedTr

Severity: variable

Explanation: This fault is caused by "created connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186234: fltTcaOpflexIDEpDfwConn1hCreatedTr

Severity: variable

Explanation: This fault is caused by "created connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186235: fltTcaOpflexIDEpDfwConn1dCreatedTr

Severity: variable

Explanation: This fault is caused by "created connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186236: fltTcaOpflexIDEpDfwConn1wCreatedTr

Severity: variable

Explanation: This fault is caused by "created connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186237: fltTcaOpflexIDEpDfwConn1moCreatedTr

Severity: variable

Explanation: This fault is caused by "created connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186238: fltTcaOpflexIDEpDfwConn1qtrCreatedTr

Severity: variable

Explanation: This fault is caused by "created connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186239: fltTcaOpflexIDEpDfwConn1yearCreatedTr

Severity: variable

Explanation: This fault is caused by "created connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186240: fltTcaOpflexIDEpDfwConn5minCreatedRate

Severity: variable

Explanation: This fault is caused by "created connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186241: fltTcaOpflexIDEpDfwConn15minCreatedRate

Severity: variable

Explanation: This fault is caused by "created connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186242: fltTcaOpflexIDEpDfwConn1hCreatedRate

Severity: variable

Explanation: This fault is caused by "created connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186243: fltTcaOpflexIDEpDfwConn1dCreatedRate

Severity: variable

Explanation: This fault is caused by "created connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186244: fltTcaOpflexIDEpDfwConn1wCreatedRate

Severity: variable

Explanation: This fault is caused by "created connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186245: fltTcaOpflexIDEpDfwConn1moCreatedRate

Severity: variable

Explanation: This fault is caused by "created connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186246: fltTcaOpflexIDEpDfwConn1qtrCreatedRate

Severity: variable

Explanation: This fault is caused by "created connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186247: fltTcaOpflexIDEpDfwConn1yearCreatedRate

Severity: variable

Explanation: This fault is caused by "created connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "created connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1863: fltPlannerRsFexLabelResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F186320: fltTcaOpflexIDEpDfwConn5minDeletedLast

Severity: variable

Explanation: This fault is caused by "destroyed connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186321: fltTcaOpflexIDEpDfwConn15minDeletedLast

Severity: variable

Explanation: This fault is caused by "destroyed connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186322: fltTcaOpflexIDEpDfwConn1hDeletedLast

Severity: variable

Explanation: This fault is caused by "destroyed connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186323: fltTcaOpflexIDEpDfwConn1dDeletedLast

Severity: variable

Explanation: This fault is caused by "destroyed connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186324: fltTcaOpflexIDEpDfwConn1wDeletedLast

Severity: variable

Explanation: This fault is caused by "destroyed connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186325: fltTcaOpflexIDEpDfwConn1moDeletedLast

Severity: variable

Explanation: This fault is caused by "destroyed connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186326: fltTcaOpflexIDEpDfwConn1qtrDeletedLast

Severity: variable

Explanation: This fault is caused by "destroyed connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186327: fltTcaOpflexIDEpDfwConn1yearDeletedLast

Severity: variable

Explanation: This fault is caused by "destroyed connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186336: fltTcaOpflexIDEpDfwConn5minDeletedCum

Severity: variable

Explanation: This fault is caused by "destroyed connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186337: fltTcaOpflexIDEpDfwConn15minDeletedCum

Severity: variable

Explanation: This fault is caused by "destroyed connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186338: fltTcaOpflexIDEpDfwConn1hDeletedCum

Severity: variable

Explanation: This fault is caused by "destroyed connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186339: fltTcaOpflexIDEpDfwConn1dDeletedCum

Severity: variable

Explanation: This fault is caused by "destroyed connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186340: fltTcaOpflexIDEpDfwConn1wDeletedCum

Severity: variable

Explanation: This fault is caused by "destroyed connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186341: fltTcaOpflexIDEpDfwConn1moDeletedCum

Severity: variable

Explanation: This fault is caused by "destroyed connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186342: fltTcaOpflexIDEpDfwConn1qtrDeletedCum

Severity: variable

Explanation: This fault is caused by "destroyed connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186343: fltTcaOpflexIDEpDfwConn1yearDeletedCum

Severity: variable

Explanation: This fault is caused by "destroyed connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186344: fltTcaOpflexIDEpDfwConn5minDeletedPer

Severity: variable

Explanation: This fault is caused by "destroyed connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186345: fltTcaOpflexIDEpDfwConn15minDeletedPer

Severity: variable

Explanation: This fault is caused by "destroyed connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186346: fltTcaOpflexIDEpDfwConn1hDeletedPer

Severity: variable

Explanation: This fault is caused by "destroyed connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186347: fltTcaOpflexIDEpDfwConn1dDeletedPer

Severity: variable

Explanation: This fault is caused by "destroyed connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186348: fltTcaOpflexIDEpDfwConn1wDeletedPer

Severity: variable

Explanation: This fault is caused by "destroyed connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186349: fltTcaOpflexIDEpDfwConn1moDeletedPer

Severity: variable

Explanation: This fault is caused by "destroyed connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186350: fltTcaOpflexIDEpDfwConn1qtrDeletedPer

Severity: variable

Explanation: This fault is caused by "destroyed connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186351: fltTcaOpflexIDEpDfwConn1yearDeletedPer

Severity: variable

Explanation: This fault is caused by "destroyed connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186352: fltTcaOpflexIDEpDfwConn5minDeletedMin

Severity: variable

Explanation: This fault is caused by "destroyed connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186353: fltTcaOpflexIDEpDfwConn15minDeletedMin

Severity: variable

Explanation: This fault is caused by "destroyed connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186354: fltTcaOpflexIDEpDfwConn1hDeletedMin

Severity: variable

Explanation: This fault is caused by "destroyed connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186355: fltTcaOpflexIDEpDfwConn1dDeletedMin

Severity: variable

Explanation: This fault is caused by "destroyed connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186356: fltTcaOpflexIDEpDfwConn1wDeletedMin

Severity: variable

Explanation: This fault is caused by "destroyed connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186357: fltTcaOpflexIDEpDfwConn1moDeletedMin

Severity: variable

Explanation: This fault is caused by "destroyed connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186358: fltTcaOpflexIDEpDfwConn1qtrDeletedMin

Severity: variable

Explanation: This fault is caused by "destroyed connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186359: fltTcaOpflexIDEpDfwConn1yearDeletedMin

Severity: variable

Explanation: This fault is caused by "destroyed connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186360: fltTcaOpflexIDEpDfwConn5minDeletedMax

Severity: variable

Explanation: This fault is caused by "destroyed connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186361: fltTcaOpflexIDEpDfwConn15minDeletedMax

Severity: variable

Explanation: This fault is caused by "destroyed connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186362: fltTcaOpflexIDEpDfwConn1hDeletedMax

Severity: variable

Explanation: This fault is caused by "destroyed connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186363: fltTcaOpflexIDEpDfwConn1dDeletedMax

Severity: variable

Explanation: This fault is caused by "destroyed connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186364: fltTcaOpflexIDEpDfwConn1wDeletedMax

Severity: variable

Explanation: This fault is caused by "destroyed connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186365: fltTcaOpflexIDEpDfwConn1moDeletedMax

Severity: variable

Explanation: This fault is caused by "destroyed connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186366: fltTcaOpflexIDEpDfwConn1qtrDeletedMax

Severity: variable

Explanation: This fault is caused by "destroyed connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186367: fltTcaOpflexIDEpDfwConn1yearDeletedMax

Severity: variable

Explanation: This fault is caused by "destroyed connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186368: fltTcaOpflexIDEpDfwConn5minDeletedAvg

Severity: variable

Explanation: This fault is caused by "destroyed connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186369: fltTcaOpflexIDEpDfwConn15minDeletedAvg

Severity: variable

Explanation: This fault is caused by "destroyed connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186370: fltTcaOpflexIDEpDfwConn1hDeletedAvg

Severity: variable

Explanation: This fault is caused by "destroyed connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186371: fltTcaOpflexIDEpDfwConn1dDeletedAvg

Severity: variable

Explanation: This fault is caused by "destroyed connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186372: fltTcaOpflexIDEpDfwConn1wDeletedAvg

Severity: variable

Explanation: This fault is caused by "destroyed connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186373: fltTcaOpflexIDEpDfwConn1moDeletedAvg

Severity: variable

Explanation: This fault is caused by "destroyed connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186374: fltTcaOpflexIDEpDfwConn1qtrDeletedAvg

Severity: variable

Explanation: This fault is caused by "destroyed connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186375: fltTcaOpflexIDEpDfwConn1yearDeletedAvg

Severity: variable

Explanation: This fault is caused by "destroyed connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186400: fltTcaOpflexIDEpDfwConn5minDeletedTr

Severity: variable

Explanation: This fault is caused by "destroyed connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186401: fltTcaOpflexIDEpDfwConn15minDeletedTr

Severity: variable

Explanation: This fault is caused by "destroyed connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186402: fltTcaOpflexIDEpDfwConn1hDeletedTr

Severity: variable

Explanation: This fault is caused by "destroyed connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186403: fltTcaOpflexIDEpDfwConn1dDeletedTr

Severity: variable

Explanation: This fault is caused by "destroyed connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186404: fltTcaOpflexIDEpDfwConn1wDeletedTr

Severity: variable

Explanation: This fault is caused by "destroyed connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186405: fltTcaOpflexIDEpDfwConn1moDeletedTr

Severity: variable

Explanation: This fault is caused by "destroyed connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186406: fltTcaOpflexIDEpDfwConn1qtrDeletedTr

Severity: variable

Explanation: This fault is caused by "destroyed connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186407: fltTcaOpflexIDEpDfwConn1yearDeletedTr

Severity: variable

Explanation: This fault is caused by "destroyed connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186408: fltTcaOpflexIDEpDfwConn5minDeletedRate

Severity: variable

Explanation: This fault is caused by "destroyed connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186409: fltTcaOpflexIDEpDfwConn15minDeletedRate

Severity: variable

Explanation: This fault is caused by "destroyed connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186410: fltTcaOpflexIDEpDfwConn1hDeletedRate

Severity: variable

Explanation: This fault is caused by "destroyed connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186411: fltTcaOpflexIDEpDfwConn1dDeletedRate

Severity: variable

Explanation: This fault is caused by "destroyed connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186412: fltTcaOpflexIDEpDfwConn1wDeletedRate

Severity: variable

Explanation: This fault is caused by "destroyed connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186413: fltTcaOpflexIDEpDfwConn1moDeletedRate

Severity: variable

Explanation: This fault is caused by "destroyed connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186414: fltTcaOpflexIDEpDfwConn1qtrDeletedRate

Severity: variable

Explanation: This fault is caused by "destroyed connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186415: fltTcaOpflexIDEpDfwConn1yearDeletedRate

Severity: variable

Explanation: This fault is caused by "destroyed connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "destroyed connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186488: fltTcaOpflexIDEpDfwConnDenied5minGlobalLimitLast

Severity: variable

Explanation: This fault is caused by "denied global limit connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186489: fltTcaOpflexIDEpDfwConnDenied15minGlobalLimitLast

Severity: variable

Explanation: This fault is caused by "denied global limit connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186490: fltTcaOpflexIDEpDfwConnDenied1hGlobalLimitLast

Severity: variable

Explanation: This fault is caused by "denied global limit connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186491: fltTcaOpflexIDEpDfwConnDenied1dGlobalLimitLast

Severity: variable

Explanation: This fault is caused by "denied global limit connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186492: fltTcaOpflexIDEpDfwConnDenied1wGlobalLimitLast

Severity: variable

Explanation: This fault is caused by "denied global limit connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186493: fltTcaOpflexIDEpDfwConnDenied1moGlobalLimitLast

Severity: variable

Explanation: This fault is caused by "denied global limit connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186494: fltTcaOpflexIDEpDfwConnDenied1qtrGlobalLimitLast

Severity: variable

Explanation: This fault is caused by "denied global limit connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186495: fltTcaOpflexIDEpDfwConnDenied1yearGlobalLimitLast

Severity: variable

Explanation: This fault is caused by "denied global limit connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1865: fltPlannerRsLeafLabelsResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F186504: fltTcaOpflexIDEpDfwConnDenied5minGlobalLimitCum

Severity: variable

Explanation: This fault is caused by "denied global limit connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186505: fltTcaOpflexIDEpDfwConnDenied15minGlobalLimitCum

Severity: variable

Explanation: This fault is caused by "denied global limit connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186506: fltTcaOpflexIDEpDfwConnDenied1hGlobalLimitCum

Severity: variable

Explanation: This fault is caused by "denied global limit connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186507: fltTcaOpflexIDEpDfwConnDenied1dGlobalLimitCum

Severity: variable

Explanation: This fault is caused by "denied global limit connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186508: fltTcaOpflexIDEpDfwConnDenied1wGlobalLimitCum

Severity: variable

Explanation: This fault is caused by "denied global limit connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186509: fltTcaOpflexIDEpDfwConnDenied1moGlobalLimitCum

Severity: variable

Explanation: This fault is caused by "denied global limit connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186510: fltTcaOpflexIDEpDfwConnDenied1qtrGlobalLimitCum

Severity: variable

Explanation: This fault is caused by "denied global limit connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186511: fltTcaOpflexIDEpDfwConnDenied1yearGlobalLimitCum

Severity: variable

Explanation: This fault is caused by "denied global limit connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186512: fltTcaOpflexIDEpDfwConnDenied5minGlobalLimitPer

Severity: variable

Explanation: This fault is caused by "denied global limit connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186513: fltTcaOpflexIDEpDfwConnDenied15minGlobalLimitPer

Severity: variable

Explanation: This fault is caused by "denied global limit connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186514: fltTcaOpflexIDEpDfwConnDenied1hGlobalLimitPer

Severity: variable

Explanation: This fault is caused by "denied global limit connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186515: fltTcaOpflexIDEpDfwConnDenied1dGlobalLimitPer

Severity: variable

Explanation: This fault is caused by "denied global limit connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186516: fltTcaOpflexIDEpDfwConnDenied1wGlobalLimitPer

Severity: variable

Explanation: This fault is caused by "denied global limit connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186517: fltTcaOpflexIDEpDfwConnDenied1moGlobalLimitPer

Severity: variable

Explanation: This fault is caused by "denied global limit connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186518: fltTcaOpflexIDEpDfwConnDenied1qtrGlobalLimitPer

Severity: variable

Explanation: This fault is caused by "denied global limit connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186519: fltTcaOpflexIDEpDfwConnDenied1yearGlobalLimitPer

Severity: variable

Explanation: This fault is caused by "denied global limit connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186520: fltTcaOpflexIDEpDfwConnDenied5minGlobalLimitMin

Severity: variable

Explanation: This fault is caused by "denied global limit connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186521: fltTcaOpflexIDEpDfwConnDenied15minGlobalLimitMin

Severity: variable

Explanation: This fault is caused by "denied global limit connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186522: fltTcaOpflexIDEpDfwConnDenied1hGlobalLimitMin

Severity: variable

Explanation: This fault is caused by "denied global limit connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186523: fltTcaOpflexIDEpDfwConnDenied1dGlobalLimitMin

Severity: variable

Explanation: This fault is caused by "denied global limit connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186524: fltTcaOpflexIDEpDfwConnDenied1wGlobalLimitMin

Severity: variable

Explanation: This fault is caused by "denied global limit connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186525: fltTcaOpflexIDEpDfwConnDenied1moGlobalLimitMin

Severity: variable

Explanation: This fault is caused by "denied global limit connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186526: fltTcaOpflexIDEpDfwConnDenied1qtrGlobalLimitMin

Severity: variable

Explanation: This fault is caused by "denied global limit connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186527: fltTcaOpflexIDEpDfwConnDenied1yearGlobalLimitMin

Severity: variable

Explanation: This fault is caused by "denied global limit connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186528: fltTcaOpflexIDEpDfwConnDenied5minGlobalLimitMax

Severity: variable

Explanation: This fault is caused by "denied global limit connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186529: fltTcaOpflexIDEpDfwConnDenied15minGlobalLimitMax

Severity: variable

Explanation: This fault is caused by "denied global limit connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186530: fltTcaOpflexIDEpDfwConnDenied1hGlobalLimitMax

Severity: variable

Explanation: This fault is caused by "denied global limit connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186531: fltTcaOpflexIDEpDfwConnDenied1dGlobalLimitMax

Severity: variable

Explanation: This fault is caused by "denied global limit connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186532: fltTcaOpflexIDEpDfwConnDenied1wGlobalLimitMax

Severity: variable

Explanation: This fault is caused by "denied global limit connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186533: fltTcaOpflexIDEpDfwConnDenied1moGlobalLimitMax

Severity: variable

Explanation: This fault is caused by "denied global limit connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186534: fltTcaOpflexIDEpDfwConnDenied1qtrGlobalLimitMax

Severity: variable

Explanation: This fault is caused by "denied global limit connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186535: fltTcaOpflexIDEpDfwConnDenied1yearGlobalLimitMax

Severity: variable

Explanation: This fault is caused by "denied global limit connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186536: fltTcaOpflexIDEpDfwConnDenied5minGlobalLimitAvg

Severity: variable

Explanation: This fault is caused by "denied global limit connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186537: fltTcaOpflexIDEpDfwConnDenied15minGlobalLimitAvg

Severity: variable

Explanation: This fault is caused by "denied global limit connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186538: fltTcaOpflexIDEpDfwConnDenied1hGlobalLimitAvg

Severity: variable

Explanation: This fault is caused by "denied global limit connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186539: fltTcaOpflexIDEpDfwConnDenied1dGlobalLimitAvg

Severity: variable

Explanation: This fault is caused by "denied global limit connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186540: fltTcaOpflexIDEpDfwConnDenied1wGlobalLimitAvg

Severity: variable

Explanation: This fault is caused by "denied global limit connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186541: fltTcaOpflexIDEpDfwConnDenied1moGlobalLimitAvg

Severity: variable

Explanation: This fault is caused by "denied global limit connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186542: fltTcaOpflexIDEpDfwConnDenied1qtrGlobalLimitAvg

Severity: variable

Explanation: This fault is caused by "denied global limit connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186543: fltTcaOpflexIDEpDfwConnDenied1yearGlobalLimitAvg

Severity: variable

Explanation: This fault is caused by "denied global limit connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186568: fltTcaOpflexIDEpDfwConnDenied5minGlobalLimitTr

Severity: variable

Explanation: This fault is caused by "denied global limit connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186569: fltTcaOpflexIDEpDfwConnDenied15minGlobalLimitTr

Severity: variable

Explanation: This fault is caused by "denied global limit connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186570: fltTcaOpflexIDEpDfwConnDenied1hGlobalLimitTr

Severity: variable

Explanation: This fault is caused by "denied global limit connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186571: fltTcaOpflexIDEpDfwConnDenied1dGlobalLimitTr

Severity: variable

Explanation: This fault is caused by "denied global limit connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186572: fltTcaOpflexIDEpDfwConnDenied1wGlobalLimitTr

Severity: variable

Explanation: This fault is caused by "denied global limit connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186573: fltTcaOpflexIDEpDfwConnDenied1moGlobalLimitTr

Severity: variable

Explanation: This fault is caused by "denied global limit connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186574: fltTcaOpflexIDEpDfwConnDenied1qtrGlobalLimitTr

Severity: variable

Explanation: This fault is caused by "denied global limit connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186575: fltTcaOpflexIDEpDfwConnDenied1yearGlobalLimitTr

Severity: variable

Explanation: This fault is caused by "denied global limit connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186576: fltTcaOpflexIDEpDfwConnDenied5minGlobalLimitRate

Severity: variable

Explanation: This fault is caused by "denied global limit connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186577: fltTcaOpflexIDEpDfwConnDenied15minGlobalLimitRate

Severity: variable

Explanation: This fault is caused by "denied global limit connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186578: fltTcaOpflexIDEpDfwConnDenied1hGlobalLimitRate

Severity: variable

Explanation: This fault is caused by "denied global limit connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186579: fltTcaOpflexIDEpDfwConnDenied1dGlobalLimitRate

Severity: variable

Explanation: This fault is caused by "denied global limit connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186580: fltTcaOpflexIDEpDfwConnDenied1wGlobalLimitRate

Severity: variable

Explanation: This fault is caused by "denied global limit connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186581: fltTcaOpflexIDEpDfwConnDenied1moGlobalLimitRate

Severity: variable

Explanation: This fault is caused by "denied global limit connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186582: fltTcaOpflexIDEpDfwConnDenied1qtrGlobalLimitRate

Severity: variable

Explanation: This fault is caused by "denied global limit connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186583: fltTcaOpflexIDEpDfwConnDenied1yearGlobalLimitRate

Severity: variable

Explanation: This fault is caused by "denied global limit connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "denied global limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186656: fltTcaOpflexIDEpDfwConnDenied5minPerPortLimitLast

Severity: variable

Explanation: This fault is caused by "denied per port limit connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186657: fltTcaOpflexIDEpDfwConnDenied15minPerPortLimitLast

Severity: variable

Explanation: This fault is caused by "denied per port limit connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186658: fltTcaOpflexIDEpDfwConnDenied1hPerPortLimitLast

Severity: variable

Explanation: This fault is caused by "denied per port limit connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186659: fltTcaOpflexIDEpDfwConnDenied1dPerPortLimitLast

Severity: variable

Explanation: This fault is caused by "denied per port limit connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186660: fltTcaOpflexIDEpDfwConnDenied1wPerPortLimitLast

Severity: variable

Explanation: This fault is caused by "denied per port limit connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186661: fltTcaOpflexIDEpDfwConnDenied1moPerPortLimitLast

Severity: variable

Explanation: This fault is caused by "denied per port limit connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186662: fltTcaOpflexIDEpDfwConnDenied1qtrPerPortLimitLast

Severity: variable

Explanation: This fault is caused by "denied per port limit connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186663: fltTcaOpflexIDEpDfwConnDenied1yearPerPortLimitLast

Severity: variable

Explanation: This fault is caused by "denied per port limit connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186672: fltTcaOpflexIDEpDfwConnDenied5minPerPortLimitCum

Severity: variable

Explanation: This fault is caused by "denied per port limit connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186673: fltTcaOpflexIDEpDfwConnDenied15minPerPortLimitCum

Severity: variable

Explanation: This fault is caused by "denied per port limit connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186674: fltTcaOpflexIDEpDfwConnDenied1hPerPortLimitCum

Severity: variable

Explanation: This fault is caused by "denied per port limit connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186675: fltTcaOpflexIDEpDfwConnDenied1dPerPortLimitCum

Severity: variable

Explanation: This fault is caused by "denied per port limit connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186676: fltTcaOpflexIDEpDfwConnDenied1wPerPortLimitCum

Severity: variable

Explanation: This fault is caused by "denied per port limit connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186677: fltTcaOpflexIDEpDfwConnDenied1moPerPortLimitCum

Severity: variable

Explanation: This fault is caused by "denied per port limit connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186678: fltTcaOpflexIDEpDfwConnDenied1qtrPerPortLimitCum

Severity: variable

Explanation: This fault is caused by "denied per port limit connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186679: fltTcaOpflexIDEpDfwConnDenied1yearPerPortLimitCum

Severity: variable

Explanation: This fault is caused by "denied per port limit connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186680: fltTcaOpflexIDEpDfwConnDenied5minPerPortLimitPer

Severity: variable

Explanation: This fault is caused by "denied per port limit connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186681: fltTcaOpflexIDEpDfwConnDenied15minPerPortLimitPer

Severity: variable

Explanation: This fault is caused by "denied per port limit connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186682: fltTcaOpflexIDEpDfwConnDenied1hPerPortLimitPer

Severity: variable

Explanation: This fault is caused by "denied per port limit connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186683: fltTcaOpflexIDEpDfwConnDenied1dPerPortLimitPer

Severity: variable

Explanation: This fault is caused by "denied per port limit connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186684: fltTcaOpflexIDEpDfwConnDenied1wPerPortLimitPer

Severity: variable

Explanation: This fault is caused by "denied per port limit connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186685: fltTcaOpflexIDEpDfwConnDenied1moPerPortLimitPer

Severity: variable

Explanation: This fault is caused by "denied per port limit connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186686: fltTcaOpflexIDEpDfwConnDenied1qtrPerPortLimitPer

Severity: variable

Explanation: This fault is caused by "denied per port limit connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186687: fltTcaOpflexIDEpDfwConnDenied1yearPerPortLimitPer

Severity: variable

Explanation: This fault is caused by "denied per port limit connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186688: fltTcaOpflexIDEpDfwConnDenied5minPerPortLimitMin

Severity: variable

Explanation: This fault is caused by "denied per port limit connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186689: fltTcaOpflexIDEpDfwConnDenied15minPerPortLimitMin

Severity: variable

Explanation: This fault is caused by "denied per port limit connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186690: fltTcaOpflexIDEpDfwConnDenied1hPerPortLimitMin

Severity: variable

Explanation: This fault is caused by "denied per port limit connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186691: fltTcaOpflexIDEpDfwConnDenied1dPerPortLimitMin

Severity: variable

Explanation: This fault is caused by "denied per port limit connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186692: fltTcaOpflexIDEpDfwConnDenied1wPerPortLimitMin

Severity: variable

Explanation: This fault is caused by "denied per port limit connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186693: fltTcaOpflexIDEpDfwConnDenied1moPerPortLimitMin

Severity: variable

Explanation: This fault is caused by "denied per port limit connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186694: fltTcaOpflexIDEpDfwConnDenied1qtrPerPortLimitMin

Severity: variable

Explanation: This fault is caused by "denied per port limit connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186695: fltTcaOpflexIDEpDfwConnDenied1yearPerPortLimitMin

Severity: variable

Explanation: This fault is caused by "denied per port limit connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186696: fltTcaOpflexIDEpDfwConnDenied5minPerPortLimitMax

Severity: variable

Explanation: This fault is caused by "denied per port limit connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186697: fltTcaOpflexIDEpDfwConnDenied15minPerPortLimitMax

Severity: variable

Explanation: This fault is caused by "denied per port limit connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186698: fltTcaOpflexIDEpDfwConnDenied1hPerPortLimitMax

Severity: variable

Explanation: This fault is caused by "denied per port limit connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186699: fltTcaOpflexIDEpDfwConnDenied1dPerPortLimitMax

Severity: variable

Explanation: This fault is caused by "denied per port limit connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1867: fltInfraFabricRecoveryFabricRecoveryInProgress

Severity: major

Explanation: This fault occurs when a fabric is in recovery mode

Recommended Action: If you see this fault, take the following actions:

1. Wait until fabric is full recovered (all appliances and switched are in-service

2. Disable the fabricRecovery mode

F186700: fltTcaOpflexIDEpDfwConnDenied1wPerPortLimitMax

Severity: variable

Explanation: This fault is caused by "denied per port limit connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186701: fltTcaOpflexIDEpDfwConnDenied1moPerPortLimitMax

Severity: variable

Explanation: This fault is caused by "denied per port limit connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186702: fltTcaOpflexIDEpDfwConnDenied1qtrPerPortLimitMax

Severity: variable

Explanation: This fault is caused by "denied per port limit connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186703: fltTcaOpflexIDEpDfwConnDenied1yearPerPortLimitMax

Severity: variable

Explanation: This fault is caused by "denied per port limit connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186704: fltTcaOpflexIDEpDfwConnDenied5minPerPortLimitAvg

Severity: variable

Explanation: This fault is caused by "denied per port limit connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186705: fltTcaOpflexIDEpDfwConnDenied15minPerPortLimitAvg

Severity: variable

Explanation: This fault is caused by "denied per port limit connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186706: fltTcaOpflexIDEpDfwConnDenied1hPerPortLimitAvg

Severity: variable

Explanation: This fault is caused by "denied per port limit connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186707: fltTcaOpflexIDEpDfwConnDenied1dPerPortLimitAvg

Severity: variable

Explanation: This fault is caused by "denied per port limit connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186708: fltTcaOpflexIDEpDfwConnDenied1wPerPortLimitAvg

Severity: variable

Explanation: This fault is caused by "denied per port limit connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186709: fltTcaOpflexIDEpDfwConnDenied1moPerPortLimitAvg

Severity: variable

Explanation: This fault is caused by "denied per port limit connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186710: fltTcaOpflexIDEpDfwConnDenied1qtrPerPortLimitAvg

Severity: variable

Explanation: This fault is caused by "denied per port limit connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186711: fltTcaOpflexIDEpDfwConnDenied1yearPerPortLimitAvg

Severity: variable

Explanation: This fault is caused by "denied per port limit connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186736: fltTcaOpflexIDEpDfwConnDenied5minPerPortLimitTr

Severity: variable

Explanation: This fault is caused by "denied per port limit connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186737: fltTcaOpflexIDEpDfwConnDenied15minPerPortLimitTr

Severity: variable

Explanation: This fault is caused by "denied per port limit connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186738: fltTcaOpflexIDEpDfwConnDenied1hPerPortLimitTr

Severity: variable

Explanation: This fault is caused by "denied per port limit connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186739: fltTcaOpflexIDEpDfwConnDenied1dPerPortLimitTr

Severity: variable

Explanation: This fault is caused by "denied per port limit connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186740: fltTcaOpflexIDEpDfwConnDenied1wPerPortLimitTr

Severity: variable

Explanation: This fault is caused by "denied per port limit connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186741: fltTcaOpflexIDEpDfwConnDenied1moPerPortLimitTr

Severity: variable

Explanation: This fault is caused by "denied per port limit connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186742: fltTcaOpflexIDEpDfwConnDenied1qtrPerPortLimitTr

Severity: variable

Explanation: This fault is caused by "denied per port limit connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186743: fltTcaOpflexIDEpDfwConnDenied1yearPerPortLimitTr

Severity: variable

Explanation: This fault is caused by "denied per port limit connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186744: fltTcaOpflexIDEpDfwConnDenied5minPerPortLimitRate

Severity: variable

Explanation: This fault is caused by "denied per port limit connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186745: fltTcaOpflexIDEpDfwConnDenied15minPerPortLimitRate

Severity: variable

Explanation: This fault is caused by "denied per port limit connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186746: fltTcaOpflexIDEpDfwConnDenied1hPerPortLimitRate

Severity: variable

Explanation: This fault is caused by "denied per port limit connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186747: fltTcaOpflexIDEpDfwConnDenied1dPerPortLimitRate

Severity: variable

Explanation: This fault is caused by "denied per port limit connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186748: fltTcaOpflexIDEpDfwConnDenied1wPerPortLimitRate

Severity: variable

Explanation: This fault is caused by "denied per port limit connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186749: fltTcaOpflexIDEpDfwConnDenied1moPerPortLimitRate

Severity: variable

Explanation: This fault is caused by "denied per port limit connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186750: fltTcaOpflexIDEpDfwConnDenied1qtrPerPortLimitRate

Severity: variable

Explanation: This fault is caused by "denied per port limit connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186751: fltTcaOpflexIDEpDfwConnDenied1yearPerPortLimitRate

Severity: variable

Explanation: This fault is caused by "denied per port limit connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "denied per port limit connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186824: fltTcaOpflexIDEpDfwPktDrop5minInvalidConnLast

Severity: variable

Explanation: This fault is caused by "invalid connection packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186825: fltTcaOpflexIDEpDfwPktDrop15minInvalidConnLast

Severity: variable

Explanation: This fault is caused by "invalid connection packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186826: fltTcaOpflexIDEpDfwPktDrop1hInvalidConnLast

Severity: variable

Explanation: This fault is caused by "invalid connection packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186827: fltTcaOpflexIDEpDfwPktDrop1dInvalidConnLast

Severity: variable

Explanation: This fault is caused by "invalid connection packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186828: fltTcaOpflexIDEpDfwPktDrop1wInvalidConnLast

Severity: variable

Explanation: This fault is caused by "invalid connection packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186829: fltTcaOpflexIDEpDfwPktDrop1moInvalidConnLast

Severity: variable

Explanation: This fault is caused by "invalid connection packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186830: fltTcaOpflexIDEpDfwPktDrop1qtrInvalidConnLast

Severity: variable

Explanation: This fault is caused by "invalid connection packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186831: fltTcaOpflexIDEpDfwPktDrop1yearInvalidConnLast

Severity: variable

Explanation: This fault is caused by "invalid connection packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186840: fltTcaOpflexIDEpDfwPktDrop5minInvalidConnCum

Severity: variable

Explanation: This fault is caused by "invalid connection packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186841: fltTcaOpflexIDEpDfwPktDrop15minInvalidConnCum

Severity: variable

Explanation: This fault is caused by "invalid connection packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186842: fltTcaOpflexIDEpDfwPktDrop1hInvalidConnCum

Severity: variable

Explanation: This fault is caused by "invalid connection packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186843: fltTcaOpflexIDEpDfwPktDrop1dInvalidConnCum

Severity: variable

Explanation: This fault is caused by "invalid connection packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186844: fltTcaOpflexIDEpDfwPktDrop1wInvalidConnCum

Severity: variable

Explanation: This fault is caused by "invalid connection packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186845: fltTcaOpflexIDEpDfwPktDrop1moInvalidConnCum

Severity: variable

Explanation: This fault is caused by "invalid connection packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186846: fltTcaOpflexIDEpDfwPktDrop1qtrInvalidConnCum

Severity: variable

Explanation: This fault is caused by "invalid connection packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186847: fltTcaOpflexIDEpDfwPktDrop1yearInvalidConnCum

Severity: variable

Explanation: This fault is caused by "invalid connection packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186848: fltTcaOpflexIDEpDfwPktDrop5minInvalidConnPer

Severity: variable

Explanation: This fault is caused by "invalid connection packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186849: fltTcaOpflexIDEpDfwPktDrop15minInvalidConnPer

Severity: variable

Explanation: This fault is caused by "invalid connection packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186850: fltTcaOpflexIDEpDfwPktDrop1hInvalidConnPer

Severity: variable

Explanation: This fault is caused by "invalid connection packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186851: fltTcaOpflexIDEpDfwPktDrop1dInvalidConnPer

Severity: variable

Explanation: This fault is caused by "invalid connection packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186852: fltTcaOpflexIDEpDfwPktDrop1wInvalidConnPer

Severity: variable

Explanation: This fault is caused by "invalid connection packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186853: fltTcaOpflexIDEpDfwPktDrop1moInvalidConnPer

Severity: variable

Explanation: This fault is caused by "invalid connection packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186854: fltTcaOpflexIDEpDfwPktDrop1qtrInvalidConnPer

Severity: variable

Explanation: This fault is caused by "invalid connection packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186855: fltTcaOpflexIDEpDfwPktDrop1yearInvalidConnPer

Severity: variable

Explanation: This fault is caused by "invalid connection packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186856: fltTcaOpflexIDEpDfwPktDrop5minInvalidConnMin

Severity: variable

Explanation: This fault is caused by "invalid connection packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186857: fltTcaOpflexIDEpDfwPktDrop15minInvalidConnMin

Severity: variable

Explanation: This fault is caused by "invalid connection packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186858: fltTcaOpflexIDEpDfwPktDrop1hInvalidConnMin

Severity: variable

Explanation: This fault is caused by "invalid connection packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186859: fltTcaOpflexIDEpDfwPktDrop1dInvalidConnMin

Severity: variable

Explanation: This fault is caused by "invalid connection packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186860: fltTcaOpflexIDEpDfwPktDrop1wInvalidConnMin

Severity: variable

Explanation: This fault is caused by "invalid connection packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186861: fltTcaOpflexIDEpDfwPktDrop1moInvalidConnMin

Severity: variable

Explanation: This fault is caused by "invalid connection packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186862: fltTcaOpflexIDEpDfwPktDrop1qtrInvalidConnMin

Severity: variable

Explanation: This fault is caused by "invalid connection packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186863: fltTcaOpflexIDEpDfwPktDrop1yearInvalidConnMin

Severity: variable

Explanation: This fault is caused by "invalid connection packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186864: fltTcaOpflexIDEpDfwPktDrop5minInvalidConnMax

Severity: variable

Explanation: This fault is caused by "invalid connection packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186865: fltTcaOpflexIDEpDfwPktDrop15minInvalidConnMax

Severity: variable

Explanation: This fault is caused by "invalid connection packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186866: fltTcaOpflexIDEpDfwPktDrop1hInvalidConnMax

Severity: variable

Explanation: This fault is caused by "invalid connection packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186867: fltTcaOpflexIDEpDfwPktDrop1dInvalidConnMax

Severity: variable

Explanation: This fault is caused by "invalid connection packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186868: fltTcaOpflexIDEpDfwPktDrop1wInvalidConnMax

Severity: variable

Explanation: This fault is caused by "invalid connection packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186869: fltTcaOpflexIDEpDfwPktDrop1moInvalidConnMax

Severity: variable

Explanation: This fault is caused by "invalid connection packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186870: fltTcaOpflexIDEpDfwPktDrop1qtrInvalidConnMax

Severity: variable

Explanation: This fault is caused by "invalid connection packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186871: fltTcaOpflexIDEpDfwPktDrop1yearInvalidConnMax

Severity: variable

Explanation: This fault is caused by "invalid connection packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186872: fltTcaOpflexIDEpDfwPktDrop5minInvalidConnAvg

Severity: variable

Explanation: This fault is caused by "invalid connection packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186873: fltTcaOpflexIDEpDfwPktDrop15minInvalidConnAvg

Severity: variable

Explanation: This fault is caused by "invalid connection packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186874: fltTcaOpflexIDEpDfwPktDrop1hInvalidConnAvg

Severity: variable

Explanation: This fault is caused by "invalid connection packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186875: fltTcaOpflexIDEpDfwPktDrop1dInvalidConnAvg

Severity: variable

Explanation: This fault is caused by "invalid connection packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186876: fltTcaOpflexIDEpDfwPktDrop1wInvalidConnAvg

Severity: variable

Explanation: This fault is caused by "invalid connection packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186877: fltTcaOpflexIDEpDfwPktDrop1moInvalidConnAvg

Severity: variable

Explanation: This fault is caused by "invalid connection packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186878: fltTcaOpflexIDEpDfwPktDrop1qtrInvalidConnAvg

Severity: variable

Explanation: This fault is caused by "invalid connection packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186879: fltTcaOpflexIDEpDfwPktDrop1yearInvalidConnAvg

Severity: variable

Explanation: This fault is caused by "invalid connection packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1869: fltPolScopedCountLimitExceeded

Severity: warning

Explanation: This fault occurs when the number of policies of this type exceed the supported fabric-wide limit.

Recommended Action: If you see this fault, take the following actions:

1. Modify your configuration so that the total number of these policies are under the supported limit.

F186904: fltTcaOpflexIDEpDfwPktDrop5minInvalidConnTr

Severity: variable

Explanation: This fault is caused by "invalid connection packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186905: fltTcaOpflexIDEpDfwPktDrop15minInvalidConnTr

Severity: variable

Explanation: This fault is caused by "invalid connection packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186906: fltTcaOpflexIDEpDfwPktDrop1hInvalidConnTr

Severity: variable

Explanation: This fault is caused by "invalid connection packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186907: fltTcaOpflexIDEpDfwPktDrop1dInvalidConnTr

Severity: variable

Explanation: This fault is caused by "invalid connection packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186908: fltTcaOpflexIDEpDfwPktDrop1wInvalidConnTr

Severity: variable

Explanation: This fault is caused by "invalid connection packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186909: fltTcaOpflexIDEpDfwPktDrop1moInvalidConnTr

Severity: variable

Explanation: This fault is caused by "invalid connection packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186910: fltTcaOpflexIDEpDfwPktDrop1qtrInvalidConnTr

Severity: variable

Explanation: This fault is caused by "invalid connection packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186911: fltTcaOpflexIDEpDfwPktDrop1yearInvalidConnTr

Severity: variable

Explanation: This fault is caused by "invalid connection packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186912: fltTcaOpflexIDEpDfwPktDrop5minInvalidConnRate

Severity: variable

Explanation: This fault is caused by "invalid connection packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186913: fltTcaOpflexIDEpDfwPktDrop15minInvalidConnRate

Severity: variable

Explanation: This fault is caused by "invalid connection packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186914: fltTcaOpflexIDEpDfwPktDrop1hInvalidConnRate

Severity: variable

Explanation: This fault is caused by "invalid connection packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186915: fltTcaOpflexIDEpDfwPktDrop1dInvalidConnRate

Severity: variable

Explanation: This fault is caused by "invalid connection packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186916: fltTcaOpflexIDEpDfwPktDrop1wInvalidConnRate

Severity: variable

Explanation: This fault is caused by "invalid connection packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186917: fltTcaOpflexIDEpDfwPktDrop1moInvalidConnRate

Severity: variable

Explanation: This fault is caused by "invalid connection packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186918: fltTcaOpflexIDEpDfwPktDrop1qtrInvalidConnRate

Severity: variable

Explanation: This fault is caused by "invalid connection packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186919: fltTcaOpflexIDEpDfwPktDrop1yearInvalidConnRate

Severity: variable

Explanation: This fault is caused by "invalid connection packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid connection packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186992: fltTcaOpflexIDEpDfwPktDrop5minInvalidFtpSynLast

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186993: fltTcaOpflexIDEpDfwPktDrop15minInvalidFtpSynLast

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186994: fltTcaOpflexIDEpDfwPktDrop1hInvalidFtpSynLast

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186995: fltTcaOpflexIDEpDfwPktDrop1dInvalidFtpSynLast

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186996: fltTcaOpflexIDEpDfwPktDrop1wInvalidFtpSynLast

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186997: fltTcaOpflexIDEpDfwPktDrop1moInvalidFtpSynLast

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186998: fltTcaOpflexIDEpDfwPktDrop1qtrInvalidFtpSynLast

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F186999: fltTcaOpflexIDEpDfwPktDrop1yearInvalidFtpSynLast

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187008: fltTcaOpflexIDEpDfwPktDrop5minInvalidFtpSynCum

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187009: fltTcaOpflexIDEpDfwPktDrop15minInvalidFtpSynCum

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187010: fltTcaOpflexIDEpDfwPktDrop1hInvalidFtpSynCum

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187011: fltTcaOpflexIDEpDfwPktDrop1dInvalidFtpSynCum

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187012: fltTcaOpflexIDEpDfwPktDrop1wInvalidFtpSynCum

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187013: fltTcaOpflexIDEpDfwPktDrop1moInvalidFtpSynCum

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187014: fltTcaOpflexIDEpDfwPktDrop1qtrInvalidFtpSynCum

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187015: fltTcaOpflexIDEpDfwPktDrop1yearInvalidFtpSynCum

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187016: fltTcaOpflexIDEpDfwPktDrop5minInvalidFtpSynPer

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187017: fltTcaOpflexIDEpDfwPktDrop15minInvalidFtpSynPer

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187018: fltTcaOpflexIDEpDfwPktDrop1hInvalidFtpSynPer

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187019: fltTcaOpflexIDEpDfwPktDrop1dInvalidFtpSynPer

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187020: fltTcaOpflexIDEpDfwPktDrop1wInvalidFtpSynPer

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187021: fltTcaOpflexIDEpDfwPktDrop1moInvalidFtpSynPer

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187022: fltTcaOpflexIDEpDfwPktDrop1qtrInvalidFtpSynPer

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187023: fltTcaOpflexIDEpDfwPktDrop1yearInvalidFtpSynPer

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187024: fltTcaOpflexIDEpDfwPktDrop5minInvalidFtpSynMin

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187025: fltTcaOpflexIDEpDfwPktDrop15minInvalidFtpSynMin

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187026: fltTcaOpflexIDEpDfwPktDrop1hInvalidFtpSynMin

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187027: fltTcaOpflexIDEpDfwPktDrop1dInvalidFtpSynMin

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187028: fltTcaOpflexIDEpDfwPktDrop1wInvalidFtpSynMin

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187029: fltTcaOpflexIDEpDfwPktDrop1moInvalidFtpSynMin

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187030: fltTcaOpflexIDEpDfwPktDrop1qtrInvalidFtpSynMin

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187031: fltTcaOpflexIDEpDfwPktDrop1yearInvalidFtpSynMin

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187032: fltTcaOpflexIDEpDfwPktDrop5minInvalidFtpSynMax

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187033: fltTcaOpflexIDEpDfwPktDrop15minInvalidFtpSynMax

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187034: fltTcaOpflexIDEpDfwPktDrop1hInvalidFtpSynMax

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187035: fltTcaOpflexIDEpDfwPktDrop1dInvalidFtpSynMax

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187036: fltTcaOpflexIDEpDfwPktDrop1wInvalidFtpSynMax

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187037: fltTcaOpflexIDEpDfwPktDrop1moInvalidFtpSynMax

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187038: fltTcaOpflexIDEpDfwPktDrop1qtrInvalidFtpSynMax

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187039: fltTcaOpflexIDEpDfwPktDrop1yearInvalidFtpSynMax

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187040: fltTcaOpflexIDEpDfwPktDrop5minInvalidFtpSynAvg

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187041: fltTcaOpflexIDEpDfwPktDrop15minInvalidFtpSynAvg

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187042: fltTcaOpflexIDEpDfwPktDrop1hInvalidFtpSynAvg

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187043: fltTcaOpflexIDEpDfwPktDrop1dInvalidFtpSynAvg

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187044: fltTcaOpflexIDEpDfwPktDrop1wInvalidFtpSynAvg

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187045: fltTcaOpflexIDEpDfwPktDrop1moInvalidFtpSynAvg

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187046: fltTcaOpflexIDEpDfwPktDrop1qtrInvalidFtpSynAvg

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187047: fltTcaOpflexIDEpDfwPktDrop1yearInvalidFtpSynAvg

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187072: fltTcaOpflexIDEpDfwPktDrop5minInvalidFtpSynTr

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187073: fltTcaOpflexIDEpDfwPktDrop15minInvalidFtpSynTr

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187074: fltTcaOpflexIDEpDfwPktDrop1hInvalidFtpSynTr

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187075: fltTcaOpflexIDEpDfwPktDrop1dInvalidFtpSynTr

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187076: fltTcaOpflexIDEpDfwPktDrop1wInvalidFtpSynTr

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187077: fltTcaOpflexIDEpDfwPktDrop1moInvalidFtpSynTr

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187078: fltTcaOpflexIDEpDfwPktDrop1qtrInvalidFtpSynTr

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187079: fltTcaOpflexIDEpDfwPktDrop1yearInvalidFtpSynTr

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187080: fltTcaOpflexIDEpDfwPktDrop5minInvalidFtpSynRate

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187081: fltTcaOpflexIDEpDfwPktDrop15minInvalidFtpSynRate

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187082: fltTcaOpflexIDEpDfwPktDrop1hInvalidFtpSynRate

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187083: fltTcaOpflexIDEpDfwPktDrop1dInvalidFtpSynRate

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187084: fltTcaOpflexIDEpDfwPktDrop1wInvalidFtpSynRate

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187085: fltTcaOpflexIDEpDfwPktDrop1moInvalidFtpSynRate

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187086: fltTcaOpflexIDEpDfwPktDrop1qtrInvalidFtpSynRate

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187087: fltTcaOpflexIDEpDfwPktDrop1yearInvalidFtpSynRate

Severity: variable

Explanation: This fault is caused by "invalid ftp SYN packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid ftp SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187160: fltTcaOpflexIDEpDfwPktDrop5minInvalidSynAckLast

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187161: fltTcaOpflexIDEpDfwPktDrop15minInvalidSynAckLast

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187162: fltTcaOpflexIDEpDfwPktDrop1hInvalidSynAckLast

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187163: fltTcaOpflexIDEpDfwPktDrop1dInvalidSynAckLast

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187164: fltTcaOpflexIDEpDfwPktDrop1wInvalidSynAckLast

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187165: fltTcaOpflexIDEpDfwPktDrop1moInvalidSynAckLast

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187166: fltTcaOpflexIDEpDfwPktDrop1qtrInvalidSynAckLast

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187167: fltTcaOpflexIDEpDfwPktDrop1yearInvalidSynAckLast

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187176: fltTcaOpflexIDEpDfwPktDrop5minInvalidSynAckCum

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187177: fltTcaOpflexIDEpDfwPktDrop15minInvalidSynAckCum

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187178: fltTcaOpflexIDEpDfwPktDrop1hInvalidSynAckCum

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187179: fltTcaOpflexIDEpDfwPktDrop1dInvalidSynAckCum

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187180: fltTcaOpflexIDEpDfwPktDrop1wInvalidSynAckCum

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187181: fltTcaOpflexIDEpDfwPktDrop1moInvalidSynAckCum

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187182: fltTcaOpflexIDEpDfwPktDrop1qtrInvalidSynAckCum

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187183: fltTcaOpflexIDEpDfwPktDrop1yearInvalidSynAckCum

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187184: fltTcaOpflexIDEpDfwPktDrop5minInvalidSynAckPer

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187185: fltTcaOpflexIDEpDfwPktDrop15minInvalidSynAckPer

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187186: fltTcaOpflexIDEpDfwPktDrop1hInvalidSynAckPer

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187187: fltTcaOpflexIDEpDfwPktDrop1dInvalidSynAckPer

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187188: fltTcaOpflexIDEpDfwPktDrop1wInvalidSynAckPer

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187189: fltTcaOpflexIDEpDfwPktDrop1moInvalidSynAckPer

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187190: fltTcaOpflexIDEpDfwPktDrop1qtrInvalidSynAckPer

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187191: fltTcaOpflexIDEpDfwPktDrop1yearInvalidSynAckPer

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187192: fltTcaOpflexIDEpDfwPktDrop5minInvalidSynAckMin

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187193: fltTcaOpflexIDEpDfwPktDrop15minInvalidSynAckMin

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187194: fltTcaOpflexIDEpDfwPktDrop1hInvalidSynAckMin

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187195: fltTcaOpflexIDEpDfwPktDrop1dInvalidSynAckMin

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187196: fltTcaOpflexIDEpDfwPktDrop1wInvalidSynAckMin

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187197: fltTcaOpflexIDEpDfwPktDrop1moInvalidSynAckMin

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187198: fltTcaOpflexIDEpDfwPktDrop1qtrInvalidSynAckMin

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187199: fltTcaOpflexIDEpDfwPktDrop1yearInvalidSynAckMin

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187200: fltTcaOpflexIDEpDfwPktDrop5minInvalidSynAckMax

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187201: fltTcaOpflexIDEpDfwPktDrop15minInvalidSynAckMax

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187202: fltTcaOpflexIDEpDfwPktDrop1hInvalidSynAckMax

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187203: fltTcaOpflexIDEpDfwPktDrop1dInvalidSynAckMax

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187204: fltTcaOpflexIDEpDfwPktDrop1wInvalidSynAckMax

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187205: fltTcaOpflexIDEpDfwPktDrop1moInvalidSynAckMax

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187206: fltTcaOpflexIDEpDfwPktDrop1qtrInvalidSynAckMax

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187207: fltTcaOpflexIDEpDfwPktDrop1yearInvalidSynAckMax

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187208: fltTcaOpflexIDEpDfwPktDrop5minInvalidSynAckAvg

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187209: fltTcaOpflexIDEpDfwPktDrop15minInvalidSynAckAvg

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187210: fltTcaOpflexIDEpDfwPktDrop1hInvalidSynAckAvg

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187211: fltTcaOpflexIDEpDfwPktDrop1dInvalidSynAckAvg

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187212: fltTcaOpflexIDEpDfwPktDrop1wInvalidSynAckAvg

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187213: fltTcaOpflexIDEpDfwPktDrop1moInvalidSynAckAvg

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187214: fltTcaOpflexIDEpDfwPktDrop1qtrInvalidSynAckAvg

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187215: fltTcaOpflexIDEpDfwPktDrop1yearInvalidSynAckAvg

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187240: fltTcaOpflexIDEpDfwPktDrop5minInvalidSynAckTr

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187241: fltTcaOpflexIDEpDfwPktDrop15minInvalidSynAckTr

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187242: fltTcaOpflexIDEpDfwPktDrop1hInvalidSynAckTr

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187243: fltTcaOpflexIDEpDfwPktDrop1dInvalidSynAckTr

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187244: fltTcaOpflexIDEpDfwPktDrop1wInvalidSynAckTr

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187245: fltTcaOpflexIDEpDfwPktDrop1moInvalidSynAckTr

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187246: fltTcaOpflexIDEpDfwPktDrop1qtrInvalidSynAckTr

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187247: fltTcaOpflexIDEpDfwPktDrop1yearInvalidSynAckTr

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187248: fltTcaOpflexIDEpDfwPktDrop5minInvalidSynAckRate

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187249: fltTcaOpflexIDEpDfwPktDrop15minInvalidSynAckRate

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187250: fltTcaOpflexIDEpDfwPktDrop1hInvalidSynAckRate

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187251: fltTcaOpflexIDEpDfwPktDrop1dInvalidSynAckRate

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187252: fltTcaOpflexIDEpDfwPktDrop1wInvalidSynAckRate

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187253: fltTcaOpflexIDEpDfwPktDrop1moInvalidSynAckRate

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187254: fltTcaOpflexIDEpDfwPktDrop1qtrInvalidSynAckRate

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187255: fltTcaOpflexIDEpDfwPktDrop1yearInvalidSynAckRate

Severity: variable

Explanation: This fault is caused by "invalid SYN ACK packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN ACK packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187328: fltTcaOpflexIDEpDfwPktDrop5minInvalidSynLast

Severity: variable

Explanation: This fault is caused by "invalid SYN packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187329: fltTcaOpflexIDEpDfwPktDrop15minInvalidSynLast

Severity: variable

Explanation: This fault is caused by "invalid SYN packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187330: fltTcaOpflexIDEpDfwPktDrop1hInvalidSynLast

Severity: variable

Explanation: This fault is caused by "invalid SYN packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187331: fltTcaOpflexIDEpDfwPktDrop1dInvalidSynLast

Severity: variable

Explanation: This fault is caused by "invalid SYN packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187332: fltTcaOpflexIDEpDfwPktDrop1wInvalidSynLast

Severity: variable

Explanation: This fault is caused by "invalid SYN packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187333: fltTcaOpflexIDEpDfwPktDrop1moInvalidSynLast

Severity: variable

Explanation: This fault is caused by "invalid SYN packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187334: fltTcaOpflexIDEpDfwPktDrop1qtrInvalidSynLast

Severity: variable

Explanation: This fault is caused by "invalid SYN packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187335: fltTcaOpflexIDEpDfwPktDrop1yearInvalidSynLast

Severity: variable

Explanation: This fault is caused by "invalid SYN packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187344: fltTcaOpflexIDEpDfwPktDrop5minInvalidSynCum

Severity: variable

Explanation: This fault is caused by "invalid SYN packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187345: fltTcaOpflexIDEpDfwPktDrop15minInvalidSynCum

Severity: variable

Explanation: This fault is caused by "invalid SYN packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187346: fltTcaOpflexIDEpDfwPktDrop1hInvalidSynCum

Severity: variable

Explanation: This fault is caused by "invalid SYN packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187347: fltTcaOpflexIDEpDfwPktDrop1dInvalidSynCum

Severity: variable

Explanation: This fault is caused by "invalid SYN packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187348: fltTcaOpflexIDEpDfwPktDrop1wInvalidSynCum

Severity: variable

Explanation: This fault is caused by "invalid SYN packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187349: fltTcaOpflexIDEpDfwPktDrop1moInvalidSynCum

Severity: variable

Explanation: This fault is caused by "invalid SYN packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187350: fltTcaOpflexIDEpDfwPktDrop1qtrInvalidSynCum

Severity: variable

Explanation: This fault is caused by "invalid SYN packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187351: fltTcaOpflexIDEpDfwPktDrop1yearInvalidSynCum

Severity: variable

Explanation: This fault is caused by "invalid SYN packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187352: fltTcaOpflexIDEpDfwPktDrop5minInvalidSynPer

Severity: variable

Explanation: This fault is caused by "invalid SYN packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187353: fltTcaOpflexIDEpDfwPktDrop15minInvalidSynPer

Severity: variable

Explanation: This fault is caused by "invalid SYN packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187354: fltTcaOpflexIDEpDfwPktDrop1hInvalidSynPer

Severity: variable

Explanation: This fault is caused by "invalid SYN packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187355: fltTcaOpflexIDEpDfwPktDrop1dInvalidSynPer

Severity: variable

Explanation: This fault is caused by "invalid SYN packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187356: fltTcaOpflexIDEpDfwPktDrop1wInvalidSynPer

Severity: variable

Explanation: This fault is caused by "invalid SYN packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187357: fltTcaOpflexIDEpDfwPktDrop1moInvalidSynPer

Severity: variable

Explanation: This fault is caused by "invalid SYN packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187358: fltTcaOpflexIDEpDfwPktDrop1qtrInvalidSynPer

Severity: variable

Explanation: This fault is caused by "invalid SYN packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187359: fltTcaOpflexIDEpDfwPktDrop1yearInvalidSynPer

Severity: variable

Explanation: This fault is caused by "invalid SYN packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187360: fltTcaOpflexIDEpDfwPktDrop5minInvalidSynMin

Severity: variable

Explanation: This fault is caused by "invalid SYN packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187361: fltTcaOpflexIDEpDfwPktDrop15minInvalidSynMin

Severity: variable

Explanation: This fault is caused by "invalid SYN packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187362: fltTcaOpflexIDEpDfwPktDrop1hInvalidSynMin

Severity: variable

Explanation: This fault is caused by "invalid SYN packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187363: fltTcaOpflexIDEpDfwPktDrop1dInvalidSynMin

Severity: variable

Explanation: This fault is caused by "invalid SYN packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187364: fltTcaOpflexIDEpDfwPktDrop1wInvalidSynMin

Severity: variable

Explanation: This fault is caused by "invalid SYN packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187365: fltTcaOpflexIDEpDfwPktDrop1moInvalidSynMin

Severity: variable

Explanation: This fault is caused by "invalid SYN packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187366: fltTcaOpflexIDEpDfwPktDrop1qtrInvalidSynMin

Severity: variable

Explanation: This fault is caused by "invalid SYN packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187367: fltTcaOpflexIDEpDfwPktDrop1yearInvalidSynMin

Severity: variable

Explanation: This fault is caused by "invalid SYN packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187368: fltTcaOpflexIDEpDfwPktDrop5minInvalidSynMax

Severity: variable

Explanation: This fault is caused by "invalid SYN packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187369: fltTcaOpflexIDEpDfwPktDrop15minInvalidSynMax

Severity: variable

Explanation: This fault is caused by "invalid SYN packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187370: fltTcaOpflexIDEpDfwPktDrop1hInvalidSynMax

Severity: variable

Explanation: This fault is caused by "invalid SYN packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187371: fltTcaOpflexIDEpDfwPktDrop1dInvalidSynMax

Severity: variable

Explanation: This fault is caused by "invalid SYN packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187372: fltTcaOpflexIDEpDfwPktDrop1wInvalidSynMax

Severity: variable

Explanation: This fault is caused by "invalid SYN packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187373: fltTcaOpflexIDEpDfwPktDrop1moInvalidSynMax

Severity: variable

Explanation: This fault is caused by "invalid SYN packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187374: fltTcaOpflexIDEpDfwPktDrop1qtrInvalidSynMax

Severity: variable

Explanation: This fault is caused by "invalid SYN packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187375: fltTcaOpflexIDEpDfwPktDrop1yearInvalidSynMax

Severity: variable

Explanation: This fault is caused by "invalid SYN packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187376: fltTcaOpflexIDEpDfwPktDrop5minInvalidSynAvg

Severity: variable

Explanation: This fault is caused by "invalid SYN packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187377: fltTcaOpflexIDEpDfwPktDrop15minInvalidSynAvg

Severity: variable

Explanation: This fault is caused by "invalid SYN packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187378: fltTcaOpflexIDEpDfwPktDrop1hInvalidSynAvg

Severity: variable

Explanation: This fault is caused by "invalid SYN packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187379: fltTcaOpflexIDEpDfwPktDrop1dInvalidSynAvg

Severity: variable

Explanation: This fault is caused by "invalid SYN packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187380: fltTcaOpflexIDEpDfwPktDrop1wInvalidSynAvg

Severity: variable

Explanation: This fault is caused by "invalid SYN packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187381: fltTcaOpflexIDEpDfwPktDrop1moInvalidSynAvg

Severity: variable

Explanation: This fault is caused by "invalid SYN packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187382: fltTcaOpflexIDEpDfwPktDrop1qtrInvalidSynAvg

Severity: variable

Explanation: This fault is caused by "invalid SYN packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187383: fltTcaOpflexIDEpDfwPktDrop1yearInvalidSynAvg

Severity: variable

Explanation: This fault is caused by "invalid SYN packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187408: fltTcaOpflexIDEpDfwPktDrop5minInvalidSynTr

Severity: variable

Explanation: This fault is caused by "invalid SYN packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187409: fltTcaOpflexIDEpDfwPktDrop15minInvalidSynTr

Severity: variable

Explanation: This fault is caused by "invalid SYN packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187410: fltTcaOpflexIDEpDfwPktDrop1hInvalidSynTr

Severity: variable

Explanation: This fault is caused by "invalid SYN packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187411: fltTcaOpflexIDEpDfwPktDrop1dInvalidSynTr

Severity: variable

Explanation: This fault is caused by "invalid SYN packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187412: fltTcaOpflexIDEpDfwPktDrop1wInvalidSynTr

Severity: variable

Explanation: This fault is caused by "invalid SYN packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187413: fltTcaOpflexIDEpDfwPktDrop1moInvalidSynTr

Severity: variable

Explanation: This fault is caused by "invalid SYN packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187414: fltTcaOpflexIDEpDfwPktDrop1qtrInvalidSynTr

Severity: variable

Explanation: This fault is caused by "invalid SYN packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187415: fltTcaOpflexIDEpDfwPktDrop1yearInvalidSynTr

Severity: variable

Explanation: This fault is caused by "invalid SYN packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187416: fltTcaOpflexIDEpDfwPktDrop5minInvalidSynRate

Severity: variable

Explanation: This fault is caused by "invalid SYN packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187417: fltTcaOpflexIDEpDfwPktDrop15minInvalidSynRate

Severity: variable

Explanation: This fault is caused by "invalid SYN packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187418: fltTcaOpflexIDEpDfwPktDrop1hInvalidSynRate

Severity: variable

Explanation: This fault is caused by "invalid SYN packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187419: fltTcaOpflexIDEpDfwPktDrop1dInvalidSynRate

Severity: variable

Explanation: This fault is caused by "invalid SYN packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187420: fltTcaOpflexIDEpDfwPktDrop1wInvalidSynRate

Severity: variable

Explanation: This fault is caused by "invalid SYN packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187421: fltTcaOpflexIDEpDfwPktDrop1moInvalidSynRate

Severity: variable

Explanation: This fault is caused by "invalid SYN packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187422: fltTcaOpflexIDEpDfwPktDrop1qtrInvalidSynRate

Severity: variable

Explanation: This fault is caused by "invalid SYN packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F187423: fltTcaOpflexIDEpDfwPktDrop1yearInvalidSynRate

Severity: variable

Explanation: This fault is caused by "invalid SYN packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "invalid SYN packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188528: fltTcaCommWebConn5minAcceptedLast

Severity: variable

Explanation: This fault is caused by "total accepted connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188529: fltTcaCommWebConn15minAcceptedLast

Severity: variable

Explanation: This fault is caused by "total accepted connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188530: fltTcaCommWebConn1hAcceptedLast

Severity: variable

Explanation: This fault is caused by "total accepted connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188531: fltTcaCommWebConn1dAcceptedLast

Severity: variable

Explanation: This fault is caused by "total accepted connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188532: fltTcaCommWebConn1wAcceptedLast

Severity: variable

Explanation: This fault is caused by "total accepted connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188533: fltTcaCommWebConn1moAcceptedLast

Severity: variable

Explanation: This fault is caused by "total accepted connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188534: fltTcaCommWebConn1qtrAcceptedLast

Severity: variable

Explanation: This fault is caused by "total accepted connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188535: fltTcaCommWebConn1yearAcceptedLast

Severity: variable

Explanation: This fault is caused by "total accepted connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188544: fltTcaCommWebConn5minAcceptedCum

Severity: variable

Explanation: This fault is caused by "total accepted connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188545: fltTcaCommWebConn15minAcceptedCum

Severity: variable

Explanation: This fault is caused by "total accepted connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188546: fltTcaCommWebConn1hAcceptedCum

Severity: variable

Explanation: This fault is caused by "total accepted connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188547: fltTcaCommWebConn1dAcceptedCum

Severity: variable

Explanation: This fault is caused by "total accepted connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188548: fltTcaCommWebConn1wAcceptedCum

Severity: variable

Explanation: This fault is caused by "total accepted connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188549: fltTcaCommWebConn1moAcceptedCum

Severity: variable

Explanation: This fault is caused by "total accepted connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188550: fltTcaCommWebConn1qtrAcceptedCum

Severity: variable

Explanation: This fault is caused by "total accepted connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188551: fltTcaCommWebConn1yearAcceptedCum

Severity: variable

Explanation: This fault is caused by "total accepted connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188552: fltTcaCommWebConn5minAcceptedPer

Severity: variable

Explanation: This fault is caused by "total accepted connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188553: fltTcaCommWebConn15minAcceptedPer

Severity: variable

Explanation: This fault is caused by "total accepted connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188554: fltTcaCommWebConn1hAcceptedPer

Severity: variable

Explanation: This fault is caused by "total accepted connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188555: fltTcaCommWebConn1dAcceptedPer

Severity: variable

Explanation: This fault is caused by "total accepted connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188556: fltTcaCommWebConn1wAcceptedPer

Severity: variable

Explanation: This fault is caused by "total accepted connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188557: fltTcaCommWebConn1moAcceptedPer

Severity: variable

Explanation: This fault is caused by "total accepted connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188558: fltTcaCommWebConn1qtrAcceptedPer

Severity: variable

Explanation: This fault is caused by "total accepted connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188559: fltTcaCommWebConn1yearAcceptedPer

Severity: variable

Explanation: This fault is caused by "total accepted connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188560: fltTcaCommWebConn5minAcceptedMin

Severity: variable

Explanation: This fault is caused by "total accepted connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188561: fltTcaCommWebConn15minAcceptedMin

Severity: variable

Explanation: This fault is caused by "total accepted connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188562: fltTcaCommWebConn1hAcceptedMin

Severity: variable

Explanation: This fault is caused by "total accepted connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188563: fltTcaCommWebConn1dAcceptedMin

Severity: variable

Explanation: This fault is caused by "total accepted connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188564: fltTcaCommWebConn1wAcceptedMin

Severity: variable

Explanation: This fault is caused by "total accepted connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188565: fltTcaCommWebConn1moAcceptedMin

Severity: variable

Explanation: This fault is caused by "total accepted connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188566: fltTcaCommWebConn1qtrAcceptedMin

Severity: variable

Explanation: This fault is caused by "total accepted connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188567: fltTcaCommWebConn1yearAcceptedMin

Severity: variable

Explanation: This fault is caused by "total accepted connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188568: fltTcaCommWebConn5minAcceptedMax

Severity: variable

Explanation: This fault is caused by "total accepted connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188569: fltTcaCommWebConn15minAcceptedMax

Severity: variable

Explanation: This fault is caused by "total accepted connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188570: fltTcaCommWebConn1hAcceptedMax

Severity: variable

Explanation: This fault is caused by "total accepted connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188571: fltTcaCommWebConn1dAcceptedMax

Severity: variable

Explanation: This fault is caused by "total accepted connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188572: fltTcaCommWebConn1wAcceptedMax

Severity: variable

Explanation: This fault is caused by "total accepted connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188573: fltTcaCommWebConn1moAcceptedMax

Severity: variable

Explanation: This fault is caused by "total accepted connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188574: fltTcaCommWebConn1qtrAcceptedMax

Severity: variable

Explanation: This fault is caused by "total accepted connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188575: fltTcaCommWebConn1yearAcceptedMax

Severity: variable

Explanation: This fault is caused by "total accepted connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188576: fltTcaCommWebConn5minAcceptedAvg

Severity: variable

Explanation: This fault is caused by "total accepted connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188577: fltTcaCommWebConn15minAcceptedAvg

Severity: variable

Explanation: This fault is caused by "total accepted connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188578: fltTcaCommWebConn1hAcceptedAvg

Severity: variable

Explanation: This fault is caused by "total accepted connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188579: fltTcaCommWebConn1dAcceptedAvg

Severity: variable

Explanation: This fault is caused by "total accepted connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188580: fltTcaCommWebConn1wAcceptedAvg

Severity: variable

Explanation: This fault is caused by "total accepted connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188581: fltTcaCommWebConn1moAcceptedAvg

Severity: variable

Explanation: This fault is caused by "total accepted connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188582: fltTcaCommWebConn1qtrAcceptedAvg

Severity: variable

Explanation: This fault is caused by "total accepted connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188583: fltTcaCommWebConn1yearAcceptedAvg

Severity: variable

Explanation: This fault is caused by "total accepted connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188608: fltTcaCommWebConn5minAcceptedTr

Severity: variable

Explanation: This fault is caused by "total accepted connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188609: fltTcaCommWebConn15minAcceptedTr

Severity: variable

Explanation: This fault is caused by "total accepted connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188610: fltTcaCommWebConn1hAcceptedTr

Severity: variable

Explanation: This fault is caused by "total accepted connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188611: fltTcaCommWebConn1dAcceptedTr

Severity: variable

Explanation: This fault is caused by "total accepted connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188612: fltTcaCommWebConn1wAcceptedTr

Severity: variable

Explanation: This fault is caused by "total accepted connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188613: fltTcaCommWebConn1moAcceptedTr

Severity: variable

Explanation: This fault is caused by "total accepted connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188614: fltTcaCommWebConn1qtrAcceptedTr

Severity: variable

Explanation: This fault is caused by "total accepted connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188615: fltTcaCommWebConn1yearAcceptedTr

Severity: variable

Explanation: This fault is caused by "total accepted connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188616: fltTcaCommWebConn5minAcceptedRate

Severity: variable

Explanation: This fault is caused by "total accepted connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188617: fltTcaCommWebConn15minAcceptedRate

Severity: variable

Explanation: This fault is caused by "total accepted connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188618: fltTcaCommWebConn1hAcceptedRate

Severity: variable

Explanation: This fault is caused by "total accepted connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188619: fltTcaCommWebConn1dAcceptedRate

Severity: variable

Explanation: This fault is caused by "total accepted connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188620: fltTcaCommWebConn1wAcceptedRate

Severity: variable

Explanation: This fault is caused by "total accepted connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188621: fltTcaCommWebConn1moAcceptedRate

Severity: variable

Explanation: This fault is caused by "total accepted connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188622: fltTcaCommWebConn1qtrAcceptedRate

Severity: variable

Explanation: This fault is caused by "total accepted connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188623: fltTcaCommWebConn1yearAcceptedRate

Severity: variable

Explanation: This fault is caused by "total accepted connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1887: fltPlannerRsConnectedSpineResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1888: fltStpIfNativevlanMissing

Severity: critical

Explanation: This fault occurs when the native vlan is not configured on the interface but it is receiving MST (802.1s) BPDUs. It could lead to layer2 topology with a loop.

Recommended Action: To recover from this fault, try the following actions:

1. Configure native vlan on the interface

2. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F188864: fltTcaCommWebConnAg5minAcceptedCum

Severity: variable

Explanation: This fault is caused by "total accepted connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188865: fltTcaCommWebConnAg15minAcceptedCum

Severity: variable

Explanation: This fault is caused by "total accepted connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188866: fltTcaCommWebConnAg1hAcceptedCum

Severity: variable

Explanation: This fault is caused by "total accepted connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188867: fltTcaCommWebConnAg1dAcceptedCum

Severity: variable

Explanation: This fault is caused by "total accepted connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188868: fltTcaCommWebConnAg1wAcceptedCum

Severity: variable

Explanation: This fault is caused by "total accepted connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188869: fltTcaCommWebConnAg1moAcceptedCum

Severity: variable

Explanation: This fault is caused by "total accepted connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188870: fltTcaCommWebConnAg1qtrAcceptedCum

Severity: variable

Explanation: This fault is caused by "total accepted connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188871: fltTcaCommWebConnAg1yearAcceptedCum

Severity: variable

Explanation: This fault is caused by "total accepted connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188872: fltTcaCommWebConnAg5minAcceptedPer

Severity: variable

Explanation: This fault is caused by "total accepted connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188873: fltTcaCommWebConnAg15minAcceptedPer

Severity: variable

Explanation: This fault is caused by "total accepted connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188874: fltTcaCommWebConnAg1hAcceptedPer

Severity: variable

Explanation: This fault is caused by "total accepted connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188875: fltTcaCommWebConnAg1dAcceptedPer

Severity: variable

Explanation: This fault is caused by "total accepted connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188876: fltTcaCommWebConnAg1wAcceptedPer

Severity: variable

Explanation: This fault is caused by "total accepted connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188877: fltTcaCommWebConnAg1moAcceptedPer

Severity: variable

Explanation: This fault is caused by "total accepted connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188878: fltTcaCommWebConnAg1qtrAcceptedPer

Severity: variable

Explanation: This fault is caused by "total accepted connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188879: fltTcaCommWebConnAg1yearAcceptedPer

Severity: variable

Explanation: This fault is caused by "total accepted connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1889: fltConfigJobPropertyDecryptionFailed

Severity: minor

Explanation: This fault occurs when configuration import fails to decrypt secure fields.

Recommended Action: If you see this fault, take the following actions:

1. Set the value manually for every secure field mentioned in the job object.

2. Make sure your security key is configured properly.

F188904: fltTcaCommWebConnAg5minAcceptedTr

Severity: variable

Explanation: This fault is caused by "total accepted connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188905: fltTcaCommWebConnAg15minAcceptedTr

Severity: variable

Explanation: This fault is caused by "total accepted connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188906: fltTcaCommWebConnAg1hAcceptedTr

Severity: variable

Explanation: This fault is caused by "total accepted connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188907: fltTcaCommWebConnAg1dAcceptedTr

Severity: variable

Explanation: This fault is caused by "total accepted connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188908: fltTcaCommWebConnAg1wAcceptedTr

Severity: variable

Explanation: This fault is caused by "total accepted connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188909: fltTcaCommWebConnAg1moAcceptedTr

Severity: variable

Explanation: This fault is caused by "total accepted connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188910: fltTcaCommWebConnAg1qtrAcceptedTr

Severity: variable

Explanation: This fault is caused by "total accepted connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188911: fltTcaCommWebConnAg1yearAcceptedTr

Severity: variable

Explanation: This fault is caused by "total accepted connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188912: fltTcaCommWebConnAg5minAcceptedRate

Severity: variable

Explanation: This fault is caused by "total accepted connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188913: fltTcaCommWebConnAg15minAcceptedRate

Severity: variable

Explanation: This fault is caused by "total accepted connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188914: fltTcaCommWebConnAg1hAcceptedRate

Severity: variable

Explanation: This fault is caused by "total accepted connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188915: fltTcaCommWebConnAg1dAcceptedRate

Severity: variable

Explanation: This fault is caused by "total accepted connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188916: fltTcaCommWebConnAg1wAcceptedRate

Severity: variable

Explanation: This fault is caused by "total accepted connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188917: fltTcaCommWebConnAg1moAcceptedRate

Severity: variable

Explanation: This fault is caused by "total accepted connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188918: fltTcaCommWebConnAg1qtrAcceptedRate

Severity: variable

Explanation: This fault is caused by "total accepted connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188919: fltTcaCommWebConnAg1yearAcceptedRate

Severity: variable

Explanation: This fault is caused by "total accepted connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total accepted connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188968: fltTcaCommWebConn5minActiveLast

Severity: variable

Explanation: This fault is caused by "current active connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current active connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188969: fltTcaCommWebConn15minActiveLast

Severity: variable

Explanation: This fault is caused by "current active connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current active connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188970: fltTcaCommWebConn1hActiveLast

Severity: variable

Explanation: This fault is caused by "current active connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current active connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188971: fltTcaCommWebConn1dActiveLast

Severity: variable

Explanation: This fault is caused by "current active connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current active connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188972: fltTcaCommWebConn1wActiveLast

Severity: variable

Explanation: This fault is caused by "current active connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current active connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188973: fltTcaCommWebConn1moActiveLast

Severity: variable

Explanation: This fault is caused by "current active connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current active connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188974: fltTcaCommWebConn1qtrActiveLast

Severity: variable

Explanation: This fault is caused by "current active connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current active connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188975: fltTcaCommWebConn1yearActiveLast

Severity: variable

Explanation: This fault is caused by "current active connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current active connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188976: fltTcaCommWebConn5minActiveMin

Severity: variable

Explanation: This fault is caused by "current active connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current active connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188977: fltTcaCommWebConn15minActiveMin

Severity: variable

Explanation: This fault is caused by "current active connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current active connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188978: fltTcaCommWebConn1hActiveMin

Severity: variable

Explanation: This fault is caused by "current active connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current active connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188979: fltTcaCommWebConn1dActiveMin

Severity: variable

Explanation: This fault is caused by "current active connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current active connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188980: fltTcaCommWebConn1wActiveMin

Severity: variable

Explanation: This fault is caused by "current active connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current active connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188981: fltTcaCommWebConn1moActiveMin

Severity: variable

Explanation: This fault is caused by "current active connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current active connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188982: fltTcaCommWebConn1qtrActiveMin

Severity: variable

Explanation: This fault is caused by "current active connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current active connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188983: fltTcaCommWebConn1yearActiveMin

Severity: variable

Explanation: This fault is caused by "current active connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current active connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188984: fltTcaCommWebConn5minActiveMax

Severity: variable

Explanation: This fault is caused by "current active connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current active connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188985: fltTcaCommWebConn15minActiveMax

Severity: variable

Explanation: This fault is caused by "current active connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current active connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188986: fltTcaCommWebConn1hActiveMax

Severity: variable

Explanation: This fault is caused by "current active connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current active connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188987: fltTcaCommWebConn1dActiveMax

Severity: variable

Explanation: This fault is caused by "current active connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current active connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188988: fltTcaCommWebConn1wActiveMax

Severity: variable

Explanation: This fault is caused by "current active connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current active connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188989: fltTcaCommWebConn1moActiveMax

Severity: variable

Explanation: This fault is caused by "current active connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current active connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188990: fltTcaCommWebConn1qtrActiveMax

Severity: variable

Explanation: This fault is caused by "current active connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current active connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188991: fltTcaCommWebConn1yearActiveMax

Severity: variable

Explanation: This fault is caused by "current active connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current active connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188992: fltTcaCommWebConn5minActiveAvg

Severity: variable

Explanation: This fault is caused by "current active connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current active connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188993: fltTcaCommWebConn15minActiveAvg

Severity: variable

Explanation: This fault is caused by "current active connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current active connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188994: fltTcaCommWebConn1hActiveAvg

Severity: variable

Explanation: This fault is caused by "current active connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current active connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188995: fltTcaCommWebConn1dActiveAvg

Severity: variable

Explanation: This fault is caused by "current active connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current active connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188996: fltTcaCommWebConn1wActiveAvg

Severity: variable

Explanation: This fault is caused by "current active connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current active connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188997: fltTcaCommWebConn1moActiveAvg

Severity: variable

Explanation: This fault is caused by "current active connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current active connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188998: fltTcaCommWebConn1qtrActiveAvg

Severity: variable

Explanation: This fault is caused by "current active connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current active connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F188999: fltTcaCommWebConn1yearActiveAvg

Severity: variable

Explanation: This fault is caused by "current active connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current active connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1890: fltEqptCardPowerStDeny

Severity: major

Explanation: This fault typically occurs when the switch detects insufficient power for a card to power up and puts card in power denied state

Recommended Action: To recover from this fault, try the following actions:

1. Verify power redundancy modes

2. Increase the number of power supplies provisioned

3. If the above actions did not resolve the issue, create a show tech-support file and contact Cisco TAC

F189032: fltTcaCommWebConn5minActiveTr

Severity: variable

Explanation: This fault is caused by "current active connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current active connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189033: fltTcaCommWebConn15minActiveTr

Severity: variable

Explanation: This fault is caused by "current active connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current active connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189034: fltTcaCommWebConn1hActiveTr

Severity: variable

Explanation: This fault is caused by "current active connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current active connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189035: fltTcaCommWebConn1dActiveTr

Severity: variable

Explanation: This fault is caused by "current active connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current active connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189036: fltTcaCommWebConn1wActiveTr

Severity: variable

Explanation: This fault is caused by "current active connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current active connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189037: fltTcaCommWebConn1moActiveTr

Severity: variable

Explanation: This fault is caused by "current active connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current active connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189038: fltTcaCommWebConn1qtrActiveTr

Severity: variable

Explanation: This fault is caused by "current active connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current active connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189039: fltTcaCommWebConn1yearActiveTr

Severity: variable

Explanation: This fault is caused by "current active connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current active connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1891: fltNwsRsNwsSyslogSrcToDestGroupResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F189208: fltTcaCommWebConn5minHandledLast

Severity: variable

Explanation: This fault is caused by "total handled connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189209: fltTcaCommWebConn15minHandledLast

Severity: variable

Explanation: This fault is caused by "total handled connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189210: fltTcaCommWebConn1hHandledLast

Severity: variable

Explanation: This fault is caused by "total handled connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189211: fltTcaCommWebConn1dHandledLast

Severity: variable

Explanation: This fault is caused by "total handled connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189212: fltTcaCommWebConn1wHandledLast

Severity: variable

Explanation: This fault is caused by "total handled connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189213: fltTcaCommWebConn1moHandledLast

Severity: variable

Explanation: This fault is caused by "total handled connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189214: fltTcaCommWebConn1qtrHandledLast

Severity: variable

Explanation: This fault is caused by "total handled connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189215: fltTcaCommWebConn1yearHandledLast

Severity: variable

Explanation: This fault is caused by "total handled connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189224: fltTcaCommWebConn5minHandledCum

Severity: variable

Explanation: This fault is caused by "total handled connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189225: fltTcaCommWebConn15minHandledCum

Severity: variable

Explanation: This fault is caused by "total handled connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189226: fltTcaCommWebConn1hHandledCum

Severity: variable

Explanation: This fault is caused by "total handled connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189227: fltTcaCommWebConn1dHandledCum

Severity: variable

Explanation: This fault is caused by "total handled connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189228: fltTcaCommWebConn1wHandledCum

Severity: variable

Explanation: This fault is caused by "total handled connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189229: fltTcaCommWebConn1moHandledCum

Severity: variable

Explanation: This fault is caused by "total handled connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189230: fltTcaCommWebConn1qtrHandledCum

Severity: variable

Explanation: This fault is caused by "total handled connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189231: fltTcaCommWebConn1yearHandledCum

Severity: variable

Explanation: This fault is caused by "total handled connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189232: fltTcaCommWebConn5minHandledPer

Severity: variable

Explanation: This fault is caused by "total handled connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189233: fltTcaCommWebConn15minHandledPer

Severity: variable

Explanation: This fault is caused by "total handled connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189234: fltTcaCommWebConn1hHandledPer

Severity: variable

Explanation: This fault is caused by "total handled connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189235: fltTcaCommWebConn1dHandledPer

Severity: variable

Explanation: This fault is caused by "total handled connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189236: fltTcaCommWebConn1wHandledPer

Severity: variable

Explanation: This fault is caused by "total handled connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189237: fltTcaCommWebConn1moHandledPer

Severity: variable

Explanation: This fault is caused by "total handled connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189238: fltTcaCommWebConn1qtrHandledPer

Severity: variable

Explanation: This fault is caused by "total handled connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189239: fltTcaCommWebConn1yearHandledPer

Severity: variable

Explanation: This fault is caused by "total handled connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189240: fltTcaCommWebConn5minHandledMin

Severity: variable

Explanation: This fault is caused by "total handled connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189241: fltTcaCommWebConn15minHandledMin

Severity: variable

Explanation: This fault is caused by "total handled connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189242: fltTcaCommWebConn1hHandledMin

Severity: variable

Explanation: This fault is caused by "total handled connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189243: fltTcaCommWebConn1dHandledMin

Severity: variable

Explanation: This fault is caused by "total handled connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189244: fltTcaCommWebConn1wHandledMin

Severity: variable

Explanation: This fault is caused by "total handled connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189245: fltTcaCommWebConn1moHandledMin

Severity: variable

Explanation: This fault is caused by "total handled connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189246: fltTcaCommWebConn1qtrHandledMin

Severity: variable

Explanation: This fault is caused by "total handled connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189247: fltTcaCommWebConn1yearHandledMin

Severity: variable

Explanation: This fault is caused by "total handled connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189248: fltTcaCommWebConn5minHandledMax

Severity: variable

Explanation: This fault is caused by "total handled connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189249: fltTcaCommWebConn15minHandledMax

Severity: variable

Explanation: This fault is caused by "total handled connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189250: fltTcaCommWebConn1hHandledMax

Severity: variable

Explanation: This fault is caused by "total handled connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189251: fltTcaCommWebConn1dHandledMax

Severity: variable

Explanation: This fault is caused by "total handled connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189252: fltTcaCommWebConn1wHandledMax

Severity: variable

Explanation: This fault is caused by "total handled connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189253: fltTcaCommWebConn1moHandledMax

Severity: variable

Explanation: This fault is caused by "total handled connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189254: fltTcaCommWebConn1qtrHandledMax

Severity: variable

Explanation: This fault is caused by "total handled connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189255: fltTcaCommWebConn1yearHandledMax

Severity: variable

Explanation: This fault is caused by "total handled connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189256: fltTcaCommWebConn5minHandledAvg

Severity: variable

Explanation: This fault is caused by "total handled connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189257: fltTcaCommWebConn15minHandledAvg

Severity: variable

Explanation: This fault is caused by "total handled connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189258: fltTcaCommWebConn1hHandledAvg

Severity: variable

Explanation: This fault is caused by "total handled connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189259: fltTcaCommWebConn1dHandledAvg

Severity: variable

Explanation: This fault is caused by "total handled connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189260: fltTcaCommWebConn1wHandledAvg

Severity: variable

Explanation: This fault is caused by "total handled connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189261: fltTcaCommWebConn1moHandledAvg

Severity: variable

Explanation: This fault is caused by "total handled connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189262: fltTcaCommWebConn1qtrHandledAvg

Severity: variable

Explanation: This fault is caused by "total handled connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189263: fltTcaCommWebConn1yearHandledAvg

Severity: variable

Explanation: This fault is caused by "total handled connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189288: fltTcaCommWebConn5minHandledTr

Severity: variable

Explanation: This fault is caused by "total handled connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189289: fltTcaCommWebConn15minHandledTr

Severity: variable

Explanation: This fault is caused by "total handled connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189290: fltTcaCommWebConn1hHandledTr

Severity: variable

Explanation: This fault is caused by "total handled connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189291: fltTcaCommWebConn1dHandledTr

Severity: variable

Explanation: This fault is caused by "total handled connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189292: fltTcaCommWebConn1wHandledTr

Severity: variable

Explanation: This fault is caused by "total handled connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189293: fltTcaCommWebConn1moHandledTr

Severity: variable

Explanation: This fault is caused by "total handled connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189294: fltTcaCommWebConn1qtrHandledTr

Severity: variable

Explanation: This fault is caused by "total handled connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189295: fltTcaCommWebConn1yearHandledTr

Severity: variable

Explanation: This fault is caused by "total handled connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189296: fltTcaCommWebConn5minHandledRate

Severity: variable

Explanation: This fault is caused by "total handled connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189297: fltTcaCommWebConn15minHandledRate

Severity: variable

Explanation: This fault is caused by "total handled connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189298: fltTcaCommWebConn1hHandledRate

Severity: variable

Explanation: This fault is caused by "total handled connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189299: fltTcaCommWebConn1dHandledRate

Severity: variable

Explanation: This fault is caused by "total handled connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1893: fltBgpInvalidRREpInvalidRouteReflector

Severity: minor

Explanation: This fault occurs when either a leaf is marked as a BGP route reflector, or if the configured BGP route reflector node is down.

Recommended Action: If you see this fault, take the following actions:

1. Verify that the node in BGP Route Reflector Node Policy Endpoint (bgp:RRNodePEp) Policy is not a leaf. Only spines can be BGP route reflectors.

2. Also, verify that the node marked as BGP route reflector is up.

3. If the above actions did not resolve the issue, collect a tech-support file and contact Cisco TAC.

F189300: fltTcaCommWebConn1wHandledRate

Severity: variable

Explanation: This fault is caused by "total handled connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189301: fltTcaCommWebConn1moHandledRate

Severity: variable

Explanation: This fault is caused by "total handled connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189302: fltTcaCommWebConn1qtrHandledRate

Severity: variable

Explanation: This fault is caused by "total handled connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189303: fltTcaCommWebConn1yearHandledRate

Severity: variable

Explanation: This fault is caused by "total handled connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189544: fltTcaCommWebConnAg5minHandledCum

Severity: variable

Explanation: This fault is caused by "total handled connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189545: fltTcaCommWebConnAg15minHandledCum

Severity: variable

Explanation: This fault is caused by "total handled connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189546: fltTcaCommWebConnAg1hHandledCum

Severity: variable

Explanation: This fault is caused by "total handled connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189547: fltTcaCommWebConnAg1dHandledCum

Severity: variable

Explanation: This fault is caused by "total handled connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189548: fltTcaCommWebConnAg1wHandledCum

Severity: variable

Explanation: This fault is caused by "total handled connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189549: fltTcaCommWebConnAg1moHandledCum

Severity: variable

Explanation: This fault is caused by "total handled connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189550: fltTcaCommWebConnAg1qtrHandledCum

Severity: variable

Explanation: This fault is caused by "total handled connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189551: fltTcaCommWebConnAg1yearHandledCum

Severity: variable

Explanation: This fault is caused by "total handled connections cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189552: fltTcaCommWebConnAg5minHandledPer

Severity: variable

Explanation: This fault is caused by "total handled connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189553: fltTcaCommWebConnAg15minHandledPer

Severity: variable

Explanation: This fault is caused by "total handled connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189554: fltTcaCommWebConnAg1hHandledPer

Severity: variable

Explanation: This fault is caused by "total handled connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189555: fltTcaCommWebConnAg1dHandledPer

Severity: variable

Explanation: This fault is caused by "total handled connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189556: fltTcaCommWebConnAg1wHandledPer

Severity: variable

Explanation: This fault is caused by "total handled connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189557: fltTcaCommWebConnAg1moHandledPer

Severity: variable

Explanation: This fault is caused by "total handled connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189558: fltTcaCommWebConnAg1qtrHandledPer

Severity: variable

Explanation: This fault is caused by "total handled connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189559: fltTcaCommWebConnAg1yearHandledPer

Severity: variable

Explanation: This fault is caused by "total handled connections periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189584: fltTcaCommWebConnAg5minHandledTr

Severity: variable

Explanation: This fault is caused by "total handled connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189585: fltTcaCommWebConnAg15minHandledTr

Severity: variable

Explanation: This fault is caused by "total handled connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189586: fltTcaCommWebConnAg1hHandledTr

Severity: variable

Explanation: This fault is caused by "total handled connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189587: fltTcaCommWebConnAg1dHandledTr

Severity: variable

Explanation: This fault is caused by "total handled connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189588: fltTcaCommWebConnAg1wHandledTr

Severity: variable

Explanation: This fault is caused by "total handled connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189589: fltTcaCommWebConnAg1moHandledTr

Severity: variable

Explanation: This fault is caused by "total handled connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189590: fltTcaCommWebConnAg1qtrHandledTr

Severity: variable

Explanation: This fault is caused by "total handled connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189591: fltTcaCommWebConnAg1yearHandledTr

Severity: variable

Explanation: This fault is caused by "total handled connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189592: fltTcaCommWebConnAg5minHandledRate

Severity: variable

Explanation: This fault is caused by "total handled connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189593: fltTcaCommWebConnAg15minHandledRate

Severity: variable

Explanation: This fault is caused by "total handled connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189594: fltTcaCommWebConnAg1hHandledRate

Severity: variable

Explanation: This fault is caused by "total handled connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189595: fltTcaCommWebConnAg1dHandledRate

Severity: variable

Explanation: This fault is caused by "total handled connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189596: fltTcaCommWebConnAg1wHandledRate

Severity: variable

Explanation: This fault is caused by "total handled connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189597: fltTcaCommWebConnAg1moHandledRate

Severity: variable

Explanation: This fault is caused by "total handled connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189598: fltTcaCommWebConnAg1qtrHandledRate

Severity: variable

Explanation: This fault is caused by "total handled connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189599: fltTcaCommWebConnAg1yearHandledRate

Severity: variable

Explanation: This fault is caused by "total handled connections rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total handled connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189648: fltTcaCommWebConnStates5minReadLast

Severity: variable

Explanation: This fault is caused by "current reading connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current reading connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189649: fltTcaCommWebConnStates15minReadLast

Severity: variable

Explanation: This fault is caused by "current reading connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current reading connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189650: fltTcaCommWebConnStates1hReadLast

Severity: variable

Explanation: This fault is caused by "current reading connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current reading connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189651: fltTcaCommWebConnStates1dReadLast

Severity: variable

Explanation: This fault is caused by "current reading connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current reading connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189652: fltTcaCommWebConnStates1wReadLast

Severity: variable

Explanation: This fault is caused by "current reading connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current reading connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189653: fltTcaCommWebConnStates1moReadLast

Severity: variable

Explanation: This fault is caused by "current reading connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current reading connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189654: fltTcaCommWebConnStates1qtrReadLast

Severity: variable

Explanation: This fault is caused by "current reading connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current reading connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189655: fltTcaCommWebConnStates1yearReadLast

Severity: variable

Explanation: This fault is caused by "current reading connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current reading connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189656: fltTcaCommWebConnStates5minReadMin

Severity: variable

Explanation: This fault is caused by "current reading connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current reading connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189657: fltTcaCommWebConnStates15minReadMin

Severity: variable

Explanation: This fault is caused by "current reading connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current reading connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189658: fltTcaCommWebConnStates1hReadMin

Severity: variable

Explanation: This fault is caused by "current reading connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current reading connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189659: fltTcaCommWebConnStates1dReadMin

Severity: variable

Explanation: This fault is caused by "current reading connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current reading connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189660: fltTcaCommWebConnStates1wReadMin

Severity: variable

Explanation: This fault is caused by "current reading connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current reading connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189661: fltTcaCommWebConnStates1moReadMin

Severity: variable

Explanation: This fault is caused by "current reading connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current reading connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189662: fltTcaCommWebConnStates1qtrReadMin

Severity: variable

Explanation: This fault is caused by "current reading connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current reading connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189663: fltTcaCommWebConnStates1yearReadMin

Severity: variable

Explanation: This fault is caused by "current reading connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current reading connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189664: fltTcaCommWebConnStates5minReadMax

Severity: variable

Explanation: This fault is caused by "current reading connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current reading connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189665: fltTcaCommWebConnStates15minReadMax

Severity: variable

Explanation: This fault is caused by "current reading connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current reading connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189666: fltTcaCommWebConnStates1hReadMax

Severity: variable

Explanation: This fault is caused by "current reading connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current reading connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189667: fltTcaCommWebConnStates1dReadMax

Severity: variable

Explanation: This fault is caused by "current reading connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current reading connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189668: fltTcaCommWebConnStates1wReadMax

Severity: variable

Explanation: This fault is caused by "current reading connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current reading connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189669: fltTcaCommWebConnStates1moReadMax

Severity: variable

Explanation: This fault is caused by "current reading connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current reading connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189670: fltTcaCommWebConnStates1qtrReadMax

Severity: variable

Explanation: This fault is caused by "current reading connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current reading connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189671: fltTcaCommWebConnStates1yearReadMax

Severity: variable

Explanation: This fault is caused by "current reading connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current reading connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189672: fltTcaCommWebConnStates5minReadAvg

Severity: variable

Explanation: This fault is caused by "current reading connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current reading connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189673: fltTcaCommWebConnStates15minReadAvg

Severity: variable

Explanation: This fault is caused by "current reading connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current reading connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189674: fltTcaCommWebConnStates1hReadAvg

Severity: variable

Explanation: This fault is caused by "current reading connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current reading connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189675: fltTcaCommWebConnStates1dReadAvg

Severity: variable

Explanation: This fault is caused by "current reading connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current reading connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189676: fltTcaCommWebConnStates1wReadAvg

Severity: variable

Explanation: This fault is caused by "current reading connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current reading connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189677: fltTcaCommWebConnStates1moReadAvg

Severity: variable

Explanation: This fault is caused by "current reading connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current reading connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189678: fltTcaCommWebConnStates1qtrReadAvg

Severity: variable

Explanation: This fault is caused by "current reading connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current reading connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189679: fltTcaCommWebConnStates1yearReadAvg

Severity: variable

Explanation: This fault is caused by "current reading connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current reading connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189712: fltTcaCommWebConnStates5minReadTr

Severity: variable

Explanation: This fault is caused by "current reading connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current reading connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189713: fltTcaCommWebConnStates15minReadTr

Severity: variable

Explanation: This fault is caused by "current reading connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current reading connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189714: fltTcaCommWebConnStates1hReadTr

Severity: variable

Explanation: This fault is caused by "current reading connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current reading connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189715: fltTcaCommWebConnStates1dReadTr

Severity: variable

Explanation: This fault is caused by "current reading connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current reading connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189716: fltTcaCommWebConnStates1wReadTr

Severity: variable

Explanation: This fault is caused by "current reading connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current reading connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189717: fltTcaCommWebConnStates1moReadTr

Severity: variable

Explanation: This fault is caused by "current reading connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current reading connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189718: fltTcaCommWebConnStates1qtrReadTr

Severity: variable

Explanation: This fault is caused by "current reading connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current reading connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189719: fltTcaCommWebConnStates1yearReadTr

Severity: variable

Explanation: This fault is caused by "current reading connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current reading connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189888: fltTcaCommWebConnStates5minWaitLast

Severity: variable

Explanation: This fault is caused by "current waiting connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current waiting connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189889: fltTcaCommWebConnStates15minWaitLast

Severity: variable

Explanation: This fault is caused by "current waiting connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current waiting connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189890: fltTcaCommWebConnStates1hWaitLast

Severity: variable

Explanation: This fault is caused by "current waiting connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current waiting connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189891: fltTcaCommWebConnStates1dWaitLast

Severity: variable

Explanation: This fault is caused by "current waiting connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current waiting connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189892: fltTcaCommWebConnStates1wWaitLast

Severity: variable

Explanation: This fault is caused by "current waiting connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current waiting connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189893: fltTcaCommWebConnStates1moWaitLast

Severity: variable

Explanation: This fault is caused by "current waiting connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current waiting connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189894: fltTcaCommWebConnStates1qtrWaitLast

Severity: variable

Explanation: This fault is caused by "current waiting connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current waiting connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189895: fltTcaCommWebConnStates1yearWaitLast

Severity: variable

Explanation: This fault is caused by "current waiting connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current waiting connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189896: fltTcaCommWebConnStates5minWaitMin

Severity: variable

Explanation: This fault is caused by "current waiting connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current waiting connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189897: fltTcaCommWebConnStates15minWaitMin

Severity: variable

Explanation: This fault is caused by "current waiting connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current waiting connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189898: fltTcaCommWebConnStates1hWaitMin

Severity: variable

Explanation: This fault is caused by "current waiting connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current waiting connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189899: fltTcaCommWebConnStates1dWaitMin

Severity: variable

Explanation: This fault is caused by "current waiting connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current waiting connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189900: fltTcaCommWebConnStates1wWaitMin

Severity: variable

Explanation: This fault is caused by "current waiting connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current waiting connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189901: fltTcaCommWebConnStates1moWaitMin

Severity: variable

Explanation: This fault is caused by "current waiting connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current waiting connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189902: fltTcaCommWebConnStates1qtrWaitMin

Severity: variable

Explanation: This fault is caused by "current waiting connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current waiting connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189903: fltTcaCommWebConnStates1yearWaitMin

Severity: variable

Explanation: This fault is caused by "current waiting connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current waiting connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189904: fltTcaCommWebConnStates5minWaitMax

Severity: variable

Explanation: This fault is caused by "current waiting connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current waiting connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189905: fltTcaCommWebConnStates15minWaitMax

Severity: variable

Explanation: This fault is caused by "current waiting connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current waiting connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189906: fltTcaCommWebConnStates1hWaitMax

Severity: variable

Explanation: This fault is caused by "current waiting connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current waiting connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189907: fltTcaCommWebConnStates1dWaitMax

Severity: variable

Explanation: This fault is caused by "current waiting connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current waiting connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189908: fltTcaCommWebConnStates1wWaitMax

Severity: variable

Explanation: This fault is caused by "current waiting connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current waiting connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189909: fltTcaCommWebConnStates1moWaitMax

Severity: variable

Explanation: This fault is caused by "current waiting connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current waiting connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189910: fltTcaCommWebConnStates1qtrWaitMax

Severity: variable

Explanation: This fault is caused by "current waiting connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current waiting connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189911: fltTcaCommWebConnStates1yearWaitMax

Severity: variable

Explanation: This fault is caused by "current waiting connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current waiting connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189912: fltTcaCommWebConnStates5minWaitAvg

Severity: variable

Explanation: This fault is caused by "current waiting connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current waiting connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189913: fltTcaCommWebConnStates15minWaitAvg

Severity: variable

Explanation: This fault is caused by "current waiting connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current waiting connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189914: fltTcaCommWebConnStates1hWaitAvg

Severity: variable

Explanation: This fault is caused by "current waiting connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current waiting connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189915: fltTcaCommWebConnStates1dWaitAvg

Severity: variable

Explanation: This fault is caused by "current waiting connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current waiting connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189916: fltTcaCommWebConnStates1wWaitAvg

Severity: variable

Explanation: This fault is caused by "current waiting connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current waiting connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189917: fltTcaCommWebConnStates1moWaitAvg

Severity: variable

Explanation: This fault is caused by "current waiting connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current waiting connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189918: fltTcaCommWebConnStates1qtrWaitAvg

Severity: variable

Explanation: This fault is caused by "current waiting connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current waiting connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189919: fltTcaCommWebConnStates1yearWaitAvg

Severity: variable

Explanation: This fault is caused by "current waiting connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current waiting connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189952: fltTcaCommWebConnStates5minWaitTr

Severity: variable

Explanation: This fault is caused by "current waiting connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current waiting connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189953: fltTcaCommWebConnStates15minWaitTr

Severity: variable

Explanation: This fault is caused by "current waiting connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current waiting connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189954: fltTcaCommWebConnStates1hWaitTr

Severity: variable

Explanation: This fault is caused by "current waiting connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current waiting connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189955: fltTcaCommWebConnStates1dWaitTr

Severity: variable

Explanation: This fault is caused by "current waiting connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current waiting connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189956: fltTcaCommWebConnStates1wWaitTr

Severity: variable

Explanation: This fault is caused by "current waiting connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current waiting connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189957: fltTcaCommWebConnStates1moWaitTr

Severity: variable

Explanation: This fault is caused by "current waiting connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current waiting connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189958: fltTcaCommWebConnStates1qtrWaitTr

Severity: variable

Explanation: This fault is caused by "current waiting connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current waiting connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F189959: fltTcaCommWebConnStates1yearWaitTr

Severity: variable

Explanation: This fault is caused by "current waiting connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current waiting connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190128: fltTcaCommWebConnStates5minWriteLast

Severity: variable

Explanation: This fault is caused by "current writing connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current writing connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190129: fltTcaCommWebConnStates15minWriteLast

Severity: variable

Explanation: This fault is caused by "current writing connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current writing connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190130: fltTcaCommWebConnStates1hWriteLast

Severity: variable

Explanation: This fault is caused by "current writing connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current writing connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190131: fltTcaCommWebConnStates1dWriteLast

Severity: variable

Explanation: This fault is caused by "current writing connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current writing connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190132: fltTcaCommWebConnStates1wWriteLast

Severity: variable

Explanation: This fault is caused by "current writing connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current writing connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190133: fltTcaCommWebConnStates1moWriteLast

Severity: variable

Explanation: This fault is caused by "current writing connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current writing connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190134: fltTcaCommWebConnStates1qtrWriteLast

Severity: variable

Explanation: This fault is caused by "current writing connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current writing connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190135: fltTcaCommWebConnStates1yearWriteLast

Severity: variable

Explanation: This fault is caused by "current writing connections current value" statistical property crossing threshold level.

Recommended Action: Check the values of "current writing connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190136: fltTcaCommWebConnStates5minWriteMin

Severity: variable

Explanation: This fault is caused by "current writing connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current writing connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190137: fltTcaCommWebConnStates15minWriteMin

Severity: variable

Explanation: This fault is caused by "current writing connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current writing connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190138: fltTcaCommWebConnStates1hWriteMin

Severity: variable

Explanation: This fault is caused by "current writing connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current writing connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190139: fltTcaCommWebConnStates1dWriteMin

Severity: variable

Explanation: This fault is caused by "current writing connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current writing connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190140: fltTcaCommWebConnStates1wWriteMin

Severity: variable

Explanation: This fault is caused by "current writing connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current writing connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190141: fltTcaCommWebConnStates1moWriteMin

Severity: variable

Explanation: This fault is caused by "current writing connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current writing connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190142: fltTcaCommWebConnStates1qtrWriteMin

Severity: variable

Explanation: This fault is caused by "current writing connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current writing connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190143: fltTcaCommWebConnStates1yearWriteMin

Severity: variable

Explanation: This fault is caused by "current writing connections minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current writing connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190144: fltTcaCommWebConnStates5minWriteMax

Severity: variable

Explanation: This fault is caused by "current writing connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current writing connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190145: fltTcaCommWebConnStates15minWriteMax

Severity: variable

Explanation: This fault is caused by "current writing connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current writing connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190146: fltTcaCommWebConnStates1hWriteMax

Severity: variable

Explanation: This fault is caused by "current writing connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current writing connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190147: fltTcaCommWebConnStates1dWriteMax

Severity: variable

Explanation: This fault is caused by "current writing connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current writing connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190148: fltTcaCommWebConnStates1wWriteMax

Severity: variable

Explanation: This fault is caused by "current writing connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current writing connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190149: fltTcaCommWebConnStates1moWriteMax

Severity: variable

Explanation: This fault is caused by "current writing connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current writing connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190150: fltTcaCommWebConnStates1qtrWriteMax

Severity: variable

Explanation: This fault is caused by "current writing connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current writing connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190151: fltTcaCommWebConnStates1yearWriteMax

Severity: variable

Explanation: This fault is caused by "current writing connections maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "current writing connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190152: fltTcaCommWebConnStates5minWriteAvg

Severity: variable

Explanation: This fault is caused by "current writing connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current writing connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190153: fltTcaCommWebConnStates15minWriteAvg

Severity: variable

Explanation: This fault is caused by "current writing connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current writing connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190154: fltTcaCommWebConnStates1hWriteAvg

Severity: variable

Explanation: This fault is caused by "current writing connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current writing connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190155: fltTcaCommWebConnStates1dWriteAvg

Severity: variable

Explanation: This fault is caused by "current writing connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current writing connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190156: fltTcaCommWebConnStates1wWriteAvg

Severity: variable

Explanation: This fault is caused by "current writing connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current writing connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190157: fltTcaCommWebConnStates1moWriteAvg

Severity: variable

Explanation: This fault is caused by "current writing connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current writing connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190158: fltTcaCommWebConnStates1qtrWriteAvg

Severity: variable

Explanation: This fault is caused by "current writing connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current writing connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190159: fltTcaCommWebConnStates1yearWriteAvg

Severity: variable

Explanation: This fault is caused by "current writing connections average value" statistical property crossing threshold level.

Recommended Action: Check the values of "current writing connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190192: fltTcaCommWebConnStates5minWriteTr

Severity: variable

Explanation: This fault is caused by "current writing connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current writing connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190193: fltTcaCommWebConnStates15minWriteTr

Severity: variable

Explanation: This fault is caused by "current writing connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current writing connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190194: fltTcaCommWebConnStates1hWriteTr

Severity: variable

Explanation: This fault is caused by "current writing connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current writing connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190195: fltTcaCommWebConnStates1dWriteTr

Severity: variable

Explanation: This fault is caused by "current writing connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current writing connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190196: fltTcaCommWebConnStates1wWriteTr

Severity: variable

Explanation: This fault is caused by "current writing connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current writing connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190197: fltTcaCommWebConnStates1moWriteTr

Severity: variable

Explanation: This fault is caused by "current writing connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current writing connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190198: fltTcaCommWebConnStates1qtrWriteTr

Severity: variable

Explanation: This fault is caused by "current writing connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current writing connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190199: fltTcaCommWebConnStates1yearWriteTr

Severity: variable

Explanation: This fault is caused by "current writing connections trend" statistical property crossing threshold level.

Recommended Action: Check the values of "current writing connections" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190368: fltTcaCommWebReq5minRequestsLast

Severity: variable

Explanation: This fault is caused by "total requests current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190369: fltTcaCommWebReq15minRequestsLast

Severity: variable

Explanation: This fault is caused by "total requests current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190370: fltTcaCommWebReq1hRequestsLast

Severity: variable

Explanation: This fault is caused by "total requests current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190371: fltTcaCommWebReq1dRequestsLast

Severity: variable

Explanation: This fault is caused by "total requests current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190372: fltTcaCommWebReq1wRequestsLast

Severity: variable

Explanation: This fault is caused by "total requests current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190373: fltTcaCommWebReq1moRequestsLast

Severity: variable

Explanation: This fault is caused by "total requests current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190374: fltTcaCommWebReq1qtrRequestsLast

Severity: variable

Explanation: This fault is caused by "total requests current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190375: fltTcaCommWebReq1yearRequestsLast

Severity: variable

Explanation: This fault is caused by "total requests current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190384: fltTcaCommWebReq5minRequestsCum

Severity: variable

Explanation: This fault is caused by "total requests cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190385: fltTcaCommWebReq15minRequestsCum

Severity: variable

Explanation: This fault is caused by "total requests cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190386: fltTcaCommWebReq1hRequestsCum

Severity: variable

Explanation: This fault is caused by "total requests cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190387: fltTcaCommWebReq1dRequestsCum

Severity: variable

Explanation: This fault is caused by "total requests cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190388: fltTcaCommWebReq1wRequestsCum

Severity: variable

Explanation: This fault is caused by "total requests cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190389: fltTcaCommWebReq1moRequestsCum

Severity: variable

Explanation: This fault is caused by "total requests cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190390: fltTcaCommWebReq1qtrRequestsCum

Severity: variable

Explanation: This fault is caused by "total requests cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190391: fltTcaCommWebReq1yearRequestsCum

Severity: variable

Explanation: This fault is caused by "total requests cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190392: fltTcaCommWebReq5minRequestsPer

Severity: variable

Explanation: This fault is caused by "total requests periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190393: fltTcaCommWebReq15minRequestsPer

Severity: variable

Explanation: This fault is caused by "total requests periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190394: fltTcaCommWebReq1hRequestsPer

Severity: variable

Explanation: This fault is caused by "total requests periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190395: fltTcaCommWebReq1dRequestsPer

Severity: variable

Explanation: This fault is caused by "total requests periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190396: fltTcaCommWebReq1wRequestsPer

Severity: variable

Explanation: This fault is caused by "total requests periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190397: fltTcaCommWebReq1moRequestsPer

Severity: variable

Explanation: This fault is caused by "total requests periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190398: fltTcaCommWebReq1qtrRequestsPer

Severity: variable

Explanation: This fault is caused by "total requests periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190399: fltTcaCommWebReq1yearRequestsPer

Severity: variable

Explanation: This fault is caused by "total requests periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1904: fltPlannerRsGraphClusterResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F190400: fltTcaCommWebReq5minRequestsMin

Severity: variable

Explanation: This fault is caused by "total requests minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190401: fltTcaCommWebReq15minRequestsMin

Severity: variable

Explanation: This fault is caused by "total requests minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190402: fltTcaCommWebReq1hRequestsMin

Severity: variable

Explanation: This fault is caused by "total requests minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190403: fltTcaCommWebReq1dRequestsMin

Severity: variable

Explanation: This fault is caused by "total requests minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190404: fltTcaCommWebReq1wRequestsMin

Severity: variable

Explanation: This fault is caused by "total requests minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190405: fltTcaCommWebReq1moRequestsMin

Severity: variable

Explanation: This fault is caused by "total requests minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190406: fltTcaCommWebReq1qtrRequestsMin

Severity: variable

Explanation: This fault is caused by "total requests minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190407: fltTcaCommWebReq1yearRequestsMin

Severity: variable

Explanation: This fault is caused by "total requests minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190408: fltTcaCommWebReq5minRequestsMax

Severity: variable

Explanation: This fault is caused by "total requests maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190409: fltTcaCommWebReq15minRequestsMax

Severity: variable

Explanation: This fault is caused by "total requests maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190410: fltTcaCommWebReq1hRequestsMax

Severity: variable

Explanation: This fault is caused by "total requests maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190411: fltTcaCommWebReq1dRequestsMax

Severity: variable

Explanation: This fault is caused by "total requests maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190412: fltTcaCommWebReq1wRequestsMax

Severity: variable

Explanation: This fault is caused by "total requests maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190413: fltTcaCommWebReq1moRequestsMax

Severity: variable

Explanation: This fault is caused by "total requests maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190414: fltTcaCommWebReq1qtrRequestsMax

Severity: variable

Explanation: This fault is caused by "total requests maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190415: fltTcaCommWebReq1yearRequestsMax

Severity: variable

Explanation: This fault is caused by "total requests maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190416: fltTcaCommWebReq5minRequestsAvg

Severity: variable

Explanation: This fault is caused by "total requests average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190417: fltTcaCommWebReq15minRequestsAvg

Severity: variable

Explanation: This fault is caused by "total requests average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190418: fltTcaCommWebReq1hRequestsAvg

Severity: variable

Explanation: This fault is caused by "total requests average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190419: fltTcaCommWebReq1dRequestsAvg

Severity: variable

Explanation: This fault is caused by "total requests average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190420: fltTcaCommWebReq1wRequestsAvg

Severity: variable

Explanation: This fault is caused by "total requests average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190421: fltTcaCommWebReq1moRequestsAvg

Severity: variable

Explanation: This fault is caused by "total requests average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190422: fltTcaCommWebReq1qtrRequestsAvg

Severity: variable

Explanation: This fault is caused by "total requests average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190423: fltTcaCommWebReq1yearRequestsAvg

Severity: variable

Explanation: This fault is caused by "total requests average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190448: fltTcaCommWebReq5minRequestsTr

Severity: variable

Explanation: This fault is caused by "total requests trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190449: fltTcaCommWebReq15minRequestsTr

Severity: variable

Explanation: This fault is caused by "total requests trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190450: fltTcaCommWebReq1hRequestsTr

Severity: variable

Explanation: This fault is caused by "total requests trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190451: fltTcaCommWebReq1dRequestsTr

Severity: variable

Explanation: This fault is caused by "total requests trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190452: fltTcaCommWebReq1wRequestsTr

Severity: variable

Explanation: This fault is caused by "total requests trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190453: fltTcaCommWebReq1moRequestsTr

Severity: variable

Explanation: This fault is caused by "total requests trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190454: fltTcaCommWebReq1qtrRequestsTr

Severity: variable

Explanation: This fault is caused by "total requests trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190455: fltTcaCommWebReq1yearRequestsTr

Severity: variable

Explanation: This fault is caused by "total requests trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190456: fltTcaCommWebReq5minRequestsRate

Severity: variable

Explanation: This fault is caused by "total requests rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190457: fltTcaCommWebReq15minRequestsRate

Severity: variable

Explanation: This fault is caused by "total requests rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190458: fltTcaCommWebReq1hRequestsRate

Severity: variable

Explanation: This fault is caused by "total requests rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190459: fltTcaCommWebReq1dRequestsRate

Severity: variable

Explanation: This fault is caused by "total requests rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190460: fltTcaCommWebReq1wRequestsRate

Severity: variable

Explanation: This fault is caused by "total requests rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190461: fltTcaCommWebReq1moRequestsRate

Severity: variable

Explanation: This fault is caused by "total requests rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190462: fltTcaCommWebReq1qtrRequestsRate

Severity: variable

Explanation: This fault is caused by "total requests rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190463: fltTcaCommWebReq1yearRequestsRate

Severity: variable

Explanation: This fault is caused by "total requests rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1905: fltPlannerRsClusterLabelResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1907: fltImMgmtIfPortDownMgmt

Severity: critical

Explanation: This fault occurs when a port is set to up but the operational state is down

Recommended Action: To recover from this fault, try the following actions:

1. Check cabling

2. Bring down port and bring it back up.

F190704: fltTcaCommWebReqAg5minRequestsCum

Severity: variable

Explanation: This fault is caused by "total requests cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190705: fltTcaCommWebReqAg15minRequestsCum

Severity: variable

Explanation: This fault is caused by "total requests cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190706: fltTcaCommWebReqAg1hRequestsCum

Severity: variable

Explanation: This fault is caused by "total requests cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190707: fltTcaCommWebReqAg1dRequestsCum

Severity: variable

Explanation: This fault is caused by "total requests cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190708: fltTcaCommWebReqAg1wRequestsCum

Severity: variable

Explanation: This fault is caused by "total requests cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190709: fltTcaCommWebReqAg1moRequestsCum

Severity: variable

Explanation: This fault is caused by "total requests cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190710: fltTcaCommWebReqAg1qtrRequestsCum

Severity: variable

Explanation: This fault is caused by "total requests cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190711: fltTcaCommWebReqAg1yearRequestsCum

Severity: variable

Explanation: This fault is caused by "total requests cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190712: fltTcaCommWebReqAg5minRequestsPer

Severity: variable

Explanation: This fault is caused by "total requests periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190713: fltTcaCommWebReqAg15minRequestsPer

Severity: variable

Explanation: This fault is caused by "total requests periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190714: fltTcaCommWebReqAg1hRequestsPer

Severity: variable

Explanation: This fault is caused by "total requests periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190715: fltTcaCommWebReqAg1dRequestsPer

Severity: variable

Explanation: This fault is caused by "total requests periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190716: fltTcaCommWebReqAg1wRequestsPer

Severity: variable

Explanation: This fault is caused by "total requests periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190717: fltTcaCommWebReqAg1moRequestsPer

Severity: variable

Explanation: This fault is caused by "total requests periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190718: fltTcaCommWebReqAg1qtrRequestsPer

Severity: variable

Explanation: This fault is caused by "total requests periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190719: fltTcaCommWebReqAg1yearRequestsPer

Severity: variable

Explanation: This fault is caused by "total requests periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190744: fltTcaCommWebReqAg5minRequestsTr

Severity: variable

Explanation: This fault is caused by "total requests trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190745: fltTcaCommWebReqAg15minRequestsTr

Severity: variable

Explanation: This fault is caused by "total requests trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190746: fltTcaCommWebReqAg1hRequestsTr

Severity: variable

Explanation: This fault is caused by "total requests trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190747: fltTcaCommWebReqAg1dRequestsTr

Severity: variable

Explanation: This fault is caused by "total requests trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190748: fltTcaCommWebReqAg1wRequestsTr

Severity: variable

Explanation: This fault is caused by "total requests trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190749: fltTcaCommWebReqAg1moRequestsTr

Severity: variable

Explanation: This fault is caused by "total requests trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190750: fltTcaCommWebReqAg1qtrRequestsTr

Severity: variable

Explanation: This fault is caused by "total requests trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190751: fltTcaCommWebReqAg1yearRequestsTr

Severity: variable

Explanation: This fault is caused by "total requests trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190752: fltTcaCommWebReqAg5minRequestsRate

Severity: variable

Explanation: This fault is caused by "total requests rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190753: fltTcaCommWebReqAg15minRequestsRate

Severity: variable

Explanation: This fault is caused by "total requests rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190754: fltTcaCommWebReqAg1hRequestsRate

Severity: variable

Explanation: This fault is caused by "total requests rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190755: fltTcaCommWebReqAg1dRequestsRate

Severity: variable

Explanation: This fault is caused by "total requests rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190756: fltTcaCommWebReqAg1wRequestsRate

Severity: variable

Explanation: This fault is caused by "total requests rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190757: fltTcaCommWebReqAg1moRequestsRate

Severity: variable

Explanation: This fault is caused by "total requests rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190758: fltTcaCommWebReqAg1qtrRequestsRate

Severity: variable

Explanation: This fault is caused by "total requests rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F190759: fltTcaCommWebReqAg1yearRequestsRate

Severity: variable

Explanation: This fault is caused by "total requests rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total requests" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1909: fltVnsRsCIfAttNResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F1911: fltNwsRsNwsSyslogSrcToDestGroupNwsFwSyslogTooManyRemoteDest

Severity: warning

Explanation: This fault occurs when a firewall syslog source refers to a syslog group containing more remote destinations than the firewall supports (3).

Recommended Action: If you see this fault, take one of the following actions:

1. Remove excess remote destinations from the syslog group, so that total number is less than or equal to 3.

2. Create a new syslog group with at most 3 remote destinations and point the firewall syslog source to it.

F1912: fltInfraRsLacpInterfacePolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F191536: fltTcaEqptcapacityPrefixEntries5minNormalizedLast

Severity: variable

Explanation: This fault is caused by "Deprecated.. current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F191537: fltTcaEqptcapacityPrefixEntries15minNormalizedLast

Severity: variable

Explanation: This fault is caused by "Deprecated.. current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F191538: fltTcaEqptcapacityPrefixEntries1hNormalizedLast

Severity: variable

Explanation: This fault is caused by "Deprecated.. current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F191539: fltTcaEqptcapacityPrefixEntries1dNormalizedLast

Severity: variable

Explanation: This fault is caused by "Deprecated.. current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F191540: fltTcaEqptcapacityPrefixEntries1wNormalizedLast

Severity: variable

Explanation: This fault is caused by "Deprecated.. current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F191541: fltTcaEqptcapacityPrefixEntries1moNormalizedLast

Severity: variable

Explanation: This fault is caused by "Deprecated.. current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F191542: fltTcaEqptcapacityPrefixEntries1qtrNormalizedLast

Severity: variable

Explanation: This fault is caused by "Deprecated.. current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F191543: fltTcaEqptcapacityPrefixEntries1yearNormalizedLast

Severity: variable

Explanation: This fault is caused by "Deprecated.. current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F191544: fltTcaEqptcapacityPrefixEntries5minNormalizedMin

Severity: variable

Explanation: This fault is caused by "Deprecated.. minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F191545: fltTcaEqptcapacityPrefixEntries15minNormalizedMin

Severity: variable

Explanation: This fault is caused by "Deprecated.. minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F191546: fltTcaEqptcapacityPrefixEntries1hNormalizedMin

Severity: variable

Explanation: This fault is caused by "Deprecated.. minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F191547: fltTcaEqptcapacityPrefixEntries1dNormalizedMin

Severity: variable

Explanation: This fault is caused by "Deprecated.. minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F191548: fltTcaEqptcapacityPrefixEntries1wNormalizedMin

Severity: variable

Explanation: This fault is caused by "Deprecated.. minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F191549: fltTcaEqptcapacityPrefixEntries1moNormalizedMin

Severity: variable

Explanation: This fault is caused by "Deprecated.. minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F191550: fltTcaEqptcapacityPrefixEntries1qtrNormalizedMin

Severity: variable

Explanation: This fault is caused by "Deprecated.. minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F191551: fltTcaEqptcapacityPrefixEntries1yearNormalizedMin

Severity: variable

Explanation: This fault is caused by "Deprecated.. minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F191552: fltTcaEqptcapacityPrefixEntries5minNormalizedMax

Severity: variable

Explanation: This fault is caused by "Deprecated.. maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F191553: fltTcaEqptcapacityPrefixEntries15minNormalizedMax

Severity: variable

Explanation: This fault is caused by "Deprecated.. maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F191554: fltTcaEqptcapacityPrefixEntries1hNormalizedMax

Severity: variable

Explanation: This fault is caused by "Deprecated.. maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F191555: fltTcaEqptcapacityPrefixEntries1dNormalizedMax

Severity: variable

Explanation: This fault is caused by "Deprecated.. maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F191556: fltTcaEqptcapacityPrefixEntries1wNormalizedMax

Severity: variable

Explanation: This fault is caused by "Deprecated.. maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F191557: fltTcaEqptcapacityPrefixEntries1moNormalizedMax

Severity: variable

Explanation: This fault is caused by "Deprecated.. maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F191558: fltTcaEqptcapacityPrefixEntries1qtrNormalizedMax

Severity: variable

Explanation: This fault is caused by "Deprecated.. maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F191559: fltTcaEqptcapacityPrefixEntries1yearNormalizedMax

Severity: variable

Explanation: This fault is caused by "Deprecated.. maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F191560: fltTcaEqptcapacityPrefixEntries5minNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Deprecated.. average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F191561: fltTcaEqptcapacityPrefixEntries15minNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Deprecated.. average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F191562: fltTcaEqptcapacityPrefixEntries1hNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Deprecated.. average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F191563: fltTcaEqptcapacityPrefixEntries1dNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Deprecated.. average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F191564: fltTcaEqptcapacityPrefixEntries1wNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Deprecated.. average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F191565: fltTcaEqptcapacityPrefixEntries1moNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Deprecated.. average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F191566: fltTcaEqptcapacityPrefixEntries1qtrNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Deprecated.. average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F191567: fltTcaEqptcapacityPrefixEntries1yearNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Deprecated.. average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F191600: fltTcaEqptcapacityPrefixEntries5minNormalizedTr

Severity: variable

Explanation: This fault is caused by "Deprecated.. trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F191601: fltTcaEqptcapacityPrefixEntries15minNormalizedTr

Severity: variable

Explanation: This fault is caused by "Deprecated.. trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F191602: fltTcaEqptcapacityPrefixEntries1hNormalizedTr

Severity: variable

Explanation: This fault is caused by "Deprecated.. trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F191603: fltTcaEqptcapacityPrefixEntries1dNormalizedTr

Severity: variable

Explanation: This fault is caused by "Deprecated.. trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F191604: fltTcaEqptcapacityPrefixEntries1wNormalizedTr

Severity: variable

Explanation: This fault is caused by "Deprecated.. trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F191605: fltTcaEqptcapacityPrefixEntries1moNormalizedTr

Severity: variable

Explanation: This fault is caused by "Deprecated.. trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F191606: fltTcaEqptcapacityPrefixEntries1qtrNormalizedTr

Severity: variable

Explanation: This fault is caused by "Deprecated.. trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F191607: fltTcaEqptcapacityPrefixEntries1yearNormalizedTr

Severity: variable

Explanation: This fault is caused by "Deprecated.. trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1925: fltL3IpCktEpIpCktEpConfigFailed

Severity: major

Explanation: This fault occurs when the IpCktEP configuration fails

Recommended Action: If this fault is consistently happening, try the following actions:

1. Check if hardware supports this feature

2. If the network connectivity is fine, generate the show tech-support file and contact Cisco TAC.

F192760: fltTcaEqptcapacityL2Usage5minLocalEpLast

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192761: fltTcaEqptcapacityL2Usage15minLocalEpLast

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192762: fltTcaEqptcapacityL2Usage1hLocalEpLast

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192763: fltTcaEqptcapacityL2Usage1dLocalEpLast

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192764: fltTcaEqptcapacityL2Usage1wLocalEpLast

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192765: fltTcaEqptcapacityL2Usage1moLocalEpLast

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192766: fltTcaEqptcapacityL2Usage1qtrLocalEpLast

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192767: fltTcaEqptcapacityL2Usage1yearLocalEpLast

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192792: fltTcaEqptcapacityL2Usage5minLocalEpMin

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192793: fltTcaEqptcapacityL2Usage15minLocalEpMin

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192794: fltTcaEqptcapacityL2Usage1hLocalEpMin

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192795: fltTcaEqptcapacityL2Usage1dLocalEpMin

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192796: fltTcaEqptcapacityL2Usage1wLocalEpMin

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192797: fltTcaEqptcapacityL2Usage1moLocalEpMin

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192798: fltTcaEqptcapacityL2Usage1qtrLocalEpMin

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192799: fltTcaEqptcapacityL2Usage1yearLocalEpMin

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192800: fltTcaEqptcapacityL2Usage5minLocalEpMax

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192801: fltTcaEqptcapacityL2Usage15minLocalEpMax

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192802: fltTcaEqptcapacityL2Usage1hLocalEpMax

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192803: fltTcaEqptcapacityL2Usage1dLocalEpMax

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192804: fltTcaEqptcapacityL2Usage1wLocalEpMax

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192805: fltTcaEqptcapacityL2Usage1moLocalEpMax

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192806: fltTcaEqptcapacityL2Usage1qtrLocalEpMax

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192807: fltTcaEqptcapacityL2Usage1yearLocalEpMax

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192808: fltTcaEqptcapacityL2Usage5minLocalEpAvg

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192809: fltTcaEqptcapacityL2Usage15minLocalEpAvg

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192810: fltTcaEqptcapacityL2Usage1hLocalEpAvg

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192811: fltTcaEqptcapacityL2Usage1dLocalEpAvg

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192812: fltTcaEqptcapacityL2Usage1wLocalEpAvg

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192813: fltTcaEqptcapacityL2Usage1moLocalEpAvg

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192814: fltTcaEqptcapacityL2Usage1qtrLocalEpAvg

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192815: fltTcaEqptcapacityL2Usage1yearLocalEpAvg

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192840: fltTcaEqptcapacityL2Usage5minLocalEpTr

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192841: fltTcaEqptcapacityL2Usage15minLocalEpTr

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192842: fltTcaEqptcapacityL2Usage1hLocalEpTr

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192843: fltTcaEqptcapacityL2Usage1dLocalEpTr

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192844: fltTcaEqptcapacityL2Usage1wLocalEpTr

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192845: fltTcaEqptcapacityL2Usage1moLocalEpTr

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192846: fltTcaEqptcapacityL2Usage1qtrLocalEpTr

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192847: fltTcaEqptcapacityL2Usage1yearLocalEpTr

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192928: fltTcaEqptcapacityL3Usage5minLocalEpLast

Severity: variable

Explanation: This fault is caused by "Local L3 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L3 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192929: fltTcaEqptcapacityL3Usage15minLocalEpLast

Severity: variable

Explanation: This fault is caused by "Local L3 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L3 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192930: fltTcaEqptcapacityL3Usage1hLocalEpLast

Severity: variable

Explanation: This fault is caused by "Local L3 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L3 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192931: fltTcaEqptcapacityL3Usage1dLocalEpLast

Severity: variable

Explanation: This fault is caused by "Local L3 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L3 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192932: fltTcaEqptcapacityL3Usage1wLocalEpLast

Severity: variable

Explanation: This fault is caused by "Local L3 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L3 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192933: fltTcaEqptcapacityL3Usage1moLocalEpLast

Severity: variable

Explanation: This fault is caused by "Local L3 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L3 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192934: fltTcaEqptcapacityL3Usage1qtrLocalEpLast

Severity: variable

Explanation: This fault is caused by "Local L3 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L3 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192935: fltTcaEqptcapacityL3Usage1yearLocalEpLast

Severity: variable

Explanation: This fault is caused by "Local L3 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L3 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192960: fltTcaEqptcapacityL3Usage5minLocalEpMin

Severity: variable

Explanation: This fault is caused by "Local L3 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L3 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192961: fltTcaEqptcapacityL3Usage15minLocalEpMin

Severity: variable

Explanation: This fault is caused by "Local L3 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L3 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192962: fltTcaEqptcapacityL3Usage1hLocalEpMin

Severity: variable

Explanation: This fault is caused by "Local L3 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L3 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192963: fltTcaEqptcapacityL3Usage1dLocalEpMin

Severity: variable

Explanation: This fault is caused by "Local L3 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L3 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192964: fltTcaEqptcapacityL3Usage1wLocalEpMin

Severity: variable

Explanation: This fault is caused by "Local L3 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L3 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192965: fltTcaEqptcapacityL3Usage1moLocalEpMin

Severity: variable

Explanation: This fault is caused by "Local L3 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L3 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192966: fltTcaEqptcapacityL3Usage1qtrLocalEpMin

Severity: variable

Explanation: This fault is caused by "Local L3 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L3 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192967: fltTcaEqptcapacityL3Usage1yearLocalEpMin

Severity: variable

Explanation: This fault is caused by "Local L3 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L3 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192968: fltTcaEqptcapacityL3Usage5minLocalEpMax

Severity: variable

Explanation: This fault is caused by "Local L3 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L3 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192969: fltTcaEqptcapacityL3Usage15minLocalEpMax

Severity: variable

Explanation: This fault is caused by "Local L3 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L3 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192970: fltTcaEqptcapacityL3Usage1hLocalEpMax

Severity: variable

Explanation: This fault is caused by "Local L3 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L3 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192971: fltTcaEqptcapacityL3Usage1dLocalEpMax

Severity: variable

Explanation: This fault is caused by "Local L3 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L3 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192972: fltTcaEqptcapacityL3Usage1wLocalEpMax

Severity: variable

Explanation: This fault is caused by "Local L3 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L3 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192973: fltTcaEqptcapacityL3Usage1moLocalEpMax

Severity: variable

Explanation: This fault is caused by "Local L3 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L3 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192974: fltTcaEqptcapacityL3Usage1qtrLocalEpMax

Severity: variable

Explanation: This fault is caused by "Local L3 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L3 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192975: fltTcaEqptcapacityL3Usage1yearLocalEpMax

Severity: variable

Explanation: This fault is caused by "Local L3 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L3 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192976: fltTcaEqptcapacityL3Usage5minLocalEpAvg

Severity: variable

Explanation: This fault is caused by "Local L3 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L3 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192977: fltTcaEqptcapacityL3Usage15minLocalEpAvg

Severity: variable

Explanation: This fault is caused by "Local L3 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L3 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192978: fltTcaEqptcapacityL3Usage1hLocalEpAvg

Severity: variable

Explanation: This fault is caused by "Local L3 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L3 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192979: fltTcaEqptcapacityL3Usage1dLocalEpAvg

Severity: variable

Explanation: This fault is caused by "Local L3 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L3 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192980: fltTcaEqptcapacityL3Usage1wLocalEpAvg

Severity: variable

Explanation: This fault is caused by "Local L3 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L3 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192981: fltTcaEqptcapacityL3Usage1moLocalEpAvg

Severity: variable

Explanation: This fault is caused by "Local L3 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L3 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192982: fltTcaEqptcapacityL3Usage1qtrLocalEpAvg

Severity: variable

Explanation: This fault is caused by "Local L3 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L3 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F192983: fltTcaEqptcapacityL3Usage1yearLocalEpAvg

Severity: variable

Explanation: This fault is caused by "Local L3 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L3 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193008: fltTcaEqptcapacityL3Usage5minLocalEpTr

Severity: variable

Explanation: This fault is caused by "Local L3 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L3 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193009: fltTcaEqptcapacityL3Usage15minLocalEpTr

Severity: variable

Explanation: This fault is caused by "Local L3 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L3 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193010: fltTcaEqptcapacityL3Usage1hLocalEpTr

Severity: variable

Explanation: This fault is caused by "Local L3 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L3 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193011: fltTcaEqptcapacityL3Usage1dLocalEpTr

Severity: variable

Explanation: This fault is caused by "Local L3 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L3 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193012: fltTcaEqptcapacityL3Usage1wLocalEpTr

Severity: variable

Explanation: This fault is caused by "Local L3 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L3 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193013: fltTcaEqptcapacityL3Usage1moLocalEpTr

Severity: variable

Explanation: This fault is caused by "Local L3 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L3 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193014: fltTcaEqptcapacityL3Usage1qtrLocalEpTr

Severity: variable

Explanation: This fault is caused by "Local L3 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L3 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193015: fltTcaEqptcapacityL3Usage1yearLocalEpTr

Severity: variable

Explanation: This fault is caused by "Local L3 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L3 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193096: fltTcaEqptcapacityMcastUsage5minLocalEpLast

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193097: fltTcaEqptcapacityMcastUsage15minLocalEpLast

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193098: fltTcaEqptcapacityMcastUsage1hLocalEpLast

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193099: fltTcaEqptcapacityMcastUsage1dLocalEpLast

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193100: fltTcaEqptcapacityMcastUsage1wLocalEpLast

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193101: fltTcaEqptcapacityMcastUsage1moLocalEpLast

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193102: fltTcaEqptcapacityMcastUsage1qtrLocalEpLast

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193103: fltTcaEqptcapacityMcastUsage1yearLocalEpLast

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193112: fltTcaEqptcapacityMcastUsage5minLocalEpCum

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193113: fltTcaEqptcapacityMcastUsage15minLocalEpCum

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193114: fltTcaEqptcapacityMcastUsage1hLocalEpCum

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193115: fltTcaEqptcapacityMcastUsage1dLocalEpCum

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193116: fltTcaEqptcapacityMcastUsage1wLocalEpCum

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193117: fltTcaEqptcapacityMcastUsage1moLocalEpCum

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193118: fltTcaEqptcapacityMcastUsage1qtrLocalEpCum

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193119: fltTcaEqptcapacityMcastUsage1yearLocalEpCum

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193120: fltTcaEqptcapacityMcastUsage5minLocalEpPer

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193121: fltTcaEqptcapacityMcastUsage15minLocalEpPer

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193122: fltTcaEqptcapacityMcastUsage1hLocalEpPer

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193123: fltTcaEqptcapacityMcastUsage1dLocalEpPer

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193124: fltTcaEqptcapacityMcastUsage1wLocalEpPer

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193125: fltTcaEqptcapacityMcastUsage1moLocalEpPer

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193126: fltTcaEqptcapacityMcastUsage1qtrLocalEpPer

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193127: fltTcaEqptcapacityMcastUsage1yearLocalEpPer

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193128: fltTcaEqptcapacityMcastUsage5minLocalEpMin

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193129: fltTcaEqptcapacityMcastUsage15minLocalEpMin

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193130: fltTcaEqptcapacityMcastUsage1hLocalEpMin

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193131: fltTcaEqptcapacityMcastUsage1dLocalEpMin

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193132: fltTcaEqptcapacityMcastUsage1wLocalEpMin

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193133: fltTcaEqptcapacityMcastUsage1moLocalEpMin

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193134: fltTcaEqptcapacityMcastUsage1qtrLocalEpMin

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193135: fltTcaEqptcapacityMcastUsage1yearLocalEpMin

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193136: fltTcaEqptcapacityMcastUsage5minLocalEpMax

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193137: fltTcaEqptcapacityMcastUsage15minLocalEpMax

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193138: fltTcaEqptcapacityMcastUsage1hLocalEpMax

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193139: fltTcaEqptcapacityMcastUsage1dLocalEpMax

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193140: fltTcaEqptcapacityMcastUsage1wLocalEpMax

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193141: fltTcaEqptcapacityMcastUsage1moLocalEpMax

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193142: fltTcaEqptcapacityMcastUsage1qtrLocalEpMax

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193143: fltTcaEqptcapacityMcastUsage1yearLocalEpMax

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193144: fltTcaEqptcapacityMcastUsage5minLocalEpAvg

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193145: fltTcaEqptcapacityMcastUsage15minLocalEpAvg

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193146: fltTcaEqptcapacityMcastUsage1hLocalEpAvg

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193147: fltTcaEqptcapacityMcastUsage1dLocalEpAvg

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193148: fltTcaEqptcapacityMcastUsage1wLocalEpAvg

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193149: fltTcaEqptcapacityMcastUsage1moLocalEpAvg

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193150: fltTcaEqptcapacityMcastUsage1qtrLocalEpAvg

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193151: fltTcaEqptcapacityMcastUsage1yearLocalEpAvg

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193176: fltTcaEqptcapacityMcastUsage5minLocalEpTr

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193177: fltTcaEqptcapacityMcastUsage15minLocalEpTr

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193178: fltTcaEqptcapacityMcastUsage1hLocalEpTr

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193179: fltTcaEqptcapacityMcastUsage1dLocalEpTr

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193180: fltTcaEqptcapacityMcastUsage1wLocalEpTr

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193181: fltTcaEqptcapacityMcastUsage1moLocalEpTr

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193182: fltTcaEqptcapacityMcastUsage1qtrLocalEpTr

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193183: fltTcaEqptcapacityMcastUsage1yearLocalEpTr

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193184: fltTcaEqptcapacityMcastUsage5minLocalEpRate

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193185: fltTcaEqptcapacityMcastUsage15minLocalEpRate

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193186: fltTcaEqptcapacityMcastUsage1hLocalEpRate

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193187: fltTcaEqptcapacityMcastUsage1dLocalEpRate

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193188: fltTcaEqptcapacityMcastUsage1wLocalEpRate

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193189: fltTcaEqptcapacityMcastUsage1moLocalEpRate

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193190: fltTcaEqptcapacityMcastUsage1qtrLocalEpRate

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193191: fltTcaEqptcapacityMcastUsage1yearLocalEpRate

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193264: fltTcaEqptcapacityPolUsage5minPolUsageLast

Severity: variable

Explanation: This fault is caused by "Policy Usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193265: fltTcaEqptcapacityPolUsage15minPolUsageLast

Severity: variable

Explanation: This fault is caused by "Policy Usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193266: fltTcaEqptcapacityPolUsage1hPolUsageLast

Severity: variable

Explanation: This fault is caused by "Policy Usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193267: fltTcaEqptcapacityPolUsage1dPolUsageLast

Severity: variable

Explanation: This fault is caused by "Policy Usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193268: fltTcaEqptcapacityPolUsage1wPolUsageLast

Severity: variable

Explanation: This fault is caused by "Policy Usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193269: fltTcaEqptcapacityPolUsage1moPolUsageLast

Severity: variable

Explanation: This fault is caused by "Policy Usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193270: fltTcaEqptcapacityPolUsage1qtrPolUsageLast

Severity: variable

Explanation: This fault is caused by "Policy Usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193271: fltTcaEqptcapacityPolUsage1yearPolUsageLast

Severity: variable

Explanation: This fault is caused by "Policy Usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193280: fltTcaEqptcapacityPolUsage5minPolUsageCum

Severity: variable

Explanation: This fault is caused by "Policy Usage cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193281: fltTcaEqptcapacityPolUsage15minPolUsageCum

Severity: variable

Explanation: This fault is caused by "Policy Usage cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193282: fltTcaEqptcapacityPolUsage1hPolUsageCum

Severity: variable

Explanation: This fault is caused by "Policy Usage cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193283: fltTcaEqptcapacityPolUsage1dPolUsageCum

Severity: variable

Explanation: This fault is caused by "Policy Usage cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193284: fltTcaEqptcapacityPolUsage1wPolUsageCum

Severity: variable

Explanation: This fault is caused by "Policy Usage cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193285: fltTcaEqptcapacityPolUsage1moPolUsageCum

Severity: variable

Explanation: This fault is caused by "Policy Usage cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193286: fltTcaEqptcapacityPolUsage1qtrPolUsageCum

Severity: variable

Explanation: This fault is caused by "Policy Usage cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193287: fltTcaEqptcapacityPolUsage1yearPolUsageCum

Severity: variable

Explanation: This fault is caused by "Policy Usage cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193288: fltTcaEqptcapacityPolUsage5minPolUsagePer

Severity: variable

Explanation: This fault is caused by "Policy Usage periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193289: fltTcaEqptcapacityPolUsage15minPolUsagePer

Severity: variable

Explanation: This fault is caused by "Policy Usage periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193290: fltTcaEqptcapacityPolUsage1hPolUsagePer

Severity: variable

Explanation: This fault is caused by "Policy Usage periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193291: fltTcaEqptcapacityPolUsage1dPolUsagePer

Severity: variable

Explanation: This fault is caused by "Policy Usage periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193292: fltTcaEqptcapacityPolUsage1wPolUsagePer

Severity: variable

Explanation: This fault is caused by "Policy Usage periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193293: fltTcaEqptcapacityPolUsage1moPolUsagePer

Severity: variable

Explanation: This fault is caused by "Policy Usage periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193294: fltTcaEqptcapacityPolUsage1qtrPolUsagePer

Severity: variable

Explanation: This fault is caused by "Policy Usage periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193295: fltTcaEqptcapacityPolUsage1yearPolUsagePer

Severity: variable

Explanation: This fault is caused by "Policy Usage periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193296: fltTcaEqptcapacityPolUsage5minPolUsageMin

Severity: variable

Explanation: This fault is caused by "Policy Usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193297: fltTcaEqptcapacityPolUsage15minPolUsageMin

Severity: variable

Explanation: This fault is caused by "Policy Usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193298: fltTcaEqptcapacityPolUsage1hPolUsageMin

Severity: variable

Explanation: This fault is caused by "Policy Usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193299: fltTcaEqptcapacityPolUsage1dPolUsageMin

Severity: variable

Explanation: This fault is caused by "Policy Usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193300: fltTcaEqptcapacityPolUsage1wPolUsageMin

Severity: variable

Explanation: This fault is caused by "Policy Usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193301: fltTcaEqptcapacityPolUsage1moPolUsageMin

Severity: variable

Explanation: This fault is caused by "Policy Usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193302: fltTcaEqptcapacityPolUsage1qtrPolUsageMin

Severity: variable

Explanation: This fault is caused by "Policy Usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193303: fltTcaEqptcapacityPolUsage1yearPolUsageMin

Severity: variable

Explanation: This fault is caused by "Policy Usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193304: fltTcaEqptcapacityPolUsage5minPolUsageMax

Severity: variable

Explanation: This fault is caused by "Policy Usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193305: fltTcaEqptcapacityPolUsage15minPolUsageMax

Severity: variable

Explanation: This fault is caused by "Policy Usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193306: fltTcaEqptcapacityPolUsage1hPolUsageMax

Severity: variable

Explanation: This fault is caused by "Policy Usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193307: fltTcaEqptcapacityPolUsage1dPolUsageMax

Severity: variable

Explanation: This fault is caused by "Policy Usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193308: fltTcaEqptcapacityPolUsage1wPolUsageMax

Severity: variable

Explanation: This fault is caused by "Policy Usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193309: fltTcaEqptcapacityPolUsage1moPolUsageMax

Severity: variable

Explanation: This fault is caused by "Policy Usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193310: fltTcaEqptcapacityPolUsage1qtrPolUsageMax

Severity: variable

Explanation: This fault is caused by "Policy Usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193311: fltTcaEqptcapacityPolUsage1yearPolUsageMax

Severity: variable

Explanation: This fault is caused by "Policy Usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193312: fltTcaEqptcapacityPolUsage5minPolUsageAvg

Severity: variable

Explanation: This fault is caused by "Policy Usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193313: fltTcaEqptcapacityPolUsage15minPolUsageAvg

Severity: variable

Explanation: This fault is caused by "Policy Usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193314: fltTcaEqptcapacityPolUsage1hPolUsageAvg

Severity: variable

Explanation: This fault is caused by "Policy Usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193315: fltTcaEqptcapacityPolUsage1dPolUsageAvg

Severity: variable

Explanation: This fault is caused by "Policy Usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193316: fltTcaEqptcapacityPolUsage1wPolUsageAvg

Severity: variable

Explanation: This fault is caused by "Policy Usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193317: fltTcaEqptcapacityPolUsage1moPolUsageAvg

Severity: variable

Explanation: This fault is caused by "Policy Usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193318: fltTcaEqptcapacityPolUsage1qtrPolUsageAvg

Severity: variable

Explanation: This fault is caused by "Policy Usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193319: fltTcaEqptcapacityPolUsage1yearPolUsageAvg

Severity: variable

Explanation: This fault is caused by "Policy Usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193344: fltTcaEqptcapacityPolUsage5minPolUsageTr

Severity: variable

Explanation: This fault is caused by "Policy Usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193345: fltTcaEqptcapacityPolUsage15minPolUsageTr

Severity: variable

Explanation: This fault is caused by "Policy Usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193346: fltTcaEqptcapacityPolUsage1hPolUsageTr

Severity: variable

Explanation: This fault is caused by "Policy Usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193347: fltTcaEqptcapacityPolUsage1dPolUsageTr

Severity: variable

Explanation: This fault is caused by "Policy Usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193348: fltTcaEqptcapacityPolUsage1wPolUsageTr

Severity: variable

Explanation: This fault is caused by "Policy Usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193349: fltTcaEqptcapacityPolUsage1moPolUsageTr

Severity: variable

Explanation: This fault is caused by "Policy Usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193350: fltTcaEqptcapacityPolUsage1qtrPolUsageTr

Severity: variable

Explanation: This fault is caused by "Policy Usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193351: fltTcaEqptcapacityPolUsage1yearPolUsageTr

Severity: variable

Explanation: This fault is caused by "Policy Usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193352: fltTcaEqptcapacityPolUsage5minPolUsageRate

Severity: variable

Explanation: This fault is caused by "Policy Usage rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193353: fltTcaEqptcapacityPolUsage15minPolUsageRate

Severity: variable

Explanation: This fault is caused by "Policy Usage rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193354: fltTcaEqptcapacityPolUsage1hPolUsageRate

Severity: variable

Explanation: This fault is caused by "Policy Usage rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193355: fltTcaEqptcapacityPolUsage1dPolUsageRate

Severity: variable

Explanation: This fault is caused by "Policy Usage rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193356: fltTcaEqptcapacityPolUsage1wPolUsageRate

Severity: variable

Explanation: This fault is caused by "Policy Usage rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193357: fltTcaEqptcapacityPolUsage1moPolUsageRate

Severity: variable

Explanation: This fault is caused by "Policy Usage rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193358: fltTcaEqptcapacityPolUsage1qtrPolUsageRate

Severity: variable

Explanation: This fault is caused by "Policy Usage rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193359: fltTcaEqptcapacityPolUsage1yearPolUsageRate

Severity: variable

Explanation: This fault is caused by "Policy Usage rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193432: fltTcaEqptcapacityRouterIpEntries5minNormalizedLast

Severity: variable

Explanation: This fault is caused by "Router IP (v4 and v6) entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Router IP (v4 and v6) entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193433: fltTcaEqptcapacityRouterIpEntries15minNormalizedLast

Severity: variable

Explanation: This fault is caused by "Router IP (v4 and v6) entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Router IP (v4 and v6) entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193434: fltTcaEqptcapacityRouterIpEntries1hNormalizedLast

Severity: variable

Explanation: This fault is caused by "Router IP (v4 and v6) entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Router IP (v4 and v6) entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193435: fltTcaEqptcapacityRouterIpEntries1dNormalizedLast

Severity: variable

Explanation: This fault is caused by "Router IP (v4 and v6) entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Router IP (v4 and v6) entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193436: fltTcaEqptcapacityRouterIpEntries1wNormalizedLast

Severity: variable

Explanation: This fault is caused by "Router IP (v4 and v6) entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Router IP (v4 and v6) entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193437: fltTcaEqptcapacityRouterIpEntries1moNormalizedLast

Severity: variable

Explanation: This fault is caused by "Router IP (v4 and v6) entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Router IP (v4 and v6) entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193438: fltTcaEqptcapacityRouterIpEntries1qtrNormalizedLast

Severity: variable

Explanation: This fault is caused by "Router IP (v4 and v6) entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Router IP (v4 and v6) entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193439: fltTcaEqptcapacityRouterIpEntries1yearNormalizedLast

Severity: variable

Explanation: This fault is caused by "Router IP (v4 and v6) entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Router IP (v4 and v6) entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193440: fltTcaEqptcapacityRouterIpEntries5minNormalizedMin

Severity: variable

Explanation: This fault is caused by "Router IP (v4 and v6) entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Router IP (v4 and v6) entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193441: fltTcaEqptcapacityRouterIpEntries15minNormalizedMin

Severity: variable

Explanation: This fault is caused by "Router IP (v4 and v6) entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Router IP (v4 and v6) entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193442: fltTcaEqptcapacityRouterIpEntries1hNormalizedMin

Severity: variable

Explanation: This fault is caused by "Router IP (v4 and v6) entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Router IP (v4 and v6) entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193443: fltTcaEqptcapacityRouterIpEntries1dNormalizedMin

Severity: variable

Explanation: This fault is caused by "Router IP (v4 and v6) entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Router IP (v4 and v6) entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193444: fltTcaEqptcapacityRouterIpEntries1wNormalizedMin

Severity: variable

Explanation: This fault is caused by "Router IP (v4 and v6) entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Router IP (v4 and v6) entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193445: fltTcaEqptcapacityRouterIpEntries1moNormalizedMin

Severity: variable

Explanation: This fault is caused by "Router IP (v4 and v6) entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Router IP (v4 and v6) entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193446: fltTcaEqptcapacityRouterIpEntries1qtrNormalizedMin

Severity: variable

Explanation: This fault is caused by "Router IP (v4 and v6) entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Router IP (v4 and v6) entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193447: fltTcaEqptcapacityRouterIpEntries1yearNormalizedMin

Severity: variable

Explanation: This fault is caused by "Router IP (v4 and v6) entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Router IP (v4 and v6) entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193448: fltTcaEqptcapacityRouterIpEntries5minNormalizedMax

Severity: variable

Explanation: This fault is caused by "Router IP (v4 and v6) entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Router IP (v4 and v6) entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193449: fltTcaEqptcapacityRouterIpEntries15minNormalizedMax

Severity: variable

Explanation: This fault is caused by "Router IP (v4 and v6) entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Router IP (v4 and v6) entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193450: fltTcaEqptcapacityRouterIpEntries1hNormalizedMax

Severity: variable

Explanation: This fault is caused by "Router IP (v4 and v6) entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Router IP (v4 and v6) entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193451: fltTcaEqptcapacityRouterIpEntries1dNormalizedMax

Severity: variable

Explanation: This fault is caused by "Router IP (v4 and v6) entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Router IP (v4 and v6) entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193452: fltTcaEqptcapacityRouterIpEntries1wNormalizedMax

Severity: variable

Explanation: This fault is caused by "Router IP (v4 and v6) entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Router IP (v4 and v6) entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193453: fltTcaEqptcapacityRouterIpEntries1moNormalizedMax

Severity: variable

Explanation: This fault is caused by "Router IP (v4 and v6) entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Router IP (v4 and v6) entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193454: fltTcaEqptcapacityRouterIpEntries1qtrNormalizedMax

Severity: variable

Explanation: This fault is caused by "Router IP (v4 and v6) entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Router IP (v4 and v6) entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193455: fltTcaEqptcapacityRouterIpEntries1yearNormalizedMax

Severity: variable

Explanation: This fault is caused by "Router IP (v4 and v6) entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Router IP (v4 and v6) entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193456: fltTcaEqptcapacityRouterIpEntries5minNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Router IP (v4 and v6) entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Router IP (v4 and v6) entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193457: fltTcaEqptcapacityRouterIpEntries15minNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Router IP (v4 and v6) entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Router IP (v4 and v6) entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193458: fltTcaEqptcapacityRouterIpEntries1hNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Router IP (v4 and v6) entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Router IP (v4 and v6) entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193459: fltTcaEqptcapacityRouterIpEntries1dNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Router IP (v4 and v6) entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Router IP (v4 and v6) entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193460: fltTcaEqptcapacityRouterIpEntries1wNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Router IP (v4 and v6) entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Router IP (v4 and v6) entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193461: fltTcaEqptcapacityRouterIpEntries1moNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Router IP (v4 and v6) entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Router IP (v4 and v6) entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193462: fltTcaEqptcapacityRouterIpEntries1qtrNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Router IP (v4 and v6) entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Router IP (v4 and v6) entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193463: fltTcaEqptcapacityRouterIpEntries1yearNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Router IP (v4 and v6) entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Router IP (v4 and v6) entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193496: fltTcaEqptcapacityRouterIpEntries5minNormalizedTr

Severity: variable

Explanation: This fault is caused by "Router IP (v4 and v6) entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Router IP (v4 and v6) entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193497: fltTcaEqptcapacityRouterIpEntries15minNormalizedTr

Severity: variable

Explanation: This fault is caused by "Router IP (v4 and v6) entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Router IP (v4 and v6) entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193498: fltTcaEqptcapacityRouterIpEntries1hNormalizedTr

Severity: variable

Explanation: This fault is caused by "Router IP (v4 and v6) entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Router IP (v4 and v6) entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193499: fltTcaEqptcapacityRouterIpEntries1dNormalizedTr

Severity: variable

Explanation: This fault is caused by "Router IP (v4 and v6) entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Router IP (v4 and v6) entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193500: fltTcaEqptcapacityRouterIpEntries1wNormalizedTr

Severity: variable

Explanation: This fault is caused by "Router IP (v4 and v6) entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Router IP (v4 and v6) entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193501: fltTcaEqptcapacityRouterIpEntries1moNormalizedTr

Severity: variable

Explanation: This fault is caused by "Router IP (v4 and v6) entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Router IP (v4 and v6) entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193502: fltTcaEqptcapacityRouterIpEntries1qtrNormalizedTr

Severity: variable

Explanation: This fault is caused by "Router IP (v4 and v6) entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Router IP (v4 and v6) entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193503: fltTcaEqptcapacityRouterIpEntries1yearNormalizedTr

Severity: variable

Explanation: This fault is caused by "Router IP (v4 and v6) entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Router IP (v4 and v6) entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193552: fltTcaEqptcapacityVlanUsage5minTotalLast

Severity: variable

Explanation: This fault is caused by "Total vlan entries current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193553: fltTcaEqptcapacityVlanUsage15minTotalLast

Severity: variable

Explanation: This fault is caused by "Total vlan entries current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193554: fltTcaEqptcapacityVlanUsage1hTotalLast

Severity: variable

Explanation: This fault is caused by "Total vlan entries current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193555: fltTcaEqptcapacityVlanUsage1dTotalLast

Severity: variable

Explanation: This fault is caused by "Total vlan entries current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193556: fltTcaEqptcapacityVlanUsage1wTotalLast

Severity: variable

Explanation: This fault is caused by "Total vlan entries current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193557: fltTcaEqptcapacityVlanUsage1moTotalLast

Severity: variable

Explanation: This fault is caused by "Total vlan entries current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193558: fltTcaEqptcapacityVlanUsage1qtrTotalLast

Severity: variable

Explanation: This fault is caused by "Total vlan entries current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193559: fltTcaEqptcapacityVlanUsage1yearTotalLast

Severity: variable

Explanation: This fault is caused by "Total vlan entries current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193568: fltTcaEqptcapacityVlanUsage5minTotalCum

Severity: variable

Explanation: This fault is caused by "Total vlan entries cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193569: fltTcaEqptcapacityVlanUsage15minTotalCum

Severity: variable

Explanation: This fault is caused by "Total vlan entries cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193570: fltTcaEqptcapacityVlanUsage1hTotalCum

Severity: variable

Explanation: This fault is caused by "Total vlan entries cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193571: fltTcaEqptcapacityVlanUsage1dTotalCum

Severity: variable

Explanation: This fault is caused by "Total vlan entries cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193572: fltTcaEqptcapacityVlanUsage1wTotalCum

Severity: variable

Explanation: This fault is caused by "Total vlan entries cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193573: fltTcaEqptcapacityVlanUsage1moTotalCum

Severity: variable

Explanation: This fault is caused by "Total vlan entries cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193574: fltTcaEqptcapacityVlanUsage1qtrTotalCum

Severity: variable

Explanation: This fault is caused by "Total vlan entries cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193575: fltTcaEqptcapacityVlanUsage1yearTotalCum

Severity: variable

Explanation: This fault is caused by "Total vlan entries cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193576: fltTcaEqptcapacityVlanUsage5minTotalPer

Severity: variable

Explanation: This fault is caused by "Total vlan entries periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193577: fltTcaEqptcapacityVlanUsage15minTotalPer

Severity: variable

Explanation: This fault is caused by "Total vlan entries periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193578: fltTcaEqptcapacityVlanUsage1hTotalPer

Severity: variable

Explanation: This fault is caused by "Total vlan entries periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193579: fltTcaEqptcapacityVlanUsage1dTotalPer

Severity: variable

Explanation: This fault is caused by "Total vlan entries periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193580: fltTcaEqptcapacityVlanUsage1wTotalPer

Severity: variable

Explanation: This fault is caused by "Total vlan entries periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193581: fltTcaEqptcapacityVlanUsage1moTotalPer

Severity: variable

Explanation: This fault is caused by "Total vlan entries periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193582: fltTcaEqptcapacityVlanUsage1qtrTotalPer

Severity: variable

Explanation: This fault is caused by "Total vlan entries periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193583: fltTcaEqptcapacityVlanUsage1yearTotalPer

Severity: variable

Explanation: This fault is caused by "Total vlan entries periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193584: fltTcaEqptcapacityVlanUsage5minTotalMin

Severity: variable

Explanation: This fault is caused by "Total vlan entries minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193585: fltTcaEqptcapacityVlanUsage15minTotalMin

Severity: variable

Explanation: This fault is caused by "Total vlan entries minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193586: fltTcaEqptcapacityVlanUsage1hTotalMin

Severity: variable

Explanation: This fault is caused by "Total vlan entries minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193587: fltTcaEqptcapacityVlanUsage1dTotalMin

Severity: variable

Explanation: This fault is caused by "Total vlan entries minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193588: fltTcaEqptcapacityVlanUsage1wTotalMin

Severity: variable

Explanation: This fault is caused by "Total vlan entries minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193589: fltTcaEqptcapacityVlanUsage1moTotalMin

Severity: variable

Explanation: This fault is caused by "Total vlan entries minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193590: fltTcaEqptcapacityVlanUsage1qtrTotalMin

Severity: variable

Explanation: This fault is caused by "Total vlan entries minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193591: fltTcaEqptcapacityVlanUsage1yearTotalMin

Severity: variable

Explanation: This fault is caused by "Total vlan entries minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193592: fltTcaEqptcapacityVlanUsage5minTotalMax

Severity: variable

Explanation: This fault is caused by "Total vlan entries maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193593: fltTcaEqptcapacityVlanUsage15minTotalMax

Severity: variable

Explanation: This fault is caused by "Total vlan entries maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193594: fltTcaEqptcapacityVlanUsage1hTotalMax

Severity: variable

Explanation: This fault is caused by "Total vlan entries maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193595: fltTcaEqptcapacityVlanUsage1dTotalMax

Severity: variable

Explanation: This fault is caused by "Total vlan entries maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193596: fltTcaEqptcapacityVlanUsage1wTotalMax

Severity: variable

Explanation: This fault is caused by "Total vlan entries maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193597: fltTcaEqptcapacityVlanUsage1moTotalMax

Severity: variable

Explanation: This fault is caused by "Total vlan entries maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193598: fltTcaEqptcapacityVlanUsage1qtrTotalMax

Severity: variable

Explanation: This fault is caused by "Total vlan entries maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193599: fltTcaEqptcapacityVlanUsage1yearTotalMax

Severity: variable

Explanation: This fault is caused by "Total vlan entries maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193600: fltTcaEqptcapacityVlanUsage5minTotalAvg

Severity: variable

Explanation: This fault is caused by "Total vlan entries average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193601: fltTcaEqptcapacityVlanUsage15minTotalAvg

Severity: variable

Explanation: This fault is caused by "Total vlan entries average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193602: fltTcaEqptcapacityVlanUsage1hTotalAvg

Severity: variable

Explanation: This fault is caused by "Total vlan entries average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193603: fltTcaEqptcapacityVlanUsage1dTotalAvg

Severity: variable

Explanation: This fault is caused by "Total vlan entries average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193604: fltTcaEqptcapacityVlanUsage1wTotalAvg

Severity: variable

Explanation: This fault is caused by "Total vlan entries average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193605: fltTcaEqptcapacityVlanUsage1moTotalAvg

Severity: variable

Explanation: This fault is caused by "Total vlan entries average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193606: fltTcaEqptcapacityVlanUsage1qtrTotalAvg

Severity: variable

Explanation: This fault is caused by "Total vlan entries average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193607: fltTcaEqptcapacityVlanUsage1yearTotalAvg

Severity: variable

Explanation: This fault is caused by "Total vlan entries average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193632: fltTcaEqptcapacityVlanUsage5minTotalTr

Severity: variable

Explanation: This fault is caused by "Total vlan entries trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193633: fltTcaEqptcapacityVlanUsage15minTotalTr

Severity: variable

Explanation: This fault is caused by "Total vlan entries trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193634: fltTcaEqptcapacityVlanUsage1hTotalTr

Severity: variable

Explanation: This fault is caused by "Total vlan entries trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193635: fltTcaEqptcapacityVlanUsage1dTotalTr

Severity: variable

Explanation: This fault is caused by "Total vlan entries trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193636: fltTcaEqptcapacityVlanUsage1wTotalTr

Severity: variable

Explanation: This fault is caused by "Total vlan entries trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193637: fltTcaEqptcapacityVlanUsage1moTotalTr

Severity: variable

Explanation: This fault is caused by "Total vlan entries trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193638: fltTcaEqptcapacityVlanUsage1qtrTotalTr

Severity: variable

Explanation: This fault is caused by "Total vlan entries trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193639: fltTcaEqptcapacityVlanUsage1yearTotalTr

Severity: variable

Explanation: This fault is caused by "Total vlan entries trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193640: fltTcaEqptcapacityVlanUsage5minTotalRate

Severity: variable

Explanation: This fault is caused by "Total vlan entries rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193641: fltTcaEqptcapacityVlanUsage15minTotalRate

Severity: variable

Explanation: This fault is caused by "Total vlan entries rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193642: fltTcaEqptcapacityVlanUsage1hTotalRate

Severity: variable

Explanation: This fault is caused by "Total vlan entries rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193643: fltTcaEqptcapacityVlanUsage1dTotalRate

Severity: variable

Explanation: This fault is caused by "Total vlan entries rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193644: fltTcaEqptcapacityVlanUsage1wTotalRate

Severity: variable

Explanation: This fault is caused by "Total vlan entries rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193645: fltTcaEqptcapacityVlanUsage1moTotalRate

Severity: variable

Explanation: This fault is caused by "Total vlan entries rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193646: fltTcaEqptcapacityVlanUsage1qtrTotalRate

Severity: variable

Explanation: This fault is caused by "Total vlan entries rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F193647: fltTcaEqptcapacityVlanUsage1yearTotalRate

Severity: variable

Explanation: This fault is caused by "Total vlan entries rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total vlan entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1940: fltEqptPsuPsuFailed

Severity: major

Explanation: This fault occurs when the Power Supply Unit is in fail state

Recommended Action: If you see this fault, take the following action:

1. replace the power supply unit that is failed

2. If the above action did not resolve the issue, create a show tech-support file and contact Cisco TAC.

F195136: fltTcaEqptcapacityL3Usage5minV4LocalEpLast

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195137: fltTcaEqptcapacityL3Usage15minV4LocalEpLast

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195138: fltTcaEqptcapacityL3Usage1hV4LocalEpLast

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195139: fltTcaEqptcapacityL3Usage1dV4LocalEpLast

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195140: fltTcaEqptcapacityL3Usage1wV4LocalEpLast

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195141: fltTcaEqptcapacityL3Usage1moV4LocalEpLast

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195142: fltTcaEqptcapacityL3Usage1qtrV4LocalEpLast

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195143: fltTcaEqptcapacityL3Usage1yearV4LocalEpLast

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195168: fltTcaEqptcapacityL3Usage5minV4LocalEpMin

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195169: fltTcaEqptcapacityL3Usage15minV4LocalEpMin

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195170: fltTcaEqptcapacityL3Usage1hV4LocalEpMin

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195171: fltTcaEqptcapacityL3Usage1dV4LocalEpMin

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195172: fltTcaEqptcapacityL3Usage1wV4LocalEpMin

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195173: fltTcaEqptcapacityL3Usage1moV4LocalEpMin

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195174: fltTcaEqptcapacityL3Usage1qtrV4LocalEpMin

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195175: fltTcaEqptcapacityL3Usage1yearV4LocalEpMin

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195176: fltTcaEqptcapacityL3Usage5minV4LocalEpMax

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195177: fltTcaEqptcapacityL3Usage15minV4LocalEpMax

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195178: fltTcaEqptcapacityL3Usage1hV4LocalEpMax

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195179: fltTcaEqptcapacityL3Usage1dV4LocalEpMax

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195180: fltTcaEqptcapacityL3Usage1wV4LocalEpMax

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195181: fltTcaEqptcapacityL3Usage1moV4LocalEpMax

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195182: fltTcaEqptcapacityL3Usage1qtrV4LocalEpMax

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195183: fltTcaEqptcapacityL3Usage1yearV4LocalEpMax

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195184: fltTcaEqptcapacityL3Usage5minV4LocalEpAvg

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195185: fltTcaEqptcapacityL3Usage15minV4LocalEpAvg

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195186: fltTcaEqptcapacityL3Usage1hV4LocalEpAvg

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195187: fltTcaEqptcapacityL3Usage1dV4LocalEpAvg

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195188: fltTcaEqptcapacityL3Usage1wV4LocalEpAvg

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195189: fltTcaEqptcapacityL3Usage1moV4LocalEpAvg

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195190: fltTcaEqptcapacityL3Usage1qtrV4LocalEpAvg

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195191: fltTcaEqptcapacityL3Usage1yearV4LocalEpAvg

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195216: fltTcaEqptcapacityL3Usage5minV4LocalEpTr

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195217: fltTcaEqptcapacityL3Usage15minV4LocalEpTr

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195218: fltTcaEqptcapacityL3Usage1hV4LocalEpTr

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195219: fltTcaEqptcapacityL3Usage1dV4LocalEpTr

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195220: fltTcaEqptcapacityL3Usage1wV4LocalEpTr

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195221: fltTcaEqptcapacityL3Usage1moV4LocalEpTr

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195222: fltTcaEqptcapacityL3Usage1qtrV4LocalEpTr

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195223: fltTcaEqptcapacityL3Usage1yearV4LocalEpTr

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195304: fltTcaEqptcapacityL3Usage5minV6LocalEpLast

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195305: fltTcaEqptcapacityL3Usage15minV6LocalEpLast

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195306: fltTcaEqptcapacityL3Usage1hV6LocalEpLast

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195307: fltTcaEqptcapacityL3Usage1dV6LocalEpLast

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195308: fltTcaEqptcapacityL3Usage1wV6LocalEpLast

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195309: fltTcaEqptcapacityL3Usage1moV6LocalEpLast

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195310: fltTcaEqptcapacityL3Usage1qtrV6LocalEpLast

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195311: fltTcaEqptcapacityL3Usage1yearV6LocalEpLast

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195336: fltTcaEqptcapacityL3Usage5minV6LocalEpMin

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195337: fltTcaEqptcapacityL3Usage15minV6LocalEpMin

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195338: fltTcaEqptcapacityL3Usage1hV6LocalEpMin

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195339: fltTcaEqptcapacityL3Usage1dV6LocalEpMin

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195340: fltTcaEqptcapacityL3Usage1wV6LocalEpMin

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195341: fltTcaEqptcapacityL3Usage1moV6LocalEpMin

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195342: fltTcaEqptcapacityL3Usage1qtrV6LocalEpMin

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195343: fltTcaEqptcapacityL3Usage1yearV6LocalEpMin

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195344: fltTcaEqptcapacityL3Usage5minV6LocalEpMax

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195345: fltTcaEqptcapacityL3Usage15minV6LocalEpMax

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195346: fltTcaEqptcapacityL3Usage1hV6LocalEpMax

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195347: fltTcaEqptcapacityL3Usage1dV6LocalEpMax

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195348: fltTcaEqptcapacityL3Usage1wV6LocalEpMax

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195349: fltTcaEqptcapacityL3Usage1moV6LocalEpMax

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195350: fltTcaEqptcapacityL3Usage1qtrV6LocalEpMax

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195351: fltTcaEqptcapacityL3Usage1yearV6LocalEpMax

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195352: fltTcaEqptcapacityL3Usage5minV6LocalEpAvg

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195353: fltTcaEqptcapacityL3Usage15minV6LocalEpAvg

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195354: fltTcaEqptcapacityL3Usage1hV6LocalEpAvg

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195355: fltTcaEqptcapacityL3Usage1dV6LocalEpAvg

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195356: fltTcaEqptcapacityL3Usage1wV6LocalEpAvg

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195357: fltTcaEqptcapacityL3Usage1moV6LocalEpAvg

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195358: fltTcaEqptcapacityL3Usage1qtrV6LocalEpAvg

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195359: fltTcaEqptcapacityL3Usage1yearV6LocalEpAvg

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195384: fltTcaEqptcapacityL3Usage5minV6LocalEpTr

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195385: fltTcaEqptcapacityL3Usage15minV6LocalEpTr

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195386: fltTcaEqptcapacityL3Usage1hV6LocalEpTr

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195387: fltTcaEqptcapacityL3Usage1dV6LocalEpTr

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195388: fltTcaEqptcapacityL3Usage1wV6LocalEpTr

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195389: fltTcaEqptcapacityL3Usage1moV6LocalEpTr

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195390: fltTcaEqptcapacityL3Usage1qtrV6LocalEpTr

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F195391: fltTcaEqptcapacityL3Usage1yearV6LocalEpTr

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1957: fltInfraIncorrectCntrlSbstStateIncorrectCntrlSbstState

Severity: major

Explanation: This fault occurs when it operator is expected to approve, reject or erase a controller's serial number .

Recommended Action: If you see this fault, take either of the following actions:

1. approve controller's serial number

2. reject controller's serial number

3. erase controller's serial number

F19600: fsmStFailCompCtrlrRemove:UnSubscribeEvents

Severity: warning

Explanation: This fault is raised when Event Unsubscribe Stage fails.

Recommended Action: Please collect tech-support file and contact Cisco TAC

F196568: fltTcaEqptcapacityL2Usage5minLocalEpCapLast

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196569: fltTcaEqptcapacityL2Usage15minLocalEpCapLast

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196570: fltTcaEqptcapacityL2Usage1hLocalEpCapLast

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196571: fltTcaEqptcapacityL2Usage1dLocalEpCapLast

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196572: fltTcaEqptcapacityL2Usage1wLocalEpCapLast

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196573: fltTcaEqptcapacityL2Usage1moLocalEpCapLast

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196574: fltTcaEqptcapacityL2Usage1qtrLocalEpCapLast

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196575: fltTcaEqptcapacityL2Usage1yearLocalEpCapLast

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196600: fltTcaEqptcapacityL2Usage5minLocalEpCapMin

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196601: fltTcaEqptcapacityL2Usage15minLocalEpCapMin

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196602: fltTcaEqptcapacityL2Usage1hLocalEpCapMin

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196603: fltTcaEqptcapacityL2Usage1dLocalEpCapMin

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196604: fltTcaEqptcapacityL2Usage1wLocalEpCapMin

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196605: fltTcaEqptcapacityL2Usage1moLocalEpCapMin

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196606: fltTcaEqptcapacityL2Usage1qtrLocalEpCapMin

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196607: fltTcaEqptcapacityL2Usage1yearLocalEpCapMin

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196608: fltTcaEqptcapacityL2Usage5minLocalEpCapMax

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196609: fltTcaEqptcapacityL2Usage15minLocalEpCapMax

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196610: fltTcaEqptcapacityL2Usage1hLocalEpCapMax

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196611: fltTcaEqptcapacityL2Usage1dLocalEpCapMax

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196612: fltTcaEqptcapacityL2Usage1wLocalEpCapMax

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196613: fltTcaEqptcapacityL2Usage1moLocalEpCapMax

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196614: fltTcaEqptcapacityL2Usage1qtrLocalEpCapMax

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196615: fltTcaEqptcapacityL2Usage1yearLocalEpCapMax

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196616: fltTcaEqptcapacityL2Usage5minLocalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196617: fltTcaEqptcapacityL2Usage15minLocalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196618: fltTcaEqptcapacityL2Usage1hLocalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196619: fltTcaEqptcapacityL2Usage1dLocalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196620: fltTcaEqptcapacityL2Usage1wLocalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196621: fltTcaEqptcapacityL2Usage1moLocalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196622: fltTcaEqptcapacityL2Usage1qtrLocalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196623: fltTcaEqptcapacityL2Usage1yearLocalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196648: fltTcaEqptcapacityL2Usage5minLocalEpCapTr

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196649: fltTcaEqptcapacityL2Usage15minLocalEpCapTr

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196650: fltTcaEqptcapacityL2Usage1hLocalEpCapTr

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196651: fltTcaEqptcapacityL2Usage1dLocalEpCapTr

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196652: fltTcaEqptcapacityL2Usage1wLocalEpCapTr

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196653: fltTcaEqptcapacityL2Usage1moLocalEpCapTr

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196654: fltTcaEqptcapacityL2Usage1qtrLocalEpCapTr

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196655: fltTcaEqptcapacityL2Usage1yearLocalEpCapTr

Severity: variable

Explanation: This fault is caused by "Local L2 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196736: fltTcaEqptcapacityL3UsageCap5minV4LocalEpCapLast

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196737: fltTcaEqptcapacityL3UsageCap15minV4LocalEpCapLast

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196738: fltTcaEqptcapacityL3UsageCap1hV4LocalEpCapLast

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196739: fltTcaEqptcapacityL3UsageCap1dV4LocalEpCapLast

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196740: fltTcaEqptcapacityL3UsageCap1wV4LocalEpCapLast

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196741: fltTcaEqptcapacityL3UsageCap1moV4LocalEpCapLast

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196742: fltTcaEqptcapacityL3UsageCap1qtrV4LocalEpCapLast

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196743: fltTcaEqptcapacityL3UsageCap1yearV4LocalEpCapLast

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196768: fltTcaEqptcapacityL3UsageCap5minV4LocalEpCapMin

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196769: fltTcaEqptcapacityL3UsageCap15minV4LocalEpCapMin

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196770: fltTcaEqptcapacityL3UsageCap1hV4LocalEpCapMin

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196771: fltTcaEqptcapacityL3UsageCap1dV4LocalEpCapMin

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196772: fltTcaEqptcapacityL3UsageCap1wV4LocalEpCapMin

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196773: fltTcaEqptcapacityL3UsageCap1moV4LocalEpCapMin

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196774: fltTcaEqptcapacityL3UsageCap1qtrV4LocalEpCapMin

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196775: fltTcaEqptcapacityL3UsageCap1yearV4LocalEpCapMin

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196776: fltTcaEqptcapacityL3UsageCap5minV4LocalEpCapMax

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196777: fltTcaEqptcapacityL3UsageCap15minV4LocalEpCapMax

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196778: fltTcaEqptcapacityL3UsageCap1hV4LocalEpCapMax

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196779: fltTcaEqptcapacityL3UsageCap1dV4LocalEpCapMax

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196780: fltTcaEqptcapacityL3UsageCap1wV4LocalEpCapMax

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196781: fltTcaEqptcapacityL3UsageCap1moV4LocalEpCapMax

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196782: fltTcaEqptcapacityL3UsageCap1qtrV4LocalEpCapMax

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196783: fltTcaEqptcapacityL3UsageCap1yearV4LocalEpCapMax

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196784: fltTcaEqptcapacityL3UsageCap5minV4LocalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196785: fltTcaEqptcapacityL3UsageCap15minV4LocalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196786: fltTcaEqptcapacityL3UsageCap1hV4LocalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196787: fltTcaEqptcapacityL3UsageCap1dV4LocalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196788: fltTcaEqptcapacityL3UsageCap1wV4LocalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196789: fltTcaEqptcapacityL3UsageCap1moV4LocalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196790: fltTcaEqptcapacityL3UsageCap1qtrV4LocalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196791: fltTcaEqptcapacityL3UsageCap1yearV4LocalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196816: fltTcaEqptcapacityL3UsageCap5minV4LocalEpCapTr

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196817: fltTcaEqptcapacityL3UsageCap15minV4LocalEpCapTr

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196818: fltTcaEqptcapacityL3UsageCap1hV4LocalEpCapTr

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196819: fltTcaEqptcapacityL3UsageCap1dV4LocalEpCapTr

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196820: fltTcaEqptcapacityL3UsageCap1wV4LocalEpCapTr

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196821: fltTcaEqptcapacityL3UsageCap1moV4LocalEpCapTr

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196822: fltTcaEqptcapacityL3UsageCap1qtrV4LocalEpCapTr

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196823: fltTcaEqptcapacityL3UsageCap1yearV4LocalEpCapTr

Severity: variable

Explanation: This fault is caused by "Local v4 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196904: fltTcaEqptcapacityL3UsageCap5minV6LocalEpCapLast

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196905: fltTcaEqptcapacityL3UsageCap15minV6LocalEpCapLast

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196906: fltTcaEqptcapacityL3UsageCap1hV6LocalEpCapLast

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196907: fltTcaEqptcapacityL3UsageCap1dV6LocalEpCapLast

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196908: fltTcaEqptcapacityL3UsageCap1wV6LocalEpCapLast

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196909: fltTcaEqptcapacityL3UsageCap1moV6LocalEpCapLast

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196910: fltTcaEqptcapacityL3UsageCap1qtrV6LocalEpCapLast

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196911: fltTcaEqptcapacityL3UsageCap1yearV6LocalEpCapLast

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196936: fltTcaEqptcapacityL3UsageCap5minV6LocalEpCapMin

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196937: fltTcaEqptcapacityL3UsageCap15minV6LocalEpCapMin

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196938: fltTcaEqptcapacityL3UsageCap1hV6LocalEpCapMin

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196939: fltTcaEqptcapacityL3UsageCap1dV6LocalEpCapMin

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196940: fltTcaEqptcapacityL3UsageCap1wV6LocalEpCapMin

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196941: fltTcaEqptcapacityL3UsageCap1moV6LocalEpCapMin

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196942: fltTcaEqptcapacityL3UsageCap1qtrV6LocalEpCapMin

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196943: fltTcaEqptcapacityL3UsageCap1yearV6LocalEpCapMin

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196944: fltTcaEqptcapacityL3UsageCap5minV6LocalEpCapMax

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196945: fltTcaEqptcapacityL3UsageCap15minV6LocalEpCapMax

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196946: fltTcaEqptcapacityL3UsageCap1hV6LocalEpCapMax

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196947: fltTcaEqptcapacityL3UsageCap1dV6LocalEpCapMax

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196948: fltTcaEqptcapacityL3UsageCap1wV6LocalEpCapMax

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196949: fltTcaEqptcapacityL3UsageCap1moV6LocalEpCapMax

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196950: fltTcaEqptcapacityL3UsageCap1qtrV6LocalEpCapMax

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196951: fltTcaEqptcapacityL3UsageCap1yearV6LocalEpCapMax

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196952: fltTcaEqptcapacityL3UsageCap5minV6LocalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196953: fltTcaEqptcapacityL3UsageCap15minV6LocalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196954: fltTcaEqptcapacityL3UsageCap1hV6LocalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196955: fltTcaEqptcapacityL3UsageCap1dV6LocalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196956: fltTcaEqptcapacityL3UsageCap1wV6LocalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196957: fltTcaEqptcapacityL3UsageCap1moV6LocalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196958: fltTcaEqptcapacityL3UsageCap1qtrV6LocalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196959: fltTcaEqptcapacityL3UsageCap1yearV6LocalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196984: fltTcaEqptcapacityL3UsageCap5minV6LocalEpCapTr

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196985: fltTcaEqptcapacityL3UsageCap15minV6LocalEpCapTr

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196986: fltTcaEqptcapacityL3UsageCap1hV6LocalEpCapTr

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196987: fltTcaEqptcapacityL3UsageCap1dV6LocalEpCapTr

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196988: fltTcaEqptcapacityL3UsageCap1wV6LocalEpCapTr

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196989: fltTcaEqptcapacityL3UsageCap1moV6LocalEpCapTr

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196990: fltTcaEqptcapacityL3UsageCap1qtrV6LocalEpCapTr

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F196991: fltTcaEqptcapacityL3UsageCap1yearV6LocalEpCapTr

Severity: variable

Explanation: This fault is caused by "Local v6 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197072: fltTcaEqptcapacityMcastUsage5minLocalEpCapLast

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197073: fltTcaEqptcapacityMcastUsage15minLocalEpCapLast

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197074: fltTcaEqptcapacityMcastUsage1hLocalEpCapLast

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197075: fltTcaEqptcapacityMcastUsage1dLocalEpCapLast

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197076: fltTcaEqptcapacityMcastUsage1wLocalEpCapLast

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197077: fltTcaEqptcapacityMcastUsage1moLocalEpCapLast

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197078: fltTcaEqptcapacityMcastUsage1qtrLocalEpCapLast

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197079: fltTcaEqptcapacityMcastUsage1yearLocalEpCapLast

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197088: fltTcaEqptcapacityMcastUsage5minLocalEpCapCum

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197089: fltTcaEqptcapacityMcastUsage15minLocalEpCapCum

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197090: fltTcaEqptcapacityMcastUsage1hLocalEpCapCum

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197091: fltTcaEqptcapacityMcastUsage1dLocalEpCapCum

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197092: fltTcaEqptcapacityMcastUsage1wLocalEpCapCum

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197093: fltTcaEqptcapacityMcastUsage1moLocalEpCapCum

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197094: fltTcaEqptcapacityMcastUsage1qtrLocalEpCapCum

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197095: fltTcaEqptcapacityMcastUsage1yearLocalEpCapCum

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197096: fltTcaEqptcapacityMcastUsage5minLocalEpCapPer

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197097: fltTcaEqptcapacityMcastUsage15minLocalEpCapPer

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197098: fltTcaEqptcapacityMcastUsage1hLocalEpCapPer

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197099: fltTcaEqptcapacityMcastUsage1dLocalEpCapPer

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197100: fltTcaEqptcapacityMcastUsage1wLocalEpCapPer

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197101: fltTcaEqptcapacityMcastUsage1moLocalEpCapPer

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197102: fltTcaEqptcapacityMcastUsage1qtrLocalEpCapPer

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197103: fltTcaEqptcapacityMcastUsage1yearLocalEpCapPer

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197104: fltTcaEqptcapacityMcastUsage5minLocalEpCapMin

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197105: fltTcaEqptcapacityMcastUsage15minLocalEpCapMin

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197106: fltTcaEqptcapacityMcastUsage1hLocalEpCapMin

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197107: fltTcaEqptcapacityMcastUsage1dLocalEpCapMin

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197108: fltTcaEqptcapacityMcastUsage1wLocalEpCapMin

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197109: fltTcaEqptcapacityMcastUsage1moLocalEpCapMin

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197110: fltTcaEqptcapacityMcastUsage1qtrLocalEpCapMin

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197111: fltTcaEqptcapacityMcastUsage1yearLocalEpCapMin

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197112: fltTcaEqptcapacityMcastUsage5minLocalEpCapMax

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197113: fltTcaEqptcapacityMcastUsage15minLocalEpCapMax

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197114: fltTcaEqptcapacityMcastUsage1hLocalEpCapMax

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197115: fltTcaEqptcapacityMcastUsage1dLocalEpCapMax

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197116: fltTcaEqptcapacityMcastUsage1wLocalEpCapMax

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197117: fltTcaEqptcapacityMcastUsage1moLocalEpCapMax

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197118: fltTcaEqptcapacityMcastUsage1qtrLocalEpCapMax

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197119: fltTcaEqptcapacityMcastUsage1yearLocalEpCapMax

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197120: fltTcaEqptcapacityMcastUsage5minLocalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197121: fltTcaEqptcapacityMcastUsage15minLocalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197122: fltTcaEqptcapacityMcastUsage1hLocalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197123: fltTcaEqptcapacityMcastUsage1dLocalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197124: fltTcaEqptcapacityMcastUsage1wLocalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197125: fltTcaEqptcapacityMcastUsage1moLocalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197126: fltTcaEqptcapacityMcastUsage1qtrLocalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197127: fltTcaEqptcapacityMcastUsage1yearLocalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197152: fltTcaEqptcapacityMcastUsage5minLocalEpCapTr

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197153: fltTcaEqptcapacityMcastUsage15minLocalEpCapTr

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197154: fltTcaEqptcapacityMcastUsage1hLocalEpCapTr

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197155: fltTcaEqptcapacityMcastUsage1dLocalEpCapTr

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197156: fltTcaEqptcapacityMcastUsage1wLocalEpCapTr

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197157: fltTcaEqptcapacityMcastUsage1moLocalEpCapTr

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197158: fltTcaEqptcapacityMcastUsage1qtrLocalEpCapTr

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197159: fltTcaEqptcapacityMcastUsage1yearLocalEpCapTr

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197160: fltTcaEqptcapacityMcastUsage5minLocalEpCapRate

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197161: fltTcaEqptcapacityMcastUsage15minLocalEpCapRate

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197162: fltTcaEqptcapacityMcastUsage1hLocalEpCapRate

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197163: fltTcaEqptcapacityMcastUsage1dLocalEpCapRate

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197164: fltTcaEqptcapacityMcastUsage1wLocalEpCapRate

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197165: fltTcaEqptcapacityMcastUsage1moLocalEpCapRate

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197166: fltTcaEqptcapacityMcastUsage1qtrLocalEpCapRate

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197167: fltTcaEqptcapacityMcastUsage1yearLocalEpCapRate

Severity: variable

Explanation: This fault is caused by "Local Multicast Endpoints capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197240: fltTcaEqptcapacityPolUsage5minPolUsageCapLast

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197241: fltTcaEqptcapacityPolUsage15minPolUsageCapLast

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197242: fltTcaEqptcapacityPolUsage1hPolUsageCapLast

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197243: fltTcaEqptcapacityPolUsage1dPolUsageCapLast

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197244: fltTcaEqptcapacityPolUsage1wPolUsageCapLast

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197245: fltTcaEqptcapacityPolUsage1moPolUsageCapLast

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197246: fltTcaEqptcapacityPolUsage1qtrPolUsageCapLast

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197247: fltTcaEqptcapacityPolUsage1yearPolUsageCapLast

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197256: fltTcaEqptcapacityPolUsage5minPolUsageCapCum

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197257: fltTcaEqptcapacityPolUsage15minPolUsageCapCum

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197258: fltTcaEqptcapacityPolUsage1hPolUsageCapCum

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197259: fltTcaEqptcapacityPolUsage1dPolUsageCapCum

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197260: fltTcaEqptcapacityPolUsage1wPolUsageCapCum

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197261: fltTcaEqptcapacityPolUsage1moPolUsageCapCum

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197262: fltTcaEqptcapacityPolUsage1qtrPolUsageCapCum

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197263: fltTcaEqptcapacityPolUsage1yearPolUsageCapCum

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197264: fltTcaEqptcapacityPolUsage5minPolUsageCapPer

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197265: fltTcaEqptcapacityPolUsage15minPolUsageCapPer

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197266: fltTcaEqptcapacityPolUsage1hPolUsageCapPer

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197267: fltTcaEqptcapacityPolUsage1dPolUsageCapPer

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197268: fltTcaEqptcapacityPolUsage1wPolUsageCapPer

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197269: fltTcaEqptcapacityPolUsage1moPolUsageCapPer

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197270: fltTcaEqptcapacityPolUsage1qtrPolUsageCapPer

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197271: fltTcaEqptcapacityPolUsage1yearPolUsageCapPer

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197272: fltTcaEqptcapacityPolUsage5minPolUsageCapMin

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197273: fltTcaEqptcapacityPolUsage15minPolUsageCapMin

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197274: fltTcaEqptcapacityPolUsage1hPolUsageCapMin

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197275: fltTcaEqptcapacityPolUsage1dPolUsageCapMin

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197276: fltTcaEqptcapacityPolUsage1wPolUsageCapMin

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197277: fltTcaEqptcapacityPolUsage1moPolUsageCapMin

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197278: fltTcaEqptcapacityPolUsage1qtrPolUsageCapMin

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197279: fltTcaEqptcapacityPolUsage1yearPolUsageCapMin

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197280: fltTcaEqptcapacityPolUsage5minPolUsageCapMax

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197281: fltTcaEqptcapacityPolUsage15minPolUsageCapMax

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197282: fltTcaEqptcapacityPolUsage1hPolUsageCapMax

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197283: fltTcaEqptcapacityPolUsage1dPolUsageCapMax

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197284: fltTcaEqptcapacityPolUsage1wPolUsageCapMax

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197285: fltTcaEqptcapacityPolUsage1moPolUsageCapMax

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197286: fltTcaEqptcapacityPolUsage1qtrPolUsageCapMax

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197287: fltTcaEqptcapacityPolUsage1yearPolUsageCapMax

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197288: fltTcaEqptcapacityPolUsage5minPolUsageCapAvg

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197289: fltTcaEqptcapacityPolUsage15minPolUsageCapAvg

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197290: fltTcaEqptcapacityPolUsage1hPolUsageCapAvg

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197291: fltTcaEqptcapacityPolUsage1dPolUsageCapAvg

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197292: fltTcaEqptcapacityPolUsage1wPolUsageCapAvg

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197293: fltTcaEqptcapacityPolUsage1moPolUsageCapAvg

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197294: fltTcaEqptcapacityPolUsage1qtrPolUsageCapAvg

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197295: fltTcaEqptcapacityPolUsage1yearPolUsageCapAvg

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197320: fltTcaEqptcapacityPolUsage5minPolUsageCapTr

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197321: fltTcaEqptcapacityPolUsage15minPolUsageCapTr

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197322: fltTcaEqptcapacityPolUsage1hPolUsageCapTr

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197323: fltTcaEqptcapacityPolUsage1dPolUsageCapTr

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197324: fltTcaEqptcapacityPolUsage1wPolUsageCapTr

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197325: fltTcaEqptcapacityPolUsage1moPolUsageCapTr

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197326: fltTcaEqptcapacityPolUsage1qtrPolUsageCapTr

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197327: fltTcaEqptcapacityPolUsage1yearPolUsageCapTr

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197328: fltTcaEqptcapacityPolUsage5minPolUsageCapRate

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197329: fltTcaEqptcapacityPolUsage15minPolUsageCapRate

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197330: fltTcaEqptcapacityPolUsage1hPolUsageCapRate

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197331: fltTcaEqptcapacityPolUsage1dPolUsageCapRate

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197332: fltTcaEqptcapacityPolUsage1wPolUsageCapRate

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197333: fltTcaEqptcapacityPolUsage1moPolUsageCapRate

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197334: fltTcaEqptcapacityPolUsage1qtrPolUsageCapRate

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197335: fltTcaEqptcapacityPolUsage1yearPolUsageCapRate

Severity: variable

Explanation: This fault is caused by "Policy Usage capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Policy Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1974: fltMgmtRsInBResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F197408: fltTcaEqptcapacityVlanUsage5minTotalCapLast

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197409: fltTcaEqptcapacityVlanUsage15minTotalCapLast

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197410: fltTcaEqptcapacityVlanUsage1hTotalCapLast

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197411: fltTcaEqptcapacityVlanUsage1dTotalCapLast

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197412: fltTcaEqptcapacityVlanUsage1wTotalCapLast

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197413: fltTcaEqptcapacityVlanUsage1moTotalCapLast

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197414: fltTcaEqptcapacityVlanUsage1qtrTotalCapLast

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197415: fltTcaEqptcapacityVlanUsage1yearTotalCapLast

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197424: fltTcaEqptcapacityVlanUsage5minTotalCapCum

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197425: fltTcaEqptcapacityVlanUsage15minTotalCapCum

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197426: fltTcaEqptcapacityVlanUsage1hTotalCapCum

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197427: fltTcaEqptcapacityVlanUsage1dTotalCapCum

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197428: fltTcaEqptcapacityVlanUsage1wTotalCapCum

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197429: fltTcaEqptcapacityVlanUsage1moTotalCapCum

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197430: fltTcaEqptcapacityVlanUsage1qtrTotalCapCum

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197431: fltTcaEqptcapacityVlanUsage1yearTotalCapCum

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197432: fltTcaEqptcapacityVlanUsage5minTotalCapPer

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197433: fltTcaEqptcapacityVlanUsage15minTotalCapPer

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197434: fltTcaEqptcapacityVlanUsage1hTotalCapPer

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197435: fltTcaEqptcapacityVlanUsage1dTotalCapPer

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197436: fltTcaEqptcapacityVlanUsage1wTotalCapPer

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197437: fltTcaEqptcapacityVlanUsage1moTotalCapPer

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197438: fltTcaEqptcapacityVlanUsage1qtrTotalCapPer

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197439: fltTcaEqptcapacityVlanUsage1yearTotalCapPer

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197440: fltTcaEqptcapacityVlanUsage5minTotalCapMin

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197441: fltTcaEqptcapacityVlanUsage15minTotalCapMin

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197442: fltTcaEqptcapacityVlanUsage1hTotalCapMin

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197443: fltTcaEqptcapacityVlanUsage1dTotalCapMin

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197444: fltTcaEqptcapacityVlanUsage1wTotalCapMin

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197445: fltTcaEqptcapacityVlanUsage1moTotalCapMin

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197446: fltTcaEqptcapacityVlanUsage1qtrTotalCapMin

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197447: fltTcaEqptcapacityVlanUsage1yearTotalCapMin

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197448: fltTcaEqptcapacityVlanUsage5minTotalCapMax

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197449: fltTcaEqptcapacityVlanUsage15minTotalCapMax

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197450: fltTcaEqptcapacityVlanUsage1hTotalCapMax

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197451: fltTcaEqptcapacityVlanUsage1dTotalCapMax

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197452: fltTcaEqptcapacityVlanUsage1wTotalCapMax

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197453: fltTcaEqptcapacityVlanUsage1moTotalCapMax

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197454: fltTcaEqptcapacityVlanUsage1qtrTotalCapMax

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197455: fltTcaEqptcapacityVlanUsage1yearTotalCapMax

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197456: fltTcaEqptcapacityVlanUsage5minTotalCapAvg

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197457: fltTcaEqptcapacityVlanUsage15minTotalCapAvg

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197458: fltTcaEqptcapacityVlanUsage1hTotalCapAvg

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197459: fltTcaEqptcapacityVlanUsage1dTotalCapAvg

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197460: fltTcaEqptcapacityVlanUsage1wTotalCapAvg

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197461: fltTcaEqptcapacityVlanUsage1moTotalCapAvg

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197462: fltTcaEqptcapacityVlanUsage1qtrTotalCapAvg

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197463: fltTcaEqptcapacityVlanUsage1yearTotalCapAvg

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197488: fltTcaEqptcapacityVlanUsage5minTotalCapTr

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197489: fltTcaEqptcapacityVlanUsage15minTotalCapTr

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197490: fltTcaEqptcapacityVlanUsage1hTotalCapTr

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197491: fltTcaEqptcapacityVlanUsage1dTotalCapTr

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197492: fltTcaEqptcapacityVlanUsage1wTotalCapTr

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197493: fltTcaEqptcapacityVlanUsage1moTotalCapTr

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197494: fltTcaEqptcapacityVlanUsage1qtrTotalCapTr

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197495: fltTcaEqptcapacityVlanUsage1yearTotalCapTr

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197496: fltTcaEqptcapacityVlanUsage5minTotalCapRate

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197497: fltTcaEqptcapacityVlanUsage15minTotalCapRate

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197498: fltTcaEqptcapacityVlanUsage1hTotalCapRate

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197499: fltTcaEqptcapacityVlanUsage1dTotalCapRate

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1975: fltMgmtRsOoBResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F197500: fltTcaEqptcapacityVlanUsage1wTotalCapRate

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197501: fltTcaEqptcapacityVlanUsage1moTotalCapRate

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197502: fltTcaEqptcapacityVlanUsage1qtrTotalCapRate

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F197503: fltTcaEqptcapacityVlanUsage1yearTotalCapRate

Severity: variable

Explanation: This fault is caused by "Vlan entries capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1976: fltVnsDevConfIssueConfIssue

Severity: minor

Explanation: This fault occurs when there is incomplete or incorrect configuration, intermittent system errors.

Recommended Action: If you see this fault, take the following actions:

1. Look at the configuration for issues. Refer to the help on (vns:ConfIssue:issue) property for error explanantion

2. Verify the configuration is correct and complete to resolve configuration related issues.

3. The system should automatically recover from intermittent system errors and no action needs to be taken here.

4. If the issue persists, create a tech-support file and contact Cisco TAC.

F1991: fltInfraRsBfdIpv4InstPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F199144: fltTcaEqptcapacityPrefixEntries5minExtNormalizedLast

Severity: variable

Explanation: This fault is caused by "External Subnet (v4 and v6) prefix entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199145: fltTcaEqptcapacityPrefixEntries15minExtNormalizedLast

Severity: variable

Explanation: This fault is caused by "External Subnet (v4 and v6) prefix entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199146: fltTcaEqptcapacityPrefixEntries1hExtNormalizedLast

Severity: variable

Explanation: This fault is caused by "External Subnet (v4 and v6) prefix entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199147: fltTcaEqptcapacityPrefixEntries1dExtNormalizedLast

Severity: variable

Explanation: This fault is caused by "External Subnet (v4 and v6) prefix entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199148: fltTcaEqptcapacityPrefixEntries1wExtNormalizedLast

Severity: variable

Explanation: This fault is caused by "External Subnet (v4 and v6) prefix entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199149: fltTcaEqptcapacityPrefixEntries1moExtNormalizedLast

Severity: variable

Explanation: This fault is caused by "External Subnet (v4 and v6) prefix entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199150: fltTcaEqptcapacityPrefixEntries1qtrExtNormalizedLast

Severity: variable

Explanation: This fault is caused by "External Subnet (v4 and v6) prefix entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199151: fltTcaEqptcapacityPrefixEntries1yearExtNormalizedLast

Severity: variable

Explanation: This fault is caused by "External Subnet (v4 and v6) prefix entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199152: fltTcaEqptcapacityPrefixEntries5minExtNormalizedMin

Severity: variable

Explanation: This fault is caused by "External Subnet (v4 and v6) prefix entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199153: fltTcaEqptcapacityPrefixEntries15minExtNormalizedMin

Severity: variable

Explanation: This fault is caused by "External Subnet (v4 and v6) prefix entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199154: fltTcaEqptcapacityPrefixEntries1hExtNormalizedMin

Severity: variable

Explanation: This fault is caused by "External Subnet (v4 and v6) prefix entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199155: fltTcaEqptcapacityPrefixEntries1dExtNormalizedMin

Severity: variable

Explanation: This fault is caused by "External Subnet (v4 and v6) prefix entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199156: fltTcaEqptcapacityPrefixEntries1wExtNormalizedMin

Severity: variable

Explanation: This fault is caused by "External Subnet (v4 and v6) prefix entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199157: fltTcaEqptcapacityPrefixEntries1moExtNormalizedMin

Severity: variable

Explanation: This fault is caused by "External Subnet (v4 and v6) prefix entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199158: fltTcaEqptcapacityPrefixEntries1qtrExtNormalizedMin

Severity: variable

Explanation: This fault is caused by "External Subnet (v4 and v6) prefix entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199159: fltTcaEqptcapacityPrefixEntries1yearExtNormalizedMin

Severity: variable

Explanation: This fault is caused by "External Subnet (v4 and v6) prefix entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199160: fltTcaEqptcapacityPrefixEntries5minExtNormalizedMax

Severity: variable

Explanation: This fault is caused by "External Subnet (v4 and v6) prefix entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199161: fltTcaEqptcapacityPrefixEntries15minExtNormalizedMax

Severity: variable

Explanation: This fault is caused by "External Subnet (v4 and v6) prefix entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199162: fltTcaEqptcapacityPrefixEntries1hExtNormalizedMax

Severity: variable

Explanation: This fault is caused by "External Subnet (v4 and v6) prefix entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199163: fltTcaEqptcapacityPrefixEntries1dExtNormalizedMax

Severity: variable

Explanation: This fault is caused by "External Subnet (v4 and v6) prefix entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199164: fltTcaEqptcapacityPrefixEntries1wExtNormalizedMax

Severity: variable

Explanation: This fault is caused by "External Subnet (v4 and v6) prefix entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199165: fltTcaEqptcapacityPrefixEntries1moExtNormalizedMax

Severity: variable

Explanation: This fault is caused by "External Subnet (v4 and v6) prefix entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199166: fltTcaEqptcapacityPrefixEntries1qtrExtNormalizedMax

Severity: variable

Explanation: This fault is caused by "External Subnet (v4 and v6) prefix entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199167: fltTcaEqptcapacityPrefixEntries1yearExtNormalizedMax

Severity: variable

Explanation: This fault is caused by "External Subnet (v4 and v6) prefix entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199168: fltTcaEqptcapacityPrefixEntries5minExtNormalizedAvg

Severity: variable

Explanation: This fault is caused by "External Subnet (v4 and v6) prefix entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199169: fltTcaEqptcapacityPrefixEntries15minExtNormalizedAvg

Severity: variable

Explanation: This fault is caused by "External Subnet (v4 and v6) prefix entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199170: fltTcaEqptcapacityPrefixEntries1hExtNormalizedAvg

Severity: variable

Explanation: This fault is caused by "External Subnet (v4 and v6) prefix entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199171: fltTcaEqptcapacityPrefixEntries1dExtNormalizedAvg

Severity: variable

Explanation: This fault is caused by "External Subnet (v4 and v6) prefix entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199172: fltTcaEqptcapacityPrefixEntries1wExtNormalizedAvg

Severity: variable

Explanation: This fault is caused by "External Subnet (v4 and v6) prefix entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199173: fltTcaEqptcapacityPrefixEntries1moExtNormalizedAvg

Severity: variable

Explanation: This fault is caused by "External Subnet (v4 and v6) prefix entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199174: fltTcaEqptcapacityPrefixEntries1qtrExtNormalizedAvg

Severity: variable

Explanation: This fault is caused by "External Subnet (v4 and v6) prefix entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199175: fltTcaEqptcapacityPrefixEntries1yearExtNormalizedAvg

Severity: variable

Explanation: This fault is caused by "External Subnet (v4 and v6) prefix entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1992: fltInfraRsBfdIpv6InstPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F199208: fltTcaEqptcapacityPrefixEntries5minExtNormalizedTr

Severity: variable

Explanation: This fault is caused by "External Subnet (v4 and v6) prefix entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199209: fltTcaEqptcapacityPrefixEntries15minExtNormalizedTr

Severity: variable

Explanation: This fault is caused by "External Subnet (v4 and v6) prefix entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199210: fltTcaEqptcapacityPrefixEntries1hExtNormalizedTr

Severity: variable

Explanation: This fault is caused by "External Subnet (v4 and v6) prefix entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199211: fltTcaEqptcapacityPrefixEntries1dExtNormalizedTr

Severity: variable

Explanation: This fault is caused by "External Subnet (v4 and v6) prefix entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199212: fltTcaEqptcapacityPrefixEntries1wExtNormalizedTr

Severity: variable

Explanation: This fault is caused by "External Subnet (v4 and v6) prefix entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199213: fltTcaEqptcapacityPrefixEntries1moExtNormalizedTr

Severity: variable

Explanation: This fault is caused by "External Subnet (v4 and v6) prefix entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199214: fltTcaEqptcapacityPrefixEntries1qtrExtNormalizedTr

Severity: variable

Explanation: This fault is caused by "External Subnet (v4 and v6) prefix entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199215: fltTcaEqptcapacityPrefixEntries1yearExtNormalizedTr

Severity: variable

Explanation: This fault is caused by "External Subnet (v4 and v6) prefix entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199264: fltTcaEqptcapacityPrefixEntries5minFabNormalizedLast

Severity: variable

Explanation: This fault is caused by "Fabric Subnet (v4 and v6) prefix entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fabric Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199265: fltTcaEqptcapacityPrefixEntries15minFabNormalizedLast

Severity: variable

Explanation: This fault is caused by "Fabric Subnet (v4 and v6) prefix entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fabric Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199266: fltTcaEqptcapacityPrefixEntries1hFabNormalizedLast

Severity: variable

Explanation: This fault is caused by "Fabric Subnet (v4 and v6) prefix entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fabric Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199267: fltTcaEqptcapacityPrefixEntries1dFabNormalizedLast

Severity: variable

Explanation: This fault is caused by "Fabric Subnet (v4 and v6) prefix entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fabric Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199268: fltTcaEqptcapacityPrefixEntries1wFabNormalizedLast

Severity: variable

Explanation: This fault is caused by "Fabric Subnet (v4 and v6) prefix entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fabric Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199269: fltTcaEqptcapacityPrefixEntries1moFabNormalizedLast

Severity: variable

Explanation: This fault is caused by "Fabric Subnet (v4 and v6) prefix entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fabric Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199270: fltTcaEqptcapacityPrefixEntries1qtrFabNormalizedLast

Severity: variable

Explanation: This fault is caused by "Fabric Subnet (v4 and v6) prefix entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fabric Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199271: fltTcaEqptcapacityPrefixEntries1yearFabNormalizedLast

Severity: variable

Explanation: This fault is caused by "Fabric Subnet (v4 and v6) prefix entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fabric Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199272: fltTcaEqptcapacityPrefixEntries5minFabNormalizedMin

Severity: variable

Explanation: This fault is caused by "Fabric Subnet (v4 and v6) prefix entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fabric Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199273: fltTcaEqptcapacityPrefixEntries15minFabNormalizedMin

Severity: variable

Explanation: This fault is caused by "Fabric Subnet (v4 and v6) prefix entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fabric Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199274: fltTcaEqptcapacityPrefixEntries1hFabNormalizedMin

Severity: variable

Explanation: This fault is caused by "Fabric Subnet (v4 and v6) prefix entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fabric Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199275: fltTcaEqptcapacityPrefixEntries1dFabNormalizedMin

Severity: variable

Explanation: This fault is caused by "Fabric Subnet (v4 and v6) prefix entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fabric Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199276: fltTcaEqptcapacityPrefixEntries1wFabNormalizedMin

Severity: variable

Explanation: This fault is caused by "Fabric Subnet (v4 and v6) prefix entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fabric Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199277: fltTcaEqptcapacityPrefixEntries1moFabNormalizedMin

Severity: variable

Explanation: This fault is caused by "Fabric Subnet (v4 and v6) prefix entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fabric Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199278: fltTcaEqptcapacityPrefixEntries1qtrFabNormalizedMin

Severity: variable

Explanation: This fault is caused by "Fabric Subnet (v4 and v6) prefix entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fabric Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199279: fltTcaEqptcapacityPrefixEntries1yearFabNormalizedMin

Severity: variable

Explanation: This fault is caused by "Fabric Subnet (v4 and v6) prefix entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fabric Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199280: fltTcaEqptcapacityPrefixEntries5minFabNormalizedMax

Severity: variable

Explanation: This fault is caused by "Fabric Subnet (v4 and v6) prefix entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fabric Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199281: fltTcaEqptcapacityPrefixEntries15minFabNormalizedMax

Severity: variable

Explanation: This fault is caused by "Fabric Subnet (v4 and v6) prefix entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fabric Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199282: fltTcaEqptcapacityPrefixEntries1hFabNormalizedMax

Severity: variable

Explanation: This fault is caused by "Fabric Subnet (v4 and v6) prefix entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fabric Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199283: fltTcaEqptcapacityPrefixEntries1dFabNormalizedMax

Severity: variable

Explanation: This fault is caused by "Fabric Subnet (v4 and v6) prefix entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fabric Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199284: fltTcaEqptcapacityPrefixEntries1wFabNormalizedMax

Severity: variable

Explanation: This fault is caused by "Fabric Subnet (v4 and v6) prefix entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fabric Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199285: fltTcaEqptcapacityPrefixEntries1moFabNormalizedMax

Severity: variable

Explanation: This fault is caused by "Fabric Subnet (v4 and v6) prefix entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fabric Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199286: fltTcaEqptcapacityPrefixEntries1qtrFabNormalizedMax

Severity: variable

Explanation: This fault is caused by "Fabric Subnet (v4 and v6) prefix entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fabric Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199287: fltTcaEqptcapacityPrefixEntries1yearFabNormalizedMax

Severity: variable

Explanation: This fault is caused by "Fabric Subnet (v4 and v6) prefix entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fabric Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199288: fltTcaEqptcapacityPrefixEntries5minFabNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Fabric Subnet (v4 and v6) prefix entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fabric Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199289: fltTcaEqptcapacityPrefixEntries15minFabNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Fabric Subnet (v4 and v6) prefix entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fabric Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199290: fltTcaEqptcapacityPrefixEntries1hFabNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Fabric Subnet (v4 and v6) prefix entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fabric Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199291: fltTcaEqptcapacityPrefixEntries1dFabNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Fabric Subnet (v4 and v6) prefix entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fabric Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199292: fltTcaEqptcapacityPrefixEntries1wFabNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Fabric Subnet (v4 and v6) prefix entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fabric Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199293: fltTcaEqptcapacityPrefixEntries1moFabNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Fabric Subnet (v4 and v6) prefix entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fabric Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199294: fltTcaEqptcapacityPrefixEntries1qtrFabNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Fabric Subnet (v4 and v6) prefix entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fabric Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199295: fltTcaEqptcapacityPrefixEntries1yearFabNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Fabric Subnet (v4 and v6) prefix entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fabric Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1993: fltInfrazoneRsToNodeGrpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F199328: fltTcaEqptcapacityPrefixEntries5minFabNormalizedTr

Severity: variable

Explanation: This fault is caused by "Fabric Subnet (v4 and v6) prefix entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Fabric Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199329: fltTcaEqptcapacityPrefixEntries15minFabNormalizedTr

Severity: variable

Explanation: This fault is caused by "Fabric Subnet (v4 and v6) prefix entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Fabric Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199330: fltTcaEqptcapacityPrefixEntries1hFabNormalizedTr

Severity: variable

Explanation: This fault is caused by "Fabric Subnet (v4 and v6) prefix entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Fabric Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199331: fltTcaEqptcapacityPrefixEntries1dFabNormalizedTr

Severity: variable

Explanation: This fault is caused by "Fabric Subnet (v4 and v6) prefix entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Fabric Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199332: fltTcaEqptcapacityPrefixEntries1wFabNormalizedTr

Severity: variable

Explanation: This fault is caused by "Fabric Subnet (v4 and v6) prefix entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Fabric Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199333: fltTcaEqptcapacityPrefixEntries1moFabNormalizedTr

Severity: variable

Explanation: This fault is caused by "Fabric Subnet (v4 and v6) prefix entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Fabric Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199334: fltTcaEqptcapacityPrefixEntries1qtrFabNormalizedTr

Severity: variable

Explanation: This fault is caused by "Fabric Subnet (v4 and v6) prefix entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Fabric Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F199335: fltTcaEqptcapacityPrefixEntries1yearFabNormalizedTr

Severity: variable

Explanation: This fault is caused by "Fabric Subnet (v4 and v6) prefix entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Fabric Subnet (v4 and v6) prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F1999: fltPlannerRsAzureDomainTmplResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

Chapter 6. ACI F2x Messages

- ACI F2* Commands

ACI F2* Commands

F2000: fltPlannerRsAzureDomainLabelResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2001: fltPlannerRsVmwareDomainTmplResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2002: fltPlannerRsVmwareDomainLabelResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F200304: fltTcaEqptcapacityVlanXlateEntries5minNormalizedLast

Severity: variable

Explanation: This fault is caused by "Vlan Xlate Entries Usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan Xlate Entries Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F200305: fltTcaEqptcapacityVlanXlateEntries15minNormalizedLast

Severity: variable

Explanation: This fault is caused by "Vlan Xlate Entries Usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan Xlate Entries Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F200306: fltTcaEqptcapacityVlanXlateEntries1hNormalizedLast

Severity: variable

Explanation: This fault is caused by "Vlan Xlate Entries Usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan Xlate Entries Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F200307: fltTcaEqptcapacityVlanXlateEntries1dNormalizedLast

Severity: variable

Explanation: This fault is caused by "Vlan Xlate Entries Usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan Xlate Entries Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F200308: fltTcaEqptcapacityVlanXlateEntries1wNormalizedLast

Severity: variable

Explanation: This fault is caused by "Vlan Xlate Entries Usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan Xlate Entries Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F200309: fltTcaEqptcapacityVlanXlateEntries1moNormalizedLast

Severity: variable

Explanation: This fault is caused by "Vlan Xlate Entries Usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan Xlate Entries Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F200310: fltTcaEqptcapacityVlanXlateEntries1qtrNormalizedLast

Severity: variable

Explanation: This fault is caused by "Vlan Xlate Entries Usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan Xlate Entries Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F200311: fltTcaEqptcapacityVlanXlateEntries1yearNormalizedLast

Severity: variable

Explanation: This fault is caused by "Vlan Xlate Entries Usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan Xlate Entries Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F200312: fltTcaEqptcapacityVlanXlateEntries5minNormalizedMin

Severity: variable

Explanation: This fault is caused by "Vlan Xlate Entries Usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan Xlate Entries Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F200313: fltTcaEqptcapacityVlanXlateEntries15minNormalizedMin

Severity: variable

Explanation: This fault is caused by "Vlan Xlate Entries Usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan Xlate Entries Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F200314: fltTcaEqptcapacityVlanXlateEntries1hNormalizedMin

Severity: variable

Explanation: This fault is caused by "Vlan Xlate Entries Usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan Xlate Entries Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F200315: fltTcaEqptcapacityVlanXlateEntries1dNormalizedMin

Severity: variable

Explanation: This fault is caused by "Vlan Xlate Entries Usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan Xlate Entries Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F200316: fltTcaEqptcapacityVlanXlateEntries1wNormalizedMin

Severity: variable

Explanation: This fault is caused by "Vlan Xlate Entries Usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan Xlate Entries Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F200317: fltTcaEqptcapacityVlanXlateEntries1moNormalizedMin

Severity: variable

Explanation: This fault is caused by "Vlan Xlate Entries Usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan Xlate Entries Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F200318: fltTcaEqptcapacityVlanXlateEntries1qtrNormalizedMin

Severity: variable

Explanation: This fault is caused by "Vlan Xlate Entries Usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan Xlate Entries Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F200319: fltTcaEqptcapacityVlanXlateEntries1yearNormalizedMin

Severity: variable

Explanation: This fault is caused by "Vlan Xlate Entries Usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan Xlate Entries Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F200320: fltTcaEqptcapacityVlanXlateEntries5minNormalizedMax

Severity: variable

Explanation: This fault is caused by "Vlan Xlate Entries Usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan Xlate Entries Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F200321: fltTcaEqptcapacityVlanXlateEntries15minNormalizedMax

Severity: variable

Explanation: This fault is caused by "Vlan Xlate Entries Usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan Xlate Entries Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F200322: fltTcaEqptcapacityVlanXlateEntries1hNormalizedMax

Severity: variable

Explanation: This fault is caused by "Vlan Xlate Entries Usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan Xlate Entries Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F200323: fltTcaEqptcapacityVlanXlateEntries1dNormalizedMax

Severity: variable

Explanation: This fault is caused by "Vlan Xlate Entries Usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan Xlate Entries Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F200324: fltTcaEqptcapacityVlanXlateEntries1wNormalizedMax

Severity: variable

Explanation: This fault is caused by "Vlan Xlate Entries Usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan Xlate Entries Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F200325: fltTcaEqptcapacityVlanXlateEntries1moNormalizedMax

Severity: variable

Explanation: This fault is caused by "Vlan Xlate Entries Usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan Xlate Entries Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F200326: fltTcaEqptcapacityVlanXlateEntries1qtrNormalizedMax

Severity: variable

Explanation: This fault is caused by "Vlan Xlate Entries Usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan Xlate Entries Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F200327: fltTcaEqptcapacityVlanXlateEntries1yearNormalizedMax

Severity: variable

Explanation: This fault is caused by "Vlan Xlate Entries Usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan Xlate Entries Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F200328: fltTcaEqptcapacityVlanXlateEntries5minNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Vlan Xlate Entries Usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan Xlate Entries Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F200329: fltTcaEqptcapacityVlanXlateEntries15minNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Vlan Xlate Entries Usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan Xlate Entries Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F200330: fltTcaEqptcapacityVlanXlateEntries1hNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Vlan Xlate Entries Usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan Xlate Entries Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F200331: fltTcaEqptcapacityVlanXlateEntries1dNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Vlan Xlate Entries Usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan Xlate Entries Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F200332: fltTcaEqptcapacityVlanXlateEntries1wNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Vlan Xlate Entries Usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan Xlate Entries Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F200333: fltTcaEqptcapacityVlanXlateEntries1moNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Vlan Xlate Entries Usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan Xlate Entries Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F200334: fltTcaEqptcapacityVlanXlateEntries1qtrNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Vlan Xlate Entries Usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan Xlate Entries Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F200335: fltTcaEqptcapacityVlanXlateEntries1yearNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Vlan Xlate Entries Usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan Xlate Entries Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F200368: fltTcaEqptcapacityVlanXlateEntries5minNormalizedTr

Severity: variable

Explanation: This fault is caused by "Vlan Xlate Entries Usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan Xlate Entries Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F200369: fltTcaEqptcapacityVlanXlateEntries15minNormalizedTr

Severity: variable

Explanation: This fault is caused by "Vlan Xlate Entries Usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan Xlate Entries Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F200370: fltTcaEqptcapacityVlanXlateEntries1hNormalizedTr

Severity: variable

Explanation: This fault is caused by "Vlan Xlate Entries Usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan Xlate Entries Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F200371: fltTcaEqptcapacityVlanXlateEntries1dNormalizedTr

Severity: variable

Explanation: This fault is caused by "Vlan Xlate Entries Usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan Xlate Entries Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F200372: fltTcaEqptcapacityVlanXlateEntries1wNormalizedTr

Severity: variable

Explanation: This fault is caused by "Vlan Xlate Entries Usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan Xlate Entries Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F200373: fltTcaEqptcapacityVlanXlateEntries1moNormalizedTr

Severity: variable

Explanation: This fault is caused by "Vlan Xlate Entries Usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan Xlate Entries Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F200374: fltTcaEqptcapacityVlanXlateEntries1qtrNormalizedTr

Severity: variable

Explanation: This fault is caused by "Vlan Xlate Entries Usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan Xlate Entries Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F200375: fltTcaEqptcapacityVlanXlateEntries1yearNormalizedTr

Severity: variable

Explanation: This fault is caused by "Vlan Xlate Entries Usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Vlan Xlate Entries Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2008: fltDppClassOperStFailed

Severity: major

Explanation: This fault occurs when DPP manager fails to activate a class due to hardware programming failure

Recommended Action: To recover from this fault, try the following actions

1. Look at any configuration issues

2. Verify the configuration is correct/complete

3. Delete the DPP class and add it back

4. If the above actions did not resolve the issue, try rebooting the switch using CLI or GUI.

5. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F2009: fltInfraRsQosDppIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2011: fltVmmRsVswitchOverrideCdpIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2012: fltVmmRsVswitchOverrideFwPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2013: fltVmmRsVswitchOverrideLacpPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2014: fltVmmRsVswitchOverrideLldpIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2015: fltVmmRsVswitchOverrideMcpIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2016: fltVmmRsVswitchOverrideStpPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2031: fltDbgacRsContextResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2041: fltInfraRsQosEgressDppIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2042: fltInfraRsQosIngressDppIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2043: fltL3extRsEgressQosDppPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2044: fltL3extRsIngressQosDppPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2060: fltVnsRsAbsCopyConnectionResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F206120: fltTcaL2EgrBytes5minMulticastLast

Severity: variable

Explanation: This fault is caused by "egress multicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206121: fltTcaL2EgrBytes15minMulticastLast

Severity: variable

Explanation: This fault is caused by "egress multicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206122: fltTcaL2EgrBytes1hMulticastLast

Severity: variable

Explanation: This fault is caused by "egress multicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206123: fltTcaL2EgrBytes1dMulticastLast

Severity: variable

Explanation: This fault is caused by "egress multicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206124: fltTcaL2EgrBytes1wMulticastLast

Severity: variable

Explanation: This fault is caused by "egress multicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206125: fltTcaL2EgrBytes1moMulticastLast

Severity: variable

Explanation: This fault is caused by "egress multicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206126: fltTcaL2EgrBytes1qtrMulticastLast

Severity: variable

Explanation: This fault is caused by "egress multicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206127: fltTcaL2EgrBytes1yearMulticastLast

Severity: variable

Explanation: This fault is caused by "egress multicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206136: fltTcaL2EgrBytes5minMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206137: fltTcaL2EgrBytes15minMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206138: fltTcaL2EgrBytes1hMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206139: fltTcaL2EgrBytes1dMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206140: fltTcaL2EgrBytes1wMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206141: fltTcaL2EgrBytes1moMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206142: fltTcaL2EgrBytes1qtrMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206143: fltTcaL2EgrBytes1yearMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206144: fltTcaL2EgrBytes5minMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206145: fltTcaL2EgrBytes15minMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206146: fltTcaL2EgrBytes1hMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206147: fltTcaL2EgrBytes1dMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206148: fltTcaL2EgrBytes1wMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206149: fltTcaL2EgrBytes1moMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206150: fltTcaL2EgrBytes1qtrMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206151: fltTcaL2EgrBytes1yearMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206152: fltTcaL2EgrBytes5minMulticastMin

Severity: variable

Explanation: This fault is caused by "egress multicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206153: fltTcaL2EgrBytes15minMulticastMin

Severity: variable

Explanation: This fault is caused by "egress multicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206154: fltTcaL2EgrBytes1hMulticastMin

Severity: variable

Explanation: This fault is caused by "egress multicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206155: fltTcaL2EgrBytes1dMulticastMin

Severity: variable

Explanation: This fault is caused by "egress multicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206156: fltTcaL2EgrBytes1wMulticastMin

Severity: variable

Explanation: This fault is caused by "egress multicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206157: fltTcaL2EgrBytes1moMulticastMin

Severity: variable

Explanation: This fault is caused by "egress multicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206158: fltTcaL2EgrBytes1qtrMulticastMin

Severity: variable

Explanation: This fault is caused by "egress multicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206159: fltTcaL2EgrBytes1yearMulticastMin

Severity: variable

Explanation: This fault is caused by "egress multicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206160: fltTcaL2EgrBytes5minMulticastMax

Severity: variable

Explanation: This fault is caused by "egress multicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206161: fltTcaL2EgrBytes15minMulticastMax

Severity: variable

Explanation: This fault is caused by "egress multicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206162: fltTcaL2EgrBytes1hMulticastMax

Severity: variable

Explanation: This fault is caused by "egress multicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206163: fltTcaL2EgrBytes1dMulticastMax

Severity: variable

Explanation: This fault is caused by "egress multicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206164: fltTcaL2EgrBytes1wMulticastMax

Severity: variable

Explanation: This fault is caused by "egress multicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206165: fltTcaL2EgrBytes1moMulticastMax

Severity: variable

Explanation: This fault is caused by "egress multicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206166: fltTcaL2EgrBytes1qtrMulticastMax

Severity: variable

Explanation: This fault is caused by "egress multicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206167: fltTcaL2EgrBytes1yearMulticastMax

Severity: variable

Explanation: This fault is caused by "egress multicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206168: fltTcaL2EgrBytes5minMulticastAvg

Severity: variable

Explanation: This fault is caused by "egress multicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206169: fltTcaL2EgrBytes15minMulticastAvg

Severity: variable

Explanation: This fault is caused by "egress multicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206170: fltTcaL2EgrBytes1hMulticastAvg

Severity: variable

Explanation: This fault is caused by "egress multicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206171: fltTcaL2EgrBytes1dMulticastAvg

Severity: variable

Explanation: This fault is caused by "egress multicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206172: fltTcaL2EgrBytes1wMulticastAvg

Severity: variable

Explanation: This fault is caused by "egress multicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206173: fltTcaL2EgrBytes1moMulticastAvg

Severity: variable

Explanation: This fault is caused by "egress multicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206174: fltTcaL2EgrBytes1qtrMulticastAvg

Severity: variable

Explanation: This fault is caused by "egress multicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206175: fltTcaL2EgrBytes1yearMulticastAvg

Severity: variable

Explanation: This fault is caused by "egress multicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206200: fltTcaL2EgrBytes5minMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206201: fltTcaL2EgrBytes15minMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206202: fltTcaL2EgrBytes1hMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206203: fltTcaL2EgrBytes1dMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206204: fltTcaL2EgrBytes1wMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206205: fltTcaL2EgrBytes1moMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206206: fltTcaL2EgrBytes1qtrMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206207: fltTcaL2EgrBytes1yearMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206208: fltTcaL2EgrBytes5minMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206209: fltTcaL2EgrBytes15minMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206210: fltTcaL2EgrBytes1hMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206211: fltTcaL2EgrBytes1dMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206212: fltTcaL2EgrBytes1wMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206213: fltTcaL2EgrBytes1moMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206214: fltTcaL2EgrBytes1qtrMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206215: fltTcaL2EgrBytes1yearMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206288: fltTcaL2EgrBytesPart5minMulticastLast

Severity: variable

Explanation: This fault is caused by "egress multicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206289: fltTcaL2EgrBytesPart15minMulticastLast

Severity: variable

Explanation: This fault is caused by "egress multicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206290: fltTcaL2EgrBytesPart1hMulticastLast

Severity: variable

Explanation: This fault is caused by "egress multicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206291: fltTcaL2EgrBytesPart1dMulticastLast

Severity: variable

Explanation: This fault is caused by "egress multicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206292: fltTcaL2EgrBytesPart1wMulticastLast

Severity: variable

Explanation: This fault is caused by "egress multicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206293: fltTcaL2EgrBytesPart1moMulticastLast

Severity: variable

Explanation: This fault is caused by "egress multicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206294: fltTcaL2EgrBytesPart1qtrMulticastLast

Severity: variable

Explanation: This fault is caused by "egress multicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206295: fltTcaL2EgrBytesPart1yearMulticastLast

Severity: variable

Explanation: This fault is caused by "egress multicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206304: fltTcaL2EgrBytesPart5minMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206305: fltTcaL2EgrBytesPart15minMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206306: fltTcaL2EgrBytesPart1hMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206307: fltTcaL2EgrBytesPart1dMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206308: fltTcaL2EgrBytesPart1wMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206309: fltTcaL2EgrBytesPart1moMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206310: fltTcaL2EgrBytesPart1qtrMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206311: fltTcaL2EgrBytesPart1yearMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206312: fltTcaL2EgrBytesPart5minMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206313: fltTcaL2EgrBytesPart15minMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206314: fltTcaL2EgrBytesPart1hMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206315: fltTcaL2EgrBytesPart1dMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206316: fltTcaL2EgrBytesPart1wMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206317: fltTcaL2EgrBytesPart1moMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206318: fltTcaL2EgrBytesPart1qtrMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206319: fltTcaL2EgrBytesPart1yearMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206320: fltTcaL2EgrBytesPart5minMulticastMin

Severity: variable

Explanation: This fault is caused by "egress multicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206321: fltTcaL2EgrBytesPart15minMulticastMin

Severity: variable

Explanation: This fault is caused by "egress multicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206322: fltTcaL2EgrBytesPart1hMulticastMin

Severity: variable

Explanation: This fault is caused by "egress multicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206323: fltTcaL2EgrBytesPart1dMulticastMin

Severity: variable

Explanation: This fault is caused by "egress multicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206324: fltTcaL2EgrBytesPart1wMulticastMin

Severity: variable

Explanation: This fault is caused by "egress multicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206325: fltTcaL2EgrBytesPart1moMulticastMin

Severity: variable

Explanation: This fault is caused by "egress multicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206326: fltTcaL2EgrBytesPart1qtrMulticastMin

Severity: variable

Explanation: This fault is caused by "egress multicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206327: fltTcaL2EgrBytesPart1yearMulticastMin

Severity: variable

Explanation: This fault is caused by "egress multicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206328: fltTcaL2EgrBytesPart5minMulticastMax

Severity: variable

Explanation: This fault is caused by "egress multicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206329: fltTcaL2EgrBytesPart15minMulticastMax

Severity: variable

Explanation: This fault is caused by "egress multicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206330: fltTcaL2EgrBytesPart1hMulticastMax

Severity: variable

Explanation: This fault is caused by "egress multicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206331: fltTcaL2EgrBytesPart1dMulticastMax

Severity: variable

Explanation: This fault is caused by "egress multicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206332: fltTcaL2EgrBytesPart1wMulticastMax

Severity: variable

Explanation: This fault is caused by "egress multicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206333: fltTcaL2EgrBytesPart1moMulticastMax

Severity: variable

Explanation: This fault is caused by "egress multicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206334: fltTcaL2EgrBytesPart1qtrMulticastMax

Severity: variable

Explanation: This fault is caused by "egress multicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206335: fltTcaL2EgrBytesPart1yearMulticastMax

Severity: variable

Explanation: This fault is caused by "egress multicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206336: fltTcaL2EgrBytesPart5minMulticastAvg

Severity: variable

Explanation: This fault is caused by "egress multicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206337: fltTcaL2EgrBytesPart15minMulticastAvg

Severity: variable

Explanation: This fault is caused by "egress multicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206338: fltTcaL2EgrBytesPart1hMulticastAvg

Severity: variable

Explanation: This fault is caused by "egress multicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206339: fltTcaL2EgrBytesPart1dMulticastAvg

Severity: variable

Explanation: This fault is caused by "egress multicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206340: fltTcaL2EgrBytesPart1wMulticastAvg

Severity: variable

Explanation: This fault is caused by "egress multicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206341: fltTcaL2EgrBytesPart1moMulticastAvg

Severity: variable

Explanation: This fault is caused by "egress multicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206342: fltTcaL2EgrBytesPart1qtrMulticastAvg

Severity: variable

Explanation: This fault is caused by "egress multicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206343: fltTcaL2EgrBytesPart1yearMulticastAvg

Severity: variable

Explanation: This fault is caused by "egress multicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206368: fltTcaL2EgrBytesPart5minMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206369: fltTcaL2EgrBytesPart15minMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206370: fltTcaL2EgrBytesPart1hMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206371: fltTcaL2EgrBytesPart1dMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206372: fltTcaL2EgrBytesPart1wMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206373: fltTcaL2EgrBytesPart1moMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206374: fltTcaL2EgrBytesPart1qtrMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206375: fltTcaL2EgrBytesPart1yearMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206376: fltTcaL2EgrBytesPart5minMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206377: fltTcaL2EgrBytesPart15minMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206378: fltTcaL2EgrBytesPart1hMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206379: fltTcaL2EgrBytesPart1dMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206380: fltTcaL2EgrBytesPart1wMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206381: fltTcaL2EgrBytesPart1moMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206382: fltTcaL2EgrBytesPart1qtrMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206383: fltTcaL2EgrBytesPart1yearMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206456: fltTcaL2EgrBytesAg5minMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206457: fltTcaL2EgrBytesAg15minMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206458: fltTcaL2EgrBytesAg1hMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206459: fltTcaL2EgrBytesAg1dMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206460: fltTcaL2EgrBytesAg1wMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206461: fltTcaL2EgrBytesAg1moMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206462: fltTcaL2EgrBytesAg1qtrMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206463: fltTcaL2EgrBytesAg1yearMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206464: fltTcaL2EgrBytesAg5minMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206465: fltTcaL2EgrBytesAg15minMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206466: fltTcaL2EgrBytesAg1hMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206467: fltTcaL2EgrBytesAg1dMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206468: fltTcaL2EgrBytesAg1wMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206469: fltTcaL2EgrBytesAg1moMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206470: fltTcaL2EgrBytesAg1qtrMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206471: fltTcaL2EgrBytesAg1yearMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206496: fltTcaL2EgrBytesAg5minMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206497: fltTcaL2EgrBytesAg15minMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206498: fltTcaL2EgrBytesAg1hMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206499: fltTcaL2EgrBytesAg1dMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2065: fltVnsRsLDevDomPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F206500: fltTcaL2EgrBytesAg1wMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206501: fltTcaL2EgrBytesAg1moMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206502: fltTcaL2EgrBytesAg1qtrMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206503: fltTcaL2EgrBytesAg1yearMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206504: fltTcaL2EgrBytesAg5minMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206505: fltTcaL2EgrBytesAg15minMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206506: fltTcaL2EgrBytesAg1hMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206507: fltTcaL2EgrBytesAg1dMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206508: fltTcaL2EgrBytesAg1wMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206509: fltTcaL2EgrBytesAg1moMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206510: fltTcaL2EgrBytesAg1qtrMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206511: fltTcaL2EgrBytesAg1yearMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206560: fltTcaL2EgrBytes5minUnicastLast

Severity: variable

Explanation: This fault is caused by "egress unicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206561: fltTcaL2EgrBytes15minUnicastLast

Severity: variable

Explanation: This fault is caused by "egress unicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206562: fltTcaL2EgrBytes1hUnicastLast

Severity: variable

Explanation: This fault is caused by "egress unicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206563: fltTcaL2EgrBytes1dUnicastLast

Severity: variable

Explanation: This fault is caused by "egress unicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206564: fltTcaL2EgrBytes1wUnicastLast

Severity: variable

Explanation: This fault is caused by "egress unicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206565: fltTcaL2EgrBytes1moUnicastLast

Severity: variable

Explanation: This fault is caused by "egress unicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206566: fltTcaL2EgrBytes1qtrUnicastLast

Severity: variable

Explanation: This fault is caused by "egress unicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206567: fltTcaL2EgrBytes1yearUnicastLast

Severity: variable

Explanation: This fault is caused by "egress unicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206576: fltTcaL2EgrBytes5minUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206577: fltTcaL2EgrBytes15minUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206578: fltTcaL2EgrBytes1hUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206579: fltTcaL2EgrBytes1dUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206580: fltTcaL2EgrBytes1wUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206581: fltTcaL2EgrBytes1moUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206582: fltTcaL2EgrBytes1qtrUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206583: fltTcaL2EgrBytes1yearUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206584: fltTcaL2EgrBytes5minUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206585: fltTcaL2EgrBytes15minUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206586: fltTcaL2EgrBytes1hUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206587: fltTcaL2EgrBytes1dUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206588: fltTcaL2EgrBytes1wUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206589: fltTcaL2EgrBytes1moUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206590: fltTcaL2EgrBytes1qtrUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206591: fltTcaL2EgrBytes1yearUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206592: fltTcaL2EgrBytes5minUnicastMin

Severity: variable

Explanation: This fault is caused by "egress unicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206593: fltTcaL2EgrBytes15minUnicastMin

Severity: variable

Explanation: This fault is caused by "egress unicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206594: fltTcaL2EgrBytes1hUnicastMin

Severity: variable

Explanation: This fault is caused by "egress unicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206595: fltTcaL2EgrBytes1dUnicastMin

Severity: variable

Explanation: This fault is caused by "egress unicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206596: fltTcaL2EgrBytes1wUnicastMin

Severity: variable

Explanation: This fault is caused by "egress unicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206597: fltTcaL2EgrBytes1moUnicastMin

Severity: variable

Explanation: This fault is caused by "egress unicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206598: fltTcaL2EgrBytes1qtrUnicastMin

Severity: variable

Explanation: This fault is caused by "egress unicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206599: fltTcaL2EgrBytes1yearUnicastMin

Severity: variable

Explanation: This fault is caused by "egress unicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206600: fltTcaL2EgrBytes5minUnicastMax

Severity: variable

Explanation: This fault is caused by "egress unicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206601: fltTcaL2EgrBytes15minUnicastMax

Severity: variable

Explanation: This fault is caused by "egress unicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206602: fltTcaL2EgrBytes1hUnicastMax

Severity: variable

Explanation: This fault is caused by "egress unicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206603: fltTcaL2EgrBytes1dUnicastMax

Severity: variable

Explanation: This fault is caused by "egress unicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206604: fltTcaL2EgrBytes1wUnicastMax

Severity: variable

Explanation: This fault is caused by "egress unicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206605: fltTcaL2EgrBytes1moUnicastMax

Severity: variable

Explanation: This fault is caused by "egress unicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206606: fltTcaL2EgrBytes1qtrUnicastMax

Severity: variable

Explanation: This fault is caused by "egress unicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206607: fltTcaL2EgrBytes1yearUnicastMax

Severity: variable

Explanation: This fault is caused by "egress unicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206608: fltTcaL2EgrBytes5minUnicastAvg

Severity: variable

Explanation: This fault is caused by "egress unicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206609: fltTcaL2EgrBytes15minUnicastAvg

Severity: variable

Explanation: This fault is caused by "egress unicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206610: fltTcaL2EgrBytes1hUnicastAvg

Severity: variable

Explanation: This fault is caused by "egress unicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206611: fltTcaL2EgrBytes1dUnicastAvg

Severity: variable

Explanation: This fault is caused by "egress unicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206612: fltTcaL2EgrBytes1wUnicastAvg

Severity: variable

Explanation: This fault is caused by "egress unicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206613: fltTcaL2EgrBytes1moUnicastAvg

Severity: variable

Explanation: This fault is caused by "egress unicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206614: fltTcaL2EgrBytes1qtrUnicastAvg

Severity: variable

Explanation: This fault is caused by "egress unicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206615: fltTcaL2EgrBytes1yearUnicastAvg

Severity: variable

Explanation: This fault is caused by "egress unicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206640: fltTcaL2EgrBytes5minUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206641: fltTcaL2EgrBytes15minUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206642: fltTcaL2EgrBytes1hUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206643: fltTcaL2EgrBytes1dUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206644: fltTcaL2EgrBytes1wUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206645: fltTcaL2EgrBytes1moUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206646: fltTcaL2EgrBytes1qtrUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206647: fltTcaL2EgrBytes1yearUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206648: fltTcaL2EgrBytes5minUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206649: fltTcaL2EgrBytes15minUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206650: fltTcaL2EgrBytes1hUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206651: fltTcaL2EgrBytes1dUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206652: fltTcaL2EgrBytes1wUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206653: fltTcaL2EgrBytes1moUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206654: fltTcaL2EgrBytes1qtrUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206655: fltTcaL2EgrBytes1yearUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2067: fltDbgacRsAcExtPolToContextResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F206728: fltTcaL2EgrBytesPart5minUnicastLast

Severity: variable

Explanation: This fault is caused by "egress unicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206729: fltTcaL2EgrBytesPart15minUnicastLast

Severity: variable

Explanation: This fault is caused by "egress unicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206730: fltTcaL2EgrBytesPart1hUnicastLast

Severity: variable

Explanation: This fault is caused by "egress unicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206731: fltTcaL2EgrBytesPart1dUnicastLast

Severity: variable

Explanation: This fault is caused by "egress unicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206732: fltTcaL2EgrBytesPart1wUnicastLast

Severity: variable

Explanation: This fault is caused by "egress unicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206733: fltTcaL2EgrBytesPart1moUnicastLast

Severity: variable

Explanation: This fault is caused by "egress unicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206734: fltTcaL2EgrBytesPart1qtrUnicastLast

Severity: variable

Explanation: This fault is caused by "egress unicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206735: fltTcaL2EgrBytesPart1yearUnicastLast

Severity: variable

Explanation: This fault is caused by "egress unicast bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206744: fltTcaL2EgrBytesPart5minUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206745: fltTcaL2EgrBytesPart15minUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206746: fltTcaL2EgrBytesPart1hUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206747: fltTcaL2EgrBytesPart1dUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206748: fltTcaL2EgrBytesPart1wUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206749: fltTcaL2EgrBytesPart1moUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206750: fltTcaL2EgrBytesPart1qtrUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206751: fltTcaL2EgrBytesPart1yearUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206752: fltTcaL2EgrBytesPart5minUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206753: fltTcaL2EgrBytesPart15minUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206754: fltTcaL2EgrBytesPart1hUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206755: fltTcaL2EgrBytesPart1dUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206756: fltTcaL2EgrBytesPart1wUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206757: fltTcaL2EgrBytesPart1moUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206758: fltTcaL2EgrBytesPart1qtrUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206759: fltTcaL2EgrBytesPart1yearUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206760: fltTcaL2EgrBytesPart5minUnicastMin

Severity: variable

Explanation: This fault is caused by "egress unicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206761: fltTcaL2EgrBytesPart15minUnicastMin

Severity: variable

Explanation: This fault is caused by "egress unicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206762: fltTcaL2EgrBytesPart1hUnicastMin

Severity: variable

Explanation: This fault is caused by "egress unicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206763: fltTcaL2EgrBytesPart1dUnicastMin

Severity: variable

Explanation: This fault is caused by "egress unicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206764: fltTcaL2EgrBytesPart1wUnicastMin

Severity: variable

Explanation: This fault is caused by "egress unicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206765: fltTcaL2EgrBytesPart1moUnicastMin

Severity: variable

Explanation: This fault is caused by "egress unicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206766: fltTcaL2EgrBytesPart1qtrUnicastMin

Severity: variable

Explanation: This fault is caused by "egress unicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206767: fltTcaL2EgrBytesPart1yearUnicastMin

Severity: variable

Explanation: This fault is caused by "egress unicast bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206768: fltTcaL2EgrBytesPart5minUnicastMax

Severity: variable

Explanation: This fault is caused by "egress unicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206769: fltTcaL2EgrBytesPart15minUnicastMax

Severity: variable

Explanation: This fault is caused by "egress unicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206770: fltTcaL2EgrBytesPart1hUnicastMax

Severity: variable

Explanation: This fault is caused by "egress unicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206771: fltTcaL2EgrBytesPart1dUnicastMax

Severity: variable

Explanation: This fault is caused by "egress unicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206772: fltTcaL2EgrBytesPart1wUnicastMax

Severity: variable

Explanation: This fault is caused by "egress unicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206773: fltTcaL2EgrBytesPart1moUnicastMax

Severity: variable

Explanation: This fault is caused by "egress unicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206774: fltTcaL2EgrBytesPart1qtrUnicastMax

Severity: variable

Explanation: This fault is caused by "egress unicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206775: fltTcaL2EgrBytesPart1yearUnicastMax

Severity: variable

Explanation: This fault is caused by "egress unicast bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206776: fltTcaL2EgrBytesPart5minUnicastAvg

Severity: variable

Explanation: This fault is caused by "egress unicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206777: fltTcaL2EgrBytesPart15minUnicastAvg

Severity: variable

Explanation: This fault is caused by "egress unicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206778: fltTcaL2EgrBytesPart1hUnicastAvg

Severity: variable

Explanation: This fault is caused by "egress unicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206779: fltTcaL2EgrBytesPart1dUnicastAvg

Severity: variable

Explanation: This fault is caused by "egress unicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206780: fltTcaL2EgrBytesPart1wUnicastAvg

Severity: variable

Explanation: This fault is caused by "egress unicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206781: fltTcaL2EgrBytesPart1moUnicastAvg

Severity: variable

Explanation: This fault is caused by "egress unicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206782: fltTcaL2EgrBytesPart1qtrUnicastAvg

Severity: variable

Explanation: This fault is caused by "egress unicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206783: fltTcaL2EgrBytesPart1yearUnicastAvg

Severity: variable

Explanation: This fault is caused by "egress unicast bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206808: fltTcaL2EgrBytesPart5minUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206809: fltTcaL2EgrBytesPart15minUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206810: fltTcaL2EgrBytesPart1hUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206811: fltTcaL2EgrBytesPart1dUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206812: fltTcaL2EgrBytesPart1wUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206813: fltTcaL2EgrBytesPart1moUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206814: fltTcaL2EgrBytesPart1qtrUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206815: fltTcaL2EgrBytesPart1yearUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206816: fltTcaL2EgrBytesPart5minUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206817: fltTcaL2EgrBytesPart15minUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206818: fltTcaL2EgrBytesPart1hUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206819: fltTcaL2EgrBytesPart1dUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206820: fltTcaL2EgrBytesPart1wUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206821: fltTcaL2EgrBytesPart1moUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206822: fltTcaL2EgrBytesPart1qtrUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206823: fltTcaL2EgrBytesPart1yearUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206896: fltTcaL2EgrBytesAg5minUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206897: fltTcaL2EgrBytesAg15minUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206898: fltTcaL2EgrBytesAg1hUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206899: fltTcaL2EgrBytesAg1dUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2069: fltL3extLNodePNodePathMisconfigured

Severity: minor

Explanation: This fault occurs when under a given l3extLNodeP either one of following conditions is present: - there is a node deployment configuration but there is no path deployment configuration for that node; - there is a path deployment configuration but there is no node deployment configuration for the node where path is.

Recommended Action: If you see this fault, take the following actions:

1. Ensure that for every RsNodeL3OutAtt there is at least an RsPathL3OutAtt

2. Ensure that for every RsPathL3OutAtt there is a corresponding an RsNodeL3OutAtt configured

F206900: fltTcaL2EgrBytesAg1wUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206901: fltTcaL2EgrBytesAg1moUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206902: fltTcaL2EgrBytesAg1qtrUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206903: fltTcaL2EgrBytesAg1yearUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206904: fltTcaL2EgrBytesAg5minUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206905: fltTcaL2EgrBytesAg15minUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206906: fltTcaL2EgrBytesAg1hUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206907: fltTcaL2EgrBytesAg1dUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206908: fltTcaL2EgrBytesAg1wUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206909: fltTcaL2EgrBytesAg1moUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206910: fltTcaL2EgrBytesAg1qtrUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206911: fltTcaL2EgrBytesAg1yearUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206936: fltTcaL2EgrBytesAg5minUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206937: fltTcaL2EgrBytesAg15minUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206938: fltTcaL2EgrBytesAg1hUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206939: fltTcaL2EgrBytesAg1dUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206940: fltTcaL2EgrBytesAg1wUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206941: fltTcaL2EgrBytesAg1moUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206942: fltTcaL2EgrBytesAg1qtrUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206943: fltTcaL2EgrBytesAg1yearUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206944: fltTcaL2EgrBytesAg5minUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206945: fltTcaL2EgrBytesAg15minUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206946: fltTcaL2EgrBytesAg1hUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206947: fltTcaL2EgrBytesAg1dUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206948: fltTcaL2EgrBytesAg1wUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206949: fltTcaL2EgrBytesAg1moUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206950: fltTcaL2EgrBytesAg1qtrUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F206951: fltTcaL2EgrBytesAg1yearUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207000: fltTcaL2EgrPkts5minMulticastLast

Severity: variable

Explanation: This fault is caused by "egress multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207001: fltTcaL2EgrPkts15minMulticastLast

Severity: variable

Explanation: This fault is caused by "egress multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207002: fltTcaL2EgrPkts1hMulticastLast

Severity: variable

Explanation: This fault is caused by "egress multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207003: fltTcaL2EgrPkts1dMulticastLast

Severity: variable

Explanation: This fault is caused by "egress multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207004: fltTcaL2EgrPkts1wMulticastLast

Severity: variable

Explanation: This fault is caused by "egress multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207005: fltTcaL2EgrPkts1moMulticastLast

Severity: variable

Explanation: This fault is caused by "egress multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207006: fltTcaL2EgrPkts1qtrMulticastLast

Severity: variable

Explanation: This fault is caused by "egress multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207007: fltTcaL2EgrPkts1yearMulticastLast

Severity: variable

Explanation: This fault is caused by "egress multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207016: fltTcaL2EgrPkts5minMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207017: fltTcaL2EgrPkts15minMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207018: fltTcaL2EgrPkts1hMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207019: fltTcaL2EgrPkts1dMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207020: fltTcaL2EgrPkts1wMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207021: fltTcaL2EgrPkts1moMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207022: fltTcaL2EgrPkts1qtrMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207023: fltTcaL2EgrPkts1yearMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207024: fltTcaL2EgrPkts5minMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207025: fltTcaL2EgrPkts15minMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207026: fltTcaL2EgrPkts1hMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207027: fltTcaL2EgrPkts1dMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207028: fltTcaL2EgrPkts1wMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207029: fltTcaL2EgrPkts1moMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207030: fltTcaL2EgrPkts1qtrMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207031: fltTcaL2EgrPkts1yearMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207032: fltTcaL2EgrPkts5minMulticastMin

Severity: variable

Explanation: This fault is caused by "egress multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207033: fltTcaL2EgrPkts15minMulticastMin

Severity: variable

Explanation: This fault is caused by "egress multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207034: fltTcaL2EgrPkts1hMulticastMin

Severity: variable

Explanation: This fault is caused by "egress multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207035: fltTcaL2EgrPkts1dMulticastMin

Severity: variable

Explanation: This fault is caused by "egress multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207036: fltTcaL2EgrPkts1wMulticastMin

Severity: variable

Explanation: This fault is caused by "egress multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207037: fltTcaL2EgrPkts1moMulticastMin

Severity: variable

Explanation: This fault is caused by "egress multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207038: fltTcaL2EgrPkts1qtrMulticastMin

Severity: variable

Explanation: This fault is caused by "egress multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207039: fltTcaL2EgrPkts1yearMulticastMin

Severity: variable

Explanation: This fault is caused by "egress multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207040: fltTcaL2EgrPkts5minMulticastMax

Severity: variable

Explanation: This fault is caused by "egress multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207041: fltTcaL2EgrPkts15minMulticastMax

Severity: variable

Explanation: This fault is caused by "egress multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207042: fltTcaL2EgrPkts1hMulticastMax

Severity: variable

Explanation: This fault is caused by "egress multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207043: fltTcaL2EgrPkts1dMulticastMax

Severity: variable

Explanation: This fault is caused by "egress multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207044: fltTcaL2EgrPkts1wMulticastMax

Severity: variable

Explanation: This fault is caused by "egress multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207045: fltTcaL2EgrPkts1moMulticastMax

Severity: variable

Explanation: This fault is caused by "egress multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207046: fltTcaL2EgrPkts1qtrMulticastMax

Severity: variable

Explanation: This fault is caused by "egress multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207047: fltTcaL2EgrPkts1yearMulticastMax

Severity: variable

Explanation: This fault is caused by "egress multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207048: fltTcaL2EgrPkts5minMulticastAvg

Severity: variable

Explanation: This fault is caused by "egress multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207049: fltTcaL2EgrPkts15minMulticastAvg

Severity: variable

Explanation: This fault is caused by "egress multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207050: fltTcaL2EgrPkts1hMulticastAvg

Severity: variable

Explanation: This fault is caused by "egress multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207051: fltTcaL2EgrPkts1dMulticastAvg

Severity: variable

Explanation: This fault is caused by "egress multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207052: fltTcaL2EgrPkts1wMulticastAvg

Severity: variable

Explanation: This fault is caused by "egress multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207053: fltTcaL2EgrPkts1moMulticastAvg

Severity: variable

Explanation: This fault is caused by "egress multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207054: fltTcaL2EgrPkts1qtrMulticastAvg

Severity: variable

Explanation: This fault is caused by "egress multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207055: fltTcaL2EgrPkts1yearMulticastAvg

Severity: variable

Explanation: This fault is caused by "egress multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207080: fltTcaL2EgrPkts5minMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207081: fltTcaL2EgrPkts15minMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207082: fltTcaL2EgrPkts1hMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207083: fltTcaL2EgrPkts1dMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207084: fltTcaL2EgrPkts1wMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207085: fltTcaL2EgrPkts1moMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207086: fltTcaL2EgrPkts1qtrMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207087: fltTcaL2EgrPkts1yearMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207088: fltTcaL2EgrPkts5minMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207089: fltTcaL2EgrPkts15minMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207090: fltTcaL2EgrPkts1hMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207091: fltTcaL2EgrPkts1dMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207092: fltTcaL2EgrPkts1wMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207093: fltTcaL2EgrPkts1moMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207094: fltTcaL2EgrPkts1qtrMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207095: fltTcaL2EgrPkts1yearMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207168: fltTcaL2EgrPktsPart5minMulticastLast

Severity: variable

Explanation: This fault is caused by "egress multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207169: fltTcaL2EgrPktsPart15minMulticastLast

Severity: variable

Explanation: This fault is caused by "egress multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207170: fltTcaL2EgrPktsPart1hMulticastLast

Severity: variable

Explanation: This fault is caused by "egress multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207171: fltTcaL2EgrPktsPart1dMulticastLast

Severity: variable

Explanation: This fault is caused by "egress multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207172: fltTcaL2EgrPktsPart1wMulticastLast

Severity: variable

Explanation: This fault is caused by "egress multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207173: fltTcaL2EgrPktsPart1moMulticastLast

Severity: variable

Explanation: This fault is caused by "egress multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207174: fltTcaL2EgrPktsPart1qtrMulticastLast

Severity: variable

Explanation: This fault is caused by "egress multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207175: fltTcaL2EgrPktsPart1yearMulticastLast

Severity: variable

Explanation: This fault is caused by "egress multicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207184: fltTcaL2EgrPktsPart5minMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207185: fltTcaL2EgrPktsPart15minMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207186: fltTcaL2EgrPktsPart1hMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207187: fltTcaL2EgrPktsPart1dMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207188: fltTcaL2EgrPktsPart1wMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207189: fltTcaL2EgrPktsPart1moMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207190: fltTcaL2EgrPktsPart1qtrMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207191: fltTcaL2EgrPktsPart1yearMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207192: fltTcaL2EgrPktsPart5minMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207193: fltTcaL2EgrPktsPart15minMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207194: fltTcaL2EgrPktsPart1hMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207195: fltTcaL2EgrPktsPart1dMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207196: fltTcaL2EgrPktsPart1wMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207197: fltTcaL2EgrPktsPart1moMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207198: fltTcaL2EgrPktsPart1qtrMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207199: fltTcaL2EgrPktsPart1yearMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207200: fltTcaL2EgrPktsPart5minMulticastMin

Severity: variable

Explanation: This fault is caused by "egress multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207201: fltTcaL2EgrPktsPart15minMulticastMin

Severity: variable

Explanation: This fault is caused by "egress multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207202: fltTcaL2EgrPktsPart1hMulticastMin

Severity: variable

Explanation: This fault is caused by "egress multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207203: fltTcaL2EgrPktsPart1dMulticastMin

Severity: variable

Explanation: This fault is caused by "egress multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207204: fltTcaL2EgrPktsPart1wMulticastMin

Severity: variable

Explanation: This fault is caused by "egress multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207205: fltTcaL2EgrPktsPart1moMulticastMin

Severity: variable

Explanation: This fault is caused by "egress multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207206: fltTcaL2EgrPktsPart1qtrMulticastMin

Severity: variable

Explanation: This fault is caused by "egress multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207207: fltTcaL2EgrPktsPart1yearMulticastMin

Severity: variable

Explanation: This fault is caused by "egress multicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207208: fltTcaL2EgrPktsPart5minMulticastMax

Severity: variable

Explanation: This fault is caused by "egress multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207209: fltTcaL2EgrPktsPart15minMulticastMax

Severity: variable

Explanation: This fault is caused by "egress multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207210: fltTcaL2EgrPktsPart1hMulticastMax

Severity: variable

Explanation: This fault is caused by "egress multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207211: fltTcaL2EgrPktsPart1dMulticastMax

Severity: variable

Explanation: This fault is caused by "egress multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207212: fltTcaL2EgrPktsPart1wMulticastMax

Severity: variable

Explanation: This fault is caused by "egress multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207213: fltTcaL2EgrPktsPart1moMulticastMax

Severity: variable

Explanation: This fault is caused by "egress multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207214: fltTcaL2EgrPktsPart1qtrMulticastMax

Severity: variable

Explanation: This fault is caused by "egress multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207215: fltTcaL2EgrPktsPart1yearMulticastMax

Severity: variable

Explanation: This fault is caused by "egress multicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207216: fltTcaL2EgrPktsPart5minMulticastAvg

Severity: variable

Explanation: This fault is caused by "egress multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207217: fltTcaL2EgrPktsPart15minMulticastAvg

Severity: variable

Explanation: This fault is caused by "egress multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207218: fltTcaL2EgrPktsPart1hMulticastAvg

Severity: variable

Explanation: This fault is caused by "egress multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207219: fltTcaL2EgrPktsPart1dMulticastAvg

Severity: variable

Explanation: This fault is caused by "egress multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207220: fltTcaL2EgrPktsPart1wMulticastAvg

Severity: variable

Explanation: This fault is caused by "egress multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207221: fltTcaL2EgrPktsPart1moMulticastAvg

Severity: variable

Explanation: This fault is caused by "egress multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207222: fltTcaL2EgrPktsPart1qtrMulticastAvg

Severity: variable

Explanation: This fault is caused by "egress multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207223: fltTcaL2EgrPktsPart1yearMulticastAvg

Severity: variable

Explanation: This fault is caused by "egress multicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207248: fltTcaL2EgrPktsPart5minMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207249: fltTcaL2EgrPktsPart15minMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207250: fltTcaL2EgrPktsPart1hMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207251: fltTcaL2EgrPktsPart1dMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207252: fltTcaL2EgrPktsPart1wMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207253: fltTcaL2EgrPktsPart1moMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207254: fltTcaL2EgrPktsPart1qtrMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207255: fltTcaL2EgrPktsPart1yearMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207256: fltTcaL2EgrPktsPart5minMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207257: fltTcaL2EgrPktsPart15minMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207258: fltTcaL2EgrPktsPart1hMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207259: fltTcaL2EgrPktsPart1dMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207260: fltTcaL2EgrPktsPart1wMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207261: fltTcaL2EgrPktsPart1moMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207262: fltTcaL2EgrPktsPart1qtrMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207263: fltTcaL2EgrPktsPart1yearMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207336: fltTcaL2EgrPktsAg5minMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207337: fltTcaL2EgrPktsAg15minMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207338: fltTcaL2EgrPktsAg1hMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207339: fltTcaL2EgrPktsAg1dMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207340: fltTcaL2EgrPktsAg1wMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207341: fltTcaL2EgrPktsAg1moMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207342: fltTcaL2EgrPktsAg1qtrMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207343: fltTcaL2EgrPktsAg1yearMulticastCum

Severity: variable

Explanation: This fault is caused by "egress multicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207344: fltTcaL2EgrPktsAg5minMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207345: fltTcaL2EgrPktsAg15minMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207346: fltTcaL2EgrPktsAg1hMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207347: fltTcaL2EgrPktsAg1dMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207348: fltTcaL2EgrPktsAg1wMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207349: fltTcaL2EgrPktsAg1moMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207350: fltTcaL2EgrPktsAg1qtrMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207351: fltTcaL2EgrPktsAg1yearMulticastPer

Severity: variable

Explanation: This fault is caused by "egress multicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207376: fltTcaL2EgrPktsAg5minMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207377: fltTcaL2EgrPktsAg15minMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207378: fltTcaL2EgrPktsAg1hMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207379: fltTcaL2EgrPktsAg1dMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207380: fltTcaL2EgrPktsAg1wMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207381: fltTcaL2EgrPktsAg1moMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207382: fltTcaL2EgrPktsAg1qtrMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207383: fltTcaL2EgrPktsAg1yearMulticastTr

Severity: variable

Explanation: This fault is caused by "egress multicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207384: fltTcaL2EgrPktsAg5minMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207385: fltTcaL2EgrPktsAg15minMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207386: fltTcaL2EgrPktsAg1hMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207387: fltTcaL2EgrPktsAg1dMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207388: fltTcaL2EgrPktsAg1wMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207389: fltTcaL2EgrPktsAg1moMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207390: fltTcaL2EgrPktsAg1qtrMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207391: fltTcaL2EgrPktsAg1yearMulticastRate

Severity: variable

Explanation: This fault is caused by "egress multicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress multicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207440: fltTcaL2EgrPkts5minUnicastLast

Severity: variable

Explanation: This fault is caused by "egress unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207441: fltTcaL2EgrPkts15minUnicastLast

Severity: variable

Explanation: This fault is caused by "egress unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207442: fltTcaL2EgrPkts1hUnicastLast

Severity: variable

Explanation: This fault is caused by "egress unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207443: fltTcaL2EgrPkts1dUnicastLast

Severity: variable

Explanation: This fault is caused by "egress unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207444: fltTcaL2EgrPkts1wUnicastLast

Severity: variable

Explanation: This fault is caused by "egress unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207445: fltTcaL2EgrPkts1moUnicastLast

Severity: variable

Explanation: This fault is caused by "egress unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207446: fltTcaL2EgrPkts1qtrUnicastLast

Severity: variable

Explanation: This fault is caused by "egress unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207447: fltTcaL2EgrPkts1yearUnicastLast

Severity: variable

Explanation: This fault is caused by "egress unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207456: fltTcaL2EgrPkts5minUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207457: fltTcaL2EgrPkts15minUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207458: fltTcaL2EgrPkts1hUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207459: fltTcaL2EgrPkts1dUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207460: fltTcaL2EgrPkts1wUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207461: fltTcaL2EgrPkts1moUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207462: fltTcaL2EgrPkts1qtrUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207463: fltTcaL2EgrPkts1yearUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207464: fltTcaL2EgrPkts5minUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207465: fltTcaL2EgrPkts15minUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207466: fltTcaL2EgrPkts1hUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207467: fltTcaL2EgrPkts1dUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207468: fltTcaL2EgrPkts1wUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207469: fltTcaL2EgrPkts1moUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207470: fltTcaL2EgrPkts1qtrUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207471: fltTcaL2EgrPkts1yearUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207472: fltTcaL2EgrPkts5minUnicastMin

Severity: variable

Explanation: This fault is caused by "egress unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207473: fltTcaL2EgrPkts15minUnicastMin

Severity: variable

Explanation: This fault is caused by "egress unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207474: fltTcaL2EgrPkts1hUnicastMin

Severity: variable

Explanation: This fault is caused by "egress unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207475: fltTcaL2EgrPkts1dUnicastMin

Severity: variable

Explanation: This fault is caused by "egress unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207476: fltTcaL2EgrPkts1wUnicastMin

Severity: variable

Explanation: This fault is caused by "egress unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207477: fltTcaL2EgrPkts1moUnicastMin

Severity: variable

Explanation: This fault is caused by "egress unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207478: fltTcaL2EgrPkts1qtrUnicastMin

Severity: variable

Explanation: This fault is caused by "egress unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207479: fltTcaL2EgrPkts1yearUnicastMin

Severity: variable

Explanation: This fault is caused by "egress unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207480: fltTcaL2EgrPkts5minUnicastMax

Severity: variable

Explanation: This fault is caused by "egress unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207481: fltTcaL2EgrPkts15minUnicastMax

Severity: variable

Explanation: This fault is caused by "egress unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207482: fltTcaL2EgrPkts1hUnicastMax

Severity: variable

Explanation: This fault is caused by "egress unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207483: fltTcaL2EgrPkts1dUnicastMax

Severity: variable

Explanation: This fault is caused by "egress unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207484: fltTcaL2EgrPkts1wUnicastMax

Severity: variable

Explanation: This fault is caused by "egress unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207485: fltTcaL2EgrPkts1moUnicastMax

Severity: variable

Explanation: This fault is caused by "egress unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207486: fltTcaL2EgrPkts1qtrUnicastMax

Severity: variable

Explanation: This fault is caused by "egress unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207487: fltTcaL2EgrPkts1yearUnicastMax

Severity: variable

Explanation: This fault is caused by "egress unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207488: fltTcaL2EgrPkts5minUnicastAvg

Severity: variable

Explanation: This fault is caused by "egress unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207489: fltTcaL2EgrPkts15minUnicastAvg

Severity: variable

Explanation: This fault is caused by "egress unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207490: fltTcaL2EgrPkts1hUnicastAvg

Severity: variable

Explanation: This fault is caused by "egress unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207491: fltTcaL2EgrPkts1dUnicastAvg

Severity: variable

Explanation: This fault is caused by "egress unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207492: fltTcaL2EgrPkts1wUnicastAvg

Severity: variable

Explanation: This fault is caused by "egress unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207493: fltTcaL2EgrPkts1moUnicastAvg

Severity: variable

Explanation: This fault is caused by "egress unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207494: fltTcaL2EgrPkts1qtrUnicastAvg

Severity: variable

Explanation: This fault is caused by "egress unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207495: fltTcaL2EgrPkts1yearUnicastAvg

Severity: variable

Explanation: This fault is caused by "egress unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207520: fltTcaL2EgrPkts5minUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207521: fltTcaL2EgrPkts15minUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207522: fltTcaL2EgrPkts1hUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207523: fltTcaL2EgrPkts1dUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207524: fltTcaL2EgrPkts1wUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207525: fltTcaL2EgrPkts1moUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207526: fltTcaL2EgrPkts1qtrUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207527: fltTcaL2EgrPkts1yearUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207528: fltTcaL2EgrPkts5minUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207529: fltTcaL2EgrPkts15minUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207530: fltTcaL2EgrPkts1hUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207531: fltTcaL2EgrPkts1dUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207532: fltTcaL2EgrPkts1wUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207533: fltTcaL2EgrPkts1moUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207534: fltTcaL2EgrPkts1qtrUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207535: fltTcaL2EgrPkts1yearUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207608: fltTcaL2EgrPktsPart5minUnicastLast

Severity: variable

Explanation: This fault is caused by "egress unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207609: fltTcaL2EgrPktsPart15minUnicastLast

Severity: variable

Explanation: This fault is caused by "egress unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207610: fltTcaL2EgrPktsPart1hUnicastLast

Severity: variable

Explanation: This fault is caused by "egress unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207611: fltTcaL2EgrPktsPart1dUnicastLast

Severity: variable

Explanation: This fault is caused by "egress unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207612: fltTcaL2EgrPktsPart1wUnicastLast

Severity: variable

Explanation: This fault is caused by "egress unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207613: fltTcaL2EgrPktsPart1moUnicastLast

Severity: variable

Explanation: This fault is caused by "egress unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207614: fltTcaL2EgrPktsPart1qtrUnicastLast

Severity: variable

Explanation: This fault is caused by "egress unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207615: fltTcaL2EgrPktsPart1yearUnicastLast

Severity: variable

Explanation: This fault is caused by "egress unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207624: fltTcaL2EgrPktsPart5minUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207625: fltTcaL2EgrPktsPart15minUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207626: fltTcaL2EgrPktsPart1hUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207627: fltTcaL2EgrPktsPart1dUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207628: fltTcaL2EgrPktsPart1wUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207629: fltTcaL2EgrPktsPart1moUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207630: fltTcaL2EgrPktsPart1qtrUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207631: fltTcaL2EgrPktsPart1yearUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207632: fltTcaL2EgrPktsPart5minUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207633: fltTcaL2EgrPktsPart15minUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207634: fltTcaL2EgrPktsPart1hUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207635: fltTcaL2EgrPktsPart1dUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207636: fltTcaL2EgrPktsPart1wUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207637: fltTcaL2EgrPktsPart1moUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207638: fltTcaL2EgrPktsPart1qtrUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207639: fltTcaL2EgrPktsPart1yearUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207640: fltTcaL2EgrPktsPart5minUnicastMin

Severity: variable

Explanation: This fault is caused by "egress unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207641: fltTcaL2EgrPktsPart15minUnicastMin

Severity: variable

Explanation: This fault is caused by "egress unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207642: fltTcaL2EgrPktsPart1hUnicastMin

Severity: variable

Explanation: This fault is caused by "egress unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207643: fltTcaL2EgrPktsPart1dUnicastMin

Severity: variable

Explanation: This fault is caused by "egress unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207644: fltTcaL2EgrPktsPart1wUnicastMin

Severity: variable

Explanation: This fault is caused by "egress unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207645: fltTcaL2EgrPktsPart1moUnicastMin

Severity: variable

Explanation: This fault is caused by "egress unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207646: fltTcaL2EgrPktsPart1qtrUnicastMin

Severity: variable

Explanation: This fault is caused by "egress unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207647: fltTcaL2EgrPktsPart1yearUnicastMin

Severity: variable

Explanation: This fault is caused by "egress unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207648: fltTcaL2EgrPktsPart5minUnicastMax

Severity: variable

Explanation: This fault is caused by "egress unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207649: fltTcaL2EgrPktsPart15minUnicastMax

Severity: variable

Explanation: This fault is caused by "egress unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207650: fltTcaL2EgrPktsPart1hUnicastMax

Severity: variable

Explanation: This fault is caused by "egress unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207651: fltTcaL2EgrPktsPart1dUnicastMax

Severity: variable

Explanation: This fault is caused by "egress unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207652: fltTcaL2EgrPktsPart1wUnicastMax

Severity: variable

Explanation: This fault is caused by "egress unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207653: fltTcaL2EgrPktsPart1moUnicastMax

Severity: variable

Explanation: This fault is caused by "egress unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207654: fltTcaL2EgrPktsPart1qtrUnicastMax

Severity: variable

Explanation: This fault is caused by "egress unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207655: fltTcaL2EgrPktsPart1yearUnicastMax

Severity: variable

Explanation: This fault is caused by "egress unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207656: fltTcaL2EgrPktsPart5minUnicastAvg

Severity: variable

Explanation: This fault is caused by "egress unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207657: fltTcaL2EgrPktsPart15minUnicastAvg

Severity: variable

Explanation: This fault is caused by "egress unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207658: fltTcaL2EgrPktsPart1hUnicastAvg

Severity: variable

Explanation: This fault is caused by "egress unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207659: fltTcaL2EgrPktsPart1dUnicastAvg

Severity: variable

Explanation: This fault is caused by "egress unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207660: fltTcaL2EgrPktsPart1wUnicastAvg

Severity: variable

Explanation: This fault is caused by "egress unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207661: fltTcaL2EgrPktsPart1moUnicastAvg

Severity: variable

Explanation: This fault is caused by "egress unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207662: fltTcaL2EgrPktsPart1qtrUnicastAvg

Severity: variable

Explanation: This fault is caused by "egress unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207663: fltTcaL2EgrPktsPart1yearUnicastAvg

Severity: variable

Explanation: This fault is caused by "egress unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207688: fltTcaL2EgrPktsPart5minUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207689: fltTcaL2EgrPktsPart15minUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207690: fltTcaL2EgrPktsPart1hUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207691: fltTcaL2EgrPktsPart1dUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207692: fltTcaL2EgrPktsPart1wUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207693: fltTcaL2EgrPktsPart1moUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207694: fltTcaL2EgrPktsPart1qtrUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207695: fltTcaL2EgrPktsPart1yearUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207696: fltTcaL2EgrPktsPart5minUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207697: fltTcaL2EgrPktsPart15minUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207698: fltTcaL2EgrPktsPart1hUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207699: fltTcaL2EgrPktsPart1dUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207700: fltTcaL2EgrPktsPart1wUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207701: fltTcaL2EgrPktsPart1moUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207702: fltTcaL2EgrPktsPart1qtrUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207703: fltTcaL2EgrPktsPart1yearUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207776: fltTcaL2EgrPktsAg5minUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207777: fltTcaL2EgrPktsAg15minUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207778: fltTcaL2EgrPktsAg1hUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207779: fltTcaL2EgrPktsAg1dUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207780: fltTcaL2EgrPktsAg1wUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207781: fltTcaL2EgrPktsAg1moUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207782: fltTcaL2EgrPktsAg1qtrUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207783: fltTcaL2EgrPktsAg1yearUnicastCum

Severity: variable

Explanation: This fault is caused by "egress unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207784: fltTcaL2EgrPktsAg5minUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207785: fltTcaL2EgrPktsAg15minUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207786: fltTcaL2EgrPktsAg1hUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207787: fltTcaL2EgrPktsAg1dUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207788: fltTcaL2EgrPktsAg1wUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207789: fltTcaL2EgrPktsAg1moUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207790: fltTcaL2EgrPktsAg1qtrUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207791: fltTcaL2EgrPktsAg1yearUnicastPer

Severity: variable

Explanation: This fault is caused by "egress unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207816: fltTcaL2EgrPktsAg5minUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207817: fltTcaL2EgrPktsAg15minUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207818: fltTcaL2EgrPktsAg1hUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207819: fltTcaL2EgrPktsAg1dUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207820: fltTcaL2EgrPktsAg1wUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207821: fltTcaL2EgrPktsAg1moUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207822: fltTcaL2EgrPktsAg1qtrUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207823: fltTcaL2EgrPktsAg1yearUnicastTr

Severity: variable

Explanation: This fault is caused by "egress unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207824: fltTcaL2EgrPktsAg5minUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207825: fltTcaL2EgrPktsAg15minUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207826: fltTcaL2EgrPktsAg1hUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207827: fltTcaL2EgrPktsAg1dUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207828: fltTcaL2EgrPktsAg1wUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207829: fltTcaL2EgrPktsAg1moUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207830: fltTcaL2EgrPktsAg1qtrUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207831: fltTcaL2EgrPktsAg1yearUnicastRate

Severity: variable

Explanation: This fault is caused by "egress unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "egress unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207952: fltTcaProcSysCPU5minIdleAverage1mLast

Severity: variable

Explanation: This fault is caused by "1 minute idle CPU average current value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute idle CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207953: fltTcaProcSysCPU15minIdleAverage1mLast

Severity: variable

Explanation: This fault is caused by "1 minute idle CPU average current value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute idle CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207954: fltTcaProcSysCPU1hIdleAverage1mLast

Severity: variable

Explanation: This fault is caused by "1 minute idle CPU average current value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute idle CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207955: fltTcaProcSysCPU1dIdleAverage1mLast

Severity: variable

Explanation: This fault is caused by "1 minute idle CPU average current value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute idle CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207956: fltTcaProcSysCPU1wIdleAverage1mLast

Severity: variable

Explanation: This fault is caused by "1 minute idle CPU average current value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute idle CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207957: fltTcaProcSysCPU1moIdleAverage1mLast

Severity: variable

Explanation: This fault is caused by "1 minute idle CPU average current value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute idle CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207958: fltTcaProcSysCPU1qtrIdleAverage1mLast

Severity: variable

Explanation: This fault is caused by "1 minute idle CPU average current value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute idle CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207959: fltTcaProcSysCPU1yearIdleAverage1mLast

Severity: variable

Explanation: This fault is caused by "1 minute idle CPU average current value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute idle CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207960: fltTcaProcSysCPU5minIdleAverage1mMin

Severity: variable

Explanation: This fault is caused by "1 minute idle CPU average minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute idle CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207961: fltTcaProcSysCPU15minIdleAverage1mMin

Severity: variable

Explanation: This fault is caused by "1 minute idle CPU average minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute idle CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207962: fltTcaProcSysCPU1hIdleAverage1mMin

Severity: variable

Explanation: This fault is caused by "1 minute idle CPU average minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute idle CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207963: fltTcaProcSysCPU1dIdleAverage1mMin

Severity: variable

Explanation: This fault is caused by "1 minute idle CPU average minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute idle CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207964: fltTcaProcSysCPU1wIdleAverage1mMin

Severity: variable

Explanation: This fault is caused by "1 minute idle CPU average minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute idle CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207965: fltTcaProcSysCPU1moIdleAverage1mMin

Severity: variable

Explanation: This fault is caused by "1 minute idle CPU average minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute idle CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207966: fltTcaProcSysCPU1qtrIdleAverage1mMin

Severity: variable

Explanation: This fault is caused by "1 minute idle CPU average minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute idle CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207967: fltTcaProcSysCPU1yearIdleAverage1mMin

Severity: variable

Explanation: This fault is caused by "1 minute idle CPU average minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute idle CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207968: fltTcaProcSysCPU5minIdleAverage1mMax

Severity: variable

Explanation: This fault is caused by "1 minute idle CPU average maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute idle CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207969: fltTcaProcSysCPU15minIdleAverage1mMax

Severity: variable

Explanation: This fault is caused by "1 minute idle CPU average maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute idle CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207970: fltTcaProcSysCPU1hIdleAverage1mMax

Severity: variable

Explanation: This fault is caused by "1 minute idle CPU average maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute idle CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207971: fltTcaProcSysCPU1dIdleAverage1mMax

Severity: variable

Explanation: This fault is caused by "1 minute idle CPU average maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute idle CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207972: fltTcaProcSysCPU1wIdleAverage1mMax

Severity: variable

Explanation: This fault is caused by "1 minute idle CPU average maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute idle CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207973: fltTcaProcSysCPU1moIdleAverage1mMax

Severity: variable

Explanation: This fault is caused by "1 minute idle CPU average maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute idle CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207974: fltTcaProcSysCPU1qtrIdleAverage1mMax

Severity: variable

Explanation: This fault is caused by "1 minute idle CPU average maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute idle CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207975: fltTcaProcSysCPU1yearIdleAverage1mMax

Severity: variable

Explanation: This fault is caused by "1 minute idle CPU average maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute idle CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207976: fltTcaProcSysCPU5minIdleAverage1mAvg

Severity: variable

Explanation: This fault is caused by "1 minute idle CPU average average value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute idle CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207977: fltTcaProcSysCPU15minIdleAverage1mAvg

Severity: variable

Explanation: This fault is caused by "1 minute idle CPU average average value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute idle CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207978: fltTcaProcSysCPU1hIdleAverage1mAvg

Severity: variable

Explanation: This fault is caused by "1 minute idle CPU average average value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute idle CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207979: fltTcaProcSysCPU1dIdleAverage1mAvg

Severity: variable

Explanation: This fault is caused by "1 minute idle CPU average average value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute idle CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207980: fltTcaProcSysCPU1wIdleAverage1mAvg

Severity: variable

Explanation: This fault is caused by "1 minute idle CPU average average value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute idle CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207981: fltTcaProcSysCPU1moIdleAverage1mAvg

Severity: variable

Explanation: This fault is caused by "1 minute idle CPU average average value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute idle CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207982: fltTcaProcSysCPU1qtrIdleAverage1mAvg

Severity: variable

Explanation: This fault is caused by "1 minute idle CPU average average value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute idle CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F207983: fltTcaProcSysCPU1yearIdleAverage1mAvg

Severity: variable

Explanation: This fault is caused by "1 minute idle CPU average average value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute idle CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208016: fltTcaProcSysCPU5minIdleAverage1mTr

Severity: variable

Explanation: This fault is caused by "1 minute idle CPU average trend" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute idle CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208017: fltTcaProcSysCPU15minIdleAverage1mTr

Severity: variable

Explanation: This fault is caused by "1 minute idle CPU average trend" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute idle CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208018: fltTcaProcSysCPU1hIdleAverage1mTr

Severity: variable

Explanation: This fault is caused by "1 minute idle CPU average trend" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute idle CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208019: fltTcaProcSysCPU1dIdleAverage1mTr

Severity: variable

Explanation: This fault is caused by "1 minute idle CPU average trend" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute idle CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208020: fltTcaProcSysCPU1wIdleAverage1mTr

Severity: variable

Explanation: This fault is caused by "1 minute idle CPU average trend" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute idle CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208021: fltTcaProcSysCPU1moIdleAverage1mTr

Severity: variable

Explanation: This fault is caused by "1 minute idle CPU average trend" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute idle CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208022: fltTcaProcSysCPU1qtrIdleAverage1mTr

Severity: variable

Explanation: This fault is caused by "1 minute idle CPU average trend" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute idle CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208023: fltTcaProcSysCPU1yearIdleAverage1mTr

Severity: variable

Explanation: This fault is caused by "1 minute idle CPU average trend" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute idle CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208072: fltTcaProcSysCPU5minKernelAverage1mLast

Severity: variable

Explanation: This fault is caused by "1 minute kernel CPU average current value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute kernel CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208073: fltTcaProcSysCPU15minKernelAverage1mLast

Severity: variable

Explanation: This fault is caused by "1 minute kernel CPU average current value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute kernel CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208074: fltTcaProcSysCPU1hKernelAverage1mLast

Severity: variable

Explanation: This fault is caused by "1 minute kernel CPU average current value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute kernel CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208075: fltTcaProcSysCPU1dKernelAverage1mLast

Severity: variable

Explanation: This fault is caused by "1 minute kernel CPU average current value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute kernel CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208076: fltTcaProcSysCPU1wKernelAverage1mLast

Severity: variable

Explanation: This fault is caused by "1 minute kernel CPU average current value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute kernel CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208077: fltTcaProcSysCPU1moKernelAverage1mLast

Severity: variable

Explanation: This fault is caused by "1 minute kernel CPU average current value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute kernel CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208078: fltTcaProcSysCPU1qtrKernelAverage1mLast

Severity: variable

Explanation: This fault is caused by "1 minute kernel CPU average current value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute kernel CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208079: fltTcaProcSysCPU1yearKernelAverage1mLast

Severity: variable

Explanation: This fault is caused by "1 minute kernel CPU average current value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute kernel CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208080: fltTcaProcSysCPU5minKernelAverage1mMin

Severity: variable

Explanation: This fault is caused by "1 minute kernel CPU average minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute kernel CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208081: fltTcaProcSysCPU15minKernelAverage1mMin

Severity: variable

Explanation: This fault is caused by "1 minute kernel CPU average minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute kernel CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208082: fltTcaProcSysCPU1hKernelAverage1mMin

Severity: variable

Explanation: This fault is caused by "1 minute kernel CPU average minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute kernel CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208083: fltTcaProcSysCPU1dKernelAverage1mMin

Severity: variable

Explanation: This fault is caused by "1 minute kernel CPU average minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute kernel CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208084: fltTcaProcSysCPU1wKernelAverage1mMin

Severity: variable

Explanation: This fault is caused by "1 minute kernel CPU average minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute kernel CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208085: fltTcaProcSysCPU1moKernelAverage1mMin

Severity: variable

Explanation: This fault is caused by "1 minute kernel CPU average minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute kernel CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208086: fltTcaProcSysCPU1qtrKernelAverage1mMin

Severity: variable

Explanation: This fault is caused by "1 minute kernel CPU average minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute kernel CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208087: fltTcaProcSysCPU1yearKernelAverage1mMin

Severity: variable

Explanation: This fault is caused by "1 minute kernel CPU average minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute kernel CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208088: fltTcaProcSysCPU5minKernelAverage1mMax

Severity: variable

Explanation: This fault is caused by "1 minute kernel CPU average maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute kernel CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208089: fltTcaProcSysCPU15minKernelAverage1mMax

Severity: variable

Explanation: This fault is caused by "1 minute kernel CPU average maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute kernel CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208090: fltTcaProcSysCPU1hKernelAverage1mMax

Severity: variable

Explanation: This fault is caused by "1 minute kernel CPU average maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute kernel CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208091: fltTcaProcSysCPU1dKernelAverage1mMax

Severity: variable

Explanation: This fault is caused by "1 minute kernel CPU average maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute kernel CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208092: fltTcaProcSysCPU1wKernelAverage1mMax

Severity: variable

Explanation: This fault is caused by "1 minute kernel CPU average maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute kernel CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208093: fltTcaProcSysCPU1moKernelAverage1mMax

Severity: variable

Explanation: This fault is caused by "1 minute kernel CPU average maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute kernel CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208094: fltTcaProcSysCPU1qtrKernelAverage1mMax

Severity: variable

Explanation: This fault is caused by "1 minute kernel CPU average maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute kernel CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208095: fltTcaProcSysCPU1yearKernelAverage1mMax

Severity: variable

Explanation: This fault is caused by "1 minute kernel CPU average maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute kernel CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208096: fltTcaProcSysCPU5minKernelAverage1mAvg

Severity: variable

Explanation: This fault is caused by "1 minute kernel CPU average average value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute kernel CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208097: fltTcaProcSysCPU15minKernelAverage1mAvg

Severity: variable

Explanation: This fault is caused by "1 minute kernel CPU average average value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute kernel CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208098: fltTcaProcSysCPU1hKernelAverage1mAvg

Severity: variable

Explanation: This fault is caused by "1 minute kernel CPU average average value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute kernel CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208099: fltTcaProcSysCPU1dKernelAverage1mAvg

Severity: variable

Explanation: This fault is caused by "1 minute kernel CPU average average value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute kernel CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2081: fltHvsSecGrpOperIssues

Severity: minor

Explanation: This fault is raised when issues are detected with security group learned from vShield/NSX.

Recommended Action: If you see this fault, take the following actions:

1. Fix the issue by creating the security policy based on the fault description

2. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F208100: fltTcaProcSysCPU1wKernelAverage1mAvg

Severity: variable

Explanation: This fault is caused by "1 minute kernel CPU average average value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute kernel CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208101: fltTcaProcSysCPU1moKernelAverage1mAvg

Severity: variable

Explanation: This fault is caused by "1 minute kernel CPU average average value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute kernel CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208102: fltTcaProcSysCPU1qtrKernelAverage1mAvg

Severity: variable

Explanation: This fault is caused by "1 minute kernel CPU average average value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute kernel CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208103: fltTcaProcSysCPU1yearKernelAverage1mAvg

Severity: variable

Explanation: This fault is caused by "1 minute kernel CPU average average value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute kernel CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208136: fltTcaProcSysCPU5minKernelAverage1mTr

Severity: variable

Explanation: This fault is caused by "1 minute kernel CPU average trend" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute kernel CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208137: fltTcaProcSysCPU15minKernelAverage1mTr

Severity: variable

Explanation: This fault is caused by "1 minute kernel CPU average trend" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute kernel CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208138: fltTcaProcSysCPU1hKernelAverage1mTr

Severity: variable

Explanation: This fault is caused by "1 minute kernel CPU average trend" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute kernel CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208139: fltTcaProcSysCPU1dKernelAverage1mTr

Severity: variable

Explanation: This fault is caused by "1 minute kernel CPU average trend" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute kernel CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208140: fltTcaProcSysCPU1wKernelAverage1mTr

Severity: variable

Explanation: This fault is caused by "1 minute kernel CPU average trend" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute kernel CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208141: fltTcaProcSysCPU1moKernelAverage1mTr

Severity: variable

Explanation: This fault is caused by "1 minute kernel CPU average trend" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute kernel CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208142: fltTcaProcSysCPU1qtrKernelAverage1mTr

Severity: variable

Explanation: This fault is caused by "1 minute kernel CPU average trend" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute kernel CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208143: fltTcaProcSysCPU1yearKernelAverage1mTr

Severity: variable

Explanation: This fault is caused by "1 minute kernel CPU average trend" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute kernel CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208192: fltTcaProcSysCPU5minUserAverage1mLast

Severity: variable

Explanation: This fault is caused by "1 minute user CPU average current value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute user CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208193: fltTcaProcSysCPU15minUserAverage1mLast

Severity: variable

Explanation: This fault is caused by "1 minute user CPU average current value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute user CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208194: fltTcaProcSysCPU1hUserAverage1mLast

Severity: variable

Explanation: This fault is caused by "1 minute user CPU average current value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute user CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208195: fltTcaProcSysCPU1dUserAverage1mLast

Severity: variable

Explanation: This fault is caused by "1 minute user CPU average current value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute user CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208196: fltTcaProcSysCPU1wUserAverage1mLast

Severity: variable

Explanation: This fault is caused by "1 minute user CPU average current value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute user CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208197: fltTcaProcSysCPU1moUserAverage1mLast

Severity: variable

Explanation: This fault is caused by "1 minute user CPU average current value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute user CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208198: fltTcaProcSysCPU1qtrUserAverage1mLast

Severity: variable

Explanation: This fault is caused by "1 minute user CPU average current value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute user CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208199: fltTcaProcSysCPU1yearUserAverage1mLast

Severity: variable

Explanation: This fault is caused by "1 minute user CPU average current value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute user CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208200: fltTcaProcSysCPU5minUserAverage1mMin

Severity: variable

Explanation: This fault is caused by "1 minute user CPU average minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute user CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208201: fltTcaProcSysCPU15minUserAverage1mMin

Severity: variable

Explanation: This fault is caused by "1 minute user CPU average minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute user CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208202: fltTcaProcSysCPU1hUserAverage1mMin

Severity: variable

Explanation: This fault is caused by "1 minute user CPU average minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute user CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208203: fltTcaProcSysCPU1dUserAverage1mMin

Severity: variable

Explanation: This fault is caused by "1 minute user CPU average minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute user CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208204: fltTcaProcSysCPU1wUserAverage1mMin

Severity: variable

Explanation: This fault is caused by "1 minute user CPU average minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute user CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208205: fltTcaProcSysCPU1moUserAverage1mMin

Severity: variable

Explanation: This fault is caused by "1 minute user CPU average minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute user CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208206: fltTcaProcSysCPU1qtrUserAverage1mMin

Severity: variable

Explanation: This fault is caused by "1 minute user CPU average minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute user CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208207: fltTcaProcSysCPU1yearUserAverage1mMin

Severity: variable

Explanation: This fault is caused by "1 minute user CPU average minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute user CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208208: fltTcaProcSysCPU5minUserAverage1mMax

Severity: variable

Explanation: This fault is caused by "1 minute user CPU average maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute user CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208209: fltTcaProcSysCPU15minUserAverage1mMax

Severity: variable

Explanation: This fault is caused by "1 minute user CPU average maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute user CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208210: fltTcaProcSysCPU1hUserAverage1mMax

Severity: variable

Explanation: This fault is caused by "1 minute user CPU average maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute user CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208211: fltTcaProcSysCPU1dUserAverage1mMax

Severity: variable

Explanation: This fault is caused by "1 minute user CPU average maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute user CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208212: fltTcaProcSysCPU1wUserAverage1mMax

Severity: variable

Explanation: This fault is caused by "1 minute user CPU average maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute user CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208213: fltTcaProcSysCPU1moUserAverage1mMax

Severity: variable

Explanation: This fault is caused by "1 minute user CPU average maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute user CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208214: fltTcaProcSysCPU1qtrUserAverage1mMax

Severity: variable

Explanation: This fault is caused by "1 minute user CPU average maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute user CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208215: fltTcaProcSysCPU1yearUserAverage1mMax

Severity: variable

Explanation: This fault is caused by "1 minute user CPU average maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute user CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208216: fltTcaProcSysCPU5minUserAverage1mAvg

Severity: variable

Explanation: This fault is caused by "1 minute user CPU average average value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute user CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208217: fltTcaProcSysCPU15minUserAverage1mAvg

Severity: variable

Explanation: This fault is caused by "1 minute user CPU average average value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute user CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208218: fltTcaProcSysCPU1hUserAverage1mAvg

Severity: variable

Explanation: This fault is caused by "1 minute user CPU average average value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute user CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208219: fltTcaProcSysCPU1dUserAverage1mAvg

Severity: variable

Explanation: This fault is caused by "1 minute user CPU average average value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute user CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208220: fltTcaProcSysCPU1wUserAverage1mAvg

Severity: variable

Explanation: This fault is caused by "1 minute user CPU average average value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute user CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208221: fltTcaProcSysCPU1moUserAverage1mAvg

Severity: variable

Explanation: This fault is caused by "1 minute user CPU average average value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute user CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208222: fltTcaProcSysCPU1qtrUserAverage1mAvg

Severity: variable

Explanation: This fault is caused by "1 minute user CPU average average value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute user CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208223: fltTcaProcSysCPU1yearUserAverage1mAvg

Severity: variable

Explanation: This fault is caused by "1 minute user CPU average average value" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute user CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208256: fltTcaProcSysCPU5minUserAverage1mTr

Severity: variable

Explanation: This fault is caused by "1 minute user CPU average trend" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute user CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208257: fltTcaProcSysCPU15minUserAverage1mTr

Severity: variable

Explanation: This fault is caused by "1 minute user CPU average trend" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute user CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208258: fltTcaProcSysCPU1hUserAverage1mTr

Severity: variable

Explanation: This fault is caused by "1 minute user CPU average trend" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute user CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208259: fltTcaProcSysCPU1dUserAverage1mTr

Severity: variable

Explanation: This fault is caused by "1 minute user CPU average trend" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute user CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208260: fltTcaProcSysCPU1wUserAverage1mTr

Severity: variable

Explanation: This fault is caused by "1 minute user CPU average trend" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute user CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208261: fltTcaProcSysCPU1moUserAverage1mTr

Severity: variable

Explanation: This fault is caused by "1 minute user CPU average trend" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute user CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208262: fltTcaProcSysCPU1qtrUserAverage1mTr

Severity: variable

Explanation: This fault is caused by "1 minute user CPU average trend" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute user CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F208263: fltTcaProcSysCPU1yearUserAverage1mTr

Severity: variable

Explanation: This fault is caused by "1 minute user CPU average trend" statistical property crossing threshold level.

Recommended Action: Check the values of "1 minute user CPU average" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2100: fltVmmRsEncapAllctrResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2105: fltL3extRsInterleakPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2107: fltDppIfOperStFailed

Severity: major

Explanation: This fault occurs when Data Plane Policer policy fails.

Recommended Action: To recover from this fault, try the following actions

1. If the fault occurred because of an usupported configuration, remove the configuration.

2. If the fault occurred due to a hardware programming error, try removing and re-applying the policy.

3. If the fault occurred because the interface on which it was applied is down, try bringing up the link.

4. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F2108: fltFirmwareFwLocalFirmwareSyncFailure

Severity: major

Explanation: This fault occurs when a image is being replicated across all ifcs

Recommended Action: If you see this fault, take the following actions:

1. Verify the location where the firmware stored is reachable through scp/http request

2. Verify the directory and file location exist

3. Verify the firmware file is valid

4. Verify the file has sufficient permissions

5. Free-up firmware repo by deleting any stale/old images.

6. Delete the image from repository and download again

7. If the above actions did not resolve the issue, create a tech-support file and contact Cisco TAC.

F2109: fltFirmwareRepoLocalFirmwareSyncFailure

Severity: major

Explanation: This fault occurs when a image is not synced across all ifcs

Recommended Action: If you see this fault, take the following actions:

1. Verify the location where the firmware stored is reachable through scp/http request

2. Verify the directory and file location exist

3. Verify the firmware file is valid

4. Verify the file has sufficient permissions

5. Free-up firmware repo by deleting any stale/old images.

6. Delete the image from repository and download again

7. If the above actions did not resolve the issue, create a tech-support file and contact Cisco TAC.

F2110: fltL3extRsSubnetToRtSummResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2111: fltL3extRsDampeningPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2121: fltFabricProtGEpZoneconfiguration

Severity: critical

Explanation: This fault occurs when a virtual Port Channel (vPC) policy is created but nodes are not part of same zone.

Recommended Action: If you see this fault, take the following actions:

1. Verify that corresponding fabric nodes are part of same zone configuration by checking Domain ID for Pair of Leaf Nodes in Fabric->Access Policies -> Policies ->Switch->Virtual Port Channel Default .

2. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F2123: fltFabricRsNodeCfgSrvResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2132: fltCompEpCPOperIssues

Severity: minor

Explanation: This fault is raised when issues are detected with security group learned from vShield/NSX.

Recommended Action: If you see this fault, take the following actions:

1. Fix the issue by deleting the security group policy/Epg

2. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F2133: fltHvsMbrMacConfigIssues

Severity: major

Explanation: This fault is raised when multiple security groups match the same VNic.

Recommended Action: If you see this fault, take the following actions:

1. Change the security group criteria to match one VNic

2. Delete the EPG policy and security group and re-add them again

3. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F2145: fltBfdRsIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2147: fltInfraRsPathToSpAccGrpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2148: fltInfraRsSpAccGrpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2149: fltInfraRsSpAccPortPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2167: fltVsanCktEpVsanmgrCfgCtrl

Severity: warning

Explanation: This fault is caused by a hardware programming failure

Recommended Action: The system will periodically retry to program the hardware. If the failure is due to lack of hardware resources, free up resources by removing or simplifying existing configuration. One of the reasons for lack of hardware resources is exhaustion of VLANs in ToR. These hardware resources can be examined by looking at capacity dashboard under OPERATIONS tab. Please check entry against the number of VLANs in output of command show vlan summary issued at node where fault is generated to check whether it exceeds above advertised node capacity.

F2168: fltBfdAuthPBfdCfgCtrl

Severity: warning

Explanation: This fault is caused by a hardware programming failure

Recommended Action: The system will periodically retry to program the hardware. If the failure is due to lack of hardware resources, free up resources by removing or simplifying existing configuration. One of the reasons for lack of hardware resources is exhaustion of VLANs in ToR. These hardware resources can be examined by looking at capacity dashboard under OPERATIONS tab. Please check entry against the number of VLANs in output of command show vlan summary issued at node where fault is generated to check whether it exceeds above advertised node capacity.

F2169: fltBfdIfAfBfdCfgCtrl

Severity: warning

Explanation: This fault is caused by a hardware programming failure

Recommended Action: The system will periodically retry to program the hardware. If the failure is due to lack of hardware resources, free up resources by removing or simplifying existing configuration. One of the reasons for lack of hardware resources is exhaustion of VLANs in ToR. These hardware resources can be examined by looking at capacity dashboard under OPERATIONS tab. Please check entry against the number of VLANs in output of command show vlan summary issued at node where fault is generated to check whether it exceeds above advertised node capacity.

F2170: fltBfdKaPBfdCfgCtrl

Severity: warning

Explanation: This fault is caused by a hardware programming failure

Recommended Action: The system will periodically retry to program the hardware. If the failure is due to lack of hardware resources, free up resources by removing or simplifying existing configuration. One of the reasons for lack of hardware resources is exhaustion of VLANs in ToR. These hardware resources can be examined by looking at capacity dashboard under OPERATIONS tab. Please check entry against the number of VLANs in output of command show vlan summary issued at node where fault is generated to check whether it exceeds above advertised node capacity.

F2185: fltPimRsIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2190: fltDhcpClientAddressAssignmentFailed

Severity: major

Explanation: This fault is raised when the configured node role doesn't match the role advertized by the node

Recommended Action: If you see this fault, take the following actions:

1. Reconfigure the nodeIdentity policy with correct role

2. If the above actions did not resolve the issue, collect a tech-support file and contact Cisco TAC.

F2194: fltPconsRADeploymentStatusWithCtx

Severity: major

Explanation: This fault occurs when deployment of policy to another process fails.

Recommended Action: Check the state of leaf/spine using "acidiag fnvread" and make sure the state of the leaf/spine is active. If not active

1. Check if leaf/spine is down

2. Check network connectivity of leaf/spine to controllers

3. If above options did not solve, create tech-support and contact Cisco TAC

If active

1. Create a tech-support file and contact Cisco TAC

F221656: fltTcaOpflexIDEpPolicyDrop5minMcastLast

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221657: fltTcaOpflexIDEpPolicyDrop15minMcastLast

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221658: fltTcaOpflexIDEpPolicyDrop1hMcastLast

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221659: fltTcaOpflexIDEpPolicyDrop1dMcastLast

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221660: fltTcaOpflexIDEpPolicyDrop1wMcastLast

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221661: fltTcaOpflexIDEpPolicyDrop1moMcastLast

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221662: fltTcaOpflexIDEpPolicyDrop1qtrMcastLast

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221663: fltTcaOpflexIDEpPolicyDrop1yearMcastLast

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221672: fltTcaOpflexIDEpPolicyDrop5minMcastCum

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221673: fltTcaOpflexIDEpPolicyDrop15minMcastCum

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221674: fltTcaOpflexIDEpPolicyDrop1hMcastCum

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221675: fltTcaOpflexIDEpPolicyDrop1dMcastCum

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221676: fltTcaOpflexIDEpPolicyDrop1wMcastCum

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221677: fltTcaOpflexIDEpPolicyDrop1moMcastCum

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221678: fltTcaOpflexIDEpPolicyDrop1qtrMcastCum

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221679: fltTcaOpflexIDEpPolicyDrop1yearMcastCum

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221680: fltTcaOpflexIDEpPolicyDrop5minMcastPer

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221681: fltTcaOpflexIDEpPolicyDrop15minMcastPer

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221682: fltTcaOpflexIDEpPolicyDrop1hMcastPer

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221683: fltTcaOpflexIDEpPolicyDrop1dMcastPer

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221684: fltTcaOpflexIDEpPolicyDrop1wMcastPer

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221685: fltTcaOpflexIDEpPolicyDrop1moMcastPer

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221686: fltTcaOpflexIDEpPolicyDrop1qtrMcastPer

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221687: fltTcaOpflexIDEpPolicyDrop1yearMcastPer

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221688: fltTcaOpflexIDEpPolicyDrop5minMcastMin

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221689: fltTcaOpflexIDEpPolicyDrop15minMcastMin

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221690: fltTcaOpflexIDEpPolicyDrop1hMcastMin

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221691: fltTcaOpflexIDEpPolicyDrop1dMcastMin

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221692: fltTcaOpflexIDEpPolicyDrop1wMcastMin

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221693: fltTcaOpflexIDEpPolicyDrop1moMcastMin

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221694: fltTcaOpflexIDEpPolicyDrop1qtrMcastMin

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221695: fltTcaOpflexIDEpPolicyDrop1yearMcastMin

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221696: fltTcaOpflexIDEpPolicyDrop5minMcastMax

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221697: fltTcaOpflexIDEpPolicyDrop15minMcastMax

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221698: fltTcaOpflexIDEpPolicyDrop1hMcastMax

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221699: fltTcaOpflexIDEpPolicyDrop1dMcastMax

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221700: fltTcaOpflexIDEpPolicyDrop1wMcastMax

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221701: fltTcaOpflexIDEpPolicyDrop1moMcastMax

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221702: fltTcaOpflexIDEpPolicyDrop1qtrMcastMax

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221703: fltTcaOpflexIDEpPolicyDrop1yearMcastMax

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221704: fltTcaOpflexIDEpPolicyDrop5minMcastAvg

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221705: fltTcaOpflexIDEpPolicyDrop15minMcastAvg

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221706: fltTcaOpflexIDEpPolicyDrop1hMcastAvg

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221707: fltTcaOpflexIDEpPolicyDrop1dMcastAvg

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221708: fltTcaOpflexIDEpPolicyDrop1wMcastAvg

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221709: fltTcaOpflexIDEpPolicyDrop1moMcastAvg

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221710: fltTcaOpflexIDEpPolicyDrop1qtrMcastAvg

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221711: fltTcaOpflexIDEpPolicyDrop1yearMcastAvg

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221736: fltTcaOpflexIDEpPolicyDrop5minMcastTr

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221737: fltTcaOpflexIDEpPolicyDrop15minMcastTr

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221738: fltTcaOpflexIDEpPolicyDrop1hMcastTr

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221739: fltTcaOpflexIDEpPolicyDrop1dMcastTr

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221740: fltTcaOpflexIDEpPolicyDrop1wMcastTr

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221741: fltTcaOpflexIDEpPolicyDrop1moMcastTr

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221742: fltTcaOpflexIDEpPolicyDrop1qtrMcastTr

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221743: fltTcaOpflexIDEpPolicyDrop1yearMcastTr

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221744: fltTcaOpflexIDEpPolicyDrop5minMcastRate

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221745: fltTcaOpflexIDEpPolicyDrop15minMcastRate

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221746: fltTcaOpflexIDEpPolicyDrop1hMcastRate

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221747: fltTcaOpflexIDEpPolicyDrop1dMcastRate

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221748: fltTcaOpflexIDEpPolicyDrop1wMcastRate

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221749: fltTcaOpflexIDEpPolicyDrop1moMcastRate

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221750: fltTcaOpflexIDEpPolicyDrop1qtrMcastRate

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221751: fltTcaOpflexIDEpPolicyDrop1yearMcastRate

Severity: variable

Explanation: This fault is caused by "policy dropped multicast/broadcast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped multicast/broadcast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221824: fltTcaOpflexIDEpPolicyDrop5minUcastLast

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221825: fltTcaOpflexIDEpPolicyDrop15minUcastLast

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221826: fltTcaOpflexIDEpPolicyDrop1hUcastLast

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221827: fltTcaOpflexIDEpPolicyDrop1dUcastLast

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221828: fltTcaOpflexIDEpPolicyDrop1wUcastLast

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221829: fltTcaOpflexIDEpPolicyDrop1moUcastLast

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221830: fltTcaOpflexIDEpPolicyDrop1qtrUcastLast

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221831: fltTcaOpflexIDEpPolicyDrop1yearUcastLast

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221840: fltTcaOpflexIDEpPolicyDrop5minUcastCum

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221841: fltTcaOpflexIDEpPolicyDrop15minUcastCum

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221842: fltTcaOpflexIDEpPolicyDrop1hUcastCum

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221843: fltTcaOpflexIDEpPolicyDrop1dUcastCum

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221844: fltTcaOpflexIDEpPolicyDrop1wUcastCum

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221845: fltTcaOpflexIDEpPolicyDrop1moUcastCum

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221846: fltTcaOpflexIDEpPolicyDrop1qtrUcastCum

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221847: fltTcaOpflexIDEpPolicyDrop1yearUcastCum

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221848: fltTcaOpflexIDEpPolicyDrop5minUcastPer

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221849: fltTcaOpflexIDEpPolicyDrop15minUcastPer

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221850: fltTcaOpflexIDEpPolicyDrop1hUcastPer

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221851: fltTcaOpflexIDEpPolicyDrop1dUcastPer

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221852: fltTcaOpflexIDEpPolicyDrop1wUcastPer

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221853: fltTcaOpflexIDEpPolicyDrop1moUcastPer

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221854: fltTcaOpflexIDEpPolicyDrop1qtrUcastPer

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221855: fltTcaOpflexIDEpPolicyDrop1yearUcastPer

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221856: fltTcaOpflexIDEpPolicyDrop5minUcastMin

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221857: fltTcaOpflexIDEpPolicyDrop15minUcastMin

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221858: fltTcaOpflexIDEpPolicyDrop1hUcastMin

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221859: fltTcaOpflexIDEpPolicyDrop1dUcastMin

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221860: fltTcaOpflexIDEpPolicyDrop1wUcastMin

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221861: fltTcaOpflexIDEpPolicyDrop1moUcastMin

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221862: fltTcaOpflexIDEpPolicyDrop1qtrUcastMin

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221863: fltTcaOpflexIDEpPolicyDrop1yearUcastMin

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221864: fltTcaOpflexIDEpPolicyDrop5minUcastMax

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221865: fltTcaOpflexIDEpPolicyDrop15minUcastMax

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221866: fltTcaOpflexIDEpPolicyDrop1hUcastMax

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221867: fltTcaOpflexIDEpPolicyDrop1dUcastMax

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221868: fltTcaOpflexIDEpPolicyDrop1wUcastMax

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221869: fltTcaOpflexIDEpPolicyDrop1moUcastMax

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221870: fltTcaOpflexIDEpPolicyDrop1qtrUcastMax

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221871: fltTcaOpflexIDEpPolicyDrop1yearUcastMax

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221872: fltTcaOpflexIDEpPolicyDrop5minUcastAvg

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221873: fltTcaOpflexIDEpPolicyDrop15minUcastAvg

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221874: fltTcaOpflexIDEpPolicyDrop1hUcastAvg

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221875: fltTcaOpflexIDEpPolicyDrop1dUcastAvg

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221876: fltTcaOpflexIDEpPolicyDrop1wUcastAvg

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221877: fltTcaOpflexIDEpPolicyDrop1moUcastAvg

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221878: fltTcaOpflexIDEpPolicyDrop1qtrUcastAvg

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221879: fltTcaOpflexIDEpPolicyDrop1yearUcastAvg

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221904: fltTcaOpflexIDEpPolicyDrop5minUcastTr

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221905: fltTcaOpflexIDEpPolicyDrop15minUcastTr

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221906: fltTcaOpflexIDEpPolicyDrop1hUcastTr

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221907: fltTcaOpflexIDEpPolicyDrop1dUcastTr

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221908: fltTcaOpflexIDEpPolicyDrop1wUcastTr

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221909: fltTcaOpflexIDEpPolicyDrop1moUcastTr

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221910: fltTcaOpflexIDEpPolicyDrop1qtrUcastTr

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221911: fltTcaOpflexIDEpPolicyDrop1yearUcastTr

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221912: fltTcaOpflexIDEpPolicyDrop5minUcastRate

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221913: fltTcaOpflexIDEpPolicyDrop15minUcastRate

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221914: fltTcaOpflexIDEpPolicyDrop1hUcastRate

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221915: fltTcaOpflexIDEpPolicyDrop1dUcastRate

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221916: fltTcaOpflexIDEpPolicyDrop1wUcastRate

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221917: fltTcaOpflexIDEpPolicyDrop1moUcastRate

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221918: fltTcaOpflexIDEpPolicyDrop1qtrUcastRate

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F221919: fltTcaOpflexIDEpPolicyDrop1yearUcastRate

Severity: variable

Explanation: This fault is caused by "policy dropped unicast packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "policy dropped unicast packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222432: fltTcaDppEgrAllow5minBytesLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222433: fltTcaDppEgrAllow15minBytesLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222434: fltTcaDppEgrAllow1hBytesLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222435: fltTcaDppEgrAllow1dBytesLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222436: fltTcaDppEgrAllow1wBytesLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222437: fltTcaDppEgrAllow1moBytesLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222438: fltTcaDppEgrAllow1qtrBytesLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222439: fltTcaDppEgrAllow1yearBytesLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222448: fltTcaDppEgrAllow5minBytesCum

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222449: fltTcaDppEgrAllow15minBytesCum

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222450: fltTcaDppEgrAllow1hBytesCum

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222451: fltTcaDppEgrAllow1dBytesCum

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222452: fltTcaDppEgrAllow1wBytesCum

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222453: fltTcaDppEgrAllow1moBytesCum

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222454: fltTcaDppEgrAllow1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222455: fltTcaDppEgrAllow1yearBytesCum

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222456: fltTcaDppEgrAllow5minBytesPer

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222457: fltTcaDppEgrAllow15minBytesPer

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222458: fltTcaDppEgrAllow1hBytesPer

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222459: fltTcaDppEgrAllow1dBytesPer

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222460: fltTcaDppEgrAllow1wBytesPer

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222461: fltTcaDppEgrAllow1moBytesPer

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222462: fltTcaDppEgrAllow1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222463: fltTcaDppEgrAllow1yearBytesPer

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222464: fltTcaDppEgrAllow5minBytesMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222465: fltTcaDppEgrAllow15minBytesMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222466: fltTcaDppEgrAllow1hBytesMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222467: fltTcaDppEgrAllow1dBytesMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222468: fltTcaDppEgrAllow1wBytesMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222469: fltTcaDppEgrAllow1moBytesMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222470: fltTcaDppEgrAllow1qtrBytesMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222471: fltTcaDppEgrAllow1yearBytesMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222472: fltTcaDppEgrAllow5minBytesMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222473: fltTcaDppEgrAllow15minBytesMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222474: fltTcaDppEgrAllow1hBytesMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222475: fltTcaDppEgrAllow1dBytesMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222476: fltTcaDppEgrAllow1wBytesMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222477: fltTcaDppEgrAllow1moBytesMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222478: fltTcaDppEgrAllow1qtrBytesMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222479: fltTcaDppEgrAllow1yearBytesMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222480: fltTcaDppEgrAllow5minBytesAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222481: fltTcaDppEgrAllow15minBytesAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222482: fltTcaDppEgrAllow1hBytesAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222483: fltTcaDppEgrAllow1dBytesAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222484: fltTcaDppEgrAllow1wBytesAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222485: fltTcaDppEgrAllow1moBytesAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222486: fltTcaDppEgrAllow1qtrBytesAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222487: fltTcaDppEgrAllow1yearBytesAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222512: fltTcaDppEgrAllow5minBytesTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222513: fltTcaDppEgrAllow15minBytesTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222514: fltTcaDppEgrAllow1hBytesTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222515: fltTcaDppEgrAllow1dBytesTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222516: fltTcaDppEgrAllow1wBytesTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222517: fltTcaDppEgrAllow1moBytesTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222518: fltTcaDppEgrAllow1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222519: fltTcaDppEgrAllow1yearBytesTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222520: fltTcaDppEgrAllow5minBytesRate

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222521: fltTcaDppEgrAllow15minBytesRate

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222522: fltTcaDppEgrAllow1hBytesRate

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222523: fltTcaDppEgrAllow1dBytesRate

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222524: fltTcaDppEgrAllow1wBytesRate

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222525: fltTcaDppEgrAllow1moBytesRate

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222526: fltTcaDppEgrAllow1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222527: fltTcaDppEgrAllow1yearBytesRate

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2226: fltRtdmcRsFilterToRtMapPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F222600: fltTcaDppEgrAllow5minBytesRateLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222601: fltTcaDppEgrAllow15minBytesRateLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222602: fltTcaDppEgrAllow1hBytesRateLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222603: fltTcaDppEgrAllow1dBytesRateLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222604: fltTcaDppEgrAllow1wBytesRateLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222605: fltTcaDppEgrAllow1moBytesRateLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222606: fltTcaDppEgrAllow1qtrBytesRateLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222607: fltTcaDppEgrAllow1yearBytesRateLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222608: fltTcaDppEgrAllow5minBytesRateMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222609: fltTcaDppEgrAllow15minBytesRateMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222610: fltTcaDppEgrAllow1hBytesRateMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222611: fltTcaDppEgrAllow1dBytesRateMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222612: fltTcaDppEgrAllow1wBytesRateMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222613: fltTcaDppEgrAllow1moBytesRateMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222614: fltTcaDppEgrAllow1qtrBytesRateMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222615: fltTcaDppEgrAllow1yearBytesRateMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222616: fltTcaDppEgrAllow5minBytesRateMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222617: fltTcaDppEgrAllow15minBytesRateMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222618: fltTcaDppEgrAllow1hBytesRateMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222619: fltTcaDppEgrAllow1dBytesRateMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222620: fltTcaDppEgrAllow1wBytesRateMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222621: fltTcaDppEgrAllow1moBytesRateMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222622: fltTcaDppEgrAllow1qtrBytesRateMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222623: fltTcaDppEgrAllow1yearBytesRateMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222624: fltTcaDppEgrAllow5minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222625: fltTcaDppEgrAllow15minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222626: fltTcaDppEgrAllow1hBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222627: fltTcaDppEgrAllow1dBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222628: fltTcaDppEgrAllow1wBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222629: fltTcaDppEgrAllow1moBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222630: fltTcaDppEgrAllow1qtrBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222631: fltTcaDppEgrAllow1yearBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222664: fltTcaDppEgrAllow5minBytesRateTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222665: fltTcaDppEgrAllow15minBytesRateTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222666: fltTcaDppEgrAllow1hBytesRateTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222667: fltTcaDppEgrAllow1dBytesRateTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222668: fltTcaDppEgrAllow1wBytesRateTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222669: fltTcaDppEgrAllow1moBytesRateTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222670: fltTcaDppEgrAllow1qtrBytesRateTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222671: fltTcaDppEgrAllow1yearBytesRateTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222720: fltTcaDppEgrAllow5minPktsLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222721: fltTcaDppEgrAllow15minPktsLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222722: fltTcaDppEgrAllow1hPktsLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222723: fltTcaDppEgrAllow1dPktsLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222724: fltTcaDppEgrAllow1wPktsLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222725: fltTcaDppEgrAllow1moPktsLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222726: fltTcaDppEgrAllow1qtrPktsLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222727: fltTcaDppEgrAllow1yearPktsLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222736: fltTcaDppEgrAllow5minPktsCum

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222737: fltTcaDppEgrAllow15minPktsCum

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222738: fltTcaDppEgrAllow1hPktsCum

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222739: fltTcaDppEgrAllow1dPktsCum

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222740: fltTcaDppEgrAllow1wPktsCum

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222741: fltTcaDppEgrAllow1moPktsCum

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222742: fltTcaDppEgrAllow1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222743: fltTcaDppEgrAllow1yearPktsCum

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222744: fltTcaDppEgrAllow5minPktsPer

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222745: fltTcaDppEgrAllow15minPktsPer

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222746: fltTcaDppEgrAllow1hPktsPer

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222747: fltTcaDppEgrAllow1dPktsPer

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222748: fltTcaDppEgrAllow1wPktsPer

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222749: fltTcaDppEgrAllow1moPktsPer

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222750: fltTcaDppEgrAllow1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222751: fltTcaDppEgrAllow1yearPktsPer

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222752: fltTcaDppEgrAllow5minPktsMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222753: fltTcaDppEgrAllow15minPktsMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222754: fltTcaDppEgrAllow1hPktsMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222755: fltTcaDppEgrAllow1dPktsMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222756: fltTcaDppEgrAllow1wPktsMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222757: fltTcaDppEgrAllow1moPktsMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222758: fltTcaDppEgrAllow1qtrPktsMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222759: fltTcaDppEgrAllow1yearPktsMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222760: fltTcaDppEgrAllow5minPktsMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222761: fltTcaDppEgrAllow15minPktsMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222762: fltTcaDppEgrAllow1hPktsMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222763: fltTcaDppEgrAllow1dPktsMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222764: fltTcaDppEgrAllow1wPktsMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222765: fltTcaDppEgrAllow1moPktsMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222766: fltTcaDppEgrAllow1qtrPktsMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222767: fltTcaDppEgrAllow1yearPktsMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222768: fltTcaDppEgrAllow5minPktsAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222769: fltTcaDppEgrAllow15minPktsAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222770: fltTcaDppEgrAllow1hPktsAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222771: fltTcaDppEgrAllow1dPktsAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222772: fltTcaDppEgrAllow1wPktsAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222773: fltTcaDppEgrAllow1moPktsAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222774: fltTcaDppEgrAllow1qtrPktsAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222775: fltTcaDppEgrAllow1yearPktsAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222800: fltTcaDppEgrAllow5minPktsTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222801: fltTcaDppEgrAllow15minPktsTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222802: fltTcaDppEgrAllow1hPktsTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222803: fltTcaDppEgrAllow1dPktsTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222804: fltTcaDppEgrAllow1wPktsTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222805: fltTcaDppEgrAllow1moPktsTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222806: fltTcaDppEgrAllow1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222807: fltTcaDppEgrAllow1yearPktsTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222808: fltTcaDppEgrAllow5minPktsRate

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222809: fltTcaDppEgrAllow15minPktsRate

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222810: fltTcaDppEgrAllow1hPktsRate

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222811: fltTcaDppEgrAllow1dPktsRate

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222812: fltTcaDppEgrAllow1wPktsRate

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222813: fltTcaDppEgrAllow1moPktsRate

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222814: fltTcaDppEgrAllow1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222815: fltTcaDppEgrAllow1yearPktsRate

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222888: fltTcaDppEgrAllow5minPktsRateLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222889: fltTcaDppEgrAllow15minPktsRateLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222890: fltTcaDppEgrAllow1hPktsRateLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222891: fltTcaDppEgrAllow1dPktsRateLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222892: fltTcaDppEgrAllow1wPktsRateLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222893: fltTcaDppEgrAllow1moPktsRateLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222894: fltTcaDppEgrAllow1qtrPktsRateLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222895: fltTcaDppEgrAllow1yearPktsRateLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222896: fltTcaDppEgrAllow5minPktsRateMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222897: fltTcaDppEgrAllow15minPktsRateMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222898: fltTcaDppEgrAllow1hPktsRateMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222899: fltTcaDppEgrAllow1dPktsRateMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2229: fltFcRsVsanAttrResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F222900: fltTcaDppEgrAllow1wPktsRateMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222901: fltTcaDppEgrAllow1moPktsRateMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222902: fltTcaDppEgrAllow1qtrPktsRateMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222903: fltTcaDppEgrAllow1yearPktsRateMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222904: fltTcaDppEgrAllow5minPktsRateMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222905: fltTcaDppEgrAllow15minPktsRateMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222906: fltTcaDppEgrAllow1hPktsRateMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222907: fltTcaDppEgrAllow1dPktsRateMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222908: fltTcaDppEgrAllow1wPktsRateMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222909: fltTcaDppEgrAllow1moPktsRateMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222910: fltTcaDppEgrAllow1qtrPktsRateMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222911: fltTcaDppEgrAllow1yearPktsRateMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222912: fltTcaDppEgrAllow5minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222913: fltTcaDppEgrAllow15minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222914: fltTcaDppEgrAllow1hPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222915: fltTcaDppEgrAllow1dPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222916: fltTcaDppEgrAllow1wPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222917: fltTcaDppEgrAllow1moPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222918: fltTcaDppEgrAllow1qtrPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222919: fltTcaDppEgrAllow1yearPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222952: fltTcaDppEgrAllow5minPktsRateTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222953: fltTcaDppEgrAllow15minPktsRateTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222954: fltTcaDppEgrAllow1hPktsRateTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222955: fltTcaDppEgrAllow1dPktsRateTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222956: fltTcaDppEgrAllow1wPktsRateTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222957: fltTcaDppEgrAllow1moPktsRateTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222958: fltTcaDppEgrAllow1qtrPktsRateTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F222959: fltTcaDppEgrAllow1yearPktsRateTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Allowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223008: fltTcaDppEgrDrop5minBytesLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223009: fltTcaDppEgrDrop15minBytesLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223010: fltTcaDppEgrDrop1hBytesLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223011: fltTcaDppEgrDrop1dBytesLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223012: fltTcaDppEgrDrop1wBytesLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223013: fltTcaDppEgrDrop1moBytesLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223014: fltTcaDppEgrDrop1qtrBytesLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223015: fltTcaDppEgrDrop1yearBytesLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223024: fltTcaDppEgrDrop5minBytesCum

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223025: fltTcaDppEgrDrop15minBytesCum

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223026: fltTcaDppEgrDrop1hBytesCum

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223027: fltTcaDppEgrDrop1dBytesCum

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223028: fltTcaDppEgrDrop1wBytesCum

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223029: fltTcaDppEgrDrop1moBytesCum

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223030: fltTcaDppEgrDrop1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223031: fltTcaDppEgrDrop1yearBytesCum

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223032: fltTcaDppEgrDrop5minBytesPer

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223033: fltTcaDppEgrDrop15minBytesPer

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223034: fltTcaDppEgrDrop1hBytesPer

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223035: fltTcaDppEgrDrop1dBytesPer

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223036: fltTcaDppEgrDrop1wBytesPer

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223037: fltTcaDppEgrDrop1moBytesPer

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223038: fltTcaDppEgrDrop1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223039: fltTcaDppEgrDrop1yearBytesPer

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223040: fltTcaDppEgrDrop5minBytesMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223041: fltTcaDppEgrDrop15minBytesMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223042: fltTcaDppEgrDrop1hBytesMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223043: fltTcaDppEgrDrop1dBytesMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223044: fltTcaDppEgrDrop1wBytesMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223045: fltTcaDppEgrDrop1moBytesMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223046: fltTcaDppEgrDrop1qtrBytesMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223047: fltTcaDppEgrDrop1yearBytesMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223048: fltTcaDppEgrDrop5minBytesMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223049: fltTcaDppEgrDrop15minBytesMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223050: fltTcaDppEgrDrop1hBytesMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223051: fltTcaDppEgrDrop1dBytesMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223052: fltTcaDppEgrDrop1wBytesMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223053: fltTcaDppEgrDrop1moBytesMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223054: fltTcaDppEgrDrop1qtrBytesMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223055: fltTcaDppEgrDrop1yearBytesMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223056: fltTcaDppEgrDrop5minBytesAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223057: fltTcaDppEgrDrop15minBytesAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223058: fltTcaDppEgrDrop1hBytesAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223059: fltTcaDppEgrDrop1dBytesAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223060: fltTcaDppEgrDrop1wBytesAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223061: fltTcaDppEgrDrop1moBytesAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223062: fltTcaDppEgrDrop1qtrBytesAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223063: fltTcaDppEgrDrop1yearBytesAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223088: fltTcaDppEgrDrop5minBytesTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223089: fltTcaDppEgrDrop15minBytesTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223090: fltTcaDppEgrDrop1hBytesTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223091: fltTcaDppEgrDrop1dBytesTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223092: fltTcaDppEgrDrop1wBytesTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223093: fltTcaDppEgrDrop1moBytesTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223094: fltTcaDppEgrDrop1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223095: fltTcaDppEgrDrop1yearBytesTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223096: fltTcaDppEgrDrop5minBytesRate

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223097: fltTcaDppEgrDrop15minBytesRate

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223098: fltTcaDppEgrDrop1hBytesRate

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223099: fltTcaDppEgrDrop1dBytesRate

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223100: fltTcaDppEgrDrop1wBytesRate

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223101: fltTcaDppEgrDrop1moBytesRate

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223102: fltTcaDppEgrDrop1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223103: fltTcaDppEgrDrop1yearBytesRate

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223176: fltTcaDppEgrDrop5minBytesRateLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223177: fltTcaDppEgrDrop15minBytesRateLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223178: fltTcaDppEgrDrop1hBytesRateLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223179: fltTcaDppEgrDrop1dBytesRateLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223180: fltTcaDppEgrDrop1wBytesRateLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223181: fltTcaDppEgrDrop1moBytesRateLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223182: fltTcaDppEgrDrop1qtrBytesRateLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223183: fltTcaDppEgrDrop1yearBytesRateLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223184: fltTcaDppEgrDrop5minBytesRateMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223185: fltTcaDppEgrDrop15minBytesRateMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223186: fltTcaDppEgrDrop1hBytesRateMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223187: fltTcaDppEgrDrop1dBytesRateMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223188: fltTcaDppEgrDrop1wBytesRateMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223189: fltTcaDppEgrDrop1moBytesRateMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223190: fltTcaDppEgrDrop1qtrBytesRateMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223191: fltTcaDppEgrDrop1yearBytesRateMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223192: fltTcaDppEgrDrop5minBytesRateMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223193: fltTcaDppEgrDrop15minBytesRateMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223194: fltTcaDppEgrDrop1hBytesRateMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223195: fltTcaDppEgrDrop1dBytesRateMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223196: fltTcaDppEgrDrop1wBytesRateMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223197: fltTcaDppEgrDrop1moBytesRateMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223198: fltTcaDppEgrDrop1qtrBytesRateMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223199: fltTcaDppEgrDrop1yearBytesRateMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2232: fltInfraRsQosPfcIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F223200: fltTcaDppEgrDrop5minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223201: fltTcaDppEgrDrop15minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223202: fltTcaDppEgrDrop1hBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223203: fltTcaDppEgrDrop1dBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223204: fltTcaDppEgrDrop1wBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223205: fltTcaDppEgrDrop1moBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223206: fltTcaDppEgrDrop1qtrBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223207: fltTcaDppEgrDrop1yearBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223240: fltTcaDppEgrDrop5minBytesRateTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223241: fltTcaDppEgrDrop15minBytesRateTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223242: fltTcaDppEgrDrop1hBytesRateTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223243: fltTcaDppEgrDrop1dBytesRateTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223244: fltTcaDppEgrDrop1wBytesRateTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223245: fltTcaDppEgrDrop1moBytesRateTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223246: fltTcaDppEgrDrop1qtrBytesRateTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223247: fltTcaDppEgrDrop1yearBytesRateTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223296: fltTcaDppEgrDrop5minPktsLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223297: fltTcaDppEgrDrop15minPktsLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223298: fltTcaDppEgrDrop1hPktsLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223299: fltTcaDppEgrDrop1dPktsLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223300: fltTcaDppEgrDrop1wPktsLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223301: fltTcaDppEgrDrop1moPktsLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223302: fltTcaDppEgrDrop1qtrPktsLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223303: fltTcaDppEgrDrop1yearPktsLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223312: fltTcaDppEgrDrop5minPktsCum

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223313: fltTcaDppEgrDrop15minPktsCum

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223314: fltTcaDppEgrDrop1hPktsCum

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223315: fltTcaDppEgrDrop1dPktsCum

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223316: fltTcaDppEgrDrop1wPktsCum

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223317: fltTcaDppEgrDrop1moPktsCum

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223318: fltTcaDppEgrDrop1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223319: fltTcaDppEgrDrop1yearPktsCum

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223320: fltTcaDppEgrDrop5minPktsPer

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223321: fltTcaDppEgrDrop15minPktsPer

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223322: fltTcaDppEgrDrop1hPktsPer

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223323: fltTcaDppEgrDrop1dPktsPer

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223324: fltTcaDppEgrDrop1wPktsPer

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223325: fltTcaDppEgrDrop1moPktsPer

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223326: fltTcaDppEgrDrop1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223327: fltTcaDppEgrDrop1yearPktsPer

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223328: fltTcaDppEgrDrop5minPktsMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223329: fltTcaDppEgrDrop15minPktsMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223330: fltTcaDppEgrDrop1hPktsMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223331: fltTcaDppEgrDrop1dPktsMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223332: fltTcaDppEgrDrop1wPktsMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223333: fltTcaDppEgrDrop1moPktsMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223334: fltTcaDppEgrDrop1qtrPktsMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223335: fltTcaDppEgrDrop1yearPktsMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223336: fltTcaDppEgrDrop5minPktsMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223337: fltTcaDppEgrDrop15minPktsMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223338: fltTcaDppEgrDrop1hPktsMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223339: fltTcaDppEgrDrop1dPktsMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223340: fltTcaDppEgrDrop1wPktsMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223341: fltTcaDppEgrDrop1moPktsMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223342: fltTcaDppEgrDrop1qtrPktsMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223343: fltTcaDppEgrDrop1yearPktsMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223344: fltTcaDppEgrDrop5minPktsAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223345: fltTcaDppEgrDrop15minPktsAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223346: fltTcaDppEgrDrop1hPktsAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223347: fltTcaDppEgrDrop1dPktsAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223348: fltTcaDppEgrDrop1wPktsAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223349: fltTcaDppEgrDrop1moPktsAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223350: fltTcaDppEgrDrop1qtrPktsAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223351: fltTcaDppEgrDrop1yearPktsAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223376: fltTcaDppEgrDrop5minPktsTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223377: fltTcaDppEgrDrop15minPktsTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223378: fltTcaDppEgrDrop1hPktsTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223379: fltTcaDppEgrDrop1dPktsTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223380: fltTcaDppEgrDrop1wPktsTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223381: fltTcaDppEgrDrop1moPktsTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223382: fltTcaDppEgrDrop1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223383: fltTcaDppEgrDrop1yearPktsTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223384: fltTcaDppEgrDrop5minPktsRate

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223385: fltTcaDppEgrDrop15minPktsRate

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223386: fltTcaDppEgrDrop1hPktsRate

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223387: fltTcaDppEgrDrop1dPktsRate

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223388: fltTcaDppEgrDrop1wPktsRate

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223389: fltTcaDppEgrDrop1moPktsRate

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223390: fltTcaDppEgrDrop1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223391: fltTcaDppEgrDrop1yearPktsRate

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2234: fltInfraRsFcFabricPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F223464: fltTcaDppEgrDrop5minPktsRateLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223465: fltTcaDppEgrDrop15minPktsRateLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223466: fltTcaDppEgrDrop1hPktsRateLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223467: fltTcaDppEgrDrop1dPktsRateLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223468: fltTcaDppEgrDrop1wPktsRateLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223469: fltTcaDppEgrDrop1moPktsRateLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223470: fltTcaDppEgrDrop1qtrPktsRateLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223471: fltTcaDppEgrDrop1yearPktsRateLast

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223472: fltTcaDppEgrDrop5minPktsRateMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223473: fltTcaDppEgrDrop15minPktsRateMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223474: fltTcaDppEgrDrop1hPktsRateMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223475: fltTcaDppEgrDrop1dPktsRateMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223476: fltTcaDppEgrDrop1wPktsRateMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223477: fltTcaDppEgrDrop1moPktsRateMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223478: fltTcaDppEgrDrop1qtrPktsRateMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223479: fltTcaDppEgrDrop1yearPktsRateMin

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223480: fltTcaDppEgrDrop5minPktsRateMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223481: fltTcaDppEgrDrop15minPktsRateMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223482: fltTcaDppEgrDrop1hPktsRateMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223483: fltTcaDppEgrDrop1dPktsRateMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223484: fltTcaDppEgrDrop1wPktsRateMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223485: fltTcaDppEgrDrop1moPktsRateMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223486: fltTcaDppEgrDrop1qtrPktsRateMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223487: fltTcaDppEgrDrop1yearPktsRateMax

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223488: fltTcaDppEgrDrop5minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223489: fltTcaDppEgrDrop15minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223490: fltTcaDppEgrDrop1hPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223491: fltTcaDppEgrDrop1dPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223492: fltTcaDppEgrDrop1wPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223493: fltTcaDppEgrDrop1moPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223494: fltTcaDppEgrDrop1qtrPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223495: fltTcaDppEgrDrop1yearPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2235: fltInfraRsFcInstPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F223528: fltTcaDppEgrDrop5minPktsRateTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223529: fltTcaDppEgrDrop15minPktsRateTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223530: fltTcaDppEgrDrop1hPktsRateTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223531: fltTcaDppEgrDrop1dPktsRateTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223532: fltTcaDppEgrDrop1wPktsRateTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223533: fltTcaDppEgrDrop1moPktsRateTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223534: fltTcaDppEgrDrop1qtrPktsRateTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223535: fltTcaDppEgrDrop1yearPktsRateTr

Severity: variable

Explanation: This fault is caused by "Egress Policer Dropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223584: fltTcaDppIngrAllow5minBytesLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223585: fltTcaDppIngrAllow15minBytesLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223586: fltTcaDppIngrAllow1hBytesLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223587: fltTcaDppIngrAllow1dBytesLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223588: fltTcaDppIngrAllow1wBytesLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223589: fltTcaDppIngrAllow1moBytesLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223590: fltTcaDppIngrAllow1qtrBytesLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223591: fltTcaDppIngrAllow1yearBytesLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223600: fltTcaDppIngrAllow5minBytesCum

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223601: fltTcaDppIngrAllow15minBytesCum

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223602: fltTcaDppIngrAllow1hBytesCum

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223603: fltTcaDppIngrAllow1dBytesCum

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223604: fltTcaDppIngrAllow1wBytesCum

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223605: fltTcaDppIngrAllow1moBytesCum

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223606: fltTcaDppIngrAllow1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223607: fltTcaDppIngrAllow1yearBytesCum

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223608: fltTcaDppIngrAllow5minBytesPer

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223609: fltTcaDppIngrAllow15minBytesPer

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223610: fltTcaDppIngrAllow1hBytesPer

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223611: fltTcaDppIngrAllow1dBytesPer

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223612: fltTcaDppIngrAllow1wBytesPer

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223613: fltTcaDppIngrAllow1moBytesPer

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223614: fltTcaDppIngrAllow1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223615: fltTcaDppIngrAllow1yearBytesPer

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223616: fltTcaDppIngrAllow5minBytesMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223617: fltTcaDppIngrAllow15minBytesMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223618: fltTcaDppIngrAllow1hBytesMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223619: fltTcaDppIngrAllow1dBytesMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223620: fltTcaDppIngrAllow1wBytesMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223621: fltTcaDppIngrAllow1moBytesMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223622: fltTcaDppIngrAllow1qtrBytesMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223623: fltTcaDppIngrAllow1yearBytesMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223624: fltTcaDppIngrAllow5minBytesMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223625: fltTcaDppIngrAllow15minBytesMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223626: fltTcaDppIngrAllow1hBytesMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223627: fltTcaDppIngrAllow1dBytesMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223628: fltTcaDppIngrAllow1wBytesMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223629: fltTcaDppIngrAllow1moBytesMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223630: fltTcaDppIngrAllow1qtrBytesMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223631: fltTcaDppIngrAllow1yearBytesMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223632: fltTcaDppIngrAllow5minBytesAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223633: fltTcaDppIngrAllow15minBytesAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223634: fltTcaDppIngrAllow1hBytesAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223635: fltTcaDppIngrAllow1dBytesAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223636: fltTcaDppIngrAllow1wBytesAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223637: fltTcaDppIngrAllow1moBytesAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223638: fltTcaDppIngrAllow1qtrBytesAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223639: fltTcaDppIngrAllow1yearBytesAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223664: fltTcaDppIngrAllow5minBytesTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223665: fltTcaDppIngrAllow15minBytesTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223666: fltTcaDppIngrAllow1hBytesTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223667: fltTcaDppIngrAllow1dBytesTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223668: fltTcaDppIngrAllow1wBytesTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223669: fltTcaDppIngrAllow1moBytesTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223670: fltTcaDppIngrAllow1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223671: fltTcaDppIngrAllow1yearBytesTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223672: fltTcaDppIngrAllow5minBytesRate

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223673: fltTcaDppIngrAllow15minBytesRate

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223674: fltTcaDppIngrAllow1hBytesRate

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223675: fltTcaDppIngrAllow1dBytesRate

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223676: fltTcaDppIngrAllow1wBytesRate

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223677: fltTcaDppIngrAllow1moBytesRate

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223678: fltTcaDppIngrAllow1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223679: fltTcaDppIngrAllow1yearBytesRate

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223752: fltTcaDppIngrAllow5minBytesRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223753: fltTcaDppIngrAllow15minBytesRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223754: fltTcaDppIngrAllow1hBytesRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223755: fltTcaDppIngrAllow1dBytesRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223756: fltTcaDppIngrAllow1wBytesRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223757: fltTcaDppIngrAllow1moBytesRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223758: fltTcaDppIngrAllow1qtrBytesRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223759: fltTcaDppIngrAllow1yearBytesRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223760: fltTcaDppIngrAllow5minBytesRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223761: fltTcaDppIngrAllow15minBytesRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223762: fltTcaDppIngrAllow1hBytesRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223763: fltTcaDppIngrAllow1dBytesRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223764: fltTcaDppIngrAllow1wBytesRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223765: fltTcaDppIngrAllow1moBytesRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223766: fltTcaDppIngrAllow1qtrBytesRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223767: fltTcaDppIngrAllow1yearBytesRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223768: fltTcaDppIngrAllow5minBytesRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223769: fltTcaDppIngrAllow15minBytesRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223770: fltTcaDppIngrAllow1hBytesRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223771: fltTcaDppIngrAllow1dBytesRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223772: fltTcaDppIngrAllow1wBytesRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223773: fltTcaDppIngrAllow1moBytesRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223774: fltTcaDppIngrAllow1qtrBytesRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223775: fltTcaDppIngrAllow1yearBytesRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223776: fltTcaDppIngrAllow5minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223777: fltTcaDppIngrAllow15minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223778: fltTcaDppIngrAllow1hBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223779: fltTcaDppIngrAllow1dBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223780: fltTcaDppIngrAllow1wBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223781: fltTcaDppIngrAllow1moBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223782: fltTcaDppIngrAllow1qtrBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223783: fltTcaDppIngrAllow1yearBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2238: fltOpflexODevFaultInfoOperationalIssues

Severity: major

Explanation: This fault is raised when there is an operational issue with respect to the Opflex device

Recommended Action: If you see this fault, take the following actions:

1. From the fault description resolve the issue on the opflex device

2. If the above actions did not resolve the issue, collect avs-tech-support file and contact Cisco TAC.

F223816: fltTcaDppIngrAllow5minBytesRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223817: fltTcaDppIngrAllow15minBytesRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223818: fltTcaDppIngrAllow1hBytesRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223819: fltTcaDppIngrAllow1dBytesRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223820: fltTcaDppIngrAllow1wBytesRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223821: fltTcaDppIngrAllow1moBytesRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223822: fltTcaDppIngrAllow1qtrBytesRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223823: fltTcaDppIngrAllow1yearBytesRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223872: fltTcaDppIngrAllow5minPktsLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223873: fltTcaDppIngrAllow15minPktsLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223874: fltTcaDppIngrAllow1hPktsLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223875: fltTcaDppIngrAllow1dPktsLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223876: fltTcaDppIngrAllow1wPktsLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223877: fltTcaDppIngrAllow1moPktsLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223878: fltTcaDppIngrAllow1qtrPktsLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223879: fltTcaDppIngrAllow1yearPktsLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223888: fltTcaDppIngrAllow5minPktsCum

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223889: fltTcaDppIngrAllow15minPktsCum

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223890: fltTcaDppIngrAllow1hPktsCum

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223891: fltTcaDppIngrAllow1dPktsCum

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223892: fltTcaDppIngrAllow1wPktsCum

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223893: fltTcaDppIngrAllow1moPktsCum

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223894: fltTcaDppIngrAllow1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223895: fltTcaDppIngrAllow1yearPktsCum

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223896: fltTcaDppIngrAllow5minPktsPer

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223897: fltTcaDppIngrAllow15minPktsPer

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223898: fltTcaDppIngrAllow1hPktsPer

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223899: fltTcaDppIngrAllow1dPktsPer

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2239: fltOpflexIDEpFaultInfoOperationalIssues

Severity: major

Explanation: This fault is raised when there is an operational issue with respect to the OpFlex End Points.

Recommended Action: If you see this fault, take the following actions:

1. From the fault description resolve the issue for the end point

2. If the above actions did not resolve the issue, collect avs-tech-support file and contact Cisco TAC.

F223900: fltTcaDppIngrAllow1wPktsPer

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223901: fltTcaDppIngrAllow1moPktsPer

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223902: fltTcaDppIngrAllow1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223903: fltTcaDppIngrAllow1yearPktsPer

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223904: fltTcaDppIngrAllow5minPktsMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223905: fltTcaDppIngrAllow15minPktsMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223906: fltTcaDppIngrAllow1hPktsMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223907: fltTcaDppIngrAllow1dPktsMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223908: fltTcaDppIngrAllow1wPktsMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223909: fltTcaDppIngrAllow1moPktsMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223910: fltTcaDppIngrAllow1qtrPktsMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223911: fltTcaDppIngrAllow1yearPktsMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223912: fltTcaDppIngrAllow5minPktsMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223913: fltTcaDppIngrAllow15minPktsMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223914: fltTcaDppIngrAllow1hPktsMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223915: fltTcaDppIngrAllow1dPktsMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223916: fltTcaDppIngrAllow1wPktsMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223917: fltTcaDppIngrAllow1moPktsMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223918: fltTcaDppIngrAllow1qtrPktsMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223919: fltTcaDppIngrAllow1yearPktsMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223920: fltTcaDppIngrAllow5minPktsAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223921: fltTcaDppIngrAllow15minPktsAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223922: fltTcaDppIngrAllow1hPktsAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223923: fltTcaDppIngrAllow1dPktsAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223924: fltTcaDppIngrAllow1wPktsAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223925: fltTcaDppIngrAllow1moPktsAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223926: fltTcaDppIngrAllow1qtrPktsAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223927: fltTcaDppIngrAllow1yearPktsAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223952: fltTcaDppIngrAllow5minPktsTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223953: fltTcaDppIngrAllow15minPktsTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223954: fltTcaDppIngrAllow1hPktsTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223955: fltTcaDppIngrAllow1dPktsTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223956: fltTcaDppIngrAllow1wPktsTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223957: fltTcaDppIngrAllow1moPktsTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223958: fltTcaDppIngrAllow1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223959: fltTcaDppIngrAllow1yearPktsTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223960: fltTcaDppIngrAllow5minPktsRate

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223961: fltTcaDppIngrAllow15minPktsRate

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223962: fltTcaDppIngrAllow1hPktsRate

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223963: fltTcaDppIngrAllow1dPktsRate

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223964: fltTcaDppIngrAllow1wPktsRate

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223965: fltTcaDppIngrAllow1moPktsRate

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223966: fltTcaDppIngrAllow1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F223967: fltTcaDppIngrAllow1yearPktsRate

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224040: fltTcaDppIngrAllow5minPktsRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224041: fltTcaDppIngrAllow15minPktsRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224042: fltTcaDppIngrAllow1hPktsRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224043: fltTcaDppIngrAllow1dPktsRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224044: fltTcaDppIngrAllow1wPktsRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224045: fltTcaDppIngrAllow1moPktsRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224046: fltTcaDppIngrAllow1qtrPktsRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224047: fltTcaDppIngrAllow1yearPktsRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224048: fltTcaDppIngrAllow5minPktsRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224049: fltTcaDppIngrAllow15minPktsRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224050: fltTcaDppIngrAllow1hPktsRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224051: fltTcaDppIngrAllow1dPktsRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224052: fltTcaDppIngrAllow1wPktsRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224053: fltTcaDppIngrAllow1moPktsRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224054: fltTcaDppIngrAllow1qtrPktsRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224055: fltTcaDppIngrAllow1yearPktsRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224056: fltTcaDppIngrAllow5minPktsRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224057: fltTcaDppIngrAllow15minPktsRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224058: fltTcaDppIngrAllow1hPktsRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224059: fltTcaDppIngrAllow1dPktsRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224060: fltTcaDppIngrAllow1wPktsRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224061: fltTcaDppIngrAllow1moPktsRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224062: fltTcaDppIngrAllow1qtrPktsRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224063: fltTcaDppIngrAllow1yearPktsRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224064: fltTcaDppIngrAllow5minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224065: fltTcaDppIngrAllow15minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224066: fltTcaDppIngrAllow1hPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224067: fltTcaDppIngrAllow1dPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224068: fltTcaDppIngrAllow1wPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224069: fltTcaDppIngrAllow1moPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224070: fltTcaDppIngrAllow1qtrPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224071: fltTcaDppIngrAllow1yearPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224104: fltTcaDppIngrAllow5minPktsRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224105: fltTcaDppIngrAllow15minPktsRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224106: fltTcaDppIngrAllow1hPktsRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224107: fltTcaDppIngrAllow1dPktsRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224108: fltTcaDppIngrAllow1wPktsRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224109: fltTcaDppIngrAllow1moPktsRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224110: fltTcaDppIngrAllow1qtrPktsRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224111: fltTcaDppIngrAllow1yearPktsRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Allowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224160: fltTcaDppIngrDrop5minBytesLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224161: fltTcaDppIngrDrop15minBytesLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224162: fltTcaDppIngrDrop1hBytesLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224163: fltTcaDppIngrDrop1dBytesLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224164: fltTcaDppIngrDrop1wBytesLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224165: fltTcaDppIngrDrop1moBytesLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224166: fltTcaDppIngrDrop1qtrBytesLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224167: fltTcaDppIngrDrop1yearBytesLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224176: fltTcaDppIngrDrop5minBytesCum

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224177: fltTcaDppIngrDrop15minBytesCum

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224178: fltTcaDppIngrDrop1hBytesCum

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224179: fltTcaDppIngrDrop1dBytesCum

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224180: fltTcaDppIngrDrop1wBytesCum

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224181: fltTcaDppIngrDrop1moBytesCum

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224182: fltTcaDppIngrDrop1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224183: fltTcaDppIngrDrop1yearBytesCum

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224184: fltTcaDppIngrDrop5minBytesPer

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224185: fltTcaDppIngrDrop15minBytesPer

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224186: fltTcaDppIngrDrop1hBytesPer

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224187: fltTcaDppIngrDrop1dBytesPer

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224188: fltTcaDppIngrDrop1wBytesPer

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224189: fltTcaDppIngrDrop1moBytesPer

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224190: fltTcaDppIngrDrop1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224191: fltTcaDppIngrDrop1yearBytesPer

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224192: fltTcaDppIngrDrop5minBytesMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224193: fltTcaDppIngrDrop15minBytesMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224194: fltTcaDppIngrDrop1hBytesMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224195: fltTcaDppIngrDrop1dBytesMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224196: fltTcaDppIngrDrop1wBytesMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224197: fltTcaDppIngrDrop1moBytesMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224198: fltTcaDppIngrDrop1qtrBytesMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224199: fltTcaDppIngrDrop1yearBytesMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224200: fltTcaDppIngrDrop5minBytesMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224201: fltTcaDppIngrDrop15minBytesMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224202: fltTcaDppIngrDrop1hBytesMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224203: fltTcaDppIngrDrop1dBytesMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224204: fltTcaDppIngrDrop1wBytesMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224205: fltTcaDppIngrDrop1moBytesMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224206: fltTcaDppIngrDrop1qtrBytesMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224207: fltTcaDppIngrDrop1yearBytesMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224208: fltTcaDppIngrDrop5minBytesAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224209: fltTcaDppIngrDrop15minBytesAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224210: fltTcaDppIngrDrop1hBytesAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224211: fltTcaDppIngrDrop1dBytesAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224212: fltTcaDppIngrDrop1wBytesAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224213: fltTcaDppIngrDrop1moBytesAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224214: fltTcaDppIngrDrop1qtrBytesAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224215: fltTcaDppIngrDrop1yearBytesAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224240: fltTcaDppIngrDrop5minBytesTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224241: fltTcaDppIngrDrop15minBytesTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224242: fltTcaDppIngrDrop1hBytesTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224243: fltTcaDppIngrDrop1dBytesTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224244: fltTcaDppIngrDrop1wBytesTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224245: fltTcaDppIngrDrop1moBytesTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224246: fltTcaDppIngrDrop1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224247: fltTcaDppIngrDrop1yearBytesTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224248: fltTcaDppIngrDrop5minBytesRate

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224249: fltTcaDppIngrDrop15minBytesRate

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224250: fltTcaDppIngrDrop1hBytesRate

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224251: fltTcaDppIngrDrop1dBytesRate

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224252: fltTcaDppIngrDrop1wBytesRate

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224253: fltTcaDppIngrDrop1moBytesRate

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224254: fltTcaDppIngrDrop1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224255: fltTcaDppIngrDrop1yearBytesRate

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224328: fltTcaDppIngrDrop5minBytesRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224329: fltTcaDppIngrDrop15minBytesRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224330: fltTcaDppIngrDrop1hBytesRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224331: fltTcaDppIngrDrop1dBytesRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224332: fltTcaDppIngrDrop1wBytesRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224333: fltTcaDppIngrDrop1moBytesRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224334: fltTcaDppIngrDrop1qtrBytesRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224335: fltTcaDppIngrDrop1yearBytesRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224336: fltTcaDppIngrDrop5minBytesRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224337: fltTcaDppIngrDrop15minBytesRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224338: fltTcaDppIngrDrop1hBytesRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224339: fltTcaDppIngrDrop1dBytesRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224340: fltTcaDppIngrDrop1wBytesRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224341: fltTcaDppIngrDrop1moBytesRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224342: fltTcaDppIngrDrop1qtrBytesRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224343: fltTcaDppIngrDrop1yearBytesRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224344: fltTcaDppIngrDrop5minBytesRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224345: fltTcaDppIngrDrop15minBytesRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224346: fltTcaDppIngrDrop1hBytesRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224347: fltTcaDppIngrDrop1dBytesRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224348: fltTcaDppIngrDrop1wBytesRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224349: fltTcaDppIngrDrop1moBytesRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224350: fltTcaDppIngrDrop1qtrBytesRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224351: fltTcaDppIngrDrop1yearBytesRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224352: fltTcaDppIngrDrop5minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224353: fltTcaDppIngrDrop15minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224354: fltTcaDppIngrDrop1hBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224355: fltTcaDppIngrDrop1dBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224356: fltTcaDppIngrDrop1wBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224357: fltTcaDppIngrDrop1moBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224358: fltTcaDppIngrDrop1qtrBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224359: fltTcaDppIngrDrop1yearBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224392: fltTcaDppIngrDrop5minBytesRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224393: fltTcaDppIngrDrop15minBytesRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224394: fltTcaDppIngrDrop1hBytesRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224395: fltTcaDppIngrDrop1dBytesRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224396: fltTcaDppIngrDrop1wBytesRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224397: fltTcaDppIngrDrop1moBytesRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224398: fltTcaDppIngrDrop1qtrBytesRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224399: fltTcaDppIngrDrop1yearBytesRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224448: fltTcaDppIngrDrop5minPktsLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224449: fltTcaDppIngrDrop15minPktsLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224450: fltTcaDppIngrDrop1hPktsLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224451: fltTcaDppIngrDrop1dPktsLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224452: fltTcaDppIngrDrop1wPktsLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224453: fltTcaDppIngrDrop1moPktsLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224454: fltTcaDppIngrDrop1qtrPktsLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224455: fltTcaDppIngrDrop1yearPktsLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224464: fltTcaDppIngrDrop5minPktsCum

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224465: fltTcaDppIngrDrop15minPktsCum

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224466: fltTcaDppIngrDrop1hPktsCum

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224467: fltTcaDppIngrDrop1dPktsCum

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224468: fltTcaDppIngrDrop1wPktsCum

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224469: fltTcaDppIngrDrop1moPktsCum

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224470: fltTcaDppIngrDrop1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224471: fltTcaDppIngrDrop1yearPktsCum

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224472: fltTcaDppIngrDrop5minPktsPer

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224473: fltTcaDppIngrDrop15minPktsPer

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224474: fltTcaDppIngrDrop1hPktsPer

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224475: fltTcaDppIngrDrop1dPktsPer

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224476: fltTcaDppIngrDrop1wPktsPer

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224477: fltTcaDppIngrDrop1moPktsPer

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224478: fltTcaDppIngrDrop1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224479: fltTcaDppIngrDrop1yearPktsPer

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224480: fltTcaDppIngrDrop5minPktsMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224481: fltTcaDppIngrDrop15minPktsMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224482: fltTcaDppIngrDrop1hPktsMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224483: fltTcaDppIngrDrop1dPktsMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224484: fltTcaDppIngrDrop1wPktsMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224485: fltTcaDppIngrDrop1moPktsMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224486: fltTcaDppIngrDrop1qtrPktsMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224487: fltTcaDppIngrDrop1yearPktsMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224488: fltTcaDppIngrDrop5minPktsMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224489: fltTcaDppIngrDrop15minPktsMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224490: fltTcaDppIngrDrop1hPktsMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224491: fltTcaDppIngrDrop1dPktsMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224492: fltTcaDppIngrDrop1wPktsMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224493: fltTcaDppIngrDrop1moPktsMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224494: fltTcaDppIngrDrop1qtrPktsMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224495: fltTcaDppIngrDrop1yearPktsMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224496: fltTcaDppIngrDrop5minPktsAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224497: fltTcaDppIngrDrop15minPktsAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224498: fltTcaDppIngrDrop1hPktsAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224499: fltTcaDppIngrDrop1dPktsAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224500: fltTcaDppIngrDrop1wPktsAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224501: fltTcaDppIngrDrop1moPktsAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224502: fltTcaDppIngrDrop1qtrPktsAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224503: fltTcaDppIngrDrop1yearPktsAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224528: fltTcaDppIngrDrop5minPktsTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224529: fltTcaDppIngrDrop15minPktsTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224530: fltTcaDppIngrDrop1hPktsTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224531: fltTcaDppIngrDrop1dPktsTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224532: fltTcaDppIngrDrop1wPktsTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224533: fltTcaDppIngrDrop1moPktsTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224534: fltTcaDppIngrDrop1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224535: fltTcaDppIngrDrop1yearPktsTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224536: fltTcaDppIngrDrop5minPktsRate

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224537: fltTcaDppIngrDrop15minPktsRate

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224538: fltTcaDppIngrDrop1hPktsRate

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224539: fltTcaDppIngrDrop1dPktsRate

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224540: fltTcaDppIngrDrop1wPktsRate

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224541: fltTcaDppIngrDrop1moPktsRate

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224542: fltTcaDppIngrDrop1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224543: fltTcaDppIngrDrop1yearPktsRate

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224616: fltTcaDppIngrDrop5minPktsRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224617: fltTcaDppIngrDrop15minPktsRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224618: fltTcaDppIngrDrop1hPktsRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224619: fltTcaDppIngrDrop1dPktsRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224620: fltTcaDppIngrDrop1wPktsRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224621: fltTcaDppIngrDrop1moPktsRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224622: fltTcaDppIngrDrop1qtrPktsRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224623: fltTcaDppIngrDrop1yearPktsRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224624: fltTcaDppIngrDrop5minPktsRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224625: fltTcaDppIngrDrop15minPktsRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224626: fltTcaDppIngrDrop1hPktsRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224627: fltTcaDppIngrDrop1dPktsRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224628: fltTcaDppIngrDrop1wPktsRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224629: fltTcaDppIngrDrop1moPktsRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224630: fltTcaDppIngrDrop1qtrPktsRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224631: fltTcaDppIngrDrop1yearPktsRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224632: fltTcaDppIngrDrop5minPktsRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224633: fltTcaDppIngrDrop15minPktsRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224634: fltTcaDppIngrDrop1hPktsRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224635: fltTcaDppIngrDrop1dPktsRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224636: fltTcaDppIngrDrop1wPktsRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224637: fltTcaDppIngrDrop1moPktsRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224638: fltTcaDppIngrDrop1qtrPktsRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224639: fltTcaDppIngrDrop1yearPktsRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224640: fltTcaDppIngrDrop5minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224641: fltTcaDppIngrDrop15minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224642: fltTcaDppIngrDrop1hPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224643: fltTcaDppIngrDrop1dPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224644: fltTcaDppIngrDrop1wPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224645: fltTcaDppIngrDrop1moPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224646: fltTcaDppIngrDrop1qtrPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224647: fltTcaDppIngrDrop1yearPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224680: fltTcaDppIngrDrop5minPktsRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224681: fltTcaDppIngrDrop15minPktsRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224682: fltTcaDppIngrDrop1hPktsRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224683: fltTcaDppIngrDrop1dPktsRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224684: fltTcaDppIngrDrop1wPktsRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224685: fltTcaDppIngrDrop1moPktsRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224686: fltTcaDppIngrDrop1qtrPktsRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F224687: fltTcaDppIngrDrop1yearPktsRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Policer Dropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2247: fltVmmEpgAggrDeployFailed

Severity: major

Explanation: This fault is raised when the trunk Endpoint Group cannot be deployed due to a missing or invalid configuration.

Recommended Action: If you see this fault, take the following actions:

1. Verify that a VLAN pool is associated to the VMM Domain.

2. Verity that any encapsulation block of the trunk EPG is part of an encapsulation block in the VLAN pool.

3. Review the fault message and add missing or remove invalid configuration.

4. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F2250: fltIgmpRsIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2251: fltInfraRsQosSdIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F225880: fltTcaActrlRuleHit5minPktsLast

Severity: variable

Explanation: This fault is caused by "hit packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225881: fltTcaActrlRuleHit15minPktsLast

Severity: variable

Explanation: This fault is caused by "hit packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225882: fltTcaActrlRuleHit1hPktsLast

Severity: variable

Explanation: This fault is caused by "hit packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225883: fltTcaActrlRuleHit1dPktsLast

Severity: variable

Explanation: This fault is caused by "hit packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225884: fltTcaActrlRuleHit1wPktsLast

Severity: variable

Explanation: This fault is caused by "hit packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225885: fltTcaActrlRuleHit1moPktsLast

Severity: variable

Explanation: This fault is caused by "hit packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225886: fltTcaActrlRuleHit1qtrPktsLast

Severity: variable

Explanation: This fault is caused by "hit packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225887: fltTcaActrlRuleHit1yearPktsLast

Severity: variable

Explanation: This fault is caused by "hit packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225896: fltTcaActrlRuleHit5minPktsCum

Severity: variable

Explanation: This fault is caused by "hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225897: fltTcaActrlRuleHit15minPktsCum

Severity: variable

Explanation: This fault is caused by "hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225898: fltTcaActrlRuleHit1hPktsCum

Severity: variable

Explanation: This fault is caused by "hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225899: fltTcaActrlRuleHit1dPktsCum

Severity: variable

Explanation: This fault is caused by "hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225900: fltTcaActrlRuleHit1wPktsCum

Severity: variable

Explanation: This fault is caused by "hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225901: fltTcaActrlRuleHit1moPktsCum

Severity: variable

Explanation: This fault is caused by "hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225902: fltTcaActrlRuleHit1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225903: fltTcaActrlRuleHit1yearPktsCum

Severity: variable

Explanation: This fault is caused by "hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225904: fltTcaActrlRuleHit5minPktsPer

Severity: variable

Explanation: This fault is caused by "hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225905: fltTcaActrlRuleHit15minPktsPer

Severity: variable

Explanation: This fault is caused by "hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225906: fltTcaActrlRuleHit1hPktsPer

Severity: variable

Explanation: This fault is caused by "hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225907: fltTcaActrlRuleHit1dPktsPer

Severity: variable

Explanation: This fault is caused by "hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225908: fltTcaActrlRuleHit1wPktsPer

Severity: variable

Explanation: This fault is caused by "hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225909: fltTcaActrlRuleHit1moPktsPer

Severity: variable

Explanation: This fault is caused by "hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225910: fltTcaActrlRuleHit1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225911: fltTcaActrlRuleHit1yearPktsPer

Severity: variable

Explanation: This fault is caused by "hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225912: fltTcaActrlRuleHit5minPktsMin

Severity: variable

Explanation: This fault is caused by "hit packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225913: fltTcaActrlRuleHit15minPktsMin

Severity: variable

Explanation: This fault is caused by "hit packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225914: fltTcaActrlRuleHit1hPktsMin

Severity: variable

Explanation: This fault is caused by "hit packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225915: fltTcaActrlRuleHit1dPktsMin

Severity: variable

Explanation: This fault is caused by "hit packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225916: fltTcaActrlRuleHit1wPktsMin

Severity: variable

Explanation: This fault is caused by "hit packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225917: fltTcaActrlRuleHit1moPktsMin

Severity: variable

Explanation: This fault is caused by "hit packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225918: fltTcaActrlRuleHit1qtrPktsMin

Severity: variable

Explanation: This fault is caused by "hit packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225919: fltTcaActrlRuleHit1yearPktsMin

Severity: variable

Explanation: This fault is caused by "hit packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225920: fltTcaActrlRuleHit5minPktsMax

Severity: variable

Explanation: This fault is caused by "hit packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225921: fltTcaActrlRuleHit15minPktsMax

Severity: variable

Explanation: This fault is caused by "hit packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225922: fltTcaActrlRuleHit1hPktsMax

Severity: variable

Explanation: This fault is caused by "hit packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225923: fltTcaActrlRuleHit1dPktsMax

Severity: variable

Explanation: This fault is caused by "hit packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225924: fltTcaActrlRuleHit1wPktsMax

Severity: variable

Explanation: This fault is caused by "hit packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225925: fltTcaActrlRuleHit1moPktsMax

Severity: variable

Explanation: This fault is caused by "hit packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225926: fltTcaActrlRuleHit1qtrPktsMax

Severity: variable

Explanation: This fault is caused by "hit packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225927: fltTcaActrlRuleHit1yearPktsMax

Severity: variable

Explanation: This fault is caused by "hit packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225928: fltTcaActrlRuleHit5minPktsAvg

Severity: variable

Explanation: This fault is caused by "hit packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225929: fltTcaActrlRuleHit15minPktsAvg

Severity: variable

Explanation: This fault is caused by "hit packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225930: fltTcaActrlRuleHit1hPktsAvg

Severity: variable

Explanation: This fault is caused by "hit packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225931: fltTcaActrlRuleHit1dPktsAvg

Severity: variable

Explanation: This fault is caused by "hit packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225932: fltTcaActrlRuleHit1wPktsAvg

Severity: variable

Explanation: This fault is caused by "hit packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225933: fltTcaActrlRuleHit1moPktsAvg

Severity: variable

Explanation: This fault is caused by "hit packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225934: fltTcaActrlRuleHit1qtrPktsAvg

Severity: variable

Explanation: This fault is caused by "hit packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225935: fltTcaActrlRuleHit1yearPktsAvg

Severity: variable

Explanation: This fault is caused by "hit packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225960: fltTcaActrlRuleHit5minPktsTr

Severity: variable

Explanation: This fault is caused by "hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225961: fltTcaActrlRuleHit15minPktsTr

Severity: variable

Explanation: This fault is caused by "hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225962: fltTcaActrlRuleHit1hPktsTr

Severity: variable

Explanation: This fault is caused by "hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225963: fltTcaActrlRuleHit1dPktsTr

Severity: variable

Explanation: This fault is caused by "hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225964: fltTcaActrlRuleHit1wPktsTr

Severity: variable

Explanation: This fault is caused by "hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225965: fltTcaActrlRuleHit1moPktsTr

Severity: variable

Explanation: This fault is caused by "hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225966: fltTcaActrlRuleHit1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225967: fltTcaActrlRuleHit1yearPktsTr

Severity: variable

Explanation: This fault is caused by "hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225968: fltTcaActrlRuleHit5minPktsRate

Severity: variable

Explanation: This fault is caused by "hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225969: fltTcaActrlRuleHit15minPktsRate

Severity: variable

Explanation: This fault is caused by "hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225970: fltTcaActrlRuleHit1hPktsRate

Severity: variable

Explanation: This fault is caused by "hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225971: fltTcaActrlRuleHit1dPktsRate

Severity: variable

Explanation: This fault is caused by "hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225972: fltTcaActrlRuleHit1wPktsRate

Severity: variable

Explanation: This fault is caused by "hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225973: fltTcaActrlRuleHit1moPktsRate

Severity: variable

Explanation: This fault is caused by "hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225974: fltTcaActrlRuleHit1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F225975: fltTcaActrlRuleHit1yearPktsRate

Severity: variable

Explanation: This fault is caused by "hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226048: fltTcaActrlRuleHitPart5minPktsLast

Severity: variable

Explanation: This fault is caused by "hit packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226049: fltTcaActrlRuleHitPart15minPktsLast

Severity: variable

Explanation: This fault is caused by "hit packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226050: fltTcaActrlRuleHitPart1hPktsLast

Severity: variable

Explanation: This fault is caused by "hit packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226051: fltTcaActrlRuleHitPart1dPktsLast

Severity: variable

Explanation: This fault is caused by "hit packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226052: fltTcaActrlRuleHitPart1wPktsLast

Severity: variable

Explanation: This fault is caused by "hit packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226053: fltTcaActrlRuleHitPart1moPktsLast

Severity: variable

Explanation: This fault is caused by "hit packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226054: fltTcaActrlRuleHitPart1qtrPktsLast

Severity: variable

Explanation: This fault is caused by "hit packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226055: fltTcaActrlRuleHitPart1yearPktsLast

Severity: variable

Explanation: This fault is caused by "hit packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226064: fltTcaActrlRuleHitPart5minPktsCum

Severity: variable

Explanation: This fault is caused by "hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226065: fltTcaActrlRuleHitPart15minPktsCum

Severity: variable

Explanation: This fault is caused by "hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226066: fltTcaActrlRuleHitPart1hPktsCum

Severity: variable

Explanation: This fault is caused by "hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226067: fltTcaActrlRuleHitPart1dPktsCum

Severity: variable

Explanation: This fault is caused by "hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226068: fltTcaActrlRuleHitPart1wPktsCum

Severity: variable

Explanation: This fault is caused by "hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226069: fltTcaActrlRuleHitPart1moPktsCum

Severity: variable

Explanation: This fault is caused by "hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226070: fltTcaActrlRuleHitPart1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226071: fltTcaActrlRuleHitPart1yearPktsCum

Severity: variable

Explanation: This fault is caused by "hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226072: fltTcaActrlRuleHitPart5minPktsPer

Severity: variable

Explanation: This fault is caused by "hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226073: fltTcaActrlRuleHitPart15minPktsPer

Severity: variable

Explanation: This fault is caused by "hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226074: fltTcaActrlRuleHitPart1hPktsPer

Severity: variable

Explanation: This fault is caused by "hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226075: fltTcaActrlRuleHitPart1dPktsPer

Severity: variable

Explanation: This fault is caused by "hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226076: fltTcaActrlRuleHitPart1wPktsPer

Severity: variable

Explanation: This fault is caused by "hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226077: fltTcaActrlRuleHitPart1moPktsPer

Severity: variable

Explanation: This fault is caused by "hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226078: fltTcaActrlRuleHitPart1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226079: fltTcaActrlRuleHitPart1yearPktsPer

Severity: variable

Explanation: This fault is caused by "hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226080: fltTcaActrlRuleHitPart5minPktsMin

Severity: variable

Explanation: This fault is caused by "hit packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226081: fltTcaActrlRuleHitPart15minPktsMin

Severity: variable

Explanation: This fault is caused by "hit packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226082: fltTcaActrlRuleHitPart1hPktsMin

Severity: variable

Explanation: This fault is caused by "hit packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226083: fltTcaActrlRuleHitPart1dPktsMin

Severity: variable

Explanation: This fault is caused by "hit packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226084: fltTcaActrlRuleHitPart1wPktsMin

Severity: variable

Explanation: This fault is caused by "hit packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226085: fltTcaActrlRuleHitPart1moPktsMin

Severity: variable

Explanation: This fault is caused by "hit packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226086: fltTcaActrlRuleHitPart1qtrPktsMin

Severity: variable

Explanation: This fault is caused by "hit packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226087: fltTcaActrlRuleHitPart1yearPktsMin

Severity: variable

Explanation: This fault is caused by "hit packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226088: fltTcaActrlRuleHitPart5minPktsMax

Severity: variable

Explanation: This fault is caused by "hit packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226089: fltTcaActrlRuleHitPart15minPktsMax

Severity: variable

Explanation: This fault is caused by "hit packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226090: fltTcaActrlRuleHitPart1hPktsMax

Severity: variable

Explanation: This fault is caused by "hit packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226091: fltTcaActrlRuleHitPart1dPktsMax

Severity: variable

Explanation: This fault is caused by "hit packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226092: fltTcaActrlRuleHitPart1wPktsMax

Severity: variable

Explanation: This fault is caused by "hit packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226093: fltTcaActrlRuleHitPart1moPktsMax

Severity: variable

Explanation: This fault is caused by "hit packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226094: fltTcaActrlRuleHitPart1qtrPktsMax

Severity: variable

Explanation: This fault is caused by "hit packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226095: fltTcaActrlRuleHitPart1yearPktsMax

Severity: variable

Explanation: This fault is caused by "hit packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226096: fltTcaActrlRuleHitPart5minPktsAvg

Severity: variable

Explanation: This fault is caused by "hit packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226097: fltTcaActrlRuleHitPart15minPktsAvg

Severity: variable

Explanation: This fault is caused by "hit packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226098: fltTcaActrlRuleHitPart1hPktsAvg

Severity: variable

Explanation: This fault is caused by "hit packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226099: fltTcaActrlRuleHitPart1dPktsAvg

Severity: variable

Explanation: This fault is caused by "hit packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226100: fltTcaActrlRuleHitPart1wPktsAvg

Severity: variable

Explanation: This fault is caused by "hit packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226101: fltTcaActrlRuleHitPart1moPktsAvg

Severity: variable

Explanation: This fault is caused by "hit packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226102: fltTcaActrlRuleHitPart1qtrPktsAvg

Severity: variable

Explanation: This fault is caused by "hit packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226103: fltTcaActrlRuleHitPart1yearPktsAvg

Severity: variable

Explanation: This fault is caused by "hit packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226128: fltTcaActrlRuleHitPart5minPktsTr

Severity: variable

Explanation: This fault is caused by "hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226129: fltTcaActrlRuleHitPart15minPktsTr

Severity: variable

Explanation: This fault is caused by "hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226130: fltTcaActrlRuleHitPart1hPktsTr

Severity: variable

Explanation: This fault is caused by "hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226131: fltTcaActrlRuleHitPart1dPktsTr

Severity: variable

Explanation: This fault is caused by "hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226132: fltTcaActrlRuleHitPart1wPktsTr

Severity: variable

Explanation: This fault is caused by "hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226133: fltTcaActrlRuleHitPart1moPktsTr

Severity: variable

Explanation: This fault is caused by "hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226134: fltTcaActrlRuleHitPart1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226135: fltTcaActrlRuleHitPart1yearPktsTr

Severity: variable

Explanation: This fault is caused by "hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226136: fltTcaActrlRuleHitPart5minPktsRate

Severity: variable

Explanation: This fault is caused by "hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226137: fltTcaActrlRuleHitPart15minPktsRate

Severity: variable

Explanation: This fault is caused by "hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226138: fltTcaActrlRuleHitPart1hPktsRate

Severity: variable

Explanation: This fault is caused by "hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226139: fltTcaActrlRuleHitPart1dPktsRate

Severity: variable

Explanation: This fault is caused by "hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226140: fltTcaActrlRuleHitPart1wPktsRate

Severity: variable

Explanation: This fault is caused by "hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226141: fltTcaActrlRuleHitPart1moPktsRate

Severity: variable

Explanation: This fault is caused by "hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226142: fltTcaActrlRuleHitPart1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226143: fltTcaActrlRuleHitPart1yearPktsRate

Severity: variable

Explanation: This fault is caused by "hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226216: fltTcaActrlRuleHitAg5minPktsCum

Severity: variable

Explanation: This fault is caused by "hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226217: fltTcaActrlRuleHitAg15minPktsCum

Severity: variable

Explanation: This fault is caused by "hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226218: fltTcaActrlRuleHitAg1hPktsCum

Severity: variable

Explanation: This fault is caused by "hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226219: fltTcaActrlRuleHitAg1dPktsCum

Severity: variable

Explanation: This fault is caused by "hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226220: fltTcaActrlRuleHitAg1wPktsCum

Severity: variable

Explanation: This fault is caused by "hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226221: fltTcaActrlRuleHitAg1moPktsCum

Severity: variable

Explanation: This fault is caused by "hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226222: fltTcaActrlRuleHitAg1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226223: fltTcaActrlRuleHitAg1yearPktsCum

Severity: variable

Explanation: This fault is caused by "hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226224: fltTcaActrlRuleHitAg5minPktsPer

Severity: variable

Explanation: This fault is caused by "hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226225: fltTcaActrlRuleHitAg15minPktsPer

Severity: variable

Explanation: This fault is caused by "hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226226: fltTcaActrlRuleHitAg1hPktsPer

Severity: variable

Explanation: This fault is caused by "hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226227: fltTcaActrlRuleHitAg1dPktsPer

Severity: variable

Explanation: This fault is caused by "hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226228: fltTcaActrlRuleHitAg1wPktsPer

Severity: variable

Explanation: This fault is caused by "hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226229: fltTcaActrlRuleHitAg1moPktsPer

Severity: variable

Explanation: This fault is caused by "hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226230: fltTcaActrlRuleHitAg1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226231: fltTcaActrlRuleHitAg1yearPktsPer

Severity: variable

Explanation: This fault is caused by "hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226256: fltTcaActrlRuleHitAg5minPktsTr

Severity: variable

Explanation: This fault is caused by "hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226257: fltTcaActrlRuleHitAg15minPktsTr

Severity: variable

Explanation: This fault is caused by "hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226258: fltTcaActrlRuleHitAg1hPktsTr

Severity: variable

Explanation: This fault is caused by "hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226259: fltTcaActrlRuleHitAg1dPktsTr

Severity: variable

Explanation: This fault is caused by "hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226260: fltTcaActrlRuleHitAg1wPktsTr

Severity: variable

Explanation: This fault is caused by "hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226261: fltTcaActrlRuleHitAg1moPktsTr

Severity: variable

Explanation: This fault is caused by "hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226262: fltTcaActrlRuleHitAg1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226263: fltTcaActrlRuleHitAg1yearPktsTr

Severity: variable

Explanation: This fault is caused by "hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226264: fltTcaActrlRuleHitAg5minPktsRate

Severity: variable

Explanation: This fault is caused by "hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226265: fltTcaActrlRuleHitAg15minPktsRate

Severity: variable

Explanation: This fault is caused by "hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226266: fltTcaActrlRuleHitAg1hPktsRate

Severity: variable

Explanation: This fault is caused by "hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226267: fltTcaActrlRuleHitAg1dPktsRate

Severity: variable

Explanation: This fault is caused by "hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226268: fltTcaActrlRuleHitAg1wPktsRate

Severity: variable

Explanation: This fault is caused by "hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226269: fltTcaActrlRuleHitAg1moPktsRate

Severity: variable

Explanation: This fault is caused by "hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226270: fltTcaActrlRuleHitAg1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226271: fltTcaActrlRuleHitAg1yearPktsRate

Severity: variable

Explanation: This fault is caused by "hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226320: fltTcaActrlRuleHit5minRevPktsLast

Severity: variable

Explanation: This fault is caused by "reverse hit packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226321: fltTcaActrlRuleHit15minRevPktsLast

Severity: variable

Explanation: This fault is caused by "reverse hit packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226322: fltTcaActrlRuleHit1hRevPktsLast

Severity: variable

Explanation: This fault is caused by "reverse hit packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226323: fltTcaActrlRuleHit1dRevPktsLast

Severity: variable

Explanation: This fault is caused by "reverse hit packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226324: fltTcaActrlRuleHit1wRevPktsLast

Severity: variable

Explanation: This fault is caused by "reverse hit packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226325: fltTcaActrlRuleHit1moRevPktsLast

Severity: variable

Explanation: This fault is caused by "reverse hit packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226326: fltTcaActrlRuleHit1qtrRevPktsLast

Severity: variable

Explanation: This fault is caused by "reverse hit packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226327: fltTcaActrlRuleHit1yearRevPktsLast

Severity: variable

Explanation: This fault is caused by "reverse hit packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226336: fltTcaActrlRuleHit5minRevPktsCum

Severity: variable

Explanation: This fault is caused by "reverse hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226337: fltTcaActrlRuleHit15minRevPktsCum

Severity: variable

Explanation: This fault is caused by "reverse hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226338: fltTcaActrlRuleHit1hRevPktsCum

Severity: variable

Explanation: This fault is caused by "reverse hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226339: fltTcaActrlRuleHit1dRevPktsCum

Severity: variable

Explanation: This fault is caused by "reverse hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226340: fltTcaActrlRuleHit1wRevPktsCum

Severity: variable

Explanation: This fault is caused by "reverse hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226341: fltTcaActrlRuleHit1moRevPktsCum

Severity: variable

Explanation: This fault is caused by "reverse hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226342: fltTcaActrlRuleHit1qtrRevPktsCum

Severity: variable

Explanation: This fault is caused by "reverse hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226343: fltTcaActrlRuleHit1yearRevPktsCum

Severity: variable

Explanation: This fault is caused by "reverse hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226344: fltTcaActrlRuleHit5minRevPktsPer

Severity: variable

Explanation: This fault is caused by "reverse hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226345: fltTcaActrlRuleHit15minRevPktsPer

Severity: variable

Explanation: This fault is caused by "reverse hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226346: fltTcaActrlRuleHit1hRevPktsPer

Severity: variable

Explanation: This fault is caused by "reverse hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226347: fltTcaActrlRuleHit1dRevPktsPer

Severity: variable

Explanation: This fault is caused by "reverse hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226348: fltTcaActrlRuleHit1wRevPktsPer

Severity: variable

Explanation: This fault is caused by "reverse hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226349: fltTcaActrlRuleHit1moRevPktsPer

Severity: variable

Explanation: This fault is caused by "reverse hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226350: fltTcaActrlRuleHit1qtrRevPktsPer

Severity: variable

Explanation: This fault is caused by "reverse hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226351: fltTcaActrlRuleHit1yearRevPktsPer

Severity: variable

Explanation: This fault is caused by "reverse hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226352: fltTcaActrlRuleHit5minRevPktsMin

Severity: variable

Explanation: This fault is caused by "reverse hit packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226353: fltTcaActrlRuleHit15minRevPktsMin

Severity: variable

Explanation: This fault is caused by "reverse hit packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226354: fltTcaActrlRuleHit1hRevPktsMin

Severity: variable

Explanation: This fault is caused by "reverse hit packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226355: fltTcaActrlRuleHit1dRevPktsMin

Severity: variable

Explanation: This fault is caused by "reverse hit packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226356: fltTcaActrlRuleHit1wRevPktsMin

Severity: variable

Explanation: This fault is caused by "reverse hit packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226357: fltTcaActrlRuleHit1moRevPktsMin

Severity: variable

Explanation: This fault is caused by "reverse hit packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226358: fltTcaActrlRuleHit1qtrRevPktsMin

Severity: variable

Explanation: This fault is caused by "reverse hit packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226359: fltTcaActrlRuleHit1yearRevPktsMin

Severity: variable

Explanation: This fault is caused by "reverse hit packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226360: fltTcaActrlRuleHit5minRevPktsMax

Severity: variable

Explanation: This fault is caused by "reverse hit packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226361: fltTcaActrlRuleHit15minRevPktsMax

Severity: variable

Explanation: This fault is caused by "reverse hit packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226362: fltTcaActrlRuleHit1hRevPktsMax

Severity: variable

Explanation: This fault is caused by "reverse hit packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226363: fltTcaActrlRuleHit1dRevPktsMax

Severity: variable

Explanation: This fault is caused by "reverse hit packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226364: fltTcaActrlRuleHit1wRevPktsMax

Severity: variable

Explanation: This fault is caused by "reverse hit packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226365: fltTcaActrlRuleHit1moRevPktsMax

Severity: variable

Explanation: This fault is caused by "reverse hit packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226366: fltTcaActrlRuleHit1qtrRevPktsMax

Severity: variable

Explanation: This fault is caused by "reverse hit packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226367: fltTcaActrlRuleHit1yearRevPktsMax

Severity: variable

Explanation: This fault is caused by "reverse hit packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226368: fltTcaActrlRuleHit5minRevPktsAvg

Severity: variable

Explanation: This fault is caused by "reverse hit packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226369: fltTcaActrlRuleHit15minRevPktsAvg

Severity: variable

Explanation: This fault is caused by "reverse hit packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226370: fltTcaActrlRuleHit1hRevPktsAvg

Severity: variable

Explanation: This fault is caused by "reverse hit packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226371: fltTcaActrlRuleHit1dRevPktsAvg

Severity: variable

Explanation: This fault is caused by "reverse hit packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226372: fltTcaActrlRuleHit1wRevPktsAvg

Severity: variable

Explanation: This fault is caused by "reverse hit packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226373: fltTcaActrlRuleHit1moRevPktsAvg

Severity: variable

Explanation: This fault is caused by "reverse hit packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226374: fltTcaActrlRuleHit1qtrRevPktsAvg

Severity: variable

Explanation: This fault is caused by "reverse hit packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226375: fltTcaActrlRuleHit1yearRevPktsAvg

Severity: variable

Explanation: This fault is caused by "reverse hit packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226400: fltTcaActrlRuleHit5minRevPktsTr

Severity: variable

Explanation: This fault is caused by "reverse hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226401: fltTcaActrlRuleHit15minRevPktsTr

Severity: variable

Explanation: This fault is caused by "reverse hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226402: fltTcaActrlRuleHit1hRevPktsTr

Severity: variable

Explanation: This fault is caused by "reverse hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226403: fltTcaActrlRuleHit1dRevPktsTr

Severity: variable

Explanation: This fault is caused by "reverse hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226404: fltTcaActrlRuleHit1wRevPktsTr

Severity: variable

Explanation: This fault is caused by "reverse hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226405: fltTcaActrlRuleHit1moRevPktsTr

Severity: variable

Explanation: This fault is caused by "reverse hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226406: fltTcaActrlRuleHit1qtrRevPktsTr

Severity: variable

Explanation: This fault is caused by "reverse hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226407: fltTcaActrlRuleHit1yearRevPktsTr

Severity: variable

Explanation: This fault is caused by "reverse hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226408: fltTcaActrlRuleHit5minRevPktsRate

Severity: variable

Explanation: This fault is caused by "reverse hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226409: fltTcaActrlRuleHit15minRevPktsRate

Severity: variable

Explanation: This fault is caused by "reverse hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226410: fltTcaActrlRuleHit1hRevPktsRate

Severity: variable

Explanation: This fault is caused by "reverse hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226411: fltTcaActrlRuleHit1dRevPktsRate

Severity: variable

Explanation: This fault is caused by "reverse hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226412: fltTcaActrlRuleHit1wRevPktsRate

Severity: variable

Explanation: This fault is caused by "reverse hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226413: fltTcaActrlRuleHit1moRevPktsRate

Severity: variable

Explanation: This fault is caused by "reverse hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226414: fltTcaActrlRuleHit1qtrRevPktsRate

Severity: variable

Explanation: This fault is caused by "reverse hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226415: fltTcaActrlRuleHit1yearRevPktsRate

Severity: variable

Explanation: This fault is caused by "reverse hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226488: fltTcaActrlRuleHitPart5minRevPktsLast

Severity: variable

Explanation: This fault is caused by "reverse hit packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226489: fltTcaActrlRuleHitPart15minRevPktsLast

Severity: variable

Explanation: This fault is caused by "reverse hit packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226490: fltTcaActrlRuleHitPart1hRevPktsLast

Severity: variable

Explanation: This fault is caused by "reverse hit packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226491: fltTcaActrlRuleHitPart1dRevPktsLast

Severity: variable

Explanation: This fault is caused by "reverse hit packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226492: fltTcaActrlRuleHitPart1wRevPktsLast

Severity: variable

Explanation: This fault is caused by "reverse hit packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226493: fltTcaActrlRuleHitPart1moRevPktsLast

Severity: variable

Explanation: This fault is caused by "reverse hit packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226494: fltTcaActrlRuleHitPart1qtrRevPktsLast

Severity: variable

Explanation: This fault is caused by "reverse hit packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226495: fltTcaActrlRuleHitPart1yearRevPktsLast

Severity: variable

Explanation: This fault is caused by "reverse hit packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226504: fltTcaActrlRuleHitPart5minRevPktsCum

Severity: variable

Explanation: This fault is caused by "reverse hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226505: fltTcaActrlRuleHitPart15minRevPktsCum

Severity: variable

Explanation: This fault is caused by "reverse hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226506: fltTcaActrlRuleHitPart1hRevPktsCum

Severity: variable

Explanation: This fault is caused by "reverse hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226507: fltTcaActrlRuleHitPart1dRevPktsCum

Severity: variable

Explanation: This fault is caused by "reverse hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226508: fltTcaActrlRuleHitPart1wRevPktsCum

Severity: variable

Explanation: This fault is caused by "reverse hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226509: fltTcaActrlRuleHitPart1moRevPktsCum

Severity: variable

Explanation: This fault is caused by "reverse hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226510: fltTcaActrlRuleHitPart1qtrRevPktsCum

Severity: variable

Explanation: This fault is caused by "reverse hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226511: fltTcaActrlRuleHitPart1yearRevPktsCum

Severity: variable

Explanation: This fault is caused by "reverse hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226512: fltTcaActrlRuleHitPart5minRevPktsPer

Severity: variable

Explanation: This fault is caused by "reverse hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226513: fltTcaActrlRuleHitPart15minRevPktsPer

Severity: variable

Explanation: This fault is caused by "reverse hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226514: fltTcaActrlRuleHitPart1hRevPktsPer

Severity: variable

Explanation: This fault is caused by "reverse hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226515: fltTcaActrlRuleHitPart1dRevPktsPer

Severity: variable

Explanation: This fault is caused by "reverse hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226516: fltTcaActrlRuleHitPart1wRevPktsPer

Severity: variable

Explanation: This fault is caused by "reverse hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226517: fltTcaActrlRuleHitPart1moRevPktsPer

Severity: variable

Explanation: This fault is caused by "reverse hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226518: fltTcaActrlRuleHitPart1qtrRevPktsPer

Severity: variable

Explanation: This fault is caused by "reverse hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226519: fltTcaActrlRuleHitPart1yearRevPktsPer

Severity: variable

Explanation: This fault is caused by "reverse hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226520: fltTcaActrlRuleHitPart5minRevPktsMin

Severity: variable

Explanation: This fault is caused by "reverse hit packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226521: fltTcaActrlRuleHitPart15minRevPktsMin

Severity: variable

Explanation: This fault is caused by "reverse hit packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226522: fltTcaActrlRuleHitPart1hRevPktsMin

Severity: variable

Explanation: This fault is caused by "reverse hit packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226523: fltTcaActrlRuleHitPart1dRevPktsMin

Severity: variable

Explanation: This fault is caused by "reverse hit packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226524: fltTcaActrlRuleHitPart1wRevPktsMin

Severity: variable

Explanation: This fault is caused by "reverse hit packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226525: fltTcaActrlRuleHitPart1moRevPktsMin

Severity: variable

Explanation: This fault is caused by "reverse hit packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226526: fltTcaActrlRuleHitPart1qtrRevPktsMin

Severity: variable

Explanation: This fault is caused by "reverse hit packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226527: fltTcaActrlRuleHitPart1yearRevPktsMin

Severity: variable

Explanation: This fault is caused by "reverse hit packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226528: fltTcaActrlRuleHitPart5minRevPktsMax

Severity: variable

Explanation: This fault is caused by "reverse hit packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226529: fltTcaActrlRuleHitPart15minRevPktsMax

Severity: variable

Explanation: This fault is caused by "reverse hit packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226530: fltTcaActrlRuleHitPart1hRevPktsMax

Severity: variable

Explanation: This fault is caused by "reverse hit packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226531: fltTcaActrlRuleHitPart1dRevPktsMax

Severity: variable

Explanation: This fault is caused by "reverse hit packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226532: fltTcaActrlRuleHitPart1wRevPktsMax

Severity: variable

Explanation: This fault is caused by "reverse hit packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226533: fltTcaActrlRuleHitPart1moRevPktsMax

Severity: variable

Explanation: This fault is caused by "reverse hit packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226534: fltTcaActrlRuleHitPart1qtrRevPktsMax

Severity: variable

Explanation: This fault is caused by "reverse hit packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226535: fltTcaActrlRuleHitPart1yearRevPktsMax

Severity: variable

Explanation: This fault is caused by "reverse hit packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226536: fltTcaActrlRuleHitPart5minRevPktsAvg

Severity: variable

Explanation: This fault is caused by "reverse hit packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226537: fltTcaActrlRuleHitPart15minRevPktsAvg

Severity: variable

Explanation: This fault is caused by "reverse hit packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226538: fltTcaActrlRuleHitPart1hRevPktsAvg

Severity: variable

Explanation: This fault is caused by "reverse hit packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226539: fltTcaActrlRuleHitPart1dRevPktsAvg

Severity: variable

Explanation: This fault is caused by "reverse hit packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226540: fltTcaActrlRuleHitPart1wRevPktsAvg

Severity: variable

Explanation: This fault is caused by "reverse hit packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226541: fltTcaActrlRuleHitPart1moRevPktsAvg

Severity: variable

Explanation: This fault is caused by "reverse hit packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226542: fltTcaActrlRuleHitPart1qtrRevPktsAvg

Severity: variable

Explanation: This fault is caused by "reverse hit packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226543: fltTcaActrlRuleHitPart1yearRevPktsAvg

Severity: variable

Explanation: This fault is caused by "reverse hit packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226568: fltTcaActrlRuleHitPart5minRevPktsTr

Severity: variable

Explanation: This fault is caused by "reverse hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226569: fltTcaActrlRuleHitPart15minRevPktsTr

Severity: variable

Explanation: This fault is caused by "reverse hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226570: fltTcaActrlRuleHitPart1hRevPktsTr

Severity: variable

Explanation: This fault is caused by "reverse hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226571: fltTcaActrlRuleHitPart1dRevPktsTr

Severity: variable

Explanation: This fault is caused by "reverse hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226572: fltTcaActrlRuleHitPart1wRevPktsTr

Severity: variable

Explanation: This fault is caused by "reverse hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226573: fltTcaActrlRuleHitPart1moRevPktsTr

Severity: variable

Explanation: This fault is caused by "reverse hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226574: fltTcaActrlRuleHitPart1qtrRevPktsTr

Severity: variable

Explanation: This fault is caused by "reverse hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226575: fltTcaActrlRuleHitPart1yearRevPktsTr

Severity: variable

Explanation: This fault is caused by "reverse hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226576: fltTcaActrlRuleHitPart5minRevPktsRate

Severity: variable

Explanation: This fault is caused by "reverse hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226577: fltTcaActrlRuleHitPart15minRevPktsRate

Severity: variable

Explanation: This fault is caused by "reverse hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226578: fltTcaActrlRuleHitPart1hRevPktsRate

Severity: variable

Explanation: This fault is caused by "reverse hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226579: fltTcaActrlRuleHitPart1dRevPktsRate

Severity: variable

Explanation: This fault is caused by "reverse hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226580: fltTcaActrlRuleHitPart1wRevPktsRate

Severity: variable

Explanation: This fault is caused by "reverse hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226581: fltTcaActrlRuleHitPart1moRevPktsRate

Severity: variable

Explanation: This fault is caused by "reverse hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226582: fltTcaActrlRuleHitPart1qtrRevPktsRate

Severity: variable

Explanation: This fault is caused by "reverse hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226583: fltTcaActrlRuleHitPart1yearRevPktsRate

Severity: variable

Explanation: This fault is caused by "reverse hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226656: fltTcaActrlRuleHitAg5minRevPktsCum

Severity: variable

Explanation: This fault is caused by "reverse hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226657: fltTcaActrlRuleHitAg15minRevPktsCum

Severity: variable

Explanation: This fault is caused by "reverse hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226658: fltTcaActrlRuleHitAg1hRevPktsCum

Severity: variable

Explanation: This fault is caused by "reverse hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226659: fltTcaActrlRuleHitAg1dRevPktsCum

Severity: variable

Explanation: This fault is caused by "reverse hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226660: fltTcaActrlRuleHitAg1wRevPktsCum

Severity: variable

Explanation: This fault is caused by "reverse hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226661: fltTcaActrlRuleHitAg1moRevPktsCum

Severity: variable

Explanation: This fault is caused by "reverse hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226662: fltTcaActrlRuleHitAg1qtrRevPktsCum

Severity: variable

Explanation: This fault is caused by "reverse hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226663: fltTcaActrlRuleHitAg1yearRevPktsCum

Severity: variable

Explanation: This fault is caused by "reverse hit packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226664: fltTcaActrlRuleHitAg5minRevPktsPer

Severity: variable

Explanation: This fault is caused by "reverse hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226665: fltTcaActrlRuleHitAg15minRevPktsPer

Severity: variable

Explanation: This fault is caused by "reverse hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226666: fltTcaActrlRuleHitAg1hRevPktsPer

Severity: variable

Explanation: This fault is caused by "reverse hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226667: fltTcaActrlRuleHitAg1dRevPktsPer

Severity: variable

Explanation: This fault is caused by "reverse hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226668: fltTcaActrlRuleHitAg1wRevPktsPer

Severity: variable

Explanation: This fault is caused by "reverse hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226669: fltTcaActrlRuleHitAg1moRevPktsPer

Severity: variable

Explanation: This fault is caused by "reverse hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226670: fltTcaActrlRuleHitAg1qtrRevPktsPer

Severity: variable

Explanation: This fault is caused by "reverse hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226671: fltTcaActrlRuleHitAg1yearRevPktsPer

Severity: variable

Explanation: This fault is caused by "reverse hit packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226696: fltTcaActrlRuleHitAg5minRevPktsTr

Severity: variable

Explanation: This fault is caused by "reverse hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226697: fltTcaActrlRuleHitAg15minRevPktsTr

Severity: variable

Explanation: This fault is caused by "reverse hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226698: fltTcaActrlRuleHitAg1hRevPktsTr

Severity: variable

Explanation: This fault is caused by "reverse hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226699: fltTcaActrlRuleHitAg1dRevPktsTr

Severity: variable

Explanation: This fault is caused by "reverse hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226700: fltTcaActrlRuleHitAg1wRevPktsTr

Severity: variable

Explanation: This fault is caused by "reverse hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226701: fltTcaActrlRuleHitAg1moRevPktsTr

Severity: variable

Explanation: This fault is caused by "reverse hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226702: fltTcaActrlRuleHitAg1qtrRevPktsTr

Severity: variable

Explanation: This fault is caused by "reverse hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226703: fltTcaActrlRuleHitAg1yearRevPktsTr

Severity: variable

Explanation: This fault is caused by "reverse hit packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226704: fltTcaActrlRuleHitAg5minRevPktsRate

Severity: variable

Explanation: This fault is caused by "reverse hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226705: fltTcaActrlRuleHitAg15minRevPktsRate

Severity: variable

Explanation: This fault is caused by "reverse hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226706: fltTcaActrlRuleHitAg1hRevPktsRate

Severity: variable

Explanation: This fault is caused by "reverse hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226707: fltTcaActrlRuleHitAg1dRevPktsRate

Severity: variable

Explanation: This fault is caused by "reverse hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226708: fltTcaActrlRuleHitAg1wRevPktsRate

Severity: variable

Explanation: This fault is caused by "reverse hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226709: fltTcaActrlRuleHitAg1moRevPktsRate

Severity: variable

Explanation: This fault is caused by "reverse hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226710: fltTcaActrlRuleHitAg1qtrRevPktsRate

Severity: variable

Explanation: This fault is caused by "reverse hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F226711: fltTcaActrlRuleHitAg1yearRevPktsRate

Severity: variable

Explanation: This fault is caused by "reverse hit packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "reverse hit packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2274: fltFabricRsNodeCtrlResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2275: fltInfraRsL2PortSecurityPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2281: fltFabricRsOLeafSToLeNodePGrpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2282: fltFabricRsOSpineSToSpNodePGrpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2283: fltInfraRsOLeafSToAccNodePGrpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2284: fltFcRsVsanNsResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2299: fltPimStaticRPEntryPolConfIssue

Severity: minor

Explanation: This fault occurs due to missing RP group range configuration.

Recommended Action: If you see this fault, please create the RP group range configuration to fix validation errors.

F2300: fltAnalyticsRsCollectorAttResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2301: fltAnalyticsRsProfAttResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2302: fltAnalyticsRsRecordPAttResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2305: fltFvBDMulticastEnabledOnL2BD

Severity: warning

Explanation: This fault occurs when multicast is allowed on a bridge domain for which L3 routing is disabled.

Recommended Action: If you see this fault, take the following actions:

1. Enable L3 routing on the BD (set property "unicastRoute" to "yes") or disallow multicast (set property mcastAllow to "false")

2. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC

F2307: fltPimMAFilterPolConfIssue

Severity: minor

Explanation: This fault occurs due to invalid route map configuraiton. Only source specific route map is allowed.

Recommended Action: If you see this fault, please fix the route map configuraiton.

F2308: fltPimBSRFilterPolConfIssue

Severity: minor

Explanation: This fault occurs due to invalid route map configuraiton. Only source specific route map is allowed.

Recommended Action: If you see this fault, please fix the route map configuraiton.

F2327: fltFvLocaleConfigurationFailed

Severity: minor

Explanation: This fault occurs when there is a mic-configuration for a given EPg/external vlan mode on a given node

Recommended Action: : If you see this fault, take the following actions: - Verify that static configuration and EPg deployment via Attachable Entity Profile are all setting mode consistently For a given EPg/external vlan, mode should be consistently configured to untagged or untagged on all node interfaces. If the above conditions did not resolve the issue, create a tech-support file and contact Cisco TAC.

F2328: fltInfraRsFcIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2330: fltPimExtPConfIssue

Severity: minor

Explanation: This fault occurs due to PIM is enabled on a layer 3 out that has external SVI interfaces.

Recommended Action: If you see this fault, you may change the layer 3 out configure to get rid of the fault.

F2331: fltIgmpResPStLimitRegEntryChange

Severity: warning

Explanation: This fault occurs when the state limit regular entries exceeds 80% of the maximum limit

Recommended Action: To recover from this fault, try the following actions

1. Delete some of the IGMP groups manually

2. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F2332: fltIgmpResPStLimitResEntryChange

Severity: warning

Explanation: This fault occurs when the state limit reserved entries exceeds 80% of the maximum limit

Recommended Action: To recover from this fault, try the following actions

1. Delete some of the IGMP groups manually

2. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F2333: fltIgmpResPStLimitRegEntryEmpty

Severity: warning

Explanation: This fault occurs when the regular limit entries are exhausted but the reserved entries are still available. If a group matches the route map configured for the reserved entries, it will be learned else will be dropped

Recommended Action: To recover from this fault, try the following actions

1. Delete some of the IGMP groups manually

2. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F2334: fltIgmpResPStLimitChangeDelGrps

Severity: critical

Explanation: This fault occurs when the regular and reserved entries get exhausted or when the user configures the state limit value such that the regular/reserved limit value is lesser than the existing config or lesser than the existing number of IGMP entries. No additional groups will be learnt when this fault is hit

Recommended Action: To recover from this fault, try the following actions:

1. Delete some IGMP groups manually

2. Verify the configuration is correct/complete

3. Reduce the number of prefixes exported into bgp

4. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F233680: fltTcaAcllogFlowCounter5minHitscountLast

Severity: variable

Explanation: This fault is caused by "Hits Counter current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233681: fltTcaAcllogFlowCounter15minHitscountLast

Severity: variable

Explanation: This fault is caused by "Hits Counter current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233682: fltTcaAcllogFlowCounter1hHitscountLast

Severity: variable

Explanation: This fault is caused by "Hits Counter current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233683: fltTcaAcllogFlowCounter1dHitscountLast

Severity: variable

Explanation: This fault is caused by "Hits Counter current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233684: fltTcaAcllogFlowCounter1wHitscountLast

Severity: variable

Explanation: This fault is caused by "Hits Counter current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233685: fltTcaAcllogFlowCounter1moHitscountLast

Severity: variable

Explanation: This fault is caused by "Hits Counter current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233686: fltTcaAcllogFlowCounter1qtrHitscountLast

Severity: variable

Explanation: This fault is caused by "Hits Counter current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233687: fltTcaAcllogFlowCounter1yearHitscountLast

Severity: variable

Explanation: This fault is caused by "Hits Counter current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233696: fltTcaAcllogFlowCounter5minHitscountCum

Severity: variable

Explanation: This fault is caused by "Hits Counter cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233697: fltTcaAcllogFlowCounter15minHitscountCum

Severity: variable

Explanation: This fault is caused by "Hits Counter cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233698: fltTcaAcllogFlowCounter1hHitscountCum

Severity: variable

Explanation: This fault is caused by "Hits Counter cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233699: fltTcaAcllogFlowCounter1dHitscountCum

Severity: variable

Explanation: This fault is caused by "Hits Counter cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233700: fltTcaAcllogFlowCounter1wHitscountCum

Severity: variable

Explanation: This fault is caused by "Hits Counter cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233701: fltTcaAcllogFlowCounter1moHitscountCum

Severity: variable

Explanation: This fault is caused by "Hits Counter cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233702: fltTcaAcllogFlowCounter1qtrHitscountCum

Severity: variable

Explanation: This fault is caused by "Hits Counter cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233703: fltTcaAcllogFlowCounter1yearHitscountCum

Severity: variable

Explanation: This fault is caused by "Hits Counter cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233704: fltTcaAcllogFlowCounter5minHitscountPer

Severity: variable

Explanation: This fault is caused by "Hits Counter periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233705: fltTcaAcllogFlowCounter15minHitscountPer

Severity: variable

Explanation: This fault is caused by "Hits Counter periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233706: fltTcaAcllogFlowCounter1hHitscountPer

Severity: variable

Explanation: This fault is caused by "Hits Counter periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233707: fltTcaAcllogFlowCounter1dHitscountPer

Severity: variable

Explanation: This fault is caused by "Hits Counter periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233708: fltTcaAcllogFlowCounter1wHitscountPer

Severity: variable

Explanation: This fault is caused by "Hits Counter periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233709: fltTcaAcllogFlowCounter1moHitscountPer

Severity: variable

Explanation: This fault is caused by "Hits Counter periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233710: fltTcaAcllogFlowCounter1qtrHitscountPer

Severity: variable

Explanation: This fault is caused by "Hits Counter periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233711: fltTcaAcllogFlowCounter1yearHitscountPer

Severity: variable

Explanation: This fault is caused by "Hits Counter periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233712: fltTcaAcllogFlowCounter5minHitscountMin

Severity: variable

Explanation: This fault is caused by "Hits Counter minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233713: fltTcaAcllogFlowCounter15minHitscountMin

Severity: variable

Explanation: This fault is caused by "Hits Counter minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233714: fltTcaAcllogFlowCounter1hHitscountMin

Severity: variable

Explanation: This fault is caused by "Hits Counter minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233715: fltTcaAcllogFlowCounter1dHitscountMin

Severity: variable

Explanation: This fault is caused by "Hits Counter minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233716: fltTcaAcllogFlowCounter1wHitscountMin

Severity: variable

Explanation: This fault is caused by "Hits Counter minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233717: fltTcaAcllogFlowCounter1moHitscountMin

Severity: variable

Explanation: This fault is caused by "Hits Counter minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233718: fltTcaAcllogFlowCounter1qtrHitscountMin

Severity: variable

Explanation: This fault is caused by "Hits Counter minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233719: fltTcaAcllogFlowCounter1yearHitscountMin

Severity: variable

Explanation: This fault is caused by "Hits Counter minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233720: fltTcaAcllogFlowCounter5minHitscountMax

Severity: variable

Explanation: This fault is caused by "Hits Counter maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233721: fltTcaAcllogFlowCounter15minHitscountMax

Severity: variable

Explanation: This fault is caused by "Hits Counter maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233722: fltTcaAcllogFlowCounter1hHitscountMax

Severity: variable

Explanation: This fault is caused by "Hits Counter maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233723: fltTcaAcllogFlowCounter1dHitscountMax

Severity: variable

Explanation: This fault is caused by "Hits Counter maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233724: fltTcaAcllogFlowCounter1wHitscountMax

Severity: variable

Explanation: This fault is caused by "Hits Counter maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233725: fltTcaAcllogFlowCounter1moHitscountMax

Severity: variable

Explanation: This fault is caused by "Hits Counter maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233726: fltTcaAcllogFlowCounter1qtrHitscountMax

Severity: variable

Explanation: This fault is caused by "Hits Counter maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233727: fltTcaAcllogFlowCounter1yearHitscountMax

Severity: variable

Explanation: This fault is caused by "Hits Counter maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233728: fltTcaAcllogFlowCounter5minHitscountAvg

Severity: variable

Explanation: This fault is caused by "Hits Counter average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233729: fltTcaAcllogFlowCounter15minHitscountAvg

Severity: variable

Explanation: This fault is caused by "Hits Counter average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233730: fltTcaAcllogFlowCounter1hHitscountAvg

Severity: variable

Explanation: This fault is caused by "Hits Counter average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233731: fltTcaAcllogFlowCounter1dHitscountAvg

Severity: variable

Explanation: This fault is caused by "Hits Counter average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233732: fltTcaAcllogFlowCounter1wHitscountAvg

Severity: variable

Explanation: This fault is caused by "Hits Counter average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233733: fltTcaAcllogFlowCounter1moHitscountAvg

Severity: variable

Explanation: This fault is caused by "Hits Counter average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233734: fltTcaAcllogFlowCounter1qtrHitscountAvg

Severity: variable

Explanation: This fault is caused by "Hits Counter average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233735: fltTcaAcllogFlowCounter1yearHitscountAvg

Severity: variable

Explanation: This fault is caused by "Hits Counter average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233760: fltTcaAcllogFlowCounter5minHitscountTr

Severity: variable

Explanation: This fault is caused by "Hits Counter trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233761: fltTcaAcllogFlowCounter15minHitscountTr

Severity: variable

Explanation: This fault is caused by "Hits Counter trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233762: fltTcaAcllogFlowCounter1hHitscountTr

Severity: variable

Explanation: This fault is caused by "Hits Counter trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233763: fltTcaAcllogFlowCounter1dHitscountTr

Severity: variable

Explanation: This fault is caused by "Hits Counter trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233764: fltTcaAcllogFlowCounter1wHitscountTr

Severity: variable

Explanation: This fault is caused by "Hits Counter trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233765: fltTcaAcllogFlowCounter1moHitscountTr

Severity: variable

Explanation: This fault is caused by "Hits Counter trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233766: fltTcaAcllogFlowCounter1qtrHitscountTr

Severity: variable

Explanation: This fault is caused by "Hits Counter trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233767: fltTcaAcllogFlowCounter1yearHitscountTr

Severity: variable

Explanation: This fault is caused by "Hits Counter trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233768: fltTcaAcllogFlowCounter5minHitscountRate

Severity: variable

Explanation: This fault is caused by "Hits Counter rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233769: fltTcaAcllogFlowCounter15minHitscountRate

Severity: variable

Explanation: This fault is caused by "Hits Counter rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233770: fltTcaAcllogFlowCounter1hHitscountRate

Severity: variable

Explanation: This fault is caused by "Hits Counter rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233771: fltTcaAcllogFlowCounter1dHitscountRate

Severity: variable

Explanation: This fault is caused by "Hits Counter rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233772: fltTcaAcllogFlowCounter1wHitscountRate

Severity: variable

Explanation: This fault is caused by "Hits Counter rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233773: fltTcaAcllogFlowCounter1moHitscountRate

Severity: variable

Explanation: This fault is caused by "Hits Counter rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233774: fltTcaAcllogFlowCounter1qtrHitscountRate

Severity: variable

Explanation: This fault is caused by "Hits Counter rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233775: fltTcaAcllogFlowCounter1yearHitscountRate

Severity: variable

Explanation: This fault is caused by "Hits Counter rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233848: fltTcaAcllogFlowCounterAg5minHitscountCum

Severity: variable

Explanation: This fault is caused by "Hits Counter cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233849: fltTcaAcllogFlowCounterAg15minHitscountCum

Severity: variable

Explanation: This fault is caused by "Hits Counter cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233850: fltTcaAcllogFlowCounterAg1hHitscountCum

Severity: variable

Explanation: This fault is caused by "Hits Counter cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233851: fltTcaAcllogFlowCounterAg1dHitscountCum

Severity: variable

Explanation: This fault is caused by "Hits Counter cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233852: fltTcaAcllogFlowCounterAg1wHitscountCum

Severity: variable

Explanation: This fault is caused by "Hits Counter cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233853: fltTcaAcllogFlowCounterAg1moHitscountCum

Severity: variable

Explanation: This fault is caused by "Hits Counter cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233854: fltTcaAcllogFlowCounterAg1qtrHitscountCum

Severity: variable

Explanation: This fault is caused by "Hits Counter cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233855: fltTcaAcllogFlowCounterAg1yearHitscountCum

Severity: variable

Explanation: This fault is caused by "Hits Counter cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233856: fltTcaAcllogFlowCounterAg5minHitscountPer

Severity: variable

Explanation: This fault is caused by "Hits Counter periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233857: fltTcaAcllogFlowCounterAg15minHitscountPer

Severity: variable

Explanation: This fault is caused by "Hits Counter periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233858: fltTcaAcllogFlowCounterAg1hHitscountPer

Severity: variable

Explanation: This fault is caused by "Hits Counter periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233859: fltTcaAcllogFlowCounterAg1dHitscountPer

Severity: variable

Explanation: This fault is caused by "Hits Counter periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233860: fltTcaAcllogFlowCounterAg1wHitscountPer

Severity: variable

Explanation: This fault is caused by "Hits Counter periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233861: fltTcaAcllogFlowCounterAg1moHitscountPer

Severity: variable

Explanation: This fault is caused by "Hits Counter periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233862: fltTcaAcllogFlowCounterAg1qtrHitscountPer

Severity: variable

Explanation: This fault is caused by "Hits Counter periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233863: fltTcaAcllogFlowCounterAg1yearHitscountPer

Severity: variable

Explanation: This fault is caused by "Hits Counter periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233888: fltTcaAcllogFlowCounterAg5minHitscountTr

Severity: variable

Explanation: This fault is caused by "Hits Counter trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233889: fltTcaAcllogFlowCounterAg15minHitscountTr

Severity: variable

Explanation: This fault is caused by "Hits Counter trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233890: fltTcaAcllogFlowCounterAg1hHitscountTr

Severity: variable

Explanation: This fault is caused by "Hits Counter trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233891: fltTcaAcllogFlowCounterAg1dHitscountTr

Severity: variable

Explanation: This fault is caused by "Hits Counter trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233892: fltTcaAcllogFlowCounterAg1wHitscountTr

Severity: variable

Explanation: This fault is caused by "Hits Counter trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233893: fltTcaAcllogFlowCounterAg1moHitscountTr

Severity: variable

Explanation: This fault is caused by "Hits Counter trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233894: fltTcaAcllogFlowCounterAg1qtrHitscountTr

Severity: variable

Explanation: This fault is caused by "Hits Counter trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233895: fltTcaAcllogFlowCounterAg1yearHitscountTr

Severity: variable

Explanation: This fault is caused by "Hits Counter trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233896: fltTcaAcllogFlowCounterAg5minHitscountRate

Severity: variable

Explanation: This fault is caused by "Hits Counter rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233897: fltTcaAcllogFlowCounterAg15minHitscountRate

Severity: variable

Explanation: This fault is caused by "Hits Counter rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233898: fltTcaAcllogFlowCounterAg1hHitscountRate

Severity: variable

Explanation: This fault is caused by "Hits Counter rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233899: fltTcaAcllogFlowCounterAg1dHitscountRate

Severity: variable

Explanation: This fault is caused by "Hits Counter rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233900: fltTcaAcllogFlowCounterAg1wHitscountRate

Severity: variable

Explanation: This fault is caused by "Hits Counter rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233901: fltTcaAcllogFlowCounterAg1moHitscountRate

Severity: variable

Explanation: This fault is caused by "Hits Counter rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233902: fltTcaAcllogFlowCounterAg1qtrHitscountRate

Severity: variable

Explanation: This fault is caused by "Hits Counter rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F233903: fltTcaAcllogFlowCounterAg1yearHitscountRate

Severity: variable

Explanation: This fault is caused by "Hits Counter rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Hits Counter" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237328: fltTcaEqptEgrAggrBytes5minDropLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237329: fltTcaEqptEgrAggrBytes15minDropLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237330: fltTcaEqptEgrAggrBytes1hDropLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237331: fltTcaEqptEgrAggrBytes1dDropLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237332: fltTcaEqptEgrAggrBytes1wDropLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237333: fltTcaEqptEgrAggrBytes1moDropLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237334: fltTcaEqptEgrAggrBytes1qtrDropLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237335: fltTcaEqptEgrAggrBytes1yearDropLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237344: fltTcaEqptEgrAggrBytes5minDropCum

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237345: fltTcaEqptEgrAggrBytes15minDropCum

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237346: fltTcaEqptEgrAggrBytes1hDropCum

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237347: fltTcaEqptEgrAggrBytes1dDropCum

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237348: fltTcaEqptEgrAggrBytes1wDropCum

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237349: fltTcaEqptEgrAggrBytes1moDropCum

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237350: fltTcaEqptEgrAggrBytes1qtrDropCum

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237351: fltTcaEqptEgrAggrBytes1yearDropCum

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237352: fltTcaEqptEgrAggrBytes5minDropPer

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237353: fltTcaEqptEgrAggrBytes15minDropPer

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237354: fltTcaEqptEgrAggrBytes1hDropPer

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237355: fltTcaEqptEgrAggrBytes1dDropPer

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237356: fltTcaEqptEgrAggrBytes1wDropPer

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237357: fltTcaEqptEgrAggrBytes1moDropPer

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237358: fltTcaEqptEgrAggrBytes1qtrDropPer

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237359: fltTcaEqptEgrAggrBytes1yearDropPer

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237360: fltTcaEqptEgrAggrBytes5minDropMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237361: fltTcaEqptEgrAggrBytes15minDropMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237362: fltTcaEqptEgrAggrBytes1hDropMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237363: fltTcaEqptEgrAggrBytes1dDropMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237364: fltTcaEqptEgrAggrBytes1wDropMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237365: fltTcaEqptEgrAggrBytes1moDropMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237366: fltTcaEqptEgrAggrBytes1qtrDropMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237367: fltTcaEqptEgrAggrBytes1yearDropMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237368: fltTcaEqptEgrAggrBytes5minDropMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237369: fltTcaEqptEgrAggrBytes15minDropMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237370: fltTcaEqptEgrAggrBytes1hDropMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237371: fltTcaEqptEgrAggrBytes1dDropMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237372: fltTcaEqptEgrAggrBytes1wDropMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237373: fltTcaEqptEgrAggrBytes1moDropMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237374: fltTcaEqptEgrAggrBytes1qtrDropMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237375: fltTcaEqptEgrAggrBytes1yearDropMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237376: fltTcaEqptEgrAggrBytes5minDropAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237377: fltTcaEqptEgrAggrBytes15minDropAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237378: fltTcaEqptEgrAggrBytes1hDropAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237379: fltTcaEqptEgrAggrBytes1dDropAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237380: fltTcaEqptEgrAggrBytes1wDropAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237381: fltTcaEqptEgrAggrBytes1moDropAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237382: fltTcaEqptEgrAggrBytes1qtrDropAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237383: fltTcaEqptEgrAggrBytes1yearDropAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237408: fltTcaEqptEgrAggrBytes5minDropTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237409: fltTcaEqptEgrAggrBytes15minDropTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237410: fltTcaEqptEgrAggrBytes1hDropTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237411: fltTcaEqptEgrAggrBytes1dDropTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237412: fltTcaEqptEgrAggrBytes1wDropTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237413: fltTcaEqptEgrAggrBytes1moDropTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237414: fltTcaEqptEgrAggrBytes1qtrDropTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237415: fltTcaEqptEgrAggrBytes1yearDropTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237416: fltTcaEqptEgrAggrBytes5minDropRate

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237417: fltTcaEqptEgrAggrBytes15minDropRate

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237418: fltTcaEqptEgrAggrBytes1hDropRate

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237419: fltTcaEqptEgrAggrBytes1dDropRate

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237420: fltTcaEqptEgrAggrBytes1wDropRate

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237421: fltTcaEqptEgrAggrBytes1moDropRate

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237422: fltTcaEqptEgrAggrBytes1qtrDropRate

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237423: fltTcaEqptEgrAggrBytes1yearDropRate

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237496: fltTcaEqptEgrAggrBytes5minDropRateLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237497: fltTcaEqptEgrAggrBytes15minDropRateLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237498: fltTcaEqptEgrAggrBytes1hDropRateLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237499: fltTcaEqptEgrAggrBytes1dDropRateLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237500: fltTcaEqptEgrAggrBytes1wDropRateLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237501: fltTcaEqptEgrAggrBytes1moDropRateLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237502: fltTcaEqptEgrAggrBytes1qtrDropRateLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237503: fltTcaEqptEgrAggrBytes1yearDropRateLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237504: fltTcaEqptEgrAggrBytes5minDropRateMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237505: fltTcaEqptEgrAggrBytes15minDropRateMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237506: fltTcaEqptEgrAggrBytes1hDropRateMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237507: fltTcaEqptEgrAggrBytes1dDropRateMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237508: fltTcaEqptEgrAggrBytes1wDropRateMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237509: fltTcaEqptEgrAggrBytes1moDropRateMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237510: fltTcaEqptEgrAggrBytes1qtrDropRateMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237511: fltTcaEqptEgrAggrBytes1yearDropRateMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237512: fltTcaEqptEgrAggrBytes5minDropRateMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237513: fltTcaEqptEgrAggrBytes15minDropRateMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237514: fltTcaEqptEgrAggrBytes1hDropRateMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237515: fltTcaEqptEgrAggrBytes1dDropRateMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237516: fltTcaEqptEgrAggrBytes1wDropRateMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237517: fltTcaEqptEgrAggrBytes1moDropRateMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237518: fltTcaEqptEgrAggrBytes1qtrDropRateMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237519: fltTcaEqptEgrAggrBytes1yearDropRateMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237520: fltTcaEqptEgrAggrBytes5minDropRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237521: fltTcaEqptEgrAggrBytes15minDropRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237522: fltTcaEqptEgrAggrBytes1hDropRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237523: fltTcaEqptEgrAggrBytes1dDropRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237524: fltTcaEqptEgrAggrBytes1wDropRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237525: fltTcaEqptEgrAggrBytes1moDropRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237526: fltTcaEqptEgrAggrBytes1qtrDropRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237527: fltTcaEqptEgrAggrBytes1yearDropRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237560: fltTcaEqptEgrAggrBytes5minDropRateTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237561: fltTcaEqptEgrAggrBytes15minDropRateTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237562: fltTcaEqptEgrAggrBytes1hDropRateTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237563: fltTcaEqptEgrAggrBytes1dDropRateTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237564: fltTcaEqptEgrAggrBytes1wDropRateTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237565: fltTcaEqptEgrAggrBytes1moDropRateTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237566: fltTcaEqptEgrAggrBytes1qtrDropRateTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237567: fltTcaEqptEgrAggrBytes1yearDropRateTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237616: fltTcaEqptEgrAggrBytes5minForwardLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237617: fltTcaEqptEgrAggrBytes15minForwardLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237618: fltTcaEqptEgrAggrBytes1hForwardLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237619: fltTcaEqptEgrAggrBytes1dForwardLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237620: fltTcaEqptEgrAggrBytes1wForwardLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237621: fltTcaEqptEgrAggrBytes1moForwardLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237622: fltTcaEqptEgrAggrBytes1qtrForwardLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237623: fltTcaEqptEgrAggrBytes1yearForwardLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237632: fltTcaEqptEgrAggrBytes5minForwardCum

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237633: fltTcaEqptEgrAggrBytes15minForwardCum

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237634: fltTcaEqptEgrAggrBytes1hForwardCum

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237635: fltTcaEqptEgrAggrBytes1dForwardCum

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237636: fltTcaEqptEgrAggrBytes1wForwardCum

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237637: fltTcaEqptEgrAggrBytes1moForwardCum

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237638: fltTcaEqptEgrAggrBytes1qtrForwardCum

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237639: fltTcaEqptEgrAggrBytes1yearForwardCum

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237640: fltTcaEqptEgrAggrBytes5minForwardPer

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237641: fltTcaEqptEgrAggrBytes15minForwardPer

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237642: fltTcaEqptEgrAggrBytes1hForwardPer

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237643: fltTcaEqptEgrAggrBytes1dForwardPer

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237644: fltTcaEqptEgrAggrBytes1wForwardPer

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237645: fltTcaEqptEgrAggrBytes1moForwardPer

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237646: fltTcaEqptEgrAggrBytes1qtrForwardPer

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237647: fltTcaEqptEgrAggrBytes1yearForwardPer

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237648: fltTcaEqptEgrAggrBytes5minForwardMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237649: fltTcaEqptEgrAggrBytes15minForwardMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237650: fltTcaEqptEgrAggrBytes1hForwardMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237651: fltTcaEqptEgrAggrBytes1dForwardMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237652: fltTcaEqptEgrAggrBytes1wForwardMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237653: fltTcaEqptEgrAggrBytes1moForwardMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237654: fltTcaEqptEgrAggrBytes1qtrForwardMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237655: fltTcaEqptEgrAggrBytes1yearForwardMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237656: fltTcaEqptEgrAggrBytes5minForwardMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237657: fltTcaEqptEgrAggrBytes15minForwardMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237658: fltTcaEqptEgrAggrBytes1hForwardMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237659: fltTcaEqptEgrAggrBytes1dForwardMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237660: fltTcaEqptEgrAggrBytes1wForwardMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237661: fltTcaEqptEgrAggrBytes1moForwardMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237662: fltTcaEqptEgrAggrBytes1qtrForwardMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237663: fltTcaEqptEgrAggrBytes1yearForwardMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237664: fltTcaEqptEgrAggrBytes5minForwardAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237665: fltTcaEqptEgrAggrBytes15minForwardAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237666: fltTcaEqptEgrAggrBytes1hForwardAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237667: fltTcaEqptEgrAggrBytes1dForwardAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237668: fltTcaEqptEgrAggrBytes1wForwardAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237669: fltTcaEqptEgrAggrBytes1moForwardAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237670: fltTcaEqptEgrAggrBytes1qtrForwardAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237671: fltTcaEqptEgrAggrBytes1yearForwardAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237696: fltTcaEqptEgrAggrBytes5minForwardTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237697: fltTcaEqptEgrAggrBytes15minForwardTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237698: fltTcaEqptEgrAggrBytes1hForwardTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237699: fltTcaEqptEgrAggrBytes1dForwardTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237700: fltTcaEqptEgrAggrBytes1wForwardTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237701: fltTcaEqptEgrAggrBytes1moForwardTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237702: fltTcaEqptEgrAggrBytes1qtrForwardTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237703: fltTcaEqptEgrAggrBytes1yearForwardTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237704: fltTcaEqptEgrAggrBytes5minForwardRate

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237705: fltTcaEqptEgrAggrBytes15minForwardRate

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237706: fltTcaEqptEgrAggrBytes1hForwardRate

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237707: fltTcaEqptEgrAggrBytes1dForwardRate

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237708: fltTcaEqptEgrAggrBytes1wForwardRate

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237709: fltTcaEqptEgrAggrBytes1moForwardRate

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237710: fltTcaEqptEgrAggrBytes1qtrForwardRate

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237711: fltTcaEqptEgrAggrBytes1yearForwardRate

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237784: fltTcaEqptEgrAggrBytes5minForwardRateLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237785: fltTcaEqptEgrAggrBytes15minForwardRateLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237786: fltTcaEqptEgrAggrBytes1hForwardRateLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237787: fltTcaEqptEgrAggrBytes1dForwardRateLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237788: fltTcaEqptEgrAggrBytes1wForwardRateLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237789: fltTcaEqptEgrAggrBytes1moForwardRateLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237790: fltTcaEqptEgrAggrBytes1qtrForwardRateLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237791: fltTcaEqptEgrAggrBytes1yearForwardRateLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237792: fltTcaEqptEgrAggrBytes5minForwardRateMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237793: fltTcaEqptEgrAggrBytes15minForwardRateMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237794: fltTcaEqptEgrAggrBytes1hForwardRateMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237795: fltTcaEqptEgrAggrBytes1dForwardRateMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237796: fltTcaEqptEgrAggrBytes1wForwardRateMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237797: fltTcaEqptEgrAggrBytes1moForwardRateMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237798: fltTcaEqptEgrAggrBytes1qtrForwardRateMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237799: fltTcaEqptEgrAggrBytes1yearForwardRateMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237800: fltTcaEqptEgrAggrBytes5minForwardRateMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237801: fltTcaEqptEgrAggrBytes15minForwardRateMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237802: fltTcaEqptEgrAggrBytes1hForwardRateMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237803: fltTcaEqptEgrAggrBytes1dForwardRateMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237804: fltTcaEqptEgrAggrBytes1wForwardRateMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237805: fltTcaEqptEgrAggrBytes1moForwardRateMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237806: fltTcaEqptEgrAggrBytes1qtrForwardRateMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237807: fltTcaEqptEgrAggrBytes1yearForwardRateMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237808: fltTcaEqptEgrAggrBytes5minForwardRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237809: fltTcaEqptEgrAggrBytes15minForwardRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237810: fltTcaEqptEgrAggrBytes1hForwardRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237811: fltTcaEqptEgrAggrBytes1dForwardRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237812: fltTcaEqptEgrAggrBytes1wForwardRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237813: fltTcaEqptEgrAggrBytes1moForwardRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237814: fltTcaEqptEgrAggrBytes1qtrForwardRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237815: fltTcaEqptEgrAggrBytes1yearForwardRateAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237848: fltTcaEqptEgrAggrBytes5minForwardRateTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237849: fltTcaEqptEgrAggrBytes15minForwardRateTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237850: fltTcaEqptEgrAggrBytes1hForwardRateTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237851: fltTcaEqptEgrAggrBytes1dForwardRateTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237852: fltTcaEqptEgrAggrBytes1wForwardRateTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237853: fltTcaEqptEgrAggrBytes1moForwardRateTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237854: fltTcaEqptEgrAggrBytes1qtrForwardRateTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237855: fltTcaEqptEgrAggrBytes1yearForwardRateTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237904: fltTcaEqptEgrAggrPkts5minDropLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237905: fltTcaEqptEgrAggrPkts15minDropLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237906: fltTcaEqptEgrAggrPkts1hDropLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237907: fltTcaEqptEgrAggrPkts1dDropLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237908: fltTcaEqptEgrAggrPkts1wDropLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237909: fltTcaEqptEgrAggrPkts1moDropLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237910: fltTcaEqptEgrAggrPkts1qtrDropLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237911: fltTcaEqptEgrAggrPkts1yearDropLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237920: fltTcaEqptEgrAggrPkts5minDropCum

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237921: fltTcaEqptEgrAggrPkts15minDropCum

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237922: fltTcaEqptEgrAggrPkts1hDropCum

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237923: fltTcaEqptEgrAggrPkts1dDropCum

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237924: fltTcaEqptEgrAggrPkts1wDropCum

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237925: fltTcaEqptEgrAggrPkts1moDropCum

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237926: fltTcaEqptEgrAggrPkts1qtrDropCum

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237927: fltTcaEqptEgrAggrPkts1yearDropCum

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237928: fltTcaEqptEgrAggrPkts5minDropPer

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237929: fltTcaEqptEgrAggrPkts15minDropPer

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237930: fltTcaEqptEgrAggrPkts1hDropPer

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237931: fltTcaEqptEgrAggrPkts1dDropPer

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237932: fltTcaEqptEgrAggrPkts1wDropPer

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237933: fltTcaEqptEgrAggrPkts1moDropPer

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237934: fltTcaEqptEgrAggrPkts1qtrDropPer

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237935: fltTcaEqptEgrAggrPkts1yearDropPer

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237936: fltTcaEqptEgrAggrPkts5minDropMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237937: fltTcaEqptEgrAggrPkts15minDropMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237938: fltTcaEqptEgrAggrPkts1hDropMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237939: fltTcaEqptEgrAggrPkts1dDropMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237940: fltTcaEqptEgrAggrPkts1wDropMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237941: fltTcaEqptEgrAggrPkts1moDropMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237942: fltTcaEqptEgrAggrPkts1qtrDropMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237943: fltTcaEqptEgrAggrPkts1yearDropMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237944: fltTcaEqptEgrAggrPkts5minDropMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237945: fltTcaEqptEgrAggrPkts15minDropMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237946: fltTcaEqptEgrAggrPkts1hDropMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237947: fltTcaEqptEgrAggrPkts1dDropMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237948: fltTcaEqptEgrAggrPkts1wDropMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237949: fltTcaEqptEgrAggrPkts1moDropMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237950: fltTcaEqptEgrAggrPkts1qtrDropMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237951: fltTcaEqptEgrAggrPkts1yearDropMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237952: fltTcaEqptEgrAggrPkts5minDropAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237953: fltTcaEqptEgrAggrPkts15minDropAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237954: fltTcaEqptEgrAggrPkts1hDropAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237955: fltTcaEqptEgrAggrPkts1dDropAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237956: fltTcaEqptEgrAggrPkts1wDropAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237957: fltTcaEqptEgrAggrPkts1moDropAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237958: fltTcaEqptEgrAggrPkts1qtrDropAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237959: fltTcaEqptEgrAggrPkts1yearDropAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237984: fltTcaEqptEgrAggrPkts5minDropTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237985: fltTcaEqptEgrAggrPkts15minDropTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237986: fltTcaEqptEgrAggrPkts1hDropTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237987: fltTcaEqptEgrAggrPkts1dDropTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237988: fltTcaEqptEgrAggrPkts1wDropTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237989: fltTcaEqptEgrAggrPkts1moDropTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237990: fltTcaEqptEgrAggrPkts1qtrDropTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237991: fltTcaEqptEgrAggrPkts1yearDropTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237992: fltTcaEqptEgrAggrPkts5minDropRate

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237993: fltTcaEqptEgrAggrPkts15minDropRate

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237994: fltTcaEqptEgrAggrPkts1hDropRate

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237995: fltTcaEqptEgrAggrPkts1dDropRate

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237996: fltTcaEqptEgrAggrPkts1wDropRate

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237997: fltTcaEqptEgrAggrPkts1moDropRate

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237998: fltTcaEqptEgrAggrPkts1qtrDropRate

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F237999: fltTcaEqptEgrAggrPkts1yearDropRate

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238072: fltTcaEqptEgrAggrPkts5minForwardLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238073: fltTcaEqptEgrAggrPkts15minForwardLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238074: fltTcaEqptEgrAggrPkts1hForwardLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238075: fltTcaEqptEgrAggrPkts1dForwardLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238076: fltTcaEqptEgrAggrPkts1wForwardLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238077: fltTcaEqptEgrAggrPkts1moForwardLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238078: fltTcaEqptEgrAggrPkts1qtrForwardLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238079: fltTcaEqptEgrAggrPkts1yearForwardLast

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238088: fltTcaEqptEgrAggrPkts5minForwardCum

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238089: fltTcaEqptEgrAggrPkts15minForwardCum

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238090: fltTcaEqptEgrAggrPkts1hForwardCum

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238091: fltTcaEqptEgrAggrPkts1dForwardCum

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238092: fltTcaEqptEgrAggrPkts1wForwardCum

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238093: fltTcaEqptEgrAggrPkts1moForwardCum

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238094: fltTcaEqptEgrAggrPkts1qtrForwardCum

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238095: fltTcaEqptEgrAggrPkts1yearForwardCum

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238096: fltTcaEqptEgrAggrPkts5minForwardPer

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238097: fltTcaEqptEgrAggrPkts15minForwardPer

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238098: fltTcaEqptEgrAggrPkts1hForwardPer

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238099: fltTcaEqptEgrAggrPkts1dForwardPer

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238100: fltTcaEqptEgrAggrPkts1wForwardPer

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238101: fltTcaEqptEgrAggrPkts1moForwardPer

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238102: fltTcaEqptEgrAggrPkts1qtrForwardPer

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238103: fltTcaEqptEgrAggrPkts1yearForwardPer

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238104: fltTcaEqptEgrAggrPkts5minForwardMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238105: fltTcaEqptEgrAggrPkts15minForwardMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238106: fltTcaEqptEgrAggrPkts1hForwardMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238107: fltTcaEqptEgrAggrPkts1dForwardMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238108: fltTcaEqptEgrAggrPkts1wForwardMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238109: fltTcaEqptEgrAggrPkts1moForwardMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238110: fltTcaEqptEgrAggrPkts1qtrForwardMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238111: fltTcaEqptEgrAggrPkts1yearForwardMin

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238112: fltTcaEqptEgrAggrPkts5minForwardMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238113: fltTcaEqptEgrAggrPkts15minForwardMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238114: fltTcaEqptEgrAggrPkts1hForwardMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238115: fltTcaEqptEgrAggrPkts1dForwardMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238116: fltTcaEqptEgrAggrPkts1wForwardMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238117: fltTcaEqptEgrAggrPkts1moForwardMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238118: fltTcaEqptEgrAggrPkts1qtrForwardMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238119: fltTcaEqptEgrAggrPkts1yearForwardMax

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238120: fltTcaEqptEgrAggrPkts5minForwardAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238121: fltTcaEqptEgrAggrPkts15minForwardAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238122: fltTcaEqptEgrAggrPkts1hForwardAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238123: fltTcaEqptEgrAggrPkts1dForwardAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238124: fltTcaEqptEgrAggrPkts1wForwardAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238125: fltTcaEqptEgrAggrPkts1moForwardAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238126: fltTcaEqptEgrAggrPkts1qtrForwardAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238127: fltTcaEqptEgrAggrPkts1yearForwardAvg

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238152: fltTcaEqptEgrAggrPkts5minForwardTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238153: fltTcaEqptEgrAggrPkts15minForwardTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238154: fltTcaEqptEgrAggrPkts1hForwardTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238155: fltTcaEqptEgrAggrPkts1dForwardTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238156: fltTcaEqptEgrAggrPkts1wForwardTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238157: fltTcaEqptEgrAggrPkts1moForwardTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238158: fltTcaEqptEgrAggrPkts1qtrForwardTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238159: fltTcaEqptEgrAggrPkts1yearForwardTr

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238160: fltTcaEqptEgrAggrPkts5minForwardRate

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238161: fltTcaEqptEgrAggrPkts15minForwardRate

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238162: fltTcaEqptEgrAggrPkts1hForwardRate

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238163: fltTcaEqptEgrAggrPkts1dForwardRate

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238164: fltTcaEqptEgrAggrPkts1wForwardRate

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238165: fltTcaEqptEgrAggrPkts1moForwardRate

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238166: fltTcaEqptEgrAggrPkts1qtrForwardRate

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238167: fltTcaEqptEgrAggrPkts1yearForwardRate

Severity: variable

Explanation: This fault is caused by "Egress Aggregated Forward Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Egress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238240: fltTcaEqptIngrAggrBytes5minDropLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238241: fltTcaEqptIngrAggrBytes15minDropLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238242: fltTcaEqptIngrAggrBytes1hDropLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238243: fltTcaEqptIngrAggrBytes1dDropLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238244: fltTcaEqptIngrAggrBytes1wDropLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238245: fltTcaEqptIngrAggrBytes1moDropLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238246: fltTcaEqptIngrAggrBytes1qtrDropLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238247: fltTcaEqptIngrAggrBytes1yearDropLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238256: fltTcaEqptIngrAggrBytes5minDropCum

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238257: fltTcaEqptIngrAggrBytes15minDropCum

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238258: fltTcaEqptIngrAggrBytes1hDropCum

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238259: fltTcaEqptIngrAggrBytes1dDropCum

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238260: fltTcaEqptIngrAggrBytes1wDropCum

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238261: fltTcaEqptIngrAggrBytes1moDropCum

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238262: fltTcaEqptIngrAggrBytes1qtrDropCum

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238263: fltTcaEqptIngrAggrBytes1yearDropCum

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238264: fltTcaEqptIngrAggrBytes5minDropPer

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238265: fltTcaEqptIngrAggrBytes15minDropPer

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238266: fltTcaEqptIngrAggrBytes1hDropPer

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238267: fltTcaEqptIngrAggrBytes1dDropPer

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238268: fltTcaEqptIngrAggrBytes1wDropPer

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238269: fltTcaEqptIngrAggrBytes1moDropPer

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238270: fltTcaEqptIngrAggrBytes1qtrDropPer

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238271: fltTcaEqptIngrAggrBytes1yearDropPer

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238272: fltTcaEqptIngrAggrBytes5minDropMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238273: fltTcaEqptIngrAggrBytes15minDropMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238274: fltTcaEqptIngrAggrBytes1hDropMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238275: fltTcaEqptIngrAggrBytes1dDropMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238276: fltTcaEqptIngrAggrBytes1wDropMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238277: fltTcaEqptIngrAggrBytes1moDropMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238278: fltTcaEqptIngrAggrBytes1qtrDropMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238279: fltTcaEqptIngrAggrBytes1yearDropMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238280: fltTcaEqptIngrAggrBytes5minDropMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238281: fltTcaEqptIngrAggrBytes15minDropMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238282: fltTcaEqptIngrAggrBytes1hDropMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238283: fltTcaEqptIngrAggrBytes1dDropMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238284: fltTcaEqptIngrAggrBytes1wDropMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238285: fltTcaEqptIngrAggrBytes1moDropMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238286: fltTcaEqptIngrAggrBytes1qtrDropMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238287: fltTcaEqptIngrAggrBytes1yearDropMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238288: fltTcaEqptIngrAggrBytes5minDropAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238289: fltTcaEqptIngrAggrBytes15minDropAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238290: fltTcaEqptIngrAggrBytes1hDropAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238291: fltTcaEqptIngrAggrBytes1dDropAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238292: fltTcaEqptIngrAggrBytes1wDropAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238293: fltTcaEqptIngrAggrBytes1moDropAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238294: fltTcaEqptIngrAggrBytes1qtrDropAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238295: fltTcaEqptIngrAggrBytes1yearDropAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238320: fltTcaEqptIngrAggrBytes5minDropTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238321: fltTcaEqptIngrAggrBytes15minDropTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238322: fltTcaEqptIngrAggrBytes1hDropTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238323: fltTcaEqptIngrAggrBytes1dDropTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238324: fltTcaEqptIngrAggrBytes1wDropTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238325: fltTcaEqptIngrAggrBytes1moDropTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238326: fltTcaEqptIngrAggrBytes1qtrDropTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238327: fltTcaEqptIngrAggrBytes1yearDropTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238328: fltTcaEqptIngrAggrBytes5minDropRate

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238329: fltTcaEqptIngrAggrBytes15minDropRate

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238330: fltTcaEqptIngrAggrBytes1hDropRate

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238331: fltTcaEqptIngrAggrBytes1dDropRate

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238332: fltTcaEqptIngrAggrBytes1wDropRate

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238333: fltTcaEqptIngrAggrBytes1moDropRate

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238334: fltTcaEqptIngrAggrBytes1qtrDropRate

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238335: fltTcaEqptIngrAggrBytes1yearDropRate

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238408: fltTcaEqptIngrAggrBytes5minDropRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238409: fltTcaEqptIngrAggrBytes15minDropRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238410: fltTcaEqptIngrAggrBytes1hDropRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238411: fltTcaEqptIngrAggrBytes1dDropRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238412: fltTcaEqptIngrAggrBytes1wDropRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238413: fltTcaEqptIngrAggrBytes1moDropRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238414: fltTcaEqptIngrAggrBytes1qtrDropRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238415: fltTcaEqptIngrAggrBytes1yearDropRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238416: fltTcaEqptIngrAggrBytes5minDropRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238417: fltTcaEqptIngrAggrBytes15minDropRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238418: fltTcaEqptIngrAggrBytes1hDropRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238419: fltTcaEqptIngrAggrBytes1dDropRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238420: fltTcaEqptIngrAggrBytes1wDropRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238421: fltTcaEqptIngrAggrBytes1moDropRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238422: fltTcaEqptIngrAggrBytes1qtrDropRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238423: fltTcaEqptIngrAggrBytes1yearDropRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238424: fltTcaEqptIngrAggrBytes5minDropRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238425: fltTcaEqptIngrAggrBytes15minDropRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238426: fltTcaEqptIngrAggrBytes1hDropRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238427: fltTcaEqptIngrAggrBytes1dDropRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238428: fltTcaEqptIngrAggrBytes1wDropRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238429: fltTcaEqptIngrAggrBytes1moDropRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238430: fltTcaEqptIngrAggrBytes1qtrDropRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238431: fltTcaEqptIngrAggrBytes1yearDropRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238432: fltTcaEqptIngrAggrBytes5minDropRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238433: fltTcaEqptIngrAggrBytes15minDropRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238434: fltTcaEqptIngrAggrBytes1hDropRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238435: fltTcaEqptIngrAggrBytes1dDropRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238436: fltTcaEqptIngrAggrBytes1wDropRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238437: fltTcaEqptIngrAggrBytes1moDropRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238438: fltTcaEqptIngrAggrBytes1qtrDropRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238439: fltTcaEqptIngrAggrBytes1yearDropRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238472: fltTcaEqptIngrAggrBytes5minDropRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238473: fltTcaEqptIngrAggrBytes15minDropRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238474: fltTcaEqptIngrAggrBytes1hDropRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238475: fltTcaEqptIngrAggrBytes1dDropRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238476: fltTcaEqptIngrAggrBytes1wDropRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238477: fltTcaEqptIngrAggrBytes1moDropRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238478: fltTcaEqptIngrAggrBytes1qtrDropRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238479: fltTcaEqptIngrAggrBytes1yearDropRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238528: fltTcaEqptIngrAggrBytes5minForwardLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238529: fltTcaEqptIngrAggrBytes15minForwardLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238530: fltTcaEqptIngrAggrBytes1hForwardLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238531: fltTcaEqptIngrAggrBytes1dForwardLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238532: fltTcaEqptIngrAggrBytes1wForwardLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238533: fltTcaEqptIngrAggrBytes1moForwardLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238534: fltTcaEqptIngrAggrBytes1qtrForwardLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238535: fltTcaEqptIngrAggrBytes1yearForwardLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238544: fltTcaEqptIngrAggrBytes5minForwardCum

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238545: fltTcaEqptIngrAggrBytes15minForwardCum

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238546: fltTcaEqptIngrAggrBytes1hForwardCum

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238547: fltTcaEqptIngrAggrBytes1dForwardCum

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238548: fltTcaEqptIngrAggrBytes1wForwardCum

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238549: fltTcaEqptIngrAggrBytes1moForwardCum

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238550: fltTcaEqptIngrAggrBytes1qtrForwardCum

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238551: fltTcaEqptIngrAggrBytes1yearForwardCum

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238552: fltTcaEqptIngrAggrBytes5minForwardPer

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238553: fltTcaEqptIngrAggrBytes15minForwardPer

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238554: fltTcaEqptIngrAggrBytes1hForwardPer

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238555: fltTcaEqptIngrAggrBytes1dForwardPer

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238556: fltTcaEqptIngrAggrBytes1wForwardPer

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238557: fltTcaEqptIngrAggrBytes1moForwardPer

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238558: fltTcaEqptIngrAggrBytes1qtrForwardPer

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238559: fltTcaEqptIngrAggrBytes1yearForwardPer

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238560: fltTcaEqptIngrAggrBytes5minForwardMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238561: fltTcaEqptIngrAggrBytes15minForwardMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238562: fltTcaEqptIngrAggrBytes1hForwardMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238563: fltTcaEqptIngrAggrBytes1dForwardMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238564: fltTcaEqptIngrAggrBytes1wForwardMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238565: fltTcaEqptIngrAggrBytes1moForwardMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238566: fltTcaEqptIngrAggrBytes1qtrForwardMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238567: fltTcaEqptIngrAggrBytes1yearForwardMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238568: fltTcaEqptIngrAggrBytes5minForwardMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238569: fltTcaEqptIngrAggrBytes15minForwardMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238570: fltTcaEqptIngrAggrBytes1hForwardMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238571: fltTcaEqptIngrAggrBytes1dForwardMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238572: fltTcaEqptIngrAggrBytes1wForwardMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238573: fltTcaEqptIngrAggrBytes1moForwardMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238574: fltTcaEqptIngrAggrBytes1qtrForwardMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238575: fltTcaEqptIngrAggrBytes1yearForwardMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238576: fltTcaEqptIngrAggrBytes5minForwardAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238577: fltTcaEqptIngrAggrBytes15minForwardAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238578: fltTcaEqptIngrAggrBytes1hForwardAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238579: fltTcaEqptIngrAggrBytes1dForwardAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238580: fltTcaEqptIngrAggrBytes1wForwardAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238581: fltTcaEqptIngrAggrBytes1moForwardAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238582: fltTcaEqptIngrAggrBytes1qtrForwardAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238583: fltTcaEqptIngrAggrBytes1yearForwardAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238608: fltTcaEqptIngrAggrBytes5minForwardTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238609: fltTcaEqptIngrAggrBytes15minForwardTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238610: fltTcaEqptIngrAggrBytes1hForwardTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238611: fltTcaEqptIngrAggrBytes1dForwardTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238612: fltTcaEqptIngrAggrBytes1wForwardTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238613: fltTcaEqptIngrAggrBytes1moForwardTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238614: fltTcaEqptIngrAggrBytes1qtrForwardTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238615: fltTcaEqptIngrAggrBytes1yearForwardTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238616: fltTcaEqptIngrAggrBytes5minForwardRate

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238617: fltTcaEqptIngrAggrBytes15minForwardRate

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238618: fltTcaEqptIngrAggrBytes1hForwardRate

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238619: fltTcaEqptIngrAggrBytes1dForwardRate

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238620: fltTcaEqptIngrAggrBytes1wForwardRate

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238621: fltTcaEqptIngrAggrBytes1moForwardRate

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238622: fltTcaEqptIngrAggrBytes1qtrForwardRate

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238623: fltTcaEqptIngrAggrBytes1yearForwardRate

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238696: fltTcaEqptIngrAggrBytes5minForwardRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238697: fltTcaEqptIngrAggrBytes15minForwardRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238698: fltTcaEqptIngrAggrBytes1hForwardRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238699: fltTcaEqptIngrAggrBytes1dForwardRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238700: fltTcaEqptIngrAggrBytes1wForwardRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238701: fltTcaEqptIngrAggrBytes1moForwardRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238702: fltTcaEqptIngrAggrBytes1qtrForwardRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238703: fltTcaEqptIngrAggrBytes1yearForwardRateLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238704: fltTcaEqptIngrAggrBytes5minForwardRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238705: fltTcaEqptIngrAggrBytes15minForwardRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238706: fltTcaEqptIngrAggrBytes1hForwardRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238707: fltTcaEqptIngrAggrBytes1dForwardRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238708: fltTcaEqptIngrAggrBytes1wForwardRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238709: fltTcaEqptIngrAggrBytes1moForwardRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238710: fltTcaEqptIngrAggrBytes1qtrForwardRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238711: fltTcaEqptIngrAggrBytes1yearForwardRateMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238712: fltTcaEqptIngrAggrBytes5minForwardRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238713: fltTcaEqptIngrAggrBytes15minForwardRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238714: fltTcaEqptIngrAggrBytes1hForwardRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238715: fltTcaEqptIngrAggrBytes1dForwardRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238716: fltTcaEqptIngrAggrBytes1wForwardRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238717: fltTcaEqptIngrAggrBytes1moForwardRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238718: fltTcaEqptIngrAggrBytes1qtrForwardRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238719: fltTcaEqptIngrAggrBytes1yearForwardRateMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238720: fltTcaEqptIngrAggrBytes5minForwardRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238721: fltTcaEqptIngrAggrBytes15minForwardRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238722: fltTcaEqptIngrAggrBytes1hForwardRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238723: fltTcaEqptIngrAggrBytes1dForwardRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238724: fltTcaEqptIngrAggrBytes1wForwardRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238725: fltTcaEqptIngrAggrBytes1moForwardRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238726: fltTcaEqptIngrAggrBytes1qtrForwardRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238727: fltTcaEqptIngrAggrBytes1yearForwardRateAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238760: fltTcaEqptIngrAggrBytes5minForwardRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238761: fltTcaEqptIngrAggrBytes15minForwardRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238762: fltTcaEqptIngrAggrBytes1hForwardRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238763: fltTcaEqptIngrAggrBytes1dForwardRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238764: fltTcaEqptIngrAggrBytes1wForwardRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238765: fltTcaEqptIngrAggrBytes1moForwardRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238766: fltTcaEqptIngrAggrBytes1qtrForwardRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238767: fltTcaEqptIngrAggrBytes1yearForwardRateTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238816: fltTcaEqptIngrAggrPkts5minDropLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238817: fltTcaEqptIngrAggrPkts15minDropLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238818: fltTcaEqptIngrAggrPkts1hDropLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238819: fltTcaEqptIngrAggrPkts1dDropLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238820: fltTcaEqptIngrAggrPkts1wDropLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238821: fltTcaEqptIngrAggrPkts1moDropLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238822: fltTcaEqptIngrAggrPkts1qtrDropLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238823: fltTcaEqptIngrAggrPkts1yearDropLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238832: fltTcaEqptIngrAggrPkts5minDropCum

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238833: fltTcaEqptIngrAggrPkts15minDropCum

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238834: fltTcaEqptIngrAggrPkts1hDropCum

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238835: fltTcaEqptIngrAggrPkts1dDropCum

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238836: fltTcaEqptIngrAggrPkts1wDropCum

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238837: fltTcaEqptIngrAggrPkts1moDropCum

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238838: fltTcaEqptIngrAggrPkts1qtrDropCum

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238839: fltTcaEqptIngrAggrPkts1yearDropCum

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238840: fltTcaEqptIngrAggrPkts5minDropPer

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238841: fltTcaEqptIngrAggrPkts15minDropPer

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238842: fltTcaEqptIngrAggrPkts1hDropPer

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238843: fltTcaEqptIngrAggrPkts1dDropPer

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238844: fltTcaEqptIngrAggrPkts1wDropPer

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238845: fltTcaEqptIngrAggrPkts1moDropPer

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238846: fltTcaEqptIngrAggrPkts1qtrDropPer

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238847: fltTcaEqptIngrAggrPkts1yearDropPer

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238848: fltTcaEqptIngrAggrPkts5minDropMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238849: fltTcaEqptIngrAggrPkts15minDropMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238850: fltTcaEqptIngrAggrPkts1hDropMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238851: fltTcaEqptIngrAggrPkts1dDropMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238852: fltTcaEqptIngrAggrPkts1wDropMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238853: fltTcaEqptIngrAggrPkts1moDropMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238854: fltTcaEqptIngrAggrPkts1qtrDropMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238855: fltTcaEqptIngrAggrPkts1yearDropMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238856: fltTcaEqptIngrAggrPkts5minDropMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238857: fltTcaEqptIngrAggrPkts15minDropMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238858: fltTcaEqptIngrAggrPkts1hDropMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238859: fltTcaEqptIngrAggrPkts1dDropMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238860: fltTcaEqptIngrAggrPkts1wDropMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238861: fltTcaEqptIngrAggrPkts1moDropMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238862: fltTcaEqptIngrAggrPkts1qtrDropMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238863: fltTcaEqptIngrAggrPkts1yearDropMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238864: fltTcaEqptIngrAggrPkts5minDropAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238865: fltTcaEqptIngrAggrPkts15minDropAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238866: fltTcaEqptIngrAggrPkts1hDropAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238867: fltTcaEqptIngrAggrPkts1dDropAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238868: fltTcaEqptIngrAggrPkts1wDropAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238869: fltTcaEqptIngrAggrPkts1moDropAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238870: fltTcaEqptIngrAggrPkts1qtrDropAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238871: fltTcaEqptIngrAggrPkts1yearDropAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238896: fltTcaEqptIngrAggrPkts5minDropTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238897: fltTcaEqptIngrAggrPkts15minDropTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238898: fltTcaEqptIngrAggrPkts1hDropTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238899: fltTcaEqptIngrAggrPkts1dDropTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238900: fltTcaEqptIngrAggrPkts1wDropTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238901: fltTcaEqptIngrAggrPkts1moDropTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238902: fltTcaEqptIngrAggrPkts1qtrDropTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238903: fltTcaEqptIngrAggrPkts1yearDropTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238904: fltTcaEqptIngrAggrPkts5minDropRate

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238905: fltTcaEqptIngrAggrPkts15minDropRate

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238906: fltTcaEqptIngrAggrPkts1hDropRate

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238907: fltTcaEqptIngrAggrPkts1dDropRate

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238908: fltTcaEqptIngrAggrPkts1wDropRate

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238909: fltTcaEqptIngrAggrPkts1moDropRate

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238910: fltTcaEqptIngrAggrPkts1qtrDropRate

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238911: fltTcaEqptIngrAggrPkts1yearDropRate

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238984: fltTcaEqptIngrAggrPkts5minForwardLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238985: fltTcaEqptIngrAggrPkts15minForwardLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238986: fltTcaEqptIngrAggrPkts1hForwardLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238987: fltTcaEqptIngrAggrPkts1dForwardLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238988: fltTcaEqptIngrAggrPkts1wForwardLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238989: fltTcaEqptIngrAggrPkts1moForwardLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238990: fltTcaEqptIngrAggrPkts1qtrForwardLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F238991: fltTcaEqptIngrAggrPkts1yearForwardLast

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239000: fltTcaEqptIngrAggrPkts5minForwardCum

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239001: fltTcaEqptIngrAggrPkts15minForwardCum

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239002: fltTcaEqptIngrAggrPkts1hForwardCum

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239003: fltTcaEqptIngrAggrPkts1dForwardCum

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239004: fltTcaEqptIngrAggrPkts1wForwardCum

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239005: fltTcaEqptIngrAggrPkts1moForwardCum

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239006: fltTcaEqptIngrAggrPkts1qtrForwardCum

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239007: fltTcaEqptIngrAggrPkts1yearForwardCum

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239008: fltTcaEqptIngrAggrPkts5minForwardPer

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239009: fltTcaEqptIngrAggrPkts15minForwardPer

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239010: fltTcaEqptIngrAggrPkts1hForwardPer

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239011: fltTcaEqptIngrAggrPkts1dForwardPer

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239012: fltTcaEqptIngrAggrPkts1wForwardPer

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239013: fltTcaEqptIngrAggrPkts1moForwardPer

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239014: fltTcaEqptIngrAggrPkts1qtrForwardPer

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239015: fltTcaEqptIngrAggrPkts1yearForwardPer

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239016: fltTcaEqptIngrAggrPkts5minForwardMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239017: fltTcaEqptIngrAggrPkts15minForwardMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239018: fltTcaEqptIngrAggrPkts1hForwardMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239019: fltTcaEqptIngrAggrPkts1dForwardMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239020: fltTcaEqptIngrAggrPkts1wForwardMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239021: fltTcaEqptIngrAggrPkts1moForwardMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239022: fltTcaEqptIngrAggrPkts1qtrForwardMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239023: fltTcaEqptIngrAggrPkts1yearForwardMin

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239024: fltTcaEqptIngrAggrPkts5minForwardMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239025: fltTcaEqptIngrAggrPkts15minForwardMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239026: fltTcaEqptIngrAggrPkts1hForwardMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239027: fltTcaEqptIngrAggrPkts1dForwardMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239028: fltTcaEqptIngrAggrPkts1wForwardMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239029: fltTcaEqptIngrAggrPkts1moForwardMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239030: fltTcaEqptIngrAggrPkts1qtrForwardMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239031: fltTcaEqptIngrAggrPkts1yearForwardMax

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239032: fltTcaEqptIngrAggrPkts5minForwardAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239033: fltTcaEqptIngrAggrPkts15minForwardAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239034: fltTcaEqptIngrAggrPkts1hForwardAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239035: fltTcaEqptIngrAggrPkts1dForwardAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239036: fltTcaEqptIngrAggrPkts1wForwardAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239037: fltTcaEqptIngrAggrPkts1moForwardAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239038: fltTcaEqptIngrAggrPkts1qtrForwardAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239039: fltTcaEqptIngrAggrPkts1yearForwardAvg

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239064: fltTcaEqptIngrAggrPkts5minForwardTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239065: fltTcaEqptIngrAggrPkts15minForwardTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239066: fltTcaEqptIngrAggrPkts1hForwardTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239067: fltTcaEqptIngrAggrPkts1dForwardTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239068: fltTcaEqptIngrAggrPkts1wForwardTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239069: fltTcaEqptIngrAggrPkts1moForwardTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239070: fltTcaEqptIngrAggrPkts1qtrForwardTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239071: fltTcaEqptIngrAggrPkts1yearForwardTr

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239072: fltTcaEqptIngrAggrPkts5minForwardRate

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239073: fltTcaEqptIngrAggrPkts15minForwardRate

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239074: fltTcaEqptIngrAggrPkts1hForwardRate

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239075: fltTcaEqptIngrAggrPkts1dForwardRate

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239076: fltTcaEqptIngrAggrPkts1wForwardRate

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239077: fltTcaEqptIngrAggrPkts1moForwardRate

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239078: fltTcaEqptIngrAggrPkts1qtrForwardRate

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F239079: fltTcaEqptIngrAggrPkts1yearForwardRate

Severity: variable

Explanation: This fault is caused by "Ingress Aggregated Forward Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Ingress Aggregated Forward Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2397: fltSvcredirDestOperStFailed

Severity: major

Explanation: This fault occurs when PBR service destination goes to failed state

Recommended Action: To recover from this fault, try the following actions

1. Check if hardware supports this feature

2. Look at any configuration issues

3. Verify the configuration is correct/complete

4. Check network connectivity and ensure the port is up

F2398: fltSvccopyDestOperStFailed

Severity: major

Explanation: This fault occurs when copy service destination goes to failed state

Recommended Action: To recover from this fault, try the following actions

1. Check if hardware supports this feature

2. Look at any configuration issues

3. Verify the configuration is correct/complete

4. Check network connectivity and ensure the port is up

F2399: fltFvStorageIssuesConfig-failed

Severity: minor

Explanation: This fault occurs when an End Point Group is incompletely or incorrectly configured.

Recommended Action: If you see this fault, take the following actions:

1. Look at the configuration for issues

2. For insufficient-resources, this is due to overall there are not enough resources

3. For invalid-vsan, this EPG's encap is not valid for the domain on which the EPG is configured

4. For native-vsan-failure, multiple vsans are configured as native on the path

5. For further details, refer to the documentation for fv:StorageIssues

6. Verify the End Point Group configuration is correct and complete

7. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F2404: fltPimDomNwIssue

Severity: minor

Explanation: This fault occurs because PIM is enabled on a VRF which is deployed on a a leaf which does not support multicast configuration.

Recommended Action: If you see this fault, please disable PIM on of VRF that is deployed on on leaf that does not support multicast.

F2405: fltL2VfcIfPortDownVfc

Severity: major

Explanation: This fault occurs when a VFC port is down

Recommended Action: If you see this fault, take the following actions

1. Check the port down reason and try resolving the issue

2. Remove the configuration or administratively shut the port if the port is not in use

3. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F2406: fltL2PortSecurityPolDefMacLimitHit

Severity: major

Explanation: This fault occurs when the ep learning is disabled on interface

Recommended Action: If this fault is consistently happening, try the following actions

1. Check total number of MACs learnt on this interface

2. Toggle the Port Security violation or change the maximum limit set for number of MACs that can be learnt on this interface

3. If maximum limit is not set, generate the show tech-support file and contact Cisco TAC.

F2407: fltL2MacCktEpMacCktEpConfigFailed

Severity: major

Explanation: This fault occurs when the MacCktEP configuration fails

Recommended Action: If this fault is consistently happening, try the following actions

1. Check if hardware supports this configuration

2. If the network connectivity is fine, generate the show tech-support file and contact Cisco TAC.

F2409: fltFvBDInvalidConfigOnBD

Severity: warning

Explanation: This fault occurs when there are specific configuration errors on a bridge domain, but the igmpsnoop is disabled.

Recommended Action: If you see this fault, take the following actions:

1. For "igmpsnoop is disabled on multicast enabled BD" error, enable igmpsnoop (set adminSt in igmp:SnoopPol or disallow multicast (set property mcastAllow to "false")

2. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC

F2421: fltEqptdiagSubjOperStFailed

Severity: minor

Explanation: This fault occurs when a diagnostic test fails.

Recommended Action: The failed diagnostic test isolates the error to a port, card(FRU) or the entire switch. For port-level errors, the port are put in disabled state. For card or switch level errors, collect the show techsupport command output on the switch and contact Cisco TAC to eliminate any known software issues before replacing the hardware.

F2428: fltCompHvOperationalIssues

Severity: critical

Explanation: This fault is raised when both the opflex channels for the host are down.

Recommended Action: If you see this fault, take the following actions:

1. Do vem restart on AVS Host.

2. If the above command doesn't fix, check the vnics and portgroups on the vcenter.

3. Check the AEP configuration on the APIC.

4. Check the ipaddress for vmk interfaces on AVS Host and try pinging leaf.

5. If the above actions did not resolve the issue, collect avs-tech-support file and contact Cisco TAC.

F2431: fltInfraRsMonBrkoutInfraPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2437: fltL2VfcIfPortVsanDownVfc

Severity: minor

Explanation: This fault occurs when a VFC portVsan is down

Recommended Action: If you see this fault, take the following actions

1. Check the port down reason and try resolving the issue

2. Remove the configuration or administratively shut the port if the port is not in use

3. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F2438: fltVsanmgrInstVsanCreateFailedLimitReached

Severity: minor

Explanation: This fault occurs when a Created Vsan count exceeds allowed limit on node

Recommended Action: If you see this fault, take the following actions

1. Check the number of allowed VSANS and deleted unused VSAN from node

2. Please note if you configure more than supported VSANS first #num supported vsans will be created you could loose a working VSAN after switch reload.

3. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F2444: fltOspfADomMaxEcmpExceeded

Severity: warning

Explanation: This fault occurs when max-path configuration exceeds the recommended value

Recommended Action: None set.

F2445: fltL2RsSrvExtIfMapTrafficMapConfigFail

Severity: warning

Explanation: This fault occurs when traffic map configuration failed

Recommended Action: If you see this fault, take the following actions

1. Check if the configured NP port is the same as current one

2. Remove the traffic map config, shutdown the F port and then config traffic map again

F2447: fltL2RsSrvExtIfMapNpvCfgCtrl

Severity: warning

Explanation: This fault is caused by a hardware programming failure

Recommended Action: The system will periodically retry to program the hardware. If the failure is due to lack of hardware resources, free up resources by removing or simplifying existing configuration. One of the reasons for lack of hardware resources is exhaustion of VLANs in ToR. These hardware resources can be examined by looking at capacity dashboard under OPERATIONS tab. Please check entry against the number of VLANs in output of command show vlan summary issued at node where fault is generated to check whether it exceeds above advertised node capacity.

F2451: fltHsrpGroupPGroupVipSubnetMismatch

Severity: minor

Explanation: This fault occurs when under a given hsrpGroupP VIP doesn't match subnet of the interface: - there is a hsrpGroupP configuration but there is no path configuration with subnet matching the Group VIP;

Recommended Action: If you see this fault, take the following actions:

1. Ensure that for every HsrpGroupP there is at least a subnet matching in RsPathL3OutAtt or Ip

F2459: fltHsrpRsGroupPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2460: fltHsrpRsIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2467: fltL2VfcIfFcoemgrCfgCtrl

Severity: warning

Explanation: This fault is caused by a hardware programming failure

Recommended Action: The system will periodically retry to program the hardware. If the failure is due to lack of hardware resources, free up resources by removing or simplifying existing configuration. One of the reasons for lack of hardware resources is exhaustion of VLANs in ToR. These hardware resources can be examined by looking at capacity dashboard under OPERATIONS tab. Please check entry against the number of VLANs in output of command show vlan summary issued at node where fault is generated to check whether it exceeds above advertised node capacity.

F2469: fltFvRsBDToNetflowMonitorPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2470: fltInfraRsNetflowMonitorPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2471: fltInfraRsNetflowNodePolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2472: fltL3extRsLIfPToNetflowMonitorPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2473: fltNetflowRsExporterToEPgResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2474: fltNetflowRsMonitorToExporterResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2475: fltNetflowRsMonitorToRecordResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2476: fltNetflowRsMonitorDefToExporterDefResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2477: fltNetflowRsMonitorDefToRecordDefResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2481: fltIgmpRsSnoopAccessGroupFilterRMapResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F250152: fltTcaEqptcapacityL2Usage5minNormalizedLast

Severity: variable

Explanation: This fault is caused by "Local L2 entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250153: fltTcaEqptcapacityL2Usage15minNormalizedLast

Severity: variable

Explanation: This fault is caused by "Local L2 entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250154: fltTcaEqptcapacityL2Usage1hNormalizedLast

Severity: variable

Explanation: This fault is caused by "Local L2 entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250155: fltTcaEqptcapacityL2Usage1dNormalizedLast

Severity: variable

Explanation: This fault is caused by "Local L2 entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250156: fltTcaEqptcapacityL2Usage1wNormalizedLast

Severity: variable

Explanation: This fault is caused by "Local L2 entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250157: fltTcaEqptcapacityL2Usage1moNormalizedLast

Severity: variable

Explanation: This fault is caused by "Local L2 entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250158: fltTcaEqptcapacityL2Usage1qtrNormalizedLast

Severity: variable

Explanation: This fault is caused by "Local L2 entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250159: fltTcaEqptcapacityL2Usage1yearNormalizedLast

Severity: variable

Explanation: This fault is caused by "Local L2 entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250160: fltTcaEqptcapacityL2Usage5minNormalizedMin

Severity: variable

Explanation: This fault is caused by "Local L2 entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250161: fltTcaEqptcapacityL2Usage15minNormalizedMin

Severity: variable

Explanation: This fault is caused by "Local L2 entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250162: fltTcaEqptcapacityL2Usage1hNormalizedMin

Severity: variable

Explanation: This fault is caused by "Local L2 entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250163: fltTcaEqptcapacityL2Usage1dNormalizedMin

Severity: variable

Explanation: This fault is caused by "Local L2 entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250164: fltTcaEqptcapacityL2Usage1wNormalizedMin

Severity: variable

Explanation: This fault is caused by "Local L2 entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250165: fltTcaEqptcapacityL2Usage1moNormalizedMin

Severity: variable

Explanation: This fault is caused by "Local L2 entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250166: fltTcaEqptcapacityL2Usage1qtrNormalizedMin

Severity: variable

Explanation: This fault is caused by "Local L2 entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250167: fltTcaEqptcapacityL2Usage1yearNormalizedMin

Severity: variable

Explanation: This fault is caused by "Local L2 entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250168: fltTcaEqptcapacityL2Usage5minNormalizedMax

Severity: variable

Explanation: This fault is caused by "Local L2 entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250169: fltTcaEqptcapacityL2Usage15minNormalizedMax

Severity: variable

Explanation: This fault is caused by "Local L2 entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250170: fltTcaEqptcapacityL2Usage1hNormalizedMax

Severity: variable

Explanation: This fault is caused by "Local L2 entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250171: fltTcaEqptcapacityL2Usage1dNormalizedMax

Severity: variable

Explanation: This fault is caused by "Local L2 entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250172: fltTcaEqptcapacityL2Usage1wNormalizedMax

Severity: variable

Explanation: This fault is caused by "Local L2 entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250173: fltTcaEqptcapacityL2Usage1moNormalizedMax

Severity: variable

Explanation: This fault is caused by "Local L2 entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250174: fltTcaEqptcapacityL2Usage1qtrNormalizedMax

Severity: variable

Explanation: This fault is caused by "Local L2 entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250175: fltTcaEqptcapacityL2Usage1yearNormalizedMax

Severity: variable

Explanation: This fault is caused by "Local L2 entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250176: fltTcaEqptcapacityL2Usage5minNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Local L2 entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250177: fltTcaEqptcapacityL2Usage15minNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Local L2 entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250178: fltTcaEqptcapacityL2Usage1hNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Local L2 entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250179: fltTcaEqptcapacityL2Usage1dNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Local L2 entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250180: fltTcaEqptcapacityL2Usage1wNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Local L2 entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250181: fltTcaEqptcapacityL2Usage1moNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Local L2 entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250182: fltTcaEqptcapacityL2Usage1qtrNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Local L2 entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250183: fltTcaEqptcapacityL2Usage1yearNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Local L2 entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250216: fltTcaEqptcapacityL2Usage5minNormalizedTr

Severity: variable

Explanation: This fault is caused by "Local L2 entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250217: fltTcaEqptcapacityL2Usage15minNormalizedTr

Severity: variable

Explanation: This fault is caused by "Local L2 entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250218: fltTcaEqptcapacityL2Usage1hNormalizedTr

Severity: variable

Explanation: This fault is caused by "Local L2 entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250219: fltTcaEqptcapacityL2Usage1dNormalizedTr

Severity: variable

Explanation: This fault is caused by "Local L2 entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250220: fltTcaEqptcapacityL2Usage1wNormalizedTr

Severity: variable

Explanation: This fault is caused by "Local L2 entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250221: fltTcaEqptcapacityL2Usage1moNormalizedTr

Severity: variable

Explanation: This fault is caused by "Local L2 entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250222: fltTcaEqptcapacityL2Usage1qtrNormalizedTr

Severity: variable

Explanation: This fault is caused by "Local L2 entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250223: fltTcaEqptcapacityL2Usage1yearNormalizedTr

Severity: variable

Explanation: This fault is caused by "Local L2 entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250272: fltTcaEqptcapacityL3UsagePer5minNormalizedv4Last

Severity: variable

Explanation: This fault is caused by "Local v4 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250273: fltTcaEqptcapacityL3UsagePer15minNormalizedv4Last

Severity: variable

Explanation: This fault is caused by "Local v4 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250274: fltTcaEqptcapacityL3UsagePer1hNormalizedv4Last

Severity: variable

Explanation: This fault is caused by "Local v4 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250275: fltTcaEqptcapacityL3UsagePer1dNormalizedv4Last

Severity: variable

Explanation: This fault is caused by "Local v4 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250276: fltTcaEqptcapacityL3UsagePer1wNormalizedv4Last

Severity: variable

Explanation: This fault is caused by "Local v4 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250277: fltTcaEqptcapacityL3UsagePer1moNormalizedv4Last

Severity: variable

Explanation: This fault is caused by "Local v4 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250278: fltTcaEqptcapacityL3UsagePer1qtrNormalizedv4Last

Severity: variable

Explanation: This fault is caused by "Local v4 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250279: fltTcaEqptcapacityL3UsagePer1yearNormalizedv4Last

Severity: variable

Explanation: This fault is caused by "Local v4 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250280: fltTcaEqptcapacityL3UsagePer5minNormalizedv4Min

Severity: variable

Explanation: This fault is caused by "Local v4 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250281: fltTcaEqptcapacityL3UsagePer15minNormalizedv4Min

Severity: variable

Explanation: This fault is caused by "Local v4 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250282: fltTcaEqptcapacityL3UsagePer1hNormalizedv4Min

Severity: variable

Explanation: This fault is caused by "Local v4 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250283: fltTcaEqptcapacityL3UsagePer1dNormalizedv4Min

Severity: variable

Explanation: This fault is caused by "Local v4 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250284: fltTcaEqptcapacityL3UsagePer1wNormalizedv4Min

Severity: variable

Explanation: This fault is caused by "Local v4 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250285: fltTcaEqptcapacityL3UsagePer1moNormalizedv4Min

Severity: variable

Explanation: This fault is caused by "Local v4 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250286: fltTcaEqptcapacityL3UsagePer1qtrNormalizedv4Min

Severity: variable

Explanation: This fault is caused by "Local v4 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250287: fltTcaEqptcapacityL3UsagePer1yearNormalizedv4Min

Severity: variable

Explanation: This fault is caused by "Local v4 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250288: fltTcaEqptcapacityL3UsagePer5minNormalizedv4Max

Severity: variable

Explanation: This fault is caused by "Local v4 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250289: fltTcaEqptcapacityL3UsagePer15minNormalizedv4Max

Severity: variable

Explanation: This fault is caused by "Local v4 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250290: fltTcaEqptcapacityL3UsagePer1hNormalizedv4Max

Severity: variable

Explanation: This fault is caused by "Local v4 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250291: fltTcaEqptcapacityL3UsagePer1dNormalizedv4Max

Severity: variable

Explanation: This fault is caused by "Local v4 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250292: fltTcaEqptcapacityL3UsagePer1wNormalizedv4Max

Severity: variable

Explanation: This fault is caused by "Local v4 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250293: fltTcaEqptcapacityL3UsagePer1moNormalizedv4Max

Severity: variable

Explanation: This fault is caused by "Local v4 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250294: fltTcaEqptcapacityL3UsagePer1qtrNormalizedv4Max

Severity: variable

Explanation: This fault is caused by "Local v4 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250295: fltTcaEqptcapacityL3UsagePer1yearNormalizedv4Max

Severity: variable

Explanation: This fault is caused by "Local v4 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250296: fltTcaEqptcapacityL3UsagePer5minNormalizedv4Avg

Severity: variable

Explanation: This fault is caused by "Local v4 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250297: fltTcaEqptcapacityL3UsagePer15minNormalizedv4Avg

Severity: variable

Explanation: This fault is caused by "Local v4 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250298: fltTcaEqptcapacityL3UsagePer1hNormalizedv4Avg

Severity: variable

Explanation: This fault is caused by "Local v4 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250299: fltTcaEqptcapacityL3UsagePer1dNormalizedv4Avg

Severity: variable

Explanation: This fault is caused by "Local v4 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250300: fltTcaEqptcapacityL3UsagePer1wNormalizedv4Avg

Severity: variable

Explanation: This fault is caused by "Local v4 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250301: fltTcaEqptcapacityL3UsagePer1moNormalizedv4Avg

Severity: variable

Explanation: This fault is caused by "Local v4 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250302: fltTcaEqptcapacityL3UsagePer1qtrNormalizedv4Avg

Severity: variable

Explanation: This fault is caused by "Local v4 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250303: fltTcaEqptcapacityL3UsagePer1yearNormalizedv4Avg

Severity: variable

Explanation: This fault is caused by "Local v4 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250336: fltTcaEqptcapacityL3UsagePer5minNormalizedv4Tr

Severity: variable

Explanation: This fault is caused by "Local v4 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250337: fltTcaEqptcapacityL3UsagePer15minNormalizedv4Tr

Severity: variable

Explanation: This fault is caused by "Local v4 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250338: fltTcaEqptcapacityL3UsagePer1hNormalizedv4Tr

Severity: variable

Explanation: This fault is caused by "Local v4 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250339: fltTcaEqptcapacityL3UsagePer1dNormalizedv4Tr

Severity: variable

Explanation: This fault is caused by "Local v4 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250340: fltTcaEqptcapacityL3UsagePer1wNormalizedv4Tr

Severity: variable

Explanation: This fault is caused by "Local v4 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250341: fltTcaEqptcapacityL3UsagePer1moNormalizedv4Tr

Severity: variable

Explanation: This fault is caused by "Local v4 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250342: fltTcaEqptcapacityL3UsagePer1qtrNormalizedv4Tr

Severity: variable

Explanation: This fault is caused by "Local v4 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250343: fltTcaEqptcapacityL3UsagePer1yearNormalizedv4Tr

Severity: variable

Explanation: This fault is caused by "Local v4 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250392: fltTcaEqptcapacityL3UsagePer5minNormalizedv6Last

Severity: variable

Explanation: This fault is caused by "Local v6 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250393: fltTcaEqptcapacityL3UsagePer15minNormalizedv6Last

Severity: variable

Explanation: This fault is caused by "Local v6 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250394: fltTcaEqptcapacityL3UsagePer1hNormalizedv6Last

Severity: variable

Explanation: This fault is caused by "Local v6 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250395: fltTcaEqptcapacityL3UsagePer1dNormalizedv6Last

Severity: variable

Explanation: This fault is caused by "Local v6 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250396: fltTcaEqptcapacityL3UsagePer1wNormalizedv6Last

Severity: variable

Explanation: This fault is caused by "Local v6 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250397: fltTcaEqptcapacityL3UsagePer1moNormalizedv6Last

Severity: variable

Explanation: This fault is caused by "Local v6 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250398: fltTcaEqptcapacityL3UsagePer1qtrNormalizedv6Last

Severity: variable

Explanation: This fault is caused by "Local v6 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250399: fltTcaEqptcapacityL3UsagePer1yearNormalizedv6Last

Severity: variable

Explanation: This fault is caused by "Local v6 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2504: fltFvRsTrustCtrlResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F250400: fltTcaEqptcapacityL3UsagePer5minNormalizedv6Min

Severity: variable

Explanation: This fault is caused by "Local v6 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250401: fltTcaEqptcapacityL3UsagePer15minNormalizedv6Min

Severity: variable

Explanation: This fault is caused by "Local v6 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250402: fltTcaEqptcapacityL3UsagePer1hNormalizedv6Min

Severity: variable

Explanation: This fault is caused by "Local v6 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250403: fltTcaEqptcapacityL3UsagePer1dNormalizedv6Min

Severity: variable

Explanation: This fault is caused by "Local v6 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250404: fltTcaEqptcapacityL3UsagePer1wNormalizedv6Min

Severity: variable

Explanation: This fault is caused by "Local v6 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250405: fltTcaEqptcapacityL3UsagePer1moNormalizedv6Min

Severity: variable

Explanation: This fault is caused by "Local v6 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250406: fltTcaEqptcapacityL3UsagePer1qtrNormalizedv6Min

Severity: variable

Explanation: This fault is caused by "Local v6 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250407: fltTcaEqptcapacityL3UsagePer1yearNormalizedv6Min

Severity: variable

Explanation: This fault is caused by "Local v6 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250408: fltTcaEqptcapacityL3UsagePer5minNormalizedv6Max

Severity: variable

Explanation: This fault is caused by "Local v6 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250409: fltTcaEqptcapacityL3UsagePer15minNormalizedv6Max

Severity: variable

Explanation: This fault is caused by "Local v6 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250410: fltTcaEqptcapacityL3UsagePer1hNormalizedv6Max

Severity: variable

Explanation: This fault is caused by "Local v6 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250411: fltTcaEqptcapacityL3UsagePer1dNormalizedv6Max

Severity: variable

Explanation: This fault is caused by "Local v6 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250412: fltTcaEqptcapacityL3UsagePer1wNormalizedv6Max

Severity: variable

Explanation: This fault is caused by "Local v6 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250413: fltTcaEqptcapacityL3UsagePer1moNormalizedv6Max

Severity: variable

Explanation: This fault is caused by "Local v6 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250414: fltTcaEqptcapacityL3UsagePer1qtrNormalizedv6Max

Severity: variable

Explanation: This fault is caused by "Local v6 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250415: fltTcaEqptcapacityL3UsagePer1yearNormalizedv6Max

Severity: variable

Explanation: This fault is caused by "Local v6 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250416: fltTcaEqptcapacityL3UsagePer5minNormalizedv6Avg

Severity: variable

Explanation: This fault is caused by "Local v6 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250417: fltTcaEqptcapacityL3UsagePer15minNormalizedv6Avg

Severity: variable

Explanation: This fault is caused by "Local v6 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250418: fltTcaEqptcapacityL3UsagePer1hNormalizedv6Avg

Severity: variable

Explanation: This fault is caused by "Local v6 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250419: fltTcaEqptcapacityL3UsagePer1dNormalizedv6Avg

Severity: variable

Explanation: This fault is caused by "Local v6 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250420: fltTcaEqptcapacityL3UsagePer1wNormalizedv6Avg

Severity: variable

Explanation: This fault is caused by "Local v6 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250421: fltTcaEqptcapacityL3UsagePer1moNormalizedv6Avg

Severity: variable

Explanation: This fault is caused by "Local v6 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250422: fltTcaEqptcapacityL3UsagePer1qtrNormalizedv6Avg

Severity: variable

Explanation: This fault is caused by "Local v6 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250423: fltTcaEqptcapacityL3UsagePer1yearNormalizedv6Avg

Severity: variable

Explanation: This fault is caused by "Local v6 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250456: fltTcaEqptcapacityL3UsagePer5minNormalizedv6Tr

Severity: variable

Explanation: This fault is caused by "Local v6 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250457: fltTcaEqptcapacityL3UsagePer15minNormalizedv6Tr

Severity: variable

Explanation: This fault is caused by "Local v6 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250458: fltTcaEqptcapacityL3UsagePer1hNormalizedv6Tr

Severity: variable

Explanation: This fault is caused by "Local v6 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250459: fltTcaEqptcapacityL3UsagePer1dNormalizedv6Tr

Severity: variable

Explanation: This fault is caused by "Local v6 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250460: fltTcaEqptcapacityL3UsagePer1wNormalizedv6Tr

Severity: variable

Explanation: This fault is caused by "Local v6 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250461: fltTcaEqptcapacityL3UsagePer1moNormalizedv6Tr

Severity: variable

Explanation: This fault is caused by "Local v6 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250462: fltTcaEqptcapacityL3UsagePer1qtrNormalizedv6Tr

Severity: variable

Explanation: This fault is caused by "Local v6 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250463: fltTcaEqptcapacityL3UsagePer1yearNormalizedv6Tr

Severity: variable

Explanation: This fault is caused by "Local v6 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250512: fltTcaEqptcapacityMcastUsage5minNormalizedLast

Severity: variable

Explanation: This fault is caused by "Local Multicast entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250513: fltTcaEqptcapacityMcastUsage15minNormalizedLast

Severity: variable

Explanation: This fault is caused by "Local Multicast entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250514: fltTcaEqptcapacityMcastUsage1hNormalizedLast

Severity: variable

Explanation: This fault is caused by "Local Multicast entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250515: fltTcaEqptcapacityMcastUsage1dNormalizedLast

Severity: variable

Explanation: This fault is caused by "Local Multicast entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250516: fltTcaEqptcapacityMcastUsage1wNormalizedLast

Severity: variable

Explanation: This fault is caused by "Local Multicast entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250517: fltTcaEqptcapacityMcastUsage1moNormalizedLast

Severity: variable

Explanation: This fault is caused by "Local Multicast entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250518: fltTcaEqptcapacityMcastUsage1qtrNormalizedLast

Severity: variable

Explanation: This fault is caused by "Local Multicast entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250519: fltTcaEqptcapacityMcastUsage1yearNormalizedLast

Severity: variable

Explanation: This fault is caused by "Local Multicast entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250520: fltTcaEqptcapacityMcastUsage5minNormalizedMin

Severity: variable

Explanation: This fault is caused by "Local Multicast entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250521: fltTcaEqptcapacityMcastUsage15minNormalizedMin

Severity: variable

Explanation: This fault is caused by "Local Multicast entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250522: fltTcaEqptcapacityMcastUsage1hNormalizedMin

Severity: variable

Explanation: This fault is caused by "Local Multicast entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250523: fltTcaEqptcapacityMcastUsage1dNormalizedMin

Severity: variable

Explanation: This fault is caused by "Local Multicast entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250524: fltTcaEqptcapacityMcastUsage1wNormalizedMin

Severity: variable

Explanation: This fault is caused by "Local Multicast entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250525: fltTcaEqptcapacityMcastUsage1moNormalizedMin

Severity: variable

Explanation: This fault is caused by "Local Multicast entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250526: fltTcaEqptcapacityMcastUsage1qtrNormalizedMin

Severity: variable

Explanation: This fault is caused by "Local Multicast entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250527: fltTcaEqptcapacityMcastUsage1yearNormalizedMin

Severity: variable

Explanation: This fault is caused by "Local Multicast entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250528: fltTcaEqptcapacityMcastUsage5minNormalizedMax

Severity: variable

Explanation: This fault is caused by "Local Multicast entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250529: fltTcaEqptcapacityMcastUsage15minNormalizedMax

Severity: variable

Explanation: This fault is caused by "Local Multicast entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250530: fltTcaEqptcapacityMcastUsage1hNormalizedMax

Severity: variable

Explanation: This fault is caused by "Local Multicast entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250531: fltTcaEqptcapacityMcastUsage1dNormalizedMax

Severity: variable

Explanation: This fault is caused by "Local Multicast entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250532: fltTcaEqptcapacityMcastUsage1wNormalizedMax

Severity: variable

Explanation: This fault is caused by "Local Multicast entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250533: fltTcaEqptcapacityMcastUsage1moNormalizedMax

Severity: variable

Explanation: This fault is caused by "Local Multicast entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250534: fltTcaEqptcapacityMcastUsage1qtrNormalizedMax

Severity: variable

Explanation: This fault is caused by "Local Multicast entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250535: fltTcaEqptcapacityMcastUsage1yearNormalizedMax

Severity: variable

Explanation: This fault is caused by "Local Multicast entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250536: fltTcaEqptcapacityMcastUsage5minNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Local Multicast entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250537: fltTcaEqptcapacityMcastUsage15minNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Local Multicast entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250538: fltTcaEqptcapacityMcastUsage1hNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Local Multicast entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250539: fltTcaEqptcapacityMcastUsage1dNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Local Multicast entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250540: fltTcaEqptcapacityMcastUsage1wNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Local Multicast entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250541: fltTcaEqptcapacityMcastUsage1moNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Local Multicast entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250542: fltTcaEqptcapacityMcastUsage1qtrNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Local Multicast entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250543: fltTcaEqptcapacityMcastUsage1yearNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Local Multicast entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250576: fltTcaEqptcapacityMcastUsage5minNormalizedTr

Severity: variable

Explanation: This fault is caused by "Local Multicast entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250577: fltTcaEqptcapacityMcastUsage15minNormalizedTr

Severity: variable

Explanation: This fault is caused by "Local Multicast entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250578: fltTcaEqptcapacityMcastUsage1hNormalizedTr

Severity: variable

Explanation: This fault is caused by "Local Multicast entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250579: fltTcaEqptcapacityMcastUsage1dNormalizedTr

Severity: variable

Explanation: This fault is caused by "Local Multicast entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250580: fltTcaEqptcapacityMcastUsage1wNormalizedTr

Severity: variable

Explanation: This fault is caused by "Local Multicast entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250581: fltTcaEqptcapacityMcastUsage1moNormalizedTr

Severity: variable

Explanation: This fault is caused by "Local Multicast entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250582: fltTcaEqptcapacityMcastUsage1qtrNormalizedTr

Severity: variable

Explanation: This fault is caused by "Local Multicast entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F250583: fltTcaEqptcapacityMcastUsage1yearNormalizedTr

Severity: variable

Explanation: This fault is caused by "Local Multicast entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Local Multicast entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2506: fltL2CktEpAllowUsegNotSupported

Severity: warning

Explanation: This fault occurs when Allow Microsegmentation is enabled for an EPG in an unsupported platform

Recommended Action: To recover from this fault, try the following actions

1. Clear Allow Microsegmentation for this EPG

2. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F2507: fltL2CktEpProxyArpNotSupported

Severity: warning

Explanation: This fault occurs when Proxy Arp is enabled for an EPG in an unsupported platform

Recommended Action: To recover from this fault, try the following actions

1. Clear Proxy Arp for this EPG

2. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F2508: fltL2CktEpProxyArpWithoutIsolationNotSupported

Severity: warning

Explanation: This fault occurs when intra-epg isolation is not enforced, but Proxy Arp is enabled for an EPG.

Recommended Action: To recover from this fault, try the following actions

1. Clear Proxy Arp for this EPG

2. Or, enable intra-epg isolation enforced for this EPG

3. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F2511: fltIgmpsnoopQuerierStQuerierIpConflict

Severity: warning

Explanation: This fault occurs when the switch querier is the same as the BD SVI querier

Recommended Action: To remove this fault, configure a different switch querier IP address or remove the switch querier config if routing is enabled

1. configure different IP for switch (layer-2) querier from the SVI querier or remove the switch querier config if routing is enabled

2. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F2514: fltFabricLocaleConfigurationFailed

Severity: minor

Explanation: This fault occurs when an out of service policy has been created, but those policies have not been deployed to one or more fabric nodes.

Recommended Action: If you see this fault, take the following actions:

1. Verify that corresponding fabric node is ready to receive policies

2. Verify that corresponding fabric node is part of the POD specified in the policy

3. If the above actions did not resolve the issue, create a tech-support file and contact Cisco TAC.

F2531: fltFvRsDomAttInvalidConfigOnRsDomAtt

Severity: minor

Explanation: This fault occurs when there are specific configuration errors on EPG to VMM Domain Association.

Recommended Action: If you see this fault, take the following actions:

1. Change deployment immediacy to immediate and check if fault is cleared

2. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC

F2532: fltIgmpStRepPStReportPolLimit

Severity: warning

Explanation: This fault occurs when the IGMP static group policy has group mask of less than 24

Recommended Action: To remove this fault, configure the static group policy route map with group mask of length greater than or equal to 24

1. configure group masklen greater than or equal to 24 in the static group route map

2. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F2533: fltMcpIfMCPLoPrioLoopDetectedPerVlan

Severity: critical

Explanation: This fault occurs when a loop is detected

Recommended Action: To recover from this fault, try the following actions

1. Review the network topology and vlan configuration on the node and the peer

2. If the above action did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F2534: fltMcpIfMCPHiPrioLoopDetectedPerVlan

Severity: critical

Explanation: This fault occurs when a loop is detected

Recommended Action: To recover from this fault, try the following actions

1. Review the network topology and vlan configuration on the node and the peer

2. If the above action did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F2542: fltAnalyticsControllerInstallationFailed

Severity: major

Explanation: This fault occurs when Analytics agent Image installation failed on the switch

Recommended Action: None set.

F2543: fltDhcpClientInvalidConfiguration

Severity: major

Explanation: This fault is raised when there are DHCP issues

Recommended Action: If you see this fault, take the following actions:

1. For "Invalid Pod Id" - Configure the Pod Setup policy

2. For "Provider MO and Subnet MO not present" - Configure the Pod Setup policy

3. For "For Wrong Fabric Id" - check if fabric clean reloaded with change of fabricId

4. For "For Node Role Mismatch" - if node is registered as spine and has an active link to APIC, please clean reload the node manually and remove it from controller.

5. For "For Node Role Mismatch" - make sure the node is not connected to the same type. Leaf to leaf, spine to spine is not supported, please remove it from controller and add back as the correct node type.

6. If the above actions did not resolve the issue, collect a tech-support file and contact Cisco TAC.

F2547: fltPconsRAInvalidNodeIdPodId

Severity: major

Explanation: This fault occurs when node-id to pod-id mapping is wrong.

Recommended Action: If you see this fault, take the following actions:

1. Make sure you are using the right podId in the fabricNode DN.

F2548: fltApPluginValidationFailed

Severity: minor

Explanation: This fault occurs due to an invalid app meta data or incorrectly packaging the app.

Recommended Action: If you see this fault, please modify the app to fix validation errors.

F2551: fltNetflowRsExporterToCtxResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2554: fltFvRsTnlCtxResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2558: fltVmmRsVswitchExporterPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2560: fltAaaCtrlrFipsStateCtrlr_fips_mode_changed

Severity: minor

Explanation: This fault occurs when FIPS 140-2 is enabled or disabled on the node

Recommended Action: If you see this fault, a node reboot is required

1. Check if a similar fault is generated on other nodes on fabric

2. Reboot all such nodes where this fault is seen

F2562: fltPolRsCtrlrFipsModeResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2563: fltCallhomeDestReachStateCallhomeDestReachState

Severity: minor

Explanation: This fault occurs when sending a callhome message to destination does not succeed.

Recommended Action: If you see this fault, take the following actions:

1. Verify destination information is correct.

2. Ensure it is reachable (ping/ssh) from the fabric and DNS entries have been configured correctly.

3. You may remove and reconfigure the callhome destination.

4. Disable RFC compliant option if enabled.

5. If the above action did not resolve the issue, contact Cisco TAC.

F2570: fltAnalyticsCollectorMaxExportersSupportedForVer9

Severity: major

Explanation: This fault occurs when the number of exporters are more than two and the version is 9

Recommended Action: To recover from this fault, try the following actions

1. Delete the excess number of exporters for Netflow version 9

F2571: fltAnalyticsRsMonitorAttFlowMonitorApplicationFailure

Severity: major

Explanation: This fault occurs when the flow monitor application on interface/BD fails.

Recommended Action: To recover from this fault, try the following actions

1. Make sure the filter tcam is not exhausted

2. Make sure the number of records have not exceeded the limit

3. Make sure target filter type matches with record match param

4. Make sure the platform is supported

F2572: fltAnalyticsRecordPRecordFailure

Severity: major

Explanation: This fault occurs when the record application on interface/BD fails

Recommended Action: To recover from this fault, try the following actions

1. Reduce the number of records so that it does not exceed the limit

F2573: fltTopSystemOobMgmtIPInUse

Severity: major

Explanation: This fault occurs when the controller out-of-band management IP address cannot be assigned as it is in use (local or remote).

Recommended Action: If you see this fault, take the following actions:

1. Identify the interface that is using this IP. For example: You can use linux utility 'arping' to locate the MAC address of interface using the IP address. arping -I oobmgmt -c 1 <IP Address>

2. If above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F2574: fltHsrpGroupDefConfig-failed

Severity: minor

Explanation: This fault occurs when group config conflicts.

Recommended Action: If you see this fault, please fix group property.

F257472: fltTcaAnalyticsDropped5minNoRouteToHostLast

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257473: fltTcaAnalyticsDropped15minNoRouteToHostLast

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257474: fltTcaAnalyticsDropped1hNoRouteToHostLast

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257475: fltTcaAnalyticsDropped1dNoRouteToHostLast

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257476: fltTcaAnalyticsDropped1wNoRouteToHostLast

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257477: fltTcaAnalyticsDropped1moNoRouteToHostLast

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257478: fltTcaAnalyticsDropped1qtrNoRouteToHostLast

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257479: fltTcaAnalyticsDropped1yearNoRouteToHostLast

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257488: fltTcaAnalyticsDropped5minNoRouteToHostCum

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257489: fltTcaAnalyticsDropped15minNoRouteToHostCum

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257490: fltTcaAnalyticsDropped1hNoRouteToHostCum

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257491: fltTcaAnalyticsDropped1dNoRouteToHostCum

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257492: fltTcaAnalyticsDropped1wNoRouteToHostCum

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257493: fltTcaAnalyticsDropped1moNoRouteToHostCum

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257494: fltTcaAnalyticsDropped1qtrNoRouteToHostCum

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257495: fltTcaAnalyticsDropped1yearNoRouteToHostCum

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257496: fltTcaAnalyticsDropped5minNoRouteToHostPer

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257497: fltTcaAnalyticsDropped15minNoRouteToHostPer

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257498: fltTcaAnalyticsDropped1hNoRouteToHostPer

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257499: fltTcaAnalyticsDropped1dNoRouteToHostPer

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257500: fltTcaAnalyticsDropped1wNoRouteToHostPer

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257501: fltTcaAnalyticsDropped1moNoRouteToHostPer

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257502: fltTcaAnalyticsDropped1qtrNoRouteToHostPer

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257503: fltTcaAnalyticsDropped1yearNoRouteToHostPer

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257504: fltTcaAnalyticsDropped5minNoRouteToHostMin

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257505: fltTcaAnalyticsDropped15minNoRouteToHostMin

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257506: fltTcaAnalyticsDropped1hNoRouteToHostMin

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257507: fltTcaAnalyticsDropped1dNoRouteToHostMin

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257508: fltTcaAnalyticsDropped1wNoRouteToHostMin

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257509: fltTcaAnalyticsDropped1moNoRouteToHostMin

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257510: fltTcaAnalyticsDropped1qtrNoRouteToHostMin

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257511: fltTcaAnalyticsDropped1yearNoRouteToHostMin

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257512: fltTcaAnalyticsDropped5minNoRouteToHostMax

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257513: fltTcaAnalyticsDropped15minNoRouteToHostMax

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257514: fltTcaAnalyticsDropped1hNoRouteToHostMax

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257515: fltTcaAnalyticsDropped1dNoRouteToHostMax

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257516: fltTcaAnalyticsDropped1wNoRouteToHostMax

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257517: fltTcaAnalyticsDropped1moNoRouteToHostMax

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257518: fltTcaAnalyticsDropped1qtrNoRouteToHostMax

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257519: fltTcaAnalyticsDropped1yearNoRouteToHostMax

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257520: fltTcaAnalyticsDropped5minNoRouteToHostAvg

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257521: fltTcaAnalyticsDropped15minNoRouteToHostAvg

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257522: fltTcaAnalyticsDropped1hNoRouteToHostAvg

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257523: fltTcaAnalyticsDropped1dNoRouteToHostAvg

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257524: fltTcaAnalyticsDropped1wNoRouteToHostAvg

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257525: fltTcaAnalyticsDropped1moNoRouteToHostAvg

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257526: fltTcaAnalyticsDropped1qtrNoRouteToHostAvg

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257527: fltTcaAnalyticsDropped1yearNoRouteToHostAvg

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257552: fltTcaAnalyticsDropped5minNoRouteToHostTr

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257553: fltTcaAnalyticsDropped15minNoRouteToHostTr

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257554: fltTcaAnalyticsDropped1hNoRouteToHostTr

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257555: fltTcaAnalyticsDropped1dNoRouteToHostTr

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257556: fltTcaAnalyticsDropped1wNoRouteToHostTr

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257557: fltTcaAnalyticsDropped1moNoRouteToHostTr

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257558: fltTcaAnalyticsDropped1qtrNoRouteToHostTr

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257559: fltTcaAnalyticsDropped1yearNoRouteToHostTr

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257560: fltTcaAnalyticsDropped5minNoRouteToHostRate

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257561: fltTcaAnalyticsDropped15minNoRouteToHostRate

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257562: fltTcaAnalyticsDropped1hNoRouteToHostRate

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257563: fltTcaAnalyticsDropped1dNoRouteToHostRate

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257564: fltTcaAnalyticsDropped1wNoRouteToHostRate

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257565: fltTcaAnalyticsDropped1moNoRouteToHostRate

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257566: fltTcaAnalyticsDropped1qtrNoRouteToHostRate

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257567: fltTcaAnalyticsDropped1yearNoRouteToHostRate

Severity: variable

Explanation: This fault is caused by "Dropped Packets - No Route To Host rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Packets - No Route To Host" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257640: fltTcaAnalyticsDropped5minOtherLast

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257641: fltTcaAnalyticsDropped15minOtherLast

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257642: fltTcaAnalyticsDropped1hOtherLast

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257643: fltTcaAnalyticsDropped1dOtherLast

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257644: fltTcaAnalyticsDropped1wOtherLast

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257645: fltTcaAnalyticsDropped1moOtherLast

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257646: fltTcaAnalyticsDropped1qtrOtherLast

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257647: fltTcaAnalyticsDropped1yearOtherLast

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257656: fltTcaAnalyticsDropped5minOtherCum

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257657: fltTcaAnalyticsDropped15minOtherCum

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257658: fltTcaAnalyticsDropped1hOtherCum

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257659: fltTcaAnalyticsDropped1dOtherCum

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257660: fltTcaAnalyticsDropped1wOtherCum

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257661: fltTcaAnalyticsDropped1moOtherCum

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257662: fltTcaAnalyticsDropped1qtrOtherCum

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257663: fltTcaAnalyticsDropped1yearOtherCum

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257664: fltTcaAnalyticsDropped5minOtherPer

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257665: fltTcaAnalyticsDropped15minOtherPer

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257666: fltTcaAnalyticsDropped1hOtherPer

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257667: fltTcaAnalyticsDropped1dOtherPer

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257668: fltTcaAnalyticsDropped1wOtherPer

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257669: fltTcaAnalyticsDropped1moOtherPer

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257670: fltTcaAnalyticsDropped1qtrOtherPer

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257671: fltTcaAnalyticsDropped1yearOtherPer

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257672: fltTcaAnalyticsDropped5minOtherMin

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257673: fltTcaAnalyticsDropped15minOtherMin

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257674: fltTcaAnalyticsDropped1hOtherMin

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257675: fltTcaAnalyticsDropped1dOtherMin

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257676: fltTcaAnalyticsDropped1wOtherMin

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257677: fltTcaAnalyticsDropped1moOtherMin

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257678: fltTcaAnalyticsDropped1qtrOtherMin

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257679: fltTcaAnalyticsDropped1yearOtherMin

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257680: fltTcaAnalyticsDropped5minOtherMax

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257681: fltTcaAnalyticsDropped15minOtherMax

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257682: fltTcaAnalyticsDropped1hOtherMax

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257683: fltTcaAnalyticsDropped1dOtherMax

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257684: fltTcaAnalyticsDropped1wOtherMax

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257685: fltTcaAnalyticsDropped1moOtherMax

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257686: fltTcaAnalyticsDropped1qtrOtherMax

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257687: fltTcaAnalyticsDropped1yearOtherMax

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257688: fltTcaAnalyticsDropped5minOtherAvg

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257689: fltTcaAnalyticsDropped15minOtherAvg

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257690: fltTcaAnalyticsDropped1hOtherAvg

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257691: fltTcaAnalyticsDropped1dOtherAvg

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257692: fltTcaAnalyticsDropped1wOtherAvg

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257693: fltTcaAnalyticsDropped1moOtherAvg

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257694: fltTcaAnalyticsDropped1qtrOtherAvg

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257695: fltTcaAnalyticsDropped1yearOtherAvg

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2577: fltEqptBrkoutPortPOperStFailed

Severity: major

Explanation: This fault occurs when applying breakout policy on a port fails.

Recommended Action: If the breakout policy fails, check if the port supports breakout configuration.

F257720: fltTcaAnalyticsDropped5minOtherTr

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257721: fltTcaAnalyticsDropped15minOtherTr

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257722: fltTcaAnalyticsDropped1hOtherTr

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257723: fltTcaAnalyticsDropped1dOtherTr

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257724: fltTcaAnalyticsDropped1wOtherTr

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257725: fltTcaAnalyticsDropped1moOtherTr

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257726: fltTcaAnalyticsDropped1qtrOtherTr

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257727: fltTcaAnalyticsDropped1yearOtherTr

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257728: fltTcaAnalyticsDropped5minOtherRate

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257729: fltTcaAnalyticsDropped15minOtherRate

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257730: fltTcaAnalyticsDropped1hOtherRate

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257731: fltTcaAnalyticsDropped1dOtherRate

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257732: fltTcaAnalyticsDropped1wOtherRate

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257733: fltTcaAnalyticsDropped1moOtherRate

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257734: fltTcaAnalyticsDropped1qtrOtherRate

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257735: fltTcaAnalyticsDropped1yearOtherRate

Severity: variable

Explanation: This fault is caused by "Other Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Other Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257808: fltTcaAnalyticsDropped5minOutputDropLast

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257809: fltTcaAnalyticsDropped15minOutputDropLast

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257810: fltTcaAnalyticsDropped1hOutputDropLast

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257811: fltTcaAnalyticsDropped1dOutputDropLast

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257812: fltTcaAnalyticsDropped1wOutputDropLast

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257813: fltTcaAnalyticsDropped1moOutputDropLast

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257814: fltTcaAnalyticsDropped1qtrOutputDropLast

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257815: fltTcaAnalyticsDropped1yearOutputDropLast

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257824: fltTcaAnalyticsDropped5minOutputDropCum

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257825: fltTcaAnalyticsDropped15minOutputDropCum

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257826: fltTcaAnalyticsDropped1hOutputDropCum

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257827: fltTcaAnalyticsDropped1dOutputDropCum

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257828: fltTcaAnalyticsDropped1wOutputDropCum

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257829: fltTcaAnalyticsDropped1moOutputDropCum

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257830: fltTcaAnalyticsDropped1qtrOutputDropCum

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257831: fltTcaAnalyticsDropped1yearOutputDropCum

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257832: fltTcaAnalyticsDropped5minOutputDropPer

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257833: fltTcaAnalyticsDropped15minOutputDropPer

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257834: fltTcaAnalyticsDropped1hOutputDropPer

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257835: fltTcaAnalyticsDropped1dOutputDropPer

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257836: fltTcaAnalyticsDropped1wOutputDropPer

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257837: fltTcaAnalyticsDropped1moOutputDropPer

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257838: fltTcaAnalyticsDropped1qtrOutputDropPer

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257839: fltTcaAnalyticsDropped1yearOutputDropPer

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257840: fltTcaAnalyticsDropped5minOutputDropMin

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257841: fltTcaAnalyticsDropped15minOutputDropMin

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257842: fltTcaAnalyticsDropped1hOutputDropMin

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257843: fltTcaAnalyticsDropped1dOutputDropMin

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257844: fltTcaAnalyticsDropped1wOutputDropMin

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257845: fltTcaAnalyticsDropped1moOutputDropMin

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257846: fltTcaAnalyticsDropped1qtrOutputDropMin

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257847: fltTcaAnalyticsDropped1yearOutputDropMin

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257848: fltTcaAnalyticsDropped5minOutputDropMax

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257849: fltTcaAnalyticsDropped15minOutputDropMax

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257850: fltTcaAnalyticsDropped1hOutputDropMax

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257851: fltTcaAnalyticsDropped1dOutputDropMax

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257852: fltTcaAnalyticsDropped1wOutputDropMax

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257853: fltTcaAnalyticsDropped1moOutputDropMax

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257854: fltTcaAnalyticsDropped1qtrOutputDropMax

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257855: fltTcaAnalyticsDropped1yearOutputDropMax

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257856: fltTcaAnalyticsDropped5minOutputDropAvg

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257857: fltTcaAnalyticsDropped15minOutputDropAvg

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257858: fltTcaAnalyticsDropped1hOutputDropAvg

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257859: fltTcaAnalyticsDropped1dOutputDropAvg

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257860: fltTcaAnalyticsDropped1wOutputDropAvg

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257861: fltTcaAnalyticsDropped1moOutputDropAvg

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257862: fltTcaAnalyticsDropped1qtrOutputDropAvg

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257863: fltTcaAnalyticsDropped1yearOutputDropAvg

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257888: fltTcaAnalyticsDropped5minOutputDropTr

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257889: fltTcaAnalyticsDropped15minOutputDropTr

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257890: fltTcaAnalyticsDropped1hOutputDropTr

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257891: fltTcaAnalyticsDropped1dOutputDropTr

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257892: fltTcaAnalyticsDropped1wOutputDropTr

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257893: fltTcaAnalyticsDropped1moOutputDropTr

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257894: fltTcaAnalyticsDropped1qtrOutputDropTr

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257895: fltTcaAnalyticsDropped1yearOutputDropTr

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257896: fltTcaAnalyticsDropped5minOutputDropRate

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257897: fltTcaAnalyticsDropped15minOutputDropRate

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257898: fltTcaAnalyticsDropped1hOutputDropRate

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257899: fltTcaAnalyticsDropped1dOutputDropRate

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2579: fltAnalyticsRsPolicyAttResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F257900: fltTcaAnalyticsDropped1wOutputDropRate

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257901: fltTcaAnalyticsDropped1moOutputDropRate

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257902: fltTcaAnalyticsDropped1qtrOutputDropRate

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257903: fltTcaAnalyticsDropped1yearOutputDropRate

Severity: variable

Explanation: This fault is caused by "Dropped Output Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Dropped Output Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257976: fltTcaAnalyticsExport5minBytesLast

Severity: variable

Explanation: This fault is caused by "Exported Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257977: fltTcaAnalyticsExport15minBytesLast

Severity: variable

Explanation: This fault is caused by "Exported Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257978: fltTcaAnalyticsExport1hBytesLast

Severity: variable

Explanation: This fault is caused by "Exported Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257979: fltTcaAnalyticsExport1dBytesLast

Severity: variable

Explanation: This fault is caused by "Exported Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257980: fltTcaAnalyticsExport1wBytesLast

Severity: variable

Explanation: This fault is caused by "Exported Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257981: fltTcaAnalyticsExport1moBytesLast

Severity: variable

Explanation: This fault is caused by "Exported Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257982: fltTcaAnalyticsExport1qtrBytesLast

Severity: variable

Explanation: This fault is caused by "Exported Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257983: fltTcaAnalyticsExport1yearBytesLast

Severity: variable

Explanation: This fault is caused by "Exported Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257992: fltTcaAnalyticsExport5minBytesCum

Severity: variable

Explanation: This fault is caused by "Exported Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257993: fltTcaAnalyticsExport15minBytesCum

Severity: variable

Explanation: This fault is caused by "Exported Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257994: fltTcaAnalyticsExport1hBytesCum

Severity: variable

Explanation: This fault is caused by "Exported Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257995: fltTcaAnalyticsExport1dBytesCum

Severity: variable

Explanation: This fault is caused by "Exported Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257996: fltTcaAnalyticsExport1wBytesCum

Severity: variable

Explanation: This fault is caused by "Exported Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257997: fltTcaAnalyticsExport1moBytesCum

Severity: variable

Explanation: This fault is caused by "Exported Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257998: fltTcaAnalyticsExport1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "Exported Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F257999: fltTcaAnalyticsExport1yearBytesCum

Severity: variable

Explanation: This fault is caused by "Exported Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2580: fltOpflexODevFaultInfoMinorOperationalIssues

Severity: minor

Explanation: This fault is raised when there is an operational issue with respect to the Opflex device

Recommended Action: If you see this fault, take the following actions:

1. From the fault description resolve the issue on the opflex device

2. If the above actions did not resolve the issue, collect avs-tech-support file and contact Cisco TAC.

F258000: fltTcaAnalyticsExport5minBytesPer

Severity: variable

Explanation: This fault is caused by "Exported Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258001: fltTcaAnalyticsExport15minBytesPer

Severity: variable

Explanation: This fault is caused by "Exported Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258002: fltTcaAnalyticsExport1hBytesPer

Severity: variable

Explanation: This fault is caused by "Exported Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258003: fltTcaAnalyticsExport1dBytesPer

Severity: variable

Explanation: This fault is caused by "Exported Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258004: fltTcaAnalyticsExport1wBytesPer

Severity: variable

Explanation: This fault is caused by "Exported Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258005: fltTcaAnalyticsExport1moBytesPer

Severity: variable

Explanation: This fault is caused by "Exported Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258006: fltTcaAnalyticsExport1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "Exported Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258007: fltTcaAnalyticsExport1yearBytesPer

Severity: variable

Explanation: This fault is caused by "Exported Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258008: fltTcaAnalyticsExport5minBytesMin

Severity: variable

Explanation: This fault is caused by "Exported Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258009: fltTcaAnalyticsExport15minBytesMin

Severity: variable

Explanation: This fault is caused by "Exported Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258010: fltTcaAnalyticsExport1hBytesMin

Severity: variable

Explanation: This fault is caused by "Exported Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258011: fltTcaAnalyticsExport1dBytesMin

Severity: variable

Explanation: This fault is caused by "Exported Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258012: fltTcaAnalyticsExport1wBytesMin

Severity: variable

Explanation: This fault is caused by "Exported Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258013: fltTcaAnalyticsExport1moBytesMin

Severity: variable

Explanation: This fault is caused by "Exported Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258014: fltTcaAnalyticsExport1qtrBytesMin

Severity: variable

Explanation: This fault is caused by "Exported Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258015: fltTcaAnalyticsExport1yearBytesMin

Severity: variable

Explanation: This fault is caused by "Exported Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258016: fltTcaAnalyticsExport5minBytesMax

Severity: variable

Explanation: This fault is caused by "Exported Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258017: fltTcaAnalyticsExport15minBytesMax

Severity: variable

Explanation: This fault is caused by "Exported Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258018: fltTcaAnalyticsExport1hBytesMax

Severity: variable

Explanation: This fault is caused by "Exported Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258019: fltTcaAnalyticsExport1dBytesMax

Severity: variable

Explanation: This fault is caused by "Exported Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258020: fltTcaAnalyticsExport1wBytesMax

Severity: variable

Explanation: This fault is caused by "Exported Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258021: fltTcaAnalyticsExport1moBytesMax

Severity: variable

Explanation: This fault is caused by "Exported Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258022: fltTcaAnalyticsExport1qtrBytesMax

Severity: variable

Explanation: This fault is caused by "Exported Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258023: fltTcaAnalyticsExport1yearBytesMax

Severity: variable

Explanation: This fault is caused by "Exported Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258024: fltTcaAnalyticsExport5minBytesAvg

Severity: variable

Explanation: This fault is caused by "Exported Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258025: fltTcaAnalyticsExport15minBytesAvg

Severity: variable

Explanation: This fault is caused by "Exported Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258026: fltTcaAnalyticsExport1hBytesAvg

Severity: variable

Explanation: This fault is caused by "Exported Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258027: fltTcaAnalyticsExport1dBytesAvg

Severity: variable

Explanation: This fault is caused by "Exported Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258028: fltTcaAnalyticsExport1wBytesAvg

Severity: variable

Explanation: This fault is caused by "Exported Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258029: fltTcaAnalyticsExport1moBytesAvg

Severity: variable

Explanation: This fault is caused by "Exported Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258030: fltTcaAnalyticsExport1qtrBytesAvg

Severity: variable

Explanation: This fault is caused by "Exported Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258031: fltTcaAnalyticsExport1yearBytesAvg

Severity: variable

Explanation: This fault is caused by "Exported Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258056: fltTcaAnalyticsExport5minBytesTr

Severity: variable

Explanation: This fault is caused by "Exported Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258057: fltTcaAnalyticsExport15minBytesTr

Severity: variable

Explanation: This fault is caused by "Exported Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258058: fltTcaAnalyticsExport1hBytesTr

Severity: variable

Explanation: This fault is caused by "Exported Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258059: fltTcaAnalyticsExport1dBytesTr

Severity: variable

Explanation: This fault is caused by "Exported Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258060: fltTcaAnalyticsExport1wBytesTr

Severity: variable

Explanation: This fault is caused by "Exported Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258061: fltTcaAnalyticsExport1moBytesTr

Severity: variable

Explanation: This fault is caused by "Exported Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258062: fltTcaAnalyticsExport1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "Exported Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258063: fltTcaAnalyticsExport1yearBytesTr

Severity: variable

Explanation: This fault is caused by "Exported Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258064: fltTcaAnalyticsExport5minBytesRate

Severity: variable

Explanation: This fault is caused by "Exported Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258065: fltTcaAnalyticsExport15minBytesRate

Severity: variable

Explanation: This fault is caused by "Exported Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258066: fltTcaAnalyticsExport1hBytesRate

Severity: variable

Explanation: This fault is caused by "Exported Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258067: fltTcaAnalyticsExport1dBytesRate

Severity: variable

Explanation: This fault is caused by "Exported Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258068: fltTcaAnalyticsExport1wBytesRate

Severity: variable

Explanation: This fault is caused by "Exported Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258069: fltTcaAnalyticsExport1moBytesRate

Severity: variable

Explanation: This fault is caused by "Exported Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258070: fltTcaAnalyticsExport1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "Exported Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258071: fltTcaAnalyticsExport1yearBytesRate

Severity: variable

Explanation: This fault is caused by "Exported Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2581: fltOpflexODevFaultInfoCriticalOperationalIssues

Severity: critical

Explanation: This fault is raised when there is an operational issue with respect to the Opflex device

Recommended Action: If you see this fault, take the following actions:

1. From the fault description resolve the issue on the opflex device

2. If the above actions did not resolve the issue, collect avs-tech-support file and contact Cisco TAC.

F258144: fltTcaAnalyticsExport5minFlowRecordsLast

Severity: variable

Explanation: This fault is caused by "Exported Flow Records current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258145: fltTcaAnalyticsExport15minFlowRecordsLast

Severity: variable

Explanation: This fault is caused by "Exported Flow Records current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258146: fltTcaAnalyticsExport1hFlowRecordsLast

Severity: variable

Explanation: This fault is caused by "Exported Flow Records current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258147: fltTcaAnalyticsExport1dFlowRecordsLast

Severity: variable

Explanation: This fault is caused by "Exported Flow Records current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258148: fltTcaAnalyticsExport1wFlowRecordsLast

Severity: variable

Explanation: This fault is caused by "Exported Flow Records current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258149: fltTcaAnalyticsExport1moFlowRecordsLast

Severity: variable

Explanation: This fault is caused by "Exported Flow Records current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258150: fltTcaAnalyticsExport1qtrFlowRecordsLast

Severity: variable

Explanation: This fault is caused by "Exported Flow Records current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258151: fltTcaAnalyticsExport1yearFlowRecordsLast

Severity: variable

Explanation: This fault is caused by "Exported Flow Records current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258160: fltTcaAnalyticsExport5minFlowRecordsCum

Severity: variable

Explanation: This fault is caused by "Exported Flow Records cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258161: fltTcaAnalyticsExport15minFlowRecordsCum

Severity: variable

Explanation: This fault is caused by "Exported Flow Records cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258162: fltTcaAnalyticsExport1hFlowRecordsCum

Severity: variable

Explanation: This fault is caused by "Exported Flow Records cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258163: fltTcaAnalyticsExport1dFlowRecordsCum

Severity: variable

Explanation: This fault is caused by "Exported Flow Records cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258164: fltTcaAnalyticsExport1wFlowRecordsCum

Severity: variable

Explanation: This fault is caused by "Exported Flow Records cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258165: fltTcaAnalyticsExport1moFlowRecordsCum

Severity: variable

Explanation: This fault is caused by "Exported Flow Records cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258166: fltTcaAnalyticsExport1qtrFlowRecordsCum

Severity: variable

Explanation: This fault is caused by "Exported Flow Records cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258167: fltTcaAnalyticsExport1yearFlowRecordsCum

Severity: variable

Explanation: This fault is caused by "Exported Flow Records cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258168: fltTcaAnalyticsExport5minFlowRecordsPer

Severity: variable

Explanation: This fault is caused by "Exported Flow Records periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258169: fltTcaAnalyticsExport15minFlowRecordsPer

Severity: variable

Explanation: This fault is caused by "Exported Flow Records periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258170: fltTcaAnalyticsExport1hFlowRecordsPer

Severity: variable

Explanation: This fault is caused by "Exported Flow Records periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258171: fltTcaAnalyticsExport1dFlowRecordsPer

Severity: variable

Explanation: This fault is caused by "Exported Flow Records periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258172: fltTcaAnalyticsExport1wFlowRecordsPer

Severity: variable

Explanation: This fault is caused by "Exported Flow Records periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258173: fltTcaAnalyticsExport1moFlowRecordsPer

Severity: variable

Explanation: This fault is caused by "Exported Flow Records periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258174: fltTcaAnalyticsExport1qtrFlowRecordsPer

Severity: variable

Explanation: This fault is caused by "Exported Flow Records periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258175: fltTcaAnalyticsExport1yearFlowRecordsPer

Severity: variable

Explanation: This fault is caused by "Exported Flow Records periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258176: fltTcaAnalyticsExport5minFlowRecordsMin

Severity: variable

Explanation: This fault is caused by "Exported Flow Records minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258177: fltTcaAnalyticsExport15minFlowRecordsMin

Severity: variable

Explanation: This fault is caused by "Exported Flow Records minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258178: fltTcaAnalyticsExport1hFlowRecordsMin

Severity: variable

Explanation: This fault is caused by "Exported Flow Records minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258179: fltTcaAnalyticsExport1dFlowRecordsMin

Severity: variable

Explanation: This fault is caused by "Exported Flow Records minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258180: fltTcaAnalyticsExport1wFlowRecordsMin

Severity: variable

Explanation: This fault is caused by "Exported Flow Records minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258181: fltTcaAnalyticsExport1moFlowRecordsMin

Severity: variable

Explanation: This fault is caused by "Exported Flow Records minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258182: fltTcaAnalyticsExport1qtrFlowRecordsMin

Severity: variable

Explanation: This fault is caused by "Exported Flow Records minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258183: fltTcaAnalyticsExport1yearFlowRecordsMin

Severity: variable

Explanation: This fault is caused by "Exported Flow Records minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258184: fltTcaAnalyticsExport5minFlowRecordsMax

Severity: variable

Explanation: This fault is caused by "Exported Flow Records maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258185: fltTcaAnalyticsExport15minFlowRecordsMax

Severity: variable

Explanation: This fault is caused by "Exported Flow Records maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258186: fltTcaAnalyticsExport1hFlowRecordsMax

Severity: variable

Explanation: This fault is caused by "Exported Flow Records maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258187: fltTcaAnalyticsExport1dFlowRecordsMax

Severity: variable

Explanation: This fault is caused by "Exported Flow Records maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258188: fltTcaAnalyticsExport1wFlowRecordsMax

Severity: variable

Explanation: This fault is caused by "Exported Flow Records maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258189: fltTcaAnalyticsExport1moFlowRecordsMax

Severity: variable

Explanation: This fault is caused by "Exported Flow Records maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258190: fltTcaAnalyticsExport1qtrFlowRecordsMax

Severity: variable

Explanation: This fault is caused by "Exported Flow Records maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258191: fltTcaAnalyticsExport1yearFlowRecordsMax

Severity: variable

Explanation: This fault is caused by "Exported Flow Records maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258192: fltTcaAnalyticsExport5minFlowRecordsAvg

Severity: variable

Explanation: This fault is caused by "Exported Flow Records average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258193: fltTcaAnalyticsExport15minFlowRecordsAvg

Severity: variable

Explanation: This fault is caused by "Exported Flow Records average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258194: fltTcaAnalyticsExport1hFlowRecordsAvg

Severity: variable

Explanation: This fault is caused by "Exported Flow Records average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258195: fltTcaAnalyticsExport1dFlowRecordsAvg

Severity: variable

Explanation: This fault is caused by "Exported Flow Records average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258196: fltTcaAnalyticsExport1wFlowRecordsAvg

Severity: variable

Explanation: This fault is caused by "Exported Flow Records average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258197: fltTcaAnalyticsExport1moFlowRecordsAvg

Severity: variable

Explanation: This fault is caused by "Exported Flow Records average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258198: fltTcaAnalyticsExport1qtrFlowRecordsAvg

Severity: variable

Explanation: This fault is caused by "Exported Flow Records average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258199: fltTcaAnalyticsExport1yearFlowRecordsAvg

Severity: variable

Explanation: This fault is caused by "Exported Flow Records average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2582: fltOpflexODevFaultInfoWarningOperationalIssues

Severity: warning

Explanation: This fault is raised when there is an operational issue with respect to the Opflex device

Recommended Action: If you see this fault, take the following actions:

1. From the fault description resolve the issue on the opflex device

2. If the above actions did not resolve the issue, collect avs-tech-support file and contact Cisco TAC.

F258224: fltTcaAnalyticsExport5minFlowRecordsTr

Severity: variable

Explanation: This fault is caused by "Exported Flow Records trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258225: fltTcaAnalyticsExport15minFlowRecordsTr

Severity: variable

Explanation: This fault is caused by "Exported Flow Records trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258226: fltTcaAnalyticsExport1hFlowRecordsTr

Severity: variable

Explanation: This fault is caused by "Exported Flow Records trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258227: fltTcaAnalyticsExport1dFlowRecordsTr

Severity: variable

Explanation: This fault is caused by "Exported Flow Records trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258228: fltTcaAnalyticsExport1wFlowRecordsTr

Severity: variable

Explanation: This fault is caused by "Exported Flow Records trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258229: fltTcaAnalyticsExport1moFlowRecordsTr

Severity: variable

Explanation: This fault is caused by "Exported Flow Records trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258230: fltTcaAnalyticsExport1qtrFlowRecordsTr

Severity: variable

Explanation: This fault is caused by "Exported Flow Records trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258231: fltTcaAnalyticsExport1yearFlowRecordsTr

Severity: variable

Explanation: This fault is caused by "Exported Flow Records trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258232: fltTcaAnalyticsExport5minFlowRecordsRate

Severity: variable

Explanation: This fault is caused by "Exported Flow Records rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258233: fltTcaAnalyticsExport15minFlowRecordsRate

Severity: variable

Explanation: This fault is caused by "Exported Flow Records rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258234: fltTcaAnalyticsExport1hFlowRecordsRate

Severity: variable

Explanation: This fault is caused by "Exported Flow Records rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258235: fltTcaAnalyticsExport1dFlowRecordsRate

Severity: variable

Explanation: This fault is caused by "Exported Flow Records rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258236: fltTcaAnalyticsExport1wFlowRecordsRate

Severity: variable

Explanation: This fault is caused by "Exported Flow Records rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258237: fltTcaAnalyticsExport1moFlowRecordsRate

Severity: variable

Explanation: This fault is caused by "Exported Flow Records rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258238: fltTcaAnalyticsExport1qtrFlowRecordsRate

Severity: variable

Explanation: This fault is caused by "Exported Flow Records rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258239: fltTcaAnalyticsExport1yearFlowRecordsRate

Severity: variable

Explanation: This fault is caused by "Exported Flow Records rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Flow Records" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2583: fltOpflexIDEpFaultInfoMinorOperationalIssues

Severity: minor

Explanation: This fault is raised when there is an operational issue with respect to the OpFlex End Points.

Recommended Action: If you see this fault, take the following actions:

1. From the fault description resolve the issue for the end point

2. If the above actions did not resolve the issue, collect avs-tech-support file and contact Cisco TAC.

F258312: fltTcaAnalyticsExport5minPacketsLast

Severity: variable

Explanation: This fault is caused by "Exported Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258313: fltTcaAnalyticsExport15minPacketsLast

Severity: variable

Explanation: This fault is caused by "Exported Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258314: fltTcaAnalyticsExport1hPacketsLast

Severity: variable

Explanation: This fault is caused by "Exported Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258315: fltTcaAnalyticsExport1dPacketsLast

Severity: variable

Explanation: This fault is caused by "Exported Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258316: fltTcaAnalyticsExport1wPacketsLast

Severity: variable

Explanation: This fault is caused by "Exported Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258317: fltTcaAnalyticsExport1moPacketsLast

Severity: variable

Explanation: This fault is caused by "Exported Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258318: fltTcaAnalyticsExport1qtrPacketsLast

Severity: variable

Explanation: This fault is caused by "Exported Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258319: fltTcaAnalyticsExport1yearPacketsLast

Severity: variable

Explanation: This fault is caused by "Exported Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258328: fltTcaAnalyticsExport5minPacketsCum

Severity: variable

Explanation: This fault is caused by "Exported Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258329: fltTcaAnalyticsExport15minPacketsCum

Severity: variable

Explanation: This fault is caused by "Exported Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258330: fltTcaAnalyticsExport1hPacketsCum

Severity: variable

Explanation: This fault is caused by "Exported Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258331: fltTcaAnalyticsExport1dPacketsCum

Severity: variable

Explanation: This fault is caused by "Exported Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258332: fltTcaAnalyticsExport1wPacketsCum

Severity: variable

Explanation: This fault is caused by "Exported Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258333: fltTcaAnalyticsExport1moPacketsCum

Severity: variable

Explanation: This fault is caused by "Exported Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258334: fltTcaAnalyticsExport1qtrPacketsCum

Severity: variable

Explanation: This fault is caused by "Exported Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258335: fltTcaAnalyticsExport1yearPacketsCum

Severity: variable

Explanation: This fault is caused by "Exported Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258336: fltTcaAnalyticsExport5minPacketsPer

Severity: variable

Explanation: This fault is caused by "Exported Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258337: fltTcaAnalyticsExport15minPacketsPer

Severity: variable

Explanation: This fault is caused by "Exported Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258338: fltTcaAnalyticsExport1hPacketsPer

Severity: variable

Explanation: This fault is caused by "Exported Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258339: fltTcaAnalyticsExport1dPacketsPer

Severity: variable

Explanation: This fault is caused by "Exported Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258340: fltTcaAnalyticsExport1wPacketsPer

Severity: variable

Explanation: This fault is caused by "Exported Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258341: fltTcaAnalyticsExport1moPacketsPer

Severity: variable

Explanation: This fault is caused by "Exported Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258342: fltTcaAnalyticsExport1qtrPacketsPer

Severity: variable

Explanation: This fault is caused by "Exported Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258343: fltTcaAnalyticsExport1yearPacketsPer

Severity: variable

Explanation: This fault is caused by "Exported Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258344: fltTcaAnalyticsExport5minPacketsMin

Severity: variable

Explanation: This fault is caused by "Exported Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258345: fltTcaAnalyticsExport15minPacketsMin

Severity: variable

Explanation: This fault is caused by "Exported Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258346: fltTcaAnalyticsExport1hPacketsMin

Severity: variable

Explanation: This fault is caused by "Exported Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258347: fltTcaAnalyticsExport1dPacketsMin

Severity: variable

Explanation: This fault is caused by "Exported Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258348: fltTcaAnalyticsExport1wPacketsMin

Severity: variable

Explanation: This fault is caused by "Exported Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258349: fltTcaAnalyticsExport1moPacketsMin

Severity: variable

Explanation: This fault is caused by "Exported Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258350: fltTcaAnalyticsExport1qtrPacketsMin

Severity: variable

Explanation: This fault is caused by "Exported Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258351: fltTcaAnalyticsExport1yearPacketsMin

Severity: variable

Explanation: This fault is caused by "Exported Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258352: fltTcaAnalyticsExport5minPacketsMax

Severity: variable

Explanation: This fault is caused by "Exported Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258353: fltTcaAnalyticsExport15minPacketsMax

Severity: variable

Explanation: This fault is caused by "Exported Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258354: fltTcaAnalyticsExport1hPacketsMax

Severity: variable

Explanation: This fault is caused by "Exported Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258355: fltTcaAnalyticsExport1dPacketsMax

Severity: variable

Explanation: This fault is caused by "Exported Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258356: fltTcaAnalyticsExport1wPacketsMax

Severity: variable

Explanation: This fault is caused by "Exported Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258357: fltTcaAnalyticsExport1moPacketsMax

Severity: variable

Explanation: This fault is caused by "Exported Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258358: fltTcaAnalyticsExport1qtrPacketsMax

Severity: variable

Explanation: This fault is caused by "Exported Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258359: fltTcaAnalyticsExport1yearPacketsMax

Severity: variable

Explanation: This fault is caused by "Exported Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258360: fltTcaAnalyticsExport5minPacketsAvg

Severity: variable

Explanation: This fault is caused by "Exported Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258361: fltTcaAnalyticsExport15minPacketsAvg

Severity: variable

Explanation: This fault is caused by "Exported Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258362: fltTcaAnalyticsExport1hPacketsAvg

Severity: variable

Explanation: This fault is caused by "Exported Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258363: fltTcaAnalyticsExport1dPacketsAvg

Severity: variable

Explanation: This fault is caused by "Exported Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258364: fltTcaAnalyticsExport1wPacketsAvg

Severity: variable

Explanation: This fault is caused by "Exported Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258365: fltTcaAnalyticsExport1moPacketsAvg

Severity: variable

Explanation: This fault is caused by "Exported Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258366: fltTcaAnalyticsExport1qtrPacketsAvg

Severity: variable

Explanation: This fault is caused by "Exported Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258367: fltTcaAnalyticsExport1yearPacketsAvg

Severity: variable

Explanation: This fault is caused by "Exported Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258392: fltTcaAnalyticsExport5minPacketsTr

Severity: variable

Explanation: This fault is caused by "Exported Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258393: fltTcaAnalyticsExport15minPacketsTr

Severity: variable

Explanation: This fault is caused by "Exported Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258394: fltTcaAnalyticsExport1hPacketsTr

Severity: variable

Explanation: This fault is caused by "Exported Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258395: fltTcaAnalyticsExport1dPacketsTr

Severity: variable

Explanation: This fault is caused by "Exported Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258396: fltTcaAnalyticsExport1wPacketsTr

Severity: variable

Explanation: This fault is caused by "Exported Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258397: fltTcaAnalyticsExport1moPacketsTr

Severity: variable

Explanation: This fault is caused by "Exported Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258398: fltTcaAnalyticsExport1qtrPacketsTr

Severity: variable

Explanation: This fault is caused by "Exported Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258399: fltTcaAnalyticsExport1yearPacketsTr

Severity: variable

Explanation: This fault is caused by "Exported Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2584: fltOpflexIDEpFaultInfoCriticalOperationalIssues

Severity: critical

Explanation: This fault is raised when there is an operational issue with respect to the OpFlex End Points.

Recommended Action: If you see this fault, take the following actions:

1. From the fault description resolve the issue for the end point

2. If the above actions did not resolve the issue, collect avs-tech-support file and contact Cisco TAC.

F258400: fltTcaAnalyticsExport5minPacketsRate

Severity: variable

Explanation: This fault is caused by "Exported Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258401: fltTcaAnalyticsExport15minPacketsRate

Severity: variable

Explanation: This fault is caused by "Exported Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258402: fltTcaAnalyticsExport1hPacketsRate

Severity: variable

Explanation: This fault is caused by "Exported Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258403: fltTcaAnalyticsExport1dPacketsRate

Severity: variable

Explanation: This fault is caused by "Exported Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258404: fltTcaAnalyticsExport1wPacketsRate

Severity: variable

Explanation: This fault is caused by "Exported Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258405: fltTcaAnalyticsExport1moPacketsRate

Severity: variable

Explanation: This fault is caused by "Exported Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258406: fltTcaAnalyticsExport1qtrPacketsRate

Severity: variable

Explanation: This fault is caused by "Exported Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258407: fltTcaAnalyticsExport1yearPacketsRate

Severity: variable

Explanation: This fault is caused by "Exported Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258480: fltTcaAnalyticsExport5minTemplatesLast

Severity: variable

Explanation: This fault is caused by "Exported Templates current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258481: fltTcaAnalyticsExport15minTemplatesLast

Severity: variable

Explanation: This fault is caused by "Exported Templates current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258482: fltTcaAnalyticsExport1hTemplatesLast

Severity: variable

Explanation: This fault is caused by "Exported Templates current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258483: fltTcaAnalyticsExport1dTemplatesLast

Severity: variable

Explanation: This fault is caused by "Exported Templates current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258484: fltTcaAnalyticsExport1wTemplatesLast

Severity: variable

Explanation: This fault is caused by "Exported Templates current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258485: fltTcaAnalyticsExport1moTemplatesLast

Severity: variable

Explanation: This fault is caused by "Exported Templates current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258486: fltTcaAnalyticsExport1qtrTemplatesLast

Severity: variable

Explanation: This fault is caused by "Exported Templates current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258487: fltTcaAnalyticsExport1yearTemplatesLast

Severity: variable

Explanation: This fault is caused by "Exported Templates current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258496: fltTcaAnalyticsExport5minTemplatesCum

Severity: variable

Explanation: This fault is caused by "Exported Templates cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258497: fltTcaAnalyticsExport15minTemplatesCum

Severity: variable

Explanation: This fault is caused by "Exported Templates cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258498: fltTcaAnalyticsExport1hTemplatesCum

Severity: variable

Explanation: This fault is caused by "Exported Templates cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258499: fltTcaAnalyticsExport1dTemplatesCum

Severity: variable

Explanation: This fault is caused by "Exported Templates cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2585: fltOpflexIDEpFaultInfoWarningOperationalIssues

Severity: warning

Explanation: This fault is raised when there is an operational issue with respect to the OpFlex End Points.

Recommended Action: If you see this fault, take the following actions:

1. From the fault description resolve the issue for the end point

2. If the above actions did not resolve the issue, collect avs-tech-support file and contact Cisco TAC.

F258500: fltTcaAnalyticsExport1wTemplatesCum

Severity: variable

Explanation: This fault is caused by "Exported Templates cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258501: fltTcaAnalyticsExport1moTemplatesCum

Severity: variable

Explanation: This fault is caused by "Exported Templates cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258502: fltTcaAnalyticsExport1qtrTemplatesCum

Severity: variable

Explanation: This fault is caused by "Exported Templates cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258503: fltTcaAnalyticsExport1yearTemplatesCum

Severity: variable

Explanation: This fault is caused by "Exported Templates cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258504: fltTcaAnalyticsExport5minTemplatesPer

Severity: variable

Explanation: This fault is caused by "Exported Templates periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258505: fltTcaAnalyticsExport15minTemplatesPer

Severity: variable

Explanation: This fault is caused by "Exported Templates periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258506: fltTcaAnalyticsExport1hTemplatesPer

Severity: variable

Explanation: This fault is caused by "Exported Templates periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258507: fltTcaAnalyticsExport1dTemplatesPer

Severity: variable

Explanation: This fault is caused by "Exported Templates periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258508: fltTcaAnalyticsExport1wTemplatesPer

Severity: variable

Explanation: This fault is caused by "Exported Templates periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258509: fltTcaAnalyticsExport1moTemplatesPer

Severity: variable

Explanation: This fault is caused by "Exported Templates periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258510: fltTcaAnalyticsExport1qtrTemplatesPer

Severity: variable

Explanation: This fault is caused by "Exported Templates periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258511: fltTcaAnalyticsExport1yearTemplatesPer

Severity: variable

Explanation: This fault is caused by "Exported Templates periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258512: fltTcaAnalyticsExport5minTemplatesMin

Severity: variable

Explanation: This fault is caused by "Exported Templates minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258513: fltTcaAnalyticsExport15minTemplatesMin

Severity: variable

Explanation: This fault is caused by "Exported Templates minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258514: fltTcaAnalyticsExport1hTemplatesMin

Severity: variable

Explanation: This fault is caused by "Exported Templates minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258515: fltTcaAnalyticsExport1dTemplatesMin

Severity: variable

Explanation: This fault is caused by "Exported Templates minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258516: fltTcaAnalyticsExport1wTemplatesMin

Severity: variable

Explanation: This fault is caused by "Exported Templates minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258517: fltTcaAnalyticsExport1moTemplatesMin

Severity: variable

Explanation: This fault is caused by "Exported Templates minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258518: fltTcaAnalyticsExport1qtrTemplatesMin

Severity: variable

Explanation: This fault is caused by "Exported Templates minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258519: fltTcaAnalyticsExport1yearTemplatesMin

Severity: variable

Explanation: This fault is caused by "Exported Templates minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258520: fltTcaAnalyticsExport5minTemplatesMax

Severity: variable

Explanation: This fault is caused by "Exported Templates maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258521: fltTcaAnalyticsExport15minTemplatesMax

Severity: variable

Explanation: This fault is caused by "Exported Templates maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258522: fltTcaAnalyticsExport1hTemplatesMax

Severity: variable

Explanation: This fault is caused by "Exported Templates maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258523: fltTcaAnalyticsExport1dTemplatesMax

Severity: variable

Explanation: This fault is caused by "Exported Templates maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258524: fltTcaAnalyticsExport1wTemplatesMax

Severity: variable

Explanation: This fault is caused by "Exported Templates maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258525: fltTcaAnalyticsExport1moTemplatesMax

Severity: variable

Explanation: This fault is caused by "Exported Templates maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258526: fltTcaAnalyticsExport1qtrTemplatesMax

Severity: variable

Explanation: This fault is caused by "Exported Templates maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258527: fltTcaAnalyticsExport1yearTemplatesMax

Severity: variable

Explanation: This fault is caused by "Exported Templates maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258528: fltTcaAnalyticsExport5minTemplatesAvg

Severity: variable

Explanation: This fault is caused by "Exported Templates average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258529: fltTcaAnalyticsExport15minTemplatesAvg

Severity: variable

Explanation: This fault is caused by "Exported Templates average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258530: fltTcaAnalyticsExport1hTemplatesAvg

Severity: variable

Explanation: This fault is caused by "Exported Templates average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258531: fltTcaAnalyticsExport1dTemplatesAvg

Severity: variable

Explanation: This fault is caused by "Exported Templates average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258532: fltTcaAnalyticsExport1wTemplatesAvg

Severity: variable

Explanation: This fault is caused by "Exported Templates average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258533: fltTcaAnalyticsExport1moTemplatesAvg

Severity: variable

Explanation: This fault is caused by "Exported Templates average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258534: fltTcaAnalyticsExport1qtrTemplatesAvg

Severity: variable

Explanation: This fault is caused by "Exported Templates average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258535: fltTcaAnalyticsExport1yearTemplatesAvg

Severity: variable

Explanation: This fault is caused by "Exported Templates average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258560: fltTcaAnalyticsExport5minTemplatesTr

Severity: variable

Explanation: This fault is caused by "Exported Templates trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258561: fltTcaAnalyticsExport15minTemplatesTr

Severity: variable

Explanation: This fault is caused by "Exported Templates trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258562: fltTcaAnalyticsExport1hTemplatesTr

Severity: variable

Explanation: This fault is caused by "Exported Templates trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258563: fltTcaAnalyticsExport1dTemplatesTr

Severity: variable

Explanation: This fault is caused by "Exported Templates trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258564: fltTcaAnalyticsExport1wTemplatesTr

Severity: variable

Explanation: This fault is caused by "Exported Templates trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258565: fltTcaAnalyticsExport1moTemplatesTr

Severity: variable

Explanation: This fault is caused by "Exported Templates trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258566: fltTcaAnalyticsExport1qtrTemplatesTr

Severity: variable

Explanation: This fault is caused by "Exported Templates trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258567: fltTcaAnalyticsExport1yearTemplatesTr

Severity: variable

Explanation: This fault is caused by "Exported Templates trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258568: fltTcaAnalyticsExport5minTemplatesRate

Severity: variable

Explanation: This fault is caused by "Exported Templates rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258569: fltTcaAnalyticsExport15minTemplatesRate

Severity: variable

Explanation: This fault is caused by "Exported Templates rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258570: fltTcaAnalyticsExport1hTemplatesRate

Severity: variable

Explanation: This fault is caused by "Exported Templates rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258571: fltTcaAnalyticsExport1dTemplatesRate

Severity: variable

Explanation: This fault is caused by "Exported Templates rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258572: fltTcaAnalyticsExport1wTemplatesRate

Severity: variable

Explanation: This fault is caused by "Exported Templates rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258573: fltTcaAnalyticsExport1moTemplatesRate

Severity: variable

Explanation: This fault is caused by "Exported Templates rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258574: fltTcaAnalyticsExport1qtrTemplatesRate

Severity: variable

Explanation: This fault is caused by "Exported Templates rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F258575: fltTcaAnalyticsExport1yearTemplatesRate

Severity: variable

Explanation: This fault is caused by "Exported Templates rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Exported Templates" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2589: fltAnalyticsCollectorCollectorDestinationUnreachable

Severity: major

Explanation: This fault occurs when the collector becomes unreachable

Recommended Action: To recover from this fault, verify the destination IP and check the routes

1. Use the correct destination IP and make sure route is present on netflow source TOR

F2593: fltQuotaConfQuotaExceeded

Severity: warning

Explanation: This fault is raised when the number of MO of class specified exceed the maximum configured numbers in the containerDn provided

Recommended Action: If you see this fault, take the following action:

1. Reduce the number of MO, else the system may run out of Hw resources

F2595: fltInfraWiNodeApplianceFailoverStatus

Severity: major

Explanation: This fault occurs when operation, to replace an APIC by standby APIC, errors out.

Recommended Action: If you see this fault, take the following actions:

1. Check if standby APIC is up and reachable via ssh. If not bring it up and reconfigure it via CIMC. Wait for standby to be discovered by active APIC cluster. Then reset the failover state and repeat the replace operation.

2. Check if standby APIC is connected to the fabric. If not (re)establish the connection. Wait for standby to be discovered by active APIC cluster. Then reset the failover state and repeat the replace operation.

3. Check for any process crashes and cores.

4. If there are core files, collect them for Cisco TAC.

5. If the above actions did not resolve the issue, create a tech-support file and contact Cisco TAC.

F2596: fltVnsLDevOperInfoLDevModifyFailure

Severity: major

Explanation: This fault occurs when the L4-L7 service node configuration fails

Recommended Action: If you see this fault, please check for faults in the device configuration.

F2597: fltVnsLDevOperInfoLDevAuditFailure

Severity: major

Explanation: This fault occurs when the L4-L7 service node configuration fails

Recommended Action: If you see this fault, please check for faults in the device configuration.

F2598: fltHsrpGroupOperStDown

Severity: major

Explanation: This fault occurs when HSRP Group goes down.

Recommended Action: Please check the config.

F2599: fltHsrpAddrOperStDown

Severity: major

Explanation: This fault occurs when HSRP vip provisioning fails .

Recommended Action: Please check the config.

F2603: fltBgpRsBgpNodeCtxPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2629: fltL2VfcIfCfgModeSt

Severity: warning

Explanation: This fault occurs when port mode is configured as NP for VFC over FEX interfaces

Recommended Action: If you see this fault, take the following actions

1. configure the port mode as F

F2630: fltAnalyticsCollectorCollectorConfigParamMismatch

Severity: major

Explanation: This fault occurs when the Collector Configuration Parameters mismatch

Recommended Action: To recover from this fault, try the following actions

1. Check the export parameters for eg: Version

F2631: fltOrchsRsLDevItemResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2632: fltOrchsRsAllocLDevResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2633: fltOrchsRsFromRPToL3DomResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2634: fltOrchsRsFromRPToL3OutInstPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2635: fltOrchsRsIpPoolRefResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2636: fltOrchsRsSvcsEncapToSvcAllocResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2637: fltOrchsRsSvcsIpToSvcAllocResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2638: fltEqptBrkoutPortPImCfgCtrl

Severity: warning

Explanation: This fault is caused by a hardware programming failure

Recommended Action: The system will periodically retry to program the hardware. If the failure is due to lack of hardware resources, free up resources by removing or simplifying existing configuration. One of the reasons for lack of hardware resources is exhaustion of VLANs in ToR. These hardware resources can be examined by looking at capacity dashboard under OPERATIONS tab. Please check entry against the number of VLANs in output of command show vlan summary issued at node where fault is generated to check whether it exceeds above advertised node capacity.

F2639: fltHsrpIfDefConfig-failed

Severity: minor

Explanation: This fault occurs when hsrp version conflicts.

Recommended Action: If you see this fault, please fix hsrp version config.

F2640: fltHsrpSecVipSecondaryVipSubnetMismatch

Severity: minor

Explanation: This fault occurs when under a given hsrpSecVip VIP doesn't match subnet of the interface: - there is a SecVip configuration but there is no path configuration with subnet matching the Secondary Group VIP;

Recommended Action: If you see this fault, take the following actions:

1. Ensure that for every HsrpSecVip there is at least a subnet matching in RsPathL3OutAtt or Ip

F2641: fltL1PrioFlowCtrlPFlushIntvlExhausted

Severity: warning

Explanation: This fault occurs when a flushthr programming for a nodrop class exceed 4.

Recommended Action: To recover from this fault, try the following actions

1. Use Existing flush threshold value

F2642: fltL2VfcIfVfcCfgSt

Severity: warning

Explanation: This fault occurs when VFC interface is created onver span destination port

Recommended Action: If you see this fault, take the following actions

1. Delete the VFC interface and span configuration

F2647: fltL2RsSrvExtIfMapInvalidFcModeNpvModeMap

Severity: warning

Explanation: This fault occurs when NP port is configured as server interface or F port is configured as External interface

Recommended Action: If you see this fault, take the following actions

1. Configure NP port as external interface

2. Configure F port as server interface

F2650: fltApPluginStartPluginFailed

Severity: minor

Explanation: Plugin has failed to start.

Recommended Action: If you see this fault, please raise a TAC case. Uninstall/Install App may help resolve the issue.

F265392: fltTcaLatencyLatencyAvg15minAvgDelayLast

Severity: variable

Explanation: This fault is caused by "average delay current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265393: fltTcaLatencyLatencyAvg115minAvgDelayLast

Severity: variable

Explanation: This fault is caused by "average delay current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265394: fltTcaLatencyLatencyAvg11hAvgDelayLast

Severity: variable

Explanation: This fault is caused by "average delay current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265395: fltTcaLatencyLatencyAvg11dAvgDelayLast

Severity: variable

Explanation: This fault is caused by "average delay current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265396: fltTcaLatencyLatencyAvg11wAvgDelayLast

Severity: variable

Explanation: This fault is caused by "average delay current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265397: fltTcaLatencyLatencyAvg11moAvgDelayLast

Severity: variable

Explanation: This fault is caused by "average delay current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265398: fltTcaLatencyLatencyAvg11qtrAvgDelayLast

Severity: variable

Explanation: This fault is caused by "average delay current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265399: fltTcaLatencyLatencyAvg11yearAvgDelayLast

Severity: variable

Explanation: This fault is caused by "average delay current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265408: fltTcaLatencyLatencyAvg15minAvgDelayCum

Severity: variable

Explanation: This fault is caused by "average delay cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265409: fltTcaLatencyLatencyAvg115minAvgDelayCum

Severity: variable

Explanation: This fault is caused by "average delay cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265410: fltTcaLatencyLatencyAvg11hAvgDelayCum

Severity: variable

Explanation: This fault is caused by "average delay cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265411: fltTcaLatencyLatencyAvg11dAvgDelayCum

Severity: variable

Explanation: This fault is caused by "average delay cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265412: fltTcaLatencyLatencyAvg11wAvgDelayCum

Severity: variable

Explanation: This fault is caused by "average delay cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265413: fltTcaLatencyLatencyAvg11moAvgDelayCum

Severity: variable

Explanation: This fault is caused by "average delay cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265414: fltTcaLatencyLatencyAvg11qtrAvgDelayCum

Severity: variable

Explanation: This fault is caused by "average delay cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265415: fltTcaLatencyLatencyAvg11yearAvgDelayCum

Severity: variable

Explanation: This fault is caused by "average delay cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265416: fltTcaLatencyLatencyAvg15minAvgDelayPer

Severity: variable

Explanation: This fault is caused by "average delay periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265417: fltTcaLatencyLatencyAvg115minAvgDelayPer

Severity: variable

Explanation: This fault is caused by "average delay periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265418: fltTcaLatencyLatencyAvg11hAvgDelayPer

Severity: variable

Explanation: This fault is caused by "average delay periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265419: fltTcaLatencyLatencyAvg11dAvgDelayPer

Severity: variable

Explanation: This fault is caused by "average delay periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265420: fltTcaLatencyLatencyAvg11wAvgDelayPer

Severity: variable

Explanation: This fault is caused by "average delay periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265421: fltTcaLatencyLatencyAvg11moAvgDelayPer

Severity: variable

Explanation: This fault is caused by "average delay periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265422: fltTcaLatencyLatencyAvg11qtrAvgDelayPer

Severity: variable

Explanation: This fault is caused by "average delay periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265423: fltTcaLatencyLatencyAvg11yearAvgDelayPer

Severity: variable

Explanation: This fault is caused by "average delay periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265424: fltTcaLatencyLatencyAvg15minAvgDelayMin

Severity: variable

Explanation: This fault is caused by "average delay minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265425: fltTcaLatencyLatencyAvg115minAvgDelayMin

Severity: variable

Explanation: This fault is caused by "average delay minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265426: fltTcaLatencyLatencyAvg11hAvgDelayMin

Severity: variable

Explanation: This fault is caused by "average delay minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265427: fltTcaLatencyLatencyAvg11dAvgDelayMin

Severity: variable

Explanation: This fault is caused by "average delay minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265428: fltTcaLatencyLatencyAvg11wAvgDelayMin

Severity: variable

Explanation: This fault is caused by "average delay minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265429: fltTcaLatencyLatencyAvg11moAvgDelayMin

Severity: variable

Explanation: This fault is caused by "average delay minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265430: fltTcaLatencyLatencyAvg11qtrAvgDelayMin

Severity: variable

Explanation: This fault is caused by "average delay minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265431: fltTcaLatencyLatencyAvg11yearAvgDelayMin

Severity: variable

Explanation: This fault is caused by "average delay minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265432: fltTcaLatencyLatencyAvg15minAvgDelayMax

Severity: variable

Explanation: This fault is caused by "average delay maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265433: fltTcaLatencyLatencyAvg115minAvgDelayMax

Severity: variable

Explanation: This fault is caused by "average delay maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265434: fltTcaLatencyLatencyAvg11hAvgDelayMax

Severity: variable

Explanation: This fault is caused by "average delay maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265435: fltTcaLatencyLatencyAvg11dAvgDelayMax

Severity: variable

Explanation: This fault is caused by "average delay maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265436: fltTcaLatencyLatencyAvg11wAvgDelayMax

Severity: variable

Explanation: This fault is caused by "average delay maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265437: fltTcaLatencyLatencyAvg11moAvgDelayMax

Severity: variable

Explanation: This fault is caused by "average delay maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265438: fltTcaLatencyLatencyAvg11qtrAvgDelayMax

Severity: variable

Explanation: This fault is caused by "average delay maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265439: fltTcaLatencyLatencyAvg11yearAvgDelayMax

Severity: variable

Explanation: This fault is caused by "average delay maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265440: fltTcaLatencyLatencyAvg15minAvgDelayAvg

Severity: variable

Explanation: This fault is caused by "average delay average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265441: fltTcaLatencyLatencyAvg115minAvgDelayAvg

Severity: variable

Explanation: This fault is caused by "average delay average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265442: fltTcaLatencyLatencyAvg11hAvgDelayAvg

Severity: variable

Explanation: This fault is caused by "average delay average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265443: fltTcaLatencyLatencyAvg11dAvgDelayAvg

Severity: variable

Explanation: This fault is caused by "average delay average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265444: fltTcaLatencyLatencyAvg11wAvgDelayAvg

Severity: variable

Explanation: This fault is caused by "average delay average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265445: fltTcaLatencyLatencyAvg11moAvgDelayAvg

Severity: variable

Explanation: This fault is caused by "average delay average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265446: fltTcaLatencyLatencyAvg11qtrAvgDelayAvg

Severity: variable

Explanation: This fault is caused by "average delay average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265447: fltTcaLatencyLatencyAvg11yearAvgDelayAvg

Severity: variable

Explanation: This fault is caused by "average delay average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265472: fltTcaLatencyLatencyAvg15minAvgDelayTr

Severity: variable

Explanation: This fault is caused by "average delay trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265473: fltTcaLatencyLatencyAvg115minAvgDelayTr

Severity: variable

Explanation: This fault is caused by "average delay trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265474: fltTcaLatencyLatencyAvg11hAvgDelayTr

Severity: variable

Explanation: This fault is caused by "average delay trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265475: fltTcaLatencyLatencyAvg11dAvgDelayTr

Severity: variable

Explanation: This fault is caused by "average delay trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265476: fltTcaLatencyLatencyAvg11wAvgDelayTr

Severity: variable

Explanation: This fault is caused by "average delay trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265477: fltTcaLatencyLatencyAvg11moAvgDelayTr

Severity: variable

Explanation: This fault is caused by "average delay trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265478: fltTcaLatencyLatencyAvg11qtrAvgDelayTr

Severity: variable

Explanation: This fault is caused by "average delay trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265479: fltTcaLatencyLatencyAvg11yearAvgDelayTr

Severity: variable

Explanation: This fault is caused by "average delay trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265480: fltTcaLatencyLatencyAvg15minAvgDelayRate

Severity: variable

Explanation: This fault is caused by "average delay rate" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265481: fltTcaLatencyLatencyAvg115minAvgDelayRate

Severity: variable

Explanation: This fault is caused by "average delay rate" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265482: fltTcaLatencyLatencyAvg11hAvgDelayRate

Severity: variable

Explanation: This fault is caused by "average delay rate" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265483: fltTcaLatencyLatencyAvg11dAvgDelayRate

Severity: variable

Explanation: This fault is caused by "average delay rate" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265484: fltTcaLatencyLatencyAvg11wAvgDelayRate

Severity: variable

Explanation: This fault is caused by "average delay rate" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265485: fltTcaLatencyLatencyAvg11moAvgDelayRate

Severity: variable

Explanation: This fault is caused by "average delay rate" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265486: fltTcaLatencyLatencyAvg11qtrAvgDelayRate

Severity: variable

Explanation: This fault is caused by "average delay rate" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265487: fltTcaLatencyLatencyAvg11yearAvgDelayRate

Severity: variable

Explanation: This fault is caused by "average delay rate" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265560: fltTcaLatencyLatencyAvg15minCumAverageLast

Severity: variable

Explanation: This fault is caused by "cumulative average delay current value" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265561: fltTcaLatencyLatencyAvg115minCumAverageLast

Severity: variable

Explanation: This fault is caused by "cumulative average delay current value" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265562: fltTcaLatencyLatencyAvg11hCumAverageLast

Severity: variable

Explanation: This fault is caused by "cumulative average delay current value" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265563: fltTcaLatencyLatencyAvg11dCumAverageLast

Severity: variable

Explanation: This fault is caused by "cumulative average delay current value" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265564: fltTcaLatencyLatencyAvg11wCumAverageLast

Severity: variable

Explanation: This fault is caused by "cumulative average delay current value" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265565: fltTcaLatencyLatencyAvg11moCumAverageLast

Severity: variable

Explanation: This fault is caused by "cumulative average delay current value" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265566: fltTcaLatencyLatencyAvg11qtrCumAverageLast

Severity: variable

Explanation: This fault is caused by "cumulative average delay current value" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265567: fltTcaLatencyLatencyAvg11yearCumAverageLast

Severity: variable

Explanation: This fault is caused by "cumulative average delay current value" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265576: fltTcaLatencyLatencyAvg15minCumAverageCum

Severity: variable

Explanation: This fault is caused by "cumulative average delay cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265577: fltTcaLatencyLatencyAvg115minCumAverageCum

Severity: variable

Explanation: This fault is caused by "cumulative average delay cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265578: fltTcaLatencyLatencyAvg11hCumAverageCum

Severity: variable

Explanation: This fault is caused by "cumulative average delay cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265579: fltTcaLatencyLatencyAvg11dCumAverageCum

Severity: variable

Explanation: This fault is caused by "cumulative average delay cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265580: fltTcaLatencyLatencyAvg11wCumAverageCum

Severity: variable

Explanation: This fault is caused by "cumulative average delay cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265581: fltTcaLatencyLatencyAvg11moCumAverageCum

Severity: variable

Explanation: This fault is caused by "cumulative average delay cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265582: fltTcaLatencyLatencyAvg11qtrCumAverageCum

Severity: variable

Explanation: This fault is caused by "cumulative average delay cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265583: fltTcaLatencyLatencyAvg11yearCumAverageCum

Severity: variable

Explanation: This fault is caused by "cumulative average delay cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265584: fltTcaLatencyLatencyAvg15minCumAveragePer

Severity: variable

Explanation: This fault is caused by "cumulative average delay periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265585: fltTcaLatencyLatencyAvg115minCumAveragePer

Severity: variable

Explanation: This fault is caused by "cumulative average delay periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265586: fltTcaLatencyLatencyAvg11hCumAveragePer

Severity: variable

Explanation: This fault is caused by "cumulative average delay periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265587: fltTcaLatencyLatencyAvg11dCumAveragePer

Severity: variable

Explanation: This fault is caused by "cumulative average delay periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265588: fltTcaLatencyLatencyAvg11wCumAveragePer

Severity: variable

Explanation: This fault is caused by "cumulative average delay periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265589: fltTcaLatencyLatencyAvg11moCumAveragePer

Severity: variable

Explanation: This fault is caused by "cumulative average delay periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265590: fltTcaLatencyLatencyAvg11qtrCumAveragePer

Severity: variable

Explanation: This fault is caused by "cumulative average delay periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265591: fltTcaLatencyLatencyAvg11yearCumAveragePer

Severity: variable

Explanation: This fault is caused by "cumulative average delay periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265592: fltTcaLatencyLatencyAvg15minCumAverageMin

Severity: variable

Explanation: This fault is caused by "cumulative average delay minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265593: fltTcaLatencyLatencyAvg115minCumAverageMin

Severity: variable

Explanation: This fault is caused by "cumulative average delay minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265594: fltTcaLatencyLatencyAvg11hCumAverageMin

Severity: variable

Explanation: This fault is caused by "cumulative average delay minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265595: fltTcaLatencyLatencyAvg11dCumAverageMin

Severity: variable

Explanation: This fault is caused by "cumulative average delay minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265596: fltTcaLatencyLatencyAvg11wCumAverageMin

Severity: variable

Explanation: This fault is caused by "cumulative average delay minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265597: fltTcaLatencyLatencyAvg11moCumAverageMin

Severity: variable

Explanation: This fault is caused by "cumulative average delay minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265598: fltTcaLatencyLatencyAvg11qtrCumAverageMin

Severity: variable

Explanation: This fault is caused by "cumulative average delay minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265599: fltTcaLatencyLatencyAvg11yearCumAverageMin

Severity: variable

Explanation: This fault is caused by "cumulative average delay minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2656: fltApPluginAppDowngradeNotAllowed

Severity: minor

Explanation: User is trying to downgrade an app, which is not allowed.

Recommended Action: This is just an informational fault, no action is needed fron user.

F265600: fltTcaLatencyLatencyAvg15minCumAverageMax

Severity: variable

Explanation: This fault is caused by "cumulative average delay maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265601: fltTcaLatencyLatencyAvg115minCumAverageMax

Severity: variable

Explanation: This fault is caused by "cumulative average delay maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265602: fltTcaLatencyLatencyAvg11hCumAverageMax

Severity: variable

Explanation: This fault is caused by "cumulative average delay maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265603: fltTcaLatencyLatencyAvg11dCumAverageMax

Severity: variable

Explanation: This fault is caused by "cumulative average delay maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265604: fltTcaLatencyLatencyAvg11wCumAverageMax

Severity: variable

Explanation: This fault is caused by "cumulative average delay maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265605: fltTcaLatencyLatencyAvg11moCumAverageMax

Severity: variable

Explanation: This fault is caused by "cumulative average delay maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265606: fltTcaLatencyLatencyAvg11qtrCumAverageMax

Severity: variable

Explanation: This fault is caused by "cumulative average delay maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265607: fltTcaLatencyLatencyAvg11yearCumAverageMax

Severity: variable

Explanation: This fault is caused by "cumulative average delay maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265608: fltTcaLatencyLatencyAvg15minCumAverageAvg

Severity: variable

Explanation: This fault is caused by "cumulative average delay average value" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265609: fltTcaLatencyLatencyAvg115minCumAverageAvg

Severity: variable

Explanation: This fault is caused by "cumulative average delay average value" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265610: fltTcaLatencyLatencyAvg11hCumAverageAvg

Severity: variable

Explanation: This fault is caused by "cumulative average delay average value" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265611: fltTcaLatencyLatencyAvg11dCumAverageAvg

Severity: variable

Explanation: This fault is caused by "cumulative average delay average value" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265612: fltTcaLatencyLatencyAvg11wCumAverageAvg

Severity: variable

Explanation: This fault is caused by "cumulative average delay average value" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265613: fltTcaLatencyLatencyAvg11moCumAverageAvg

Severity: variable

Explanation: This fault is caused by "cumulative average delay average value" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265614: fltTcaLatencyLatencyAvg11qtrCumAverageAvg

Severity: variable

Explanation: This fault is caused by "cumulative average delay average value" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265615: fltTcaLatencyLatencyAvg11yearCumAverageAvg

Severity: variable

Explanation: This fault is caused by "cumulative average delay average value" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265640: fltTcaLatencyLatencyAvg15minCumAverageTr

Severity: variable

Explanation: This fault is caused by "cumulative average delay trend" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265641: fltTcaLatencyLatencyAvg115minCumAverageTr

Severity: variable

Explanation: This fault is caused by "cumulative average delay trend" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265642: fltTcaLatencyLatencyAvg11hCumAverageTr

Severity: variable

Explanation: This fault is caused by "cumulative average delay trend" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265643: fltTcaLatencyLatencyAvg11dCumAverageTr

Severity: variable

Explanation: This fault is caused by "cumulative average delay trend" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265644: fltTcaLatencyLatencyAvg11wCumAverageTr

Severity: variable

Explanation: This fault is caused by "cumulative average delay trend" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265645: fltTcaLatencyLatencyAvg11moCumAverageTr

Severity: variable

Explanation: This fault is caused by "cumulative average delay trend" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265646: fltTcaLatencyLatencyAvg11qtrCumAverageTr

Severity: variable

Explanation: This fault is caused by "cumulative average delay trend" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265647: fltTcaLatencyLatencyAvg11yearCumAverageTr

Severity: variable

Explanation: This fault is caused by "cumulative average delay trend" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265648: fltTcaLatencyLatencyAvg15minCumAverageRate

Severity: variable

Explanation: This fault is caused by "cumulative average delay rate" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265649: fltTcaLatencyLatencyAvg115minCumAverageRate

Severity: variable

Explanation: This fault is caused by "cumulative average delay rate" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265650: fltTcaLatencyLatencyAvg11hCumAverageRate

Severity: variable

Explanation: This fault is caused by "cumulative average delay rate" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265651: fltTcaLatencyLatencyAvg11dCumAverageRate

Severity: variable

Explanation: This fault is caused by "cumulative average delay rate" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265652: fltTcaLatencyLatencyAvg11wCumAverageRate

Severity: variable

Explanation: This fault is caused by "cumulative average delay rate" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265653: fltTcaLatencyLatencyAvg11moCumAverageRate

Severity: variable

Explanation: This fault is caused by "cumulative average delay rate" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265654: fltTcaLatencyLatencyAvg11qtrCumAverageRate

Severity: variable

Explanation: This fault is caused by "cumulative average delay rate" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265655: fltTcaLatencyLatencyAvg11yearCumAverageRate

Severity: variable

Explanation: This fault is caused by "cumulative average delay rate" statistical property crossing threshold level.

Recommended Action: Check the values of "cumulative average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265728: fltTcaLatencyLatencyAvg15minMaxDelayLast

Severity: variable

Explanation: This fault is caused by "maximum delay current value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265729: fltTcaLatencyLatencyAvg115minMaxDelayLast

Severity: variable

Explanation: This fault is caused by "maximum delay current value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265730: fltTcaLatencyLatencyAvg11hMaxDelayLast

Severity: variable

Explanation: This fault is caused by "maximum delay current value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265731: fltTcaLatencyLatencyAvg11dMaxDelayLast

Severity: variable

Explanation: This fault is caused by "maximum delay current value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265732: fltTcaLatencyLatencyAvg11wMaxDelayLast

Severity: variable

Explanation: This fault is caused by "maximum delay current value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265733: fltTcaLatencyLatencyAvg11moMaxDelayLast

Severity: variable

Explanation: This fault is caused by "maximum delay current value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265734: fltTcaLatencyLatencyAvg11qtrMaxDelayLast

Severity: variable

Explanation: This fault is caused by "maximum delay current value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265735: fltTcaLatencyLatencyAvg11yearMaxDelayLast

Severity: variable

Explanation: This fault is caused by "maximum delay current value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265744: fltTcaLatencyLatencyAvg15minMaxDelayCum

Severity: variable

Explanation: This fault is caused by "maximum delay cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265745: fltTcaLatencyLatencyAvg115minMaxDelayCum

Severity: variable

Explanation: This fault is caused by "maximum delay cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265746: fltTcaLatencyLatencyAvg11hMaxDelayCum

Severity: variable

Explanation: This fault is caused by "maximum delay cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265747: fltTcaLatencyLatencyAvg11dMaxDelayCum

Severity: variable

Explanation: This fault is caused by "maximum delay cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265748: fltTcaLatencyLatencyAvg11wMaxDelayCum

Severity: variable

Explanation: This fault is caused by "maximum delay cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265749: fltTcaLatencyLatencyAvg11moMaxDelayCum

Severity: variable

Explanation: This fault is caused by "maximum delay cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265750: fltTcaLatencyLatencyAvg11qtrMaxDelayCum

Severity: variable

Explanation: This fault is caused by "maximum delay cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265751: fltTcaLatencyLatencyAvg11yearMaxDelayCum

Severity: variable

Explanation: This fault is caused by "maximum delay cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265752: fltTcaLatencyLatencyAvg15minMaxDelayPer

Severity: variable

Explanation: This fault is caused by "maximum delay periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265753: fltTcaLatencyLatencyAvg115minMaxDelayPer

Severity: variable

Explanation: This fault is caused by "maximum delay periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265754: fltTcaLatencyLatencyAvg11hMaxDelayPer

Severity: variable

Explanation: This fault is caused by "maximum delay periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265755: fltTcaLatencyLatencyAvg11dMaxDelayPer

Severity: variable

Explanation: This fault is caused by "maximum delay periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265756: fltTcaLatencyLatencyAvg11wMaxDelayPer

Severity: variable

Explanation: This fault is caused by "maximum delay periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265757: fltTcaLatencyLatencyAvg11moMaxDelayPer

Severity: variable

Explanation: This fault is caused by "maximum delay periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265758: fltTcaLatencyLatencyAvg11qtrMaxDelayPer

Severity: variable

Explanation: This fault is caused by "maximum delay periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265759: fltTcaLatencyLatencyAvg11yearMaxDelayPer

Severity: variable

Explanation: This fault is caused by "maximum delay periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265760: fltTcaLatencyLatencyAvg15minMaxDelayMin

Severity: variable

Explanation: This fault is caused by "maximum delay minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265761: fltTcaLatencyLatencyAvg115minMaxDelayMin

Severity: variable

Explanation: This fault is caused by "maximum delay minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265762: fltTcaLatencyLatencyAvg11hMaxDelayMin

Severity: variable

Explanation: This fault is caused by "maximum delay minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265763: fltTcaLatencyLatencyAvg11dMaxDelayMin

Severity: variable

Explanation: This fault is caused by "maximum delay minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265764: fltTcaLatencyLatencyAvg11wMaxDelayMin

Severity: variable

Explanation: This fault is caused by "maximum delay minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265765: fltTcaLatencyLatencyAvg11moMaxDelayMin

Severity: variable

Explanation: This fault is caused by "maximum delay minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265766: fltTcaLatencyLatencyAvg11qtrMaxDelayMin

Severity: variable

Explanation: This fault is caused by "maximum delay minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265767: fltTcaLatencyLatencyAvg11yearMaxDelayMin

Severity: variable

Explanation: This fault is caused by "maximum delay minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265768: fltTcaLatencyLatencyAvg15minMaxDelayMax

Severity: variable

Explanation: This fault is caused by "maximum delay maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265769: fltTcaLatencyLatencyAvg115minMaxDelayMax

Severity: variable

Explanation: This fault is caused by "maximum delay maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265770: fltTcaLatencyLatencyAvg11hMaxDelayMax

Severity: variable

Explanation: This fault is caused by "maximum delay maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265771: fltTcaLatencyLatencyAvg11dMaxDelayMax

Severity: variable

Explanation: This fault is caused by "maximum delay maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265772: fltTcaLatencyLatencyAvg11wMaxDelayMax

Severity: variable

Explanation: This fault is caused by "maximum delay maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265773: fltTcaLatencyLatencyAvg11moMaxDelayMax

Severity: variable

Explanation: This fault is caused by "maximum delay maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265774: fltTcaLatencyLatencyAvg11qtrMaxDelayMax

Severity: variable

Explanation: This fault is caused by "maximum delay maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265775: fltTcaLatencyLatencyAvg11yearMaxDelayMax

Severity: variable

Explanation: This fault is caused by "maximum delay maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265776: fltTcaLatencyLatencyAvg15minMaxDelayAvg

Severity: variable

Explanation: This fault is caused by "maximum delay average value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265777: fltTcaLatencyLatencyAvg115minMaxDelayAvg

Severity: variable

Explanation: This fault is caused by "maximum delay average value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265778: fltTcaLatencyLatencyAvg11hMaxDelayAvg

Severity: variable

Explanation: This fault is caused by "maximum delay average value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265779: fltTcaLatencyLatencyAvg11dMaxDelayAvg

Severity: variable

Explanation: This fault is caused by "maximum delay average value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265780: fltTcaLatencyLatencyAvg11wMaxDelayAvg

Severity: variable

Explanation: This fault is caused by "maximum delay average value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265781: fltTcaLatencyLatencyAvg11moMaxDelayAvg

Severity: variable

Explanation: This fault is caused by "maximum delay average value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265782: fltTcaLatencyLatencyAvg11qtrMaxDelayAvg

Severity: variable

Explanation: This fault is caused by "maximum delay average value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265783: fltTcaLatencyLatencyAvg11yearMaxDelayAvg

Severity: variable

Explanation: This fault is caused by "maximum delay average value" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2658: fltFabricRsMacsecFabIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F265808: fltTcaLatencyLatencyAvg15minMaxDelayTr

Severity: variable

Explanation: This fault is caused by "maximum delay trend" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265809: fltTcaLatencyLatencyAvg115minMaxDelayTr

Severity: variable

Explanation: This fault is caused by "maximum delay trend" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265810: fltTcaLatencyLatencyAvg11hMaxDelayTr

Severity: variable

Explanation: This fault is caused by "maximum delay trend" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265811: fltTcaLatencyLatencyAvg11dMaxDelayTr

Severity: variable

Explanation: This fault is caused by "maximum delay trend" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265812: fltTcaLatencyLatencyAvg11wMaxDelayTr

Severity: variable

Explanation: This fault is caused by "maximum delay trend" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265813: fltTcaLatencyLatencyAvg11moMaxDelayTr

Severity: variable

Explanation: This fault is caused by "maximum delay trend" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265814: fltTcaLatencyLatencyAvg11qtrMaxDelayTr

Severity: variable

Explanation: This fault is caused by "maximum delay trend" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265815: fltTcaLatencyLatencyAvg11yearMaxDelayTr

Severity: variable

Explanation: This fault is caused by "maximum delay trend" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265816: fltTcaLatencyLatencyAvg15minMaxDelayRate

Severity: variable

Explanation: This fault is caused by "maximum delay rate" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265817: fltTcaLatencyLatencyAvg115minMaxDelayRate

Severity: variable

Explanation: This fault is caused by "maximum delay rate" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265818: fltTcaLatencyLatencyAvg11hMaxDelayRate

Severity: variable

Explanation: This fault is caused by "maximum delay rate" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265819: fltTcaLatencyLatencyAvg11dMaxDelayRate

Severity: variable

Explanation: This fault is caused by "maximum delay rate" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265820: fltTcaLatencyLatencyAvg11wMaxDelayRate

Severity: variable

Explanation: This fault is caused by "maximum delay rate" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265821: fltTcaLatencyLatencyAvg11moMaxDelayRate

Severity: variable

Explanation: This fault is caused by "maximum delay rate" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265822: fltTcaLatencyLatencyAvg11qtrMaxDelayRate

Severity: variable

Explanation: This fault is caused by "maximum delay rate" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265823: fltTcaLatencyLatencyAvg11yearMaxDelayRate

Severity: variable

Explanation: This fault is caused by "maximum delay rate" statistical property crossing threshold level.

Recommended Action: Check the values of "maximum delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265896: fltTcaLatencyLatencyAvg15minPktCountLast

Severity: variable

Explanation: This fault is caused by "packet count current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265897: fltTcaLatencyLatencyAvg115minPktCountLast

Severity: variable

Explanation: This fault is caused by "packet count current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265898: fltTcaLatencyLatencyAvg11hPktCountLast

Severity: variable

Explanation: This fault is caused by "packet count current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265899: fltTcaLatencyLatencyAvg11dPktCountLast

Severity: variable

Explanation: This fault is caused by "packet count current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2659: fltFabricRsMacsecPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F265900: fltTcaLatencyLatencyAvg11wPktCountLast

Severity: variable

Explanation: This fault is caused by "packet count current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265901: fltTcaLatencyLatencyAvg11moPktCountLast

Severity: variable

Explanation: This fault is caused by "packet count current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265902: fltTcaLatencyLatencyAvg11qtrPktCountLast

Severity: variable

Explanation: This fault is caused by "packet count current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265903: fltTcaLatencyLatencyAvg11yearPktCountLast

Severity: variable

Explanation: This fault is caused by "packet count current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265912: fltTcaLatencyLatencyAvg15minPktCountCum

Severity: variable

Explanation: This fault is caused by "packet count cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265913: fltTcaLatencyLatencyAvg115minPktCountCum

Severity: variable

Explanation: This fault is caused by "packet count cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265914: fltTcaLatencyLatencyAvg11hPktCountCum

Severity: variable

Explanation: This fault is caused by "packet count cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265915: fltTcaLatencyLatencyAvg11dPktCountCum

Severity: variable

Explanation: This fault is caused by "packet count cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265916: fltTcaLatencyLatencyAvg11wPktCountCum

Severity: variable

Explanation: This fault is caused by "packet count cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265917: fltTcaLatencyLatencyAvg11moPktCountCum

Severity: variable

Explanation: This fault is caused by "packet count cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265918: fltTcaLatencyLatencyAvg11qtrPktCountCum

Severity: variable

Explanation: This fault is caused by "packet count cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265919: fltTcaLatencyLatencyAvg11yearPktCountCum

Severity: variable

Explanation: This fault is caused by "packet count cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265920: fltTcaLatencyLatencyAvg15minPktCountPer

Severity: variable

Explanation: This fault is caused by "packet count periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265921: fltTcaLatencyLatencyAvg115minPktCountPer

Severity: variable

Explanation: This fault is caused by "packet count periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265922: fltTcaLatencyLatencyAvg11hPktCountPer

Severity: variable

Explanation: This fault is caused by "packet count periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265923: fltTcaLatencyLatencyAvg11dPktCountPer

Severity: variable

Explanation: This fault is caused by "packet count periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265924: fltTcaLatencyLatencyAvg11wPktCountPer

Severity: variable

Explanation: This fault is caused by "packet count periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265925: fltTcaLatencyLatencyAvg11moPktCountPer

Severity: variable

Explanation: This fault is caused by "packet count periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265926: fltTcaLatencyLatencyAvg11qtrPktCountPer

Severity: variable

Explanation: This fault is caused by "packet count periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265927: fltTcaLatencyLatencyAvg11yearPktCountPer

Severity: variable

Explanation: This fault is caused by "packet count periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265928: fltTcaLatencyLatencyAvg15minPktCountMin

Severity: variable

Explanation: This fault is caused by "packet count minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265929: fltTcaLatencyLatencyAvg115minPktCountMin

Severity: variable

Explanation: This fault is caused by "packet count minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265930: fltTcaLatencyLatencyAvg11hPktCountMin

Severity: variable

Explanation: This fault is caused by "packet count minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265931: fltTcaLatencyLatencyAvg11dPktCountMin

Severity: variable

Explanation: This fault is caused by "packet count minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265932: fltTcaLatencyLatencyAvg11wPktCountMin

Severity: variable

Explanation: This fault is caused by "packet count minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265933: fltTcaLatencyLatencyAvg11moPktCountMin

Severity: variable

Explanation: This fault is caused by "packet count minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265934: fltTcaLatencyLatencyAvg11qtrPktCountMin

Severity: variable

Explanation: This fault is caused by "packet count minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265935: fltTcaLatencyLatencyAvg11yearPktCountMin

Severity: variable

Explanation: This fault is caused by "packet count minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265936: fltTcaLatencyLatencyAvg15minPktCountMax

Severity: variable

Explanation: This fault is caused by "packet count maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265937: fltTcaLatencyLatencyAvg115minPktCountMax

Severity: variable

Explanation: This fault is caused by "packet count maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265938: fltTcaLatencyLatencyAvg11hPktCountMax

Severity: variable

Explanation: This fault is caused by "packet count maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265939: fltTcaLatencyLatencyAvg11dPktCountMax

Severity: variable

Explanation: This fault is caused by "packet count maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265940: fltTcaLatencyLatencyAvg11wPktCountMax

Severity: variable

Explanation: This fault is caused by "packet count maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265941: fltTcaLatencyLatencyAvg11moPktCountMax

Severity: variable

Explanation: This fault is caused by "packet count maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265942: fltTcaLatencyLatencyAvg11qtrPktCountMax

Severity: variable

Explanation: This fault is caused by "packet count maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265943: fltTcaLatencyLatencyAvg11yearPktCountMax

Severity: variable

Explanation: This fault is caused by "packet count maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265944: fltTcaLatencyLatencyAvg15minPktCountAvg

Severity: variable

Explanation: This fault is caused by "packet count average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265945: fltTcaLatencyLatencyAvg115minPktCountAvg

Severity: variable

Explanation: This fault is caused by "packet count average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265946: fltTcaLatencyLatencyAvg11hPktCountAvg

Severity: variable

Explanation: This fault is caused by "packet count average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265947: fltTcaLatencyLatencyAvg11dPktCountAvg

Severity: variable

Explanation: This fault is caused by "packet count average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265948: fltTcaLatencyLatencyAvg11wPktCountAvg

Severity: variable

Explanation: This fault is caused by "packet count average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265949: fltTcaLatencyLatencyAvg11moPktCountAvg

Severity: variable

Explanation: This fault is caused by "packet count average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265950: fltTcaLatencyLatencyAvg11qtrPktCountAvg

Severity: variable

Explanation: This fault is caused by "packet count average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265951: fltTcaLatencyLatencyAvg11yearPktCountAvg

Severity: variable

Explanation: This fault is caused by "packet count average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265976: fltTcaLatencyLatencyAvg15minPktCountTr

Severity: variable

Explanation: This fault is caused by "packet count trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265977: fltTcaLatencyLatencyAvg115minPktCountTr

Severity: variable

Explanation: This fault is caused by "packet count trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265978: fltTcaLatencyLatencyAvg11hPktCountTr

Severity: variable

Explanation: This fault is caused by "packet count trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265979: fltTcaLatencyLatencyAvg11dPktCountTr

Severity: variable

Explanation: This fault is caused by "packet count trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265980: fltTcaLatencyLatencyAvg11wPktCountTr

Severity: variable

Explanation: This fault is caused by "packet count trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265981: fltTcaLatencyLatencyAvg11moPktCountTr

Severity: variable

Explanation: This fault is caused by "packet count trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265982: fltTcaLatencyLatencyAvg11qtrPktCountTr

Severity: variable

Explanation: This fault is caused by "packet count trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265983: fltTcaLatencyLatencyAvg11yearPktCountTr

Severity: variable

Explanation: This fault is caused by "packet count trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265984: fltTcaLatencyLatencyAvg15minPktCountRate

Severity: variable

Explanation: This fault is caused by "packet count rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265985: fltTcaLatencyLatencyAvg115minPktCountRate

Severity: variable

Explanation: This fault is caused by "packet count rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265986: fltTcaLatencyLatencyAvg11hPktCountRate

Severity: variable

Explanation: This fault is caused by "packet count rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265987: fltTcaLatencyLatencyAvg11dPktCountRate

Severity: variable

Explanation: This fault is caused by "packet count rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265988: fltTcaLatencyLatencyAvg11wPktCountRate

Severity: variable

Explanation: This fault is caused by "packet count rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265989: fltTcaLatencyLatencyAvg11moPktCountRate

Severity: variable

Explanation: This fault is caused by "packet count rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265990: fltTcaLatencyLatencyAvg11qtrPktCountRate

Severity: variable

Explanation: This fault is caused by "packet count rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F265991: fltTcaLatencyLatencyAvg11yearPktCountRate

Severity: variable

Explanation: This fault is caused by "packet count rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2660: fltInfraRsMacsecIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F266064: fltTcaLatencyLatencyAvg25minSeqNoLast

Severity: variable

Explanation: This fault is caused by "sequence number current value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266065: fltTcaLatencyLatencyAvg215minSeqNoLast

Severity: variable

Explanation: This fault is caused by "sequence number current value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266066: fltTcaLatencyLatencyAvg21hSeqNoLast

Severity: variable

Explanation: This fault is caused by "sequence number current value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266067: fltTcaLatencyLatencyAvg21dSeqNoLast

Severity: variable

Explanation: This fault is caused by "sequence number current value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266068: fltTcaLatencyLatencyAvg21wSeqNoLast

Severity: variable

Explanation: This fault is caused by "sequence number current value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266069: fltTcaLatencyLatencyAvg21moSeqNoLast

Severity: variable

Explanation: This fault is caused by "sequence number current value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266070: fltTcaLatencyLatencyAvg21qtrSeqNoLast

Severity: variable

Explanation: This fault is caused by "sequence number current value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266071: fltTcaLatencyLatencyAvg21yearSeqNoLast

Severity: variable

Explanation: This fault is caused by "sequence number current value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266080: fltTcaLatencyLatencyAvg25minSeqNoCum

Severity: variable

Explanation: This fault is caused by "sequence number cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266081: fltTcaLatencyLatencyAvg215minSeqNoCum

Severity: variable

Explanation: This fault is caused by "sequence number cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266082: fltTcaLatencyLatencyAvg21hSeqNoCum

Severity: variable

Explanation: This fault is caused by "sequence number cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266083: fltTcaLatencyLatencyAvg21dSeqNoCum

Severity: variable

Explanation: This fault is caused by "sequence number cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266084: fltTcaLatencyLatencyAvg21wSeqNoCum

Severity: variable

Explanation: This fault is caused by "sequence number cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266085: fltTcaLatencyLatencyAvg21moSeqNoCum

Severity: variable

Explanation: This fault is caused by "sequence number cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266086: fltTcaLatencyLatencyAvg21qtrSeqNoCum

Severity: variable

Explanation: This fault is caused by "sequence number cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266087: fltTcaLatencyLatencyAvg21yearSeqNoCum

Severity: variable

Explanation: This fault is caused by "sequence number cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266088: fltTcaLatencyLatencyAvg25minSeqNoPer

Severity: variable

Explanation: This fault is caused by "sequence number periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266089: fltTcaLatencyLatencyAvg215minSeqNoPer

Severity: variable

Explanation: This fault is caused by "sequence number periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266090: fltTcaLatencyLatencyAvg21hSeqNoPer

Severity: variable

Explanation: This fault is caused by "sequence number periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266091: fltTcaLatencyLatencyAvg21dSeqNoPer

Severity: variable

Explanation: This fault is caused by "sequence number periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266092: fltTcaLatencyLatencyAvg21wSeqNoPer

Severity: variable

Explanation: This fault is caused by "sequence number periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266093: fltTcaLatencyLatencyAvg21moSeqNoPer

Severity: variable

Explanation: This fault is caused by "sequence number periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266094: fltTcaLatencyLatencyAvg21qtrSeqNoPer

Severity: variable

Explanation: This fault is caused by "sequence number periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266095: fltTcaLatencyLatencyAvg21yearSeqNoPer

Severity: variable

Explanation: This fault is caused by "sequence number periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266096: fltTcaLatencyLatencyAvg25minSeqNoMin

Severity: variable

Explanation: This fault is caused by "sequence number minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266097: fltTcaLatencyLatencyAvg215minSeqNoMin

Severity: variable

Explanation: This fault is caused by "sequence number minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266098: fltTcaLatencyLatencyAvg21hSeqNoMin

Severity: variable

Explanation: This fault is caused by "sequence number minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266099: fltTcaLatencyLatencyAvg21dSeqNoMin

Severity: variable

Explanation: This fault is caused by "sequence number minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2661: fltMacsecRsToKeyChainPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F266100: fltTcaLatencyLatencyAvg21wSeqNoMin

Severity: variable

Explanation: This fault is caused by "sequence number minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266101: fltTcaLatencyLatencyAvg21moSeqNoMin

Severity: variable

Explanation: This fault is caused by "sequence number minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266102: fltTcaLatencyLatencyAvg21qtrSeqNoMin

Severity: variable

Explanation: This fault is caused by "sequence number minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266103: fltTcaLatencyLatencyAvg21yearSeqNoMin

Severity: variable

Explanation: This fault is caused by "sequence number minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266104: fltTcaLatencyLatencyAvg25minSeqNoMax

Severity: variable

Explanation: This fault is caused by "sequence number maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266105: fltTcaLatencyLatencyAvg215minSeqNoMax

Severity: variable

Explanation: This fault is caused by "sequence number maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266106: fltTcaLatencyLatencyAvg21hSeqNoMax

Severity: variable

Explanation: This fault is caused by "sequence number maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266107: fltTcaLatencyLatencyAvg21dSeqNoMax

Severity: variable

Explanation: This fault is caused by "sequence number maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266108: fltTcaLatencyLatencyAvg21wSeqNoMax

Severity: variable

Explanation: This fault is caused by "sequence number maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266109: fltTcaLatencyLatencyAvg21moSeqNoMax

Severity: variable

Explanation: This fault is caused by "sequence number maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266110: fltTcaLatencyLatencyAvg21qtrSeqNoMax

Severity: variable

Explanation: This fault is caused by "sequence number maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266111: fltTcaLatencyLatencyAvg21yearSeqNoMax

Severity: variable

Explanation: This fault is caused by "sequence number maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266112: fltTcaLatencyLatencyAvg25minSeqNoAvg

Severity: variable

Explanation: This fault is caused by "sequence number average value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266113: fltTcaLatencyLatencyAvg215minSeqNoAvg

Severity: variable

Explanation: This fault is caused by "sequence number average value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266114: fltTcaLatencyLatencyAvg21hSeqNoAvg

Severity: variable

Explanation: This fault is caused by "sequence number average value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266115: fltTcaLatencyLatencyAvg21dSeqNoAvg

Severity: variable

Explanation: This fault is caused by "sequence number average value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266116: fltTcaLatencyLatencyAvg21wSeqNoAvg

Severity: variable

Explanation: This fault is caused by "sequence number average value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266117: fltTcaLatencyLatencyAvg21moSeqNoAvg

Severity: variable

Explanation: This fault is caused by "sequence number average value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266118: fltTcaLatencyLatencyAvg21qtrSeqNoAvg

Severity: variable

Explanation: This fault is caused by "sequence number average value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266119: fltTcaLatencyLatencyAvg21yearSeqNoAvg

Severity: variable

Explanation: This fault is caused by "sequence number average value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266144: fltTcaLatencyLatencyAvg25minSeqNoTr

Severity: variable

Explanation: This fault is caused by "sequence number trend" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266145: fltTcaLatencyLatencyAvg215minSeqNoTr

Severity: variable

Explanation: This fault is caused by "sequence number trend" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266146: fltTcaLatencyLatencyAvg21hSeqNoTr

Severity: variable

Explanation: This fault is caused by "sequence number trend" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266147: fltTcaLatencyLatencyAvg21dSeqNoTr

Severity: variable

Explanation: This fault is caused by "sequence number trend" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266148: fltTcaLatencyLatencyAvg21wSeqNoTr

Severity: variable

Explanation: This fault is caused by "sequence number trend" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266149: fltTcaLatencyLatencyAvg21moSeqNoTr

Severity: variable

Explanation: This fault is caused by "sequence number trend" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266150: fltTcaLatencyLatencyAvg21qtrSeqNoTr

Severity: variable

Explanation: This fault is caused by "sequence number trend" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266151: fltTcaLatencyLatencyAvg21yearSeqNoTr

Severity: variable

Explanation: This fault is caused by "sequence number trend" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266152: fltTcaLatencyLatencyAvg25minSeqNoRate

Severity: variable

Explanation: This fault is caused by "sequence number rate" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266153: fltTcaLatencyLatencyAvg215minSeqNoRate

Severity: variable

Explanation: This fault is caused by "sequence number rate" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266154: fltTcaLatencyLatencyAvg21hSeqNoRate

Severity: variable

Explanation: This fault is caused by "sequence number rate" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266155: fltTcaLatencyLatencyAvg21dSeqNoRate

Severity: variable

Explanation: This fault is caused by "sequence number rate" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266156: fltTcaLatencyLatencyAvg21wSeqNoRate

Severity: variable

Explanation: This fault is caused by "sequence number rate" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266157: fltTcaLatencyLatencyAvg21moSeqNoRate

Severity: variable

Explanation: This fault is caused by "sequence number rate" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266158: fltTcaLatencyLatencyAvg21qtrSeqNoRate

Severity: variable

Explanation: This fault is caused by "sequence number rate" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266159: fltTcaLatencyLatencyAvg21yearSeqNoRate

Severity: variable

Explanation: This fault is caused by "sequence number rate" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2662: fltMacsecRsToParamPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F266232: fltTcaLatencyLatencyAvg25minStdDevLast

Severity: variable

Explanation: This fault is caused by "standard deviation current value" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266233: fltTcaLatencyLatencyAvg215minStdDevLast

Severity: variable

Explanation: This fault is caused by "standard deviation current value" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266234: fltTcaLatencyLatencyAvg21hStdDevLast

Severity: variable

Explanation: This fault is caused by "standard deviation current value" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266235: fltTcaLatencyLatencyAvg21dStdDevLast

Severity: variable

Explanation: This fault is caused by "standard deviation current value" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266236: fltTcaLatencyLatencyAvg21wStdDevLast

Severity: variable

Explanation: This fault is caused by "standard deviation current value" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266237: fltTcaLatencyLatencyAvg21moStdDevLast

Severity: variable

Explanation: This fault is caused by "standard deviation current value" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266238: fltTcaLatencyLatencyAvg21qtrStdDevLast

Severity: variable

Explanation: This fault is caused by "standard deviation current value" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266239: fltTcaLatencyLatencyAvg21yearStdDevLast

Severity: variable

Explanation: This fault is caused by "standard deviation current value" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266248: fltTcaLatencyLatencyAvg25minStdDevCum

Severity: variable

Explanation: This fault is caused by "standard deviation cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266249: fltTcaLatencyLatencyAvg215minStdDevCum

Severity: variable

Explanation: This fault is caused by "standard deviation cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266250: fltTcaLatencyLatencyAvg21hStdDevCum

Severity: variable

Explanation: This fault is caused by "standard deviation cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266251: fltTcaLatencyLatencyAvg21dStdDevCum

Severity: variable

Explanation: This fault is caused by "standard deviation cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266252: fltTcaLatencyLatencyAvg21wStdDevCum

Severity: variable

Explanation: This fault is caused by "standard deviation cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266253: fltTcaLatencyLatencyAvg21moStdDevCum

Severity: variable

Explanation: This fault is caused by "standard deviation cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266254: fltTcaLatencyLatencyAvg21qtrStdDevCum

Severity: variable

Explanation: This fault is caused by "standard deviation cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266255: fltTcaLatencyLatencyAvg21yearStdDevCum

Severity: variable

Explanation: This fault is caused by "standard deviation cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266256: fltTcaLatencyLatencyAvg25minStdDevPer

Severity: variable

Explanation: This fault is caused by "standard deviation periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266257: fltTcaLatencyLatencyAvg215minStdDevPer

Severity: variable

Explanation: This fault is caused by "standard deviation periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266258: fltTcaLatencyLatencyAvg21hStdDevPer

Severity: variable

Explanation: This fault is caused by "standard deviation periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266259: fltTcaLatencyLatencyAvg21dStdDevPer

Severity: variable

Explanation: This fault is caused by "standard deviation periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266260: fltTcaLatencyLatencyAvg21wStdDevPer

Severity: variable

Explanation: This fault is caused by "standard deviation periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266261: fltTcaLatencyLatencyAvg21moStdDevPer

Severity: variable

Explanation: This fault is caused by "standard deviation periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266262: fltTcaLatencyLatencyAvg21qtrStdDevPer

Severity: variable

Explanation: This fault is caused by "standard deviation periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266263: fltTcaLatencyLatencyAvg21yearStdDevPer

Severity: variable

Explanation: This fault is caused by "standard deviation periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266264: fltTcaLatencyLatencyAvg25minStdDevMin

Severity: variable

Explanation: This fault is caused by "standard deviation minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266265: fltTcaLatencyLatencyAvg215minStdDevMin

Severity: variable

Explanation: This fault is caused by "standard deviation minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266266: fltTcaLatencyLatencyAvg21hStdDevMin

Severity: variable

Explanation: This fault is caused by "standard deviation minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266267: fltTcaLatencyLatencyAvg21dStdDevMin

Severity: variable

Explanation: This fault is caused by "standard deviation minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266268: fltTcaLatencyLatencyAvg21wStdDevMin

Severity: variable

Explanation: This fault is caused by "standard deviation minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266269: fltTcaLatencyLatencyAvg21moStdDevMin

Severity: variable

Explanation: This fault is caused by "standard deviation minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266270: fltTcaLatencyLatencyAvg21qtrStdDevMin

Severity: variable

Explanation: This fault is caused by "standard deviation minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266271: fltTcaLatencyLatencyAvg21yearStdDevMin

Severity: variable

Explanation: This fault is caused by "standard deviation minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266272: fltTcaLatencyLatencyAvg25minStdDevMax

Severity: variable

Explanation: This fault is caused by "standard deviation maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266273: fltTcaLatencyLatencyAvg215minStdDevMax

Severity: variable

Explanation: This fault is caused by "standard deviation maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266274: fltTcaLatencyLatencyAvg21hStdDevMax

Severity: variable

Explanation: This fault is caused by "standard deviation maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266275: fltTcaLatencyLatencyAvg21dStdDevMax

Severity: variable

Explanation: This fault is caused by "standard deviation maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266276: fltTcaLatencyLatencyAvg21wStdDevMax

Severity: variable

Explanation: This fault is caused by "standard deviation maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266277: fltTcaLatencyLatencyAvg21moStdDevMax

Severity: variable

Explanation: This fault is caused by "standard deviation maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266278: fltTcaLatencyLatencyAvg21qtrStdDevMax

Severity: variable

Explanation: This fault is caused by "standard deviation maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266279: fltTcaLatencyLatencyAvg21yearStdDevMax

Severity: variable

Explanation: This fault is caused by "standard deviation maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266280: fltTcaLatencyLatencyAvg25minStdDevAvg

Severity: variable

Explanation: This fault is caused by "standard deviation average value" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266281: fltTcaLatencyLatencyAvg215minStdDevAvg

Severity: variable

Explanation: This fault is caused by "standard deviation average value" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266282: fltTcaLatencyLatencyAvg21hStdDevAvg

Severity: variable

Explanation: This fault is caused by "standard deviation average value" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266283: fltTcaLatencyLatencyAvg21dStdDevAvg

Severity: variable

Explanation: This fault is caused by "standard deviation average value" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266284: fltTcaLatencyLatencyAvg21wStdDevAvg

Severity: variable

Explanation: This fault is caused by "standard deviation average value" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266285: fltTcaLatencyLatencyAvg21moStdDevAvg

Severity: variable

Explanation: This fault is caused by "standard deviation average value" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266286: fltTcaLatencyLatencyAvg21qtrStdDevAvg

Severity: variable

Explanation: This fault is caused by "standard deviation average value" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266287: fltTcaLatencyLatencyAvg21yearStdDevAvg

Severity: variable

Explanation: This fault is caused by "standard deviation average value" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266312: fltTcaLatencyLatencyAvg25minStdDevTr

Severity: variable

Explanation: This fault is caused by "standard deviation trend" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266313: fltTcaLatencyLatencyAvg215minStdDevTr

Severity: variable

Explanation: This fault is caused by "standard deviation trend" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266314: fltTcaLatencyLatencyAvg21hStdDevTr

Severity: variable

Explanation: This fault is caused by "standard deviation trend" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266315: fltTcaLatencyLatencyAvg21dStdDevTr

Severity: variable

Explanation: This fault is caused by "standard deviation trend" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266316: fltTcaLatencyLatencyAvg21wStdDevTr

Severity: variable

Explanation: This fault is caused by "standard deviation trend" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266317: fltTcaLatencyLatencyAvg21moStdDevTr

Severity: variable

Explanation: This fault is caused by "standard deviation trend" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266318: fltTcaLatencyLatencyAvg21qtrStdDevTr

Severity: variable

Explanation: This fault is caused by "standard deviation trend" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266319: fltTcaLatencyLatencyAvg21yearStdDevTr

Severity: variable

Explanation: This fault is caused by "standard deviation trend" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266320: fltTcaLatencyLatencyAvg25minStdDevRate

Severity: variable

Explanation: This fault is caused by "standard deviation rate" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266321: fltTcaLatencyLatencyAvg215minStdDevRate

Severity: variable

Explanation: This fault is caused by "standard deviation rate" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266322: fltTcaLatencyLatencyAvg21hStdDevRate

Severity: variable

Explanation: This fault is caused by "standard deviation rate" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266323: fltTcaLatencyLatencyAvg21dStdDevRate

Severity: variable

Explanation: This fault is caused by "standard deviation rate" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266324: fltTcaLatencyLatencyAvg21wStdDevRate

Severity: variable

Explanation: This fault is caused by "standard deviation rate" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266325: fltTcaLatencyLatencyAvg21moStdDevRate

Severity: variable

Explanation: This fault is caused by "standard deviation rate" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266326: fltTcaLatencyLatencyAvg21qtrStdDevRate

Severity: variable

Explanation: This fault is caused by "standard deviation rate" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266327: fltTcaLatencyLatencyAvg21yearStdDevRate

Severity: variable

Explanation: This fault is caused by "standard deviation rate" statistical property crossing threshold level.

Recommended Action: Check the values of "standard deviation" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266400: fltTcaLatencyLatencyAvg25minTotPktCountLast

Severity: variable

Explanation: This fault is caused by "total packet count current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266401: fltTcaLatencyLatencyAvg215minTotPktCountLast

Severity: variable

Explanation: This fault is caused by "total packet count current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266402: fltTcaLatencyLatencyAvg21hTotPktCountLast

Severity: variable

Explanation: This fault is caused by "total packet count current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266403: fltTcaLatencyLatencyAvg21dTotPktCountLast

Severity: variable

Explanation: This fault is caused by "total packet count current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266404: fltTcaLatencyLatencyAvg21wTotPktCountLast

Severity: variable

Explanation: This fault is caused by "total packet count current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266405: fltTcaLatencyLatencyAvg21moTotPktCountLast

Severity: variable

Explanation: This fault is caused by "total packet count current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266406: fltTcaLatencyLatencyAvg21qtrTotPktCountLast

Severity: variable

Explanation: This fault is caused by "total packet count current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266407: fltTcaLatencyLatencyAvg21yearTotPktCountLast

Severity: variable

Explanation: This fault is caused by "total packet count current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266416: fltTcaLatencyLatencyAvg25minTotPktCountCum

Severity: variable

Explanation: This fault is caused by "total packet count cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266417: fltTcaLatencyLatencyAvg215minTotPktCountCum

Severity: variable

Explanation: This fault is caused by "total packet count cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266418: fltTcaLatencyLatencyAvg21hTotPktCountCum

Severity: variable

Explanation: This fault is caused by "total packet count cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266419: fltTcaLatencyLatencyAvg21dTotPktCountCum

Severity: variable

Explanation: This fault is caused by "total packet count cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266420: fltTcaLatencyLatencyAvg21wTotPktCountCum

Severity: variable

Explanation: This fault is caused by "total packet count cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266421: fltTcaLatencyLatencyAvg21moTotPktCountCum

Severity: variable

Explanation: This fault is caused by "total packet count cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266422: fltTcaLatencyLatencyAvg21qtrTotPktCountCum

Severity: variable

Explanation: This fault is caused by "total packet count cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266423: fltTcaLatencyLatencyAvg21yearTotPktCountCum

Severity: variable

Explanation: This fault is caused by "total packet count cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266424: fltTcaLatencyLatencyAvg25minTotPktCountPer

Severity: variable

Explanation: This fault is caused by "total packet count periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266425: fltTcaLatencyLatencyAvg215minTotPktCountPer

Severity: variable

Explanation: This fault is caused by "total packet count periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266426: fltTcaLatencyLatencyAvg21hTotPktCountPer

Severity: variable

Explanation: This fault is caused by "total packet count periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266427: fltTcaLatencyLatencyAvg21dTotPktCountPer

Severity: variable

Explanation: This fault is caused by "total packet count periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266428: fltTcaLatencyLatencyAvg21wTotPktCountPer

Severity: variable

Explanation: This fault is caused by "total packet count periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266429: fltTcaLatencyLatencyAvg21moTotPktCountPer

Severity: variable

Explanation: This fault is caused by "total packet count periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266430: fltTcaLatencyLatencyAvg21qtrTotPktCountPer

Severity: variable

Explanation: This fault is caused by "total packet count periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266431: fltTcaLatencyLatencyAvg21yearTotPktCountPer

Severity: variable

Explanation: This fault is caused by "total packet count periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266432: fltTcaLatencyLatencyAvg25minTotPktCountMin

Severity: variable

Explanation: This fault is caused by "total packet count minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266433: fltTcaLatencyLatencyAvg215minTotPktCountMin

Severity: variable

Explanation: This fault is caused by "total packet count minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266434: fltTcaLatencyLatencyAvg21hTotPktCountMin

Severity: variable

Explanation: This fault is caused by "total packet count minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266435: fltTcaLatencyLatencyAvg21dTotPktCountMin

Severity: variable

Explanation: This fault is caused by "total packet count minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266436: fltTcaLatencyLatencyAvg21wTotPktCountMin

Severity: variable

Explanation: This fault is caused by "total packet count minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266437: fltTcaLatencyLatencyAvg21moTotPktCountMin

Severity: variable

Explanation: This fault is caused by "total packet count minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266438: fltTcaLatencyLatencyAvg21qtrTotPktCountMin

Severity: variable

Explanation: This fault is caused by "total packet count minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266439: fltTcaLatencyLatencyAvg21yearTotPktCountMin

Severity: variable

Explanation: This fault is caused by "total packet count minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266440: fltTcaLatencyLatencyAvg25minTotPktCountMax

Severity: variable

Explanation: This fault is caused by "total packet count maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266441: fltTcaLatencyLatencyAvg215minTotPktCountMax

Severity: variable

Explanation: This fault is caused by "total packet count maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266442: fltTcaLatencyLatencyAvg21hTotPktCountMax

Severity: variable

Explanation: This fault is caused by "total packet count maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266443: fltTcaLatencyLatencyAvg21dTotPktCountMax

Severity: variable

Explanation: This fault is caused by "total packet count maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266444: fltTcaLatencyLatencyAvg21wTotPktCountMax

Severity: variable

Explanation: This fault is caused by "total packet count maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266445: fltTcaLatencyLatencyAvg21moTotPktCountMax

Severity: variable

Explanation: This fault is caused by "total packet count maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266446: fltTcaLatencyLatencyAvg21qtrTotPktCountMax

Severity: variable

Explanation: This fault is caused by "total packet count maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266447: fltTcaLatencyLatencyAvg21yearTotPktCountMax

Severity: variable

Explanation: This fault is caused by "total packet count maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266448: fltTcaLatencyLatencyAvg25minTotPktCountAvg

Severity: variable

Explanation: This fault is caused by "total packet count average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266449: fltTcaLatencyLatencyAvg215minTotPktCountAvg

Severity: variable

Explanation: This fault is caused by "total packet count average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266450: fltTcaLatencyLatencyAvg21hTotPktCountAvg

Severity: variable

Explanation: This fault is caused by "total packet count average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266451: fltTcaLatencyLatencyAvg21dTotPktCountAvg

Severity: variable

Explanation: This fault is caused by "total packet count average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266452: fltTcaLatencyLatencyAvg21wTotPktCountAvg

Severity: variable

Explanation: This fault is caused by "total packet count average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266453: fltTcaLatencyLatencyAvg21moTotPktCountAvg

Severity: variable

Explanation: This fault is caused by "total packet count average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266454: fltTcaLatencyLatencyAvg21qtrTotPktCountAvg

Severity: variable

Explanation: This fault is caused by "total packet count average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266455: fltTcaLatencyLatencyAvg21yearTotPktCountAvg

Severity: variable

Explanation: This fault is caused by "total packet count average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266480: fltTcaLatencyLatencyAvg25minTotPktCountTr

Severity: variable

Explanation: This fault is caused by "total packet count trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266481: fltTcaLatencyLatencyAvg215minTotPktCountTr

Severity: variable

Explanation: This fault is caused by "total packet count trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266482: fltTcaLatencyLatencyAvg21hTotPktCountTr

Severity: variable

Explanation: This fault is caused by "total packet count trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266483: fltTcaLatencyLatencyAvg21dTotPktCountTr

Severity: variable

Explanation: This fault is caused by "total packet count trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266484: fltTcaLatencyLatencyAvg21wTotPktCountTr

Severity: variable

Explanation: This fault is caused by "total packet count trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266485: fltTcaLatencyLatencyAvg21moTotPktCountTr

Severity: variable

Explanation: This fault is caused by "total packet count trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266486: fltTcaLatencyLatencyAvg21qtrTotPktCountTr

Severity: variable

Explanation: This fault is caused by "total packet count trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266487: fltTcaLatencyLatencyAvg21yearTotPktCountTr

Severity: variable

Explanation: This fault is caused by "total packet count trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266488: fltTcaLatencyLatencyAvg25minTotPktCountRate

Severity: variable

Explanation: This fault is caused by "total packet count rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266489: fltTcaLatencyLatencyAvg215minTotPktCountRate

Severity: variable

Explanation: This fault is caused by "total packet count rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266490: fltTcaLatencyLatencyAvg21hTotPktCountRate

Severity: variable

Explanation: This fault is caused by "total packet count rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266491: fltTcaLatencyLatencyAvg21dTotPktCountRate

Severity: variable

Explanation: This fault is caused by "total packet count rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266492: fltTcaLatencyLatencyAvg21wTotPktCountRate

Severity: variable

Explanation: This fault is caused by "total packet count rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266493: fltTcaLatencyLatencyAvg21moTotPktCountRate

Severity: variable

Explanation: This fault is caused by "total packet count rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266494: fltTcaLatencyLatencyAvg21qtrTotPktCountRate

Severity: variable

Explanation: This fault is caused by "total packet count rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266495: fltTcaLatencyLatencyAvg21yearTotPktCountRate

Severity: variable

Explanation: This fault is caused by "total packet count rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total packet count" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266568: fltTcaLatencyLatencyHist15minAvgDelayLast

Severity: variable

Explanation: This fault is caused by "average delay current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266569: fltTcaLatencyLatencyHist115minAvgDelayLast

Severity: variable

Explanation: This fault is caused by "average delay current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266570: fltTcaLatencyLatencyHist11hAvgDelayLast

Severity: variable

Explanation: This fault is caused by "average delay current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266571: fltTcaLatencyLatencyHist11dAvgDelayLast

Severity: variable

Explanation: This fault is caused by "average delay current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266572: fltTcaLatencyLatencyHist11wAvgDelayLast

Severity: variable

Explanation: This fault is caused by "average delay current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266573: fltTcaLatencyLatencyHist11moAvgDelayLast

Severity: variable

Explanation: This fault is caused by "average delay current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266574: fltTcaLatencyLatencyHist11qtrAvgDelayLast

Severity: variable

Explanation: This fault is caused by "average delay current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266575: fltTcaLatencyLatencyHist11yearAvgDelayLast

Severity: variable

Explanation: This fault is caused by "average delay current value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266584: fltTcaLatencyLatencyHist15minAvgDelayCum

Severity: variable

Explanation: This fault is caused by "average delay cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266585: fltTcaLatencyLatencyHist115minAvgDelayCum

Severity: variable

Explanation: This fault is caused by "average delay cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266586: fltTcaLatencyLatencyHist11hAvgDelayCum

Severity: variable

Explanation: This fault is caused by "average delay cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266587: fltTcaLatencyLatencyHist11dAvgDelayCum

Severity: variable

Explanation: This fault is caused by "average delay cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266588: fltTcaLatencyLatencyHist11wAvgDelayCum

Severity: variable

Explanation: This fault is caused by "average delay cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266589: fltTcaLatencyLatencyHist11moAvgDelayCum

Severity: variable

Explanation: This fault is caused by "average delay cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266590: fltTcaLatencyLatencyHist11qtrAvgDelayCum

Severity: variable

Explanation: This fault is caused by "average delay cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266591: fltTcaLatencyLatencyHist11yearAvgDelayCum

Severity: variable

Explanation: This fault is caused by "average delay cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266592: fltTcaLatencyLatencyHist15minAvgDelayPer

Severity: variable

Explanation: This fault is caused by "average delay periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266593: fltTcaLatencyLatencyHist115minAvgDelayPer

Severity: variable

Explanation: This fault is caused by "average delay periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266594: fltTcaLatencyLatencyHist11hAvgDelayPer

Severity: variable

Explanation: This fault is caused by "average delay periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266595: fltTcaLatencyLatencyHist11dAvgDelayPer

Severity: variable

Explanation: This fault is caused by "average delay periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266596: fltTcaLatencyLatencyHist11wAvgDelayPer

Severity: variable

Explanation: This fault is caused by "average delay periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266597: fltTcaLatencyLatencyHist11moAvgDelayPer

Severity: variable

Explanation: This fault is caused by "average delay periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266598: fltTcaLatencyLatencyHist11qtrAvgDelayPer

Severity: variable

Explanation: This fault is caused by "average delay periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266599: fltTcaLatencyLatencyHist11yearAvgDelayPer

Severity: variable

Explanation: This fault is caused by "average delay periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266600: fltTcaLatencyLatencyHist15minAvgDelayMin

Severity: variable

Explanation: This fault is caused by "average delay minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266601: fltTcaLatencyLatencyHist115minAvgDelayMin

Severity: variable

Explanation: This fault is caused by "average delay minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266602: fltTcaLatencyLatencyHist11hAvgDelayMin

Severity: variable

Explanation: This fault is caused by "average delay minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266603: fltTcaLatencyLatencyHist11dAvgDelayMin

Severity: variable

Explanation: This fault is caused by "average delay minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266604: fltTcaLatencyLatencyHist11wAvgDelayMin

Severity: variable

Explanation: This fault is caused by "average delay minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266605: fltTcaLatencyLatencyHist11moAvgDelayMin

Severity: variable

Explanation: This fault is caused by "average delay minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266606: fltTcaLatencyLatencyHist11qtrAvgDelayMin

Severity: variable

Explanation: This fault is caused by "average delay minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266607: fltTcaLatencyLatencyHist11yearAvgDelayMin

Severity: variable

Explanation: This fault is caused by "average delay minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266608: fltTcaLatencyLatencyHist15minAvgDelayMax

Severity: variable

Explanation: This fault is caused by "average delay maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266609: fltTcaLatencyLatencyHist115minAvgDelayMax

Severity: variable

Explanation: This fault is caused by "average delay maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266610: fltTcaLatencyLatencyHist11hAvgDelayMax

Severity: variable

Explanation: This fault is caused by "average delay maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266611: fltTcaLatencyLatencyHist11dAvgDelayMax

Severity: variable

Explanation: This fault is caused by "average delay maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266612: fltTcaLatencyLatencyHist11wAvgDelayMax

Severity: variable

Explanation: This fault is caused by "average delay maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266613: fltTcaLatencyLatencyHist11moAvgDelayMax

Severity: variable

Explanation: This fault is caused by "average delay maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266614: fltTcaLatencyLatencyHist11qtrAvgDelayMax

Severity: variable

Explanation: This fault is caused by "average delay maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266615: fltTcaLatencyLatencyHist11yearAvgDelayMax

Severity: variable

Explanation: This fault is caused by "average delay maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266616: fltTcaLatencyLatencyHist15minAvgDelayAvg

Severity: variable

Explanation: This fault is caused by "average delay average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266617: fltTcaLatencyLatencyHist115minAvgDelayAvg

Severity: variable

Explanation: This fault is caused by "average delay average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266618: fltTcaLatencyLatencyHist11hAvgDelayAvg

Severity: variable

Explanation: This fault is caused by "average delay average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266619: fltTcaLatencyLatencyHist11dAvgDelayAvg

Severity: variable

Explanation: This fault is caused by "average delay average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266620: fltTcaLatencyLatencyHist11wAvgDelayAvg

Severity: variable

Explanation: This fault is caused by "average delay average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266621: fltTcaLatencyLatencyHist11moAvgDelayAvg

Severity: variable

Explanation: This fault is caused by "average delay average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266622: fltTcaLatencyLatencyHist11qtrAvgDelayAvg

Severity: variable

Explanation: This fault is caused by "average delay average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266623: fltTcaLatencyLatencyHist11yearAvgDelayAvg

Severity: variable

Explanation: This fault is caused by "average delay average value" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266648: fltTcaLatencyLatencyHist15minAvgDelayTr

Severity: variable

Explanation: This fault is caused by "average delay trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266649: fltTcaLatencyLatencyHist115minAvgDelayTr

Severity: variable

Explanation: This fault is caused by "average delay trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266650: fltTcaLatencyLatencyHist11hAvgDelayTr

Severity: variable

Explanation: This fault is caused by "average delay trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266651: fltTcaLatencyLatencyHist11dAvgDelayTr

Severity: variable

Explanation: This fault is caused by "average delay trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266652: fltTcaLatencyLatencyHist11wAvgDelayTr

Severity: variable

Explanation: This fault is caused by "average delay trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266653: fltTcaLatencyLatencyHist11moAvgDelayTr

Severity: variable

Explanation: This fault is caused by "average delay trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266654: fltTcaLatencyLatencyHist11qtrAvgDelayTr

Severity: variable

Explanation: This fault is caused by "average delay trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266655: fltTcaLatencyLatencyHist11yearAvgDelayTr

Severity: variable

Explanation: This fault is caused by "average delay trend" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266656: fltTcaLatencyLatencyHist15minAvgDelayRate

Severity: variable

Explanation: This fault is caused by "average delay rate" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266657: fltTcaLatencyLatencyHist115minAvgDelayRate

Severity: variable

Explanation: This fault is caused by "average delay rate" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266658: fltTcaLatencyLatencyHist11hAvgDelayRate

Severity: variable

Explanation: This fault is caused by "average delay rate" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266659: fltTcaLatencyLatencyHist11dAvgDelayRate

Severity: variable

Explanation: This fault is caused by "average delay rate" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266660: fltTcaLatencyLatencyHist11wAvgDelayRate

Severity: variable

Explanation: This fault is caused by "average delay rate" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266661: fltTcaLatencyLatencyHist11moAvgDelayRate

Severity: variable

Explanation: This fault is caused by "average delay rate" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266662: fltTcaLatencyLatencyHist11qtrAvgDelayRate

Severity: variable

Explanation: This fault is caused by "average delay rate" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266663: fltTcaLatencyLatencyHist11yearAvgDelayRate

Severity: variable

Explanation: This fault is caused by "average delay rate" statistical property crossing threshold level.

Recommended Action: Check the values of "average delay" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266736: fltTcaLatencyLatencyHist15minBucket0Last

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266737: fltTcaLatencyLatencyHist115minBucket0Last

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266738: fltTcaLatencyLatencyHist11hBucket0Last

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266739: fltTcaLatencyLatencyHist11dBucket0Last

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266740: fltTcaLatencyLatencyHist11wBucket0Last

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266741: fltTcaLatencyLatencyHist11moBucket0Last

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266742: fltTcaLatencyLatencyHist11qtrBucket0Last

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266743: fltTcaLatencyLatencyHist11yearBucket0Last

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266752: fltTcaLatencyLatencyHist15minBucket0Cum

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266753: fltTcaLatencyLatencyHist115minBucket0Cum

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266754: fltTcaLatencyLatencyHist11hBucket0Cum

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266755: fltTcaLatencyLatencyHist11dBucket0Cum

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266756: fltTcaLatencyLatencyHist11wBucket0Cum

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266757: fltTcaLatencyLatencyHist11moBucket0Cum

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266758: fltTcaLatencyLatencyHist11qtrBucket0Cum

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266759: fltTcaLatencyLatencyHist11yearBucket0Cum

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266760: fltTcaLatencyLatencyHist15minBucket0Per

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266761: fltTcaLatencyLatencyHist115minBucket0Per

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266762: fltTcaLatencyLatencyHist11hBucket0Per

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266763: fltTcaLatencyLatencyHist11dBucket0Per

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266764: fltTcaLatencyLatencyHist11wBucket0Per

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266765: fltTcaLatencyLatencyHist11moBucket0Per

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266766: fltTcaLatencyLatencyHist11qtrBucket0Per

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266767: fltTcaLatencyLatencyHist11yearBucket0Per

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266768: fltTcaLatencyLatencyHist15minBucket0Min

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266769: fltTcaLatencyLatencyHist115minBucket0Min

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266770: fltTcaLatencyLatencyHist11hBucket0Min

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266771: fltTcaLatencyLatencyHist11dBucket0Min

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266772: fltTcaLatencyLatencyHist11wBucket0Min

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266773: fltTcaLatencyLatencyHist11moBucket0Min

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266774: fltTcaLatencyLatencyHist11qtrBucket0Min

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266775: fltTcaLatencyLatencyHist11yearBucket0Min

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266776: fltTcaLatencyLatencyHist15minBucket0Max

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266777: fltTcaLatencyLatencyHist115minBucket0Max

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266778: fltTcaLatencyLatencyHist11hBucket0Max

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266779: fltTcaLatencyLatencyHist11dBucket0Max

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266780: fltTcaLatencyLatencyHist11wBucket0Max

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266781: fltTcaLatencyLatencyHist11moBucket0Max

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266782: fltTcaLatencyLatencyHist11qtrBucket0Max

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266783: fltTcaLatencyLatencyHist11yearBucket0Max

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266784: fltTcaLatencyLatencyHist15minBucket0Avg

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266785: fltTcaLatencyLatencyHist115minBucket0Avg

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266786: fltTcaLatencyLatencyHist11hBucket0Avg

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266787: fltTcaLatencyLatencyHist11dBucket0Avg

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266788: fltTcaLatencyLatencyHist11wBucket0Avg

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266789: fltTcaLatencyLatencyHist11moBucket0Avg

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266790: fltTcaLatencyLatencyHist11qtrBucket0Avg

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266791: fltTcaLatencyLatencyHist11yearBucket0Avg

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2668: fltInfraRsCoppIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F266816: fltTcaLatencyLatencyHist15minBucket0Tr

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266817: fltTcaLatencyLatencyHist115minBucket0Tr

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266818: fltTcaLatencyLatencyHist11hBucket0Tr

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266819: fltTcaLatencyLatencyHist11dBucket0Tr

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266820: fltTcaLatencyLatencyHist11wBucket0Tr

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266821: fltTcaLatencyLatencyHist11moBucket0Tr

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266822: fltTcaLatencyLatencyHist11qtrBucket0Tr

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266823: fltTcaLatencyLatencyHist11yearBucket0Tr

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266824: fltTcaLatencyLatencyHist15minBucket0Rate

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266825: fltTcaLatencyLatencyHist115minBucket0Rate

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266826: fltTcaLatencyLatencyHist11hBucket0Rate

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266827: fltTcaLatencyLatencyHist11dBucket0Rate

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266828: fltTcaLatencyLatencyHist11wBucket0Rate

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266829: fltTcaLatencyLatencyHist11moBucket0Rate

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266830: fltTcaLatencyLatencyHist11qtrBucket0Rate

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266831: fltTcaLatencyLatencyHist11yearBucket0Rate

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2669: fltApPluginSignatureVerificationFailed

Severity: major

Explanation: This fault occurs when there is a signature verification failure for Cisco signed app.

Recommended Action: If you see this fault, please make sure that app was not modified after downloading from Cisco. Re-download the app from cisco app center and try again.

F266904: fltTcaLatencyLatencyHist15minBucket1Last

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266905: fltTcaLatencyLatencyHist115minBucket1Last

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266906: fltTcaLatencyLatencyHist11hBucket1Last

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266907: fltTcaLatencyLatencyHist11dBucket1Last

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266908: fltTcaLatencyLatencyHist11wBucket1Last

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266909: fltTcaLatencyLatencyHist11moBucket1Last

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266910: fltTcaLatencyLatencyHist11qtrBucket1Last

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266911: fltTcaLatencyLatencyHist11yearBucket1Last

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266920: fltTcaLatencyLatencyHist15minBucket1Cum

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266921: fltTcaLatencyLatencyHist115minBucket1Cum

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266922: fltTcaLatencyLatencyHist11hBucket1Cum

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266923: fltTcaLatencyLatencyHist11dBucket1Cum

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266924: fltTcaLatencyLatencyHist11wBucket1Cum

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266925: fltTcaLatencyLatencyHist11moBucket1Cum

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266926: fltTcaLatencyLatencyHist11qtrBucket1Cum

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266927: fltTcaLatencyLatencyHist11yearBucket1Cum

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266928: fltTcaLatencyLatencyHist15minBucket1Per

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266929: fltTcaLatencyLatencyHist115minBucket1Per

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266930: fltTcaLatencyLatencyHist11hBucket1Per

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266931: fltTcaLatencyLatencyHist11dBucket1Per

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266932: fltTcaLatencyLatencyHist11wBucket1Per

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266933: fltTcaLatencyLatencyHist11moBucket1Per

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266934: fltTcaLatencyLatencyHist11qtrBucket1Per

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266935: fltTcaLatencyLatencyHist11yearBucket1Per

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266936: fltTcaLatencyLatencyHist15minBucket1Min

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266937: fltTcaLatencyLatencyHist115minBucket1Min

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266938: fltTcaLatencyLatencyHist11hBucket1Min

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266939: fltTcaLatencyLatencyHist11dBucket1Min

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266940: fltTcaLatencyLatencyHist11wBucket1Min

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266941: fltTcaLatencyLatencyHist11moBucket1Min

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266942: fltTcaLatencyLatencyHist11qtrBucket1Min

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266943: fltTcaLatencyLatencyHist11yearBucket1Min

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266944: fltTcaLatencyLatencyHist15minBucket1Max

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266945: fltTcaLatencyLatencyHist115minBucket1Max

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266946: fltTcaLatencyLatencyHist11hBucket1Max

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266947: fltTcaLatencyLatencyHist11dBucket1Max

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266948: fltTcaLatencyLatencyHist11wBucket1Max

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266949: fltTcaLatencyLatencyHist11moBucket1Max

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266950: fltTcaLatencyLatencyHist11qtrBucket1Max

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266951: fltTcaLatencyLatencyHist11yearBucket1Max

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266952: fltTcaLatencyLatencyHist15minBucket1Avg

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266953: fltTcaLatencyLatencyHist115minBucket1Avg

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266954: fltTcaLatencyLatencyHist11hBucket1Avg

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266955: fltTcaLatencyLatencyHist11dBucket1Avg

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266956: fltTcaLatencyLatencyHist11wBucket1Avg

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266957: fltTcaLatencyLatencyHist11moBucket1Avg

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266958: fltTcaLatencyLatencyHist11qtrBucket1Avg

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266959: fltTcaLatencyLatencyHist11yearBucket1Avg

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266984: fltTcaLatencyLatencyHist15minBucket1Tr

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266985: fltTcaLatencyLatencyHist115minBucket1Tr

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266986: fltTcaLatencyLatencyHist11hBucket1Tr

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266987: fltTcaLatencyLatencyHist11dBucket1Tr

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266988: fltTcaLatencyLatencyHist11wBucket1Tr

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266989: fltTcaLatencyLatencyHist11moBucket1Tr

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266990: fltTcaLatencyLatencyHist11qtrBucket1Tr

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266991: fltTcaLatencyLatencyHist11yearBucket1Tr

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266992: fltTcaLatencyLatencyHist15minBucket1Rate

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266993: fltTcaLatencyLatencyHist115minBucket1Rate

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266994: fltTcaLatencyLatencyHist11hBucket1Rate

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266995: fltTcaLatencyLatencyHist11dBucket1Rate

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266996: fltTcaLatencyLatencyHist11wBucket1Rate

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266997: fltTcaLatencyLatencyHist11moBucket1Rate

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266998: fltTcaLatencyLatencyHist11qtrBucket1Rate

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F266999: fltTcaLatencyLatencyHist11yearBucket1Rate

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267072: fltTcaLatencyLatencyHist15minSeqNoLast

Severity: variable

Explanation: This fault is caused by "sequence number current value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267073: fltTcaLatencyLatencyHist115minSeqNoLast

Severity: variable

Explanation: This fault is caused by "sequence number current value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267074: fltTcaLatencyLatencyHist11hSeqNoLast

Severity: variable

Explanation: This fault is caused by "sequence number current value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267075: fltTcaLatencyLatencyHist11dSeqNoLast

Severity: variable

Explanation: This fault is caused by "sequence number current value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267076: fltTcaLatencyLatencyHist11wSeqNoLast

Severity: variable

Explanation: This fault is caused by "sequence number current value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267077: fltTcaLatencyLatencyHist11moSeqNoLast

Severity: variable

Explanation: This fault is caused by "sequence number current value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267078: fltTcaLatencyLatencyHist11qtrSeqNoLast

Severity: variable

Explanation: This fault is caused by "sequence number current value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267079: fltTcaLatencyLatencyHist11yearSeqNoLast

Severity: variable

Explanation: This fault is caused by "sequence number current value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267088: fltTcaLatencyLatencyHist15minSeqNoCum

Severity: variable

Explanation: This fault is caused by "sequence number cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267089: fltTcaLatencyLatencyHist115minSeqNoCum

Severity: variable

Explanation: This fault is caused by "sequence number cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267090: fltTcaLatencyLatencyHist11hSeqNoCum

Severity: variable

Explanation: This fault is caused by "sequence number cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267091: fltTcaLatencyLatencyHist11dSeqNoCum

Severity: variable

Explanation: This fault is caused by "sequence number cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267092: fltTcaLatencyLatencyHist11wSeqNoCum

Severity: variable

Explanation: This fault is caused by "sequence number cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267093: fltTcaLatencyLatencyHist11moSeqNoCum

Severity: variable

Explanation: This fault is caused by "sequence number cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267094: fltTcaLatencyLatencyHist11qtrSeqNoCum

Severity: variable

Explanation: This fault is caused by "sequence number cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267095: fltTcaLatencyLatencyHist11yearSeqNoCum

Severity: variable

Explanation: This fault is caused by "sequence number cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267096: fltTcaLatencyLatencyHist15minSeqNoPer

Severity: variable

Explanation: This fault is caused by "sequence number periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267097: fltTcaLatencyLatencyHist115minSeqNoPer

Severity: variable

Explanation: This fault is caused by "sequence number periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267098: fltTcaLatencyLatencyHist11hSeqNoPer

Severity: variable

Explanation: This fault is caused by "sequence number periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267099: fltTcaLatencyLatencyHist11dSeqNoPer

Severity: variable

Explanation: This fault is caused by "sequence number periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267100: fltTcaLatencyLatencyHist11wSeqNoPer

Severity: variable

Explanation: This fault is caused by "sequence number periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267101: fltTcaLatencyLatencyHist11moSeqNoPer

Severity: variable

Explanation: This fault is caused by "sequence number periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267102: fltTcaLatencyLatencyHist11qtrSeqNoPer

Severity: variable

Explanation: This fault is caused by "sequence number periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267103: fltTcaLatencyLatencyHist11yearSeqNoPer

Severity: variable

Explanation: This fault is caused by "sequence number periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267104: fltTcaLatencyLatencyHist15minSeqNoMin

Severity: variable

Explanation: This fault is caused by "sequence number minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267105: fltTcaLatencyLatencyHist115minSeqNoMin

Severity: variable

Explanation: This fault is caused by "sequence number minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267106: fltTcaLatencyLatencyHist11hSeqNoMin

Severity: variable

Explanation: This fault is caused by "sequence number minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267107: fltTcaLatencyLatencyHist11dSeqNoMin

Severity: variable

Explanation: This fault is caused by "sequence number minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267108: fltTcaLatencyLatencyHist11wSeqNoMin

Severity: variable

Explanation: This fault is caused by "sequence number minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267109: fltTcaLatencyLatencyHist11moSeqNoMin

Severity: variable

Explanation: This fault is caused by "sequence number minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267110: fltTcaLatencyLatencyHist11qtrSeqNoMin

Severity: variable

Explanation: This fault is caused by "sequence number minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267111: fltTcaLatencyLatencyHist11yearSeqNoMin

Severity: variable

Explanation: This fault is caused by "sequence number minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267112: fltTcaLatencyLatencyHist15minSeqNoMax

Severity: variable

Explanation: This fault is caused by "sequence number maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267113: fltTcaLatencyLatencyHist115minSeqNoMax

Severity: variable

Explanation: This fault is caused by "sequence number maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267114: fltTcaLatencyLatencyHist11hSeqNoMax

Severity: variable

Explanation: This fault is caused by "sequence number maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267115: fltTcaLatencyLatencyHist11dSeqNoMax

Severity: variable

Explanation: This fault is caused by "sequence number maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267116: fltTcaLatencyLatencyHist11wSeqNoMax

Severity: variable

Explanation: This fault is caused by "sequence number maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267117: fltTcaLatencyLatencyHist11moSeqNoMax

Severity: variable

Explanation: This fault is caused by "sequence number maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267118: fltTcaLatencyLatencyHist11qtrSeqNoMax

Severity: variable

Explanation: This fault is caused by "sequence number maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267119: fltTcaLatencyLatencyHist11yearSeqNoMax

Severity: variable

Explanation: This fault is caused by "sequence number maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267120: fltTcaLatencyLatencyHist15minSeqNoAvg

Severity: variable

Explanation: This fault is caused by "sequence number average value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267121: fltTcaLatencyLatencyHist115minSeqNoAvg

Severity: variable

Explanation: This fault is caused by "sequence number average value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267122: fltTcaLatencyLatencyHist11hSeqNoAvg

Severity: variable

Explanation: This fault is caused by "sequence number average value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267123: fltTcaLatencyLatencyHist11dSeqNoAvg

Severity: variable

Explanation: This fault is caused by "sequence number average value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267124: fltTcaLatencyLatencyHist11wSeqNoAvg

Severity: variable

Explanation: This fault is caused by "sequence number average value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267125: fltTcaLatencyLatencyHist11moSeqNoAvg

Severity: variable

Explanation: This fault is caused by "sequence number average value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267126: fltTcaLatencyLatencyHist11qtrSeqNoAvg

Severity: variable

Explanation: This fault is caused by "sequence number average value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267127: fltTcaLatencyLatencyHist11yearSeqNoAvg

Severity: variable

Explanation: This fault is caused by "sequence number average value" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267152: fltTcaLatencyLatencyHist15minSeqNoTr

Severity: variable

Explanation: This fault is caused by "sequence number trend" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267153: fltTcaLatencyLatencyHist115minSeqNoTr

Severity: variable

Explanation: This fault is caused by "sequence number trend" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267154: fltTcaLatencyLatencyHist11hSeqNoTr

Severity: variable

Explanation: This fault is caused by "sequence number trend" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267155: fltTcaLatencyLatencyHist11dSeqNoTr

Severity: variable

Explanation: This fault is caused by "sequence number trend" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267156: fltTcaLatencyLatencyHist11wSeqNoTr

Severity: variable

Explanation: This fault is caused by "sequence number trend" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267157: fltTcaLatencyLatencyHist11moSeqNoTr

Severity: variable

Explanation: This fault is caused by "sequence number trend" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267158: fltTcaLatencyLatencyHist11qtrSeqNoTr

Severity: variable

Explanation: This fault is caused by "sequence number trend" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267159: fltTcaLatencyLatencyHist11yearSeqNoTr

Severity: variable

Explanation: This fault is caused by "sequence number trend" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267160: fltTcaLatencyLatencyHist15minSeqNoRate

Severity: variable

Explanation: This fault is caused by "sequence number rate" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267161: fltTcaLatencyLatencyHist115minSeqNoRate

Severity: variable

Explanation: This fault is caused by "sequence number rate" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267162: fltTcaLatencyLatencyHist11hSeqNoRate

Severity: variable

Explanation: This fault is caused by "sequence number rate" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267163: fltTcaLatencyLatencyHist11dSeqNoRate

Severity: variable

Explanation: This fault is caused by "sequence number rate" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267164: fltTcaLatencyLatencyHist11wSeqNoRate

Severity: variable

Explanation: This fault is caused by "sequence number rate" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267165: fltTcaLatencyLatencyHist11moSeqNoRate

Severity: variable

Explanation: This fault is caused by "sequence number rate" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267166: fltTcaLatencyLatencyHist11qtrSeqNoRate

Severity: variable

Explanation: This fault is caused by "sequence number rate" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267167: fltTcaLatencyLatencyHist11yearSeqNoRate

Severity: variable

Explanation: This fault is caused by "sequence number rate" statistical property crossing threshold level.

Recommended Action: Check the values of "sequence number" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267240: fltTcaLatencyLatencyHist25minBucket2Last

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267241: fltTcaLatencyLatencyHist215minBucket2Last

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267242: fltTcaLatencyLatencyHist21hBucket2Last

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267243: fltTcaLatencyLatencyHist21dBucket2Last

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267244: fltTcaLatencyLatencyHist21wBucket2Last

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267245: fltTcaLatencyLatencyHist21moBucket2Last

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267246: fltTcaLatencyLatencyHist21qtrBucket2Last

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267247: fltTcaLatencyLatencyHist21yearBucket2Last

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267256: fltTcaLatencyLatencyHist25minBucket2Cum

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267257: fltTcaLatencyLatencyHist215minBucket2Cum

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267258: fltTcaLatencyLatencyHist21hBucket2Cum

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267259: fltTcaLatencyLatencyHist21dBucket2Cum

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267260: fltTcaLatencyLatencyHist21wBucket2Cum

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267261: fltTcaLatencyLatencyHist21moBucket2Cum

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267262: fltTcaLatencyLatencyHist21qtrBucket2Cum

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267263: fltTcaLatencyLatencyHist21yearBucket2Cum

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267264: fltTcaLatencyLatencyHist25minBucket2Per

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267265: fltTcaLatencyLatencyHist215minBucket2Per

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267266: fltTcaLatencyLatencyHist21hBucket2Per

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267267: fltTcaLatencyLatencyHist21dBucket2Per

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267268: fltTcaLatencyLatencyHist21wBucket2Per

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267269: fltTcaLatencyLatencyHist21moBucket2Per

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267270: fltTcaLatencyLatencyHist21qtrBucket2Per

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267271: fltTcaLatencyLatencyHist21yearBucket2Per

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267272: fltTcaLatencyLatencyHist25minBucket2Min

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267273: fltTcaLatencyLatencyHist215minBucket2Min

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267274: fltTcaLatencyLatencyHist21hBucket2Min

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267275: fltTcaLatencyLatencyHist21dBucket2Min

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267276: fltTcaLatencyLatencyHist21wBucket2Min

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267277: fltTcaLatencyLatencyHist21moBucket2Min

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267278: fltTcaLatencyLatencyHist21qtrBucket2Min

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267279: fltTcaLatencyLatencyHist21yearBucket2Min

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267280: fltTcaLatencyLatencyHist25minBucket2Max

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267281: fltTcaLatencyLatencyHist215minBucket2Max

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267282: fltTcaLatencyLatencyHist21hBucket2Max

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267283: fltTcaLatencyLatencyHist21dBucket2Max

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267284: fltTcaLatencyLatencyHist21wBucket2Max

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267285: fltTcaLatencyLatencyHist21moBucket2Max

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267286: fltTcaLatencyLatencyHist21qtrBucket2Max

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267287: fltTcaLatencyLatencyHist21yearBucket2Max

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267288: fltTcaLatencyLatencyHist25minBucket2Avg

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267289: fltTcaLatencyLatencyHist215minBucket2Avg

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267290: fltTcaLatencyLatencyHist21hBucket2Avg

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267291: fltTcaLatencyLatencyHist21dBucket2Avg

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267292: fltTcaLatencyLatencyHist21wBucket2Avg

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267293: fltTcaLatencyLatencyHist21moBucket2Avg

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267294: fltTcaLatencyLatencyHist21qtrBucket2Avg

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267295: fltTcaLatencyLatencyHist21yearBucket2Avg

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2673: fltL1StormCtrlPUcMcBcStormPktCfgIsNotSupported

Severity: warning

Explanation: This fault occurs when user tries to configure granular storm control for unicast multicast and broadcast pkts on unsupported hardware

Recommended Action: To recover from this fault, switch to ALL Storm Control config

1. Modify Storm Control config to default ALL packet type

F267320: fltTcaLatencyLatencyHist25minBucket2Tr

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267321: fltTcaLatencyLatencyHist215minBucket2Tr

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267322: fltTcaLatencyLatencyHist21hBucket2Tr

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267323: fltTcaLatencyLatencyHist21dBucket2Tr

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267324: fltTcaLatencyLatencyHist21wBucket2Tr

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267325: fltTcaLatencyLatencyHist21moBucket2Tr

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267326: fltTcaLatencyLatencyHist21qtrBucket2Tr

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267327: fltTcaLatencyLatencyHist21yearBucket2Tr

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267328: fltTcaLatencyLatencyHist25minBucket2Rate

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267329: fltTcaLatencyLatencyHist215minBucket2Rate

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267330: fltTcaLatencyLatencyHist21hBucket2Rate

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267331: fltTcaLatencyLatencyHist21dBucket2Rate

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267332: fltTcaLatencyLatencyHist21wBucket2Rate

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267333: fltTcaLatencyLatencyHist21moBucket2Rate

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267334: fltTcaLatencyLatencyHist21qtrBucket2Rate

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267335: fltTcaLatencyLatencyHist21yearBucket2Rate

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2674: fltFhsIpInspectOperStDown

Severity: major

Explanation: This fault occurs when the operational state of the ip inspect feature is changed to due to either cfg-err or bd-max-binding-limit-exceeded or epg-max-binding-limit-exceeded or mac-max-binding-limit-exceeded reasons

Recommended Action: To recover from this fault, try the following actions

1. For cfg-err fault remove the ipisnpect feature config and add it back

2. For bd-max-binding-limit-exceeded either move the endpoints to different bd or increase the per bd ep limit in ipinspect configuration

3. For epg-max-binding-limit-exceeded either move the endpoints to different epg or increase the per epg ep limit in ipinspect configuration

4. For mac-max-binding-limit-exceeded either reduce the ip endpoints to different mac or increase the per mac ep limit in ipinspect configuration

F267408: fltTcaLatencyLatencyHist25minBucket3Last

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267409: fltTcaLatencyLatencyHist215minBucket3Last

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267410: fltTcaLatencyLatencyHist21hBucket3Last

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267411: fltTcaLatencyLatencyHist21dBucket3Last

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267412: fltTcaLatencyLatencyHist21wBucket3Last

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267413: fltTcaLatencyLatencyHist21moBucket3Last

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267414: fltTcaLatencyLatencyHist21qtrBucket3Last

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267415: fltTcaLatencyLatencyHist21yearBucket3Last

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267424: fltTcaLatencyLatencyHist25minBucket3Cum

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267425: fltTcaLatencyLatencyHist215minBucket3Cum

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267426: fltTcaLatencyLatencyHist21hBucket3Cum

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267427: fltTcaLatencyLatencyHist21dBucket3Cum

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267428: fltTcaLatencyLatencyHist21wBucket3Cum

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267429: fltTcaLatencyLatencyHist21moBucket3Cum

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267430: fltTcaLatencyLatencyHist21qtrBucket3Cum

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267431: fltTcaLatencyLatencyHist21yearBucket3Cum

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267432: fltTcaLatencyLatencyHist25minBucket3Per

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267433: fltTcaLatencyLatencyHist215minBucket3Per

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267434: fltTcaLatencyLatencyHist21hBucket3Per

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267435: fltTcaLatencyLatencyHist21dBucket3Per

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267436: fltTcaLatencyLatencyHist21wBucket3Per

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267437: fltTcaLatencyLatencyHist21moBucket3Per

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267438: fltTcaLatencyLatencyHist21qtrBucket3Per

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267439: fltTcaLatencyLatencyHist21yearBucket3Per

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267440: fltTcaLatencyLatencyHist25minBucket3Min

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267441: fltTcaLatencyLatencyHist215minBucket3Min

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267442: fltTcaLatencyLatencyHist21hBucket3Min

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267443: fltTcaLatencyLatencyHist21dBucket3Min

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267444: fltTcaLatencyLatencyHist21wBucket3Min

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267445: fltTcaLatencyLatencyHist21moBucket3Min

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267446: fltTcaLatencyLatencyHist21qtrBucket3Min

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267447: fltTcaLatencyLatencyHist21yearBucket3Min

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267448: fltTcaLatencyLatencyHist25minBucket3Max

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267449: fltTcaLatencyLatencyHist215minBucket3Max

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267450: fltTcaLatencyLatencyHist21hBucket3Max

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267451: fltTcaLatencyLatencyHist21dBucket3Max

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267452: fltTcaLatencyLatencyHist21wBucket3Max

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267453: fltTcaLatencyLatencyHist21moBucket3Max

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267454: fltTcaLatencyLatencyHist21qtrBucket3Max

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267455: fltTcaLatencyLatencyHist21yearBucket3Max

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267456: fltTcaLatencyLatencyHist25minBucket3Avg

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267457: fltTcaLatencyLatencyHist215minBucket3Avg

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267458: fltTcaLatencyLatencyHist21hBucket3Avg

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267459: fltTcaLatencyLatencyHist21dBucket3Avg

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267460: fltTcaLatencyLatencyHist21wBucket3Avg

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267461: fltTcaLatencyLatencyHist21moBucket3Avg

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267462: fltTcaLatencyLatencyHist21qtrBucket3Avg

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267463: fltTcaLatencyLatencyHist21yearBucket3Avg

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267488: fltTcaLatencyLatencyHist25minBucket3Tr

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267489: fltTcaLatencyLatencyHist215minBucket3Tr

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267490: fltTcaLatencyLatencyHist21hBucket3Tr

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267491: fltTcaLatencyLatencyHist21dBucket3Tr

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267492: fltTcaLatencyLatencyHist21wBucket3Tr

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267493: fltTcaLatencyLatencyHist21moBucket3Tr

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267494: fltTcaLatencyLatencyHist21qtrBucket3Tr

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267495: fltTcaLatencyLatencyHist21yearBucket3Tr

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267496: fltTcaLatencyLatencyHist25minBucket3Rate

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267497: fltTcaLatencyLatencyHist215minBucket3Rate

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267498: fltTcaLatencyLatencyHist21hBucket3Rate

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267499: fltTcaLatencyLatencyHist21dBucket3Rate

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2675: fltFhsIpInspectProtoOperStDown

Severity: major

Explanation: This fault occurs when the operational state of the ip inspect protocol subfeature is changed to due to either cfg-err or bd-vlan-down reasons

Recommended Action: To recover from this fault, try the following actions

1. For cfg-err fault remove the ipisnpect feature config and add it back

2. For bd-vlan-down check if the operational state of the vlan corresponding to BD is up in the vlan manager database on the leaf

F267500: fltTcaLatencyLatencyHist21wBucket3Rate

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267501: fltTcaLatencyLatencyHist21moBucket3Rate

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267502: fltTcaLatencyLatencyHist21qtrBucket3Rate

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267503: fltTcaLatencyLatencyHist21yearBucket3Rate

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267576: fltTcaLatencyLatencyHist25minBucket4Last

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267577: fltTcaLatencyLatencyHist215minBucket4Last

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267578: fltTcaLatencyLatencyHist21hBucket4Last

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267579: fltTcaLatencyLatencyHist21dBucket4Last

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267580: fltTcaLatencyLatencyHist21wBucket4Last

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267581: fltTcaLatencyLatencyHist21moBucket4Last

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267582: fltTcaLatencyLatencyHist21qtrBucket4Last

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267583: fltTcaLatencyLatencyHist21yearBucket4Last

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267592: fltTcaLatencyLatencyHist25minBucket4Cum

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267593: fltTcaLatencyLatencyHist215minBucket4Cum

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267594: fltTcaLatencyLatencyHist21hBucket4Cum

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267595: fltTcaLatencyLatencyHist21dBucket4Cum

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267596: fltTcaLatencyLatencyHist21wBucket4Cum

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267597: fltTcaLatencyLatencyHist21moBucket4Cum

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267598: fltTcaLatencyLatencyHist21qtrBucket4Cum

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267599: fltTcaLatencyLatencyHist21yearBucket4Cum

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2676: fltFhsTrustCtrlOperStDown

Severity: major

Explanation: This fault occurs when the operational state of the Trust control is changed to due to cfg-err reason on the leaf

Recommended Action: To recover from this fault, try the following actions

1. For cfg-err fault remove the trustctrl config and add it back on the epg

F267600: fltTcaLatencyLatencyHist25minBucket4Per

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267601: fltTcaLatencyLatencyHist215minBucket4Per

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267602: fltTcaLatencyLatencyHist21hBucket4Per

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267603: fltTcaLatencyLatencyHist21dBucket4Per

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267604: fltTcaLatencyLatencyHist21wBucket4Per

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267605: fltTcaLatencyLatencyHist21moBucket4Per

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267606: fltTcaLatencyLatencyHist21qtrBucket4Per

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267607: fltTcaLatencyLatencyHist21yearBucket4Per

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267608: fltTcaLatencyLatencyHist25minBucket4Min

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267609: fltTcaLatencyLatencyHist215minBucket4Min

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267610: fltTcaLatencyLatencyHist21hBucket4Min

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267611: fltTcaLatencyLatencyHist21dBucket4Min

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267612: fltTcaLatencyLatencyHist21wBucket4Min

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267613: fltTcaLatencyLatencyHist21moBucket4Min

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267614: fltTcaLatencyLatencyHist21qtrBucket4Min

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267615: fltTcaLatencyLatencyHist21yearBucket4Min

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267616: fltTcaLatencyLatencyHist25minBucket4Max

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267617: fltTcaLatencyLatencyHist215minBucket4Max

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267618: fltTcaLatencyLatencyHist21hBucket4Max

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267619: fltTcaLatencyLatencyHist21dBucket4Max

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267620: fltTcaLatencyLatencyHist21wBucket4Max

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267621: fltTcaLatencyLatencyHist21moBucket4Max

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267622: fltTcaLatencyLatencyHist21qtrBucket4Max

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267623: fltTcaLatencyLatencyHist21yearBucket4Max

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267624: fltTcaLatencyLatencyHist25minBucket4Avg

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267625: fltTcaLatencyLatencyHist215minBucket4Avg

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267626: fltTcaLatencyLatencyHist21hBucket4Avg

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267627: fltTcaLatencyLatencyHist21dBucket4Avg

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267628: fltTcaLatencyLatencyHist21wBucket4Avg

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267629: fltTcaLatencyLatencyHist21moBucket4Avg

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267630: fltTcaLatencyLatencyHist21qtrBucket4Avg

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267631: fltTcaLatencyLatencyHist21yearBucket4Avg

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267656: fltTcaLatencyLatencyHist25minBucket4Tr

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267657: fltTcaLatencyLatencyHist215minBucket4Tr

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267658: fltTcaLatencyLatencyHist21hBucket4Tr

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267659: fltTcaLatencyLatencyHist21dBucket4Tr

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267660: fltTcaLatencyLatencyHist21wBucket4Tr

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267661: fltTcaLatencyLatencyHist21moBucket4Tr

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267662: fltTcaLatencyLatencyHist21qtrBucket4Tr

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267663: fltTcaLatencyLatencyHist21yearBucket4Tr

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267664: fltTcaLatencyLatencyHist25minBucket4Rate

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267665: fltTcaLatencyLatencyHist215minBucket4Rate

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267666: fltTcaLatencyLatencyHist21hBucket4Rate

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267667: fltTcaLatencyLatencyHist21dBucket4Rate

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267668: fltTcaLatencyLatencyHist21wBucket4Rate

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267669: fltTcaLatencyLatencyHist21moBucket4Rate

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267670: fltTcaLatencyLatencyHist21qtrBucket4Rate

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267671: fltTcaLatencyLatencyHist21yearBucket4Rate

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2677: fltFhsRaGuardOperStDown

Severity: major

Explanation: This fault occurs when the operational state of the RA Guard fhs feature is changed to due to cfg-err or bd-vlan-down reasons on the leaf

Recommended Action: To recover from this fault, try the following actions

1. For cfg-err fault remove the RA Guard config and add it back on the epg

2. For bd-vlan-down check if the operational state of the vlan corresponding to BD is up in the vlan manager database on the leaf

F267744: fltTcaLatencyLatencyHist25minBucket5Last

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267745: fltTcaLatencyLatencyHist215minBucket5Last

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267746: fltTcaLatencyLatencyHist21hBucket5Last

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267747: fltTcaLatencyLatencyHist21dBucket5Last

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267748: fltTcaLatencyLatencyHist21wBucket5Last

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267749: fltTcaLatencyLatencyHist21moBucket5Last

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267750: fltTcaLatencyLatencyHist21qtrBucket5Last

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267751: fltTcaLatencyLatencyHist21yearBucket5Last

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267760: fltTcaLatencyLatencyHist25minBucket5Cum

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267761: fltTcaLatencyLatencyHist215minBucket5Cum

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267762: fltTcaLatencyLatencyHist21hBucket5Cum

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267763: fltTcaLatencyLatencyHist21dBucket5Cum

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267764: fltTcaLatencyLatencyHist21wBucket5Cum

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267765: fltTcaLatencyLatencyHist21moBucket5Cum

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267766: fltTcaLatencyLatencyHist21qtrBucket5Cum

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267767: fltTcaLatencyLatencyHist21yearBucket5Cum

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267768: fltTcaLatencyLatencyHist25minBucket5Per

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267769: fltTcaLatencyLatencyHist215minBucket5Per

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267770: fltTcaLatencyLatencyHist21hBucket5Per

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267771: fltTcaLatencyLatencyHist21dBucket5Per

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267772: fltTcaLatencyLatencyHist21wBucket5Per

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267773: fltTcaLatencyLatencyHist21moBucket5Per

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267774: fltTcaLatencyLatencyHist21qtrBucket5Per

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267775: fltTcaLatencyLatencyHist21yearBucket5Per

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267776: fltTcaLatencyLatencyHist25minBucket5Min

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267777: fltTcaLatencyLatencyHist215minBucket5Min

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267778: fltTcaLatencyLatencyHist21hBucket5Min

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267779: fltTcaLatencyLatencyHist21dBucket5Min

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267780: fltTcaLatencyLatencyHist21wBucket5Min

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267781: fltTcaLatencyLatencyHist21moBucket5Min

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267782: fltTcaLatencyLatencyHist21qtrBucket5Min

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267783: fltTcaLatencyLatencyHist21yearBucket5Min

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267784: fltTcaLatencyLatencyHist25minBucket5Max

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267785: fltTcaLatencyLatencyHist215minBucket5Max

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267786: fltTcaLatencyLatencyHist21hBucket5Max

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267787: fltTcaLatencyLatencyHist21dBucket5Max

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267788: fltTcaLatencyLatencyHist21wBucket5Max

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267789: fltTcaLatencyLatencyHist21moBucket5Max

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267790: fltTcaLatencyLatencyHist21qtrBucket5Max

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267791: fltTcaLatencyLatencyHist21yearBucket5Max

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267792: fltTcaLatencyLatencyHist25minBucket5Avg

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267793: fltTcaLatencyLatencyHist215minBucket5Avg

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267794: fltTcaLatencyLatencyHist21hBucket5Avg

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267795: fltTcaLatencyLatencyHist21dBucket5Avg

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267796: fltTcaLatencyLatencyHist21wBucket5Avg

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267797: fltTcaLatencyLatencyHist21moBucket5Avg

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267798: fltTcaLatencyLatencyHist21qtrBucket5Avg

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267799: fltTcaLatencyLatencyHist21yearBucket5Avg

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2678: fltFhsSrcGuardOperStDown

Severity: major

Explanation: This fault occurs when the operational state of the Source Guard fhs feature is changed to due to cfg-err or bd-vlan-down reasons on the leaf

Recommended Action: To recover from this fault, try the following actions

1. For cfg-err fault remove the Source Guard config and add it back on the epg

2. For bd-vlan-down check if the operational state of the vlan corresponding to BD is up in the vlan manager database on the leaf

F267824: fltTcaLatencyLatencyHist25minBucket5Tr

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267825: fltTcaLatencyLatencyHist215minBucket5Tr

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267826: fltTcaLatencyLatencyHist21hBucket5Tr

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267827: fltTcaLatencyLatencyHist21dBucket5Tr

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267828: fltTcaLatencyLatencyHist21wBucket5Tr

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267829: fltTcaLatencyLatencyHist21moBucket5Tr

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267830: fltTcaLatencyLatencyHist21qtrBucket5Tr

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267831: fltTcaLatencyLatencyHist21yearBucket5Tr

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267832: fltTcaLatencyLatencyHist25minBucket5Rate

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267833: fltTcaLatencyLatencyHist215minBucket5Rate

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267834: fltTcaLatencyLatencyHist21hBucket5Rate

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267835: fltTcaLatencyLatencyHist21dBucket5Rate

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267836: fltTcaLatencyLatencyHist21wBucket5Rate

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267837: fltTcaLatencyLatencyHist21moBucket5Rate

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267838: fltTcaLatencyLatencyHist21qtrBucket5Rate

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267839: fltTcaLatencyLatencyHist21yearBucket5Rate

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267912: fltTcaLatencyLatencyHist35minBucket6Last

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267913: fltTcaLatencyLatencyHist315minBucket6Last

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267914: fltTcaLatencyLatencyHist31hBucket6Last

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267915: fltTcaLatencyLatencyHist31dBucket6Last

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267916: fltTcaLatencyLatencyHist31wBucket6Last

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267917: fltTcaLatencyLatencyHist31moBucket6Last

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267918: fltTcaLatencyLatencyHist31qtrBucket6Last

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267919: fltTcaLatencyLatencyHist31yearBucket6Last

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267928: fltTcaLatencyLatencyHist35minBucket6Cum

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267929: fltTcaLatencyLatencyHist315minBucket6Cum

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267930: fltTcaLatencyLatencyHist31hBucket6Cum

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267931: fltTcaLatencyLatencyHist31dBucket6Cum

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267932: fltTcaLatencyLatencyHist31wBucket6Cum

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267933: fltTcaLatencyLatencyHist31moBucket6Cum

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267934: fltTcaLatencyLatencyHist31qtrBucket6Cum

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267935: fltTcaLatencyLatencyHist31yearBucket6Cum

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267936: fltTcaLatencyLatencyHist35minBucket6Per

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267937: fltTcaLatencyLatencyHist315minBucket6Per

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267938: fltTcaLatencyLatencyHist31hBucket6Per

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267939: fltTcaLatencyLatencyHist31dBucket6Per

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267940: fltTcaLatencyLatencyHist31wBucket6Per

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267941: fltTcaLatencyLatencyHist31moBucket6Per

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267942: fltTcaLatencyLatencyHist31qtrBucket6Per

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267943: fltTcaLatencyLatencyHist31yearBucket6Per

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267944: fltTcaLatencyLatencyHist35minBucket6Min

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267945: fltTcaLatencyLatencyHist315minBucket6Min

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267946: fltTcaLatencyLatencyHist31hBucket6Min

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267947: fltTcaLatencyLatencyHist31dBucket6Min

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267948: fltTcaLatencyLatencyHist31wBucket6Min

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267949: fltTcaLatencyLatencyHist31moBucket6Min

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267950: fltTcaLatencyLatencyHist31qtrBucket6Min

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267951: fltTcaLatencyLatencyHist31yearBucket6Min

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267952: fltTcaLatencyLatencyHist35minBucket6Max

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267953: fltTcaLatencyLatencyHist315minBucket6Max

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267954: fltTcaLatencyLatencyHist31hBucket6Max

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267955: fltTcaLatencyLatencyHist31dBucket6Max

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267956: fltTcaLatencyLatencyHist31wBucket6Max

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267957: fltTcaLatencyLatencyHist31moBucket6Max

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267958: fltTcaLatencyLatencyHist31qtrBucket6Max

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267959: fltTcaLatencyLatencyHist31yearBucket6Max

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267960: fltTcaLatencyLatencyHist35minBucket6Avg

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267961: fltTcaLatencyLatencyHist315minBucket6Avg

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267962: fltTcaLatencyLatencyHist31hBucket6Avg

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267963: fltTcaLatencyLatencyHist31dBucket6Avg

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267964: fltTcaLatencyLatencyHist31wBucket6Avg

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267965: fltTcaLatencyLatencyHist31moBucket6Avg

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267966: fltTcaLatencyLatencyHist31qtrBucket6Avg

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267967: fltTcaLatencyLatencyHist31yearBucket6Avg

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267992: fltTcaLatencyLatencyHist35minBucket6Tr

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267993: fltTcaLatencyLatencyHist315minBucket6Tr

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267994: fltTcaLatencyLatencyHist31hBucket6Tr

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267995: fltTcaLatencyLatencyHist31dBucket6Tr

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267996: fltTcaLatencyLatencyHist31wBucket6Tr

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267997: fltTcaLatencyLatencyHist31moBucket6Tr

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267998: fltTcaLatencyLatencyHist31qtrBucket6Tr

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F267999: fltTcaLatencyLatencyHist31yearBucket6Tr

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268000: fltTcaLatencyLatencyHist35minBucket6Rate

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268001: fltTcaLatencyLatencyHist315minBucket6Rate

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268002: fltTcaLatencyLatencyHist31hBucket6Rate

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268003: fltTcaLatencyLatencyHist31dBucket6Rate

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268004: fltTcaLatencyLatencyHist31wBucket6Rate

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268005: fltTcaLatencyLatencyHist31moBucket6Rate

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268006: fltTcaLatencyLatencyHist31qtrBucket6Rate

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268007: fltTcaLatencyLatencyHist31yearBucket6Rate

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268080: fltTcaLatencyLatencyHist35minBucket7Last

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268081: fltTcaLatencyLatencyHist315minBucket7Last

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268082: fltTcaLatencyLatencyHist31hBucket7Last

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268083: fltTcaLatencyLatencyHist31dBucket7Last

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268084: fltTcaLatencyLatencyHist31wBucket7Last

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268085: fltTcaLatencyLatencyHist31moBucket7Last

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268086: fltTcaLatencyLatencyHist31qtrBucket7Last

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268087: fltTcaLatencyLatencyHist31yearBucket7Last

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268096: fltTcaLatencyLatencyHist35minBucket7Cum

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268097: fltTcaLatencyLatencyHist315minBucket7Cum

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268098: fltTcaLatencyLatencyHist31hBucket7Cum

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268099: fltTcaLatencyLatencyHist31dBucket7Cum

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268100: fltTcaLatencyLatencyHist31wBucket7Cum

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268101: fltTcaLatencyLatencyHist31moBucket7Cum

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268102: fltTcaLatencyLatencyHist31qtrBucket7Cum

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268103: fltTcaLatencyLatencyHist31yearBucket7Cum

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268104: fltTcaLatencyLatencyHist35minBucket7Per

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268105: fltTcaLatencyLatencyHist315minBucket7Per

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268106: fltTcaLatencyLatencyHist31hBucket7Per

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268107: fltTcaLatencyLatencyHist31dBucket7Per

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268108: fltTcaLatencyLatencyHist31wBucket7Per

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268109: fltTcaLatencyLatencyHist31moBucket7Per

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268110: fltTcaLatencyLatencyHist31qtrBucket7Per

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268111: fltTcaLatencyLatencyHist31yearBucket7Per

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268112: fltTcaLatencyLatencyHist35minBucket7Min

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268113: fltTcaLatencyLatencyHist315minBucket7Min

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268114: fltTcaLatencyLatencyHist31hBucket7Min

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268115: fltTcaLatencyLatencyHist31dBucket7Min

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268116: fltTcaLatencyLatencyHist31wBucket7Min

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268117: fltTcaLatencyLatencyHist31moBucket7Min

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268118: fltTcaLatencyLatencyHist31qtrBucket7Min

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268119: fltTcaLatencyLatencyHist31yearBucket7Min

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268120: fltTcaLatencyLatencyHist35minBucket7Max

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268121: fltTcaLatencyLatencyHist315minBucket7Max

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268122: fltTcaLatencyLatencyHist31hBucket7Max

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268123: fltTcaLatencyLatencyHist31dBucket7Max

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268124: fltTcaLatencyLatencyHist31wBucket7Max

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268125: fltTcaLatencyLatencyHist31moBucket7Max

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268126: fltTcaLatencyLatencyHist31qtrBucket7Max

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268127: fltTcaLatencyLatencyHist31yearBucket7Max

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268128: fltTcaLatencyLatencyHist35minBucket7Avg

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268129: fltTcaLatencyLatencyHist315minBucket7Avg

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268130: fltTcaLatencyLatencyHist31hBucket7Avg

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268131: fltTcaLatencyLatencyHist31dBucket7Avg

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268132: fltTcaLatencyLatencyHist31wBucket7Avg

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268133: fltTcaLatencyLatencyHist31moBucket7Avg

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268134: fltTcaLatencyLatencyHist31qtrBucket7Avg

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268135: fltTcaLatencyLatencyHist31yearBucket7Avg

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268160: fltTcaLatencyLatencyHist35minBucket7Tr

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268161: fltTcaLatencyLatencyHist315minBucket7Tr

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268162: fltTcaLatencyLatencyHist31hBucket7Tr

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268163: fltTcaLatencyLatencyHist31dBucket7Tr

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268164: fltTcaLatencyLatencyHist31wBucket7Tr

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268165: fltTcaLatencyLatencyHist31moBucket7Tr

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268166: fltTcaLatencyLatencyHist31qtrBucket7Tr

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268167: fltTcaLatencyLatencyHist31yearBucket7Tr

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268168: fltTcaLatencyLatencyHist35minBucket7Rate

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268169: fltTcaLatencyLatencyHist315minBucket7Rate

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268170: fltTcaLatencyLatencyHist31hBucket7Rate

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268171: fltTcaLatencyLatencyHist31dBucket7Rate

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268172: fltTcaLatencyLatencyHist31wBucket7Rate

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268173: fltTcaLatencyLatencyHist31moBucket7Rate

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268174: fltTcaLatencyLatencyHist31qtrBucket7Rate

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268175: fltTcaLatencyLatencyHist31yearBucket7Rate

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268248: fltTcaLatencyLatencyHist35minBucket8Last

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268249: fltTcaLatencyLatencyHist315minBucket8Last

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268250: fltTcaLatencyLatencyHist31hBucket8Last

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268251: fltTcaLatencyLatencyHist31dBucket8Last

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268252: fltTcaLatencyLatencyHist31wBucket8Last

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268253: fltTcaLatencyLatencyHist31moBucket8Last

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268254: fltTcaLatencyLatencyHist31qtrBucket8Last

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268255: fltTcaLatencyLatencyHist31yearBucket8Last

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268264: fltTcaLatencyLatencyHist35minBucket8Cum

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268265: fltTcaLatencyLatencyHist315minBucket8Cum

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268266: fltTcaLatencyLatencyHist31hBucket8Cum

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268267: fltTcaLatencyLatencyHist31dBucket8Cum

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268268: fltTcaLatencyLatencyHist31wBucket8Cum

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268269: fltTcaLatencyLatencyHist31moBucket8Cum

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268270: fltTcaLatencyLatencyHist31qtrBucket8Cum

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268271: fltTcaLatencyLatencyHist31yearBucket8Cum

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268272: fltTcaLatencyLatencyHist35minBucket8Per

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268273: fltTcaLatencyLatencyHist315minBucket8Per

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268274: fltTcaLatencyLatencyHist31hBucket8Per

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268275: fltTcaLatencyLatencyHist31dBucket8Per

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268276: fltTcaLatencyLatencyHist31wBucket8Per

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268277: fltTcaLatencyLatencyHist31moBucket8Per

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268278: fltTcaLatencyLatencyHist31qtrBucket8Per

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268279: fltTcaLatencyLatencyHist31yearBucket8Per

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268280: fltTcaLatencyLatencyHist35minBucket8Min

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268281: fltTcaLatencyLatencyHist315minBucket8Min

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268282: fltTcaLatencyLatencyHist31hBucket8Min

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268283: fltTcaLatencyLatencyHist31dBucket8Min

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268284: fltTcaLatencyLatencyHist31wBucket8Min

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268285: fltTcaLatencyLatencyHist31moBucket8Min

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268286: fltTcaLatencyLatencyHist31qtrBucket8Min

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268287: fltTcaLatencyLatencyHist31yearBucket8Min

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268288: fltTcaLatencyLatencyHist35minBucket8Max

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268289: fltTcaLatencyLatencyHist315minBucket8Max

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268290: fltTcaLatencyLatencyHist31hBucket8Max

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268291: fltTcaLatencyLatencyHist31dBucket8Max

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268292: fltTcaLatencyLatencyHist31wBucket8Max

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268293: fltTcaLatencyLatencyHist31moBucket8Max

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268294: fltTcaLatencyLatencyHist31qtrBucket8Max

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268295: fltTcaLatencyLatencyHist31yearBucket8Max

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268296: fltTcaLatencyLatencyHist35minBucket8Avg

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268297: fltTcaLatencyLatencyHist315minBucket8Avg

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268298: fltTcaLatencyLatencyHist31hBucket8Avg

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268299: fltTcaLatencyLatencyHist31dBucket8Avg

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268300: fltTcaLatencyLatencyHist31wBucket8Avg

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268301: fltTcaLatencyLatencyHist31moBucket8Avg

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268302: fltTcaLatencyLatencyHist31qtrBucket8Avg

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268303: fltTcaLatencyLatencyHist31yearBucket8Avg

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268328: fltTcaLatencyLatencyHist35minBucket8Tr

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268329: fltTcaLatencyLatencyHist315minBucket8Tr

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268330: fltTcaLatencyLatencyHist31hBucket8Tr

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268331: fltTcaLatencyLatencyHist31dBucket8Tr

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268332: fltTcaLatencyLatencyHist31wBucket8Tr

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268333: fltTcaLatencyLatencyHist31moBucket8Tr

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268334: fltTcaLatencyLatencyHist31qtrBucket8Tr

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268335: fltTcaLatencyLatencyHist31yearBucket8Tr

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268336: fltTcaLatencyLatencyHist35minBucket8Rate

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268337: fltTcaLatencyLatencyHist315minBucket8Rate

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268338: fltTcaLatencyLatencyHist31hBucket8Rate

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268339: fltTcaLatencyLatencyHist31dBucket8Rate

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268340: fltTcaLatencyLatencyHist31wBucket8Rate

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268341: fltTcaLatencyLatencyHist31moBucket8Rate

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268342: fltTcaLatencyLatencyHist31qtrBucket8Rate

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268343: fltTcaLatencyLatencyHist31yearBucket8Rate

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268416: fltTcaLatencyLatencyHist35minBucket9Last

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268417: fltTcaLatencyLatencyHist315minBucket9Last

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268418: fltTcaLatencyLatencyHist31hBucket9Last

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268419: fltTcaLatencyLatencyHist31dBucket9Last

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268420: fltTcaLatencyLatencyHist31wBucket9Last

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268421: fltTcaLatencyLatencyHist31moBucket9Last

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268422: fltTcaLatencyLatencyHist31qtrBucket9Last

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268423: fltTcaLatencyLatencyHist31yearBucket9Last

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268432: fltTcaLatencyLatencyHist35minBucket9Cum

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268433: fltTcaLatencyLatencyHist315minBucket9Cum

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268434: fltTcaLatencyLatencyHist31hBucket9Cum

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268435: fltTcaLatencyLatencyHist31dBucket9Cum

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268436: fltTcaLatencyLatencyHist31wBucket9Cum

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268437: fltTcaLatencyLatencyHist31moBucket9Cum

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268438: fltTcaLatencyLatencyHist31qtrBucket9Cum

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268439: fltTcaLatencyLatencyHist31yearBucket9Cum

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268440: fltTcaLatencyLatencyHist35minBucket9Per

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268441: fltTcaLatencyLatencyHist315minBucket9Per

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268442: fltTcaLatencyLatencyHist31hBucket9Per

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268443: fltTcaLatencyLatencyHist31dBucket9Per

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268444: fltTcaLatencyLatencyHist31wBucket9Per

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268445: fltTcaLatencyLatencyHist31moBucket9Per

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268446: fltTcaLatencyLatencyHist31qtrBucket9Per

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268447: fltTcaLatencyLatencyHist31yearBucket9Per

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268448: fltTcaLatencyLatencyHist35minBucket9Min

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268449: fltTcaLatencyLatencyHist315minBucket9Min

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268450: fltTcaLatencyLatencyHist31hBucket9Min

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268451: fltTcaLatencyLatencyHist31dBucket9Min

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268452: fltTcaLatencyLatencyHist31wBucket9Min

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268453: fltTcaLatencyLatencyHist31moBucket9Min

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268454: fltTcaLatencyLatencyHist31qtrBucket9Min

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268455: fltTcaLatencyLatencyHist31yearBucket9Min

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268456: fltTcaLatencyLatencyHist35minBucket9Max

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268457: fltTcaLatencyLatencyHist315minBucket9Max

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268458: fltTcaLatencyLatencyHist31hBucket9Max

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268459: fltTcaLatencyLatencyHist31dBucket9Max

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268460: fltTcaLatencyLatencyHist31wBucket9Max

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268461: fltTcaLatencyLatencyHist31moBucket9Max

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268462: fltTcaLatencyLatencyHist31qtrBucket9Max

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268463: fltTcaLatencyLatencyHist31yearBucket9Max

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268464: fltTcaLatencyLatencyHist35minBucket9Avg

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268465: fltTcaLatencyLatencyHist315minBucket9Avg

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268466: fltTcaLatencyLatencyHist31hBucket9Avg

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268467: fltTcaLatencyLatencyHist31dBucket9Avg

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268468: fltTcaLatencyLatencyHist31wBucket9Avg

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268469: fltTcaLatencyLatencyHist31moBucket9Avg

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268470: fltTcaLatencyLatencyHist31qtrBucket9Avg

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268471: fltTcaLatencyLatencyHist31yearBucket9Avg

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268496: fltTcaLatencyLatencyHist35minBucket9Tr

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268497: fltTcaLatencyLatencyHist315minBucket9Tr

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268498: fltTcaLatencyLatencyHist31hBucket9Tr

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268499: fltTcaLatencyLatencyHist31dBucket9Tr

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268500: fltTcaLatencyLatencyHist31wBucket9Tr

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268501: fltTcaLatencyLatencyHist31moBucket9Tr

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268502: fltTcaLatencyLatencyHist31qtrBucket9Tr

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268503: fltTcaLatencyLatencyHist31yearBucket9Tr

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268504: fltTcaLatencyLatencyHist35minBucket9Rate

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268505: fltTcaLatencyLatencyHist315minBucket9Rate

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268506: fltTcaLatencyLatencyHist31hBucket9Rate

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268507: fltTcaLatencyLatencyHist31dBucket9Rate

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268508: fltTcaLatencyLatencyHist31wBucket9Rate

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268509: fltTcaLatencyLatencyHist31moBucket9Rate

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268510: fltTcaLatencyLatencyHist31qtrBucket9Rate

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268511: fltTcaLatencyLatencyHist31yearBucket9Rate

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268584: fltTcaLatencyLatencyHist45minBucket10Last

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268585: fltTcaLatencyLatencyHist415minBucket10Last

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268586: fltTcaLatencyLatencyHist41hBucket10Last

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268587: fltTcaLatencyLatencyHist41dBucket10Last

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268588: fltTcaLatencyLatencyHist41wBucket10Last

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268589: fltTcaLatencyLatencyHist41moBucket10Last

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268590: fltTcaLatencyLatencyHist41qtrBucket10Last

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268591: fltTcaLatencyLatencyHist41yearBucket10Last

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268600: fltTcaLatencyLatencyHist45minBucket10Cum

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268601: fltTcaLatencyLatencyHist415minBucket10Cum

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268602: fltTcaLatencyLatencyHist41hBucket10Cum

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268603: fltTcaLatencyLatencyHist41dBucket10Cum

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268604: fltTcaLatencyLatencyHist41wBucket10Cum

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268605: fltTcaLatencyLatencyHist41moBucket10Cum

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268606: fltTcaLatencyLatencyHist41qtrBucket10Cum

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268607: fltTcaLatencyLatencyHist41yearBucket10Cum

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268608: fltTcaLatencyLatencyHist45minBucket10Per

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268609: fltTcaLatencyLatencyHist415minBucket10Per

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268610: fltTcaLatencyLatencyHist41hBucket10Per

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268611: fltTcaLatencyLatencyHist41dBucket10Per

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268612: fltTcaLatencyLatencyHist41wBucket10Per

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268613: fltTcaLatencyLatencyHist41moBucket10Per

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268614: fltTcaLatencyLatencyHist41qtrBucket10Per

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268615: fltTcaLatencyLatencyHist41yearBucket10Per

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268616: fltTcaLatencyLatencyHist45minBucket10Min

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268617: fltTcaLatencyLatencyHist415minBucket10Min

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268618: fltTcaLatencyLatencyHist41hBucket10Min

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268619: fltTcaLatencyLatencyHist41dBucket10Min

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268620: fltTcaLatencyLatencyHist41wBucket10Min

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268621: fltTcaLatencyLatencyHist41moBucket10Min

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268622: fltTcaLatencyLatencyHist41qtrBucket10Min

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268623: fltTcaLatencyLatencyHist41yearBucket10Min

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268624: fltTcaLatencyLatencyHist45minBucket10Max

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268625: fltTcaLatencyLatencyHist415minBucket10Max

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268626: fltTcaLatencyLatencyHist41hBucket10Max

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268627: fltTcaLatencyLatencyHist41dBucket10Max

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268628: fltTcaLatencyLatencyHist41wBucket10Max

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268629: fltTcaLatencyLatencyHist41moBucket10Max

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268630: fltTcaLatencyLatencyHist41qtrBucket10Max

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268631: fltTcaLatencyLatencyHist41yearBucket10Max

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268632: fltTcaLatencyLatencyHist45minBucket10Avg

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268633: fltTcaLatencyLatencyHist415minBucket10Avg

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268634: fltTcaLatencyLatencyHist41hBucket10Avg

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268635: fltTcaLatencyLatencyHist41dBucket10Avg

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268636: fltTcaLatencyLatencyHist41wBucket10Avg

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268637: fltTcaLatencyLatencyHist41moBucket10Avg

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268638: fltTcaLatencyLatencyHist41qtrBucket10Avg

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268639: fltTcaLatencyLatencyHist41yearBucket10Avg

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268664: fltTcaLatencyLatencyHist45minBucket10Tr

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268665: fltTcaLatencyLatencyHist415minBucket10Tr

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268666: fltTcaLatencyLatencyHist41hBucket10Tr

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268667: fltTcaLatencyLatencyHist41dBucket10Tr

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268668: fltTcaLatencyLatencyHist41wBucket10Tr

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268669: fltTcaLatencyLatencyHist41moBucket10Tr

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268670: fltTcaLatencyLatencyHist41qtrBucket10Tr

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268671: fltTcaLatencyLatencyHist41yearBucket10Tr

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268672: fltTcaLatencyLatencyHist45minBucket10Rate

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268673: fltTcaLatencyLatencyHist415minBucket10Rate

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268674: fltTcaLatencyLatencyHist41hBucket10Rate

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268675: fltTcaLatencyLatencyHist41dBucket10Rate

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268676: fltTcaLatencyLatencyHist41wBucket10Rate

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268677: fltTcaLatencyLatencyHist41moBucket10Rate

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268678: fltTcaLatencyLatencyHist41qtrBucket10Rate

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268679: fltTcaLatencyLatencyHist41yearBucket10Rate

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268752: fltTcaLatencyLatencyHist45minBucket11Last

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268753: fltTcaLatencyLatencyHist415minBucket11Last

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268754: fltTcaLatencyLatencyHist41hBucket11Last

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268755: fltTcaLatencyLatencyHist41dBucket11Last

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268756: fltTcaLatencyLatencyHist41wBucket11Last

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268757: fltTcaLatencyLatencyHist41moBucket11Last

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268758: fltTcaLatencyLatencyHist41qtrBucket11Last

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268759: fltTcaLatencyLatencyHist41yearBucket11Last

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268768: fltTcaLatencyLatencyHist45minBucket11Cum

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268769: fltTcaLatencyLatencyHist415minBucket11Cum

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268770: fltTcaLatencyLatencyHist41hBucket11Cum

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268771: fltTcaLatencyLatencyHist41dBucket11Cum

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268772: fltTcaLatencyLatencyHist41wBucket11Cum

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268773: fltTcaLatencyLatencyHist41moBucket11Cum

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268774: fltTcaLatencyLatencyHist41qtrBucket11Cum

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268775: fltTcaLatencyLatencyHist41yearBucket11Cum

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268776: fltTcaLatencyLatencyHist45minBucket11Per

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268777: fltTcaLatencyLatencyHist415minBucket11Per

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268778: fltTcaLatencyLatencyHist41hBucket11Per

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268779: fltTcaLatencyLatencyHist41dBucket11Per

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268780: fltTcaLatencyLatencyHist41wBucket11Per

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268781: fltTcaLatencyLatencyHist41moBucket11Per

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268782: fltTcaLatencyLatencyHist41qtrBucket11Per

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268783: fltTcaLatencyLatencyHist41yearBucket11Per

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268784: fltTcaLatencyLatencyHist45minBucket11Min

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268785: fltTcaLatencyLatencyHist415minBucket11Min

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268786: fltTcaLatencyLatencyHist41hBucket11Min

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268787: fltTcaLatencyLatencyHist41dBucket11Min

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268788: fltTcaLatencyLatencyHist41wBucket11Min

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268789: fltTcaLatencyLatencyHist41moBucket11Min

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268790: fltTcaLatencyLatencyHist41qtrBucket11Min

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268791: fltTcaLatencyLatencyHist41yearBucket11Min

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268792: fltTcaLatencyLatencyHist45minBucket11Max

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268793: fltTcaLatencyLatencyHist415minBucket11Max

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268794: fltTcaLatencyLatencyHist41hBucket11Max

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268795: fltTcaLatencyLatencyHist41dBucket11Max

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268796: fltTcaLatencyLatencyHist41wBucket11Max

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268797: fltTcaLatencyLatencyHist41moBucket11Max

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268798: fltTcaLatencyLatencyHist41qtrBucket11Max

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268799: fltTcaLatencyLatencyHist41yearBucket11Max

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2688: fltInfraRsLeafCoppProfileResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F268800: fltTcaLatencyLatencyHist45minBucket11Avg

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268801: fltTcaLatencyLatencyHist415minBucket11Avg

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268802: fltTcaLatencyLatencyHist41hBucket11Avg

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268803: fltTcaLatencyLatencyHist41dBucket11Avg

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268804: fltTcaLatencyLatencyHist41wBucket11Avg

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268805: fltTcaLatencyLatencyHist41moBucket11Avg

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268806: fltTcaLatencyLatencyHist41qtrBucket11Avg

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268807: fltTcaLatencyLatencyHist41yearBucket11Avg

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268832: fltTcaLatencyLatencyHist45minBucket11Tr

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268833: fltTcaLatencyLatencyHist415minBucket11Tr

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268834: fltTcaLatencyLatencyHist41hBucket11Tr

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268835: fltTcaLatencyLatencyHist41dBucket11Tr

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268836: fltTcaLatencyLatencyHist41wBucket11Tr

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268837: fltTcaLatencyLatencyHist41moBucket11Tr

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268838: fltTcaLatencyLatencyHist41qtrBucket11Tr

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268839: fltTcaLatencyLatencyHist41yearBucket11Tr

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268840: fltTcaLatencyLatencyHist45minBucket11Rate

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268841: fltTcaLatencyLatencyHist415minBucket11Rate

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268842: fltTcaLatencyLatencyHist41hBucket11Rate

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268843: fltTcaLatencyLatencyHist41dBucket11Rate

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268844: fltTcaLatencyLatencyHist41wBucket11Rate

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268845: fltTcaLatencyLatencyHist41moBucket11Rate

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268846: fltTcaLatencyLatencyHist41qtrBucket11Rate

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268847: fltTcaLatencyLatencyHist41yearBucket11Rate

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2689: fltInfraRsSpineCoppProfileResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F268920: fltTcaLatencyLatencyHist45minBucket12Last

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268921: fltTcaLatencyLatencyHist415minBucket12Last

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268922: fltTcaLatencyLatencyHist41hBucket12Last

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268923: fltTcaLatencyLatencyHist41dBucket12Last

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268924: fltTcaLatencyLatencyHist41wBucket12Last

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268925: fltTcaLatencyLatencyHist41moBucket12Last

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268926: fltTcaLatencyLatencyHist41qtrBucket12Last

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268927: fltTcaLatencyLatencyHist41yearBucket12Last

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268936: fltTcaLatencyLatencyHist45minBucket12Cum

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268937: fltTcaLatencyLatencyHist415minBucket12Cum

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268938: fltTcaLatencyLatencyHist41hBucket12Cum

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268939: fltTcaLatencyLatencyHist41dBucket12Cum

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268940: fltTcaLatencyLatencyHist41wBucket12Cum

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268941: fltTcaLatencyLatencyHist41moBucket12Cum

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268942: fltTcaLatencyLatencyHist41qtrBucket12Cum

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268943: fltTcaLatencyLatencyHist41yearBucket12Cum

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268944: fltTcaLatencyLatencyHist45minBucket12Per

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268945: fltTcaLatencyLatencyHist415minBucket12Per

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268946: fltTcaLatencyLatencyHist41hBucket12Per

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268947: fltTcaLatencyLatencyHist41dBucket12Per

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268948: fltTcaLatencyLatencyHist41wBucket12Per

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268949: fltTcaLatencyLatencyHist41moBucket12Per

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268950: fltTcaLatencyLatencyHist41qtrBucket12Per

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268951: fltTcaLatencyLatencyHist41yearBucket12Per

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268952: fltTcaLatencyLatencyHist45minBucket12Min

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268953: fltTcaLatencyLatencyHist415minBucket12Min

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268954: fltTcaLatencyLatencyHist41hBucket12Min

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268955: fltTcaLatencyLatencyHist41dBucket12Min

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268956: fltTcaLatencyLatencyHist41wBucket12Min

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268957: fltTcaLatencyLatencyHist41moBucket12Min

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268958: fltTcaLatencyLatencyHist41qtrBucket12Min

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268959: fltTcaLatencyLatencyHist41yearBucket12Min

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268960: fltTcaLatencyLatencyHist45minBucket12Max

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268961: fltTcaLatencyLatencyHist415minBucket12Max

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268962: fltTcaLatencyLatencyHist41hBucket12Max

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268963: fltTcaLatencyLatencyHist41dBucket12Max

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268964: fltTcaLatencyLatencyHist41wBucket12Max

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268965: fltTcaLatencyLatencyHist41moBucket12Max

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268966: fltTcaLatencyLatencyHist41qtrBucket12Max

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268967: fltTcaLatencyLatencyHist41yearBucket12Max

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268968: fltTcaLatencyLatencyHist45minBucket12Avg

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268969: fltTcaLatencyLatencyHist415minBucket12Avg

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268970: fltTcaLatencyLatencyHist41hBucket12Avg

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268971: fltTcaLatencyLatencyHist41dBucket12Avg

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268972: fltTcaLatencyLatencyHist41wBucket12Avg

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268973: fltTcaLatencyLatencyHist41moBucket12Avg

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268974: fltTcaLatencyLatencyHist41qtrBucket12Avg

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F268975: fltTcaLatencyLatencyHist41yearBucket12Avg

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2690: fltInfraRsSpineAccNodePGrpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F269000: fltTcaLatencyLatencyHist45minBucket12Tr

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269001: fltTcaLatencyLatencyHist415minBucket12Tr

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269002: fltTcaLatencyLatencyHist41hBucket12Tr

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269003: fltTcaLatencyLatencyHist41dBucket12Tr

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269004: fltTcaLatencyLatencyHist41wBucket12Tr

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269005: fltTcaLatencyLatencyHist41moBucket12Tr

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269006: fltTcaLatencyLatencyHist41qtrBucket12Tr

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269007: fltTcaLatencyLatencyHist41yearBucket12Tr

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269008: fltTcaLatencyLatencyHist45minBucket12Rate

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269009: fltTcaLatencyLatencyHist415minBucket12Rate

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269010: fltTcaLatencyLatencyHist41hBucket12Rate

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269011: fltTcaLatencyLatencyHist41dBucket12Rate

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269012: fltTcaLatencyLatencyHist41wBucket12Rate

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269013: fltTcaLatencyLatencyHist41moBucket12Rate

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269014: fltTcaLatencyLatencyHist41qtrBucket12Rate

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269015: fltTcaLatencyLatencyHist41yearBucket12Rate

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269088: fltTcaLatencyLatencyHist45minBucket13Last

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269089: fltTcaLatencyLatencyHist415minBucket13Last

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269090: fltTcaLatencyLatencyHist41hBucket13Last

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269091: fltTcaLatencyLatencyHist41dBucket13Last

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269092: fltTcaLatencyLatencyHist41wBucket13Last

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269093: fltTcaLatencyLatencyHist41moBucket13Last

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269094: fltTcaLatencyLatencyHist41qtrBucket13Last

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269095: fltTcaLatencyLatencyHist41yearBucket13Last

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269104: fltTcaLatencyLatencyHist45minBucket13Cum

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269105: fltTcaLatencyLatencyHist415minBucket13Cum

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269106: fltTcaLatencyLatencyHist41hBucket13Cum

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269107: fltTcaLatencyLatencyHist41dBucket13Cum

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269108: fltTcaLatencyLatencyHist41wBucket13Cum

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269109: fltTcaLatencyLatencyHist41moBucket13Cum

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269110: fltTcaLatencyLatencyHist41qtrBucket13Cum

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269111: fltTcaLatencyLatencyHist41yearBucket13Cum

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269112: fltTcaLatencyLatencyHist45minBucket13Per

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269113: fltTcaLatencyLatencyHist415minBucket13Per

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269114: fltTcaLatencyLatencyHist41hBucket13Per

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269115: fltTcaLatencyLatencyHist41dBucket13Per

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269116: fltTcaLatencyLatencyHist41wBucket13Per

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269117: fltTcaLatencyLatencyHist41moBucket13Per

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269118: fltTcaLatencyLatencyHist41qtrBucket13Per

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269119: fltTcaLatencyLatencyHist41yearBucket13Per

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269120: fltTcaLatencyLatencyHist45minBucket13Min

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269121: fltTcaLatencyLatencyHist415minBucket13Min

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269122: fltTcaLatencyLatencyHist41hBucket13Min

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269123: fltTcaLatencyLatencyHist41dBucket13Min

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269124: fltTcaLatencyLatencyHist41wBucket13Min

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269125: fltTcaLatencyLatencyHist41moBucket13Min

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269126: fltTcaLatencyLatencyHist41qtrBucket13Min

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269127: fltTcaLatencyLatencyHist41yearBucket13Min

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269128: fltTcaLatencyLatencyHist45minBucket13Max

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269129: fltTcaLatencyLatencyHist415minBucket13Max

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269130: fltTcaLatencyLatencyHist41hBucket13Max

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269131: fltTcaLatencyLatencyHist41dBucket13Max

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269132: fltTcaLatencyLatencyHist41wBucket13Max

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269133: fltTcaLatencyLatencyHist41moBucket13Max

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269134: fltTcaLatencyLatencyHist41qtrBucket13Max

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269135: fltTcaLatencyLatencyHist41yearBucket13Max

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269136: fltTcaLatencyLatencyHist45minBucket13Avg

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269137: fltTcaLatencyLatencyHist415minBucket13Avg

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269138: fltTcaLatencyLatencyHist41hBucket13Avg

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269139: fltTcaLatencyLatencyHist41dBucket13Avg

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269140: fltTcaLatencyLatencyHist41wBucket13Avg

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269141: fltTcaLatencyLatencyHist41moBucket13Avg

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269142: fltTcaLatencyLatencyHist41qtrBucket13Avg

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269143: fltTcaLatencyLatencyHist41yearBucket13Avg

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269168: fltTcaLatencyLatencyHist45minBucket13Tr

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269169: fltTcaLatencyLatencyHist415minBucket13Tr

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269170: fltTcaLatencyLatencyHist41hBucket13Tr

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269171: fltTcaLatencyLatencyHist41dBucket13Tr

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269172: fltTcaLatencyLatencyHist41wBucket13Tr

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269173: fltTcaLatencyLatencyHist41moBucket13Tr

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269174: fltTcaLatencyLatencyHist41qtrBucket13Tr

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269175: fltTcaLatencyLatencyHist41yearBucket13Tr

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269176: fltTcaLatencyLatencyHist45minBucket13Rate

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269177: fltTcaLatencyLatencyHist415minBucket13Rate

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269178: fltTcaLatencyLatencyHist41hBucket13Rate

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269179: fltTcaLatencyLatencyHist41dBucket13Rate

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269180: fltTcaLatencyLatencyHist41wBucket13Rate

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269181: fltTcaLatencyLatencyHist41moBucket13Rate

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269182: fltTcaLatencyLatencyHist41qtrBucket13Rate

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269183: fltTcaLatencyLatencyHist41yearBucket13Rate

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269256: fltTcaLatencyLatencyHist55minBucket14Last

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269257: fltTcaLatencyLatencyHist515minBucket14Last

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269258: fltTcaLatencyLatencyHist51hBucket14Last

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269259: fltTcaLatencyLatencyHist51dBucket14Last

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269260: fltTcaLatencyLatencyHist51wBucket14Last

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269261: fltTcaLatencyLatencyHist51moBucket14Last

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269262: fltTcaLatencyLatencyHist51qtrBucket14Last

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269263: fltTcaLatencyLatencyHist51yearBucket14Last

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269272: fltTcaLatencyLatencyHist55minBucket14Cum

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269273: fltTcaLatencyLatencyHist515minBucket14Cum

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269274: fltTcaLatencyLatencyHist51hBucket14Cum

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269275: fltTcaLatencyLatencyHist51dBucket14Cum

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269276: fltTcaLatencyLatencyHist51wBucket14Cum

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269277: fltTcaLatencyLatencyHist51moBucket14Cum

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269278: fltTcaLatencyLatencyHist51qtrBucket14Cum

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269279: fltTcaLatencyLatencyHist51yearBucket14Cum

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269280: fltTcaLatencyLatencyHist55minBucket14Per

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269281: fltTcaLatencyLatencyHist515minBucket14Per

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269282: fltTcaLatencyLatencyHist51hBucket14Per

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269283: fltTcaLatencyLatencyHist51dBucket14Per

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269284: fltTcaLatencyLatencyHist51wBucket14Per

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269285: fltTcaLatencyLatencyHist51moBucket14Per

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269286: fltTcaLatencyLatencyHist51qtrBucket14Per

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269287: fltTcaLatencyLatencyHist51yearBucket14Per

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269288: fltTcaLatencyLatencyHist55minBucket14Min

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269289: fltTcaLatencyLatencyHist515minBucket14Min

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269290: fltTcaLatencyLatencyHist51hBucket14Min

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269291: fltTcaLatencyLatencyHist51dBucket14Min

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269292: fltTcaLatencyLatencyHist51wBucket14Min

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269293: fltTcaLatencyLatencyHist51moBucket14Min

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269294: fltTcaLatencyLatencyHist51qtrBucket14Min

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269295: fltTcaLatencyLatencyHist51yearBucket14Min

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269296: fltTcaLatencyLatencyHist55minBucket14Max

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269297: fltTcaLatencyLatencyHist515minBucket14Max

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269298: fltTcaLatencyLatencyHist51hBucket14Max

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269299: fltTcaLatencyLatencyHist51dBucket14Max

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269300: fltTcaLatencyLatencyHist51wBucket14Max

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269301: fltTcaLatencyLatencyHist51moBucket14Max

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269302: fltTcaLatencyLatencyHist51qtrBucket14Max

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269303: fltTcaLatencyLatencyHist51yearBucket14Max

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269304: fltTcaLatencyLatencyHist55minBucket14Avg

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269305: fltTcaLatencyLatencyHist515minBucket14Avg

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269306: fltTcaLatencyLatencyHist51hBucket14Avg

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269307: fltTcaLatencyLatencyHist51dBucket14Avg

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269308: fltTcaLatencyLatencyHist51wBucket14Avg

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269309: fltTcaLatencyLatencyHist51moBucket14Avg

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269310: fltTcaLatencyLatencyHist51qtrBucket14Avg

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269311: fltTcaLatencyLatencyHist51yearBucket14Avg

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269336: fltTcaLatencyLatencyHist55minBucket14Tr

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269337: fltTcaLatencyLatencyHist515minBucket14Tr

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269338: fltTcaLatencyLatencyHist51hBucket14Tr

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269339: fltTcaLatencyLatencyHist51dBucket14Tr

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269340: fltTcaLatencyLatencyHist51wBucket14Tr

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269341: fltTcaLatencyLatencyHist51moBucket14Tr

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269342: fltTcaLatencyLatencyHist51qtrBucket14Tr

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269343: fltTcaLatencyLatencyHist51yearBucket14Tr

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269344: fltTcaLatencyLatencyHist55minBucket14Rate

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269345: fltTcaLatencyLatencyHist515minBucket14Rate

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269346: fltTcaLatencyLatencyHist51hBucket14Rate

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269347: fltTcaLatencyLatencyHist51dBucket14Rate

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269348: fltTcaLatencyLatencyHist51wBucket14Rate

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269349: fltTcaLatencyLatencyHist51moBucket14Rate

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269350: fltTcaLatencyLatencyHist51qtrBucket14Rate

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269351: fltTcaLatencyLatencyHist51yearBucket14Rate

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2694: fltOpflexIDEpOperationalIssues

Severity: major

Explanation: This fault is raised when there is an issue with respect to the end point.

Recommended Action: If you see this fault, take the following actions:

1. Check the AEP configuration on the domain attached to this device. Make sure there are valid interfaces.

2. Check for any issues with the Port Channel/ VPC.

3. Check connectivity to the OpFlex device.

4. To restore, delete and re-add the OpFlex device.

5. Try restarting the device.

6. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F269424: fltTcaLatencyLatencyHist55minBucket15Last

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269425: fltTcaLatencyLatencyHist515minBucket15Last

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269426: fltTcaLatencyLatencyHist51hBucket15Last

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269427: fltTcaLatencyLatencyHist51dBucket15Last

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269428: fltTcaLatencyLatencyHist51wBucket15Last

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269429: fltTcaLatencyLatencyHist51moBucket15Last

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269430: fltTcaLatencyLatencyHist51qtrBucket15Last

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269431: fltTcaLatencyLatencyHist51yearBucket15Last

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269440: fltTcaLatencyLatencyHist55minBucket15Cum

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269441: fltTcaLatencyLatencyHist515minBucket15Cum

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269442: fltTcaLatencyLatencyHist51hBucket15Cum

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269443: fltTcaLatencyLatencyHist51dBucket15Cum

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269444: fltTcaLatencyLatencyHist51wBucket15Cum

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269445: fltTcaLatencyLatencyHist51moBucket15Cum

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269446: fltTcaLatencyLatencyHist51qtrBucket15Cum

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269447: fltTcaLatencyLatencyHist51yearBucket15Cum

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269448: fltTcaLatencyLatencyHist55minBucket15Per

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269449: fltTcaLatencyLatencyHist515minBucket15Per

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269450: fltTcaLatencyLatencyHist51hBucket15Per

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269451: fltTcaLatencyLatencyHist51dBucket15Per

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269452: fltTcaLatencyLatencyHist51wBucket15Per

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269453: fltTcaLatencyLatencyHist51moBucket15Per

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269454: fltTcaLatencyLatencyHist51qtrBucket15Per

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269455: fltTcaLatencyLatencyHist51yearBucket15Per

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269456: fltTcaLatencyLatencyHist55minBucket15Min

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269457: fltTcaLatencyLatencyHist515minBucket15Min

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269458: fltTcaLatencyLatencyHist51hBucket15Min

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269459: fltTcaLatencyLatencyHist51dBucket15Min

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269460: fltTcaLatencyLatencyHist51wBucket15Min

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269461: fltTcaLatencyLatencyHist51moBucket15Min

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269462: fltTcaLatencyLatencyHist51qtrBucket15Min

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269463: fltTcaLatencyLatencyHist51yearBucket15Min

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269464: fltTcaLatencyLatencyHist55minBucket15Max

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269465: fltTcaLatencyLatencyHist515minBucket15Max

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269466: fltTcaLatencyLatencyHist51hBucket15Max

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269467: fltTcaLatencyLatencyHist51dBucket15Max

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269468: fltTcaLatencyLatencyHist51wBucket15Max

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269469: fltTcaLatencyLatencyHist51moBucket15Max

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269470: fltTcaLatencyLatencyHist51qtrBucket15Max

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269471: fltTcaLatencyLatencyHist51yearBucket15Max

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269472: fltTcaLatencyLatencyHist55minBucket15Avg

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269473: fltTcaLatencyLatencyHist515minBucket15Avg

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269474: fltTcaLatencyLatencyHist51hBucket15Avg

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269475: fltTcaLatencyLatencyHist51dBucket15Avg

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269476: fltTcaLatencyLatencyHist51wBucket15Avg

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269477: fltTcaLatencyLatencyHist51moBucket15Avg

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269478: fltTcaLatencyLatencyHist51qtrBucket15Avg

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269479: fltTcaLatencyLatencyHist51yearBucket15Avg

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269504: fltTcaLatencyLatencyHist55minBucket15Tr

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269505: fltTcaLatencyLatencyHist515minBucket15Tr

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269506: fltTcaLatencyLatencyHist51hBucket15Tr

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269507: fltTcaLatencyLatencyHist51dBucket15Tr

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269508: fltTcaLatencyLatencyHist51wBucket15Tr

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269509: fltTcaLatencyLatencyHist51moBucket15Tr

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269510: fltTcaLatencyLatencyHist51qtrBucket15Tr

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269511: fltTcaLatencyLatencyHist51yearBucket15Tr

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269512: fltTcaLatencyLatencyHist55minBucket15Rate

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269513: fltTcaLatencyLatencyHist515minBucket15Rate

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269514: fltTcaLatencyLatencyHist51hBucket15Rate

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269515: fltTcaLatencyLatencyHist51dBucket15Rate

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269516: fltTcaLatencyLatencyHist51wBucket15Rate

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269517: fltTcaLatencyLatencyHist51moBucket15Rate

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269518: fltTcaLatencyLatencyHist51qtrBucket15Rate

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269519: fltTcaLatencyLatencyHist51yearBucket15Rate

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269592: fltTcaLatencyLatencyHist55minTotalBucket0Last

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269593: fltTcaLatencyLatencyHist515minTotalBucket0Last

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269594: fltTcaLatencyLatencyHist51hTotalBucket0Last

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269595: fltTcaLatencyLatencyHist51dTotalBucket0Last

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269596: fltTcaLatencyLatencyHist51wTotalBucket0Last

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269597: fltTcaLatencyLatencyHist51moTotalBucket0Last

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269598: fltTcaLatencyLatencyHist51qtrTotalBucket0Last

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269599: fltTcaLatencyLatencyHist51yearTotalBucket0Last

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269608: fltTcaLatencyLatencyHist55minTotalBucket0Cum

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269609: fltTcaLatencyLatencyHist515minTotalBucket0Cum

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269610: fltTcaLatencyLatencyHist51hTotalBucket0Cum

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269611: fltTcaLatencyLatencyHist51dTotalBucket0Cum

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269612: fltTcaLatencyLatencyHist51wTotalBucket0Cum

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269613: fltTcaLatencyLatencyHist51moTotalBucket0Cum

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269614: fltTcaLatencyLatencyHist51qtrTotalBucket0Cum

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269615: fltTcaLatencyLatencyHist51yearTotalBucket0Cum

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269616: fltTcaLatencyLatencyHist55minTotalBucket0Per

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269617: fltTcaLatencyLatencyHist515minTotalBucket0Per

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269618: fltTcaLatencyLatencyHist51hTotalBucket0Per

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269619: fltTcaLatencyLatencyHist51dTotalBucket0Per

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269620: fltTcaLatencyLatencyHist51wTotalBucket0Per

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269621: fltTcaLatencyLatencyHist51moTotalBucket0Per

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269622: fltTcaLatencyLatencyHist51qtrTotalBucket0Per

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269623: fltTcaLatencyLatencyHist51yearTotalBucket0Per

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269624: fltTcaLatencyLatencyHist55minTotalBucket0Min

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269625: fltTcaLatencyLatencyHist515minTotalBucket0Min

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269626: fltTcaLatencyLatencyHist51hTotalBucket0Min

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269627: fltTcaLatencyLatencyHist51dTotalBucket0Min

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269628: fltTcaLatencyLatencyHist51wTotalBucket0Min

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269629: fltTcaLatencyLatencyHist51moTotalBucket0Min

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269630: fltTcaLatencyLatencyHist51qtrTotalBucket0Min

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269631: fltTcaLatencyLatencyHist51yearTotalBucket0Min

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269632: fltTcaLatencyLatencyHist55minTotalBucket0Max

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269633: fltTcaLatencyLatencyHist515minTotalBucket0Max

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269634: fltTcaLatencyLatencyHist51hTotalBucket0Max

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269635: fltTcaLatencyLatencyHist51dTotalBucket0Max

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269636: fltTcaLatencyLatencyHist51wTotalBucket0Max

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269637: fltTcaLatencyLatencyHist51moTotalBucket0Max

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269638: fltTcaLatencyLatencyHist51qtrTotalBucket0Max

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269639: fltTcaLatencyLatencyHist51yearTotalBucket0Max

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269640: fltTcaLatencyLatencyHist55minTotalBucket0Avg

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269641: fltTcaLatencyLatencyHist515minTotalBucket0Avg

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269642: fltTcaLatencyLatencyHist51hTotalBucket0Avg

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269643: fltTcaLatencyLatencyHist51dTotalBucket0Avg

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269644: fltTcaLatencyLatencyHist51wTotalBucket0Avg

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269645: fltTcaLatencyLatencyHist51moTotalBucket0Avg

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269646: fltTcaLatencyLatencyHist51qtrTotalBucket0Avg

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269647: fltTcaLatencyLatencyHist51yearTotalBucket0Avg

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269672: fltTcaLatencyLatencyHist55minTotalBucket0Tr

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269673: fltTcaLatencyLatencyHist515minTotalBucket0Tr

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269674: fltTcaLatencyLatencyHist51hTotalBucket0Tr

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269675: fltTcaLatencyLatencyHist51dTotalBucket0Tr

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269676: fltTcaLatencyLatencyHist51wTotalBucket0Tr

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269677: fltTcaLatencyLatencyHist51moTotalBucket0Tr

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269678: fltTcaLatencyLatencyHist51qtrTotalBucket0Tr

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269679: fltTcaLatencyLatencyHist51yearTotalBucket0Tr

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269680: fltTcaLatencyLatencyHist55minTotalBucket0Rate

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269681: fltTcaLatencyLatencyHist515minTotalBucket0Rate

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269682: fltTcaLatencyLatencyHist51hTotalBucket0Rate

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269683: fltTcaLatencyLatencyHist51dTotalBucket0Rate

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269684: fltTcaLatencyLatencyHist51wTotalBucket0Rate

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269685: fltTcaLatencyLatencyHist51moTotalBucket0Rate

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269686: fltTcaLatencyLatencyHist51qtrTotalBucket0Rate

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269687: fltTcaLatencyLatencyHist51yearTotalBucket0Rate

Severity: variable

Explanation: This fault is caused by "packets within the 1st bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 1st bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269760: fltTcaLatencyLatencyHist55minTotalBucket1Last

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269761: fltTcaLatencyLatencyHist515minTotalBucket1Last

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269762: fltTcaLatencyLatencyHist51hTotalBucket1Last

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269763: fltTcaLatencyLatencyHist51dTotalBucket1Last

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269764: fltTcaLatencyLatencyHist51wTotalBucket1Last

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269765: fltTcaLatencyLatencyHist51moTotalBucket1Last

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269766: fltTcaLatencyLatencyHist51qtrTotalBucket1Last

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269767: fltTcaLatencyLatencyHist51yearTotalBucket1Last

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269776: fltTcaLatencyLatencyHist55minTotalBucket1Cum

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269777: fltTcaLatencyLatencyHist515minTotalBucket1Cum

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269778: fltTcaLatencyLatencyHist51hTotalBucket1Cum

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269779: fltTcaLatencyLatencyHist51dTotalBucket1Cum

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269780: fltTcaLatencyLatencyHist51wTotalBucket1Cum

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269781: fltTcaLatencyLatencyHist51moTotalBucket1Cum

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269782: fltTcaLatencyLatencyHist51qtrTotalBucket1Cum

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269783: fltTcaLatencyLatencyHist51yearTotalBucket1Cum

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269784: fltTcaLatencyLatencyHist55minTotalBucket1Per

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269785: fltTcaLatencyLatencyHist515minTotalBucket1Per

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269786: fltTcaLatencyLatencyHist51hTotalBucket1Per

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269787: fltTcaLatencyLatencyHist51dTotalBucket1Per

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269788: fltTcaLatencyLatencyHist51wTotalBucket1Per

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269789: fltTcaLatencyLatencyHist51moTotalBucket1Per

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269790: fltTcaLatencyLatencyHist51qtrTotalBucket1Per

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269791: fltTcaLatencyLatencyHist51yearTotalBucket1Per

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269792: fltTcaLatencyLatencyHist55minTotalBucket1Min

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269793: fltTcaLatencyLatencyHist515minTotalBucket1Min

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269794: fltTcaLatencyLatencyHist51hTotalBucket1Min

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269795: fltTcaLatencyLatencyHist51dTotalBucket1Min

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269796: fltTcaLatencyLatencyHist51wTotalBucket1Min

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269797: fltTcaLatencyLatencyHist51moTotalBucket1Min

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269798: fltTcaLatencyLatencyHist51qtrTotalBucket1Min

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269799: fltTcaLatencyLatencyHist51yearTotalBucket1Min

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2698: fltFvRsSecInheritedResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F269800: fltTcaLatencyLatencyHist55minTotalBucket1Max

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269801: fltTcaLatencyLatencyHist515minTotalBucket1Max

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269802: fltTcaLatencyLatencyHist51hTotalBucket1Max

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269803: fltTcaLatencyLatencyHist51dTotalBucket1Max

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269804: fltTcaLatencyLatencyHist51wTotalBucket1Max

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269805: fltTcaLatencyLatencyHist51moTotalBucket1Max

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269806: fltTcaLatencyLatencyHist51qtrTotalBucket1Max

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269807: fltTcaLatencyLatencyHist51yearTotalBucket1Max

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269808: fltTcaLatencyLatencyHist55minTotalBucket1Avg

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269809: fltTcaLatencyLatencyHist515minTotalBucket1Avg

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269810: fltTcaLatencyLatencyHist51hTotalBucket1Avg

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269811: fltTcaLatencyLatencyHist51dTotalBucket1Avg

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269812: fltTcaLatencyLatencyHist51wTotalBucket1Avg

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269813: fltTcaLatencyLatencyHist51moTotalBucket1Avg

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269814: fltTcaLatencyLatencyHist51qtrTotalBucket1Avg

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269815: fltTcaLatencyLatencyHist51yearTotalBucket1Avg

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269840: fltTcaLatencyLatencyHist55minTotalBucket1Tr

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269841: fltTcaLatencyLatencyHist515minTotalBucket1Tr

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269842: fltTcaLatencyLatencyHist51hTotalBucket1Tr

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269843: fltTcaLatencyLatencyHist51dTotalBucket1Tr

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269844: fltTcaLatencyLatencyHist51wTotalBucket1Tr

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269845: fltTcaLatencyLatencyHist51moTotalBucket1Tr

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269846: fltTcaLatencyLatencyHist51qtrTotalBucket1Tr

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269847: fltTcaLatencyLatencyHist51yearTotalBucket1Tr

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269848: fltTcaLatencyLatencyHist55minTotalBucket1Rate

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269849: fltTcaLatencyLatencyHist515minTotalBucket1Rate

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269850: fltTcaLatencyLatencyHist51hTotalBucket1Rate

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269851: fltTcaLatencyLatencyHist51dTotalBucket1Rate

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269852: fltTcaLatencyLatencyHist51wTotalBucket1Rate

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269853: fltTcaLatencyLatencyHist51moTotalBucket1Rate

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269854: fltTcaLatencyLatencyHist51qtrTotalBucket1Rate

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269855: fltTcaLatencyLatencyHist51yearTotalBucket1Rate

Severity: variable

Explanation: This fault is caused by "packets within the 2nd bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 2nd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2699: fltRecoveryStStShBusyPolicyMgrShard

Severity: major

Explanation: This fault occurs when steady state is not reached by policy manager, with respect to policy updates, for reconciliation to start.

Recommended Action: Check policy manager for continuous policy updates

1. If you are still seeing this, create tech-support ticket and contact Cisco TAC

F269928: fltTcaLatencyLatencyHist65minTotalBucket2Last

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269929: fltTcaLatencyLatencyHist615minTotalBucket2Last

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269930: fltTcaLatencyLatencyHist61hTotalBucket2Last

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269931: fltTcaLatencyLatencyHist61dTotalBucket2Last

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269932: fltTcaLatencyLatencyHist61wTotalBucket2Last

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269933: fltTcaLatencyLatencyHist61moTotalBucket2Last

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269934: fltTcaLatencyLatencyHist61qtrTotalBucket2Last

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269935: fltTcaLatencyLatencyHist61yearTotalBucket2Last

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269944: fltTcaLatencyLatencyHist65minTotalBucket2Cum

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269945: fltTcaLatencyLatencyHist615minTotalBucket2Cum

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269946: fltTcaLatencyLatencyHist61hTotalBucket2Cum

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269947: fltTcaLatencyLatencyHist61dTotalBucket2Cum

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269948: fltTcaLatencyLatencyHist61wTotalBucket2Cum

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269949: fltTcaLatencyLatencyHist61moTotalBucket2Cum

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269950: fltTcaLatencyLatencyHist61qtrTotalBucket2Cum

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269951: fltTcaLatencyLatencyHist61yearTotalBucket2Cum

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269952: fltTcaLatencyLatencyHist65minTotalBucket2Per

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269953: fltTcaLatencyLatencyHist615minTotalBucket2Per

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269954: fltTcaLatencyLatencyHist61hTotalBucket2Per

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269955: fltTcaLatencyLatencyHist61dTotalBucket2Per

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269956: fltTcaLatencyLatencyHist61wTotalBucket2Per

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269957: fltTcaLatencyLatencyHist61moTotalBucket2Per

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269958: fltTcaLatencyLatencyHist61qtrTotalBucket2Per

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269959: fltTcaLatencyLatencyHist61yearTotalBucket2Per

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269960: fltTcaLatencyLatencyHist65minTotalBucket2Min

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269961: fltTcaLatencyLatencyHist615minTotalBucket2Min

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269962: fltTcaLatencyLatencyHist61hTotalBucket2Min

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269963: fltTcaLatencyLatencyHist61dTotalBucket2Min

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269964: fltTcaLatencyLatencyHist61wTotalBucket2Min

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269965: fltTcaLatencyLatencyHist61moTotalBucket2Min

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269966: fltTcaLatencyLatencyHist61qtrTotalBucket2Min

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269967: fltTcaLatencyLatencyHist61yearTotalBucket2Min

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269968: fltTcaLatencyLatencyHist65minTotalBucket2Max

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269969: fltTcaLatencyLatencyHist615minTotalBucket2Max

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269970: fltTcaLatencyLatencyHist61hTotalBucket2Max

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269971: fltTcaLatencyLatencyHist61dTotalBucket2Max

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269972: fltTcaLatencyLatencyHist61wTotalBucket2Max

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269973: fltTcaLatencyLatencyHist61moTotalBucket2Max

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269974: fltTcaLatencyLatencyHist61qtrTotalBucket2Max

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269975: fltTcaLatencyLatencyHist61yearTotalBucket2Max

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269976: fltTcaLatencyLatencyHist65minTotalBucket2Avg

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269977: fltTcaLatencyLatencyHist615minTotalBucket2Avg

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269978: fltTcaLatencyLatencyHist61hTotalBucket2Avg

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269979: fltTcaLatencyLatencyHist61dTotalBucket2Avg

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269980: fltTcaLatencyLatencyHist61wTotalBucket2Avg

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269981: fltTcaLatencyLatencyHist61moTotalBucket2Avg

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269982: fltTcaLatencyLatencyHist61qtrTotalBucket2Avg

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F269983: fltTcaLatencyLatencyHist61yearTotalBucket2Avg

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270008: fltTcaLatencyLatencyHist65minTotalBucket2Tr

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270009: fltTcaLatencyLatencyHist615minTotalBucket2Tr

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270010: fltTcaLatencyLatencyHist61hTotalBucket2Tr

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270011: fltTcaLatencyLatencyHist61dTotalBucket2Tr

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270012: fltTcaLatencyLatencyHist61wTotalBucket2Tr

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270013: fltTcaLatencyLatencyHist61moTotalBucket2Tr

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270014: fltTcaLatencyLatencyHist61qtrTotalBucket2Tr

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270015: fltTcaLatencyLatencyHist61yearTotalBucket2Tr

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270016: fltTcaLatencyLatencyHist65minTotalBucket2Rate

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270017: fltTcaLatencyLatencyHist615minTotalBucket2Rate

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270018: fltTcaLatencyLatencyHist61hTotalBucket2Rate

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270019: fltTcaLatencyLatencyHist61dTotalBucket2Rate

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270020: fltTcaLatencyLatencyHist61wTotalBucket2Rate

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270021: fltTcaLatencyLatencyHist61moTotalBucket2Rate

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270022: fltTcaLatencyLatencyHist61qtrTotalBucket2Rate

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270023: fltTcaLatencyLatencyHist61yearTotalBucket2Rate

Severity: variable

Explanation: This fault is caused by "packets within the 3rd bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 3rd bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270096: fltTcaLatencyLatencyHist65minTotalBucket3Last

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270097: fltTcaLatencyLatencyHist615minTotalBucket3Last

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270098: fltTcaLatencyLatencyHist61hTotalBucket3Last

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270099: fltTcaLatencyLatencyHist61dTotalBucket3Last

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270100: fltTcaLatencyLatencyHist61wTotalBucket3Last

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270101: fltTcaLatencyLatencyHist61moTotalBucket3Last

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270102: fltTcaLatencyLatencyHist61qtrTotalBucket3Last

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270103: fltTcaLatencyLatencyHist61yearTotalBucket3Last

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270112: fltTcaLatencyLatencyHist65minTotalBucket3Cum

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270113: fltTcaLatencyLatencyHist615minTotalBucket3Cum

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270114: fltTcaLatencyLatencyHist61hTotalBucket3Cum

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270115: fltTcaLatencyLatencyHist61dTotalBucket3Cum

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270116: fltTcaLatencyLatencyHist61wTotalBucket3Cum

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270117: fltTcaLatencyLatencyHist61moTotalBucket3Cum

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270118: fltTcaLatencyLatencyHist61qtrTotalBucket3Cum

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270119: fltTcaLatencyLatencyHist61yearTotalBucket3Cum

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270120: fltTcaLatencyLatencyHist65minTotalBucket3Per

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270121: fltTcaLatencyLatencyHist615minTotalBucket3Per

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270122: fltTcaLatencyLatencyHist61hTotalBucket3Per

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270123: fltTcaLatencyLatencyHist61dTotalBucket3Per

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270124: fltTcaLatencyLatencyHist61wTotalBucket3Per

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270125: fltTcaLatencyLatencyHist61moTotalBucket3Per

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270126: fltTcaLatencyLatencyHist61qtrTotalBucket3Per

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270127: fltTcaLatencyLatencyHist61yearTotalBucket3Per

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270128: fltTcaLatencyLatencyHist65minTotalBucket3Min

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270129: fltTcaLatencyLatencyHist615minTotalBucket3Min

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270130: fltTcaLatencyLatencyHist61hTotalBucket3Min

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270131: fltTcaLatencyLatencyHist61dTotalBucket3Min

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270132: fltTcaLatencyLatencyHist61wTotalBucket3Min

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270133: fltTcaLatencyLatencyHist61moTotalBucket3Min

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270134: fltTcaLatencyLatencyHist61qtrTotalBucket3Min

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270135: fltTcaLatencyLatencyHist61yearTotalBucket3Min

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270136: fltTcaLatencyLatencyHist65minTotalBucket3Max

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270137: fltTcaLatencyLatencyHist615minTotalBucket3Max

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270138: fltTcaLatencyLatencyHist61hTotalBucket3Max

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270139: fltTcaLatencyLatencyHist61dTotalBucket3Max

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270140: fltTcaLatencyLatencyHist61wTotalBucket3Max

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270141: fltTcaLatencyLatencyHist61moTotalBucket3Max

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270142: fltTcaLatencyLatencyHist61qtrTotalBucket3Max

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270143: fltTcaLatencyLatencyHist61yearTotalBucket3Max

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270144: fltTcaLatencyLatencyHist65minTotalBucket3Avg

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270145: fltTcaLatencyLatencyHist615minTotalBucket3Avg

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270146: fltTcaLatencyLatencyHist61hTotalBucket3Avg

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270147: fltTcaLatencyLatencyHist61dTotalBucket3Avg

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270148: fltTcaLatencyLatencyHist61wTotalBucket3Avg

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270149: fltTcaLatencyLatencyHist61moTotalBucket3Avg

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270150: fltTcaLatencyLatencyHist61qtrTotalBucket3Avg

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270151: fltTcaLatencyLatencyHist61yearTotalBucket3Avg

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270176: fltTcaLatencyLatencyHist65minTotalBucket3Tr

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270177: fltTcaLatencyLatencyHist615minTotalBucket3Tr

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270178: fltTcaLatencyLatencyHist61hTotalBucket3Tr

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270179: fltTcaLatencyLatencyHist61dTotalBucket3Tr

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270180: fltTcaLatencyLatencyHist61wTotalBucket3Tr

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270181: fltTcaLatencyLatencyHist61moTotalBucket3Tr

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270182: fltTcaLatencyLatencyHist61qtrTotalBucket3Tr

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270183: fltTcaLatencyLatencyHist61yearTotalBucket3Tr

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270184: fltTcaLatencyLatencyHist65minTotalBucket3Rate

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270185: fltTcaLatencyLatencyHist615minTotalBucket3Rate

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270186: fltTcaLatencyLatencyHist61hTotalBucket3Rate

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270187: fltTcaLatencyLatencyHist61dTotalBucket3Rate

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270188: fltTcaLatencyLatencyHist61wTotalBucket3Rate

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270189: fltTcaLatencyLatencyHist61moTotalBucket3Rate

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270190: fltTcaLatencyLatencyHist61qtrTotalBucket3Rate

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270191: fltTcaLatencyLatencyHist61yearTotalBucket3Rate

Severity: variable

Explanation: This fault is caused by "packets within the 4th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 4th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270264: fltTcaLatencyLatencyHist65minTotalBucket4Last

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270265: fltTcaLatencyLatencyHist615minTotalBucket4Last

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270266: fltTcaLatencyLatencyHist61hTotalBucket4Last

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270267: fltTcaLatencyLatencyHist61dTotalBucket4Last

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270268: fltTcaLatencyLatencyHist61wTotalBucket4Last

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270269: fltTcaLatencyLatencyHist61moTotalBucket4Last

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270270: fltTcaLatencyLatencyHist61qtrTotalBucket4Last

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270271: fltTcaLatencyLatencyHist61yearTotalBucket4Last

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270280: fltTcaLatencyLatencyHist65minTotalBucket4Cum

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270281: fltTcaLatencyLatencyHist615minTotalBucket4Cum

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270282: fltTcaLatencyLatencyHist61hTotalBucket4Cum

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270283: fltTcaLatencyLatencyHist61dTotalBucket4Cum

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270284: fltTcaLatencyLatencyHist61wTotalBucket4Cum

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270285: fltTcaLatencyLatencyHist61moTotalBucket4Cum

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270286: fltTcaLatencyLatencyHist61qtrTotalBucket4Cum

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270287: fltTcaLatencyLatencyHist61yearTotalBucket4Cum

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270288: fltTcaLatencyLatencyHist65minTotalBucket4Per

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270289: fltTcaLatencyLatencyHist615minTotalBucket4Per

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270290: fltTcaLatencyLatencyHist61hTotalBucket4Per

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270291: fltTcaLatencyLatencyHist61dTotalBucket4Per

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270292: fltTcaLatencyLatencyHist61wTotalBucket4Per

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270293: fltTcaLatencyLatencyHist61moTotalBucket4Per

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270294: fltTcaLatencyLatencyHist61qtrTotalBucket4Per

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270295: fltTcaLatencyLatencyHist61yearTotalBucket4Per

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270296: fltTcaLatencyLatencyHist65minTotalBucket4Min

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270297: fltTcaLatencyLatencyHist615minTotalBucket4Min

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270298: fltTcaLatencyLatencyHist61hTotalBucket4Min

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270299: fltTcaLatencyLatencyHist61dTotalBucket4Min

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270300: fltTcaLatencyLatencyHist61wTotalBucket4Min

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270301: fltTcaLatencyLatencyHist61moTotalBucket4Min

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270302: fltTcaLatencyLatencyHist61qtrTotalBucket4Min

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270303: fltTcaLatencyLatencyHist61yearTotalBucket4Min

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270304: fltTcaLatencyLatencyHist65minTotalBucket4Max

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270305: fltTcaLatencyLatencyHist615minTotalBucket4Max

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270306: fltTcaLatencyLatencyHist61hTotalBucket4Max

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270307: fltTcaLatencyLatencyHist61dTotalBucket4Max

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270308: fltTcaLatencyLatencyHist61wTotalBucket4Max

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270309: fltTcaLatencyLatencyHist61moTotalBucket4Max

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270310: fltTcaLatencyLatencyHist61qtrTotalBucket4Max

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270311: fltTcaLatencyLatencyHist61yearTotalBucket4Max

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270312: fltTcaLatencyLatencyHist65minTotalBucket4Avg

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270313: fltTcaLatencyLatencyHist615minTotalBucket4Avg

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270314: fltTcaLatencyLatencyHist61hTotalBucket4Avg

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270315: fltTcaLatencyLatencyHist61dTotalBucket4Avg

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270316: fltTcaLatencyLatencyHist61wTotalBucket4Avg

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270317: fltTcaLatencyLatencyHist61moTotalBucket4Avg

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270318: fltTcaLatencyLatencyHist61qtrTotalBucket4Avg

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270319: fltTcaLatencyLatencyHist61yearTotalBucket4Avg

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270344: fltTcaLatencyLatencyHist65minTotalBucket4Tr

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270345: fltTcaLatencyLatencyHist615minTotalBucket4Tr

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270346: fltTcaLatencyLatencyHist61hTotalBucket4Tr

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270347: fltTcaLatencyLatencyHist61dTotalBucket4Tr

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270348: fltTcaLatencyLatencyHist61wTotalBucket4Tr

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270349: fltTcaLatencyLatencyHist61moTotalBucket4Tr

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270350: fltTcaLatencyLatencyHist61qtrTotalBucket4Tr

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270351: fltTcaLatencyLatencyHist61yearTotalBucket4Tr

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270352: fltTcaLatencyLatencyHist65minTotalBucket4Rate

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270353: fltTcaLatencyLatencyHist615minTotalBucket4Rate

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270354: fltTcaLatencyLatencyHist61hTotalBucket4Rate

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270355: fltTcaLatencyLatencyHist61dTotalBucket4Rate

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270356: fltTcaLatencyLatencyHist61wTotalBucket4Rate

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270357: fltTcaLatencyLatencyHist61moTotalBucket4Rate

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270358: fltTcaLatencyLatencyHist61qtrTotalBucket4Rate

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270359: fltTcaLatencyLatencyHist61yearTotalBucket4Rate

Severity: variable

Explanation: This fault is caused by "packets within the 5th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 5th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270432: fltTcaLatencyLatencyHist65minTotalBucket5Last

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270433: fltTcaLatencyLatencyHist615minTotalBucket5Last

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270434: fltTcaLatencyLatencyHist61hTotalBucket5Last

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270435: fltTcaLatencyLatencyHist61dTotalBucket5Last

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270436: fltTcaLatencyLatencyHist61wTotalBucket5Last

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270437: fltTcaLatencyLatencyHist61moTotalBucket5Last

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270438: fltTcaLatencyLatencyHist61qtrTotalBucket5Last

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270439: fltTcaLatencyLatencyHist61yearTotalBucket5Last

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270448: fltTcaLatencyLatencyHist65minTotalBucket5Cum

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270449: fltTcaLatencyLatencyHist615minTotalBucket5Cum

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270450: fltTcaLatencyLatencyHist61hTotalBucket5Cum

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270451: fltTcaLatencyLatencyHist61dTotalBucket5Cum

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270452: fltTcaLatencyLatencyHist61wTotalBucket5Cum

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270453: fltTcaLatencyLatencyHist61moTotalBucket5Cum

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270454: fltTcaLatencyLatencyHist61qtrTotalBucket5Cum

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270455: fltTcaLatencyLatencyHist61yearTotalBucket5Cum

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270456: fltTcaLatencyLatencyHist65minTotalBucket5Per

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270457: fltTcaLatencyLatencyHist615minTotalBucket5Per

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270458: fltTcaLatencyLatencyHist61hTotalBucket5Per

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270459: fltTcaLatencyLatencyHist61dTotalBucket5Per

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270460: fltTcaLatencyLatencyHist61wTotalBucket5Per

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270461: fltTcaLatencyLatencyHist61moTotalBucket5Per

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270462: fltTcaLatencyLatencyHist61qtrTotalBucket5Per

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270463: fltTcaLatencyLatencyHist61yearTotalBucket5Per

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270464: fltTcaLatencyLatencyHist65minTotalBucket5Min

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270465: fltTcaLatencyLatencyHist615minTotalBucket5Min

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270466: fltTcaLatencyLatencyHist61hTotalBucket5Min

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270467: fltTcaLatencyLatencyHist61dTotalBucket5Min

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270468: fltTcaLatencyLatencyHist61wTotalBucket5Min

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270469: fltTcaLatencyLatencyHist61moTotalBucket5Min

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270470: fltTcaLatencyLatencyHist61qtrTotalBucket5Min

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270471: fltTcaLatencyLatencyHist61yearTotalBucket5Min

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270472: fltTcaLatencyLatencyHist65minTotalBucket5Max

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270473: fltTcaLatencyLatencyHist615minTotalBucket5Max

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270474: fltTcaLatencyLatencyHist61hTotalBucket5Max

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270475: fltTcaLatencyLatencyHist61dTotalBucket5Max

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270476: fltTcaLatencyLatencyHist61wTotalBucket5Max

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270477: fltTcaLatencyLatencyHist61moTotalBucket5Max

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270478: fltTcaLatencyLatencyHist61qtrTotalBucket5Max

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270479: fltTcaLatencyLatencyHist61yearTotalBucket5Max

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270480: fltTcaLatencyLatencyHist65minTotalBucket5Avg

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270481: fltTcaLatencyLatencyHist615minTotalBucket5Avg

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270482: fltTcaLatencyLatencyHist61hTotalBucket5Avg

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270483: fltTcaLatencyLatencyHist61dTotalBucket5Avg

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270484: fltTcaLatencyLatencyHist61wTotalBucket5Avg

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270485: fltTcaLatencyLatencyHist61moTotalBucket5Avg

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270486: fltTcaLatencyLatencyHist61qtrTotalBucket5Avg

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270487: fltTcaLatencyLatencyHist61yearTotalBucket5Avg

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2705: fltVpcIfIfImpaired

Severity: major

Explanation: This fault occurs when vpc interface goes down while peer interface is up.

Recommended Action: Please verify the port connectivity.

F270512: fltTcaLatencyLatencyHist65minTotalBucket5Tr

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270513: fltTcaLatencyLatencyHist615minTotalBucket5Tr

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270514: fltTcaLatencyLatencyHist61hTotalBucket5Tr

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270515: fltTcaLatencyLatencyHist61dTotalBucket5Tr

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270516: fltTcaLatencyLatencyHist61wTotalBucket5Tr

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270517: fltTcaLatencyLatencyHist61moTotalBucket5Tr

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270518: fltTcaLatencyLatencyHist61qtrTotalBucket5Tr

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270519: fltTcaLatencyLatencyHist61yearTotalBucket5Tr

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270520: fltTcaLatencyLatencyHist65minTotalBucket5Rate

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270521: fltTcaLatencyLatencyHist615minTotalBucket5Rate

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270522: fltTcaLatencyLatencyHist61hTotalBucket5Rate

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270523: fltTcaLatencyLatencyHist61dTotalBucket5Rate

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270524: fltTcaLatencyLatencyHist61wTotalBucket5Rate

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270525: fltTcaLatencyLatencyHist61moTotalBucket5Rate

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270526: fltTcaLatencyLatencyHist61qtrTotalBucket5Rate

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270527: fltTcaLatencyLatencyHist61yearTotalBucket5Rate

Severity: variable

Explanation: This fault is caused by "packets within the 6th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 6th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270600: fltTcaLatencyLatencyHist75minTotalBucket6Last

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270601: fltTcaLatencyLatencyHist715minTotalBucket6Last

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270602: fltTcaLatencyLatencyHist71hTotalBucket6Last

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270603: fltTcaLatencyLatencyHist71dTotalBucket6Last

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270604: fltTcaLatencyLatencyHist71wTotalBucket6Last

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270605: fltTcaLatencyLatencyHist71moTotalBucket6Last

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270606: fltTcaLatencyLatencyHist71qtrTotalBucket6Last

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270607: fltTcaLatencyLatencyHist71yearTotalBucket6Last

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270616: fltTcaLatencyLatencyHist75minTotalBucket6Cum

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270617: fltTcaLatencyLatencyHist715minTotalBucket6Cum

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270618: fltTcaLatencyLatencyHist71hTotalBucket6Cum

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270619: fltTcaLatencyLatencyHist71dTotalBucket6Cum

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270620: fltTcaLatencyLatencyHist71wTotalBucket6Cum

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270621: fltTcaLatencyLatencyHist71moTotalBucket6Cum

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270622: fltTcaLatencyLatencyHist71qtrTotalBucket6Cum

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270623: fltTcaLatencyLatencyHist71yearTotalBucket6Cum

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270624: fltTcaLatencyLatencyHist75minTotalBucket6Per

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270625: fltTcaLatencyLatencyHist715minTotalBucket6Per

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270626: fltTcaLatencyLatencyHist71hTotalBucket6Per

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270627: fltTcaLatencyLatencyHist71dTotalBucket6Per

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270628: fltTcaLatencyLatencyHist71wTotalBucket6Per

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270629: fltTcaLatencyLatencyHist71moTotalBucket6Per

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270630: fltTcaLatencyLatencyHist71qtrTotalBucket6Per

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270631: fltTcaLatencyLatencyHist71yearTotalBucket6Per

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270632: fltTcaLatencyLatencyHist75minTotalBucket6Min

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270633: fltTcaLatencyLatencyHist715minTotalBucket6Min

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270634: fltTcaLatencyLatencyHist71hTotalBucket6Min

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270635: fltTcaLatencyLatencyHist71dTotalBucket6Min

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270636: fltTcaLatencyLatencyHist71wTotalBucket6Min

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270637: fltTcaLatencyLatencyHist71moTotalBucket6Min

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270638: fltTcaLatencyLatencyHist71qtrTotalBucket6Min

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270639: fltTcaLatencyLatencyHist71yearTotalBucket6Min

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270640: fltTcaLatencyLatencyHist75minTotalBucket6Max

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270641: fltTcaLatencyLatencyHist715minTotalBucket6Max

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270642: fltTcaLatencyLatencyHist71hTotalBucket6Max

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270643: fltTcaLatencyLatencyHist71dTotalBucket6Max

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270644: fltTcaLatencyLatencyHist71wTotalBucket6Max

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270645: fltTcaLatencyLatencyHist71moTotalBucket6Max

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270646: fltTcaLatencyLatencyHist71qtrTotalBucket6Max

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270647: fltTcaLatencyLatencyHist71yearTotalBucket6Max

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270648: fltTcaLatencyLatencyHist75minTotalBucket6Avg

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270649: fltTcaLatencyLatencyHist715minTotalBucket6Avg

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270650: fltTcaLatencyLatencyHist71hTotalBucket6Avg

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270651: fltTcaLatencyLatencyHist71dTotalBucket6Avg

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270652: fltTcaLatencyLatencyHist71wTotalBucket6Avg

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270653: fltTcaLatencyLatencyHist71moTotalBucket6Avg

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270654: fltTcaLatencyLatencyHist71qtrTotalBucket6Avg

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270655: fltTcaLatencyLatencyHist71yearTotalBucket6Avg

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270680: fltTcaLatencyLatencyHist75minTotalBucket6Tr

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270681: fltTcaLatencyLatencyHist715minTotalBucket6Tr

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270682: fltTcaLatencyLatencyHist71hTotalBucket6Tr

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270683: fltTcaLatencyLatencyHist71dTotalBucket6Tr

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270684: fltTcaLatencyLatencyHist71wTotalBucket6Tr

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270685: fltTcaLatencyLatencyHist71moTotalBucket6Tr

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270686: fltTcaLatencyLatencyHist71qtrTotalBucket6Tr

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270687: fltTcaLatencyLatencyHist71yearTotalBucket6Tr

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270688: fltTcaLatencyLatencyHist75minTotalBucket6Rate

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270689: fltTcaLatencyLatencyHist715minTotalBucket6Rate

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270690: fltTcaLatencyLatencyHist71hTotalBucket6Rate

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270691: fltTcaLatencyLatencyHist71dTotalBucket6Rate

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270692: fltTcaLatencyLatencyHist71wTotalBucket6Rate

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270693: fltTcaLatencyLatencyHist71moTotalBucket6Rate

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270694: fltTcaLatencyLatencyHist71qtrTotalBucket6Rate

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270695: fltTcaLatencyLatencyHist71yearTotalBucket6Rate

Severity: variable

Explanation: This fault is caused by "packets within the 7th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 7th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270768: fltTcaLatencyLatencyHist75minTotalBucket7Last

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270769: fltTcaLatencyLatencyHist715minTotalBucket7Last

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270770: fltTcaLatencyLatencyHist71hTotalBucket7Last

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270771: fltTcaLatencyLatencyHist71dTotalBucket7Last

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270772: fltTcaLatencyLatencyHist71wTotalBucket7Last

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270773: fltTcaLatencyLatencyHist71moTotalBucket7Last

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270774: fltTcaLatencyLatencyHist71qtrTotalBucket7Last

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270775: fltTcaLatencyLatencyHist71yearTotalBucket7Last

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270784: fltTcaLatencyLatencyHist75minTotalBucket7Cum

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270785: fltTcaLatencyLatencyHist715minTotalBucket7Cum

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270786: fltTcaLatencyLatencyHist71hTotalBucket7Cum

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270787: fltTcaLatencyLatencyHist71dTotalBucket7Cum

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270788: fltTcaLatencyLatencyHist71wTotalBucket7Cum

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270789: fltTcaLatencyLatencyHist71moTotalBucket7Cum

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270790: fltTcaLatencyLatencyHist71qtrTotalBucket7Cum

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270791: fltTcaLatencyLatencyHist71yearTotalBucket7Cum

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270792: fltTcaLatencyLatencyHist75minTotalBucket7Per

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270793: fltTcaLatencyLatencyHist715minTotalBucket7Per

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270794: fltTcaLatencyLatencyHist71hTotalBucket7Per

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270795: fltTcaLatencyLatencyHist71dTotalBucket7Per

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270796: fltTcaLatencyLatencyHist71wTotalBucket7Per

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270797: fltTcaLatencyLatencyHist71moTotalBucket7Per

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270798: fltTcaLatencyLatencyHist71qtrTotalBucket7Per

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270799: fltTcaLatencyLatencyHist71yearTotalBucket7Per

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270800: fltTcaLatencyLatencyHist75minTotalBucket7Min

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270801: fltTcaLatencyLatencyHist715minTotalBucket7Min

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270802: fltTcaLatencyLatencyHist71hTotalBucket7Min

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270803: fltTcaLatencyLatencyHist71dTotalBucket7Min

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270804: fltTcaLatencyLatencyHist71wTotalBucket7Min

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270805: fltTcaLatencyLatencyHist71moTotalBucket7Min

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270806: fltTcaLatencyLatencyHist71qtrTotalBucket7Min

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270807: fltTcaLatencyLatencyHist71yearTotalBucket7Min

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270808: fltTcaLatencyLatencyHist75minTotalBucket7Max

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270809: fltTcaLatencyLatencyHist715minTotalBucket7Max

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270810: fltTcaLatencyLatencyHist71hTotalBucket7Max

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270811: fltTcaLatencyLatencyHist71dTotalBucket7Max

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270812: fltTcaLatencyLatencyHist71wTotalBucket7Max

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270813: fltTcaLatencyLatencyHist71moTotalBucket7Max

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270814: fltTcaLatencyLatencyHist71qtrTotalBucket7Max

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270815: fltTcaLatencyLatencyHist71yearTotalBucket7Max

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270816: fltTcaLatencyLatencyHist75minTotalBucket7Avg

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270817: fltTcaLatencyLatencyHist715minTotalBucket7Avg

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270818: fltTcaLatencyLatencyHist71hTotalBucket7Avg

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270819: fltTcaLatencyLatencyHist71dTotalBucket7Avg

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270820: fltTcaLatencyLatencyHist71wTotalBucket7Avg

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270821: fltTcaLatencyLatencyHist71moTotalBucket7Avg

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270822: fltTcaLatencyLatencyHist71qtrTotalBucket7Avg

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270823: fltTcaLatencyLatencyHist71yearTotalBucket7Avg

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270848: fltTcaLatencyLatencyHist75minTotalBucket7Tr

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270849: fltTcaLatencyLatencyHist715minTotalBucket7Tr

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270850: fltTcaLatencyLatencyHist71hTotalBucket7Tr

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270851: fltTcaLatencyLatencyHist71dTotalBucket7Tr

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270852: fltTcaLatencyLatencyHist71wTotalBucket7Tr

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270853: fltTcaLatencyLatencyHist71moTotalBucket7Tr

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270854: fltTcaLatencyLatencyHist71qtrTotalBucket7Tr

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270855: fltTcaLatencyLatencyHist71yearTotalBucket7Tr

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270856: fltTcaLatencyLatencyHist75minTotalBucket7Rate

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270857: fltTcaLatencyLatencyHist715minTotalBucket7Rate

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270858: fltTcaLatencyLatencyHist71hTotalBucket7Rate

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270859: fltTcaLatencyLatencyHist71dTotalBucket7Rate

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270860: fltTcaLatencyLatencyHist71wTotalBucket7Rate

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270861: fltTcaLatencyLatencyHist71moTotalBucket7Rate

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270862: fltTcaLatencyLatencyHist71qtrTotalBucket7Rate

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270863: fltTcaLatencyLatencyHist71yearTotalBucket7Rate

Severity: variable

Explanation: This fault is caused by "packets within the 8th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 8th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270936: fltTcaLatencyLatencyHist75minTotalBucket8Last

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270937: fltTcaLatencyLatencyHist715minTotalBucket8Last

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270938: fltTcaLatencyLatencyHist71hTotalBucket8Last

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270939: fltTcaLatencyLatencyHist71dTotalBucket8Last

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270940: fltTcaLatencyLatencyHist71wTotalBucket8Last

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270941: fltTcaLatencyLatencyHist71moTotalBucket8Last

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270942: fltTcaLatencyLatencyHist71qtrTotalBucket8Last

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270943: fltTcaLatencyLatencyHist71yearTotalBucket8Last

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270952: fltTcaLatencyLatencyHist75minTotalBucket8Cum

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270953: fltTcaLatencyLatencyHist715minTotalBucket8Cum

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270954: fltTcaLatencyLatencyHist71hTotalBucket8Cum

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270955: fltTcaLatencyLatencyHist71dTotalBucket8Cum

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270956: fltTcaLatencyLatencyHist71wTotalBucket8Cum

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270957: fltTcaLatencyLatencyHist71moTotalBucket8Cum

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270958: fltTcaLatencyLatencyHist71qtrTotalBucket8Cum

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270959: fltTcaLatencyLatencyHist71yearTotalBucket8Cum

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270960: fltTcaLatencyLatencyHist75minTotalBucket8Per

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270961: fltTcaLatencyLatencyHist715minTotalBucket8Per

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270962: fltTcaLatencyLatencyHist71hTotalBucket8Per

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270963: fltTcaLatencyLatencyHist71dTotalBucket8Per

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270964: fltTcaLatencyLatencyHist71wTotalBucket8Per

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270965: fltTcaLatencyLatencyHist71moTotalBucket8Per

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270966: fltTcaLatencyLatencyHist71qtrTotalBucket8Per

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270967: fltTcaLatencyLatencyHist71yearTotalBucket8Per

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270968: fltTcaLatencyLatencyHist75minTotalBucket8Min

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270969: fltTcaLatencyLatencyHist715minTotalBucket8Min

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270970: fltTcaLatencyLatencyHist71hTotalBucket8Min

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270971: fltTcaLatencyLatencyHist71dTotalBucket8Min

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270972: fltTcaLatencyLatencyHist71wTotalBucket8Min

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270973: fltTcaLatencyLatencyHist71moTotalBucket8Min

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270974: fltTcaLatencyLatencyHist71qtrTotalBucket8Min

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270975: fltTcaLatencyLatencyHist71yearTotalBucket8Min

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270976: fltTcaLatencyLatencyHist75minTotalBucket8Max

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270977: fltTcaLatencyLatencyHist715minTotalBucket8Max

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270978: fltTcaLatencyLatencyHist71hTotalBucket8Max

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270979: fltTcaLatencyLatencyHist71dTotalBucket8Max

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270980: fltTcaLatencyLatencyHist71wTotalBucket8Max

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270981: fltTcaLatencyLatencyHist71moTotalBucket8Max

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270982: fltTcaLatencyLatencyHist71qtrTotalBucket8Max

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270983: fltTcaLatencyLatencyHist71yearTotalBucket8Max

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270984: fltTcaLatencyLatencyHist75minTotalBucket8Avg

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270985: fltTcaLatencyLatencyHist715minTotalBucket8Avg

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270986: fltTcaLatencyLatencyHist71hTotalBucket8Avg

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270987: fltTcaLatencyLatencyHist71dTotalBucket8Avg

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270988: fltTcaLatencyLatencyHist71wTotalBucket8Avg

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270989: fltTcaLatencyLatencyHist71moTotalBucket8Avg

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270990: fltTcaLatencyLatencyHist71qtrTotalBucket8Avg

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F270991: fltTcaLatencyLatencyHist71yearTotalBucket8Avg

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271016: fltTcaLatencyLatencyHist75minTotalBucket8Tr

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271017: fltTcaLatencyLatencyHist715minTotalBucket8Tr

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271018: fltTcaLatencyLatencyHist71hTotalBucket8Tr

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271019: fltTcaLatencyLatencyHist71dTotalBucket8Tr

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271020: fltTcaLatencyLatencyHist71wTotalBucket8Tr

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271021: fltTcaLatencyLatencyHist71moTotalBucket8Tr

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271022: fltTcaLatencyLatencyHist71qtrTotalBucket8Tr

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271023: fltTcaLatencyLatencyHist71yearTotalBucket8Tr

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271024: fltTcaLatencyLatencyHist75minTotalBucket8Rate

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271025: fltTcaLatencyLatencyHist715minTotalBucket8Rate

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271026: fltTcaLatencyLatencyHist71hTotalBucket8Rate

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271027: fltTcaLatencyLatencyHist71dTotalBucket8Rate

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271028: fltTcaLatencyLatencyHist71wTotalBucket8Rate

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271029: fltTcaLatencyLatencyHist71moTotalBucket8Rate

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271030: fltTcaLatencyLatencyHist71qtrTotalBucket8Rate

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271031: fltTcaLatencyLatencyHist71yearTotalBucket8Rate

Severity: variable

Explanation: This fault is caused by "packets within the 9th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 9th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271104: fltTcaLatencyLatencyHist75minTotalBucket9Last

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271105: fltTcaLatencyLatencyHist715minTotalBucket9Last

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271106: fltTcaLatencyLatencyHist71hTotalBucket9Last

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271107: fltTcaLatencyLatencyHist71dTotalBucket9Last

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271108: fltTcaLatencyLatencyHist71wTotalBucket9Last

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271109: fltTcaLatencyLatencyHist71moTotalBucket9Last

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271110: fltTcaLatencyLatencyHist71qtrTotalBucket9Last

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271111: fltTcaLatencyLatencyHist71yearTotalBucket9Last

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271120: fltTcaLatencyLatencyHist75minTotalBucket9Cum

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271121: fltTcaLatencyLatencyHist715minTotalBucket9Cum

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271122: fltTcaLatencyLatencyHist71hTotalBucket9Cum

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271123: fltTcaLatencyLatencyHist71dTotalBucket9Cum

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271124: fltTcaLatencyLatencyHist71wTotalBucket9Cum

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271125: fltTcaLatencyLatencyHist71moTotalBucket9Cum

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271126: fltTcaLatencyLatencyHist71qtrTotalBucket9Cum

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271127: fltTcaLatencyLatencyHist71yearTotalBucket9Cum

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271128: fltTcaLatencyLatencyHist75minTotalBucket9Per

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271129: fltTcaLatencyLatencyHist715minTotalBucket9Per

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271130: fltTcaLatencyLatencyHist71hTotalBucket9Per

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271131: fltTcaLatencyLatencyHist71dTotalBucket9Per

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271132: fltTcaLatencyLatencyHist71wTotalBucket9Per

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271133: fltTcaLatencyLatencyHist71moTotalBucket9Per

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271134: fltTcaLatencyLatencyHist71qtrTotalBucket9Per

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271135: fltTcaLatencyLatencyHist71yearTotalBucket9Per

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271136: fltTcaLatencyLatencyHist75minTotalBucket9Min

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271137: fltTcaLatencyLatencyHist715minTotalBucket9Min

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271138: fltTcaLatencyLatencyHist71hTotalBucket9Min

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271139: fltTcaLatencyLatencyHist71dTotalBucket9Min

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271140: fltTcaLatencyLatencyHist71wTotalBucket9Min

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271141: fltTcaLatencyLatencyHist71moTotalBucket9Min

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271142: fltTcaLatencyLatencyHist71qtrTotalBucket9Min

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271143: fltTcaLatencyLatencyHist71yearTotalBucket9Min

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271144: fltTcaLatencyLatencyHist75minTotalBucket9Max

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271145: fltTcaLatencyLatencyHist715minTotalBucket9Max

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271146: fltTcaLatencyLatencyHist71hTotalBucket9Max

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271147: fltTcaLatencyLatencyHist71dTotalBucket9Max

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271148: fltTcaLatencyLatencyHist71wTotalBucket9Max

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271149: fltTcaLatencyLatencyHist71moTotalBucket9Max

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271150: fltTcaLatencyLatencyHist71qtrTotalBucket9Max

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271151: fltTcaLatencyLatencyHist71yearTotalBucket9Max

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271152: fltTcaLatencyLatencyHist75minTotalBucket9Avg

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271153: fltTcaLatencyLatencyHist715minTotalBucket9Avg

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271154: fltTcaLatencyLatencyHist71hTotalBucket9Avg

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271155: fltTcaLatencyLatencyHist71dTotalBucket9Avg

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271156: fltTcaLatencyLatencyHist71wTotalBucket9Avg

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271157: fltTcaLatencyLatencyHist71moTotalBucket9Avg

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271158: fltTcaLatencyLatencyHist71qtrTotalBucket9Avg

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271159: fltTcaLatencyLatencyHist71yearTotalBucket9Avg

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271184: fltTcaLatencyLatencyHist75minTotalBucket9Tr

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271185: fltTcaLatencyLatencyHist715minTotalBucket9Tr

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271186: fltTcaLatencyLatencyHist71hTotalBucket9Tr

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271187: fltTcaLatencyLatencyHist71dTotalBucket9Tr

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271188: fltTcaLatencyLatencyHist71wTotalBucket9Tr

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271189: fltTcaLatencyLatencyHist71moTotalBucket9Tr

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271190: fltTcaLatencyLatencyHist71qtrTotalBucket9Tr

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271191: fltTcaLatencyLatencyHist71yearTotalBucket9Tr

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271192: fltTcaLatencyLatencyHist75minTotalBucket9Rate

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271193: fltTcaLatencyLatencyHist715minTotalBucket9Rate

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271194: fltTcaLatencyLatencyHist71hTotalBucket9Rate

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271195: fltTcaLatencyLatencyHist71dTotalBucket9Rate

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271196: fltTcaLatencyLatencyHist71wTotalBucket9Rate

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271197: fltTcaLatencyLatencyHist71moTotalBucket9Rate

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271198: fltTcaLatencyLatencyHist71qtrTotalBucket9Rate

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271199: fltTcaLatencyLatencyHist71yearTotalBucket9Rate

Severity: variable

Explanation: This fault is caused by "packets within the 10th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 10th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271272: fltTcaLatencyLatencyHist85minTotalBucket10Last

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271273: fltTcaLatencyLatencyHist815minTotalBucket10Last

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271274: fltTcaLatencyLatencyHist81hTotalBucket10Last

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271275: fltTcaLatencyLatencyHist81dTotalBucket10Last

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271276: fltTcaLatencyLatencyHist81wTotalBucket10Last

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271277: fltTcaLatencyLatencyHist81moTotalBucket10Last

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271278: fltTcaLatencyLatencyHist81qtrTotalBucket10Last

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271279: fltTcaLatencyLatencyHist81yearTotalBucket10Last

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271288: fltTcaLatencyLatencyHist85minTotalBucket10Cum

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271289: fltTcaLatencyLatencyHist815minTotalBucket10Cum

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271290: fltTcaLatencyLatencyHist81hTotalBucket10Cum

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271291: fltTcaLatencyLatencyHist81dTotalBucket10Cum

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271292: fltTcaLatencyLatencyHist81wTotalBucket10Cum

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271293: fltTcaLatencyLatencyHist81moTotalBucket10Cum

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271294: fltTcaLatencyLatencyHist81qtrTotalBucket10Cum

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271295: fltTcaLatencyLatencyHist81yearTotalBucket10Cum

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271296: fltTcaLatencyLatencyHist85minTotalBucket10Per

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271297: fltTcaLatencyLatencyHist815minTotalBucket10Per

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271298: fltTcaLatencyLatencyHist81hTotalBucket10Per

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271299: fltTcaLatencyLatencyHist81dTotalBucket10Per

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2713: fltL2RsPathDomAttDot1qTunnelNotSupported

Severity: warning

Explanation: This fault occurs when a QinQ tunnel is deployed on an unsupported platform ToR

Recommended Action: To recover from this fault, try the following actions

1. Delete dot1q tunnel deployment from node

2. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F271300: fltTcaLatencyLatencyHist81wTotalBucket10Per

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271301: fltTcaLatencyLatencyHist81moTotalBucket10Per

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271302: fltTcaLatencyLatencyHist81qtrTotalBucket10Per

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271303: fltTcaLatencyLatencyHist81yearTotalBucket10Per

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271304: fltTcaLatencyLatencyHist85minTotalBucket10Min

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271305: fltTcaLatencyLatencyHist815minTotalBucket10Min

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271306: fltTcaLatencyLatencyHist81hTotalBucket10Min

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271307: fltTcaLatencyLatencyHist81dTotalBucket10Min

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271308: fltTcaLatencyLatencyHist81wTotalBucket10Min

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271309: fltTcaLatencyLatencyHist81moTotalBucket10Min

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271310: fltTcaLatencyLatencyHist81qtrTotalBucket10Min

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271311: fltTcaLatencyLatencyHist81yearTotalBucket10Min

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271312: fltTcaLatencyLatencyHist85minTotalBucket10Max

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271313: fltTcaLatencyLatencyHist815minTotalBucket10Max

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271314: fltTcaLatencyLatencyHist81hTotalBucket10Max

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271315: fltTcaLatencyLatencyHist81dTotalBucket10Max

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271316: fltTcaLatencyLatencyHist81wTotalBucket10Max

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271317: fltTcaLatencyLatencyHist81moTotalBucket10Max

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271318: fltTcaLatencyLatencyHist81qtrTotalBucket10Max

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271319: fltTcaLatencyLatencyHist81yearTotalBucket10Max

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271320: fltTcaLatencyLatencyHist85minTotalBucket10Avg

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271321: fltTcaLatencyLatencyHist815minTotalBucket10Avg

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271322: fltTcaLatencyLatencyHist81hTotalBucket10Avg

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271323: fltTcaLatencyLatencyHist81dTotalBucket10Avg

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271324: fltTcaLatencyLatencyHist81wTotalBucket10Avg

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271325: fltTcaLatencyLatencyHist81moTotalBucket10Avg

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271326: fltTcaLatencyLatencyHist81qtrTotalBucket10Avg

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271327: fltTcaLatencyLatencyHist81yearTotalBucket10Avg

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271352: fltTcaLatencyLatencyHist85minTotalBucket10Tr

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271353: fltTcaLatencyLatencyHist815minTotalBucket10Tr

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271354: fltTcaLatencyLatencyHist81hTotalBucket10Tr

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271355: fltTcaLatencyLatencyHist81dTotalBucket10Tr

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271356: fltTcaLatencyLatencyHist81wTotalBucket10Tr

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271357: fltTcaLatencyLatencyHist81moTotalBucket10Tr

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271358: fltTcaLatencyLatencyHist81qtrTotalBucket10Tr

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271359: fltTcaLatencyLatencyHist81yearTotalBucket10Tr

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271360: fltTcaLatencyLatencyHist85minTotalBucket10Rate

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271361: fltTcaLatencyLatencyHist815minTotalBucket10Rate

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271362: fltTcaLatencyLatencyHist81hTotalBucket10Rate

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271363: fltTcaLatencyLatencyHist81dTotalBucket10Rate

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271364: fltTcaLatencyLatencyHist81wTotalBucket10Rate

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271365: fltTcaLatencyLatencyHist81moTotalBucket10Rate

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271366: fltTcaLatencyLatencyHist81qtrTotalBucket10Rate

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271367: fltTcaLatencyLatencyHist81yearTotalBucket10Rate

Severity: variable

Explanation: This fault is caused by "packets within the 11th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 11th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2714: fltEthpmFaultQinqPortNotSupported

Severity: warning

Explanation: This fault occurs when port mode is configured as a qinq core/edge port on an unsupported platform

Recommended Action: To recover from this fault, delete port mode config as a qinq core/edge port

F271440: fltTcaLatencyLatencyHist85minTotalBucket11Last

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271441: fltTcaLatencyLatencyHist815minTotalBucket11Last

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271442: fltTcaLatencyLatencyHist81hTotalBucket11Last

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271443: fltTcaLatencyLatencyHist81dTotalBucket11Last

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271444: fltTcaLatencyLatencyHist81wTotalBucket11Last

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271445: fltTcaLatencyLatencyHist81moTotalBucket11Last

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271446: fltTcaLatencyLatencyHist81qtrTotalBucket11Last

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271447: fltTcaLatencyLatencyHist81yearTotalBucket11Last

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271456: fltTcaLatencyLatencyHist85minTotalBucket11Cum

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271457: fltTcaLatencyLatencyHist815minTotalBucket11Cum

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271458: fltTcaLatencyLatencyHist81hTotalBucket11Cum

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271459: fltTcaLatencyLatencyHist81dTotalBucket11Cum

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271460: fltTcaLatencyLatencyHist81wTotalBucket11Cum

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271461: fltTcaLatencyLatencyHist81moTotalBucket11Cum

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271462: fltTcaLatencyLatencyHist81qtrTotalBucket11Cum

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271463: fltTcaLatencyLatencyHist81yearTotalBucket11Cum

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271464: fltTcaLatencyLatencyHist85minTotalBucket11Per

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271465: fltTcaLatencyLatencyHist815minTotalBucket11Per

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271466: fltTcaLatencyLatencyHist81hTotalBucket11Per

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271467: fltTcaLatencyLatencyHist81dTotalBucket11Per

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271468: fltTcaLatencyLatencyHist81wTotalBucket11Per

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271469: fltTcaLatencyLatencyHist81moTotalBucket11Per

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271470: fltTcaLatencyLatencyHist81qtrTotalBucket11Per

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271471: fltTcaLatencyLatencyHist81yearTotalBucket11Per

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271472: fltTcaLatencyLatencyHist85minTotalBucket11Min

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271473: fltTcaLatencyLatencyHist815minTotalBucket11Min

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271474: fltTcaLatencyLatencyHist81hTotalBucket11Min

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271475: fltTcaLatencyLatencyHist81dTotalBucket11Min

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271476: fltTcaLatencyLatencyHist81wTotalBucket11Min

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271477: fltTcaLatencyLatencyHist81moTotalBucket11Min

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271478: fltTcaLatencyLatencyHist81qtrTotalBucket11Min

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271479: fltTcaLatencyLatencyHist81yearTotalBucket11Min

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271480: fltTcaLatencyLatencyHist85minTotalBucket11Max

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271481: fltTcaLatencyLatencyHist815minTotalBucket11Max

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271482: fltTcaLatencyLatencyHist81hTotalBucket11Max

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271483: fltTcaLatencyLatencyHist81dTotalBucket11Max

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271484: fltTcaLatencyLatencyHist81wTotalBucket11Max

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271485: fltTcaLatencyLatencyHist81moTotalBucket11Max

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271486: fltTcaLatencyLatencyHist81qtrTotalBucket11Max

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271487: fltTcaLatencyLatencyHist81yearTotalBucket11Max

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271488: fltTcaLatencyLatencyHist85minTotalBucket11Avg

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271489: fltTcaLatencyLatencyHist815minTotalBucket11Avg

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271490: fltTcaLatencyLatencyHist81hTotalBucket11Avg

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271491: fltTcaLatencyLatencyHist81dTotalBucket11Avg

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271492: fltTcaLatencyLatencyHist81wTotalBucket11Avg

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271493: fltTcaLatencyLatencyHist81moTotalBucket11Avg

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271494: fltTcaLatencyLatencyHist81qtrTotalBucket11Avg

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271495: fltTcaLatencyLatencyHist81yearTotalBucket11Avg

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271520: fltTcaLatencyLatencyHist85minTotalBucket11Tr

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271521: fltTcaLatencyLatencyHist815minTotalBucket11Tr

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271522: fltTcaLatencyLatencyHist81hTotalBucket11Tr

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271523: fltTcaLatencyLatencyHist81dTotalBucket11Tr

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271524: fltTcaLatencyLatencyHist81wTotalBucket11Tr

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271525: fltTcaLatencyLatencyHist81moTotalBucket11Tr

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271526: fltTcaLatencyLatencyHist81qtrTotalBucket11Tr

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271527: fltTcaLatencyLatencyHist81yearTotalBucket11Tr

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271528: fltTcaLatencyLatencyHist85minTotalBucket11Rate

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271529: fltTcaLatencyLatencyHist815minTotalBucket11Rate

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271530: fltTcaLatencyLatencyHist81hTotalBucket11Rate

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271531: fltTcaLatencyLatencyHist81dTotalBucket11Rate

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271532: fltTcaLatencyLatencyHist81wTotalBucket11Rate

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271533: fltTcaLatencyLatencyHist81moTotalBucket11Rate

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271534: fltTcaLatencyLatencyHist81qtrTotalBucket11Rate

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271535: fltTcaLatencyLatencyHist81yearTotalBucket11Rate

Severity: variable

Explanation: This fault is caused by "packets within the 12th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 12th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271608: fltTcaLatencyLatencyHist85minTotalBucket12Last

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271609: fltTcaLatencyLatencyHist815minTotalBucket12Last

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271610: fltTcaLatencyLatencyHist81hTotalBucket12Last

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271611: fltTcaLatencyLatencyHist81dTotalBucket12Last

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271612: fltTcaLatencyLatencyHist81wTotalBucket12Last

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271613: fltTcaLatencyLatencyHist81moTotalBucket12Last

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271614: fltTcaLatencyLatencyHist81qtrTotalBucket12Last

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271615: fltTcaLatencyLatencyHist81yearTotalBucket12Last

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271624: fltTcaLatencyLatencyHist85minTotalBucket12Cum

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271625: fltTcaLatencyLatencyHist815minTotalBucket12Cum

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271626: fltTcaLatencyLatencyHist81hTotalBucket12Cum

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271627: fltTcaLatencyLatencyHist81dTotalBucket12Cum

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271628: fltTcaLatencyLatencyHist81wTotalBucket12Cum

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271629: fltTcaLatencyLatencyHist81moTotalBucket12Cum

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271630: fltTcaLatencyLatencyHist81qtrTotalBucket12Cum

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271631: fltTcaLatencyLatencyHist81yearTotalBucket12Cum

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271632: fltTcaLatencyLatencyHist85minTotalBucket12Per

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271633: fltTcaLatencyLatencyHist815minTotalBucket12Per

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271634: fltTcaLatencyLatencyHist81hTotalBucket12Per

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271635: fltTcaLatencyLatencyHist81dTotalBucket12Per

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271636: fltTcaLatencyLatencyHist81wTotalBucket12Per

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271637: fltTcaLatencyLatencyHist81moTotalBucket12Per

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271638: fltTcaLatencyLatencyHist81qtrTotalBucket12Per

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271639: fltTcaLatencyLatencyHist81yearTotalBucket12Per

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271640: fltTcaLatencyLatencyHist85minTotalBucket12Min

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271641: fltTcaLatencyLatencyHist815minTotalBucket12Min

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271642: fltTcaLatencyLatencyHist81hTotalBucket12Min

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271643: fltTcaLatencyLatencyHist81dTotalBucket12Min

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271644: fltTcaLatencyLatencyHist81wTotalBucket12Min

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271645: fltTcaLatencyLatencyHist81moTotalBucket12Min

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271646: fltTcaLatencyLatencyHist81qtrTotalBucket12Min

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271647: fltTcaLatencyLatencyHist81yearTotalBucket12Min

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271648: fltTcaLatencyLatencyHist85minTotalBucket12Max

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271649: fltTcaLatencyLatencyHist815minTotalBucket12Max

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271650: fltTcaLatencyLatencyHist81hTotalBucket12Max

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271651: fltTcaLatencyLatencyHist81dTotalBucket12Max

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271652: fltTcaLatencyLatencyHist81wTotalBucket12Max

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271653: fltTcaLatencyLatencyHist81moTotalBucket12Max

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271654: fltTcaLatencyLatencyHist81qtrTotalBucket12Max

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271655: fltTcaLatencyLatencyHist81yearTotalBucket12Max

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271656: fltTcaLatencyLatencyHist85minTotalBucket12Avg

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271657: fltTcaLatencyLatencyHist815minTotalBucket12Avg

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271658: fltTcaLatencyLatencyHist81hTotalBucket12Avg

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271659: fltTcaLatencyLatencyHist81dTotalBucket12Avg

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271660: fltTcaLatencyLatencyHist81wTotalBucket12Avg

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271661: fltTcaLatencyLatencyHist81moTotalBucket12Avg

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271662: fltTcaLatencyLatencyHist81qtrTotalBucket12Avg

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271663: fltTcaLatencyLatencyHist81yearTotalBucket12Avg

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271688: fltTcaLatencyLatencyHist85minTotalBucket12Tr

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271689: fltTcaLatencyLatencyHist815minTotalBucket12Tr

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271690: fltTcaLatencyLatencyHist81hTotalBucket12Tr

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271691: fltTcaLatencyLatencyHist81dTotalBucket12Tr

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271692: fltTcaLatencyLatencyHist81wTotalBucket12Tr

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271693: fltTcaLatencyLatencyHist81moTotalBucket12Tr

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271694: fltTcaLatencyLatencyHist81qtrTotalBucket12Tr

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271695: fltTcaLatencyLatencyHist81yearTotalBucket12Tr

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271696: fltTcaLatencyLatencyHist85minTotalBucket12Rate

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271697: fltTcaLatencyLatencyHist815minTotalBucket12Rate

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271698: fltTcaLatencyLatencyHist81hTotalBucket12Rate

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271699: fltTcaLatencyLatencyHist81dTotalBucket12Rate

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271700: fltTcaLatencyLatencyHist81wTotalBucket12Rate

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271701: fltTcaLatencyLatencyHist81moTotalBucket12Rate

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271702: fltTcaLatencyLatencyHist81qtrTotalBucket12Rate

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271703: fltTcaLatencyLatencyHist81yearTotalBucket12Rate

Severity: variable

Explanation: This fault is caused by "packets within the 13th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 13th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271776: fltTcaLatencyLatencyHist85minTotalBucket13Last

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271777: fltTcaLatencyLatencyHist815minTotalBucket13Last

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271778: fltTcaLatencyLatencyHist81hTotalBucket13Last

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271779: fltTcaLatencyLatencyHist81dTotalBucket13Last

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271780: fltTcaLatencyLatencyHist81wTotalBucket13Last

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271781: fltTcaLatencyLatencyHist81moTotalBucket13Last

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271782: fltTcaLatencyLatencyHist81qtrTotalBucket13Last

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271783: fltTcaLatencyLatencyHist81yearTotalBucket13Last

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271792: fltTcaLatencyLatencyHist85minTotalBucket13Cum

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271793: fltTcaLatencyLatencyHist815minTotalBucket13Cum

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271794: fltTcaLatencyLatencyHist81hTotalBucket13Cum

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271795: fltTcaLatencyLatencyHist81dTotalBucket13Cum

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271796: fltTcaLatencyLatencyHist81wTotalBucket13Cum

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271797: fltTcaLatencyLatencyHist81moTotalBucket13Cum

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271798: fltTcaLatencyLatencyHist81qtrTotalBucket13Cum

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271799: fltTcaLatencyLatencyHist81yearTotalBucket13Cum

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271800: fltTcaLatencyLatencyHist85minTotalBucket13Per

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271801: fltTcaLatencyLatencyHist815minTotalBucket13Per

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271802: fltTcaLatencyLatencyHist81hTotalBucket13Per

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271803: fltTcaLatencyLatencyHist81dTotalBucket13Per

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271804: fltTcaLatencyLatencyHist81wTotalBucket13Per

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271805: fltTcaLatencyLatencyHist81moTotalBucket13Per

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271806: fltTcaLatencyLatencyHist81qtrTotalBucket13Per

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271807: fltTcaLatencyLatencyHist81yearTotalBucket13Per

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271808: fltTcaLatencyLatencyHist85minTotalBucket13Min

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271809: fltTcaLatencyLatencyHist815minTotalBucket13Min

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271810: fltTcaLatencyLatencyHist81hTotalBucket13Min

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271811: fltTcaLatencyLatencyHist81dTotalBucket13Min

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271812: fltTcaLatencyLatencyHist81wTotalBucket13Min

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271813: fltTcaLatencyLatencyHist81moTotalBucket13Min

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271814: fltTcaLatencyLatencyHist81qtrTotalBucket13Min

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271815: fltTcaLatencyLatencyHist81yearTotalBucket13Min

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271816: fltTcaLatencyLatencyHist85minTotalBucket13Max

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271817: fltTcaLatencyLatencyHist815minTotalBucket13Max

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271818: fltTcaLatencyLatencyHist81hTotalBucket13Max

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271819: fltTcaLatencyLatencyHist81dTotalBucket13Max

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271820: fltTcaLatencyLatencyHist81wTotalBucket13Max

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271821: fltTcaLatencyLatencyHist81moTotalBucket13Max

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271822: fltTcaLatencyLatencyHist81qtrTotalBucket13Max

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271823: fltTcaLatencyLatencyHist81yearTotalBucket13Max

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271824: fltTcaLatencyLatencyHist85minTotalBucket13Avg

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271825: fltTcaLatencyLatencyHist815minTotalBucket13Avg

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271826: fltTcaLatencyLatencyHist81hTotalBucket13Avg

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271827: fltTcaLatencyLatencyHist81dTotalBucket13Avg

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271828: fltTcaLatencyLatencyHist81wTotalBucket13Avg

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271829: fltTcaLatencyLatencyHist81moTotalBucket13Avg

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271830: fltTcaLatencyLatencyHist81qtrTotalBucket13Avg

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271831: fltTcaLatencyLatencyHist81yearTotalBucket13Avg

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271856: fltTcaLatencyLatencyHist85minTotalBucket13Tr

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271857: fltTcaLatencyLatencyHist815minTotalBucket13Tr

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271858: fltTcaLatencyLatencyHist81hTotalBucket13Tr

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271859: fltTcaLatencyLatencyHist81dTotalBucket13Tr

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271860: fltTcaLatencyLatencyHist81wTotalBucket13Tr

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271861: fltTcaLatencyLatencyHist81moTotalBucket13Tr

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271862: fltTcaLatencyLatencyHist81qtrTotalBucket13Tr

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271863: fltTcaLatencyLatencyHist81yearTotalBucket13Tr

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271864: fltTcaLatencyLatencyHist85minTotalBucket13Rate

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271865: fltTcaLatencyLatencyHist815minTotalBucket13Rate

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271866: fltTcaLatencyLatencyHist81hTotalBucket13Rate

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271867: fltTcaLatencyLatencyHist81dTotalBucket13Rate

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271868: fltTcaLatencyLatencyHist81wTotalBucket13Rate

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271869: fltTcaLatencyLatencyHist81moTotalBucket13Rate

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271870: fltTcaLatencyLatencyHist81qtrTotalBucket13Rate

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271871: fltTcaLatencyLatencyHist81yearTotalBucket13Rate

Severity: variable

Explanation: This fault is caused by "packets within the 14th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 14th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2719: fltFvRsDppPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F271944: fltTcaLatencyLatencyHist95minTotalBucket14Last

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271945: fltTcaLatencyLatencyHist915minTotalBucket14Last

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271946: fltTcaLatencyLatencyHist91hTotalBucket14Last

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271947: fltTcaLatencyLatencyHist91dTotalBucket14Last

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271948: fltTcaLatencyLatencyHist91wTotalBucket14Last

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271949: fltTcaLatencyLatencyHist91moTotalBucket14Last

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271950: fltTcaLatencyLatencyHist91qtrTotalBucket14Last

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271951: fltTcaLatencyLatencyHist91yearTotalBucket14Last

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271960: fltTcaLatencyLatencyHist95minTotalBucket14Cum

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271961: fltTcaLatencyLatencyHist915minTotalBucket14Cum

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271962: fltTcaLatencyLatencyHist91hTotalBucket14Cum

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271963: fltTcaLatencyLatencyHist91dTotalBucket14Cum

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271964: fltTcaLatencyLatencyHist91wTotalBucket14Cum

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271965: fltTcaLatencyLatencyHist91moTotalBucket14Cum

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271966: fltTcaLatencyLatencyHist91qtrTotalBucket14Cum

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271967: fltTcaLatencyLatencyHist91yearTotalBucket14Cum

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271968: fltTcaLatencyLatencyHist95minTotalBucket14Per

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271969: fltTcaLatencyLatencyHist915minTotalBucket14Per

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271970: fltTcaLatencyLatencyHist91hTotalBucket14Per

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271971: fltTcaLatencyLatencyHist91dTotalBucket14Per

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271972: fltTcaLatencyLatencyHist91wTotalBucket14Per

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271973: fltTcaLatencyLatencyHist91moTotalBucket14Per

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271974: fltTcaLatencyLatencyHist91qtrTotalBucket14Per

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271975: fltTcaLatencyLatencyHist91yearTotalBucket14Per

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271976: fltTcaLatencyLatencyHist95minTotalBucket14Min

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271977: fltTcaLatencyLatencyHist915minTotalBucket14Min

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271978: fltTcaLatencyLatencyHist91hTotalBucket14Min

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271979: fltTcaLatencyLatencyHist91dTotalBucket14Min

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271980: fltTcaLatencyLatencyHist91wTotalBucket14Min

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271981: fltTcaLatencyLatencyHist91moTotalBucket14Min

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271982: fltTcaLatencyLatencyHist91qtrTotalBucket14Min

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271983: fltTcaLatencyLatencyHist91yearTotalBucket14Min

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271984: fltTcaLatencyLatencyHist95minTotalBucket14Max

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271985: fltTcaLatencyLatencyHist915minTotalBucket14Max

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271986: fltTcaLatencyLatencyHist91hTotalBucket14Max

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271987: fltTcaLatencyLatencyHist91dTotalBucket14Max

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271988: fltTcaLatencyLatencyHist91wTotalBucket14Max

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271989: fltTcaLatencyLatencyHist91moTotalBucket14Max

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271990: fltTcaLatencyLatencyHist91qtrTotalBucket14Max

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271991: fltTcaLatencyLatencyHist91yearTotalBucket14Max

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271992: fltTcaLatencyLatencyHist95minTotalBucket14Avg

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271993: fltTcaLatencyLatencyHist915minTotalBucket14Avg

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271994: fltTcaLatencyLatencyHist91hTotalBucket14Avg

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271995: fltTcaLatencyLatencyHist91dTotalBucket14Avg

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271996: fltTcaLatencyLatencyHist91wTotalBucket14Avg

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271997: fltTcaLatencyLatencyHist91moTotalBucket14Avg

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271998: fltTcaLatencyLatencyHist91qtrTotalBucket14Avg

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F271999: fltTcaLatencyLatencyHist91yearTotalBucket14Avg

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2720: fltIsisExtIfExtIfConfigErr

Severity: warning

Explanation: This fault occurs when translation-capable flag is set on ISIS external interface but the LC is not Sugarbowl.

Recommended Action: If you see this fault, take the following actions:

1. Disable the translation-capable flag on non-sugarbowl links.

2. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F272024: fltTcaLatencyLatencyHist95minTotalBucket14Tr

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272025: fltTcaLatencyLatencyHist915minTotalBucket14Tr

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272026: fltTcaLatencyLatencyHist91hTotalBucket14Tr

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272027: fltTcaLatencyLatencyHist91dTotalBucket14Tr

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272028: fltTcaLatencyLatencyHist91wTotalBucket14Tr

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272029: fltTcaLatencyLatencyHist91moTotalBucket14Tr

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272030: fltTcaLatencyLatencyHist91qtrTotalBucket14Tr

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272031: fltTcaLatencyLatencyHist91yearTotalBucket14Tr

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272032: fltTcaLatencyLatencyHist95minTotalBucket14Rate

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272033: fltTcaLatencyLatencyHist915minTotalBucket14Rate

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272034: fltTcaLatencyLatencyHist91hTotalBucket14Rate

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272035: fltTcaLatencyLatencyHist91dTotalBucket14Rate

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272036: fltTcaLatencyLatencyHist91wTotalBucket14Rate

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272037: fltTcaLatencyLatencyHist91moTotalBucket14Rate

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272038: fltTcaLatencyLatencyHist91qtrTotalBucket14Rate

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272039: fltTcaLatencyLatencyHist91yearTotalBucket14Rate

Severity: variable

Explanation: This fault is caused by "packets within the 15th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 15th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2721: fltFhsInstOperStDown

Severity: major

Explanation: This fault occurs when the operational state of the FHS Instance is changed due to run time resource limits exhaustion reasons on the leaf

Recommended Action: To recover from this fault, try the following actions

1. For violation-event-history-limit-reached clear the violation event history concrete objects from the leaf using the APIC GUI

F272112: fltTcaLatencyLatencyHist95minTotalBucket15Last

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272113: fltTcaLatencyLatencyHist915minTotalBucket15Last

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272114: fltTcaLatencyLatencyHist91hTotalBucket15Last

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272115: fltTcaLatencyLatencyHist91dTotalBucket15Last

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272116: fltTcaLatencyLatencyHist91wTotalBucket15Last

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272117: fltTcaLatencyLatencyHist91moTotalBucket15Last

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272118: fltTcaLatencyLatencyHist91qtrTotalBucket15Last

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272119: fltTcaLatencyLatencyHist91yearTotalBucket15Last

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket current value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272128: fltTcaLatencyLatencyHist95minTotalBucket15Cum

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272129: fltTcaLatencyLatencyHist915minTotalBucket15Cum

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272130: fltTcaLatencyLatencyHist91hTotalBucket15Cum

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272131: fltTcaLatencyLatencyHist91dTotalBucket15Cum

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272132: fltTcaLatencyLatencyHist91wTotalBucket15Cum

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272133: fltTcaLatencyLatencyHist91moTotalBucket15Cum

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272134: fltTcaLatencyLatencyHist91qtrTotalBucket15Cum

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272135: fltTcaLatencyLatencyHist91yearTotalBucket15Cum

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272136: fltTcaLatencyLatencyHist95minTotalBucket15Per

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272137: fltTcaLatencyLatencyHist915minTotalBucket15Per

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272138: fltTcaLatencyLatencyHist91hTotalBucket15Per

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272139: fltTcaLatencyLatencyHist91dTotalBucket15Per

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272140: fltTcaLatencyLatencyHist91wTotalBucket15Per

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272141: fltTcaLatencyLatencyHist91moTotalBucket15Per

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272142: fltTcaLatencyLatencyHist91qtrTotalBucket15Per

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272143: fltTcaLatencyLatencyHist91yearTotalBucket15Per

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272144: fltTcaLatencyLatencyHist95minTotalBucket15Min

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272145: fltTcaLatencyLatencyHist915minTotalBucket15Min

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272146: fltTcaLatencyLatencyHist91hTotalBucket15Min

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272147: fltTcaLatencyLatencyHist91dTotalBucket15Min

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272148: fltTcaLatencyLatencyHist91wTotalBucket15Min

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272149: fltTcaLatencyLatencyHist91moTotalBucket15Min

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272150: fltTcaLatencyLatencyHist91qtrTotalBucket15Min

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272151: fltTcaLatencyLatencyHist91yearTotalBucket15Min

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272152: fltTcaLatencyLatencyHist95minTotalBucket15Max

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272153: fltTcaLatencyLatencyHist915minTotalBucket15Max

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272154: fltTcaLatencyLatencyHist91hTotalBucket15Max

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272155: fltTcaLatencyLatencyHist91dTotalBucket15Max

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272156: fltTcaLatencyLatencyHist91wTotalBucket15Max

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272157: fltTcaLatencyLatencyHist91moTotalBucket15Max

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272158: fltTcaLatencyLatencyHist91qtrTotalBucket15Max

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272159: fltTcaLatencyLatencyHist91yearTotalBucket15Max

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272160: fltTcaLatencyLatencyHist95minTotalBucket15Avg

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272161: fltTcaLatencyLatencyHist915minTotalBucket15Avg

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272162: fltTcaLatencyLatencyHist91hTotalBucket15Avg

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272163: fltTcaLatencyLatencyHist91dTotalBucket15Avg

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272164: fltTcaLatencyLatencyHist91wTotalBucket15Avg

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272165: fltTcaLatencyLatencyHist91moTotalBucket15Avg

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272166: fltTcaLatencyLatencyHist91qtrTotalBucket15Avg

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272167: fltTcaLatencyLatencyHist91yearTotalBucket15Avg

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket average value" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272192: fltTcaLatencyLatencyHist95minTotalBucket15Tr

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272193: fltTcaLatencyLatencyHist915minTotalBucket15Tr

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272194: fltTcaLatencyLatencyHist91hTotalBucket15Tr

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272195: fltTcaLatencyLatencyHist91dTotalBucket15Tr

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272196: fltTcaLatencyLatencyHist91wTotalBucket15Tr

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272197: fltTcaLatencyLatencyHist91moTotalBucket15Tr

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272198: fltTcaLatencyLatencyHist91qtrTotalBucket15Tr

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272199: fltTcaLatencyLatencyHist91yearTotalBucket15Tr

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket trend" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2722: fltFhsViolationEventFhsViolationEvent

Severity: major

Explanation: This fault occurs when First Hop Security detects security violation

Recommended Action: To recover from this fault, try the following actions

1. Track the endpoint causing the violation to see if it is a real threat and remove it from the network, use the ep attributes displayed in the message to track its location

F272200: fltTcaLatencyLatencyHist95minTotalBucket15Rate

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272201: fltTcaLatencyLatencyHist915minTotalBucket15Rate

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272202: fltTcaLatencyLatencyHist91hTotalBucket15Rate

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272203: fltTcaLatencyLatencyHist91dTotalBucket15Rate

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272204: fltTcaLatencyLatencyHist91wTotalBucket15Rate

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272205: fltTcaLatencyLatencyHist91moTotalBucket15Rate

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272206: fltTcaLatencyLatencyHist91qtrTotalBucket15Rate

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F272207: fltTcaLatencyLatencyHist91yearTotalBucket15Rate

Severity: variable

Explanation: This fault is caused by "packets within the 16th bucket rate" statistical property crossing threshold level.

Recommended Action: Check the values of "packets within the 16th bucket" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2725: fltL2PortSecurityPolDefUnsupported

Severity: warning

Explanation: This fault occurs when port security policy configuration is deployed on an unsupported platform TOR. The reason could be that this configuration is on a BD that stretches to the unsupported TOR

Recommended Action: If this fault is seen consistently, try the following actions

1. Remove the port security configuration from BD

2. If the above actions do not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F2728: fltAcLatencyInstOperStFailed

Severity: minor

Explanation: This fault occurs when latency feature is inactive.

Recommended Action: To recover from this fault, try the following actions

1. If the fault occurred because of PTP being disabled, enable PTP mode for latency to work.

2. If the fault occurred because of PTP not supported, latency is not supported on this switch.

3. If the fault occurred because of PTP bad correction, check if the PTP correction recovers in a few seconds. If it didnot resolve the issue, generate the show tech-support file and contact Cisco TAC.

F2730: fltEqptStorageWearout-Warning

Severity: warning

Explanation: This fault occurs when the SSD media wearout indicator (life remaining) is less than 10%.

Recommended Action: If you see this fault, take the following actions:

1. Replace SSD.

2. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F2731: fltEqptStorageWearout-Major

Severity: major

Explanation: This fault occurs when the SSD media wearout indicator (life remaining) is less than 5%.

Recommended Action: If you see this fault, take the following actions:

1. Replace SSD.

2. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F2732: fltEqptStorageWearout-Critical

Severity: critical

Explanation: This fault occurs when the SSD media wearout indicator (life remaining) is less than 1%.

Recommended Action: If you see this fault, take the following actions:

1. Replace SSD.

2. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F2734: fltInfraRsTopoctrlFwdScaleProfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2735: fltTopSystemDuplicateOOBMgmtIPV4

Severity: major

Explanation: This fault occurs when the controller out-of-band management IPV4 address a is duplicate of the inband managment IPV4 address

Recommended Action: If you see this fault, take the following actions:

1. Modify the controller out-of-band management IPV4 address

2. If above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F2736: fltTopSystemDuplicateIBMgmtIPV4

Severity: major

Explanation: This fault occurs when the controller inband management IPV4 address is a duplicate of the out-of-band managment IPV4 address

Recommended Action: If you see this fault, take the following actions:

1. Modify the controller inband management IPV4 address

2. If above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F2737: fltTopSystemDuplicateOOBMgmtIPV6

Severity: major

Explanation: This fault occurs when the controller out-of-band management IPV6 address a is duplicate of the inband managment IPV6 address

Recommended Action: If you see this fault, take the following actions:

1. Modify the controller out-of-band management IPV6 address

2. If above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F2738: fltTopSystemDuplicateIBMgmtIPV6

Severity: major

Explanation: This fault occurs when the controller inband management IPV6 address is a duplicate of the out-of-band managment IPV6 address

Recommended Action: If you see this fault, take the following actions:

1. Modify the controller inband management IPV6 address

2. If above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F2739: fltL1EthIfReflectiveRelayCfgNotSupported

Severity: warning

Explanation: This fault occurs when user tries to configure Reflective Relay on unsupported hardware

Recommended Action: To recover from this fault, Disable Reflective Relay

F2740: fltEthpmFaultPortSpeedCompatCheck

Severity: warning

Explanation: This fault occurs when port speed is configured to an invalid/unsupported value

Recommended Action: To recover from this fault, correct speed in link-level policy used in TOR or change the speed as "inherit"

F2741: fltNwPathEpVlanScopeSupportIsNotSupported

Severity: warning

Explanation: This fault occurs when user tries to configure Vlan scope as LOCAL for DTAG ports

Recommended Action: To recover from this fault, switch vlan scope to GLOBAL on DTAG port

1. Modify Vlan Scope to GLOBAL

F274248: fltTcaFvFltCounter5minCritcountLast

Severity: variable

Explanation: This fault is caused by "critical Fault current value" statistical property crossing threshold level.

Recommended Action: Check the values of "critical Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274249: fltTcaFvFltCounter15minCritcountLast

Severity: variable

Explanation: This fault is caused by "critical Fault current value" statistical property crossing threshold level.

Recommended Action: Check the values of "critical Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274250: fltTcaFvFltCounter1hCritcountLast

Severity: variable

Explanation: This fault is caused by "critical Fault current value" statistical property crossing threshold level.

Recommended Action: Check the values of "critical Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274251: fltTcaFvFltCounter1dCritcountLast

Severity: variable

Explanation: This fault is caused by "critical Fault current value" statistical property crossing threshold level.

Recommended Action: Check the values of "critical Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274252: fltTcaFvFltCounter1wCritcountLast

Severity: variable

Explanation: This fault is caused by "critical Fault current value" statistical property crossing threshold level.

Recommended Action: Check the values of "critical Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274253: fltTcaFvFltCounter1moCritcountLast

Severity: variable

Explanation: This fault is caused by "critical Fault current value" statistical property crossing threshold level.

Recommended Action: Check the values of "critical Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274254: fltTcaFvFltCounter1qtrCritcountLast

Severity: variable

Explanation: This fault is caused by "critical Fault current value" statistical property crossing threshold level.

Recommended Action: Check the values of "critical Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274255: fltTcaFvFltCounter1yearCritcountLast

Severity: variable

Explanation: This fault is caused by "critical Fault current value" statistical property crossing threshold level.

Recommended Action: Check the values of "critical Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274256: fltTcaFvFltCounter5minCritcountMin

Severity: variable

Explanation: This fault is caused by "critical Fault minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "critical Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274257: fltTcaFvFltCounter15minCritcountMin

Severity: variable

Explanation: This fault is caused by "critical Fault minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "critical Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274258: fltTcaFvFltCounter1hCritcountMin

Severity: variable

Explanation: This fault is caused by "critical Fault minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "critical Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274259: fltTcaFvFltCounter1dCritcountMin

Severity: variable

Explanation: This fault is caused by "critical Fault minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "critical Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274260: fltTcaFvFltCounter1wCritcountMin

Severity: variable

Explanation: This fault is caused by "critical Fault minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "critical Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274261: fltTcaFvFltCounter1moCritcountMin

Severity: variable

Explanation: This fault is caused by "critical Fault minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "critical Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274262: fltTcaFvFltCounter1qtrCritcountMin

Severity: variable

Explanation: This fault is caused by "critical Fault minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "critical Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274263: fltTcaFvFltCounter1yearCritcountMin

Severity: variable

Explanation: This fault is caused by "critical Fault minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "critical Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274264: fltTcaFvFltCounter5minCritcountMax

Severity: variable

Explanation: This fault is caused by "critical Fault maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "critical Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274265: fltTcaFvFltCounter15minCritcountMax

Severity: variable

Explanation: This fault is caused by "critical Fault maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "critical Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274266: fltTcaFvFltCounter1hCritcountMax

Severity: variable

Explanation: This fault is caused by "critical Fault maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "critical Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274267: fltTcaFvFltCounter1dCritcountMax

Severity: variable

Explanation: This fault is caused by "critical Fault maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "critical Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274268: fltTcaFvFltCounter1wCritcountMax

Severity: variable

Explanation: This fault is caused by "critical Fault maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "critical Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274269: fltTcaFvFltCounter1moCritcountMax

Severity: variable

Explanation: This fault is caused by "critical Fault maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "critical Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274270: fltTcaFvFltCounter1qtrCritcountMax

Severity: variable

Explanation: This fault is caused by "critical Fault maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "critical Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274271: fltTcaFvFltCounter1yearCritcountMax

Severity: variable

Explanation: This fault is caused by "critical Fault maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "critical Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274272: fltTcaFvFltCounter5minCritcountAvg

Severity: variable

Explanation: This fault is caused by "critical Fault average value" statistical property crossing threshold level.

Recommended Action: Check the values of "critical Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274273: fltTcaFvFltCounter15minCritcountAvg

Severity: variable

Explanation: This fault is caused by "critical Fault average value" statistical property crossing threshold level.

Recommended Action: Check the values of "critical Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274274: fltTcaFvFltCounter1hCritcountAvg

Severity: variable

Explanation: This fault is caused by "critical Fault average value" statistical property crossing threshold level.

Recommended Action: Check the values of "critical Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274275: fltTcaFvFltCounter1dCritcountAvg

Severity: variable

Explanation: This fault is caused by "critical Fault average value" statistical property crossing threshold level.

Recommended Action: Check the values of "critical Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274276: fltTcaFvFltCounter1wCritcountAvg

Severity: variable

Explanation: This fault is caused by "critical Fault average value" statistical property crossing threshold level.

Recommended Action: Check the values of "critical Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274277: fltTcaFvFltCounter1moCritcountAvg

Severity: variable

Explanation: This fault is caused by "critical Fault average value" statistical property crossing threshold level.

Recommended Action: Check the values of "critical Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274278: fltTcaFvFltCounter1qtrCritcountAvg

Severity: variable

Explanation: This fault is caused by "critical Fault average value" statistical property crossing threshold level.

Recommended Action: Check the values of "critical Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274279: fltTcaFvFltCounter1yearCritcountAvg

Severity: variable

Explanation: This fault is caused by "critical Fault average value" statistical property crossing threshold level.

Recommended Action: Check the values of "critical Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2743: fltInfraRsL2PortAuthPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F274312: fltTcaFvFltCounter5minCritcountTr

Severity: variable

Explanation: This fault is caused by "critical Fault trend" statistical property crossing threshold level.

Recommended Action: Check the values of "critical Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274313: fltTcaFvFltCounter15minCritcountTr

Severity: variable

Explanation: This fault is caused by "critical Fault trend" statistical property crossing threshold level.

Recommended Action: Check the values of "critical Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274314: fltTcaFvFltCounter1hCritcountTr

Severity: variable

Explanation: This fault is caused by "critical Fault trend" statistical property crossing threshold level.

Recommended Action: Check the values of "critical Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274315: fltTcaFvFltCounter1dCritcountTr

Severity: variable

Explanation: This fault is caused by "critical Fault trend" statistical property crossing threshold level.

Recommended Action: Check the values of "critical Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274316: fltTcaFvFltCounter1wCritcountTr

Severity: variable

Explanation: This fault is caused by "critical Fault trend" statistical property crossing threshold level.

Recommended Action: Check the values of "critical Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274317: fltTcaFvFltCounter1moCritcountTr

Severity: variable

Explanation: This fault is caused by "critical Fault trend" statistical property crossing threshold level.

Recommended Action: Check the values of "critical Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274318: fltTcaFvFltCounter1qtrCritcountTr

Severity: variable

Explanation: This fault is caused by "critical Fault trend" statistical property crossing threshold level.

Recommended Action: Check the values of "critical Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274319: fltTcaFvFltCounter1yearCritcountTr

Severity: variable

Explanation: This fault is caused by "critical Fault trend" statistical property crossing threshold level.

Recommended Action: Check the values of "critical Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274368: fltTcaFvFltCounter5minMajcountLast

Severity: variable

Explanation: This fault is caused by "major Fault current value" statistical property crossing threshold level.

Recommended Action: Check the values of "major Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274369: fltTcaFvFltCounter15minMajcountLast

Severity: variable

Explanation: This fault is caused by "major Fault current value" statistical property crossing threshold level.

Recommended Action: Check the values of "major Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274370: fltTcaFvFltCounter1hMajcountLast

Severity: variable

Explanation: This fault is caused by "major Fault current value" statistical property crossing threshold level.

Recommended Action: Check the values of "major Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274371: fltTcaFvFltCounter1dMajcountLast

Severity: variable

Explanation: This fault is caused by "major Fault current value" statistical property crossing threshold level.

Recommended Action: Check the values of "major Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274372: fltTcaFvFltCounter1wMajcountLast

Severity: variable

Explanation: This fault is caused by "major Fault current value" statistical property crossing threshold level.

Recommended Action: Check the values of "major Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274373: fltTcaFvFltCounter1moMajcountLast

Severity: variable

Explanation: This fault is caused by "major Fault current value" statistical property crossing threshold level.

Recommended Action: Check the values of "major Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274374: fltTcaFvFltCounter1qtrMajcountLast

Severity: variable

Explanation: This fault is caused by "major Fault current value" statistical property crossing threshold level.

Recommended Action: Check the values of "major Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274375: fltTcaFvFltCounter1yearMajcountLast

Severity: variable

Explanation: This fault is caused by "major Fault current value" statistical property crossing threshold level.

Recommended Action: Check the values of "major Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274376: fltTcaFvFltCounter5minMajcountMin

Severity: variable

Explanation: This fault is caused by "major Fault minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "major Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274377: fltTcaFvFltCounter15minMajcountMin

Severity: variable

Explanation: This fault is caused by "major Fault minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "major Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274378: fltTcaFvFltCounter1hMajcountMin

Severity: variable

Explanation: This fault is caused by "major Fault minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "major Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274379: fltTcaFvFltCounter1dMajcountMin

Severity: variable

Explanation: This fault is caused by "major Fault minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "major Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274380: fltTcaFvFltCounter1wMajcountMin

Severity: variable

Explanation: This fault is caused by "major Fault minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "major Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274381: fltTcaFvFltCounter1moMajcountMin

Severity: variable

Explanation: This fault is caused by "major Fault minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "major Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274382: fltTcaFvFltCounter1qtrMajcountMin

Severity: variable

Explanation: This fault is caused by "major Fault minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "major Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274383: fltTcaFvFltCounter1yearMajcountMin

Severity: variable

Explanation: This fault is caused by "major Fault minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "major Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274384: fltTcaFvFltCounter5minMajcountMax

Severity: variable

Explanation: This fault is caused by "major Fault maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "major Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274385: fltTcaFvFltCounter15minMajcountMax

Severity: variable

Explanation: This fault is caused by "major Fault maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "major Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274386: fltTcaFvFltCounter1hMajcountMax

Severity: variable

Explanation: This fault is caused by "major Fault maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "major Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274387: fltTcaFvFltCounter1dMajcountMax

Severity: variable

Explanation: This fault is caused by "major Fault maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "major Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274388: fltTcaFvFltCounter1wMajcountMax

Severity: variable

Explanation: This fault is caused by "major Fault maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "major Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274389: fltTcaFvFltCounter1moMajcountMax

Severity: variable

Explanation: This fault is caused by "major Fault maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "major Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274390: fltTcaFvFltCounter1qtrMajcountMax

Severity: variable

Explanation: This fault is caused by "major Fault maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "major Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274391: fltTcaFvFltCounter1yearMajcountMax

Severity: variable

Explanation: This fault is caused by "major Fault maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "major Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274392: fltTcaFvFltCounter5minMajcountAvg

Severity: variable

Explanation: This fault is caused by "major Fault average value" statistical property crossing threshold level.

Recommended Action: Check the values of "major Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274393: fltTcaFvFltCounter15minMajcountAvg

Severity: variable

Explanation: This fault is caused by "major Fault average value" statistical property crossing threshold level.

Recommended Action: Check the values of "major Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274394: fltTcaFvFltCounter1hMajcountAvg

Severity: variable

Explanation: This fault is caused by "major Fault average value" statistical property crossing threshold level.

Recommended Action: Check the values of "major Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274395: fltTcaFvFltCounter1dMajcountAvg

Severity: variable

Explanation: This fault is caused by "major Fault average value" statistical property crossing threshold level.

Recommended Action: Check the values of "major Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274396: fltTcaFvFltCounter1wMajcountAvg

Severity: variable

Explanation: This fault is caused by "major Fault average value" statistical property crossing threshold level.

Recommended Action: Check the values of "major Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274397: fltTcaFvFltCounter1moMajcountAvg

Severity: variable

Explanation: This fault is caused by "major Fault average value" statistical property crossing threshold level.

Recommended Action: Check the values of "major Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274398: fltTcaFvFltCounter1qtrMajcountAvg

Severity: variable

Explanation: This fault is caused by "major Fault average value" statistical property crossing threshold level.

Recommended Action: Check the values of "major Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274399: fltTcaFvFltCounter1yearMajcountAvg

Severity: variable

Explanation: This fault is caused by "major Fault average value" statistical property crossing threshold level.

Recommended Action: Check the values of "major Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2744: fltL2RsAaaRadiusProviderGroupResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F274432: fltTcaFvFltCounter5minMajcountTr

Severity: variable

Explanation: This fault is caused by "major Fault trend" statistical property crossing threshold level.

Recommended Action: Check the values of "major Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274433: fltTcaFvFltCounter15minMajcountTr

Severity: variable

Explanation: This fault is caused by "major Fault trend" statistical property crossing threshold level.

Recommended Action: Check the values of "major Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274434: fltTcaFvFltCounter1hMajcountTr

Severity: variable

Explanation: This fault is caused by "major Fault trend" statistical property crossing threshold level.

Recommended Action: Check the values of "major Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274435: fltTcaFvFltCounter1dMajcountTr

Severity: variable

Explanation: This fault is caused by "major Fault trend" statistical property crossing threshold level.

Recommended Action: Check the values of "major Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274436: fltTcaFvFltCounter1wMajcountTr

Severity: variable

Explanation: This fault is caused by "major Fault trend" statistical property crossing threshold level.

Recommended Action: Check the values of "major Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274437: fltTcaFvFltCounter1moMajcountTr

Severity: variable

Explanation: This fault is caused by "major Fault trend" statistical property crossing threshold level.

Recommended Action: Check the values of "major Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274438: fltTcaFvFltCounter1qtrMajcountTr

Severity: variable

Explanation: This fault is caused by "major Fault trend" statistical property crossing threshold level.

Recommended Action: Check the values of "major Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274439: fltTcaFvFltCounter1yearMajcountTr

Severity: variable

Explanation: This fault is caused by "major Fault trend" statistical property crossing threshold level.

Recommended Action: Check the values of "major Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274488: fltTcaFvFltCounter5minMincountLast

Severity: variable

Explanation: This fault is caused by "minor Fault current value" statistical property crossing threshold level.

Recommended Action: Check the values of "minor Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274489: fltTcaFvFltCounter15minMincountLast

Severity: variable

Explanation: This fault is caused by "minor Fault current value" statistical property crossing threshold level.

Recommended Action: Check the values of "minor Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274490: fltTcaFvFltCounter1hMincountLast

Severity: variable

Explanation: This fault is caused by "minor Fault current value" statistical property crossing threshold level.

Recommended Action: Check the values of "minor Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274491: fltTcaFvFltCounter1dMincountLast

Severity: variable

Explanation: This fault is caused by "minor Fault current value" statistical property crossing threshold level.

Recommended Action: Check the values of "minor Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274492: fltTcaFvFltCounter1wMincountLast

Severity: variable

Explanation: This fault is caused by "minor Fault current value" statistical property crossing threshold level.

Recommended Action: Check the values of "minor Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274493: fltTcaFvFltCounter1moMincountLast

Severity: variable

Explanation: This fault is caused by "minor Fault current value" statistical property crossing threshold level.

Recommended Action: Check the values of "minor Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274494: fltTcaFvFltCounter1qtrMincountLast

Severity: variable

Explanation: This fault is caused by "minor Fault current value" statistical property crossing threshold level.

Recommended Action: Check the values of "minor Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274495: fltTcaFvFltCounter1yearMincountLast

Severity: variable

Explanation: This fault is caused by "minor Fault current value" statistical property crossing threshold level.

Recommended Action: Check the values of "minor Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274496: fltTcaFvFltCounter5minMincountMin

Severity: variable

Explanation: This fault is caused by "minor Fault minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "minor Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274497: fltTcaFvFltCounter15minMincountMin

Severity: variable

Explanation: This fault is caused by "minor Fault minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "minor Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274498: fltTcaFvFltCounter1hMincountMin

Severity: variable

Explanation: This fault is caused by "minor Fault minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "minor Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274499: fltTcaFvFltCounter1dMincountMin

Severity: variable

Explanation: This fault is caused by "minor Fault minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "minor Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274500: fltTcaFvFltCounter1wMincountMin

Severity: variable

Explanation: This fault is caused by "minor Fault minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "minor Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274501: fltTcaFvFltCounter1moMincountMin

Severity: variable

Explanation: This fault is caused by "minor Fault minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "minor Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274502: fltTcaFvFltCounter1qtrMincountMin

Severity: variable

Explanation: This fault is caused by "minor Fault minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "minor Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274503: fltTcaFvFltCounter1yearMincountMin

Severity: variable

Explanation: This fault is caused by "minor Fault minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "minor Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274504: fltTcaFvFltCounter5minMincountMax

Severity: variable

Explanation: This fault is caused by "minor Fault maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "minor Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274505: fltTcaFvFltCounter15minMincountMax

Severity: variable

Explanation: This fault is caused by "minor Fault maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "minor Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274506: fltTcaFvFltCounter1hMincountMax

Severity: variable

Explanation: This fault is caused by "minor Fault maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "minor Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274507: fltTcaFvFltCounter1dMincountMax

Severity: variable

Explanation: This fault is caused by "minor Fault maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "minor Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274508: fltTcaFvFltCounter1wMincountMax

Severity: variable

Explanation: This fault is caused by "minor Fault maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "minor Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274509: fltTcaFvFltCounter1moMincountMax

Severity: variable

Explanation: This fault is caused by "minor Fault maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "minor Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274510: fltTcaFvFltCounter1qtrMincountMax

Severity: variable

Explanation: This fault is caused by "minor Fault maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "minor Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274511: fltTcaFvFltCounter1yearMincountMax

Severity: variable

Explanation: This fault is caused by "minor Fault maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "minor Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274512: fltTcaFvFltCounter5minMincountAvg

Severity: variable

Explanation: This fault is caused by "minor Fault average value" statistical property crossing threshold level.

Recommended Action: Check the values of "minor Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274513: fltTcaFvFltCounter15minMincountAvg

Severity: variable

Explanation: This fault is caused by "minor Fault average value" statistical property crossing threshold level.

Recommended Action: Check the values of "minor Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274514: fltTcaFvFltCounter1hMincountAvg

Severity: variable

Explanation: This fault is caused by "minor Fault average value" statistical property crossing threshold level.

Recommended Action: Check the values of "minor Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274515: fltTcaFvFltCounter1dMincountAvg

Severity: variable

Explanation: This fault is caused by "minor Fault average value" statistical property crossing threshold level.

Recommended Action: Check the values of "minor Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274516: fltTcaFvFltCounter1wMincountAvg

Severity: variable

Explanation: This fault is caused by "minor Fault average value" statistical property crossing threshold level.

Recommended Action: Check the values of "minor Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274517: fltTcaFvFltCounter1moMincountAvg

Severity: variable

Explanation: This fault is caused by "minor Fault average value" statistical property crossing threshold level.

Recommended Action: Check the values of "minor Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274518: fltTcaFvFltCounter1qtrMincountAvg

Severity: variable

Explanation: This fault is caused by "minor Fault average value" statistical property crossing threshold level.

Recommended Action: Check the values of "minor Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274519: fltTcaFvFltCounter1yearMincountAvg

Severity: variable

Explanation: This fault is caused by "minor Fault average value" statistical property crossing threshold level.

Recommended Action: Check the values of "minor Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274552: fltTcaFvFltCounter5minMincountTr

Severity: variable

Explanation: This fault is caused by "minor Fault trend" statistical property crossing threshold level.

Recommended Action: Check the values of "minor Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274553: fltTcaFvFltCounter15minMincountTr

Severity: variable

Explanation: This fault is caused by "minor Fault trend" statistical property crossing threshold level.

Recommended Action: Check the values of "minor Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274554: fltTcaFvFltCounter1hMincountTr

Severity: variable

Explanation: This fault is caused by "minor Fault trend" statistical property crossing threshold level.

Recommended Action: Check the values of "minor Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274555: fltTcaFvFltCounter1dMincountTr

Severity: variable

Explanation: This fault is caused by "minor Fault trend" statistical property crossing threshold level.

Recommended Action: Check the values of "minor Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274556: fltTcaFvFltCounter1wMincountTr

Severity: variable

Explanation: This fault is caused by "minor Fault trend" statistical property crossing threshold level.

Recommended Action: Check the values of "minor Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274557: fltTcaFvFltCounter1moMincountTr

Severity: variable

Explanation: This fault is caused by "minor Fault trend" statistical property crossing threshold level.

Recommended Action: Check the values of "minor Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274558: fltTcaFvFltCounter1qtrMincountTr

Severity: variable

Explanation: This fault is caused by "minor Fault trend" statistical property crossing threshold level.

Recommended Action: Check the values of "minor Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274559: fltTcaFvFltCounter1yearMincountTr

Severity: variable

Explanation: This fault is caused by "minor Fault trend" statistical property crossing threshold level.

Recommended Action: Check the values of "minor Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274608: fltTcaFvFltCounter5minWarncountLast

Severity: variable

Explanation: This fault is caused by "warning Fault current value" statistical property crossing threshold level.

Recommended Action: Check the values of "warning Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274609: fltTcaFvFltCounter15minWarncountLast

Severity: variable

Explanation: This fault is caused by "warning Fault current value" statistical property crossing threshold level.

Recommended Action: Check the values of "warning Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274610: fltTcaFvFltCounter1hWarncountLast

Severity: variable

Explanation: This fault is caused by "warning Fault current value" statistical property crossing threshold level.

Recommended Action: Check the values of "warning Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274611: fltTcaFvFltCounter1dWarncountLast

Severity: variable

Explanation: This fault is caused by "warning Fault current value" statistical property crossing threshold level.

Recommended Action: Check the values of "warning Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274612: fltTcaFvFltCounter1wWarncountLast

Severity: variable

Explanation: This fault is caused by "warning Fault current value" statistical property crossing threshold level.

Recommended Action: Check the values of "warning Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274613: fltTcaFvFltCounter1moWarncountLast

Severity: variable

Explanation: This fault is caused by "warning Fault current value" statistical property crossing threshold level.

Recommended Action: Check the values of "warning Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274614: fltTcaFvFltCounter1qtrWarncountLast

Severity: variable

Explanation: This fault is caused by "warning Fault current value" statistical property crossing threshold level.

Recommended Action: Check the values of "warning Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274615: fltTcaFvFltCounter1yearWarncountLast

Severity: variable

Explanation: This fault is caused by "warning Fault current value" statistical property crossing threshold level.

Recommended Action: Check the values of "warning Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274616: fltTcaFvFltCounter5minWarncountMin

Severity: variable

Explanation: This fault is caused by "warning Fault minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "warning Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274617: fltTcaFvFltCounter15minWarncountMin

Severity: variable

Explanation: This fault is caused by "warning Fault minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "warning Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274618: fltTcaFvFltCounter1hWarncountMin

Severity: variable

Explanation: This fault is caused by "warning Fault minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "warning Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274619: fltTcaFvFltCounter1dWarncountMin

Severity: variable

Explanation: This fault is caused by "warning Fault minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "warning Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274620: fltTcaFvFltCounter1wWarncountMin

Severity: variable

Explanation: This fault is caused by "warning Fault minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "warning Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274621: fltTcaFvFltCounter1moWarncountMin

Severity: variable

Explanation: This fault is caused by "warning Fault minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "warning Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274622: fltTcaFvFltCounter1qtrWarncountMin

Severity: variable

Explanation: This fault is caused by "warning Fault minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "warning Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274623: fltTcaFvFltCounter1yearWarncountMin

Severity: variable

Explanation: This fault is caused by "warning Fault minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "warning Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274624: fltTcaFvFltCounter5minWarncountMax

Severity: variable

Explanation: This fault is caused by "warning Fault maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "warning Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274625: fltTcaFvFltCounter15minWarncountMax

Severity: variable

Explanation: This fault is caused by "warning Fault maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "warning Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274626: fltTcaFvFltCounter1hWarncountMax

Severity: variable

Explanation: This fault is caused by "warning Fault maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "warning Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274627: fltTcaFvFltCounter1dWarncountMax

Severity: variable

Explanation: This fault is caused by "warning Fault maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "warning Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274628: fltTcaFvFltCounter1wWarncountMax

Severity: variable

Explanation: This fault is caused by "warning Fault maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "warning Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274629: fltTcaFvFltCounter1moWarncountMax

Severity: variable

Explanation: This fault is caused by "warning Fault maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "warning Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274630: fltTcaFvFltCounter1qtrWarncountMax

Severity: variable

Explanation: This fault is caused by "warning Fault maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "warning Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274631: fltTcaFvFltCounter1yearWarncountMax

Severity: variable

Explanation: This fault is caused by "warning Fault maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "warning Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274632: fltTcaFvFltCounter5minWarncountAvg

Severity: variable

Explanation: This fault is caused by "warning Fault average value" statistical property crossing threshold level.

Recommended Action: Check the values of "warning Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274633: fltTcaFvFltCounter15minWarncountAvg

Severity: variable

Explanation: This fault is caused by "warning Fault average value" statistical property crossing threshold level.

Recommended Action: Check the values of "warning Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274634: fltTcaFvFltCounter1hWarncountAvg

Severity: variable

Explanation: This fault is caused by "warning Fault average value" statistical property crossing threshold level.

Recommended Action: Check the values of "warning Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274635: fltTcaFvFltCounter1dWarncountAvg

Severity: variable

Explanation: This fault is caused by "warning Fault average value" statistical property crossing threshold level.

Recommended Action: Check the values of "warning Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274636: fltTcaFvFltCounter1wWarncountAvg

Severity: variable

Explanation: This fault is caused by "warning Fault average value" statistical property crossing threshold level.

Recommended Action: Check the values of "warning Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274637: fltTcaFvFltCounter1moWarncountAvg

Severity: variable

Explanation: This fault is caused by "warning Fault average value" statistical property crossing threshold level.

Recommended Action: Check the values of "warning Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274638: fltTcaFvFltCounter1qtrWarncountAvg

Severity: variable

Explanation: This fault is caused by "warning Fault average value" statistical property crossing threshold level.

Recommended Action: Check the values of "warning Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274639: fltTcaFvFltCounter1yearWarncountAvg

Severity: variable

Explanation: This fault is caused by "warning Fault average value" statistical property crossing threshold level.

Recommended Action: Check the values of "warning Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274672: fltTcaFvFltCounter5minWarncountTr

Severity: variable

Explanation: This fault is caused by "warning Fault trend" statistical property crossing threshold level.

Recommended Action: Check the values of "warning Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274673: fltTcaFvFltCounter15minWarncountTr

Severity: variable

Explanation: This fault is caused by "warning Fault trend" statistical property crossing threshold level.

Recommended Action: Check the values of "warning Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274674: fltTcaFvFltCounter1hWarncountTr

Severity: variable

Explanation: This fault is caused by "warning Fault trend" statistical property crossing threshold level.

Recommended Action: Check the values of "warning Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274675: fltTcaFvFltCounter1dWarncountTr

Severity: variable

Explanation: This fault is caused by "warning Fault trend" statistical property crossing threshold level.

Recommended Action: Check the values of "warning Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274676: fltTcaFvFltCounter1wWarncountTr

Severity: variable

Explanation: This fault is caused by "warning Fault trend" statistical property crossing threshold level.

Recommended Action: Check the values of "warning Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274677: fltTcaFvFltCounter1moWarncountTr

Severity: variable

Explanation: This fault is caused by "warning Fault trend" statistical property crossing threshold level.

Recommended Action: Check the values of "warning Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274678: fltTcaFvFltCounter1qtrWarncountTr

Severity: variable

Explanation: This fault is caused by "warning Fault trend" statistical property crossing threshold level.

Recommended Action: Check the values of "warning Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F274679: fltTcaFvFltCounter1yearWarncountTr

Severity: variable

Explanation: This fault is caused by "warning Fault trend" statistical property crossing threshold level.

Recommended Action: Check the values of "warning Fault" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275504: fltTcaProcApplicationCPU5minCurrentLast

Severity: variable

Explanation: This fault is caused by "Application CPU usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275505: fltTcaProcApplicationCPU15minCurrentLast

Severity: variable

Explanation: This fault is caused by "Application CPU usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275506: fltTcaProcApplicationCPU1hCurrentLast

Severity: variable

Explanation: This fault is caused by "Application CPU usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275507: fltTcaProcApplicationCPU1dCurrentLast

Severity: variable

Explanation: This fault is caused by "Application CPU usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275508: fltTcaProcApplicationCPU1wCurrentLast

Severity: variable

Explanation: This fault is caused by "Application CPU usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275509: fltTcaProcApplicationCPU1moCurrentLast

Severity: variable

Explanation: This fault is caused by "Application CPU usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275510: fltTcaProcApplicationCPU1qtrCurrentLast

Severity: variable

Explanation: This fault is caused by "Application CPU usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275511: fltTcaProcApplicationCPU1yearCurrentLast

Severity: variable

Explanation: This fault is caused by "Application CPU usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275512: fltTcaProcApplicationCPU5minCurrentMin

Severity: variable

Explanation: This fault is caused by "Application CPU usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275513: fltTcaProcApplicationCPU15minCurrentMin

Severity: variable

Explanation: This fault is caused by "Application CPU usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275514: fltTcaProcApplicationCPU1hCurrentMin

Severity: variable

Explanation: This fault is caused by "Application CPU usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275515: fltTcaProcApplicationCPU1dCurrentMin

Severity: variable

Explanation: This fault is caused by "Application CPU usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275516: fltTcaProcApplicationCPU1wCurrentMin

Severity: variable

Explanation: This fault is caused by "Application CPU usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275517: fltTcaProcApplicationCPU1moCurrentMin

Severity: variable

Explanation: This fault is caused by "Application CPU usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275518: fltTcaProcApplicationCPU1qtrCurrentMin

Severity: variable

Explanation: This fault is caused by "Application CPU usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275519: fltTcaProcApplicationCPU1yearCurrentMin

Severity: variable

Explanation: This fault is caused by "Application CPU usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275520: fltTcaProcApplicationCPU5minCurrentMax

Severity: variable

Explanation: This fault is caused by "Application CPU usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275521: fltTcaProcApplicationCPU15minCurrentMax

Severity: variable

Explanation: This fault is caused by "Application CPU usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275522: fltTcaProcApplicationCPU1hCurrentMax

Severity: variable

Explanation: This fault is caused by "Application CPU usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275523: fltTcaProcApplicationCPU1dCurrentMax

Severity: variable

Explanation: This fault is caused by "Application CPU usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275524: fltTcaProcApplicationCPU1wCurrentMax

Severity: variable

Explanation: This fault is caused by "Application CPU usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275525: fltTcaProcApplicationCPU1moCurrentMax

Severity: variable

Explanation: This fault is caused by "Application CPU usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275526: fltTcaProcApplicationCPU1qtrCurrentMax

Severity: variable

Explanation: This fault is caused by "Application CPU usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275527: fltTcaProcApplicationCPU1yearCurrentMax

Severity: variable

Explanation: This fault is caused by "Application CPU usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275528: fltTcaProcApplicationCPU5minCurrentAvg

Severity: variable

Explanation: This fault is caused by "Application CPU usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275529: fltTcaProcApplicationCPU15minCurrentAvg

Severity: variable

Explanation: This fault is caused by "Application CPU usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275530: fltTcaProcApplicationCPU1hCurrentAvg

Severity: variable

Explanation: This fault is caused by "Application CPU usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275531: fltTcaProcApplicationCPU1dCurrentAvg

Severity: variable

Explanation: This fault is caused by "Application CPU usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275532: fltTcaProcApplicationCPU1wCurrentAvg

Severity: variable

Explanation: This fault is caused by "Application CPU usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275533: fltTcaProcApplicationCPU1moCurrentAvg

Severity: variable

Explanation: This fault is caused by "Application CPU usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275534: fltTcaProcApplicationCPU1qtrCurrentAvg

Severity: variable

Explanation: This fault is caused by "Application CPU usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275535: fltTcaProcApplicationCPU1yearCurrentAvg

Severity: variable

Explanation: This fault is caused by "Application CPU usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275568: fltTcaProcApplicationCPU5minCurrentTr

Severity: variable

Explanation: This fault is caused by "Application CPU usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Application CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275569: fltTcaProcApplicationCPU15minCurrentTr

Severity: variable

Explanation: This fault is caused by "Application CPU usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Application CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275570: fltTcaProcApplicationCPU1hCurrentTr

Severity: variable

Explanation: This fault is caused by "Application CPU usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Application CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275571: fltTcaProcApplicationCPU1dCurrentTr

Severity: variable

Explanation: This fault is caused by "Application CPU usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Application CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275572: fltTcaProcApplicationCPU1wCurrentTr

Severity: variable

Explanation: This fault is caused by "Application CPU usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Application CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275573: fltTcaProcApplicationCPU1moCurrentTr

Severity: variable

Explanation: This fault is caused by "Application CPU usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Application CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275574: fltTcaProcApplicationCPU1qtrCurrentTr

Severity: variable

Explanation: This fault is caused by "Application CPU usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Application CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275575: fltTcaProcApplicationCPU1yearCurrentTr

Severity: variable

Explanation: This fault is caused by "Application CPU usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Application CPU usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275624: fltTcaProcApplicationMemory5minCurrentLast

Severity: variable

Explanation: This fault is caused by "Application memory usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application memory usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275625: fltTcaProcApplicationMemory15minCurrentLast

Severity: variable

Explanation: This fault is caused by "Application memory usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application memory usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275626: fltTcaProcApplicationMemory1hCurrentLast

Severity: variable

Explanation: This fault is caused by "Application memory usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application memory usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275627: fltTcaProcApplicationMemory1dCurrentLast

Severity: variable

Explanation: This fault is caused by "Application memory usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application memory usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275628: fltTcaProcApplicationMemory1wCurrentLast

Severity: variable

Explanation: This fault is caused by "Application memory usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application memory usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275629: fltTcaProcApplicationMemory1moCurrentLast

Severity: variable

Explanation: This fault is caused by "Application memory usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application memory usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275630: fltTcaProcApplicationMemory1qtrCurrentLast

Severity: variable

Explanation: This fault is caused by "Application memory usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application memory usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275631: fltTcaProcApplicationMemory1yearCurrentLast

Severity: variable

Explanation: This fault is caused by "Application memory usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application memory usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275632: fltTcaProcApplicationMemory5minCurrentMin

Severity: variable

Explanation: This fault is caused by "Application memory usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application memory usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275633: fltTcaProcApplicationMemory15minCurrentMin

Severity: variable

Explanation: This fault is caused by "Application memory usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application memory usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275634: fltTcaProcApplicationMemory1hCurrentMin

Severity: variable

Explanation: This fault is caused by "Application memory usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application memory usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275635: fltTcaProcApplicationMemory1dCurrentMin

Severity: variable

Explanation: This fault is caused by "Application memory usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application memory usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275636: fltTcaProcApplicationMemory1wCurrentMin

Severity: variable

Explanation: This fault is caused by "Application memory usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application memory usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275637: fltTcaProcApplicationMemory1moCurrentMin

Severity: variable

Explanation: This fault is caused by "Application memory usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application memory usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275638: fltTcaProcApplicationMemory1qtrCurrentMin

Severity: variable

Explanation: This fault is caused by "Application memory usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application memory usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275639: fltTcaProcApplicationMemory1yearCurrentMin

Severity: variable

Explanation: This fault is caused by "Application memory usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application memory usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275640: fltTcaProcApplicationMemory5minCurrentMax

Severity: variable

Explanation: This fault is caused by "Application memory usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application memory usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275641: fltTcaProcApplicationMemory15minCurrentMax

Severity: variable

Explanation: This fault is caused by "Application memory usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application memory usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275642: fltTcaProcApplicationMemory1hCurrentMax

Severity: variable

Explanation: This fault is caused by "Application memory usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application memory usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275643: fltTcaProcApplicationMemory1dCurrentMax

Severity: variable

Explanation: This fault is caused by "Application memory usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application memory usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275644: fltTcaProcApplicationMemory1wCurrentMax

Severity: variable

Explanation: This fault is caused by "Application memory usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application memory usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275645: fltTcaProcApplicationMemory1moCurrentMax

Severity: variable

Explanation: This fault is caused by "Application memory usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application memory usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275646: fltTcaProcApplicationMemory1qtrCurrentMax

Severity: variable

Explanation: This fault is caused by "Application memory usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application memory usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275647: fltTcaProcApplicationMemory1yearCurrentMax

Severity: variable

Explanation: This fault is caused by "Application memory usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application memory usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275648: fltTcaProcApplicationMemory5minCurrentAvg

Severity: variable

Explanation: This fault is caused by "Application memory usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application memory usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275649: fltTcaProcApplicationMemory15minCurrentAvg

Severity: variable

Explanation: This fault is caused by "Application memory usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application memory usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275650: fltTcaProcApplicationMemory1hCurrentAvg

Severity: variable

Explanation: This fault is caused by "Application memory usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application memory usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275651: fltTcaProcApplicationMemory1dCurrentAvg

Severity: variable

Explanation: This fault is caused by "Application memory usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application memory usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275652: fltTcaProcApplicationMemory1wCurrentAvg

Severity: variable

Explanation: This fault is caused by "Application memory usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application memory usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275653: fltTcaProcApplicationMemory1moCurrentAvg

Severity: variable

Explanation: This fault is caused by "Application memory usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application memory usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275654: fltTcaProcApplicationMemory1qtrCurrentAvg

Severity: variable

Explanation: This fault is caused by "Application memory usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application memory usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275655: fltTcaProcApplicationMemory1yearCurrentAvg

Severity: variable

Explanation: This fault is caused by "Application memory usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Application memory usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275688: fltTcaProcApplicationMemory5minCurrentTr

Severity: variable

Explanation: This fault is caused by "Application memory usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Application memory usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275689: fltTcaProcApplicationMemory15minCurrentTr

Severity: variable

Explanation: This fault is caused by "Application memory usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Application memory usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275690: fltTcaProcApplicationMemory1hCurrentTr

Severity: variable

Explanation: This fault is caused by "Application memory usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Application memory usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275691: fltTcaProcApplicationMemory1dCurrentTr

Severity: variable

Explanation: This fault is caused by "Application memory usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Application memory usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275692: fltTcaProcApplicationMemory1wCurrentTr

Severity: variable

Explanation: This fault is caused by "Application memory usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Application memory usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275693: fltTcaProcApplicationMemory1moCurrentTr

Severity: variable

Explanation: This fault is caused by "Application memory usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Application memory usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275694: fltTcaProcApplicationMemory1qtrCurrentTr

Severity: variable

Explanation: This fault is caused by "Application memory usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Application memory usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F275695: fltTcaProcApplicationMemory1yearCurrentTr

Severity: variable

Explanation: This fault is caused by "Application memory usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Application memory usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2770: fltDnsepgRsSvrEpgResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2771: fltEqptExtChOperStOffline

Severity: critical

Explanation: FEX is offline due to SDP timeout

Recommended Action: To recover from this fault, try the following actions:

1. Replace the SFP

2. Replace the fiber

3. Try changing the port on FEX

4. If none of the above works, try swapping the connection between the switches

F2773: fltDatetimeNtpqSyncFailed

Severity: critical

Explanation: This fault occurs when a ntp configuration on a controller has problems

Recommended Action: If you see this fault, take the following actions:

1. Verify that the ntp peers are correctly configured and are reachable.

2. Verify that the ntp peers have the correct keys.

3. Configure multiple NTP servers to guarantee availability of a valid NTP Server for synchronization.

4. The sources marked with 'x' are deduced to be having a false ticker. Configure multiple NTP Servers known to not have any issues.

5. If multiple NTP Servers are configured try to figure out if all the servers are synchronized. Remove the NTP server that is out of sync.

6. Verify whether NTP daemon is running in all or some of the NTP servers by going to Fabric -> Inventory -> Pod -> Switch -> Processes -> ntp

7. Verify if one or more of the NTP server have valid NTP configuration and valid NTP server sources.

8. It is NOT recommended to use only two NTP servers.

9. If more than one NTP server is required, four NTP servers is the recommended minimum. Four servers protects against one incorrect timesource, or "falseticker".

10. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F2774: fltFvRsIntraEpgResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F277496: fltTcaEqptIngrStormBc5minDropBytesLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277497: fltTcaEqptIngrStormBc15minDropBytesLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277498: fltTcaEqptIngrStormBc1hDropBytesLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277499: fltTcaEqptIngrStormBc1dDropBytesLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277500: fltTcaEqptIngrStormBc1wDropBytesLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277501: fltTcaEqptIngrStormBc1moDropBytesLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277502: fltTcaEqptIngrStormBc1qtrDropBytesLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277503: fltTcaEqptIngrStormBc1yearDropBytesLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277512: fltTcaEqptIngrStormBc5minDropBytesCum

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277513: fltTcaEqptIngrStormBc15minDropBytesCum

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277514: fltTcaEqptIngrStormBc1hDropBytesCum

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277515: fltTcaEqptIngrStormBc1dDropBytesCum

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277516: fltTcaEqptIngrStormBc1wDropBytesCum

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277517: fltTcaEqptIngrStormBc1moDropBytesCum

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277518: fltTcaEqptIngrStormBc1qtrDropBytesCum

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277519: fltTcaEqptIngrStormBc1yearDropBytesCum

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277520: fltTcaEqptIngrStormBc5minDropBytesPer

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277521: fltTcaEqptIngrStormBc15minDropBytesPer

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277522: fltTcaEqptIngrStormBc1hDropBytesPer

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277523: fltTcaEqptIngrStormBc1dDropBytesPer

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277524: fltTcaEqptIngrStormBc1wDropBytesPer

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277525: fltTcaEqptIngrStormBc1moDropBytesPer

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277526: fltTcaEqptIngrStormBc1qtrDropBytesPer

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277527: fltTcaEqptIngrStormBc1yearDropBytesPer

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277528: fltTcaEqptIngrStormBc5minDropBytesMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277529: fltTcaEqptIngrStormBc15minDropBytesMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277530: fltTcaEqptIngrStormBc1hDropBytesMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277531: fltTcaEqptIngrStormBc1dDropBytesMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277532: fltTcaEqptIngrStormBc1wDropBytesMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277533: fltTcaEqptIngrStormBc1moDropBytesMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277534: fltTcaEqptIngrStormBc1qtrDropBytesMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277535: fltTcaEqptIngrStormBc1yearDropBytesMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277536: fltTcaEqptIngrStormBc5minDropBytesMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277537: fltTcaEqptIngrStormBc15minDropBytesMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277538: fltTcaEqptIngrStormBc1hDropBytesMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277539: fltTcaEqptIngrStormBc1dDropBytesMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277540: fltTcaEqptIngrStormBc1wDropBytesMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277541: fltTcaEqptIngrStormBc1moDropBytesMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277542: fltTcaEqptIngrStormBc1qtrDropBytesMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277543: fltTcaEqptIngrStormBc1yearDropBytesMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277544: fltTcaEqptIngrStormBc5minDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277545: fltTcaEqptIngrStormBc15minDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277546: fltTcaEqptIngrStormBc1hDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277547: fltTcaEqptIngrStormBc1dDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277548: fltTcaEqptIngrStormBc1wDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277549: fltTcaEqptIngrStormBc1moDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277550: fltTcaEqptIngrStormBc1qtrDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277551: fltTcaEqptIngrStormBc1yearDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277576: fltTcaEqptIngrStormBc5minDropBytesTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277577: fltTcaEqptIngrStormBc15minDropBytesTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277578: fltTcaEqptIngrStormBc1hDropBytesTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277579: fltTcaEqptIngrStormBc1dDropBytesTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277580: fltTcaEqptIngrStormBc1wDropBytesTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277581: fltTcaEqptIngrStormBc1moDropBytesTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277582: fltTcaEqptIngrStormBc1qtrDropBytesTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277583: fltTcaEqptIngrStormBc1yearDropBytesTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277584: fltTcaEqptIngrStormBc5minDropBytesRate

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277585: fltTcaEqptIngrStormBc15minDropBytesRate

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277586: fltTcaEqptIngrStormBc1hDropBytesRate

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277587: fltTcaEqptIngrStormBc1dDropBytesRate

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277588: fltTcaEqptIngrStormBc1wDropBytesRate

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277589: fltTcaEqptIngrStormBc1moDropBytesRate

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277590: fltTcaEqptIngrStormBc1qtrDropBytesRate

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277591: fltTcaEqptIngrStormBc1yearDropBytesRate

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277664: fltTcaEqptIngrStormBc5minDropBytesRateLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277665: fltTcaEqptIngrStormBc15minDropBytesRateLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277666: fltTcaEqptIngrStormBc1hDropBytesRateLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277667: fltTcaEqptIngrStormBc1dDropBytesRateLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277668: fltTcaEqptIngrStormBc1wDropBytesRateLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277669: fltTcaEqptIngrStormBc1moDropBytesRateLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277670: fltTcaEqptIngrStormBc1qtrDropBytesRateLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277671: fltTcaEqptIngrStormBc1yearDropBytesRateLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277672: fltTcaEqptIngrStormBc5minDropBytesRateMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277673: fltTcaEqptIngrStormBc15minDropBytesRateMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277674: fltTcaEqptIngrStormBc1hDropBytesRateMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277675: fltTcaEqptIngrStormBc1dDropBytesRateMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277676: fltTcaEqptIngrStormBc1wDropBytesRateMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277677: fltTcaEqptIngrStormBc1moDropBytesRateMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277678: fltTcaEqptIngrStormBc1qtrDropBytesRateMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277679: fltTcaEqptIngrStormBc1yearDropBytesRateMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277680: fltTcaEqptIngrStormBc5minDropBytesRateMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277681: fltTcaEqptIngrStormBc15minDropBytesRateMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277682: fltTcaEqptIngrStormBc1hDropBytesRateMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277683: fltTcaEqptIngrStormBc1dDropBytesRateMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277684: fltTcaEqptIngrStormBc1wDropBytesRateMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277685: fltTcaEqptIngrStormBc1moDropBytesRateMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277686: fltTcaEqptIngrStormBc1qtrDropBytesRateMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277687: fltTcaEqptIngrStormBc1yearDropBytesRateMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277688: fltTcaEqptIngrStormBc5minDropBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277689: fltTcaEqptIngrStormBc15minDropBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277690: fltTcaEqptIngrStormBc1hDropBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277691: fltTcaEqptIngrStormBc1dDropBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277692: fltTcaEqptIngrStormBc1wDropBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277693: fltTcaEqptIngrStormBc1moDropBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277694: fltTcaEqptIngrStormBc1qtrDropBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277695: fltTcaEqptIngrStormBc1yearDropBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277728: fltTcaEqptIngrStormBc5minDropBytesRateTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277729: fltTcaEqptIngrStormBc15minDropBytesRateTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277730: fltTcaEqptIngrStormBc1hDropBytesRateTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277731: fltTcaEqptIngrStormBc1dDropBytesRateTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277732: fltTcaEqptIngrStormBc1wDropBytesRateTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277733: fltTcaEqptIngrStormBc1moDropBytesRateTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277734: fltTcaEqptIngrStormBc1qtrDropBytesRateTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277735: fltTcaEqptIngrStormBc1yearDropBytesRateTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Broadcast traffic rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Broadcast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277784: fltTcaEqptIngrStormMc5minDropBytesLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277785: fltTcaEqptIngrStormMc15minDropBytesLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277786: fltTcaEqptIngrStormMc1hDropBytesLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277787: fltTcaEqptIngrStormMc1dDropBytesLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277788: fltTcaEqptIngrStormMc1wDropBytesLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277789: fltTcaEqptIngrStormMc1moDropBytesLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277790: fltTcaEqptIngrStormMc1qtrDropBytesLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277791: fltTcaEqptIngrStormMc1yearDropBytesLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277800: fltTcaEqptIngrStormMc5minDropBytesCum

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277801: fltTcaEqptIngrStormMc15minDropBytesCum

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277802: fltTcaEqptIngrStormMc1hDropBytesCum

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277803: fltTcaEqptIngrStormMc1dDropBytesCum

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277804: fltTcaEqptIngrStormMc1wDropBytesCum

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277805: fltTcaEqptIngrStormMc1moDropBytesCum

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277806: fltTcaEqptIngrStormMc1qtrDropBytesCum

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277807: fltTcaEqptIngrStormMc1yearDropBytesCum

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277808: fltTcaEqptIngrStormMc5minDropBytesPer

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277809: fltTcaEqptIngrStormMc15minDropBytesPer

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277810: fltTcaEqptIngrStormMc1hDropBytesPer

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277811: fltTcaEqptIngrStormMc1dDropBytesPer

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277812: fltTcaEqptIngrStormMc1wDropBytesPer

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277813: fltTcaEqptIngrStormMc1moDropBytesPer

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277814: fltTcaEqptIngrStormMc1qtrDropBytesPer

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277815: fltTcaEqptIngrStormMc1yearDropBytesPer

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277816: fltTcaEqptIngrStormMc5minDropBytesMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277817: fltTcaEqptIngrStormMc15minDropBytesMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277818: fltTcaEqptIngrStormMc1hDropBytesMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277819: fltTcaEqptIngrStormMc1dDropBytesMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277820: fltTcaEqptIngrStormMc1wDropBytesMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277821: fltTcaEqptIngrStormMc1moDropBytesMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277822: fltTcaEqptIngrStormMc1qtrDropBytesMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277823: fltTcaEqptIngrStormMc1yearDropBytesMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277824: fltTcaEqptIngrStormMc5minDropBytesMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277825: fltTcaEqptIngrStormMc15minDropBytesMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277826: fltTcaEqptIngrStormMc1hDropBytesMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277827: fltTcaEqptIngrStormMc1dDropBytesMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277828: fltTcaEqptIngrStormMc1wDropBytesMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277829: fltTcaEqptIngrStormMc1moDropBytesMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277830: fltTcaEqptIngrStormMc1qtrDropBytesMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277831: fltTcaEqptIngrStormMc1yearDropBytesMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277832: fltTcaEqptIngrStormMc5minDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277833: fltTcaEqptIngrStormMc15minDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277834: fltTcaEqptIngrStormMc1hDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277835: fltTcaEqptIngrStormMc1dDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277836: fltTcaEqptIngrStormMc1wDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277837: fltTcaEqptIngrStormMc1moDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277838: fltTcaEqptIngrStormMc1qtrDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277839: fltTcaEqptIngrStormMc1yearDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277864: fltTcaEqptIngrStormMc5minDropBytesTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277865: fltTcaEqptIngrStormMc15minDropBytesTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277866: fltTcaEqptIngrStormMc1hDropBytesTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277867: fltTcaEqptIngrStormMc1dDropBytesTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277868: fltTcaEqptIngrStormMc1wDropBytesTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277869: fltTcaEqptIngrStormMc1moDropBytesTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277870: fltTcaEqptIngrStormMc1qtrDropBytesTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277871: fltTcaEqptIngrStormMc1yearDropBytesTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277872: fltTcaEqptIngrStormMc5minDropBytesRate

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277873: fltTcaEqptIngrStormMc15minDropBytesRate

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277874: fltTcaEqptIngrStormMc1hDropBytesRate

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277875: fltTcaEqptIngrStormMc1dDropBytesRate

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277876: fltTcaEqptIngrStormMc1wDropBytesRate

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277877: fltTcaEqptIngrStormMc1moDropBytesRate

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277878: fltTcaEqptIngrStormMc1qtrDropBytesRate

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277879: fltTcaEqptIngrStormMc1yearDropBytesRate

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277952: fltTcaEqptIngrStormMc5minDropBytesRateLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277953: fltTcaEqptIngrStormMc15minDropBytesRateLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277954: fltTcaEqptIngrStormMc1hDropBytesRateLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277955: fltTcaEqptIngrStormMc1dDropBytesRateLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277956: fltTcaEqptIngrStormMc1wDropBytesRateLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277957: fltTcaEqptIngrStormMc1moDropBytesRateLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277958: fltTcaEqptIngrStormMc1qtrDropBytesRateLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277959: fltTcaEqptIngrStormMc1yearDropBytesRateLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277960: fltTcaEqptIngrStormMc5minDropBytesRateMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277961: fltTcaEqptIngrStormMc15minDropBytesRateMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277962: fltTcaEqptIngrStormMc1hDropBytesRateMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277963: fltTcaEqptIngrStormMc1dDropBytesRateMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277964: fltTcaEqptIngrStormMc1wDropBytesRateMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277965: fltTcaEqptIngrStormMc1moDropBytesRateMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277966: fltTcaEqptIngrStormMc1qtrDropBytesRateMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277967: fltTcaEqptIngrStormMc1yearDropBytesRateMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277968: fltTcaEqptIngrStormMc5minDropBytesRateMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277969: fltTcaEqptIngrStormMc15minDropBytesRateMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277970: fltTcaEqptIngrStormMc1hDropBytesRateMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277971: fltTcaEqptIngrStormMc1dDropBytesRateMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277972: fltTcaEqptIngrStormMc1wDropBytesRateMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277973: fltTcaEqptIngrStormMc1moDropBytesRateMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277974: fltTcaEqptIngrStormMc1qtrDropBytesRateMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277975: fltTcaEqptIngrStormMc1yearDropBytesRateMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277976: fltTcaEqptIngrStormMc5minDropBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277977: fltTcaEqptIngrStormMc15minDropBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277978: fltTcaEqptIngrStormMc1hDropBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277979: fltTcaEqptIngrStormMc1dDropBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277980: fltTcaEqptIngrStormMc1wDropBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277981: fltTcaEqptIngrStormMc1moDropBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277982: fltTcaEqptIngrStormMc1qtrDropBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F277983: fltTcaEqptIngrStormMc1yearDropBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278016: fltTcaEqptIngrStormMc5minDropBytesRateTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278017: fltTcaEqptIngrStormMc15minDropBytesRateTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278018: fltTcaEqptIngrStormMc1hDropBytesRateTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278019: fltTcaEqptIngrStormMc1dDropBytesRateTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278020: fltTcaEqptIngrStormMc1wDropBytesRateTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278021: fltTcaEqptIngrStormMc1moDropBytesRateTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278022: fltTcaEqptIngrStormMc1qtrDropBytesRateTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278023: fltTcaEqptIngrStormMc1yearDropBytesRateTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Multicast traffic rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Multicast traffic rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278072: fltTcaEqptIngrStormUc5minDropBytesLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278073: fltTcaEqptIngrStormUc15minDropBytesLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278074: fltTcaEqptIngrStormUc1hDropBytesLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278075: fltTcaEqptIngrStormUc1dDropBytesLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278076: fltTcaEqptIngrStormUc1wDropBytesLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278077: fltTcaEqptIngrStormUc1moDropBytesLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278078: fltTcaEqptIngrStormUc1qtrDropBytesLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278079: fltTcaEqptIngrStormUc1yearDropBytesLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278088: fltTcaEqptIngrStormUc5minDropBytesCum

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278089: fltTcaEqptIngrStormUc15minDropBytesCum

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278090: fltTcaEqptIngrStormUc1hDropBytesCum

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278091: fltTcaEqptIngrStormUc1dDropBytesCum

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278092: fltTcaEqptIngrStormUc1wDropBytesCum

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278093: fltTcaEqptIngrStormUc1moDropBytesCum

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278094: fltTcaEqptIngrStormUc1qtrDropBytesCum

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278095: fltTcaEqptIngrStormUc1yearDropBytesCum

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278096: fltTcaEqptIngrStormUc5minDropBytesPer

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278097: fltTcaEqptIngrStormUc15minDropBytesPer

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278098: fltTcaEqptIngrStormUc1hDropBytesPer

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278099: fltTcaEqptIngrStormUc1dDropBytesPer

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278100: fltTcaEqptIngrStormUc1wDropBytesPer

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278101: fltTcaEqptIngrStormUc1moDropBytesPer

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278102: fltTcaEqptIngrStormUc1qtrDropBytesPer

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278103: fltTcaEqptIngrStormUc1yearDropBytesPer

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278104: fltTcaEqptIngrStormUc5minDropBytesMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278105: fltTcaEqptIngrStormUc15minDropBytesMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278106: fltTcaEqptIngrStormUc1hDropBytesMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278107: fltTcaEqptIngrStormUc1dDropBytesMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278108: fltTcaEqptIngrStormUc1wDropBytesMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278109: fltTcaEqptIngrStormUc1moDropBytesMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278110: fltTcaEqptIngrStormUc1qtrDropBytesMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278111: fltTcaEqptIngrStormUc1yearDropBytesMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278112: fltTcaEqptIngrStormUc5minDropBytesMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278113: fltTcaEqptIngrStormUc15minDropBytesMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278114: fltTcaEqptIngrStormUc1hDropBytesMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278115: fltTcaEqptIngrStormUc1dDropBytesMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278116: fltTcaEqptIngrStormUc1wDropBytesMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278117: fltTcaEqptIngrStormUc1moDropBytesMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278118: fltTcaEqptIngrStormUc1qtrDropBytesMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278119: fltTcaEqptIngrStormUc1yearDropBytesMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278120: fltTcaEqptIngrStormUc5minDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278121: fltTcaEqptIngrStormUc15minDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278122: fltTcaEqptIngrStormUc1hDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278123: fltTcaEqptIngrStormUc1dDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278124: fltTcaEqptIngrStormUc1wDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278125: fltTcaEqptIngrStormUc1moDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278126: fltTcaEqptIngrStormUc1qtrDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278127: fltTcaEqptIngrStormUc1yearDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278152: fltTcaEqptIngrStormUc5minDropBytesTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278153: fltTcaEqptIngrStormUc15minDropBytesTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278154: fltTcaEqptIngrStormUc1hDropBytesTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278155: fltTcaEqptIngrStormUc1dDropBytesTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278156: fltTcaEqptIngrStormUc1wDropBytesTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278157: fltTcaEqptIngrStormUc1moDropBytesTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278158: fltTcaEqptIngrStormUc1qtrDropBytesTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278159: fltTcaEqptIngrStormUc1yearDropBytesTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278160: fltTcaEqptIngrStormUc5minDropBytesRate

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278161: fltTcaEqptIngrStormUc15minDropBytesRate

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278162: fltTcaEqptIngrStormUc1hDropBytesRate

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278163: fltTcaEqptIngrStormUc1dDropBytesRate

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278164: fltTcaEqptIngrStormUc1wDropBytesRate

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278165: fltTcaEqptIngrStormUc1moDropBytesRate

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278166: fltTcaEqptIngrStormUc1qtrDropBytesRate

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278167: fltTcaEqptIngrStormUc1yearDropBytesRate

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278240: fltTcaEqptIngrStormUc5minDropBytesRateLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278241: fltTcaEqptIngrStormUc15minDropBytesRateLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278242: fltTcaEqptIngrStormUc1hDropBytesRateLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278243: fltTcaEqptIngrStormUc1dDropBytesRateLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278244: fltTcaEqptIngrStormUc1wDropBytesRateLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278245: fltTcaEqptIngrStormUc1moDropBytesRateLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278246: fltTcaEqptIngrStormUc1qtrDropBytesRateLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278247: fltTcaEqptIngrStormUc1yearDropBytesRateLast

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278248: fltTcaEqptIngrStormUc5minDropBytesRateMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278249: fltTcaEqptIngrStormUc15minDropBytesRateMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278250: fltTcaEqptIngrStormUc1hDropBytesRateMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278251: fltTcaEqptIngrStormUc1dDropBytesRateMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278252: fltTcaEqptIngrStormUc1wDropBytesRateMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278253: fltTcaEqptIngrStormUc1moDropBytesRateMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278254: fltTcaEqptIngrStormUc1qtrDropBytesRateMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278255: fltTcaEqptIngrStormUc1yearDropBytesRateMin

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278256: fltTcaEqptIngrStormUc5minDropBytesRateMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278257: fltTcaEqptIngrStormUc15minDropBytesRateMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278258: fltTcaEqptIngrStormUc1hDropBytesRateMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278259: fltTcaEqptIngrStormUc1dDropBytesRateMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278260: fltTcaEqptIngrStormUc1wDropBytesRateMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278261: fltTcaEqptIngrStormUc1moDropBytesRateMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278262: fltTcaEqptIngrStormUc1qtrDropBytesRateMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278263: fltTcaEqptIngrStormUc1yearDropBytesRateMax

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278264: fltTcaEqptIngrStormUc5minDropBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278265: fltTcaEqptIngrStormUc15minDropBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278266: fltTcaEqptIngrStormUc1hDropBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278267: fltTcaEqptIngrStormUc1dDropBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278268: fltTcaEqptIngrStormUc1wDropBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278269: fltTcaEqptIngrStormUc1moDropBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278270: fltTcaEqptIngrStormUc1qtrDropBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278271: fltTcaEqptIngrStormUc1yearDropBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278304: fltTcaEqptIngrStormUc5minDropBytesRateTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278305: fltTcaEqptIngrStormUc15minDropBytesRateTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278306: fltTcaEqptIngrStormUc1hDropBytesRateTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278307: fltTcaEqptIngrStormUc1dDropBytesRateTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278308: fltTcaEqptIngrStormUc1wDropBytesRateTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278309: fltTcaEqptIngrStormUc1moDropBytesRateTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278310: fltTcaEqptIngrStormUc1qtrDropBytesRateTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278311: fltTcaEqptIngrStormUc1yearDropBytesRateTr

Severity: variable

Explanation: This fault is caused by "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Storm Ctrl Drop Bytes for Unknown Unicast pkts rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2786: fltAnalyticsRsRecordPAttRecordMonitorRelationFailure

Severity: major

Explanation: This fault occurs when the monitor is applied on an incompatible record type

Recommended Action: To recover from this fault, try the following actions

1. Check the record match parameters for eg: Source IP, IPv6

F2788: fltPcLbPHashConfigFailed

Severity: major

Explanation: This fault occurs when hash policy can't be configured on switch

Recommended Action: Configuration not supported on NS based platforms.

F278984: fltTcaEqptMacsecrxbytes5minDecryptedOctetsLast

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278985: fltTcaEqptMacsecrxbytes15minDecryptedOctetsLast

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278986: fltTcaEqptMacsecrxbytes1hDecryptedOctetsLast

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278987: fltTcaEqptMacsecrxbytes1dDecryptedOctetsLast

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278988: fltTcaEqptMacsecrxbytes1wDecryptedOctetsLast

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278989: fltTcaEqptMacsecrxbytes1moDecryptedOctetsLast

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278990: fltTcaEqptMacsecrxbytes1qtrDecryptedOctetsLast

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F278991: fltTcaEqptMacsecrxbytes1yearDecryptedOctetsLast

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279000: fltTcaEqptMacsecrxbytes5minDecryptedOctetsCum

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279001: fltTcaEqptMacsecrxbytes15minDecryptedOctetsCum

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279002: fltTcaEqptMacsecrxbytes1hDecryptedOctetsCum

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279003: fltTcaEqptMacsecrxbytes1dDecryptedOctetsCum

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279004: fltTcaEqptMacsecrxbytes1wDecryptedOctetsCum

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279005: fltTcaEqptMacsecrxbytes1moDecryptedOctetsCum

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279006: fltTcaEqptMacsecrxbytes1qtrDecryptedOctetsCum

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279007: fltTcaEqptMacsecrxbytes1yearDecryptedOctetsCum

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279008: fltTcaEqptMacsecrxbytes5minDecryptedOctetsPer

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279009: fltTcaEqptMacsecrxbytes15minDecryptedOctetsPer

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279010: fltTcaEqptMacsecrxbytes1hDecryptedOctetsPer

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279011: fltTcaEqptMacsecrxbytes1dDecryptedOctetsPer

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279012: fltTcaEqptMacsecrxbytes1wDecryptedOctetsPer

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279013: fltTcaEqptMacsecrxbytes1moDecryptedOctetsPer

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279014: fltTcaEqptMacsecrxbytes1qtrDecryptedOctetsPer

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279015: fltTcaEqptMacsecrxbytes1yearDecryptedOctetsPer

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279016: fltTcaEqptMacsecrxbytes5minDecryptedOctetsMin

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279017: fltTcaEqptMacsecrxbytes15minDecryptedOctetsMin

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279018: fltTcaEqptMacsecrxbytes1hDecryptedOctetsMin

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279019: fltTcaEqptMacsecrxbytes1dDecryptedOctetsMin

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279020: fltTcaEqptMacsecrxbytes1wDecryptedOctetsMin

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279021: fltTcaEqptMacsecrxbytes1moDecryptedOctetsMin

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279022: fltTcaEqptMacsecrxbytes1qtrDecryptedOctetsMin

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279023: fltTcaEqptMacsecrxbytes1yearDecryptedOctetsMin

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279024: fltTcaEqptMacsecrxbytes5minDecryptedOctetsMax

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279025: fltTcaEqptMacsecrxbytes15minDecryptedOctetsMax

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279026: fltTcaEqptMacsecrxbytes1hDecryptedOctetsMax

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279027: fltTcaEqptMacsecrxbytes1dDecryptedOctetsMax

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279028: fltTcaEqptMacsecrxbytes1wDecryptedOctetsMax

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279029: fltTcaEqptMacsecrxbytes1moDecryptedOctetsMax

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279030: fltTcaEqptMacsecrxbytes1qtrDecryptedOctetsMax

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279031: fltTcaEqptMacsecrxbytes1yearDecryptedOctetsMax

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279032: fltTcaEqptMacsecrxbytes5minDecryptedOctetsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279033: fltTcaEqptMacsecrxbytes15minDecryptedOctetsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279034: fltTcaEqptMacsecrxbytes1hDecryptedOctetsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279035: fltTcaEqptMacsecrxbytes1dDecryptedOctetsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279036: fltTcaEqptMacsecrxbytes1wDecryptedOctetsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279037: fltTcaEqptMacsecrxbytes1moDecryptedOctetsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279038: fltTcaEqptMacsecrxbytes1qtrDecryptedOctetsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279039: fltTcaEqptMacsecrxbytes1yearDecryptedOctetsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279064: fltTcaEqptMacsecrxbytes5minDecryptedOctetsTr

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279065: fltTcaEqptMacsecrxbytes15minDecryptedOctetsTr

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279066: fltTcaEqptMacsecrxbytes1hDecryptedOctetsTr

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279067: fltTcaEqptMacsecrxbytes1dDecryptedOctetsTr

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279068: fltTcaEqptMacsecrxbytes1wDecryptedOctetsTr

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279069: fltTcaEqptMacsecrxbytes1moDecryptedOctetsTr

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279070: fltTcaEqptMacsecrxbytes1qtrDecryptedOctetsTr

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279071: fltTcaEqptMacsecrxbytes1yearDecryptedOctetsTr

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279072: fltTcaEqptMacsecrxbytes5minDecryptedOctetsRate

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279073: fltTcaEqptMacsecrxbytes15minDecryptedOctetsRate

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279074: fltTcaEqptMacsecrxbytes1hDecryptedOctetsRate

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279075: fltTcaEqptMacsecrxbytes1dDecryptedOctetsRate

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279076: fltTcaEqptMacsecrxbytes1wDecryptedOctetsRate

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279077: fltTcaEqptMacsecrxbytes1moDecryptedOctetsRate

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279078: fltTcaEqptMacsecrxbytes1qtrDecryptedOctetsRate

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279079: fltTcaEqptMacsecrxbytes1yearDecryptedOctetsRate

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279152: fltTcaEqptMacsecrxbytes5minDecryptedOctetsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279153: fltTcaEqptMacsecrxbytes15minDecryptedOctetsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279154: fltTcaEqptMacsecrxbytes1hDecryptedOctetsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279155: fltTcaEqptMacsecrxbytes1dDecryptedOctetsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279156: fltTcaEqptMacsecrxbytes1wDecryptedOctetsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279157: fltTcaEqptMacsecrxbytes1moDecryptedOctetsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279158: fltTcaEqptMacsecrxbytes1qtrDecryptedOctetsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279159: fltTcaEqptMacsecrxbytes1yearDecryptedOctetsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279160: fltTcaEqptMacsecrxbytes5minDecryptedOctetsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279161: fltTcaEqptMacsecrxbytes15minDecryptedOctetsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279162: fltTcaEqptMacsecrxbytes1hDecryptedOctetsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279163: fltTcaEqptMacsecrxbytes1dDecryptedOctetsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279164: fltTcaEqptMacsecrxbytes1wDecryptedOctetsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279165: fltTcaEqptMacsecrxbytes1moDecryptedOctetsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279166: fltTcaEqptMacsecrxbytes1qtrDecryptedOctetsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279167: fltTcaEqptMacsecrxbytes1yearDecryptedOctetsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279168: fltTcaEqptMacsecrxbytes5minDecryptedOctetsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279169: fltTcaEqptMacsecrxbytes15minDecryptedOctetsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279170: fltTcaEqptMacsecrxbytes1hDecryptedOctetsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279171: fltTcaEqptMacsecrxbytes1dDecryptedOctetsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279172: fltTcaEqptMacsecrxbytes1wDecryptedOctetsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279173: fltTcaEqptMacsecrxbytes1moDecryptedOctetsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279174: fltTcaEqptMacsecrxbytes1qtrDecryptedOctetsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279175: fltTcaEqptMacsecrxbytes1yearDecryptedOctetsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279176: fltTcaEqptMacsecrxbytes5minDecryptedOctetsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279177: fltTcaEqptMacsecrxbytes15minDecryptedOctetsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279178: fltTcaEqptMacsecrxbytes1hDecryptedOctetsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279179: fltTcaEqptMacsecrxbytes1dDecryptedOctetsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279180: fltTcaEqptMacsecrxbytes1wDecryptedOctetsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279181: fltTcaEqptMacsecrxbytes1moDecryptedOctetsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279182: fltTcaEqptMacsecrxbytes1qtrDecryptedOctetsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279183: fltTcaEqptMacsecrxbytes1yearDecryptedOctetsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279216: fltTcaEqptMacsecrxbytes5minDecryptedOctetsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279217: fltTcaEqptMacsecrxbytes15minDecryptedOctetsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279218: fltTcaEqptMacsecrxbytes1hDecryptedOctetsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279219: fltTcaEqptMacsecrxbytes1dDecryptedOctetsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279220: fltTcaEqptMacsecrxbytes1wDecryptedOctetsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279221: fltTcaEqptMacsecrxbytes1moDecryptedOctetsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279222: fltTcaEqptMacsecrxbytes1qtrDecryptedOctetsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279223: fltTcaEqptMacsecrxbytes1yearDecryptedOctetsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted octets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279272: fltTcaEqptMacsecrxbytes5minValidatedOctetsLast

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279273: fltTcaEqptMacsecrxbytes15minValidatedOctetsLast

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279274: fltTcaEqptMacsecrxbytes1hValidatedOctetsLast

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279275: fltTcaEqptMacsecrxbytes1dValidatedOctetsLast

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279276: fltTcaEqptMacsecrxbytes1wValidatedOctetsLast

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279277: fltTcaEqptMacsecrxbytes1moValidatedOctetsLast

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279278: fltTcaEqptMacsecrxbytes1qtrValidatedOctetsLast

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279279: fltTcaEqptMacsecrxbytes1yearValidatedOctetsLast

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279288: fltTcaEqptMacsecrxbytes5minValidatedOctetsCum

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279289: fltTcaEqptMacsecrxbytes15minValidatedOctetsCum

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279290: fltTcaEqptMacsecrxbytes1hValidatedOctetsCum

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279291: fltTcaEqptMacsecrxbytes1dValidatedOctetsCum

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279292: fltTcaEqptMacsecrxbytes1wValidatedOctetsCum

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279293: fltTcaEqptMacsecrxbytes1moValidatedOctetsCum

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279294: fltTcaEqptMacsecrxbytes1qtrValidatedOctetsCum

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279295: fltTcaEqptMacsecrxbytes1yearValidatedOctetsCum

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279296: fltTcaEqptMacsecrxbytes5minValidatedOctetsPer

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279297: fltTcaEqptMacsecrxbytes15minValidatedOctetsPer

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279298: fltTcaEqptMacsecrxbytes1hValidatedOctetsPer

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279299: fltTcaEqptMacsecrxbytes1dValidatedOctetsPer

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279300: fltTcaEqptMacsecrxbytes1wValidatedOctetsPer

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279301: fltTcaEqptMacsecrxbytes1moValidatedOctetsPer

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279302: fltTcaEqptMacsecrxbytes1qtrValidatedOctetsPer

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279303: fltTcaEqptMacsecrxbytes1yearValidatedOctetsPer

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279304: fltTcaEqptMacsecrxbytes5minValidatedOctetsMin

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279305: fltTcaEqptMacsecrxbytes15minValidatedOctetsMin

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279306: fltTcaEqptMacsecrxbytes1hValidatedOctetsMin

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279307: fltTcaEqptMacsecrxbytes1dValidatedOctetsMin

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279308: fltTcaEqptMacsecrxbytes1wValidatedOctetsMin

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279309: fltTcaEqptMacsecrxbytes1moValidatedOctetsMin

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279310: fltTcaEqptMacsecrxbytes1qtrValidatedOctetsMin

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279311: fltTcaEqptMacsecrxbytes1yearValidatedOctetsMin

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279312: fltTcaEqptMacsecrxbytes5minValidatedOctetsMax

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279313: fltTcaEqptMacsecrxbytes15minValidatedOctetsMax

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279314: fltTcaEqptMacsecrxbytes1hValidatedOctetsMax

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279315: fltTcaEqptMacsecrxbytes1dValidatedOctetsMax

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279316: fltTcaEqptMacsecrxbytes1wValidatedOctetsMax

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279317: fltTcaEqptMacsecrxbytes1moValidatedOctetsMax

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279318: fltTcaEqptMacsecrxbytes1qtrValidatedOctetsMax

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279319: fltTcaEqptMacsecrxbytes1yearValidatedOctetsMax

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279320: fltTcaEqptMacsecrxbytes5minValidatedOctetsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279321: fltTcaEqptMacsecrxbytes15minValidatedOctetsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279322: fltTcaEqptMacsecrxbytes1hValidatedOctetsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279323: fltTcaEqptMacsecrxbytes1dValidatedOctetsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279324: fltTcaEqptMacsecrxbytes1wValidatedOctetsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279325: fltTcaEqptMacsecrxbytes1moValidatedOctetsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279326: fltTcaEqptMacsecrxbytes1qtrValidatedOctetsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279327: fltTcaEqptMacsecrxbytes1yearValidatedOctetsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279352: fltTcaEqptMacsecrxbytes5minValidatedOctetsTr

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279353: fltTcaEqptMacsecrxbytes15minValidatedOctetsTr

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279354: fltTcaEqptMacsecrxbytes1hValidatedOctetsTr

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279355: fltTcaEqptMacsecrxbytes1dValidatedOctetsTr

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279356: fltTcaEqptMacsecrxbytes1wValidatedOctetsTr

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279357: fltTcaEqptMacsecrxbytes1moValidatedOctetsTr

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279358: fltTcaEqptMacsecrxbytes1qtrValidatedOctetsTr

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279359: fltTcaEqptMacsecrxbytes1yearValidatedOctetsTr

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279360: fltTcaEqptMacsecrxbytes5minValidatedOctetsRate

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279361: fltTcaEqptMacsecrxbytes15minValidatedOctetsRate

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279362: fltTcaEqptMacsecrxbytes1hValidatedOctetsRate

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279363: fltTcaEqptMacsecrxbytes1dValidatedOctetsRate

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279364: fltTcaEqptMacsecrxbytes1wValidatedOctetsRate

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279365: fltTcaEqptMacsecrxbytes1moValidatedOctetsRate

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279366: fltTcaEqptMacsecrxbytes1qtrValidatedOctetsRate

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279367: fltTcaEqptMacsecrxbytes1yearValidatedOctetsRate

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2794: fltFabricRsL3IfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F279440: fltTcaEqptMacsecrxbytes5minValidatedOctetsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279441: fltTcaEqptMacsecrxbytes15minValidatedOctetsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279442: fltTcaEqptMacsecrxbytes1hValidatedOctetsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279443: fltTcaEqptMacsecrxbytes1dValidatedOctetsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279444: fltTcaEqptMacsecrxbytes1wValidatedOctetsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279445: fltTcaEqptMacsecrxbytes1moValidatedOctetsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279446: fltTcaEqptMacsecrxbytes1qtrValidatedOctetsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279447: fltTcaEqptMacsecrxbytes1yearValidatedOctetsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279448: fltTcaEqptMacsecrxbytes5minValidatedOctetsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279449: fltTcaEqptMacsecrxbytes15minValidatedOctetsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279450: fltTcaEqptMacsecrxbytes1hValidatedOctetsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279451: fltTcaEqptMacsecrxbytes1dValidatedOctetsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279452: fltTcaEqptMacsecrxbytes1wValidatedOctetsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279453: fltTcaEqptMacsecrxbytes1moValidatedOctetsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279454: fltTcaEqptMacsecrxbytes1qtrValidatedOctetsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279455: fltTcaEqptMacsecrxbytes1yearValidatedOctetsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279456: fltTcaEqptMacsecrxbytes5minValidatedOctetsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279457: fltTcaEqptMacsecrxbytes15minValidatedOctetsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279458: fltTcaEqptMacsecrxbytes1hValidatedOctetsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279459: fltTcaEqptMacsecrxbytes1dValidatedOctetsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279460: fltTcaEqptMacsecrxbytes1wValidatedOctetsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279461: fltTcaEqptMacsecrxbytes1moValidatedOctetsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279462: fltTcaEqptMacsecrxbytes1qtrValidatedOctetsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279463: fltTcaEqptMacsecrxbytes1yearValidatedOctetsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279464: fltTcaEqptMacsecrxbytes5minValidatedOctetsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279465: fltTcaEqptMacsecrxbytes15minValidatedOctetsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279466: fltTcaEqptMacsecrxbytes1hValidatedOctetsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279467: fltTcaEqptMacsecrxbytes1dValidatedOctetsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279468: fltTcaEqptMacsecrxbytes1wValidatedOctetsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279469: fltTcaEqptMacsecrxbytes1moValidatedOctetsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279470: fltTcaEqptMacsecrxbytes1qtrValidatedOctetsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279471: fltTcaEqptMacsecrxbytes1yearValidatedOctetsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279504: fltTcaEqptMacsecrxbytes5minValidatedOctetsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279505: fltTcaEqptMacsecrxbytes15minValidatedOctetsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279506: fltTcaEqptMacsecrxbytes1hValidatedOctetsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279507: fltTcaEqptMacsecrxbytes1dValidatedOctetsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279508: fltTcaEqptMacsecrxbytes1wValidatedOctetsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279509: fltTcaEqptMacsecrxbytes1moValidatedOctetsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279510: fltTcaEqptMacsecrxbytes1qtrValidatedOctetsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279511: fltTcaEqptMacsecrxbytes1yearValidatedOctetsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Validated octets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279560: fltTcaEqptMacsecrxpkts5minDecryptedPacktesLast

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279561: fltTcaEqptMacsecrxpkts15minDecryptedPacktesLast

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279562: fltTcaEqptMacsecrxpkts1hDecryptedPacktesLast

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279563: fltTcaEqptMacsecrxpkts1dDecryptedPacktesLast

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279564: fltTcaEqptMacsecrxpkts1wDecryptedPacktesLast

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279565: fltTcaEqptMacsecrxpkts1moDecryptedPacktesLast

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279566: fltTcaEqptMacsecrxpkts1qtrDecryptedPacktesLast

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279567: fltTcaEqptMacsecrxpkts1yearDecryptedPacktesLast

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279576: fltTcaEqptMacsecrxpkts5minDecryptedPacktesCum

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279577: fltTcaEqptMacsecrxpkts15minDecryptedPacktesCum

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279578: fltTcaEqptMacsecrxpkts1hDecryptedPacktesCum

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279579: fltTcaEqptMacsecrxpkts1dDecryptedPacktesCum

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279580: fltTcaEqptMacsecrxpkts1wDecryptedPacktesCum

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279581: fltTcaEqptMacsecrxpkts1moDecryptedPacktesCum

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279582: fltTcaEqptMacsecrxpkts1qtrDecryptedPacktesCum

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279583: fltTcaEqptMacsecrxpkts1yearDecryptedPacktesCum

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279584: fltTcaEqptMacsecrxpkts5minDecryptedPacktesPer

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279585: fltTcaEqptMacsecrxpkts15minDecryptedPacktesPer

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279586: fltTcaEqptMacsecrxpkts1hDecryptedPacktesPer

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279587: fltTcaEqptMacsecrxpkts1dDecryptedPacktesPer

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279588: fltTcaEqptMacsecrxpkts1wDecryptedPacktesPer

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279589: fltTcaEqptMacsecrxpkts1moDecryptedPacktesPer

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279590: fltTcaEqptMacsecrxpkts1qtrDecryptedPacktesPer

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279591: fltTcaEqptMacsecrxpkts1yearDecryptedPacktesPer

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279592: fltTcaEqptMacsecrxpkts5minDecryptedPacktesMin

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279593: fltTcaEqptMacsecrxpkts15minDecryptedPacktesMin

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279594: fltTcaEqptMacsecrxpkts1hDecryptedPacktesMin

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279595: fltTcaEqptMacsecrxpkts1dDecryptedPacktesMin

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279596: fltTcaEqptMacsecrxpkts1wDecryptedPacktesMin

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279597: fltTcaEqptMacsecrxpkts1moDecryptedPacktesMin

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279598: fltTcaEqptMacsecrxpkts1qtrDecryptedPacktesMin

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279599: fltTcaEqptMacsecrxpkts1yearDecryptedPacktesMin

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279600: fltTcaEqptMacsecrxpkts5minDecryptedPacktesMax

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279601: fltTcaEqptMacsecrxpkts15minDecryptedPacktesMax

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279602: fltTcaEqptMacsecrxpkts1hDecryptedPacktesMax

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279603: fltTcaEqptMacsecrxpkts1dDecryptedPacktesMax

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279604: fltTcaEqptMacsecrxpkts1wDecryptedPacktesMax

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279605: fltTcaEqptMacsecrxpkts1moDecryptedPacktesMax

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279606: fltTcaEqptMacsecrxpkts1qtrDecryptedPacktesMax

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279607: fltTcaEqptMacsecrxpkts1yearDecryptedPacktesMax

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279608: fltTcaEqptMacsecrxpkts5minDecryptedPacktesAvg

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279609: fltTcaEqptMacsecrxpkts15minDecryptedPacktesAvg

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279610: fltTcaEqptMacsecrxpkts1hDecryptedPacktesAvg

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279611: fltTcaEqptMacsecrxpkts1dDecryptedPacktesAvg

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279612: fltTcaEqptMacsecrxpkts1wDecryptedPacktesAvg

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279613: fltTcaEqptMacsecrxpkts1moDecryptedPacktesAvg

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279614: fltTcaEqptMacsecrxpkts1qtrDecryptedPacktesAvg

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279615: fltTcaEqptMacsecrxpkts1yearDecryptedPacktesAvg

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279640: fltTcaEqptMacsecrxpkts5minDecryptedPacktesTr

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279641: fltTcaEqptMacsecrxpkts15minDecryptedPacktesTr

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279642: fltTcaEqptMacsecrxpkts1hDecryptedPacktesTr

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279643: fltTcaEqptMacsecrxpkts1dDecryptedPacktesTr

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279644: fltTcaEqptMacsecrxpkts1wDecryptedPacktesTr

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279645: fltTcaEqptMacsecrxpkts1moDecryptedPacktesTr

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279646: fltTcaEqptMacsecrxpkts1qtrDecryptedPacktesTr

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279647: fltTcaEqptMacsecrxpkts1yearDecryptedPacktesTr

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279648: fltTcaEqptMacsecrxpkts5minDecryptedPacktesRate

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279649: fltTcaEqptMacsecrxpkts15minDecryptedPacktesRate

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279650: fltTcaEqptMacsecrxpkts1hDecryptedPacktesRate

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279651: fltTcaEqptMacsecrxpkts1dDecryptedPacktesRate

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279652: fltTcaEqptMacsecrxpkts1wDecryptedPacktesRate

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279653: fltTcaEqptMacsecrxpkts1moDecryptedPacktesRate

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279654: fltTcaEqptMacsecrxpkts1qtrDecryptedPacktesRate

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279655: fltTcaEqptMacsecrxpkts1yearDecryptedPacktesRate

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279728: fltTcaEqptMacsecrxpkts5minDecryptedPacktesRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279729: fltTcaEqptMacsecrxpkts15minDecryptedPacktesRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279730: fltTcaEqptMacsecrxpkts1hDecryptedPacktesRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279731: fltTcaEqptMacsecrxpkts1dDecryptedPacktesRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279732: fltTcaEqptMacsecrxpkts1wDecryptedPacktesRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279733: fltTcaEqptMacsecrxpkts1moDecryptedPacktesRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279734: fltTcaEqptMacsecrxpkts1qtrDecryptedPacktesRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279735: fltTcaEqptMacsecrxpkts1yearDecryptedPacktesRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279736: fltTcaEqptMacsecrxpkts5minDecryptedPacktesRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279737: fltTcaEqptMacsecrxpkts15minDecryptedPacktesRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279738: fltTcaEqptMacsecrxpkts1hDecryptedPacktesRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279739: fltTcaEqptMacsecrxpkts1dDecryptedPacktesRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279740: fltTcaEqptMacsecrxpkts1wDecryptedPacktesRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279741: fltTcaEqptMacsecrxpkts1moDecryptedPacktesRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279742: fltTcaEqptMacsecrxpkts1qtrDecryptedPacktesRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279743: fltTcaEqptMacsecrxpkts1yearDecryptedPacktesRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279744: fltTcaEqptMacsecrxpkts5minDecryptedPacktesRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279745: fltTcaEqptMacsecrxpkts15minDecryptedPacktesRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279746: fltTcaEqptMacsecrxpkts1hDecryptedPacktesRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279747: fltTcaEqptMacsecrxpkts1dDecryptedPacktesRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279748: fltTcaEqptMacsecrxpkts1wDecryptedPacktesRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279749: fltTcaEqptMacsecrxpkts1moDecryptedPacktesRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279750: fltTcaEqptMacsecrxpkts1qtrDecryptedPacktesRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279751: fltTcaEqptMacsecrxpkts1yearDecryptedPacktesRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279752: fltTcaEqptMacsecrxpkts5minDecryptedPacktesRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279753: fltTcaEqptMacsecrxpkts15minDecryptedPacktesRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279754: fltTcaEqptMacsecrxpkts1hDecryptedPacktesRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279755: fltTcaEqptMacsecrxpkts1dDecryptedPacktesRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279756: fltTcaEqptMacsecrxpkts1wDecryptedPacktesRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279757: fltTcaEqptMacsecrxpkts1moDecryptedPacktesRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279758: fltTcaEqptMacsecrxpkts1qtrDecryptedPacktesRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279759: fltTcaEqptMacsecrxpkts1yearDecryptedPacktesRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279792: fltTcaEqptMacsecrxpkts5minDecryptedPacktesRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279793: fltTcaEqptMacsecrxpkts15minDecryptedPacktesRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279794: fltTcaEqptMacsecrxpkts1hDecryptedPacktesRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279795: fltTcaEqptMacsecrxpkts1dDecryptedPacktesRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279796: fltTcaEqptMacsecrxpkts1wDecryptedPacktesRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279797: fltTcaEqptMacsecrxpkts1moDecryptedPacktesRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279798: fltTcaEqptMacsecrxpkts1qtrDecryptedPacktesRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279799: fltTcaEqptMacsecrxpkts1yearDecryptedPacktesRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Decrypted packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279848: fltTcaEqptMacsecrxpkts5minValidatedPacketsLast

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279849: fltTcaEqptMacsecrxpkts15minValidatedPacketsLast

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279850: fltTcaEqptMacsecrxpkts1hValidatedPacketsLast

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279851: fltTcaEqptMacsecrxpkts1dValidatedPacketsLast

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279852: fltTcaEqptMacsecrxpkts1wValidatedPacketsLast

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279853: fltTcaEqptMacsecrxpkts1moValidatedPacketsLast

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279854: fltTcaEqptMacsecrxpkts1qtrValidatedPacketsLast

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279855: fltTcaEqptMacsecrxpkts1yearValidatedPacketsLast

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279864: fltTcaEqptMacsecrxpkts5minValidatedPacketsCum

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279865: fltTcaEqptMacsecrxpkts15minValidatedPacketsCum

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279866: fltTcaEqptMacsecrxpkts1hValidatedPacketsCum

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279867: fltTcaEqptMacsecrxpkts1dValidatedPacketsCum

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279868: fltTcaEqptMacsecrxpkts1wValidatedPacketsCum

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279869: fltTcaEqptMacsecrxpkts1moValidatedPacketsCum

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279870: fltTcaEqptMacsecrxpkts1qtrValidatedPacketsCum

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279871: fltTcaEqptMacsecrxpkts1yearValidatedPacketsCum

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279872: fltTcaEqptMacsecrxpkts5minValidatedPacketsPer

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279873: fltTcaEqptMacsecrxpkts15minValidatedPacketsPer

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279874: fltTcaEqptMacsecrxpkts1hValidatedPacketsPer

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279875: fltTcaEqptMacsecrxpkts1dValidatedPacketsPer

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279876: fltTcaEqptMacsecrxpkts1wValidatedPacketsPer

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279877: fltTcaEqptMacsecrxpkts1moValidatedPacketsPer

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279878: fltTcaEqptMacsecrxpkts1qtrValidatedPacketsPer

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279879: fltTcaEqptMacsecrxpkts1yearValidatedPacketsPer

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279880: fltTcaEqptMacsecrxpkts5minValidatedPacketsMin

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279881: fltTcaEqptMacsecrxpkts15minValidatedPacketsMin

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279882: fltTcaEqptMacsecrxpkts1hValidatedPacketsMin

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279883: fltTcaEqptMacsecrxpkts1dValidatedPacketsMin

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279884: fltTcaEqptMacsecrxpkts1wValidatedPacketsMin

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279885: fltTcaEqptMacsecrxpkts1moValidatedPacketsMin

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279886: fltTcaEqptMacsecrxpkts1qtrValidatedPacketsMin

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279887: fltTcaEqptMacsecrxpkts1yearValidatedPacketsMin

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279888: fltTcaEqptMacsecrxpkts5minValidatedPacketsMax

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279889: fltTcaEqptMacsecrxpkts15minValidatedPacketsMax

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279890: fltTcaEqptMacsecrxpkts1hValidatedPacketsMax

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279891: fltTcaEqptMacsecrxpkts1dValidatedPacketsMax

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279892: fltTcaEqptMacsecrxpkts1wValidatedPacketsMax

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279893: fltTcaEqptMacsecrxpkts1moValidatedPacketsMax

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279894: fltTcaEqptMacsecrxpkts1qtrValidatedPacketsMax

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279895: fltTcaEqptMacsecrxpkts1yearValidatedPacketsMax

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279896: fltTcaEqptMacsecrxpkts5minValidatedPacketsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279897: fltTcaEqptMacsecrxpkts15minValidatedPacketsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279898: fltTcaEqptMacsecrxpkts1hValidatedPacketsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279899: fltTcaEqptMacsecrxpkts1dValidatedPacketsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2799: fltInfraRsL2NodeAuthPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F279900: fltTcaEqptMacsecrxpkts1wValidatedPacketsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279901: fltTcaEqptMacsecrxpkts1moValidatedPacketsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279902: fltTcaEqptMacsecrxpkts1qtrValidatedPacketsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279903: fltTcaEqptMacsecrxpkts1yearValidatedPacketsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279928: fltTcaEqptMacsecrxpkts5minValidatedPacketsTr

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279929: fltTcaEqptMacsecrxpkts15minValidatedPacketsTr

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279930: fltTcaEqptMacsecrxpkts1hValidatedPacketsTr

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279931: fltTcaEqptMacsecrxpkts1dValidatedPacketsTr

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279932: fltTcaEqptMacsecrxpkts1wValidatedPacketsTr

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279933: fltTcaEqptMacsecrxpkts1moValidatedPacketsTr

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279934: fltTcaEqptMacsecrxpkts1qtrValidatedPacketsTr

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279935: fltTcaEqptMacsecrxpkts1yearValidatedPacketsTr

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279936: fltTcaEqptMacsecrxpkts5minValidatedPacketsRate

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279937: fltTcaEqptMacsecrxpkts15minValidatedPacketsRate

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279938: fltTcaEqptMacsecrxpkts1hValidatedPacketsRate

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279939: fltTcaEqptMacsecrxpkts1dValidatedPacketsRate

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279940: fltTcaEqptMacsecrxpkts1wValidatedPacketsRate

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279941: fltTcaEqptMacsecrxpkts1moValidatedPacketsRate

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279942: fltTcaEqptMacsecrxpkts1qtrValidatedPacketsRate

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F279943: fltTcaEqptMacsecrxpkts1yearValidatedPacketsRate

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280016: fltTcaEqptMacsecrxpkts5minValidatedPacketsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280017: fltTcaEqptMacsecrxpkts15minValidatedPacketsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280018: fltTcaEqptMacsecrxpkts1hValidatedPacketsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280019: fltTcaEqptMacsecrxpkts1dValidatedPacketsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280020: fltTcaEqptMacsecrxpkts1wValidatedPacketsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280021: fltTcaEqptMacsecrxpkts1moValidatedPacketsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280022: fltTcaEqptMacsecrxpkts1qtrValidatedPacketsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280023: fltTcaEqptMacsecrxpkts1yearValidatedPacketsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280024: fltTcaEqptMacsecrxpkts5minValidatedPacketsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280025: fltTcaEqptMacsecrxpkts15minValidatedPacketsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280026: fltTcaEqptMacsecrxpkts1hValidatedPacketsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280027: fltTcaEqptMacsecrxpkts1dValidatedPacketsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280028: fltTcaEqptMacsecrxpkts1wValidatedPacketsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280029: fltTcaEqptMacsecrxpkts1moValidatedPacketsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280030: fltTcaEqptMacsecrxpkts1qtrValidatedPacketsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280031: fltTcaEqptMacsecrxpkts1yearValidatedPacketsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280032: fltTcaEqptMacsecrxpkts5minValidatedPacketsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280033: fltTcaEqptMacsecrxpkts15minValidatedPacketsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280034: fltTcaEqptMacsecrxpkts1hValidatedPacketsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280035: fltTcaEqptMacsecrxpkts1dValidatedPacketsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280036: fltTcaEqptMacsecrxpkts1wValidatedPacketsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280037: fltTcaEqptMacsecrxpkts1moValidatedPacketsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280038: fltTcaEqptMacsecrxpkts1qtrValidatedPacketsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280039: fltTcaEqptMacsecrxpkts1yearValidatedPacketsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280040: fltTcaEqptMacsecrxpkts5minValidatedPacketsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280041: fltTcaEqptMacsecrxpkts15minValidatedPacketsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280042: fltTcaEqptMacsecrxpkts1hValidatedPacketsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280043: fltTcaEqptMacsecrxpkts1dValidatedPacketsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280044: fltTcaEqptMacsecrxpkts1wValidatedPacketsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280045: fltTcaEqptMacsecrxpkts1moValidatedPacketsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280046: fltTcaEqptMacsecrxpkts1qtrValidatedPacketsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280047: fltTcaEqptMacsecrxpkts1yearValidatedPacketsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280080: fltTcaEqptMacsecrxpkts5minValidatedPacketsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280081: fltTcaEqptMacsecrxpkts15minValidatedPacketsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280082: fltTcaEqptMacsecrxpkts1hValidatedPacketsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280083: fltTcaEqptMacsecrxpkts1dValidatedPacketsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280084: fltTcaEqptMacsecrxpkts1wValidatedPacketsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280085: fltTcaEqptMacsecrxpkts1moValidatedPacketsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280086: fltTcaEqptMacsecrxpkts1qtrValidatedPacketsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280087: fltTcaEqptMacsecrxpkts1yearValidatedPacketsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Validated packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Validated packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280136: fltTcaEqptMacsectxbytes5minEncryptedOctetsLast

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280137: fltTcaEqptMacsectxbytes15minEncryptedOctetsLast

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280138: fltTcaEqptMacsectxbytes1hEncryptedOctetsLast

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280139: fltTcaEqptMacsectxbytes1dEncryptedOctetsLast

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280140: fltTcaEqptMacsectxbytes1wEncryptedOctetsLast

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280141: fltTcaEqptMacsectxbytes1moEncryptedOctetsLast

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280142: fltTcaEqptMacsectxbytes1qtrEncryptedOctetsLast

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280143: fltTcaEqptMacsectxbytes1yearEncryptedOctetsLast

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280152: fltTcaEqptMacsectxbytes5minEncryptedOctetsCum

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280153: fltTcaEqptMacsectxbytes15minEncryptedOctetsCum

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280154: fltTcaEqptMacsectxbytes1hEncryptedOctetsCum

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280155: fltTcaEqptMacsectxbytes1dEncryptedOctetsCum

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280156: fltTcaEqptMacsectxbytes1wEncryptedOctetsCum

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280157: fltTcaEqptMacsectxbytes1moEncryptedOctetsCum

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280158: fltTcaEqptMacsectxbytes1qtrEncryptedOctetsCum

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280159: fltTcaEqptMacsectxbytes1yearEncryptedOctetsCum

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280160: fltTcaEqptMacsectxbytes5minEncryptedOctetsPer

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280161: fltTcaEqptMacsectxbytes15minEncryptedOctetsPer

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280162: fltTcaEqptMacsectxbytes1hEncryptedOctetsPer

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280163: fltTcaEqptMacsectxbytes1dEncryptedOctetsPer

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280164: fltTcaEqptMacsectxbytes1wEncryptedOctetsPer

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280165: fltTcaEqptMacsectxbytes1moEncryptedOctetsPer

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280166: fltTcaEqptMacsectxbytes1qtrEncryptedOctetsPer

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280167: fltTcaEqptMacsectxbytes1yearEncryptedOctetsPer

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280168: fltTcaEqptMacsectxbytes5minEncryptedOctetsMin

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280169: fltTcaEqptMacsectxbytes15minEncryptedOctetsMin

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280170: fltTcaEqptMacsectxbytes1hEncryptedOctetsMin

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280171: fltTcaEqptMacsectxbytes1dEncryptedOctetsMin

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280172: fltTcaEqptMacsectxbytes1wEncryptedOctetsMin

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280173: fltTcaEqptMacsectxbytes1moEncryptedOctetsMin

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280174: fltTcaEqptMacsectxbytes1qtrEncryptedOctetsMin

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280175: fltTcaEqptMacsectxbytes1yearEncryptedOctetsMin

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280176: fltTcaEqptMacsectxbytes5minEncryptedOctetsMax

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280177: fltTcaEqptMacsectxbytes15minEncryptedOctetsMax

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280178: fltTcaEqptMacsectxbytes1hEncryptedOctetsMax

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280179: fltTcaEqptMacsectxbytes1dEncryptedOctetsMax

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280180: fltTcaEqptMacsectxbytes1wEncryptedOctetsMax

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280181: fltTcaEqptMacsectxbytes1moEncryptedOctetsMax

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280182: fltTcaEqptMacsectxbytes1qtrEncryptedOctetsMax

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280183: fltTcaEqptMacsectxbytes1yearEncryptedOctetsMax

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280184: fltTcaEqptMacsectxbytes5minEncryptedOctetsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280185: fltTcaEqptMacsectxbytes15minEncryptedOctetsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280186: fltTcaEqptMacsectxbytes1hEncryptedOctetsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280187: fltTcaEqptMacsectxbytes1dEncryptedOctetsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280188: fltTcaEqptMacsectxbytes1wEncryptedOctetsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280189: fltTcaEqptMacsectxbytes1moEncryptedOctetsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280190: fltTcaEqptMacsectxbytes1qtrEncryptedOctetsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280191: fltTcaEqptMacsectxbytes1yearEncryptedOctetsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280216: fltTcaEqptMacsectxbytes5minEncryptedOctetsTr

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280217: fltTcaEqptMacsectxbytes15minEncryptedOctetsTr

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280218: fltTcaEqptMacsectxbytes1hEncryptedOctetsTr

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280219: fltTcaEqptMacsectxbytes1dEncryptedOctetsTr

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280220: fltTcaEqptMacsectxbytes1wEncryptedOctetsTr

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280221: fltTcaEqptMacsectxbytes1moEncryptedOctetsTr

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280222: fltTcaEqptMacsectxbytes1qtrEncryptedOctetsTr

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280223: fltTcaEqptMacsectxbytes1yearEncryptedOctetsTr

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280224: fltTcaEqptMacsectxbytes5minEncryptedOctetsRate

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280225: fltTcaEqptMacsectxbytes15minEncryptedOctetsRate

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280226: fltTcaEqptMacsectxbytes1hEncryptedOctetsRate

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280227: fltTcaEqptMacsectxbytes1dEncryptedOctetsRate

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280228: fltTcaEqptMacsectxbytes1wEncryptedOctetsRate

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280229: fltTcaEqptMacsectxbytes1moEncryptedOctetsRate

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280230: fltTcaEqptMacsectxbytes1qtrEncryptedOctetsRate

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280231: fltTcaEqptMacsectxbytes1yearEncryptedOctetsRate

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2803: fltFvRsBDToFhsResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F280304: fltTcaEqptMacsectxbytes5minEncryptedOctetsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280305: fltTcaEqptMacsectxbytes15minEncryptedOctetsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280306: fltTcaEqptMacsectxbytes1hEncryptedOctetsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280307: fltTcaEqptMacsectxbytes1dEncryptedOctetsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280308: fltTcaEqptMacsectxbytes1wEncryptedOctetsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280309: fltTcaEqptMacsectxbytes1moEncryptedOctetsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280310: fltTcaEqptMacsectxbytes1qtrEncryptedOctetsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280311: fltTcaEqptMacsectxbytes1yearEncryptedOctetsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280312: fltTcaEqptMacsectxbytes5minEncryptedOctetsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280313: fltTcaEqptMacsectxbytes15minEncryptedOctetsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280314: fltTcaEqptMacsectxbytes1hEncryptedOctetsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280315: fltTcaEqptMacsectxbytes1dEncryptedOctetsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280316: fltTcaEqptMacsectxbytes1wEncryptedOctetsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280317: fltTcaEqptMacsectxbytes1moEncryptedOctetsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280318: fltTcaEqptMacsectxbytes1qtrEncryptedOctetsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280319: fltTcaEqptMacsectxbytes1yearEncryptedOctetsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280320: fltTcaEqptMacsectxbytes5minEncryptedOctetsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280321: fltTcaEqptMacsectxbytes15minEncryptedOctetsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280322: fltTcaEqptMacsectxbytes1hEncryptedOctetsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280323: fltTcaEqptMacsectxbytes1dEncryptedOctetsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280324: fltTcaEqptMacsectxbytes1wEncryptedOctetsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280325: fltTcaEqptMacsectxbytes1moEncryptedOctetsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280326: fltTcaEqptMacsectxbytes1qtrEncryptedOctetsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280327: fltTcaEqptMacsectxbytes1yearEncryptedOctetsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280328: fltTcaEqptMacsectxbytes5minEncryptedOctetsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280329: fltTcaEqptMacsectxbytes15minEncryptedOctetsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280330: fltTcaEqptMacsectxbytes1hEncryptedOctetsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280331: fltTcaEqptMacsectxbytes1dEncryptedOctetsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280332: fltTcaEqptMacsectxbytes1wEncryptedOctetsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280333: fltTcaEqptMacsectxbytes1moEncryptedOctetsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280334: fltTcaEqptMacsectxbytes1qtrEncryptedOctetsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280335: fltTcaEqptMacsectxbytes1yearEncryptedOctetsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280368: fltTcaEqptMacsectxbytes5minEncryptedOctetsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280369: fltTcaEqptMacsectxbytes15minEncryptedOctetsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280370: fltTcaEqptMacsectxbytes1hEncryptedOctetsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280371: fltTcaEqptMacsectxbytes1dEncryptedOctetsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280372: fltTcaEqptMacsectxbytes1wEncryptedOctetsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280373: fltTcaEqptMacsectxbytes1moEncryptedOctetsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280374: fltTcaEqptMacsectxbytes1qtrEncryptedOctetsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280375: fltTcaEqptMacsectxbytes1yearEncryptedOctetsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted octets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280424: fltTcaEqptMacsectxbytes5minProtectedOctetsLast

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280425: fltTcaEqptMacsectxbytes15minProtectedOctetsLast

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280426: fltTcaEqptMacsectxbytes1hProtectedOctetsLast

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280427: fltTcaEqptMacsectxbytes1dProtectedOctetsLast

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280428: fltTcaEqptMacsectxbytes1wProtectedOctetsLast

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280429: fltTcaEqptMacsectxbytes1moProtectedOctetsLast

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280430: fltTcaEqptMacsectxbytes1qtrProtectedOctetsLast

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280431: fltTcaEqptMacsectxbytes1yearProtectedOctetsLast

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280440: fltTcaEqptMacsectxbytes5minProtectedOctetsCum

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280441: fltTcaEqptMacsectxbytes15minProtectedOctetsCum

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280442: fltTcaEqptMacsectxbytes1hProtectedOctetsCum

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280443: fltTcaEqptMacsectxbytes1dProtectedOctetsCum

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280444: fltTcaEqptMacsectxbytes1wProtectedOctetsCum

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280445: fltTcaEqptMacsectxbytes1moProtectedOctetsCum

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280446: fltTcaEqptMacsectxbytes1qtrProtectedOctetsCum

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280447: fltTcaEqptMacsectxbytes1yearProtectedOctetsCum

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280448: fltTcaEqptMacsectxbytes5minProtectedOctetsPer

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280449: fltTcaEqptMacsectxbytes15minProtectedOctetsPer

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280450: fltTcaEqptMacsectxbytes1hProtectedOctetsPer

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280451: fltTcaEqptMacsectxbytes1dProtectedOctetsPer

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280452: fltTcaEqptMacsectxbytes1wProtectedOctetsPer

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280453: fltTcaEqptMacsectxbytes1moProtectedOctetsPer

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280454: fltTcaEqptMacsectxbytes1qtrProtectedOctetsPer

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280455: fltTcaEqptMacsectxbytes1yearProtectedOctetsPer

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280456: fltTcaEqptMacsectxbytes5minProtectedOctetsMin

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280457: fltTcaEqptMacsectxbytes15minProtectedOctetsMin

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280458: fltTcaEqptMacsectxbytes1hProtectedOctetsMin

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280459: fltTcaEqptMacsectxbytes1dProtectedOctetsMin

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280460: fltTcaEqptMacsectxbytes1wProtectedOctetsMin

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280461: fltTcaEqptMacsectxbytes1moProtectedOctetsMin

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280462: fltTcaEqptMacsectxbytes1qtrProtectedOctetsMin

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280463: fltTcaEqptMacsectxbytes1yearProtectedOctetsMin

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280464: fltTcaEqptMacsectxbytes5minProtectedOctetsMax

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280465: fltTcaEqptMacsectxbytes15minProtectedOctetsMax

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280466: fltTcaEqptMacsectxbytes1hProtectedOctetsMax

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280467: fltTcaEqptMacsectxbytes1dProtectedOctetsMax

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280468: fltTcaEqptMacsectxbytes1wProtectedOctetsMax

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280469: fltTcaEqptMacsectxbytes1moProtectedOctetsMax

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280470: fltTcaEqptMacsectxbytes1qtrProtectedOctetsMax

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280471: fltTcaEqptMacsectxbytes1yearProtectedOctetsMax

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280472: fltTcaEqptMacsectxbytes5minProtectedOctetsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280473: fltTcaEqptMacsectxbytes15minProtectedOctetsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280474: fltTcaEqptMacsectxbytes1hProtectedOctetsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280475: fltTcaEqptMacsectxbytes1dProtectedOctetsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280476: fltTcaEqptMacsectxbytes1wProtectedOctetsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280477: fltTcaEqptMacsectxbytes1moProtectedOctetsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280478: fltTcaEqptMacsectxbytes1qtrProtectedOctetsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280479: fltTcaEqptMacsectxbytes1yearProtectedOctetsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2805: fltPcLbPEltmCfgCtrl

Severity: warning

Explanation: This fault is caused by a hardware programming failure

Recommended Action: The system will periodically retry to program the hardware. If the failure is due to lack of hardware resources, free up resources by removing or simplifying existing configuration. One of the reasons for lack of hardware resources is exhaustion of VLANs in ToR. These hardware resources can be examined by looking at capacity dashboard under OPERATIONS tab. Please check entry against the number of VLANs in output of command show vlan summary issued at node where fault is generated to check whether it exceeds above advertised node capacity.

F280504: fltTcaEqptMacsectxbytes5minProtectedOctetsTr

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280505: fltTcaEqptMacsectxbytes15minProtectedOctetsTr

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280506: fltTcaEqptMacsectxbytes1hProtectedOctetsTr

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280507: fltTcaEqptMacsectxbytes1dProtectedOctetsTr

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280508: fltTcaEqptMacsectxbytes1wProtectedOctetsTr

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280509: fltTcaEqptMacsectxbytes1moProtectedOctetsTr

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280510: fltTcaEqptMacsectxbytes1qtrProtectedOctetsTr

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280511: fltTcaEqptMacsectxbytes1yearProtectedOctetsTr

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280512: fltTcaEqptMacsectxbytes5minProtectedOctetsRate

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280513: fltTcaEqptMacsectxbytes15minProtectedOctetsRate

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280514: fltTcaEqptMacsectxbytes1hProtectedOctetsRate

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280515: fltTcaEqptMacsectxbytes1dProtectedOctetsRate

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280516: fltTcaEqptMacsectxbytes1wProtectedOctetsRate

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280517: fltTcaEqptMacsectxbytes1moProtectedOctetsRate

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280518: fltTcaEqptMacsectxbytes1qtrProtectedOctetsRate

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280519: fltTcaEqptMacsectxbytes1yearProtectedOctetsRate

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280592: fltTcaEqptMacsectxbytes5minProtectedOctetsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280593: fltTcaEqptMacsectxbytes15minProtectedOctetsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280594: fltTcaEqptMacsectxbytes1hProtectedOctetsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280595: fltTcaEqptMacsectxbytes1dProtectedOctetsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280596: fltTcaEqptMacsectxbytes1wProtectedOctetsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280597: fltTcaEqptMacsectxbytes1moProtectedOctetsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280598: fltTcaEqptMacsectxbytes1qtrProtectedOctetsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280599: fltTcaEqptMacsectxbytes1yearProtectedOctetsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280600: fltTcaEqptMacsectxbytes5minProtectedOctetsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280601: fltTcaEqptMacsectxbytes15minProtectedOctetsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280602: fltTcaEqptMacsectxbytes1hProtectedOctetsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280603: fltTcaEqptMacsectxbytes1dProtectedOctetsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280604: fltTcaEqptMacsectxbytes1wProtectedOctetsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280605: fltTcaEqptMacsectxbytes1moProtectedOctetsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280606: fltTcaEqptMacsectxbytes1qtrProtectedOctetsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280607: fltTcaEqptMacsectxbytes1yearProtectedOctetsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280608: fltTcaEqptMacsectxbytes5minProtectedOctetsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280609: fltTcaEqptMacsectxbytes15minProtectedOctetsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280610: fltTcaEqptMacsectxbytes1hProtectedOctetsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280611: fltTcaEqptMacsectxbytes1dProtectedOctetsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280612: fltTcaEqptMacsectxbytes1wProtectedOctetsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280613: fltTcaEqptMacsectxbytes1moProtectedOctetsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280614: fltTcaEqptMacsectxbytes1qtrProtectedOctetsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280615: fltTcaEqptMacsectxbytes1yearProtectedOctetsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280616: fltTcaEqptMacsectxbytes5minProtectedOctetsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280617: fltTcaEqptMacsectxbytes15minProtectedOctetsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280618: fltTcaEqptMacsectxbytes1hProtectedOctetsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280619: fltTcaEqptMacsectxbytes1dProtectedOctetsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280620: fltTcaEqptMacsectxbytes1wProtectedOctetsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280621: fltTcaEqptMacsectxbytes1moProtectedOctetsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280622: fltTcaEqptMacsectxbytes1qtrProtectedOctetsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280623: fltTcaEqptMacsectxbytes1yearProtectedOctetsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280656: fltTcaEqptMacsectxbytes5minProtectedOctetsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280657: fltTcaEqptMacsectxbytes15minProtectedOctetsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280658: fltTcaEqptMacsectxbytes1hProtectedOctetsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280659: fltTcaEqptMacsectxbytes1dProtectedOctetsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280660: fltTcaEqptMacsectxbytes1wProtectedOctetsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280661: fltTcaEqptMacsectxbytes1moProtectedOctetsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280662: fltTcaEqptMacsectxbytes1qtrProtectedOctetsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280663: fltTcaEqptMacsectxbytes1yearProtectedOctetsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Protected octets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected octets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280712: fltTcaEqptMacsectxpkts5minEncryptedPacktesLast

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280713: fltTcaEqptMacsectxpkts15minEncryptedPacktesLast

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280714: fltTcaEqptMacsectxpkts1hEncryptedPacktesLast

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280715: fltTcaEqptMacsectxpkts1dEncryptedPacktesLast

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280716: fltTcaEqptMacsectxpkts1wEncryptedPacktesLast

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280717: fltTcaEqptMacsectxpkts1moEncryptedPacktesLast

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280718: fltTcaEqptMacsectxpkts1qtrEncryptedPacktesLast

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280719: fltTcaEqptMacsectxpkts1yearEncryptedPacktesLast

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280728: fltTcaEqptMacsectxpkts5minEncryptedPacktesCum

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280729: fltTcaEqptMacsectxpkts15minEncryptedPacktesCum

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280730: fltTcaEqptMacsectxpkts1hEncryptedPacktesCum

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280731: fltTcaEqptMacsectxpkts1dEncryptedPacktesCum

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280732: fltTcaEqptMacsectxpkts1wEncryptedPacktesCum

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280733: fltTcaEqptMacsectxpkts1moEncryptedPacktesCum

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280734: fltTcaEqptMacsectxpkts1qtrEncryptedPacktesCum

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280735: fltTcaEqptMacsectxpkts1yearEncryptedPacktesCum

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280736: fltTcaEqptMacsectxpkts5minEncryptedPacktesPer

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280737: fltTcaEqptMacsectxpkts15minEncryptedPacktesPer

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280738: fltTcaEqptMacsectxpkts1hEncryptedPacktesPer

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280739: fltTcaEqptMacsectxpkts1dEncryptedPacktesPer

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280740: fltTcaEqptMacsectxpkts1wEncryptedPacktesPer

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280741: fltTcaEqptMacsectxpkts1moEncryptedPacktesPer

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280742: fltTcaEqptMacsectxpkts1qtrEncryptedPacktesPer

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280743: fltTcaEqptMacsectxpkts1yearEncryptedPacktesPer

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280744: fltTcaEqptMacsectxpkts5minEncryptedPacktesMin

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280745: fltTcaEqptMacsectxpkts15minEncryptedPacktesMin

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280746: fltTcaEqptMacsectxpkts1hEncryptedPacktesMin

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280747: fltTcaEqptMacsectxpkts1dEncryptedPacktesMin

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280748: fltTcaEqptMacsectxpkts1wEncryptedPacktesMin

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280749: fltTcaEqptMacsectxpkts1moEncryptedPacktesMin

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280750: fltTcaEqptMacsectxpkts1qtrEncryptedPacktesMin

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280751: fltTcaEqptMacsectxpkts1yearEncryptedPacktesMin

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280752: fltTcaEqptMacsectxpkts5minEncryptedPacktesMax

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280753: fltTcaEqptMacsectxpkts15minEncryptedPacktesMax

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280754: fltTcaEqptMacsectxpkts1hEncryptedPacktesMax

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280755: fltTcaEqptMacsectxpkts1dEncryptedPacktesMax

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280756: fltTcaEqptMacsectxpkts1wEncryptedPacktesMax

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280757: fltTcaEqptMacsectxpkts1moEncryptedPacktesMax

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280758: fltTcaEqptMacsectxpkts1qtrEncryptedPacktesMax

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280759: fltTcaEqptMacsectxpkts1yearEncryptedPacktesMax

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280760: fltTcaEqptMacsectxpkts5minEncryptedPacktesAvg

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280761: fltTcaEqptMacsectxpkts15minEncryptedPacktesAvg

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280762: fltTcaEqptMacsectxpkts1hEncryptedPacktesAvg

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280763: fltTcaEqptMacsectxpkts1dEncryptedPacktesAvg

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280764: fltTcaEqptMacsectxpkts1wEncryptedPacktesAvg

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280765: fltTcaEqptMacsectxpkts1moEncryptedPacktesAvg

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280766: fltTcaEqptMacsectxpkts1qtrEncryptedPacktesAvg

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280767: fltTcaEqptMacsectxpkts1yearEncryptedPacktesAvg

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280792: fltTcaEqptMacsectxpkts5minEncryptedPacktesTr

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280793: fltTcaEqptMacsectxpkts15minEncryptedPacktesTr

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280794: fltTcaEqptMacsectxpkts1hEncryptedPacktesTr

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280795: fltTcaEqptMacsectxpkts1dEncryptedPacktesTr

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280796: fltTcaEqptMacsectxpkts1wEncryptedPacktesTr

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280797: fltTcaEqptMacsectxpkts1moEncryptedPacktesTr

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280798: fltTcaEqptMacsectxpkts1qtrEncryptedPacktesTr

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280799: fltTcaEqptMacsectxpkts1yearEncryptedPacktesTr

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280800: fltTcaEqptMacsectxpkts5minEncryptedPacktesRate

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280801: fltTcaEqptMacsectxpkts15minEncryptedPacktesRate

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280802: fltTcaEqptMacsectxpkts1hEncryptedPacktesRate

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280803: fltTcaEqptMacsectxpkts1dEncryptedPacktesRate

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280804: fltTcaEqptMacsectxpkts1wEncryptedPacktesRate

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280805: fltTcaEqptMacsectxpkts1moEncryptedPacktesRate

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280806: fltTcaEqptMacsectxpkts1qtrEncryptedPacktesRate

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280807: fltTcaEqptMacsectxpkts1yearEncryptedPacktesRate

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280880: fltTcaEqptMacsectxpkts5minEncryptedPacktesRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280881: fltTcaEqptMacsectxpkts15minEncryptedPacktesRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280882: fltTcaEqptMacsectxpkts1hEncryptedPacktesRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280883: fltTcaEqptMacsectxpkts1dEncryptedPacktesRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280884: fltTcaEqptMacsectxpkts1wEncryptedPacktesRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280885: fltTcaEqptMacsectxpkts1moEncryptedPacktesRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280886: fltTcaEqptMacsectxpkts1qtrEncryptedPacktesRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280887: fltTcaEqptMacsectxpkts1yearEncryptedPacktesRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280888: fltTcaEqptMacsectxpkts5minEncryptedPacktesRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280889: fltTcaEqptMacsectxpkts15minEncryptedPacktesRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280890: fltTcaEqptMacsectxpkts1hEncryptedPacktesRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280891: fltTcaEqptMacsectxpkts1dEncryptedPacktesRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280892: fltTcaEqptMacsectxpkts1wEncryptedPacktesRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280893: fltTcaEqptMacsectxpkts1moEncryptedPacktesRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280894: fltTcaEqptMacsectxpkts1qtrEncryptedPacktesRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280895: fltTcaEqptMacsectxpkts1yearEncryptedPacktesRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280896: fltTcaEqptMacsectxpkts5minEncryptedPacktesRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280897: fltTcaEqptMacsectxpkts15minEncryptedPacktesRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280898: fltTcaEqptMacsectxpkts1hEncryptedPacktesRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280899: fltTcaEqptMacsectxpkts1dEncryptedPacktesRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280900: fltTcaEqptMacsectxpkts1wEncryptedPacktesRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280901: fltTcaEqptMacsectxpkts1moEncryptedPacktesRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280902: fltTcaEqptMacsectxpkts1qtrEncryptedPacktesRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280903: fltTcaEqptMacsectxpkts1yearEncryptedPacktesRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280904: fltTcaEqptMacsectxpkts5minEncryptedPacktesRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280905: fltTcaEqptMacsectxpkts15minEncryptedPacktesRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280906: fltTcaEqptMacsectxpkts1hEncryptedPacktesRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280907: fltTcaEqptMacsectxpkts1dEncryptedPacktesRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280908: fltTcaEqptMacsectxpkts1wEncryptedPacktesRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280909: fltTcaEqptMacsectxpkts1moEncryptedPacktesRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280910: fltTcaEqptMacsectxpkts1qtrEncryptedPacktesRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280911: fltTcaEqptMacsectxpkts1yearEncryptedPacktesRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280944: fltTcaEqptMacsectxpkts5minEncryptedPacktesRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280945: fltTcaEqptMacsectxpkts15minEncryptedPacktesRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280946: fltTcaEqptMacsectxpkts1hEncryptedPacktesRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280947: fltTcaEqptMacsectxpkts1dEncryptedPacktesRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280948: fltTcaEqptMacsectxpkts1wEncryptedPacktesRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280949: fltTcaEqptMacsectxpkts1moEncryptedPacktesRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280950: fltTcaEqptMacsectxpkts1qtrEncryptedPacktesRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F280951: fltTcaEqptMacsectxpkts1yearEncryptedPacktesRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Encrypted packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281000: fltTcaEqptMacsectxpkts5minProtectedPacketsLast

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281001: fltTcaEqptMacsectxpkts15minProtectedPacketsLast

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281002: fltTcaEqptMacsectxpkts1hProtectedPacketsLast

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281003: fltTcaEqptMacsectxpkts1dProtectedPacketsLast

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281004: fltTcaEqptMacsectxpkts1wProtectedPacketsLast

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281005: fltTcaEqptMacsectxpkts1moProtectedPacketsLast

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281006: fltTcaEqptMacsectxpkts1qtrProtectedPacketsLast

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281007: fltTcaEqptMacsectxpkts1yearProtectedPacketsLast

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281016: fltTcaEqptMacsectxpkts5minProtectedPacketsCum

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281017: fltTcaEqptMacsectxpkts15minProtectedPacketsCum

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281018: fltTcaEqptMacsectxpkts1hProtectedPacketsCum

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281019: fltTcaEqptMacsectxpkts1dProtectedPacketsCum

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281020: fltTcaEqptMacsectxpkts1wProtectedPacketsCum

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281021: fltTcaEqptMacsectxpkts1moProtectedPacketsCum

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281022: fltTcaEqptMacsectxpkts1qtrProtectedPacketsCum

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281023: fltTcaEqptMacsectxpkts1yearProtectedPacketsCum

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281024: fltTcaEqptMacsectxpkts5minProtectedPacketsPer

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281025: fltTcaEqptMacsectxpkts15minProtectedPacketsPer

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281026: fltTcaEqptMacsectxpkts1hProtectedPacketsPer

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281027: fltTcaEqptMacsectxpkts1dProtectedPacketsPer

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281028: fltTcaEqptMacsectxpkts1wProtectedPacketsPer

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281029: fltTcaEqptMacsectxpkts1moProtectedPacketsPer

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281030: fltTcaEqptMacsectxpkts1qtrProtectedPacketsPer

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281031: fltTcaEqptMacsectxpkts1yearProtectedPacketsPer

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281032: fltTcaEqptMacsectxpkts5minProtectedPacketsMin

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281033: fltTcaEqptMacsectxpkts15minProtectedPacketsMin

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281034: fltTcaEqptMacsectxpkts1hProtectedPacketsMin

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281035: fltTcaEqptMacsectxpkts1dProtectedPacketsMin

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281036: fltTcaEqptMacsectxpkts1wProtectedPacketsMin

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281037: fltTcaEqptMacsectxpkts1moProtectedPacketsMin

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281038: fltTcaEqptMacsectxpkts1qtrProtectedPacketsMin

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281039: fltTcaEqptMacsectxpkts1yearProtectedPacketsMin

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281040: fltTcaEqptMacsectxpkts5minProtectedPacketsMax

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281041: fltTcaEqptMacsectxpkts15minProtectedPacketsMax

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281042: fltTcaEqptMacsectxpkts1hProtectedPacketsMax

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281043: fltTcaEqptMacsectxpkts1dProtectedPacketsMax

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281044: fltTcaEqptMacsectxpkts1wProtectedPacketsMax

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281045: fltTcaEqptMacsectxpkts1moProtectedPacketsMax

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281046: fltTcaEqptMacsectxpkts1qtrProtectedPacketsMax

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281047: fltTcaEqptMacsectxpkts1yearProtectedPacketsMax

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281048: fltTcaEqptMacsectxpkts5minProtectedPacketsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281049: fltTcaEqptMacsectxpkts15minProtectedPacketsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281050: fltTcaEqptMacsectxpkts1hProtectedPacketsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281051: fltTcaEqptMacsectxpkts1dProtectedPacketsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281052: fltTcaEqptMacsectxpkts1wProtectedPacketsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281053: fltTcaEqptMacsectxpkts1moProtectedPacketsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281054: fltTcaEqptMacsectxpkts1qtrProtectedPacketsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281055: fltTcaEqptMacsectxpkts1yearProtectedPacketsAvg

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281080: fltTcaEqptMacsectxpkts5minProtectedPacketsTr

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281081: fltTcaEqptMacsectxpkts15minProtectedPacketsTr

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281082: fltTcaEqptMacsectxpkts1hProtectedPacketsTr

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281083: fltTcaEqptMacsectxpkts1dProtectedPacketsTr

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281084: fltTcaEqptMacsectxpkts1wProtectedPacketsTr

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281085: fltTcaEqptMacsectxpkts1moProtectedPacketsTr

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281086: fltTcaEqptMacsectxpkts1qtrProtectedPacketsTr

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281087: fltTcaEqptMacsectxpkts1yearProtectedPacketsTr

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281088: fltTcaEqptMacsectxpkts5minProtectedPacketsRate

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281089: fltTcaEqptMacsectxpkts15minProtectedPacketsRate

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281090: fltTcaEqptMacsectxpkts1hProtectedPacketsRate

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281091: fltTcaEqptMacsectxpkts1dProtectedPacketsRate

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281092: fltTcaEqptMacsectxpkts1wProtectedPacketsRate

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281093: fltTcaEqptMacsectxpkts1moProtectedPacketsRate

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281094: fltTcaEqptMacsectxpkts1qtrProtectedPacketsRate

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281095: fltTcaEqptMacsectxpkts1yearProtectedPacketsRate

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281168: fltTcaEqptMacsectxpkts5minProtectedPacketsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281169: fltTcaEqptMacsectxpkts15minProtectedPacketsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281170: fltTcaEqptMacsectxpkts1hProtectedPacketsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281171: fltTcaEqptMacsectxpkts1dProtectedPacketsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281172: fltTcaEqptMacsectxpkts1wProtectedPacketsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281173: fltTcaEqptMacsectxpkts1moProtectedPacketsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281174: fltTcaEqptMacsectxpkts1qtrProtectedPacketsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281175: fltTcaEqptMacsectxpkts1yearProtectedPacketsRateLast

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281176: fltTcaEqptMacsectxpkts5minProtectedPacketsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281177: fltTcaEqptMacsectxpkts15minProtectedPacketsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281178: fltTcaEqptMacsectxpkts1hProtectedPacketsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281179: fltTcaEqptMacsectxpkts1dProtectedPacketsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281180: fltTcaEqptMacsectxpkts1wProtectedPacketsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281181: fltTcaEqptMacsectxpkts1moProtectedPacketsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281182: fltTcaEqptMacsectxpkts1qtrProtectedPacketsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281183: fltTcaEqptMacsectxpkts1yearProtectedPacketsRateMin

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281184: fltTcaEqptMacsectxpkts5minProtectedPacketsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281185: fltTcaEqptMacsectxpkts15minProtectedPacketsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281186: fltTcaEqptMacsectxpkts1hProtectedPacketsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281187: fltTcaEqptMacsectxpkts1dProtectedPacketsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281188: fltTcaEqptMacsectxpkts1wProtectedPacketsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281189: fltTcaEqptMacsectxpkts1moProtectedPacketsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281190: fltTcaEqptMacsectxpkts1qtrProtectedPacketsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281191: fltTcaEqptMacsectxpkts1yearProtectedPacketsRateMax

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281192: fltTcaEqptMacsectxpkts5minProtectedPacketsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281193: fltTcaEqptMacsectxpkts15minProtectedPacketsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281194: fltTcaEqptMacsectxpkts1hProtectedPacketsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281195: fltTcaEqptMacsectxpkts1dProtectedPacketsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281196: fltTcaEqptMacsectxpkts1wProtectedPacketsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281197: fltTcaEqptMacsectxpkts1moProtectedPacketsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281198: fltTcaEqptMacsectxpkts1qtrProtectedPacketsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281199: fltTcaEqptMacsectxpkts1yearProtectedPacketsRateAvg

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2812: fltDnsepgNwIssuesConnectionErrorMajorFault

Severity: major

Explanation: This fault occurs when the connection to DNS Server

Recommended Action: If you see this fault, please make sure that the device has the correct IP and DNS server is accepting connection from outside..

F281232: fltTcaEqptMacsectxpkts5minProtectedPacketsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281233: fltTcaEqptMacsectxpkts15minProtectedPacketsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281234: fltTcaEqptMacsectxpkts1hProtectedPacketsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281235: fltTcaEqptMacsectxpkts1dProtectedPacketsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281236: fltTcaEqptMacsectxpkts1wProtectedPacketsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281237: fltTcaEqptMacsectxpkts1moProtectedPacketsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281238: fltTcaEqptMacsectxpkts1qtrProtectedPacketsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F281239: fltTcaEqptMacsectxpkts1yearProtectedPacketsRateTr

Severity: variable

Explanation: This fault is caused by "Macsec Protected packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Macsec Protected packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2813: fltDnsepgNwIssuesNoDataMinorFault

Severity: minor

Explanation: This fault occurs when the connection to DNS Server doesn't read any data from zonebr/>

Recommended Action: If you see this fault, please make sure that the the domain name zone exists on the DNS server.

F2816: fltPlannerRsExistingTopoDeplPrefResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2817: fltAcRuleIpLatencyOperStFailed

Severity: minor

Explanation: This fault occurs when either the total latency-stats rule reaches maximum programmable limit or an unsupported modification is made on an latency policy. The acRule for latency does not get programmed and is instead stuck in failed state.

Recommended Action: To recover from this fault, try the following actions

1. If the fault occurred because of a policy modification, disable and re-enable the latency policy with the changes.

2. If the fault occurred because the maximum limit was reached, remove unneeded latency configuration policies to accommodate new policies.

3. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F2821: fltTunnelIfTunnelDown

Severity: major

Explanation: This fault should not occur. It has been deprecated.

Recommended Action: If you see this fault, take the following actions:

1. To correct this fault, please attempt to create the tunnel again

2. If the above actions did not resolve the issue, collect a tech-support file and contact Cisco TAC.

F2822: fltInfraRsPoeInstPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2823: fltInfraRsPoeIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2824: fltOspfAIfP2PError

Severity: major

Explanation: This fault occurs when more than one neighbor is learnt on an interface configured as point-to-point

Recommended Action: None set.

F2827: fltIpv4NexthopEPIpv4NexthopEpConfigFailed

Severity: warning

Explanation: This fault occurs when Nexthop EP Reachability configuration is deployed on an unsupported platform TOR. The reason could be that this configuration is on a BD that stretches to the unsupported TOR

Recommended Action: If this fault is seen consistently, try the following actions

1. Delete BD deployment for the current EPG from the node

2. If the above actions do not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F2828: fltIpv6NexthopEPIpv6NexthopEpConfigFailed

Severity: warning

Explanation: This fault occurs when Nexthop EP Reachability configuration is deployed on an unsupported platform TOR. The reason could be that this configuration is on a BD that stretches to the unsupported TOR

Recommended Action: If this fault is seen consistently, try the following actions

1. Delete BD deployment for the current EPG from the node

2. If the above actions do not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F282848: fltTcaCoppArpAllow5minBytesLast

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282849: fltTcaCoppArpAllow15minBytesLast

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282850: fltTcaCoppArpAllow1hBytesLast

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282851: fltTcaCoppArpAllow1dBytesLast

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282852: fltTcaCoppArpAllow1wBytesLast

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282853: fltTcaCoppArpAllow1moBytesLast

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282854: fltTcaCoppArpAllow1qtrBytesLast

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282855: fltTcaCoppArpAllow1yearBytesLast

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282864: fltTcaCoppArpAllow5minBytesCum

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282865: fltTcaCoppArpAllow15minBytesCum

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282866: fltTcaCoppArpAllow1hBytesCum

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282867: fltTcaCoppArpAllow1dBytesCum

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282868: fltTcaCoppArpAllow1wBytesCum

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282869: fltTcaCoppArpAllow1moBytesCum

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282870: fltTcaCoppArpAllow1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282871: fltTcaCoppArpAllow1yearBytesCum

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282872: fltTcaCoppArpAllow5minBytesPer

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282873: fltTcaCoppArpAllow15minBytesPer

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282874: fltTcaCoppArpAllow1hBytesPer

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282875: fltTcaCoppArpAllow1dBytesPer

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282876: fltTcaCoppArpAllow1wBytesPer

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282877: fltTcaCoppArpAllow1moBytesPer

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282878: fltTcaCoppArpAllow1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282879: fltTcaCoppArpAllow1yearBytesPer

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282880: fltTcaCoppArpAllow5minBytesMin

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282881: fltTcaCoppArpAllow15minBytesMin

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282882: fltTcaCoppArpAllow1hBytesMin

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282883: fltTcaCoppArpAllow1dBytesMin

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282884: fltTcaCoppArpAllow1wBytesMin

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282885: fltTcaCoppArpAllow1moBytesMin

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282886: fltTcaCoppArpAllow1qtrBytesMin

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282887: fltTcaCoppArpAllow1yearBytesMin

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282888: fltTcaCoppArpAllow5minBytesMax

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282889: fltTcaCoppArpAllow15minBytesMax

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282890: fltTcaCoppArpAllow1hBytesMax

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282891: fltTcaCoppArpAllow1dBytesMax

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282892: fltTcaCoppArpAllow1wBytesMax

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282893: fltTcaCoppArpAllow1moBytesMax

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282894: fltTcaCoppArpAllow1qtrBytesMax

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282895: fltTcaCoppArpAllow1yearBytesMax

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282896: fltTcaCoppArpAllow5minBytesAvg

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282897: fltTcaCoppArpAllow15minBytesAvg

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282898: fltTcaCoppArpAllow1hBytesAvg

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282899: fltTcaCoppArpAllow1dBytesAvg

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282900: fltTcaCoppArpAllow1wBytesAvg

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282901: fltTcaCoppArpAllow1moBytesAvg

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282902: fltTcaCoppArpAllow1qtrBytesAvg

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282903: fltTcaCoppArpAllow1yearBytesAvg

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282928: fltTcaCoppArpAllow5minBytesTr

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282929: fltTcaCoppArpAllow15minBytesTr

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282930: fltTcaCoppArpAllow1hBytesTr

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282931: fltTcaCoppArpAllow1dBytesTr

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282932: fltTcaCoppArpAllow1wBytesTr

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282933: fltTcaCoppArpAllow1moBytesTr

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282934: fltTcaCoppArpAllow1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282935: fltTcaCoppArpAllow1yearBytesTr

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282936: fltTcaCoppArpAllow5minBytesRate

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282937: fltTcaCoppArpAllow15minBytesRate

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282938: fltTcaCoppArpAllow1hBytesRate

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282939: fltTcaCoppArpAllow1dBytesRate

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282940: fltTcaCoppArpAllow1wBytesRate

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282941: fltTcaCoppArpAllow1moBytesRate

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282942: fltTcaCoppArpAllow1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F282943: fltTcaCoppArpAllow1yearBytesRate

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2830: fltVnsRsRedirectHealthGroupResolveFail

Severity: minor

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F283016: fltTcaCoppArpAllow5minBytesRateLast

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283017: fltTcaCoppArpAllow15minBytesRateLast

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283018: fltTcaCoppArpAllow1hBytesRateLast

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283019: fltTcaCoppArpAllow1dBytesRateLast

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283020: fltTcaCoppArpAllow1wBytesRateLast

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283021: fltTcaCoppArpAllow1moBytesRateLast

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283022: fltTcaCoppArpAllow1qtrBytesRateLast

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283023: fltTcaCoppArpAllow1yearBytesRateLast

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283024: fltTcaCoppArpAllow5minBytesRateMin

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283025: fltTcaCoppArpAllow15minBytesRateMin

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283026: fltTcaCoppArpAllow1hBytesRateMin

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283027: fltTcaCoppArpAllow1dBytesRateMin

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283028: fltTcaCoppArpAllow1wBytesRateMin

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283029: fltTcaCoppArpAllow1moBytesRateMin

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283030: fltTcaCoppArpAllow1qtrBytesRateMin

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283031: fltTcaCoppArpAllow1yearBytesRateMin

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283032: fltTcaCoppArpAllow5minBytesRateMax

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283033: fltTcaCoppArpAllow15minBytesRateMax

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283034: fltTcaCoppArpAllow1hBytesRateMax

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283035: fltTcaCoppArpAllow1dBytesRateMax

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283036: fltTcaCoppArpAllow1wBytesRateMax

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283037: fltTcaCoppArpAllow1moBytesRateMax

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283038: fltTcaCoppArpAllow1qtrBytesRateMax

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283039: fltTcaCoppArpAllow1yearBytesRateMax

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283040: fltTcaCoppArpAllow5minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283041: fltTcaCoppArpAllow15minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283042: fltTcaCoppArpAllow1hBytesRateAvg

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283043: fltTcaCoppArpAllow1dBytesRateAvg

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283044: fltTcaCoppArpAllow1wBytesRateAvg

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283045: fltTcaCoppArpAllow1moBytesRateAvg

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283046: fltTcaCoppArpAllow1qtrBytesRateAvg

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283047: fltTcaCoppArpAllow1yearBytesRateAvg

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283080: fltTcaCoppArpAllow5minBytesRateTr

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283081: fltTcaCoppArpAllow15minBytesRateTr

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283082: fltTcaCoppArpAllow1hBytesRateTr

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283083: fltTcaCoppArpAllow1dBytesRateTr

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283084: fltTcaCoppArpAllow1wBytesRateTr

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283085: fltTcaCoppArpAllow1moBytesRateTr

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283086: fltTcaCoppArpAllow1qtrBytesRateTr

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283087: fltTcaCoppArpAllow1yearBytesRateTr

Severity: variable

Explanation: This fault is caused by "ArpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2831: fltVnsRsIPSLAMonitoringPolResolveFail

Severity: minor

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F283136: fltTcaCoppArpAllow5minPktsLast

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283137: fltTcaCoppArpAllow15minPktsLast

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283138: fltTcaCoppArpAllow1hPktsLast

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283139: fltTcaCoppArpAllow1dPktsLast

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283140: fltTcaCoppArpAllow1wPktsLast

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283141: fltTcaCoppArpAllow1moPktsLast

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283142: fltTcaCoppArpAllow1qtrPktsLast

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283143: fltTcaCoppArpAllow1yearPktsLast

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283152: fltTcaCoppArpAllow5minPktsCum

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283153: fltTcaCoppArpAllow15minPktsCum

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283154: fltTcaCoppArpAllow1hPktsCum

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283155: fltTcaCoppArpAllow1dPktsCum

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283156: fltTcaCoppArpAllow1wPktsCum

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283157: fltTcaCoppArpAllow1moPktsCum

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283158: fltTcaCoppArpAllow1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283159: fltTcaCoppArpAllow1yearPktsCum

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283160: fltTcaCoppArpAllow5minPktsPer

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283161: fltTcaCoppArpAllow15minPktsPer

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283162: fltTcaCoppArpAllow1hPktsPer

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283163: fltTcaCoppArpAllow1dPktsPer

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283164: fltTcaCoppArpAllow1wPktsPer

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283165: fltTcaCoppArpAllow1moPktsPer

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283166: fltTcaCoppArpAllow1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283167: fltTcaCoppArpAllow1yearPktsPer

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283168: fltTcaCoppArpAllow5minPktsMin

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283169: fltTcaCoppArpAllow15minPktsMin

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283170: fltTcaCoppArpAllow1hPktsMin

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283171: fltTcaCoppArpAllow1dPktsMin

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283172: fltTcaCoppArpAllow1wPktsMin

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283173: fltTcaCoppArpAllow1moPktsMin

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283174: fltTcaCoppArpAllow1qtrPktsMin

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283175: fltTcaCoppArpAllow1yearPktsMin

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283176: fltTcaCoppArpAllow5minPktsMax

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283177: fltTcaCoppArpAllow15minPktsMax

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283178: fltTcaCoppArpAllow1hPktsMax

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283179: fltTcaCoppArpAllow1dPktsMax

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283180: fltTcaCoppArpAllow1wPktsMax

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283181: fltTcaCoppArpAllow1moPktsMax

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283182: fltTcaCoppArpAllow1qtrPktsMax

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283183: fltTcaCoppArpAllow1yearPktsMax

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283184: fltTcaCoppArpAllow5minPktsAvg

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283185: fltTcaCoppArpAllow15minPktsAvg

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283186: fltTcaCoppArpAllow1hPktsAvg

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283187: fltTcaCoppArpAllow1dPktsAvg

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283188: fltTcaCoppArpAllow1wPktsAvg

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283189: fltTcaCoppArpAllow1moPktsAvg

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283190: fltTcaCoppArpAllow1qtrPktsAvg

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283191: fltTcaCoppArpAllow1yearPktsAvg

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283216: fltTcaCoppArpAllow5minPktsTr

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283217: fltTcaCoppArpAllow15minPktsTr

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283218: fltTcaCoppArpAllow1hPktsTr

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283219: fltTcaCoppArpAllow1dPktsTr

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283220: fltTcaCoppArpAllow1wPktsTr

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283221: fltTcaCoppArpAllow1moPktsTr

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283222: fltTcaCoppArpAllow1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283223: fltTcaCoppArpAllow1yearPktsTr

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283224: fltTcaCoppArpAllow5minPktsRate

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283225: fltTcaCoppArpAllow15minPktsRate

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283226: fltTcaCoppArpAllow1hPktsRate

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283227: fltTcaCoppArpAllow1dPktsRate

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283228: fltTcaCoppArpAllow1wPktsRate

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283229: fltTcaCoppArpAllow1moPktsRate

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283230: fltTcaCoppArpAllow1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283231: fltTcaCoppArpAllow1yearPktsRate

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2833: fltSvcredirDestGrpOperStFailed

Severity: major

Explanation: This fault occurs when PBR service dest group goes to failed state due to threshold violation

Recommended Action: To recover from this fault, try the following actions

1. number of active dests in the group crosses

2. threshold high

F283304: fltTcaCoppArpAllow5minPktsRateLast

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283305: fltTcaCoppArpAllow15minPktsRateLast

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283306: fltTcaCoppArpAllow1hPktsRateLast

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283307: fltTcaCoppArpAllow1dPktsRateLast

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283308: fltTcaCoppArpAllow1wPktsRateLast

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283309: fltTcaCoppArpAllow1moPktsRateLast

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283310: fltTcaCoppArpAllow1qtrPktsRateLast

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283311: fltTcaCoppArpAllow1yearPktsRateLast

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283312: fltTcaCoppArpAllow5minPktsRateMin

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283313: fltTcaCoppArpAllow15minPktsRateMin

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283314: fltTcaCoppArpAllow1hPktsRateMin

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283315: fltTcaCoppArpAllow1dPktsRateMin

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283316: fltTcaCoppArpAllow1wPktsRateMin

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283317: fltTcaCoppArpAllow1moPktsRateMin

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283318: fltTcaCoppArpAllow1qtrPktsRateMin

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283319: fltTcaCoppArpAllow1yearPktsRateMin

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283320: fltTcaCoppArpAllow5minPktsRateMax

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283321: fltTcaCoppArpAllow15minPktsRateMax

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283322: fltTcaCoppArpAllow1hPktsRateMax

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283323: fltTcaCoppArpAllow1dPktsRateMax

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283324: fltTcaCoppArpAllow1wPktsRateMax

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283325: fltTcaCoppArpAllow1moPktsRateMax

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283326: fltTcaCoppArpAllow1qtrPktsRateMax

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283327: fltTcaCoppArpAllow1yearPktsRateMax

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283328: fltTcaCoppArpAllow5minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283329: fltTcaCoppArpAllow15minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283330: fltTcaCoppArpAllow1hPktsRateAvg

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283331: fltTcaCoppArpAllow1dPktsRateAvg

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283332: fltTcaCoppArpAllow1wPktsRateAvg

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283333: fltTcaCoppArpAllow1moPktsRateAvg

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283334: fltTcaCoppArpAllow1qtrPktsRateAvg

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283335: fltTcaCoppArpAllow1yearPktsRateAvg

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283368: fltTcaCoppArpAllow5minPktsRateTr

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283369: fltTcaCoppArpAllow15minPktsRateTr

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283370: fltTcaCoppArpAllow1hPktsRateTr

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283371: fltTcaCoppArpAllow1dPktsRateTr

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283372: fltTcaCoppArpAllow1wPktsRateTr

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283373: fltTcaCoppArpAllow1moPktsRateTr

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283374: fltTcaCoppArpAllow1qtrPktsRateTr

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283375: fltTcaCoppArpAllow1yearPktsRateTr

Severity: variable

Explanation: This fault is caused by "ArpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2834: fltEthpmFaultDoubleEncapPortNotSupported

Severity: warning

Explanation: This fault occurs when port mode is configured as a double encap port on an unsupported platform

Recommended Action: To recover from this fault, delete port mode config as a double encap port

F283424: fltTcaCoppArpDrop5minBytesLast

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283425: fltTcaCoppArpDrop15minBytesLast

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283426: fltTcaCoppArpDrop1hBytesLast

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283427: fltTcaCoppArpDrop1dBytesLast

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283428: fltTcaCoppArpDrop1wBytesLast

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283429: fltTcaCoppArpDrop1moBytesLast

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283430: fltTcaCoppArpDrop1qtrBytesLast

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283431: fltTcaCoppArpDrop1yearBytesLast

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283440: fltTcaCoppArpDrop5minBytesCum

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283441: fltTcaCoppArpDrop15minBytesCum

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283442: fltTcaCoppArpDrop1hBytesCum

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283443: fltTcaCoppArpDrop1dBytesCum

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283444: fltTcaCoppArpDrop1wBytesCum

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283445: fltTcaCoppArpDrop1moBytesCum

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283446: fltTcaCoppArpDrop1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283447: fltTcaCoppArpDrop1yearBytesCum

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283448: fltTcaCoppArpDrop5minBytesPer

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283449: fltTcaCoppArpDrop15minBytesPer

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283450: fltTcaCoppArpDrop1hBytesPer

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283451: fltTcaCoppArpDrop1dBytesPer

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283452: fltTcaCoppArpDrop1wBytesPer

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283453: fltTcaCoppArpDrop1moBytesPer

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283454: fltTcaCoppArpDrop1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283455: fltTcaCoppArpDrop1yearBytesPer

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283456: fltTcaCoppArpDrop5minBytesMin

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283457: fltTcaCoppArpDrop15minBytesMin

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283458: fltTcaCoppArpDrop1hBytesMin

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283459: fltTcaCoppArpDrop1dBytesMin

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283460: fltTcaCoppArpDrop1wBytesMin

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283461: fltTcaCoppArpDrop1moBytesMin

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283462: fltTcaCoppArpDrop1qtrBytesMin

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283463: fltTcaCoppArpDrop1yearBytesMin

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283464: fltTcaCoppArpDrop5minBytesMax

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283465: fltTcaCoppArpDrop15minBytesMax

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283466: fltTcaCoppArpDrop1hBytesMax

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283467: fltTcaCoppArpDrop1dBytesMax

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283468: fltTcaCoppArpDrop1wBytesMax

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283469: fltTcaCoppArpDrop1moBytesMax

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283470: fltTcaCoppArpDrop1qtrBytesMax

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283471: fltTcaCoppArpDrop1yearBytesMax

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283472: fltTcaCoppArpDrop5minBytesAvg

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283473: fltTcaCoppArpDrop15minBytesAvg

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283474: fltTcaCoppArpDrop1hBytesAvg

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283475: fltTcaCoppArpDrop1dBytesAvg

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283476: fltTcaCoppArpDrop1wBytesAvg

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283477: fltTcaCoppArpDrop1moBytesAvg

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283478: fltTcaCoppArpDrop1qtrBytesAvg

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283479: fltTcaCoppArpDrop1yearBytesAvg

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283504: fltTcaCoppArpDrop5minBytesTr

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283505: fltTcaCoppArpDrop15minBytesTr

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283506: fltTcaCoppArpDrop1hBytesTr

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283507: fltTcaCoppArpDrop1dBytesTr

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283508: fltTcaCoppArpDrop1wBytesTr

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283509: fltTcaCoppArpDrop1moBytesTr

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283510: fltTcaCoppArpDrop1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283511: fltTcaCoppArpDrop1yearBytesTr

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283512: fltTcaCoppArpDrop5minBytesRate

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283513: fltTcaCoppArpDrop15minBytesRate

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283514: fltTcaCoppArpDrop1hBytesRate

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283515: fltTcaCoppArpDrop1dBytesRate

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283516: fltTcaCoppArpDrop1wBytesRate

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283517: fltTcaCoppArpDrop1moBytesRate

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283518: fltTcaCoppArpDrop1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283519: fltTcaCoppArpDrop1yearBytesRate

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283592: fltTcaCoppArpDrop5minBytesRateLast

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283593: fltTcaCoppArpDrop15minBytesRateLast

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283594: fltTcaCoppArpDrop1hBytesRateLast

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283595: fltTcaCoppArpDrop1dBytesRateLast

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283596: fltTcaCoppArpDrop1wBytesRateLast

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283597: fltTcaCoppArpDrop1moBytesRateLast

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283598: fltTcaCoppArpDrop1qtrBytesRateLast

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283599: fltTcaCoppArpDrop1yearBytesRateLast

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283600: fltTcaCoppArpDrop5minBytesRateMin

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283601: fltTcaCoppArpDrop15minBytesRateMin

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283602: fltTcaCoppArpDrop1hBytesRateMin

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283603: fltTcaCoppArpDrop1dBytesRateMin

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283604: fltTcaCoppArpDrop1wBytesRateMin

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283605: fltTcaCoppArpDrop1moBytesRateMin

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283606: fltTcaCoppArpDrop1qtrBytesRateMin

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283607: fltTcaCoppArpDrop1yearBytesRateMin

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283608: fltTcaCoppArpDrop5minBytesRateMax

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283609: fltTcaCoppArpDrop15minBytesRateMax

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283610: fltTcaCoppArpDrop1hBytesRateMax

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283611: fltTcaCoppArpDrop1dBytesRateMax

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283612: fltTcaCoppArpDrop1wBytesRateMax

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283613: fltTcaCoppArpDrop1moBytesRateMax

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283614: fltTcaCoppArpDrop1qtrBytesRateMax

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283615: fltTcaCoppArpDrop1yearBytesRateMax

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283616: fltTcaCoppArpDrop5minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283617: fltTcaCoppArpDrop15minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283618: fltTcaCoppArpDrop1hBytesRateAvg

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283619: fltTcaCoppArpDrop1dBytesRateAvg

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283620: fltTcaCoppArpDrop1wBytesRateAvg

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283621: fltTcaCoppArpDrop1moBytesRateAvg

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283622: fltTcaCoppArpDrop1qtrBytesRateAvg

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283623: fltTcaCoppArpDrop1yearBytesRateAvg

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283656: fltTcaCoppArpDrop5minBytesRateTr

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283657: fltTcaCoppArpDrop15minBytesRateTr

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283658: fltTcaCoppArpDrop1hBytesRateTr

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283659: fltTcaCoppArpDrop1dBytesRateTr

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283660: fltTcaCoppArpDrop1wBytesRateTr

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283661: fltTcaCoppArpDrop1moBytesRateTr

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283662: fltTcaCoppArpDrop1qtrBytesRateTr

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283663: fltTcaCoppArpDrop1yearBytesRateTr

Severity: variable

Explanation: This fault is caused by "ArpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283712: fltTcaCoppArpDrop5minPktsLast

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283713: fltTcaCoppArpDrop15minPktsLast

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283714: fltTcaCoppArpDrop1hPktsLast

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283715: fltTcaCoppArpDrop1dPktsLast

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283716: fltTcaCoppArpDrop1wPktsLast

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283717: fltTcaCoppArpDrop1moPktsLast

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283718: fltTcaCoppArpDrop1qtrPktsLast

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283719: fltTcaCoppArpDrop1yearPktsLast

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283728: fltTcaCoppArpDrop5minPktsCum

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283729: fltTcaCoppArpDrop15minPktsCum

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283730: fltTcaCoppArpDrop1hPktsCum

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283731: fltTcaCoppArpDrop1dPktsCum

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283732: fltTcaCoppArpDrop1wPktsCum

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283733: fltTcaCoppArpDrop1moPktsCum

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283734: fltTcaCoppArpDrop1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283735: fltTcaCoppArpDrop1yearPktsCum

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283736: fltTcaCoppArpDrop5minPktsPer

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283737: fltTcaCoppArpDrop15minPktsPer

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283738: fltTcaCoppArpDrop1hPktsPer

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283739: fltTcaCoppArpDrop1dPktsPer

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283740: fltTcaCoppArpDrop1wPktsPer

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283741: fltTcaCoppArpDrop1moPktsPer

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283742: fltTcaCoppArpDrop1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283743: fltTcaCoppArpDrop1yearPktsPer

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283744: fltTcaCoppArpDrop5minPktsMin

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283745: fltTcaCoppArpDrop15minPktsMin

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283746: fltTcaCoppArpDrop1hPktsMin

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283747: fltTcaCoppArpDrop1dPktsMin

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283748: fltTcaCoppArpDrop1wPktsMin

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283749: fltTcaCoppArpDrop1moPktsMin

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283750: fltTcaCoppArpDrop1qtrPktsMin

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283751: fltTcaCoppArpDrop1yearPktsMin

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283752: fltTcaCoppArpDrop5minPktsMax

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283753: fltTcaCoppArpDrop15minPktsMax

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283754: fltTcaCoppArpDrop1hPktsMax

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283755: fltTcaCoppArpDrop1dPktsMax

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283756: fltTcaCoppArpDrop1wPktsMax

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283757: fltTcaCoppArpDrop1moPktsMax

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283758: fltTcaCoppArpDrop1qtrPktsMax

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283759: fltTcaCoppArpDrop1yearPktsMax

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283760: fltTcaCoppArpDrop5minPktsAvg

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283761: fltTcaCoppArpDrop15minPktsAvg

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283762: fltTcaCoppArpDrop1hPktsAvg

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283763: fltTcaCoppArpDrop1dPktsAvg

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283764: fltTcaCoppArpDrop1wPktsAvg

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283765: fltTcaCoppArpDrop1moPktsAvg

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283766: fltTcaCoppArpDrop1qtrPktsAvg

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283767: fltTcaCoppArpDrop1yearPktsAvg

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283792: fltTcaCoppArpDrop5minPktsTr

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283793: fltTcaCoppArpDrop15minPktsTr

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283794: fltTcaCoppArpDrop1hPktsTr

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283795: fltTcaCoppArpDrop1dPktsTr

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283796: fltTcaCoppArpDrop1wPktsTr

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283797: fltTcaCoppArpDrop1moPktsTr

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283798: fltTcaCoppArpDrop1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283799: fltTcaCoppArpDrop1yearPktsTr

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283800: fltTcaCoppArpDrop5minPktsRate

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283801: fltTcaCoppArpDrop15minPktsRate

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283802: fltTcaCoppArpDrop1hPktsRate

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283803: fltTcaCoppArpDrop1dPktsRate

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283804: fltTcaCoppArpDrop1wPktsRate

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283805: fltTcaCoppArpDrop1moPktsRate

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283806: fltTcaCoppArpDrop1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283807: fltTcaCoppArpDrop1yearPktsRate

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283880: fltTcaCoppArpDrop5minPktsRateLast

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283881: fltTcaCoppArpDrop15minPktsRateLast

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283882: fltTcaCoppArpDrop1hPktsRateLast

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283883: fltTcaCoppArpDrop1dPktsRateLast

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283884: fltTcaCoppArpDrop1wPktsRateLast

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283885: fltTcaCoppArpDrop1moPktsRateLast

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283886: fltTcaCoppArpDrop1qtrPktsRateLast

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283887: fltTcaCoppArpDrop1yearPktsRateLast

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283888: fltTcaCoppArpDrop5minPktsRateMin

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283889: fltTcaCoppArpDrop15minPktsRateMin

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283890: fltTcaCoppArpDrop1hPktsRateMin

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283891: fltTcaCoppArpDrop1dPktsRateMin

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283892: fltTcaCoppArpDrop1wPktsRateMin

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283893: fltTcaCoppArpDrop1moPktsRateMin

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283894: fltTcaCoppArpDrop1qtrPktsRateMin

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283895: fltTcaCoppArpDrop1yearPktsRateMin

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283896: fltTcaCoppArpDrop5minPktsRateMax

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283897: fltTcaCoppArpDrop15minPktsRateMax

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283898: fltTcaCoppArpDrop1hPktsRateMax

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283899: fltTcaCoppArpDrop1dPktsRateMax

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2839: fltHvsLNodeOperationalIssues

Severity: major

Explanation: This fault is raised when ACI controller failed to get the properties of a VMware Distributed Switch.

Recommended Action: If you see this fault, take the following actions:

1. Check in VCenter whether there is any faults raised for the DVS in question and resolve the faults via VCenter

2. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F283900: fltTcaCoppArpDrop1wPktsRateMax

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283901: fltTcaCoppArpDrop1moPktsRateMax

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283902: fltTcaCoppArpDrop1qtrPktsRateMax

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283903: fltTcaCoppArpDrop1yearPktsRateMax

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283904: fltTcaCoppArpDrop5minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283905: fltTcaCoppArpDrop15minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283906: fltTcaCoppArpDrop1hPktsRateAvg

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283907: fltTcaCoppArpDrop1dPktsRateAvg

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283908: fltTcaCoppArpDrop1wPktsRateAvg

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283909: fltTcaCoppArpDrop1moPktsRateAvg

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283910: fltTcaCoppArpDrop1qtrPktsRateAvg

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283911: fltTcaCoppArpDrop1yearPktsRateAvg

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283944: fltTcaCoppArpDrop5minPktsRateTr

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283945: fltTcaCoppArpDrop15minPktsRateTr

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283946: fltTcaCoppArpDrop1hPktsRateTr

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283947: fltTcaCoppArpDrop1dPktsRateTr

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283948: fltTcaCoppArpDrop1wPktsRateTr

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283949: fltTcaCoppArpDrop1moPktsRateTr

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283950: fltTcaCoppArpDrop1qtrPktsRateTr

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F283951: fltTcaCoppArpDrop1yearPktsRateTr

Severity: variable

Explanation: This fault is caused by "ArpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ArpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2840: fltCompHvRemoteOperIssues

Severity: major

Explanation: This fault is raised when ACI controller failed to update the properties of a VMware hypervisor.

Recommended Action: If you see this fault, take the following actions:

1. Check in VCenter whether there is any faults raised for the Hypervisor in question and resolve the faults via VCenter

2. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F284000: fltTcaCoppBfdAllow5minBytesLast

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284001: fltTcaCoppBfdAllow15minBytesLast

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284002: fltTcaCoppBfdAllow1hBytesLast

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284003: fltTcaCoppBfdAllow1dBytesLast

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284004: fltTcaCoppBfdAllow1wBytesLast

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284005: fltTcaCoppBfdAllow1moBytesLast

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284006: fltTcaCoppBfdAllow1qtrBytesLast

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284007: fltTcaCoppBfdAllow1yearBytesLast

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284016: fltTcaCoppBfdAllow5minBytesCum

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284017: fltTcaCoppBfdAllow15minBytesCum

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284018: fltTcaCoppBfdAllow1hBytesCum

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284019: fltTcaCoppBfdAllow1dBytesCum

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284020: fltTcaCoppBfdAllow1wBytesCum

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284021: fltTcaCoppBfdAllow1moBytesCum

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284022: fltTcaCoppBfdAllow1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284023: fltTcaCoppBfdAllow1yearBytesCum

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284024: fltTcaCoppBfdAllow5minBytesPer

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284025: fltTcaCoppBfdAllow15minBytesPer

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284026: fltTcaCoppBfdAllow1hBytesPer

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284027: fltTcaCoppBfdAllow1dBytesPer

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284028: fltTcaCoppBfdAllow1wBytesPer

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284029: fltTcaCoppBfdAllow1moBytesPer

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284030: fltTcaCoppBfdAllow1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284031: fltTcaCoppBfdAllow1yearBytesPer

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284032: fltTcaCoppBfdAllow5minBytesMin

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284033: fltTcaCoppBfdAllow15minBytesMin

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284034: fltTcaCoppBfdAllow1hBytesMin

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284035: fltTcaCoppBfdAllow1dBytesMin

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284036: fltTcaCoppBfdAllow1wBytesMin

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284037: fltTcaCoppBfdAllow1moBytesMin

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284038: fltTcaCoppBfdAllow1qtrBytesMin

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284039: fltTcaCoppBfdAllow1yearBytesMin

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284040: fltTcaCoppBfdAllow5minBytesMax

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284041: fltTcaCoppBfdAllow15minBytesMax

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284042: fltTcaCoppBfdAllow1hBytesMax

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284043: fltTcaCoppBfdAllow1dBytesMax

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284044: fltTcaCoppBfdAllow1wBytesMax

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284045: fltTcaCoppBfdAllow1moBytesMax

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284046: fltTcaCoppBfdAllow1qtrBytesMax

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284047: fltTcaCoppBfdAllow1yearBytesMax

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284048: fltTcaCoppBfdAllow5minBytesAvg

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284049: fltTcaCoppBfdAllow15minBytesAvg

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284050: fltTcaCoppBfdAllow1hBytesAvg

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284051: fltTcaCoppBfdAllow1dBytesAvg

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284052: fltTcaCoppBfdAllow1wBytesAvg

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284053: fltTcaCoppBfdAllow1moBytesAvg

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284054: fltTcaCoppBfdAllow1qtrBytesAvg

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284055: fltTcaCoppBfdAllow1yearBytesAvg

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284080: fltTcaCoppBfdAllow5minBytesTr

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284081: fltTcaCoppBfdAllow15minBytesTr

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284082: fltTcaCoppBfdAllow1hBytesTr

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284083: fltTcaCoppBfdAllow1dBytesTr

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284084: fltTcaCoppBfdAllow1wBytesTr

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284085: fltTcaCoppBfdAllow1moBytesTr

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284086: fltTcaCoppBfdAllow1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284087: fltTcaCoppBfdAllow1yearBytesTr

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284088: fltTcaCoppBfdAllow5minBytesRate

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284089: fltTcaCoppBfdAllow15minBytesRate

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284090: fltTcaCoppBfdAllow1hBytesRate

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284091: fltTcaCoppBfdAllow1dBytesRate

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284092: fltTcaCoppBfdAllow1wBytesRate

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284093: fltTcaCoppBfdAllow1moBytesRate

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284094: fltTcaCoppBfdAllow1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284095: fltTcaCoppBfdAllow1yearBytesRate

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2841: fltCompVmOperationalIssues

Severity: major

Explanation: This fault is raised when ACI controller failed to update the properties of a VMware virtual machine.

Recommended Action: If you see this fault, take the following actions:

1. Check in VCenter whether there is any faults raised for the VM in question and resolve the faults via VCenter

2. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F284168: fltTcaCoppBfdAllow5minBytesRateLast

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284169: fltTcaCoppBfdAllow15minBytesRateLast

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284170: fltTcaCoppBfdAllow1hBytesRateLast

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284171: fltTcaCoppBfdAllow1dBytesRateLast

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284172: fltTcaCoppBfdAllow1wBytesRateLast

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284173: fltTcaCoppBfdAllow1moBytesRateLast

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284174: fltTcaCoppBfdAllow1qtrBytesRateLast

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284175: fltTcaCoppBfdAllow1yearBytesRateLast

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284176: fltTcaCoppBfdAllow5minBytesRateMin

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284177: fltTcaCoppBfdAllow15minBytesRateMin

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284178: fltTcaCoppBfdAllow1hBytesRateMin

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284179: fltTcaCoppBfdAllow1dBytesRateMin

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284180: fltTcaCoppBfdAllow1wBytesRateMin

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284181: fltTcaCoppBfdAllow1moBytesRateMin

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284182: fltTcaCoppBfdAllow1qtrBytesRateMin

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284183: fltTcaCoppBfdAllow1yearBytesRateMin

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284184: fltTcaCoppBfdAllow5minBytesRateMax

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284185: fltTcaCoppBfdAllow15minBytesRateMax

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284186: fltTcaCoppBfdAllow1hBytesRateMax

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284187: fltTcaCoppBfdAllow1dBytesRateMax

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284188: fltTcaCoppBfdAllow1wBytesRateMax

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284189: fltTcaCoppBfdAllow1moBytesRateMax

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284190: fltTcaCoppBfdAllow1qtrBytesRateMax

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284191: fltTcaCoppBfdAllow1yearBytesRateMax

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284192: fltTcaCoppBfdAllow5minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284193: fltTcaCoppBfdAllow15minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284194: fltTcaCoppBfdAllow1hBytesRateAvg

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284195: fltTcaCoppBfdAllow1dBytesRateAvg

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284196: fltTcaCoppBfdAllow1wBytesRateAvg

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284197: fltTcaCoppBfdAllow1moBytesRateAvg

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284198: fltTcaCoppBfdAllow1qtrBytesRateAvg

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284199: fltTcaCoppBfdAllow1yearBytesRateAvg

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2842: fltCompVNicOperationalIssues

Severity: major

Explanation: This fault is raised when ACI controller failed to update the properties of a VNIC (e.g., it can not find the EPG that the VNIC attached to).

Recommended Action: If you see this fault, take the following actions:

1. Check in VCenter about the port group that the VNIC is attaching to and clear the port group if it is invalid.

2. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F284232: fltTcaCoppBfdAllow5minBytesRateTr

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284233: fltTcaCoppBfdAllow15minBytesRateTr

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284234: fltTcaCoppBfdAllow1hBytesRateTr

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284235: fltTcaCoppBfdAllow1dBytesRateTr

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284236: fltTcaCoppBfdAllow1wBytesRateTr

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284237: fltTcaCoppBfdAllow1moBytesRateTr

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284238: fltTcaCoppBfdAllow1qtrBytesRateTr

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284239: fltTcaCoppBfdAllow1yearBytesRateTr

Severity: variable

Explanation: This fault is caused by "BfdAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284288: fltTcaCoppBfdAllow5minPktsLast

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284289: fltTcaCoppBfdAllow15minPktsLast

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284290: fltTcaCoppBfdAllow1hPktsLast

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284291: fltTcaCoppBfdAllow1dPktsLast

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284292: fltTcaCoppBfdAllow1wPktsLast

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284293: fltTcaCoppBfdAllow1moPktsLast

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284294: fltTcaCoppBfdAllow1qtrPktsLast

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284295: fltTcaCoppBfdAllow1yearPktsLast

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2843: fltCompHpNicRemoteOperIssues

Severity: major

Explanation: This fault is raised when ACI controller failed to find the DVS that the Hypervisor NIC is attached to.

Recommended Action: If you see this fault, take the following actions:

1. Check in VCenter about the port group that the Hypervisor NIC is attaching to and clear the port group if it is invalid.

2. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F284304: fltTcaCoppBfdAllow5minPktsCum

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284305: fltTcaCoppBfdAllow15minPktsCum

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284306: fltTcaCoppBfdAllow1hPktsCum

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284307: fltTcaCoppBfdAllow1dPktsCum

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284308: fltTcaCoppBfdAllow1wPktsCum

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284309: fltTcaCoppBfdAllow1moPktsCum

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284310: fltTcaCoppBfdAllow1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284311: fltTcaCoppBfdAllow1yearPktsCum

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284312: fltTcaCoppBfdAllow5minPktsPer

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284313: fltTcaCoppBfdAllow15minPktsPer

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284314: fltTcaCoppBfdAllow1hPktsPer

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284315: fltTcaCoppBfdAllow1dPktsPer

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284316: fltTcaCoppBfdAllow1wPktsPer

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284317: fltTcaCoppBfdAllow1moPktsPer

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284318: fltTcaCoppBfdAllow1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284319: fltTcaCoppBfdAllow1yearPktsPer

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284320: fltTcaCoppBfdAllow5minPktsMin

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284321: fltTcaCoppBfdAllow15minPktsMin

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284322: fltTcaCoppBfdAllow1hPktsMin

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284323: fltTcaCoppBfdAllow1dPktsMin

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284324: fltTcaCoppBfdAllow1wPktsMin

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284325: fltTcaCoppBfdAllow1moPktsMin

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284326: fltTcaCoppBfdAllow1qtrPktsMin

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284327: fltTcaCoppBfdAllow1yearPktsMin

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284328: fltTcaCoppBfdAllow5minPktsMax

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284329: fltTcaCoppBfdAllow15minPktsMax

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284330: fltTcaCoppBfdAllow1hPktsMax

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284331: fltTcaCoppBfdAllow1dPktsMax

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284332: fltTcaCoppBfdAllow1wPktsMax

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284333: fltTcaCoppBfdAllow1moPktsMax

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284334: fltTcaCoppBfdAllow1qtrPktsMax

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284335: fltTcaCoppBfdAllow1yearPktsMax

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284336: fltTcaCoppBfdAllow5minPktsAvg

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284337: fltTcaCoppBfdAllow15minPktsAvg

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284338: fltTcaCoppBfdAllow1hPktsAvg

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284339: fltTcaCoppBfdAllow1dPktsAvg

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284340: fltTcaCoppBfdAllow1wPktsAvg

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284341: fltTcaCoppBfdAllow1moPktsAvg

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284342: fltTcaCoppBfdAllow1qtrPktsAvg

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284343: fltTcaCoppBfdAllow1yearPktsAvg

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284368: fltTcaCoppBfdAllow5minPktsTr

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284369: fltTcaCoppBfdAllow15minPktsTr

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284370: fltTcaCoppBfdAllow1hPktsTr

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284371: fltTcaCoppBfdAllow1dPktsTr

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284372: fltTcaCoppBfdAllow1wPktsTr

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284373: fltTcaCoppBfdAllow1moPktsTr

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284374: fltTcaCoppBfdAllow1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284375: fltTcaCoppBfdAllow1yearPktsTr

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284376: fltTcaCoppBfdAllow5minPktsRate

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284377: fltTcaCoppBfdAllow15minPktsRate

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284378: fltTcaCoppBfdAllow1hPktsRate

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284379: fltTcaCoppBfdAllow1dPktsRate

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284380: fltTcaCoppBfdAllow1wPktsRate

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284381: fltTcaCoppBfdAllow1moPktsRate

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284382: fltTcaCoppBfdAllow1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284383: fltTcaCoppBfdAllow1yearPktsRate

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2844: fltCompMgmtNicRemoteOperIssues

Severity: major

Explanation: This fault is raised when ACI controller failed to find the DVS that the VM KNIC is attached to.

Recommended Action: If you see this fault, take the following actions:

1. Check in VCenter about the DVS that the VMK NIC is attaching to and clear the DVS if it is invalid.

2. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F284456: fltTcaCoppBfdAllow5minPktsRateLast

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284457: fltTcaCoppBfdAllow15minPktsRateLast

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284458: fltTcaCoppBfdAllow1hPktsRateLast

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284459: fltTcaCoppBfdAllow1dPktsRateLast

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284460: fltTcaCoppBfdAllow1wPktsRateLast

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284461: fltTcaCoppBfdAllow1moPktsRateLast

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284462: fltTcaCoppBfdAllow1qtrPktsRateLast

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284463: fltTcaCoppBfdAllow1yearPktsRateLast

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284464: fltTcaCoppBfdAllow5minPktsRateMin

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284465: fltTcaCoppBfdAllow15minPktsRateMin

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284466: fltTcaCoppBfdAllow1hPktsRateMin

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284467: fltTcaCoppBfdAllow1dPktsRateMin

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284468: fltTcaCoppBfdAllow1wPktsRateMin

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284469: fltTcaCoppBfdAllow1moPktsRateMin

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284470: fltTcaCoppBfdAllow1qtrPktsRateMin

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284471: fltTcaCoppBfdAllow1yearPktsRateMin

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284472: fltTcaCoppBfdAllow5minPktsRateMax

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284473: fltTcaCoppBfdAllow15minPktsRateMax

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284474: fltTcaCoppBfdAllow1hPktsRateMax

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284475: fltTcaCoppBfdAllow1dPktsRateMax

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284476: fltTcaCoppBfdAllow1wPktsRateMax

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284477: fltTcaCoppBfdAllow1moPktsRateMax

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284478: fltTcaCoppBfdAllow1qtrPktsRateMax

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284479: fltTcaCoppBfdAllow1yearPktsRateMax

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284480: fltTcaCoppBfdAllow5minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284481: fltTcaCoppBfdAllow15minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284482: fltTcaCoppBfdAllow1hPktsRateAvg

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284483: fltTcaCoppBfdAllow1dPktsRateAvg

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284484: fltTcaCoppBfdAllow1wPktsRateAvg

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284485: fltTcaCoppBfdAllow1moPktsRateAvg

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284486: fltTcaCoppBfdAllow1qtrPktsRateAvg

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284487: fltTcaCoppBfdAllow1yearPktsRateAvg

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284520: fltTcaCoppBfdAllow5minPktsRateTr

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284521: fltTcaCoppBfdAllow15minPktsRateTr

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284522: fltTcaCoppBfdAllow1hPktsRateTr

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284523: fltTcaCoppBfdAllow1dPktsRateTr

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284524: fltTcaCoppBfdAllow1wPktsRateTr

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284525: fltTcaCoppBfdAllow1moPktsRateTr

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284526: fltTcaCoppBfdAllow1qtrPktsRateTr

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284527: fltTcaCoppBfdAllow1yearPktsRateTr

Severity: variable

Explanation: This fault is caused by "BfdAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284576: fltTcaCoppBfdDrop5minBytesLast

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284577: fltTcaCoppBfdDrop15minBytesLast

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284578: fltTcaCoppBfdDrop1hBytesLast

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284579: fltTcaCoppBfdDrop1dBytesLast

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284580: fltTcaCoppBfdDrop1wBytesLast

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284581: fltTcaCoppBfdDrop1moBytesLast

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284582: fltTcaCoppBfdDrop1qtrBytesLast

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284583: fltTcaCoppBfdDrop1yearBytesLast

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284592: fltTcaCoppBfdDrop5minBytesCum

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284593: fltTcaCoppBfdDrop15minBytesCum

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284594: fltTcaCoppBfdDrop1hBytesCum

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284595: fltTcaCoppBfdDrop1dBytesCum

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284596: fltTcaCoppBfdDrop1wBytesCum

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284597: fltTcaCoppBfdDrop1moBytesCum

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284598: fltTcaCoppBfdDrop1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284599: fltTcaCoppBfdDrop1yearBytesCum

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284600: fltTcaCoppBfdDrop5minBytesPer

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284601: fltTcaCoppBfdDrop15minBytesPer

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284602: fltTcaCoppBfdDrop1hBytesPer

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284603: fltTcaCoppBfdDrop1dBytesPer

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284604: fltTcaCoppBfdDrop1wBytesPer

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284605: fltTcaCoppBfdDrop1moBytesPer

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284606: fltTcaCoppBfdDrop1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284607: fltTcaCoppBfdDrop1yearBytesPer

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284608: fltTcaCoppBfdDrop5minBytesMin

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284609: fltTcaCoppBfdDrop15minBytesMin

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284610: fltTcaCoppBfdDrop1hBytesMin

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284611: fltTcaCoppBfdDrop1dBytesMin

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284612: fltTcaCoppBfdDrop1wBytesMin

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284613: fltTcaCoppBfdDrop1moBytesMin

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284614: fltTcaCoppBfdDrop1qtrBytesMin

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284615: fltTcaCoppBfdDrop1yearBytesMin

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284616: fltTcaCoppBfdDrop5minBytesMax

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284617: fltTcaCoppBfdDrop15minBytesMax

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284618: fltTcaCoppBfdDrop1hBytesMax

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284619: fltTcaCoppBfdDrop1dBytesMax

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284620: fltTcaCoppBfdDrop1wBytesMax

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284621: fltTcaCoppBfdDrop1moBytesMax

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284622: fltTcaCoppBfdDrop1qtrBytesMax

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284623: fltTcaCoppBfdDrop1yearBytesMax

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284624: fltTcaCoppBfdDrop5minBytesAvg

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284625: fltTcaCoppBfdDrop15minBytesAvg

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284626: fltTcaCoppBfdDrop1hBytesAvg

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284627: fltTcaCoppBfdDrop1dBytesAvg

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284628: fltTcaCoppBfdDrop1wBytesAvg

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284629: fltTcaCoppBfdDrop1moBytesAvg

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284630: fltTcaCoppBfdDrop1qtrBytesAvg

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284631: fltTcaCoppBfdDrop1yearBytesAvg

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284656: fltTcaCoppBfdDrop5minBytesTr

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284657: fltTcaCoppBfdDrop15minBytesTr

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284658: fltTcaCoppBfdDrop1hBytesTr

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284659: fltTcaCoppBfdDrop1dBytesTr

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284660: fltTcaCoppBfdDrop1wBytesTr

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284661: fltTcaCoppBfdDrop1moBytesTr

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284662: fltTcaCoppBfdDrop1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284663: fltTcaCoppBfdDrop1yearBytesTr

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284664: fltTcaCoppBfdDrop5minBytesRate

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284665: fltTcaCoppBfdDrop15minBytesRate

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284666: fltTcaCoppBfdDrop1hBytesRate

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284667: fltTcaCoppBfdDrop1dBytesRate

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284668: fltTcaCoppBfdDrop1wBytesRate

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284669: fltTcaCoppBfdDrop1moBytesRate

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284670: fltTcaCoppBfdDrop1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284671: fltTcaCoppBfdDrop1yearBytesRate

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284744: fltTcaCoppBfdDrop5minBytesRateLast

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284745: fltTcaCoppBfdDrop15minBytesRateLast

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284746: fltTcaCoppBfdDrop1hBytesRateLast

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284747: fltTcaCoppBfdDrop1dBytesRateLast

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284748: fltTcaCoppBfdDrop1wBytesRateLast

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284749: fltTcaCoppBfdDrop1moBytesRateLast

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284750: fltTcaCoppBfdDrop1qtrBytesRateLast

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284751: fltTcaCoppBfdDrop1yearBytesRateLast

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284752: fltTcaCoppBfdDrop5minBytesRateMin

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284753: fltTcaCoppBfdDrop15minBytesRateMin

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284754: fltTcaCoppBfdDrop1hBytesRateMin

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284755: fltTcaCoppBfdDrop1dBytesRateMin

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284756: fltTcaCoppBfdDrop1wBytesRateMin

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284757: fltTcaCoppBfdDrop1moBytesRateMin

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284758: fltTcaCoppBfdDrop1qtrBytesRateMin

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284759: fltTcaCoppBfdDrop1yearBytesRateMin

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284760: fltTcaCoppBfdDrop5minBytesRateMax

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284761: fltTcaCoppBfdDrop15minBytesRateMax

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284762: fltTcaCoppBfdDrop1hBytesRateMax

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284763: fltTcaCoppBfdDrop1dBytesRateMax

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284764: fltTcaCoppBfdDrop1wBytesRateMax

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284765: fltTcaCoppBfdDrop1moBytesRateMax

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284766: fltTcaCoppBfdDrop1qtrBytesRateMax

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284767: fltTcaCoppBfdDrop1yearBytesRateMax

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284768: fltTcaCoppBfdDrop5minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284769: fltTcaCoppBfdDrop15minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284770: fltTcaCoppBfdDrop1hBytesRateAvg

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284771: fltTcaCoppBfdDrop1dBytesRateAvg

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284772: fltTcaCoppBfdDrop1wBytesRateAvg

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284773: fltTcaCoppBfdDrop1moBytesRateAvg

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284774: fltTcaCoppBfdDrop1qtrBytesRateAvg

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284775: fltTcaCoppBfdDrop1yearBytesRateAvg

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284808: fltTcaCoppBfdDrop5minBytesRateTr

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284809: fltTcaCoppBfdDrop15minBytesRateTr

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284810: fltTcaCoppBfdDrop1hBytesRateTr

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284811: fltTcaCoppBfdDrop1dBytesRateTr

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284812: fltTcaCoppBfdDrop1wBytesRateTr

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284813: fltTcaCoppBfdDrop1moBytesRateTr

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284814: fltTcaCoppBfdDrop1qtrBytesRateTr

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284815: fltTcaCoppBfdDrop1yearBytesRateTr

Severity: variable

Explanation: This fault is caused by "BfdDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284864: fltTcaCoppBfdDrop5minPktsLast

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284865: fltTcaCoppBfdDrop15minPktsLast

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284866: fltTcaCoppBfdDrop1hPktsLast

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284867: fltTcaCoppBfdDrop1dPktsLast

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284868: fltTcaCoppBfdDrop1wPktsLast

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284869: fltTcaCoppBfdDrop1moPktsLast

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284870: fltTcaCoppBfdDrop1qtrPktsLast

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284871: fltTcaCoppBfdDrop1yearPktsLast

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284880: fltTcaCoppBfdDrop5minPktsCum

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284881: fltTcaCoppBfdDrop15minPktsCum

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284882: fltTcaCoppBfdDrop1hPktsCum

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284883: fltTcaCoppBfdDrop1dPktsCum

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284884: fltTcaCoppBfdDrop1wPktsCum

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284885: fltTcaCoppBfdDrop1moPktsCum

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284886: fltTcaCoppBfdDrop1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284887: fltTcaCoppBfdDrop1yearPktsCum

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284888: fltTcaCoppBfdDrop5minPktsPer

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284889: fltTcaCoppBfdDrop15minPktsPer

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284890: fltTcaCoppBfdDrop1hPktsPer

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284891: fltTcaCoppBfdDrop1dPktsPer

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284892: fltTcaCoppBfdDrop1wPktsPer

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284893: fltTcaCoppBfdDrop1moPktsPer

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284894: fltTcaCoppBfdDrop1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284895: fltTcaCoppBfdDrop1yearPktsPer

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284896: fltTcaCoppBfdDrop5minPktsMin

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284897: fltTcaCoppBfdDrop15minPktsMin

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284898: fltTcaCoppBfdDrop1hPktsMin

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284899: fltTcaCoppBfdDrop1dPktsMin

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284900: fltTcaCoppBfdDrop1wPktsMin

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284901: fltTcaCoppBfdDrop1moPktsMin

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284902: fltTcaCoppBfdDrop1qtrPktsMin

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284903: fltTcaCoppBfdDrop1yearPktsMin

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284904: fltTcaCoppBfdDrop5minPktsMax

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284905: fltTcaCoppBfdDrop15minPktsMax

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284906: fltTcaCoppBfdDrop1hPktsMax

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284907: fltTcaCoppBfdDrop1dPktsMax

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284908: fltTcaCoppBfdDrop1wPktsMax

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284909: fltTcaCoppBfdDrop1moPktsMax

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284910: fltTcaCoppBfdDrop1qtrPktsMax

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284911: fltTcaCoppBfdDrop1yearPktsMax

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284912: fltTcaCoppBfdDrop5minPktsAvg

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284913: fltTcaCoppBfdDrop15minPktsAvg

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284914: fltTcaCoppBfdDrop1hPktsAvg

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284915: fltTcaCoppBfdDrop1dPktsAvg

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284916: fltTcaCoppBfdDrop1wPktsAvg

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284917: fltTcaCoppBfdDrop1moPktsAvg

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284918: fltTcaCoppBfdDrop1qtrPktsAvg

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284919: fltTcaCoppBfdDrop1yearPktsAvg

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284944: fltTcaCoppBfdDrop5minPktsTr

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284945: fltTcaCoppBfdDrop15minPktsTr

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284946: fltTcaCoppBfdDrop1hPktsTr

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284947: fltTcaCoppBfdDrop1dPktsTr

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284948: fltTcaCoppBfdDrop1wPktsTr

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284949: fltTcaCoppBfdDrop1moPktsTr

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284950: fltTcaCoppBfdDrop1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284951: fltTcaCoppBfdDrop1yearPktsTr

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284952: fltTcaCoppBfdDrop5minPktsRate

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284953: fltTcaCoppBfdDrop15minPktsRate

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284954: fltTcaCoppBfdDrop1hPktsRate

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284955: fltTcaCoppBfdDrop1dPktsRate

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284956: fltTcaCoppBfdDrop1wPktsRate

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284957: fltTcaCoppBfdDrop1moPktsRate

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284958: fltTcaCoppBfdDrop1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F284959: fltTcaCoppBfdDrop1yearPktsRate

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285032: fltTcaCoppBfdDrop5minPktsRateLast

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285033: fltTcaCoppBfdDrop15minPktsRateLast

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285034: fltTcaCoppBfdDrop1hPktsRateLast

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285035: fltTcaCoppBfdDrop1dPktsRateLast

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285036: fltTcaCoppBfdDrop1wPktsRateLast

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285037: fltTcaCoppBfdDrop1moPktsRateLast

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285038: fltTcaCoppBfdDrop1qtrPktsRateLast

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285039: fltTcaCoppBfdDrop1yearPktsRateLast

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285040: fltTcaCoppBfdDrop5minPktsRateMin

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285041: fltTcaCoppBfdDrop15minPktsRateMin

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285042: fltTcaCoppBfdDrop1hPktsRateMin

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285043: fltTcaCoppBfdDrop1dPktsRateMin

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285044: fltTcaCoppBfdDrop1wPktsRateMin

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285045: fltTcaCoppBfdDrop1moPktsRateMin

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285046: fltTcaCoppBfdDrop1qtrPktsRateMin

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285047: fltTcaCoppBfdDrop1yearPktsRateMin

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285048: fltTcaCoppBfdDrop5minPktsRateMax

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285049: fltTcaCoppBfdDrop15minPktsRateMax

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285050: fltTcaCoppBfdDrop1hPktsRateMax

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285051: fltTcaCoppBfdDrop1dPktsRateMax

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285052: fltTcaCoppBfdDrop1wPktsRateMax

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285053: fltTcaCoppBfdDrop1moPktsRateMax

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285054: fltTcaCoppBfdDrop1qtrPktsRateMax

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285055: fltTcaCoppBfdDrop1yearPktsRateMax

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285056: fltTcaCoppBfdDrop5minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285057: fltTcaCoppBfdDrop15minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285058: fltTcaCoppBfdDrop1hPktsRateAvg

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285059: fltTcaCoppBfdDrop1dPktsRateAvg

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285060: fltTcaCoppBfdDrop1wPktsRateAvg

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285061: fltTcaCoppBfdDrop1moPktsRateAvg

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285062: fltTcaCoppBfdDrop1qtrPktsRateAvg

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285063: fltTcaCoppBfdDrop1yearPktsRateAvg

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285096: fltTcaCoppBfdDrop5minPktsRateTr

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285097: fltTcaCoppBfdDrop15minPktsRateTr

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285098: fltTcaCoppBfdDrop1hPktsRateTr

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285099: fltTcaCoppBfdDrop1dPktsRateTr

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2851: fltAaaRsaProviderRsaProvider_Inoperable

Severity: minor

Explanation: This fault occurs when the Rsa Provider is not operational.

Recommended Action: If you see this fault, take the following actions:

1. Verify the IP address and path to the Rsa provider are still active and functioning.

2. Ensure the configuration on the Rsa provider has not changed.

3. Verify that the Rsa provider is still functioning properly

4. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F285100: fltTcaCoppBfdDrop1wPktsRateTr

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285101: fltTcaCoppBfdDrop1moPktsRateTr

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285102: fltTcaCoppBfdDrop1qtrPktsRateTr

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285103: fltTcaCoppBfdDrop1yearPktsRateTr

Severity: variable

Explanation: This fault is caused by "BfdDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BfdDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285152: fltTcaCoppBgpAllow5minBytesLast

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285153: fltTcaCoppBgpAllow15minBytesLast

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285154: fltTcaCoppBgpAllow1hBytesLast

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285155: fltTcaCoppBgpAllow1dBytesLast

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285156: fltTcaCoppBgpAllow1wBytesLast

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285157: fltTcaCoppBgpAllow1moBytesLast

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285158: fltTcaCoppBgpAllow1qtrBytesLast

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285159: fltTcaCoppBgpAllow1yearBytesLast

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285168: fltTcaCoppBgpAllow5minBytesCum

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285169: fltTcaCoppBgpAllow15minBytesCum

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285170: fltTcaCoppBgpAllow1hBytesCum

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285171: fltTcaCoppBgpAllow1dBytesCum

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285172: fltTcaCoppBgpAllow1wBytesCum

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285173: fltTcaCoppBgpAllow1moBytesCum

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285174: fltTcaCoppBgpAllow1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285175: fltTcaCoppBgpAllow1yearBytesCum

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285176: fltTcaCoppBgpAllow5minBytesPer

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285177: fltTcaCoppBgpAllow15minBytesPer

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285178: fltTcaCoppBgpAllow1hBytesPer

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285179: fltTcaCoppBgpAllow1dBytesPer

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285180: fltTcaCoppBgpAllow1wBytesPer

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285181: fltTcaCoppBgpAllow1moBytesPer

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285182: fltTcaCoppBgpAllow1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285183: fltTcaCoppBgpAllow1yearBytesPer

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285184: fltTcaCoppBgpAllow5minBytesMin

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285185: fltTcaCoppBgpAllow15minBytesMin

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285186: fltTcaCoppBgpAllow1hBytesMin

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285187: fltTcaCoppBgpAllow1dBytesMin

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285188: fltTcaCoppBgpAllow1wBytesMin

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285189: fltTcaCoppBgpAllow1moBytesMin

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285190: fltTcaCoppBgpAllow1qtrBytesMin

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285191: fltTcaCoppBgpAllow1yearBytesMin

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285192: fltTcaCoppBgpAllow5minBytesMax

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285193: fltTcaCoppBgpAllow15minBytesMax

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285194: fltTcaCoppBgpAllow1hBytesMax

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285195: fltTcaCoppBgpAllow1dBytesMax

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285196: fltTcaCoppBgpAllow1wBytesMax

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285197: fltTcaCoppBgpAllow1moBytesMax

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285198: fltTcaCoppBgpAllow1qtrBytesMax

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285199: fltTcaCoppBgpAllow1yearBytesMax

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2852: fltAaaRsaProviderRsaProviderInoperable

Severity: minor

Explanation: This fault occurs when the Rsa Provider is not operational.

Recommended Action: If you see this fault, take the following actions:

1. Verify the IP address and path to the Rsa provider are still active and functioning.

2. Ensure the configuration on the Rsa provider has not changed.

3. Verify that the Rsa provider is still functioning properly

4. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F285200: fltTcaCoppBgpAllow5minBytesAvg

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285201: fltTcaCoppBgpAllow15minBytesAvg

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285202: fltTcaCoppBgpAllow1hBytesAvg

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285203: fltTcaCoppBgpAllow1dBytesAvg

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285204: fltTcaCoppBgpAllow1wBytesAvg

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285205: fltTcaCoppBgpAllow1moBytesAvg

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285206: fltTcaCoppBgpAllow1qtrBytesAvg

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285207: fltTcaCoppBgpAllow1yearBytesAvg

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285232: fltTcaCoppBgpAllow5minBytesTr

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285233: fltTcaCoppBgpAllow15minBytesTr

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285234: fltTcaCoppBgpAllow1hBytesTr

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285235: fltTcaCoppBgpAllow1dBytesTr

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285236: fltTcaCoppBgpAllow1wBytesTr

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285237: fltTcaCoppBgpAllow1moBytesTr

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285238: fltTcaCoppBgpAllow1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285239: fltTcaCoppBgpAllow1yearBytesTr

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285240: fltTcaCoppBgpAllow5minBytesRate

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285241: fltTcaCoppBgpAllow15minBytesRate

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285242: fltTcaCoppBgpAllow1hBytesRate

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285243: fltTcaCoppBgpAllow1dBytesRate

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285244: fltTcaCoppBgpAllow1wBytesRate

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285245: fltTcaCoppBgpAllow1moBytesRate

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285246: fltTcaCoppBgpAllow1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285247: fltTcaCoppBgpAllow1yearBytesRate

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2853: fltMacsecIfOperStDown

Severity: warning

Explanation: This fault occurs when the operational state of MACSec Interface is unsupported

Recommended Action: This fault occurs when you are trying to configure MACSec on

1. An unsupported Platform

2. An unsupported Version

F285320: fltTcaCoppBgpAllow5minBytesRateLast

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285321: fltTcaCoppBgpAllow15minBytesRateLast

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285322: fltTcaCoppBgpAllow1hBytesRateLast

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285323: fltTcaCoppBgpAllow1dBytesRateLast

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285324: fltTcaCoppBgpAllow1wBytesRateLast

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285325: fltTcaCoppBgpAllow1moBytesRateLast

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285326: fltTcaCoppBgpAllow1qtrBytesRateLast

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285327: fltTcaCoppBgpAllow1yearBytesRateLast

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285328: fltTcaCoppBgpAllow5minBytesRateMin

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285329: fltTcaCoppBgpAllow15minBytesRateMin

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285330: fltTcaCoppBgpAllow1hBytesRateMin

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285331: fltTcaCoppBgpAllow1dBytesRateMin

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285332: fltTcaCoppBgpAllow1wBytesRateMin

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285333: fltTcaCoppBgpAllow1moBytesRateMin

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285334: fltTcaCoppBgpAllow1qtrBytesRateMin

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285335: fltTcaCoppBgpAllow1yearBytesRateMin

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285336: fltTcaCoppBgpAllow5minBytesRateMax

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285337: fltTcaCoppBgpAllow15minBytesRateMax

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285338: fltTcaCoppBgpAllow1hBytesRateMax

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285339: fltTcaCoppBgpAllow1dBytesRateMax

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285340: fltTcaCoppBgpAllow1wBytesRateMax

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285341: fltTcaCoppBgpAllow1moBytesRateMax

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285342: fltTcaCoppBgpAllow1qtrBytesRateMax

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285343: fltTcaCoppBgpAllow1yearBytesRateMax

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285344: fltTcaCoppBgpAllow5minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285345: fltTcaCoppBgpAllow15minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285346: fltTcaCoppBgpAllow1hBytesRateAvg

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285347: fltTcaCoppBgpAllow1dBytesRateAvg

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285348: fltTcaCoppBgpAllow1wBytesRateAvg

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285349: fltTcaCoppBgpAllow1moBytesRateAvg

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285350: fltTcaCoppBgpAllow1qtrBytesRateAvg

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285351: fltTcaCoppBgpAllow1yearBytesRateAvg

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285384: fltTcaCoppBgpAllow5minBytesRateTr

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285385: fltTcaCoppBgpAllow15minBytesRateTr

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285386: fltTcaCoppBgpAllow1hBytesRateTr

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285387: fltTcaCoppBgpAllow1dBytesRateTr

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285388: fltTcaCoppBgpAllow1wBytesRateTr

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285389: fltTcaCoppBgpAllow1moBytesRateTr

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285390: fltTcaCoppBgpAllow1qtrBytesRateTr

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285391: fltTcaCoppBgpAllow1yearBytesRateTr

Severity: variable

Explanation: This fault is caused by "BgpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2854: fltMacsecFabIfOperStDown

Severity: warning

Explanation: This fault occurs when the operational state of MACSec Interface is unsupported

Recommended Action: This fault occurs when you are trying to configure MACSec on

1. An unsupported Platform

2. An unsupported Version

F285440: fltTcaCoppBgpAllow5minPktsLast

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285441: fltTcaCoppBgpAllow15minPktsLast

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285442: fltTcaCoppBgpAllow1hPktsLast

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285443: fltTcaCoppBgpAllow1dPktsLast

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285444: fltTcaCoppBgpAllow1wPktsLast

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285445: fltTcaCoppBgpAllow1moPktsLast

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285446: fltTcaCoppBgpAllow1qtrPktsLast

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285447: fltTcaCoppBgpAllow1yearPktsLast

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285456: fltTcaCoppBgpAllow5minPktsCum

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285457: fltTcaCoppBgpAllow15minPktsCum

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285458: fltTcaCoppBgpAllow1hPktsCum

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285459: fltTcaCoppBgpAllow1dPktsCum

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285460: fltTcaCoppBgpAllow1wPktsCum

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285461: fltTcaCoppBgpAllow1moPktsCum

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285462: fltTcaCoppBgpAllow1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285463: fltTcaCoppBgpAllow1yearPktsCum

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285464: fltTcaCoppBgpAllow5minPktsPer

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285465: fltTcaCoppBgpAllow15minPktsPer

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285466: fltTcaCoppBgpAllow1hPktsPer

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285467: fltTcaCoppBgpAllow1dPktsPer

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285468: fltTcaCoppBgpAllow1wPktsPer

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285469: fltTcaCoppBgpAllow1moPktsPer

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285470: fltTcaCoppBgpAllow1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285471: fltTcaCoppBgpAllow1yearPktsPer

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285472: fltTcaCoppBgpAllow5minPktsMin

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285473: fltTcaCoppBgpAllow15minPktsMin

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285474: fltTcaCoppBgpAllow1hPktsMin

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285475: fltTcaCoppBgpAllow1dPktsMin

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285476: fltTcaCoppBgpAllow1wPktsMin

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285477: fltTcaCoppBgpAllow1moPktsMin

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285478: fltTcaCoppBgpAllow1qtrPktsMin

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285479: fltTcaCoppBgpAllow1yearPktsMin

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285480: fltTcaCoppBgpAllow5minPktsMax

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285481: fltTcaCoppBgpAllow15minPktsMax

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285482: fltTcaCoppBgpAllow1hPktsMax

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285483: fltTcaCoppBgpAllow1dPktsMax

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285484: fltTcaCoppBgpAllow1wPktsMax

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285485: fltTcaCoppBgpAllow1moPktsMax

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285486: fltTcaCoppBgpAllow1qtrPktsMax

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285487: fltTcaCoppBgpAllow1yearPktsMax

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285488: fltTcaCoppBgpAllow5minPktsAvg

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285489: fltTcaCoppBgpAllow15minPktsAvg

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285490: fltTcaCoppBgpAllow1hPktsAvg

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285491: fltTcaCoppBgpAllow1dPktsAvg

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285492: fltTcaCoppBgpAllow1wPktsAvg

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285493: fltTcaCoppBgpAllow1moPktsAvg

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285494: fltTcaCoppBgpAllow1qtrPktsAvg

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285495: fltTcaCoppBgpAllow1yearPktsAvg

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2855: fltInfraRsIaclLeafProfileResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F285520: fltTcaCoppBgpAllow5minPktsTr

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285521: fltTcaCoppBgpAllow15minPktsTr

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285522: fltTcaCoppBgpAllow1hPktsTr

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285523: fltTcaCoppBgpAllow1dPktsTr

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285524: fltTcaCoppBgpAllow1wPktsTr

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285525: fltTcaCoppBgpAllow1moPktsTr

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285526: fltTcaCoppBgpAllow1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285527: fltTcaCoppBgpAllow1yearPktsTr

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285528: fltTcaCoppBgpAllow5minPktsRate

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285529: fltTcaCoppBgpAllow15minPktsRate

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285530: fltTcaCoppBgpAllow1hPktsRate

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285531: fltTcaCoppBgpAllow1dPktsRate

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285532: fltTcaCoppBgpAllow1wPktsRate

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285533: fltTcaCoppBgpAllow1moPktsRate

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285534: fltTcaCoppBgpAllow1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285535: fltTcaCoppBgpAllow1yearPktsRate

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2856: fltInfraRsIaclSpineProfileResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F285608: fltTcaCoppBgpAllow5minPktsRateLast

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285609: fltTcaCoppBgpAllow15minPktsRateLast

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285610: fltTcaCoppBgpAllow1hPktsRateLast

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285611: fltTcaCoppBgpAllow1dPktsRateLast

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285612: fltTcaCoppBgpAllow1wPktsRateLast

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285613: fltTcaCoppBgpAllow1moPktsRateLast

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285614: fltTcaCoppBgpAllow1qtrPktsRateLast

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285615: fltTcaCoppBgpAllow1yearPktsRateLast

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285616: fltTcaCoppBgpAllow5minPktsRateMin

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285617: fltTcaCoppBgpAllow15minPktsRateMin

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285618: fltTcaCoppBgpAllow1hPktsRateMin

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285619: fltTcaCoppBgpAllow1dPktsRateMin

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285620: fltTcaCoppBgpAllow1wPktsRateMin

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285621: fltTcaCoppBgpAllow1moPktsRateMin

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285622: fltTcaCoppBgpAllow1qtrPktsRateMin

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285623: fltTcaCoppBgpAllow1yearPktsRateMin

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285624: fltTcaCoppBgpAllow5minPktsRateMax

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285625: fltTcaCoppBgpAllow15minPktsRateMax

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285626: fltTcaCoppBgpAllow1hPktsRateMax

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285627: fltTcaCoppBgpAllow1dPktsRateMax

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285628: fltTcaCoppBgpAllow1wPktsRateMax

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285629: fltTcaCoppBgpAllow1moPktsRateMax

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285630: fltTcaCoppBgpAllow1qtrPktsRateMax

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285631: fltTcaCoppBgpAllow1yearPktsRateMax

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285632: fltTcaCoppBgpAllow5minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285633: fltTcaCoppBgpAllow15minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285634: fltTcaCoppBgpAllow1hPktsRateAvg

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285635: fltTcaCoppBgpAllow1dPktsRateAvg

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285636: fltTcaCoppBgpAllow1wPktsRateAvg

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285637: fltTcaCoppBgpAllow1moPktsRateAvg

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285638: fltTcaCoppBgpAllow1qtrPktsRateAvg

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285639: fltTcaCoppBgpAllow1yearPktsRateAvg

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285672: fltTcaCoppBgpAllow5minPktsRateTr

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285673: fltTcaCoppBgpAllow15minPktsRateTr

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285674: fltTcaCoppBgpAllow1hPktsRateTr

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285675: fltTcaCoppBgpAllow1dPktsRateTr

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285676: fltTcaCoppBgpAllow1wPktsRateTr

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285677: fltTcaCoppBgpAllow1moPktsRateTr

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285678: fltTcaCoppBgpAllow1qtrPktsRateTr

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285679: fltTcaCoppBgpAllow1yearPktsRateTr

Severity: variable

Explanation: This fault is caused by "BgpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285728: fltTcaCoppBgpDrop5minBytesLast

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285729: fltTcaCoppBgpDrop15minBytesLast

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285730: fltTcaCoppBgpDrop1hBytesLast

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285731: fltTcaCoppBgpDrop1dBytesLast

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285732: fltTcaCoppBgpDrop1wBytesLast

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285733: fltTcaCoppBgpDrop1moBytesLast

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285734: fltTcaCoppBgpDrop1qtrBytesLast

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285735: fltTcaCoppBgpDrop1yearBytesLast

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285744: fltTcaCoppBgpDrop5minBytesCum

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285745: fltTcaCoppBgpDrop15minBytesCum

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285746: fltTcaCoppBgpDrop1hBytesCum

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285747: fltTcaCoppBgpDrop1dBytesCum

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285748: fltTcaCoppBgpDrop1wBytesCum

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285749: fltTcaCoppBgpDrop1moBytesCum

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285750: fltTcaCoppBgpDrop1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285751: fltTcaCoppBgpDrop1yearBytesCum

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285752: fltTcaCoppBgpDrop5minBytesPer

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285753: fltTcaCoppBgpDrop15minBytesPer

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285754: fltTcaCoppBgpDrop1hBytesPer

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285755: fltTcaCoppBgpDrop1dBytesPer

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285756: fltTcaCoppBgpDrop1wBytesPer

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285757: fltTcaCoppBgpDrop1moBytesPer

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285758: fltTcaCoppBgpDrop1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285759: fltTcaCoppBgpDrop1yearBytesPer

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285760: fltTcaCoppBgpDrop5minBytesMin

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285761: fltTcaCoppBgpDrop15minBytesMin

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285762: fltTcaCoppBgpDrop1hBytesMin

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285763: fltTcaCoppBgpDrop1dBytesMin

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285764: fltTcaCoppBgpDrop1wBytesMin

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285765: fltTcaCoppBgpDrop1moBytesMin

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285766: fltTcaCoppBgpDrop1qtrBytesMin

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285767: fltTcaCoppBgpDrop1yearBytesMin

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285768: fltTcaCoppBgpDrop5minBytesMax

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285769: fltTcaCoppBgpDrop15minBytesMax

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285770: fltTcaCoppBgpDrop1hBytesMax

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285771: fltTcaCoppBgpDrop1dBytesMax

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285772: fltTcaCoppBgpDrop1wBytesMax

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285773: fltTcaCoppBgpDrop1moBytesMax

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285774: fltTcaCoppBgpDrop1qtrBytesMax

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285775: fltTcaCoppBgpDrop1yearBytesMax

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285776: fltTcaCoppBgpDrop5minBytesAvg

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285777: fltTcaCoppBgpDrop15minBytesAvg

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285778: fltTcaCoppBgpDrop1hBytesAvg

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285779: fltTcaCoppBgpDrop1dBytesAvg

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285780: fltTcaCoppBgpDrop1wBytesAvg

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285781: fltTcaCoppBgpDrop1moBytesAvg

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285782: fltTcaCoppBgpDrop1qtrBytesAvg

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285783: fltTcaCoppBgpDrop1yearBytesAvg

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285808: fltTcaCoppBgpDrop5minBytesTr

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285809: fltTcaCoppBgpDrop15minBytesTr

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285810: fltTcaCoppBgpDrop1hBytesTr

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285811: fltTcaCoppBgpDrop1dBytesTr

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285812: fltTcaCoppBgpDrop1wBytesTr

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285813: fltTcaCoppBgpDrop1moBytesTr

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285814: fltTcaCoppBgpDrop1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285815: fltTcaCoppBgpDrop1yearBytesTr

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285816: fltTcaCoppBgpDrop5minBytesRate

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285817: fltTcaCoppBgpDrop15minBytesRate

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285818: fltTcaCoppBgpDrop1hBytesRate

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285819: fltTcaCoppBgpDrop1dBytesRate

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285820: fltTcaCoppBgpDrop1wBytesRate

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285821: fltTcaCoppBgpDrop1moBytesRate

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285822: fltTcaCoppBgpDrop1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285823: fltTcaCoppBgpDrop1yearBytesRate

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285896: fltTcaCoppBgpDrop5minBytesRateLast

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285897: fltTcaCoppBgpDrop15minBytesRateLast

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285898: fltTcaCoppBgpDrop1hBytesRateLast

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285899: fltTcaCoppBgpDrop1dBytesRateLast

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2859: fltAnalyticsInstNwIssue

Severity: minor

Explanation: This fault occurs because Analytics Cluster information is present on a leaf but inband management VRF is missing.

Recommended Action: If you see this fault, please deploy inband managment VRF on the leaf.

F285900: fltTcaCoppBgpDrop1wBytesRateLast

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285901: fltTcaCoppBgpDrop1moBytesRateLast

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285902: fltTcaCoppBgpDrop1qtrBytesRateLast

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285903: fltTcaCoppBgpDrop1yearBytesRateLast

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285904: fltTcaCoppBgpDrop5minBytesRateMin

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285905: fltTcaCoppBgpDrop15minBytesRateMin

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285906: fltTcaCoppBgpDrop1hBytesRateMin

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285907: fltTcaCoppBgpDrop1dBytesRateMin

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285908: fltTcaCoppBgpDrop1wBytesRateMin

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285909: fltTcaCoppBgpDrop1moBytesRateMin

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285910: fltTcaCoppBgpDrop1qtrBytesRateMin

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285911: fltTcaCoppBgpDrop1yearBytesRateMin

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285912: fltTcaCoppBgpDrop5minBytesRateMax

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285913: fltTcaCoppBgpDrop15minBytesRateMax

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285914: fltTcaCoppBgpDrop1hBytesRateMax

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285915: fltTcaCoppBgpDrop1dBytesRateMax

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285916: fltTcaCoppBgpDrop1wBytesRateMax

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285917: fltTcaCoppBgpDrop1moBytesRateMax

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285918: fltTcaCoppBgpDrop1qtrBytesRateMax

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285919: fltTcaCoppBgpDrop1yearBytesRateMax

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285920: fltTcaCoppBgpDrop5minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285921: fltTcaCoppBgpDrop15minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285922: fltTcaCoppBgpDrop1hBytesRateAvg

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285923: fltTcaCoppBgpDrop1dBytesRateAvg

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285924: fltTcaCoppBgpDrop1wBytesRateAvg

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285925: fltTcaCoppBgpDrop1moBytesRateAvg

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285926: fltTcaCoppBgpDrop1qtrBytesRateAvg

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285927: fltTcaCoppBgpDrop1yearBytesRateAvg

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285960: fltTcaCoppBgpDrop5minBytesRateTr

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285961: fltTcaCoppBgpDrop15minBytesRateTr

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285962: fltTcaCoppBgpDrop1hBytesRateTr

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285963: fltTcaCoppBgpDrop1dBytesRateTr

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285964: fltTcaCoppBgpDrop1wBytesRateTr

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285965: fltTcaCoppBgpDrop1moBytesRateTr

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285966: fltTcaCoppBgpDrop1qtrBytesRateTr

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F285967: fltTcaCoppBgpDrop1yearBytesRateTr

Severity: variable

Explanation: This fault is caused by "BgpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2860: fltCallhomeDestReachStateCallhomeDestDropMsg

Severity: minor

Explanation: This fault occurs when sending a callhome message to a slow destination.

Recommended Action: If you see this fault, take the following actions:

1. Verify destination information is correct.

2. Check if the the destination is slow in handling incoming messages.

3. You may remove and reconfigure the callhome destination.

4. If the above action did not resolve the issue, contact Cisco TAC.

F286016: fltTcaCoppBgpDrop5minPktsLast

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286017: fltTcaCoppBgpDrop15minPktsLast

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286018: fltTcaCoppBgpDrop1hPktsLast

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286019: fltTcaCoppBgpDrop1dPktsLast

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286020: fltTcaCoppBgpDrop1wPktsLast

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286021: fltTcaCoppBgpDrop1moPktsLast

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286022: fltTcaCoppBgpDrop1qtrPktsLast

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286023: fltTcaCoppBgpDrop1yearPktsLast

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286032: fltTcaCoppBgpDrop5minPktsCum

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286033: fltTcaCoppBgpDrop15minPktsCum

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286034: fltTcaCoppBgpDrop1hPktsCum

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286035: fltTcaCoppBgpDrop1dPktsCum

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286036: fltTcaCoppBgpDrop1wPktsCum

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286037: fltTcaCoppBgpDrop1moPktsCum

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286038: fltTcaCoppBgpDrop1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286039: fltTcaCoppBgpDrop1yearPktsCum

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286040: fltTcaCoppBgpDrop5minPktsPer

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286041: fltTcaCoppBgpDrop15minPktsPer

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286042: fltTcaCoppBgpDrop1hPktsPer

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286043: fltTcaCoppBgpDrop1dPktsPer

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286044: fltTcaCoppBgpDrop1wPktsPer

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286045: fltTcaCoppBgpDrop1moPktsPer

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286046: fltTcaCoppBgpDrop1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286047: fltTcaCoppBgpDrop1yearPktsPer

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286048: fltTcaCoppBgpDrop5minPktsMin

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286049: fltTcaCoppBgpDrop15minPktsMin

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286050: fltTcaCoppBgpDrop1hPktsMin

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286051: fltTcaCoppBgpDrop1dPktsMin

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286052: fltTcaCoppBgpDrop1wPktsMin

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286053: fltTcaCoppBgpDrop1moPktsMin

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286054: fltTcaCoppBgpDrop1qtrPktsMin

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286055: fltTcaCoppBgpDrop1yearPktsMin

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286056: fltTcaCoppBgpDrop5minPktsMax

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286057: fltTcaCoppBgpDrop15minPktsMax

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286058: fltTcaCoppBgpDrop1hPktsMax

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286059: fltTcaCoppBgpDrop1dPktsMax

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286060: fltTcaCoppBgpDrop1wPktsMax

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286061: fltTcaCoppBgpDrop1moPktsMax

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286062: fltTcaCoppBgpDrop1qtrPktsMax

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286063: fltTcaCoppBgpDrop1yearPktsMax

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286064: fltTcaCoppBgpDrop5minPktsAvg

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286065: fltTcaCoppBgpDrop15minPktsAvg

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286066: fltTcaCoppBgpDrop1hPktsAvg

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286067: fltTcaCoppBgpDrop1dPktsAvg

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286068: fltTcaCoppBgpDrop1wPktsAvg

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286069: fltTcaCoppBgpDrop1moPktsAvg

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286070: fltTcaCoppBgpDrop1qtrPktsAvg

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286071: fltTcaCoppBgpDrop1yearPktsAvg

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286096: fltTcaCoppBgpDrop5minPktsTr

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286097: fltTcaCoppBgpDrop15minPktsTr

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286098: fltTcaCoppBgpDrop1hPktsTr

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286099: fltTcaCoppBgpDrop1dPktsTr

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286100: fltTcaCoppBgpDrop1wPktsTr

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286101: fltTcaCoppBgpDrop1moPktsTr

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286102: fltTcaCoppBgpDrop1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286103: fltTcaCoppBgpDrop1yearPktsTr

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286104: fltTcaCoppBgpDrop5minPktsRate

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286105: fltTcaCoppBgpDrop15minPktsRate

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286106: fltTcaCoppBgpDrop1hPktsRate

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286107: fltTcaCoppBgpDrop1dPktsRate

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286108: fltTcaCoppBgpDrop1wPktsRate

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286109: fltTcaCoppBgpDrop1moPktsRate

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286110: fltTcaCoppBgpDrop1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286111: fltTcaCoppBgpDrop1yearPktsRate

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286184: fltTcaCoppBgpDrop5minPktsRateLast

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286185: fltTcaCoppBgpDrop15minPktsRateLast

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286186: fltTcaCoppBgpDrop1hPktsRateLast

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286187: fltTcaCoppBgpDrop1dPktsRateLast

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286188: fltTcaCoppBgpDrop1wPktsRateLast

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286189: fltTcaCoppBgpDrop1moPktsRateLast

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286190: fltTcaCoppBgpDrop1qtrPktsRateLast

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286191: fltTcaCoppBgpDrop1yearPktsRateLast

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286192: fltTcaCoppBgpDrop5minPktsRateMin

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286193: fltTcaCoppBgpDrop15minPktsRateMin

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286194: fltTcaCoppBgpDrop1hPktsRateMin

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286195: fltTcaCoppBgpDrop1dPktsRateMin

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286196: fltTcaCoppBgpDrop1wPktsRateMin

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286197: fltTcaCoppBgpDrop1moPktsRateMin

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286198: fltTcaCoppBgpDrop1qtrPktsRateMin

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286199: fltTcaCoppBgpDrop1yearPktsRateMin

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286200: fltTcaCoppBgpDrop5minPktsRateMax

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286201: fltTcaCoppBgpDrop15minPktsRateMax

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286202: fltTcaCoppBgpDrop1hPktsRateMax

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286203: fltTcaCoppBgpDrop1dPktsRateMax

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286204: fltTcaCoppBgpDrop1wPktsRateMax

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286205: fltTcaCoppBgpDrop1moPktsRateMax

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286206: fltTcaCoppBgpDrop1qtrPktsRateMax

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286207: fltTcaCoppBgpDrop1yearPktsRateMax

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286208: fltTcaCoppBgpDrop5minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286209: fltTcaCoppBgpDrop15minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286210: fltTcaCoppBgpDrop1hPktsRateAvg

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286211: fltTcaCoppBgpDrop1dPktsRateAvg

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286212: fltTcaCoppBgpDrop1wPktsRateAvg

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286213: fltTcaCoppBgpDrop1moPktsRateAvg

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286214: fltTcaCoppBgpDrop1qtrPktsRateAvg

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286215: fltTcaCoppBgpDrop1yearPktsRateAvg

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286248: fltTcaCoppBgpDrop5minPktsRateTr

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286249: fltTcaCoppBgpDrop15minPktsRateTr

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286250: fltTcaCoppBgpDrop1hPktsRateTr

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286251: fltTcaCoppBgpDrop1dPktsRateTr

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286252: fltTcaCoppBgpDrop1wPktsRateTr

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286253: fltTcaCoppBgpDrop1moPktsRateTr

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286254: fltTcaCoppBgpDrop1qtrPktsRateTr

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286255: fltTcaCoppBgpDrop1yearPktsRateTr

Severity: variable

Explanation: This fault is caused by "BgpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BgpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286304: fltTcaCoppCdpAllow5minBytesLast

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286305: fltTcaCoppCdpAllow15minBytesLast

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286306: fltTcaCoppCdpAllow1hBytesLast

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286307: fltTcaCoppCdpAllow1dBytesLast

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286308: fltTcaCoppCdpAllow1wBytesLast

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286309: fltTcaCoppCdpAllow1moBytesLast

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286310: fltTcaCoppCdpAllow1qtrBytesLast

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286311: fltTcaCoppCdpAllow1yearBytesLast

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286320: fltTcaCoppCdpAllow5minBytesCum

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286321: fltTcaCoppCdpAllow15minBytesCum

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286322: fltTcaCoppCdpAllow1hBytesCum

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286323: fltTcaCoppCdpAllow1dBytesCum

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286324: fltTcaCoppCdpAllow1wBytesCum

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286325: fltTcaCoppCdpAllow1moBytesCum

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286326: fltTcaCoppCdpAllow1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286327: fltTcaCoppCdpAllow1yearBytesCum

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286328: fltTcaCoppCdpAllow5minBytesPer

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286329: fltTcaCoppCdpAllow15minBytesPer

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286330: fltTcaCoppCdpAllow1hBytesPer

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286331: fltTcaCoppCdpAllow1dBytesPer

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286332: fltTcaCoppCdpAllow1wBytesPer

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286333: fltTcaCoppCdpAllow1moBytesPer

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286334: fltTcaCoppCdpAllow1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286335: fltTcaCoppCdpAllow1yearBytesPer

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286336: fltTcaCoppCdpAllow5minBytesMin

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286337: fltTcaCoppCdpAllow15minBytesMin

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286338: fltTcaCoppCdpAllow1hBytesMin

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286339: fltTcaCoppCdpAllow1dBytesMin

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286340: fltTcaCoppCdpAllow1wBytesMin

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286341: fltTcaCoppCdpAllow1moBytesMin

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286342: fltTcaCoppCdpAllow1qtrBytesMin

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286343: fltTcaCoppCdpAllow1yearBytesMin

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286344: fltTcaCoppCdpAllow5minBytesMax

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286345: fltTcaCoppCdpAllow15minBytesMax

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286346: fltTcaCoppCdpAllow1hBytesMax

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286347: fltTcaCoppCdpAllow1dBytesMax

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286348: fltTcaCoppCdpAllow1wBytesMax

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286349: fltTcaCoppCdpAllow1moBytesMax

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286350: fltTcaCoppCdpAllow1qtrBytesMax

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286351: fltTcaCoppCdpAllow1yearBytesMax

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286352: fltTcaCoppCdpAllow5minBytesAvg

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286353: fltTcaCoppCdpAllow15minBytesAvg

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286354: fltTcaCoppCdpAllow1hBytesAvg

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286355: fltTcaCoppCdpAllow1dBytesAvg

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286356: fltTcaCoppCdpAllow1wBytesAvg

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286357: fltTcaCoppCdpAllow1moBytesAvg

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286358: fltTcaCoppCdpAllow1qtrBytesAvg

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286359: fltTcaCoppCdpAllow1yearBytesAvg

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286384: fltTcaCoppCdpAllow5minBytesTr

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286385: fltTcaCoppCdpAllow15minBytesTr

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286386: fltTcaCoppCdpAllow1hBytesTr

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286387: fltTcaCoppCdpAllow1dBytesTr

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286388: fltTcaCoppCdpAllow1wBytesTr

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286389: fltTcaCoppCdpAllow1moBytesTr

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286390: fltTcaCoppCdpAllow1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286391: fltTcaCoppCdpAllow1yearBytesTr

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286392: fltTcaCoppCdpAllow5minBytesRate

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286393: fltTcaCoppCdpAllow15minBytesRate

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286394: fltTcaCoppCdpAllow1hBytesRate

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286395: fltTcaCoppCdpAllow1dBytesRate

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286396: fltTcaCoppCdpAllow1wBytesRate

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286397: fltTcaCoppCdpAllow1moBytesRate

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286398: fltTcaCoppCdpAllow1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286399: fltTcaCoppCdpAllow1yearBytesRate

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286472: fltTcaCoppCdpAllow5minBytesRateLast

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286473: fltTcaCoppCdpAllow15minBytesRateLast

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286474: fltTcaCoppCdpAllow1hBytesRateLast

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286475: fltTcaCoppCdpAllow1dBytesRateLast

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286476: fltTcaCoppCdpAllow1wBytesRateLast

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286477: fltTcaCoppCdpAllow1moBytesRateLast

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286478: fltTcaCoppCdpAllow1qtrBytesRateLast

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286479: fltTcaCoppCdpAllow1yearBytesRateLast

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286480: fltTcaCoppCdpAllow5minBytesRateMin

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286481: fltTcaCoppCdpAllow15minBytesRateMin

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286482: fltTcaCoppCdpAllow1hBytesRateMin

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286483: fltTcaCoppCdpAllow1dBytesRateMin

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286484: fltTcaCoppCdpAllow1wBytesRateMin

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286485: fltTcaCoppCdpAllow1moBytesRateMin

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286486: fltTcaCoppCdpAllow1qtrBytesRateMin

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286487: fltTcaCoppCdpAllow1yearBytesRateMin

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286488: fltTcaCoppCdpAllow5minBytesRateMax

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286489: fltTcaCoppCdpAllow15minBytesRateMax

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286490: fltTcaCoppCdpAllow1hBytesRateMax

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286491: fltTcaCoppCdpAllow1dBytesRateMax

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286492: fltTcaCoppCdpAllow1wBytesRateMax

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286493: fltTcaCoppCdpAllow1moBytesRateMax

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286494: fltTcaCoppCdpAllow1qtrBytesRateMax

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286495: fltTcaCoppCdpAllow1yearBytesRateMax

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286496: fltTcaCoppCdpAllow5minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286497: fltTcaCoppCdpAllow15minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286498: fltTcaCoppCdpAllow1hBytesRateAvg

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286499: fltTcaCoppCdpAllow1dBytesRateAvg

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286500: fltTcaCoppCdpAllow1wBytesRateAvg

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286501: fltTcaCoppCdpAllow1moBytesRateAvg

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286502: fltTcaCoppCdpAllow1qtrBytesRateAvg

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286503: fltTcaCoppCdpAllow1yearBytesRateAvg

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286536: fltTcaCoppCdpAllow5minBytesRateTr

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286537: fltTcaCoppCdpAllow15minBytesRateTr

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286538: fltTcaCoppCdpAllow1hBytesRateTr

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286539: fltTcaCoppCdpAllow1dBytesRateTr

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286540: fltTcaCoppCdpAllow1wBytesRateTr

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286541: fltTcaCoppCdpAllow1moBytesRateTr

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286542: fltTcaCoppCdpAllow1qtrBytesRateTr

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286543: fltTcaCoppCdpAllow1yearBytesRateTr

Severity: variable

Explanation: This fault is caused by "CdpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286592: fltTcaCoppCdpAllow5minPktsLast

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286593: fltTcaCoppCdpAllow15minPktsLast

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286594: fltTcaCoppCdpAllow1hPktsLast

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286595: fltTcaCoppCdpAllow1dPktsLast

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286596: fltTcaCoppCdpAllow1wPktsLast

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286597: fltTcaCoppCdpAllow1moPktsLast

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286598: fltTcaCoppCdpAllow1qtrPktsLast

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286599: fltTcaCoppCdpAllow1yearPktsLast

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286608: fltTcaCoppCdpAllow5minPktsCum

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286609: fltTcaCoppCdpAllow15minPktsCum

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286610: fltTcaCoppCdpAllow1hPktsCum

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286611: fltTcaCoppCdpAllow1dPktsCum

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286612: fltTcaCoppCdpAllow1wPktsCum

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286613: fltTcaCoppCdpAllow1moPktsCum

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286614: fltTcaCoppCdpAllow1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286615: fltTcaCoppCdpAllow1yearPktsCum

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286616: fltTcaCoppCdpAllow5minPktsPer

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286617: fltTcaCoppCdpAllow15minPktsPer

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286618: fltTcaCoppCdpAllow1hPktsPer

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286619: fltTcaCoppCdpAllow1dPktsPer

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286620: fltTcaCoppCdpAllow1wPktsPer

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286621: fltTcaCoppCdpAllow1moPktsPer

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286622: fltTcaCoppCdpAllow1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286623: fltTcaCoppCdpAllow1yearPktsPer

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286624: fltTcaCoppCdpAllow5minPktsMin

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286625: fltTcaCoppCdpAllow15minPktsMin

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286626: fltTcaCoppCdpAllow1hPktsMin

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286627: fltTcaCoppCdpAllow1dPktsMin

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286628: fltTcaCoppCdpAllow1wPktsMin

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286629: fltTcaCoppCdpAllow1moPktsMin

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286630: fltTcaCoppCdpAllow1qtrPktsMin

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286631: fltTcaCoppCdpAllow1yearPktsMin

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286632: fltTcaCoppCdpAllow5minPktsMax

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286633: fltTcaCoppCdpAllow15minPktsMax

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286634: fltTcaCoppCdpAllow1hPktsMax

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286635: fltTcaCoppCdpAllow1dPktsMax

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286636: fltTcaCoppCdpAllow1wPktsMax

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286637: fltTcaCoppCdpAllow1moPktsMax

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286638: fltTcaCoppCdpAllow1qtrPktsMax

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286639: fltTcaCoppCdpAllow1yearPktsMax

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286640: fltTcaCoppCdpAllow5minPktsAvg

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286641: fltTcaCoppCdpAllow15minPktsAvg

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286642: fltTcaCoppCdpAllow1hPktsAvg

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286643: fltTcaCoppCdpAllow1dPktsAvg

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286644: fltTcaCoppCdpAllow1wPktsAvg

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286645: fltTcaCoppCdpAllow1moPktsAvg

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286646: fltTcaCoppCdpAllow1qtrPktsAvg

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286647: fltTcaCoppCdpAllow1yearPktsAvg

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286672: fltTcaCoppCdpAllow5minPktsTr

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286673: fltTcaCoppCdpAllow15minPktsTr

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286674: fltTcaCoppCdpAllow1hPktsTr

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286675: fltTcaCoppCdpAllow1dPktsTr

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286676: fltTcaCoppCdpAllow1wPktsTr

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286677: fltTcaCoppCdpAllow1moPktsTr

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286678: fltTcaCoppCdpAllow1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286679: fltTcaCoppCdpAllow1yearPktsTr

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286680: fltTcaCoppCdpAllow5minPktsRate

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286681: fltTcaCoppCdpAllow15minPktsRate

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286682: fltTcaCoppCdpAllow1hPktsRate

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286683: fltTcaCoppCdpAllow1dPktsRate

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286684: fltTcaCoppCdpAllow1wPktsRate

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286685: fltTcaCoppCdpAllow1moPktsRate

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286686: fltTcaCoppCdpAllow1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286687: fltTcaCoppCdpAllow1yearPktsRate

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286760: fltTcaCoppCdpAllow5minPktsRateLast

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286761: fltTcaCoppCdpAllow15minPktsRateLast

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286762: fltTcaCoppCdpAllow1hPktsRateLast

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286763: fltTcaCoppCdpAllow1dPktsRateLast

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286764: fltTcaCoppCdpAllow1wPktsRateLast

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286765: fltTcaCoppCdpAllow1moPktsRateLast

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286766: fltTcaCoppCdpAllow1qtrPktsRateLast

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286767: fltTcaCoppCdpAllow1yearPktsRateLast

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286768: fltTcaCoppCdpAllow5minPktsRateMin

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286769: fltTcaCoppCdpAllow15minPktsRateMin

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286770: fltTcaCoppCdpAllow1hPktsRateMin

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286771: fltTcaCoppCdpAllow1dPktsRateMin

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286772: fltTcaCoppCdpAllow1wPktsRateMin

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286773: fltTcaCoppCdpAllow1moPktsRateMin

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286774: fltTcaCoppCdpAllow1qtrPktsRateMin

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286775: fltTcaCoppCdpAllow1yearPktsRateMin

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286776: fltTcaCoppCdpAllow5minPktsRateMax

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286777: fltTcaCoppCdpAllow15minPktsRateMax

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286778: fltTcaCoppCdpAllow1hPktsRateMax

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286779: fltTcaCoppCdpAllow1dPktsRateMax

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286780: fltTcaCoppCdpAllow1wPktsRateMax

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286781: fltTcaCoppCdpAllow1moPktsRateMax

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286782: fltTcaCoppCdpAllow1qtrPktsRateMax

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286783: fltTcaCoppCdpAllow1yearPktsRateMax

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286784: fltTcaCoppCdpAllow5minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286785: fltTcaCoppCdpAllow15minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286786: fltTcaCoppCdpAllow1hPktsRateAvg

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286787: fltTcaCoppCdpAllow1dPktsRateAvg

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286788: fltTcaCoppCdpAllow1wPktsRateAvg

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286789: fltTcaCoppCdpAllow1moPktsRateAvg

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286790: fltTcaCoppCdpAllow1qtrPktsRateAvg

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286791: fltTcaCoppCdpAllow1yearPktsRateAvg

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286824: fltTcaCoppCdpAllow5minPktsRateTr

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286825: fltTcaCoppCdpAllow15minPktsRateTr

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286826: fltTcaCoppCdpAllow1hPktsRateTr

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286827: fltTcaCoppCdpAllow1dPktsRateTr

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286828: fltTcaCoppCdpAllow1wPktsRateTr

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286829: fltTcaCoppCdpAllow1moPktsRateTr

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286830: fltTcaCoppCdpAllow1qtrPktsRateTr

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286831: fltTcaCoppCdpAllow1yearPktsRateTr

Severity: variable

Explanation: This fault is caused by "CdpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286880: fltTcaCoppCdpDrop5minBytesLast

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286881: fltTcaCoppCdpDrop15minBytesLast

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286882: fltTcaCoppCdpDrop1hBytesLast

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286883: fltTcaCoppCdpDrop1dBytesLast

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286884: fltTcaCoppCdpDrop1wBytesLast

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286885: fltTcaCoppCdpDrop1moBytesLast

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286886: fltTcaCoppCdpDrop1qtrBytesLast

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286887: fltTcaCoppCdpDrop1yearBytesLast

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286896: fltTcaCoppCdpDrop5minBytesCum

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286897: fltTcaCoppCdpDrop15minBytesCum

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286898: fltTcaCoppCdpDrop1hBytesCum

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286899: fltTcaCoppCdpDrop1dBytesCum

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2869: fltAaaSamlProviderSamlProvider_Inoperable

Severity: major

Explanation: This fault occurs when the SAML provider is not operational.

Recommended Action: If you see this fault, take the following actions:

1. Verify the IP address and path to the SAML provider are still active and functioning.

2. Ensure the configuration on the SAML provider has not changed.

3. Verify that the SAML provider is still functioning properly

4. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F286900: fltTcaCoppCdpDrop1wBytesCum

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286901: fltTcaCoppCdpDrop1moBytesCum

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286902: fltTcaCoppCdpDrop1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286903: fltTcaCoppCdpDrop1yearBytesCum

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286904: fltTcaCoppCdpDrop5minBytesPer

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286905: fltTcaCoppCdpDrop15minBytesPer

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286906: fltTcaCoppCdpDrop1hBytesPer

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286907: fltTcaCoppCdpDrop1dBytesPer

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286908: fltTcaCoppCdpDrop1wBytesPer

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286909: fltTcaCoppCdpDrop1moBytesPer

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286910: fltTcaCoppCdpDrop1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286911: fltTcaCoppCdpDrop1yearBytesPer

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286912: fltTcaCoppCdpDrop5minBytesMin

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286913: fltTcaCoppCdpDrop15minBytesMin

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286914: fltTcaCoppCdpDrop1hBytesMin

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286915: fltTcaCoppCdpDrop1dBytesMin

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286916: fltTcaCoppCdpDrop1wBytesMin

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286917: fltTcaCoppCdpDrop1moBytesMin

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286918: fltTcaCoppCdpDrop1qtrBytesMin

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286919: fltTcaCoppCdpDrop1yearBytesMin

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286920: fltTcaCoppCdpDrop5minBytesMax

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286921: fltTcaCoppCdpDrop15minBytesMax

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286922: fltTcaCoppCdpDrop1hBytesMax

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286923: fltTcaCoppCdpDrop1dBytesMax

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286924: fltTcaCoppCdpDrop1wBytesMax

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286925: fltTcaCoppCdpDrop1moBytesMax

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286926: fltTcaCoppCdpDrop1qtrBytesMax

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286927: fltTcaCoppCdpDrop1yearBytesMax

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286928: fltTcaCoppCdpDrop5minBytesAvg

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286929: fltTcaCoppCdpDrop15minBytesAvg

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286930: fltTcaCoppCdpDrop1hBytesAvg

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286931: fltTcaCoppCdpDrop1dBytesAvg

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286932: fltTcaCoppCdpDrop1wBytesAvg

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286933: fltTcaCoppCdpDrop1moBytesAvg

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286934: fltTcaCoppCdpDrop1qtrBytesAvg

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286935: fltTcaCoppCdpDrop1yearBytesAvg

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286960: fltTcaCoppCdpDrop5minBytesTr

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286961: fltTcaCoppCdpDrop15minBytesTr

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286962: fltTcaCoppCdpDrop1hBytesTr

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286963: fltTcaCoppCdpDrop1dBytesTr

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286964: fltTcaCoppCdpDrop1wBytesTr

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286965: fltTcaCoppCdpDrop1moBytesTr

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286966: fltTcaCoppCdpDrop1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286967: fltTcaCoppCdpDrop1yearBytesTr

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286968: fltTcaCoppCdpDrop5minBytesRate

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286969: fltTcaCoppCdpDrop15minBytesRate

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286970: fltTcaCoppCdpDrop1hBytesRate

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286971: fltTcaCoppCdpDrop1dBytesRate

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286972: fltTcaCoppCdpDrop1wBytesRate

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286973: fltTcaCoppCdpDrop1moBytesRate

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286974: fltTcaCoppCdpDrop1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F286975: fltTcaCoppCdpDrop1yearBytesRate

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2870: fltAaaSamlProviderSamlProviderInoperable

Severity: major

Explanation: This fault occurs when the SAML provider is not operational.

Recommended Action: If you see this fault, take the following actions:

1. Verify the IP address and path to the SAML provider are still active and functioning.

2. Ensure the configuration on the SAML provider has not changed.

3. Verify that the SAML provider is still functioning properly

4. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F287048: fltTcaCoppCdpDrop5minBytesRateLast

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287049: fltTcaCoppCdpDrop15minBytesRateLast

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287050: fltTcaCoppCdpDrop1hBytesRateLast

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287051: fltTcaCoppCdpDrop1dBytesRateLast

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287052: fltTcaCoppCdpDrop1wBytesRateLast

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287053: fltTcaCoppCdpDrop1moBytesRateLast

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287054: fltTcaCoppCdpDrop1qtrBytesRateLast

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287055: fltTcaCoppCdpDrop1yearBytesRateLast

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287056: fltTcaCoppCdpDrop5minBytesRateMin

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287057: fltTcaCoppCdpDrop15minBytesRateMin

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287058: fltTcaCoppCdpDrop1hBytesRateMin

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287059: fltTcaCoppCdpDrop1dBytesRateMin

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287060: fltTcaCoppCdpDrop1wBytesRateMin

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287061: fltTcaCoppCdpDrop1moBytesRateMin

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287062: fltTcaCoppCdpDrop1qtrBytesRateMin

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287063: fltTcaCoppCdpDrop1yearBytesRateMin

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287064: fltTcaCoppCdpDrop5minBytesRateMax

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287065: fltTcaCoppCdpDrop15minBytesRateMax

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287066: fltTcaCoppCdpDrop1hBytesRateMax

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287067: fltTcaCoppCdpDrop1dBytesRateMax

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287068: fltTcaCoppCdpDrop1wBytesRateMax

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287069: fltTcaCoppCdpDrop1moBytesRateMax

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287070: fltTcaCoppCdpDrop1qtrBytesRateMax

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287071: fltTcaCoppCdpDrop1yearBytesRateMax

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287072: fltTcaCoppCdpDrop5minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287073: fltTcaCoppCdpDrop15minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287074: fltTcaCoppCdpDrop1hBytesRateAvg

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287075: fltTcaCoppCdpDrop1dBytesRateAvg

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287076: fltTcaCoppCdpDrop1wBytesRateAvg

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287077: fltTcaCoppCdpDrop1moBytesRateAvg

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287078: fltTcaCoppCdpDrop1qtrBytesRateAvg

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287079: fltTcaCoppCdpDrop1yearBytesRateAvg

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2871: fltInfraRsSpineBfdIpv4InstPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F287112: fltTcaCoppCdpDrop5minBytesRateTr

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287113: fltTcaCoppCdpDrop15minBytesRateTr

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287114: fltTcaCoppCdpDrop1hBytesRateTr

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287115: fltTcaCoppCdpDrop1dBytesRateTr

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287116: fltTcaCoppCdpDrop1wBytesRateTr

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287117: fltTcaCoppCdpDrop1moBytesRateTr

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287118: fltTcaCoppCdpDrop1qtrBytesRateTr

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287119: fltTcaCoppCdpDrop1yearBytesRateTr

Severity: variable

Explanation: This fault is caused by "CdpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287168: fltTcaCoppCdpDrop5minPktsLast

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287169: fltTcaCoppCdpDrop15minPktsLast

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287170: fltTcaCoppCdpDrop1hPktsLast

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287171: fltTcaCoppCdpDrop1dPktsLast

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287172: fltTcaCoppCdpDrop1wPktsLast

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287173: fltTcaCoppCdpDrop1moPktsLast

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287174: fltTcaCoppCdpDrop1qtrPktsLast

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287175: fltTcaCoppCdpDrop1yearPktsLast

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287184: fltTcaCoppCdpDrop5minPktsCum

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287185: fltTcaCoppCdpDrop15minPktsCum

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287186: fltTcaCoppCdpDrop1hPktsCum

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287187: fltTcaCoppCdpDrop1dPktsCum

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287188: fltTcaCoppCdpDrop1wPktsCum

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287189: fltTcaCoppCdpDrop1moPktsCum

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287190: fltTcaCoppCdpDrop1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287191: fltTcaCoppCdpDrop1yearPktsCum

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287192: fltTcaCoppCdpDrop5minPktsPer

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287193: fltTcaCoppCdpDrop15minPktsPer

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287194: fltTcaCoppCdpDrop1hPktsPer

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287195: fltTcaCoppCdpDrop1dPktsPer

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287196: fltTcaCoppCdpDrop1wPktsPer

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287197: fltTcaCoppCdpDrop1moPktsPer

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287198: fltTcaCoppCdpDrop1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287199: fltTcaCoppCdpDrop1yearPktsPer

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2872: fltInfraRsSpineBfdIpv6InstPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F287200: fltTcaCoppCdpDrop5minPktsMin

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287201: fltTcaCoppCdpDrop15minPktsMin

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287202: fltTcaCoppCdpDrop1hPktsMin

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287203: fltTcaCoppCdpDrop1dPktsMin

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287204: fltTcaCoppCdpDrop1wPktsMin

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287205: fltTcaCoppCdpDrop1moPktsMin

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287206: fltTcaCoppCdpDrop1qtrPktsMin

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287207: fltTcaCoppCdpDrop1yearPktsMin

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287208: fltTcaCoppCdpDrop5minPktsMax

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287209: fltTcaCoppCdpDrop15minPktsMax

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287210: fltTcaCoppCdpDrop1hPktsMax

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287211: fltTcaCoppCdpDrop1dPktsMax

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287212: fltTcaCoppCdpDrop1wPktsMax

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287213: fltTcaCoppCdpDrop1moPktsMax

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287214: fltTcaCoppCdpDrop1qtrPktsMax

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287215: fltTcaCoppCdpDrop1yearPktsMax

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287216: fltTcaCoppCdpDrop5minPktsAvg

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287217: fltTcaCoppCdpDrop15minPktsAvg

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287218: fltTcaCoppCdpDrop1hPktsAvg

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287219: fltTcaCoppCdpDrop1dPktsAvg

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287220: fltTcaCoppCdpDrop1wPktsAvg

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287221: fltTcaCoppCdpDrop1moPktsAvg

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287222: fltTcaCoppCdpDrop1qtrPktsAvg

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287223: fltTcaCoppCdpDrop1yearPktsAvg

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287248: fltTcaCoppCdpDrop5minPktsTr

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287249: fltTcaCoppCdpDrop15minPktsTr

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287250: fltTcaCoppCdpDrop1hPktsTr

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287251: fltTcaCoppCdpDrop1dPktsTr

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287252: fltTcaCoppCdpDrop1wPktsTr

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287253: fltTcaCoppCdpDrop1moPktsTr

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287254: fltTcaCoppCdpDrop1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287255: fltTcaCoppCdpDrop1yearPktsTr

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287256: fltTcaCoppCdpDrop5minPktsRate

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287257: fltTcaCoppCdpDrop15minPktsRate

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287258: fltTcaCoppCdpDrop1hPktsRate

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287259: fltTcaCoppCdpDrop1dPktsRate

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287260: fltTcaCoppCdpDrop1wPktsRate

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287261: fltTcaCoppCdpDrop1moPktsRate

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287262: fltTcaCoppCdpDrop1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287263: fltTcaCoppCdpDrop1yearPktsRate

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2873: fltInfraRsPortDirectionDeploymentStatus

Severity: minor

Explanation: This fault occurs when deployment of policy to a leaf fails.

Recommended Action: Check the state the version of leaf and make sure it supports the policy If above options did not solve, create tech-support and contact Cisco TAC

F287336: fltTcaCoppCdpDrop5minPktsRateLast

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287337: fltTcaCoppCdpDrop15minPktsRateLast

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287338: fltTcaCoppCdpDrop1hPktsRateLast

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287339: fltTcaCoppCdpDrop1dPktsRateLast

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287340: fltTcaCoppCdpDrop1wPktsRateLast

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287341: fltTcaCoppCdpDrop1moPktsRateLast

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287342: fltTcaCoppCdpDrop1qtrPktsRateLast

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287343: fltTcaCoppCdpDrop1yearPktsRateLast

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287344: fltTcaCoppCdpDrop5minPktsRateMin

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287345: fltTcaCoppCdpDrop15minPktsRateMin

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287346: fltTcaCoppCdpDrop1hPktsRateMin

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287347: fltTcaCoppCdpDrop1dPktsRateMin

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287348: fltTcaCoppCdpDrop1wPktsRateMin

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287349: fltTcaCoppCdpDrop1moPktsRateMin

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287350: fltTcaCoppCdpDrop1qtrPktsRateMin

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287351: fltTcaCoppCdpDrop1yearPktsRateMin

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287352: fltTcaCoppCdpDrop5minPktsRateMax

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287353: fltTcaCoppCdpDrop15minPktsRateMax

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287354: fltTcaCoppCdpDrop1hPktsRateMax

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287355: fltTcaCoppCdpDrop1dPktsRateMax

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287356: fltTcaCoppCdpDrop1wPktsRateMax

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287357: fltTcaCoppCdpDrop1moPktsRateMax

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287358: fltTcaCoppCdpDrop1qtrPktsRateMax

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287359: fltTcaCoppCdpDrop1yearPktsRateMax

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287360: fltTcaCoppCdpDrop5minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287361: fltTcaCoppCdpDrop15minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287362: fltTcaCoppCdpDrop1hPktsRateAvg

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287363: fltTcaCoppCdpDrop1dPktsRateAvg

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287364: fltTcaCoppCdpDrop1wPktsRateAvg

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287365: fltTcaCoppCdpDrop1moPktsRateAvg

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287366: fltTcaCoppCdpDrop1qtrPktsRateAvg

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287367: fltTcaCoppCdpDrop1yearPktsRateAvg

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2874: fltAnalyticsInstAnalyticsInstFailure

Severity: major

Explanation: This fault occurs when Analytics/Netflow is enable on unsupported platform

Recommended Action: None set.

F287400: fltTcaCoppCdpDrop5minPktsRateTr

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287401: fltTcaCoppCdpDrop15minPktsRateTr

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287402: fltTcaCoppCdpDrop1hPktsRateTr

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287403: fltTcaCoppCdpDrop1dPktsRateTr

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287404: fltTcaCoppCdpDrop1wPktsRateTr

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287405: fltTcaCoppCdpDrop1moPktsRateTr

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287406: fltTcaCoppCdpDrop1qtrPktsRateTr

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287407: fltTcaCoppCdpDrop1yearPktsRateTr

Severity: variable

Explanation: This fault is caused by "CdpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CdpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287456: fltTcaCoppFilterStats5minBytesLast

Severity: variable

Explanation: This fault is caused by "Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287457: fltTcaCoppFilterStats15minBytesLast

Severity: variable

Explanation: This fault is caused by "Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287458: fltTcaCoppFilterStats1hBytesLast

Severity: variable

Explanation: This fault is caused by "Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287459: fltTcaCoppFilterStats1dBytesLast

Severity: variable

Explanation: This fault is caused by "Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287460: fltTcaCoppFilterStats1wBytesLast

Severity: variable

Explanation: This fault is caused by "Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287461: fltTcaCoppFilterStats1moBytesLast

Severity: variable

Explanation: This fault is caused by "Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287462: fltTcaCoppFilterStats1qtrBytesLast

Severity: variable

Explanation: This fault is caused by "Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287463: fltTcaCoppFilterStats1yearBytesLast

Severity: variable

Explanation: This fault is caused by "Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287472: fltTcaCoppFilterStats5minBytesCum

Severity: variable

Explanation: This fault is caused by "Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287473: fltTcaCoppFilterStats15minBytesCum

Severity: variable

Explanation: This fault is caused by "Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287474: fltTcaCoppFilterStats1hBytesCum

Severity: variable

Explanation: This fault is caused by "Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287475: fltTcaCoppFilterStats1dBytesCum

Severity: variable

Explanation: This fault is caused by "Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287476: fltTcaCoppFilterStats1wBytesCum

Severity: variable

Explanation: This fault is caused by "Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287477: fltTcaCoppFilterStats1moBytesCum

Severity: variable

Explanation: This fault is caused by "Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287478: fltTcaCoppFilterStats1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287479: fltTcaCoppFilterStats1yearBytesCum

Severity: variable

Explanation: This fault is caused by "Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287480: fltTcaCoppFilterStats5minBytesPer

Severity: variable

Explanation: This fault is caused by "Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287481: fltTcaCoppFilterStats15minBytesPer

Severity: variable

Explanation: This fault is caused by "Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287482: fltTcaCoppFilterStats1hBytesPer

Severity: variable

Explanation: This fault is caused by "Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287483: fltTcaCoppFilterStats1dBytesPer

Severity: variable

Explanation: This fault is caused by "Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287484: fltTcaCoppFilterStats1wBytesPer

Severity: variable

Explanation: This fault is caused by "Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287485: fltTcaCoppFilterStats1moBytesPer

Severity: variable

Explanation: This fault is caused by "Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287486: fltTcaCoppFilterStats1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287487: fltTcaCoppFilterStats1yearBytesPer

Severity: variable

Explanation: This fault is caused by "Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287488: fltTcaCoppFilterStats5minBytesMin

Severity: variable

Explanation: This fault is caused by "Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287489: fltTcaCoppFilterStats15minBytesMin

Severity: variable

Explanation: This fault is caused by "Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287490: fltTcaCoppFilterStats1hBytesMin

Severity: variable

Explanation: This fault is caused by "Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287491: fltTcaCoppFilterStats1dBytesMin

Severity: variable

Explanation: This fault is caused by "Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287492: fltTcaCoppFilterStats1wBytesMin

Severity: variable

Explanation: This fault is caused by "Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287493: fltTcaCoppFilterStats1moBytesMin

Severity: variable

Explanation: This fault is caused by "Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287494: fltTcaCoppFilterStats1qtrBytesMin

Severity: variable

Explanation: This fault is caused by "Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287495: fltTcaCoppFilterStats1yearBytesMin

Severity: variable

Explanation: This fault is caused by "Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287496: fltTcaCoppFilterStats5minBytesMax

Severity: variable

Explanation: This fault is caused by "Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287497: fltTcaCoppFilterStats15minBytesMax

Severity: variable

Explanation: This fault is caused by "Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287498: fltTcaCoppFilterStats1hBytesMax

Severity: variable

Explanation: This fault is caused by "Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287499: fltTcaCoppFilterStats1dBytesMax

Severity: variable

Explanation: This fault is caused by "Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2875: fltStpInstMstpWithLocalScope

Severity: critical

Explanation: This fault occurs when some interfaces are in local scope but they are receiving MST (802.1s) BPDUs. It could lead to inconsistent endpoint states in the fabric.

Recommended Action: To recover from this fault, try the following actions

1. Configure global scope on the interface

2. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F287500: fltTcaCoppFilterStats1wBytesMax

Severity: variable

Explanation: This fault is caused by "Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287501: fltTcaCoppFilterStats1moBytesMax

Severity: variable

Explanation: This fault is caused by "Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287502: fltTcaCoppFilterStats1qtrBytesMax

Severity: variable

Explanation: This fault is caused by "Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287503: fltTcaCoppFilterStats1yearBytesMax

Severity: variable

Explanation: This fault is caused by "Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287504: fltTcaCoppFilterStats5minBytesAvg

Severity: variable

Explanation: This fault is caused by "Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287505: fltTcaCoppFilterStats15minBytesAvg

Severity: variable

Explanation: This fault is caused by "Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287506: fltTcaCoppFilterStats1hBytesAvg

Severity: variable

Explanation: This fault is caused by "Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287507: fltTcaCoppFilterStats1dBytesAvg

Severity: variable

Explanation: This fault is caused by "Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287508: fltTcaCoppFilterStats1wBytesAvg

Severity: variable

Explanation: This fault is caused by "Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287509: fltTcaCoppFilterStats1moBytesAvg

Severity: variable

Explanation: This fault is caused by "Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287510: fltTcaCoppFilterStats1qtrBytesAvg

Severity: variable

Explanation: This fault is caused by "Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287511: fltTcaCoppFilterStats1yearBytesAvg

Severity: variable

Explanation: This fault is caused by "Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287536: fltTcaCoppFilterStats5minBytesTr

Severity: variable

Explanation: This fault is caused by "Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287537: fltTcaCoppFilterStats15minBytesTr

Severity: variable

Explanation: This fault is caused by "Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287538: fltTcaCoppFilterStats1hBytesTr

Severity: variable

Explanation: This fault is caused by "Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287539: fltTcaCoppFilterStats1dBytesTr

Severity: variable

Explanation: This fault is caused by "Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287540: fltTcaCoppFilterStats1wBytesTr

Severity: variable

Explanation: This fault is caused by "Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287541: fltTcaCoppFilterStats1moBytesTr

Severity: variable

Explanation: This fault is caused by "Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287542: fltTcaCoppFilterStats1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287543: fltTcaCoppFilterStats1yearBytesTr

Severity: variable

Explanation: This fault is caused by "Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287544: fltTcaCoppFilterStats5minBytesRate

Severity: variable

Explanation: This fault is caused by "Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287545: fltTcaCoppFilterStats15minBytesRate

Severity: variable

Explanation: This fault is caused by "Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287546: fltTcaCoppFilterStats1hBytesRate

Severity: variable

Explanation: This fault is caused by "Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287547: fltTcaCoppFilterStats1dBytesRate

Severity: variable

Explanation: This fault is caused by "Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287548: fltTcaCoppFilterStats1wBytesRate

Severity: variable

Explanation: This fault is caused by "Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287549: fltTcaCoppFilterStats1moBytesRate

Severity: variable

Explanation: This fault is caused by "Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287550: fltTcaCoppFilterStats1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287551: fltTcaCoppFilterStats1yearBytesRate

Severity: variable

Explanation: This fault is caused by "Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287624: fltTcaCoppFilterStats5minBytesRateLast

Severity: variable

Explanation: This fault is caused by "Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287625: fltTcaCoppFilterStats15minBytesRateLast

Severity: variable

Explanation: This fault is caused by "Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287626: fltTcaCoppFilterStats1hBytesRateLast

Severity: variable

Explanation: This fault is caused by "Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287627: fltTcaCoppFilterStats1dBytesRateLast

Severity: variable

Explanation: This fault is caused by "Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287628: fltTcaCoppFilterStats1wBytesRateLast

Severity: variable

Explanation: This fault is caused by "Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287629: fltTcaCoppFilterStats1moBytesRateLast

Severity: variable

Explanation: This fault is caused by "Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287630: fltTcaCoppFilterStats1qtrBytesRateLast

Severity: variable

Explanation: This fault is caused by "Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287631: fltTcaCoppFilterStats1yearBytesRateLast

Severity: variable

Explanation: This fault is caused by "Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287632: fltTcaCoppFilterStats5minBytesRateMin

Severity: variable

Explanation: This fault is caused by "Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287633: fltTcaCoppFilterStats15minBytesRateMin

Severity: variable

Explanation: This fault is caused by "Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287634: fltTcaCoppFilterStats1hBytesRateMin

Severity: variable

Explanation: This fault is caused by "Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287635: fltTcaCoppFilterStats1dBytesRateMin

Severity: variable

Explanation: This fault is caused by "Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287636: fltTcaCoppFilterStats1wBytesRateMin

Severity: variable

Explanation: This fault is caused by "Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287637: fltTcaCoppFilterStats1moBytesRateMin

Severity: variable

Explanation: This fault is caused by "Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287638: fltTcaCoppFilterStats1qtrBytesRateMin

Severity: variable

Explanation: This fault is caused by "Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287639: fltTcaCoppFilterStats1yearBytesRateMin

Severity: variable

Explanation: This fault is caused by "Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287640: fltTcaCoppFilterStats5minBytesRateMax

Severity: variable

Explanation: This fault is caused by "Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287641: fltTcaCoppFilterStats15minBytesRateMax

Severity: variable

Explanation: This fault is caused by "Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287642: fltTcaCoppFilterStats1hBytesRateMax

Severity: variable

Explanation: This fault is caused by "Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287643: fltTcaCoppFilterStats1dBytesRateMax

Severity: variable

Explanation: This fault is caused by "Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287644: fltTcaCoppFilterStats1wBytesRateMax

Severity: variable

Explanation: This fault is caused by "Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287645: fltTcaCoppFilterStats1moBytesRateMax

Severity: variable

Explanation: This fault is caused by "Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287646: fltTcaCoppFilterStats1qtrBytesRateMax

Severity: variable

Explanation: This fault is caused by "Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287647: fltTcaCoppFilterStats1yearBytesRateMax

Severity: variable

Explanation: This fault is caused by "Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287648: fltTcaCoppFilterStats5minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287649: fltTcaCoppFilterStats15minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287650: fltTcaCoppFilterStats1hBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287651: fltTcaCoppFilterStats1dBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287652: fltTcaCoppFilterStats1wBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287653: fltTcaCoppFilterStats1moBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287654: fltTcaCoppFilterStats1qtrBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287655: fltTcaCoppFilterStats1yearBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287688: fltTcaCoppFilterStats5minBytesRateTr

Severity: variable

Explanation: This fault is caused by "Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287689: fltTcaCoppFilterStats15minBytesRateTr

Severity: variable

Explanation: This fault is caused by "Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287690: fltTcaCoppFilterStats1hBytesRateTr

Severity: variable

Explanation: This fault is caused by "Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287691: fltTcaCoppFilterStats1dBytesRateTr

Severity: variable

Explanation: This fault is caused by "Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287692: fltTcaCoppFilterStats1wBytesRateTr

Severity: variable

Explanation: This fault is caused by "Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287693: fltTcaCoppFilterStats1moBytesRateTr

Severity: variable

Explanation: This fault is caused by "Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287694: fltTcaCoppFilterStats1qtrBytesRateTr

Severity: variable

Explanation: This fault is caused by "Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287695: fltTcaCoppFilterStats1yearBytesRateTr

Severity: variable

Explanation: This fault is caused by "Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287744: fltTcaCoppFilterStats5minPktsLast

Severity: variable

Explanation: This fault is caused by "Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287745: fltTcaCoppFilterStats15minPktsLast

Severity: variable

Explanation: This fault is caused by "Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287746: fltTcaCoppFilterStats1hPktsLast

Severity: variable

Explanation: This fault is caused by "Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287747: fltTcaCoppFilterStats1dPktsLast

Severity: variable

Explanation: This fault is caused by "Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287748: fltTcaCoppFilterStats1wPktsLast

Severity: variable

Explanation: This fault is caused by "Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287749: fltTcaCoppFilterStats1moPktsLast

Severity: variable

Explanation: This fault is caused by "Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287750: fltTcaCoppFilterStats1qtrPktsLast

Severity: variable

Explanation: This fault is caused by "Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287751: fltTcaCoppFilterStats1yearPktsLast

Severity: variable

Explanation: This fault is caused by "Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287760: fltTcaCoppFilterStats5minPktsCum

Severity: variable

Explanation: This fault is caused by "Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287761: fltTcaCoppFilterStats15minPktsCum

Severity: variable

Explanation: This fault is caused by "Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287762: fltTcaCoppFilterStats1hPktsCum

Severity: variable

Explanation: This fault is caused by "Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287763: fltTcaCoppFilterStats1dPktsCum

Severity: variable

Explanation: This fault is caused by "Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287764: fltTcaCoppFilterStats1wPktsCum

Severity: variable

Explanation: This fault is caused by "Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287765: fltTcaCoppFilterStats1moPktsCum

Severity: variable

Explanation: This fault is caused by "Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287766: fltTcaCoppFilterStats1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287767: fltTcaCoppFilterStats1yearPktsCum

Severity: variable

Explanation: This fault is caused by "Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287768: fltTcaCoppFilterStats5minPktsPer

Severity: variable

Explanation: This fault is caused by "Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287769: fltTcaCoppFilterStats15minPktsPer

Severity: variable

Explanation: This fault is caused by "Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287770: fltTcaCoppFilterStats1hPktsPer

Severity: variable

Explanation: This fault is caused by "Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287771: fltTcaCoppFilterStats1dPktsPer

Severity: variable

Explanation: This fault is caused by "Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287772: fltTcaCoppFilterStats1wPktsPer

Severity: variable

Explanation: This fault is caused by "Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287773: fltTcaCoppFilterStats1moPktsPer

Severity: variable

Explanation: This fault is caused by "Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287774: fltTcaCoppFilterStats1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287775: fltTcaCoppFilterStats1yearPktsPer

Severity: variable

Explanation: This fault is caused by "Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287776: fltTcaCoppFilterStats5minPktsMin

Severity: variable

Explanation: This fault is caused by "Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287777: fltTcaCoppFilterStats15minPktsMin

Severity: variable

Explanation: This fault is caused by "Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287778: fltTcaCoppFilterStats1hPktsMin

Severity: variable

Explanation: This fault is caused by "Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287779: fltTcaCoppFilterStats1dPktsMin

Severity: variable

Explanation: This fault is caused by "Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287780: fltTcaCoppFilterStats1wPktsMin

Severity: variable

Explanation: This fault is caused by "Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287781: fltTcaCoppFilterStats1moPktsMin

Severity: variable

Explanation: This fault is caused by "Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287782: fltTcaCoppFilterStats1qtrPktsMin

Severity: variable

Explanation: This fault is caused by "Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287783: fltTcaCoppFilterStats1yearPktsMin

Severity: variable

Explanation: This fault is caused by "Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287784: fltTcaCoppFilterStats5minPktsMax

Severity: variable

Explanation: This fault is caused by "Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287785: fltTcaCoppFilterStats15minPktsMax

Severity: variable

Explanation: This fault is caused by "Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287786: fltTcaCoppFilterStats1hPktsMax

Severity: variable

Explanation: This fault is caused by "Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287787: fltTcaCoppFilterStats1dPktsMax

Severity: variable

Explanation: This fault is caused by "Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287788: fltTcaCoppFilterStats1wPktsMax

Severity: variable

Explanation: This fault is caused by "Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287789: fltTcaCoppFilterStats1moPktsMax

Severity: variable

Explanation: This fault is caused by "Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287790: fltTcaCoppFilterStats1qtrPktsMax

Severity: variable

Explanation: This fault is caused by "Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287791: fltTcaCoppFilterStats1yearPktsMax

Severity: variable

Explanation: This fault is caused by "Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287792: fltTcaCoppFilterStats5minPktsAvg

Severity: variable

Explanation: This fault is caused by "Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287793: fltTcaCoppFilterStats15minPktsAvg

Severity: variable

Explanation: This fault is caused by "Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287794: fltTcaCoppFilterStats1hPktsAvg

Severity: variable

Explanation: This fault is caused by "Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287795: fltTcaCoppFilterStats1dPktsAvg

Severity: variable

Explanation: This fault is caused by "Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287796: fltTcaCoppFilterStats1wPktsAvg

Severity: variable

Explanation: This fault is caused by "Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287797: fltTcaCoppFilterStats1moPktsAvg

Severity: variable

Explanation: This fault is caused by "Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287798: fltTcaCoppFilterStats1qtrPktsAvg

Severity: variable

Explanation: This fault is caused by "Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287799: fltTcaCoppFilterStats1yearPktsAvg

Severity: variable

Explanation: This fault is caused by "Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287824: fltTcaCoppFilterStats5minPktsTr

Severity: variable

Explanation: This fault is caused by "Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287825: fltTcaCoppFilterStats15minPktsTr

Severity: variable

Explanation: This fault is caused by "Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287826: fltTcaCoppFilterStats1hPktsTr

Severity: variable

Explanation: This fault is caused by "Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287827: fltTcaCoppFilterStats1dPktsTr

Severity: variable

Explanation: This fault is caused by "Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287828: fltTcaCoppFilterStats1wPktsTr

Severity: variable

Explanation: This fault is caused by "Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287829: fltTcaCoppFilterStats1moPktsTr

Severity: variable

Explanation: This fault is caused by "Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287830: fltTcaCoppFilterStats1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287831: fltTcaCoppFilterStats1yearPktsTr

Severity: variable

Explanation: This fault is caused by "Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287832: fltTcaCoppFilterStats5minPktsRate

Severity: variable

Explanation: This fault is caused by "Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287833: fltTcaCoppFilterStats15minPktsRate

Severity: variable

Explanation: This fault is caused by "Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287834: fltTcaCoppFilterStats1hPktsRate

Severity: variable

Explanation: This fault is caused by "Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287835: fltTcaCoppFilterStats1dPktsRate

Severity: variable

Explanation: This fault is caused by "Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287836: fltTcaCoppFilterStats1wPktsRate

Severity: variable

Explanation: This fault is caused by "Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287837: fltTcaCoppFilterStats1moPktsRate

Severity: variable

Explanation: This fault is caused by "Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287838: fltTcaCoppFilterStats1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287839: fltTcaCoppFilterStats1yearPktsRate

Severity: variable

Explanation: This fault is caused by "Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287912: fltTcaCoppFilterStats5minPktsRateLast

Severity: variable

Explanation: This fault is caused by "Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287913: fltTcaCoppFilterStats15minPktsRateLast

Severity: variable

Explanation: This fault is caused by "Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287914: fltTcaCoppFilterStats1hPktsRateLast

Severity: variable

Explanation: This fault is caused by "Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287915: fltTcaCoppFilterStats1dPktsRateLast

Severity: variable

Explanation: This fault is caused by "Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287916: fltTcaCoppFilterStats1wPktsRateLast

Severity: variable

Explanation: This fault is caused by "Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287917: fltTcaCoppFilterStats1moPktsRateLast

Severity: variable

Explanation: This fault is caused by "Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287918: fltTcaCoppFilterStats1qtrPktsRateLast

Severity: variable

Explanation: This fault is caused by "Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287919: fltTcaCoppFilterStats1yearPktsRateLast

Severity: variable

Explanation: This fault is caused by "Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287920: fltTcaCoppFilterStats5minPktsRateMin

Severity: variable

Explanation: This fault is caused by "Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287921: fltTcaCoppFilterStats15minPktsRateMin

Severity: variable

Explanation: This fault is caused by "Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287922: fltTcaCoppFilterStats1hPktsRateMin

Severity: variable

Explanation: This fault is caused by "Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287923: fltTcaCoppFilterStats1dPktsRateMin

Severity: variable

Explanation: This fault is caused by "Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287924: fltTcaCoppFilterStats1wPktsRateMin

Severity: variable

Explanation: This fault is caused by "Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287925: fltTcaCoppFilterStats1moPktsRateMin

Severity: variable

Explanation: This fault is caused by "Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287926: fltTcaCoppFilterStats1qtrPktsRateMin

Severity: variable

Explanation: This fault is caused by "Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287927: fltTcaCoppFilterStats1yearPktsRateMin

Severity: variable

Explanation: This fault is caused by "Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287928: fltTcaCoppFilterStats5minPktsRateMax

Severity: variable

Explanation: This fault is caused by "Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287929: fltTcaCoppFilterStats15minPktsRateMax

Severity: variable

Explanation: This fault is caused by "Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287930: fltTcaCoppFilterStats1hPktsRateMax

Severity: variable

Explanation: This fault is caused by "Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287931: fltTcaCoppFilterStats1dPktsRateMax

Severity: variable

Explanation: This fault is caused by "Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287932: fltTcaCoppFilterStats1wPktsRateMax

Severity: variable

Explanation: This fault is caused by "Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287933: fltTcaCoppFilterStats1moPktsRateMax

Severity: variable

Explanation: This fault is caused by "Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287934: fltTcaCoppFilterStats1qtrPktsRateMax

Severity: variable

Explanation: This fault is caused by "Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287935: fltTcaCoppFilterStats1yearPktsRateMax

Severity: variable

Explanation: This fault is caused by "Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287936: fltTcaCoppFilterStats5minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287937: fltTcaCoppFilterStats15minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287938: fltTcaCoppFilterStats1hPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287939: fltTcaCoppFilterStats1dPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287940: fltTcaCoppFilterStats1wPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287941: fltTcaCoppFilterStats1moPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287942: fltTcaCoppFilterStats1qtrPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287943: fltTcaCoppFilterStats1yearPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287976: fltTcaCoppFilterStats5minPktsRateTr

Severity: variable

Explanation: This fault is caused by "Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287977: fltTcaCoppFilterStats15minPktsRateTr

Severity: variable

Explanation: This fault is caused by "Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287978: fltTcaCoppFilterStats1hPktsRateTr

Severity: variable

Explanation: This fault is caused by "Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287979: fltTcaCoppFilterStats1dPktsRateTr

Severity: variable

Explanation: This fault is caused by "Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287980: fltTcaCoppFilterStats1wPktsRateTr

Severity: variable

Explanation: This fault is caused by "Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287981: fltTcaCoppFilterStats1moPktsRateTr

Severity: variable

Explanation: This fault is caused by "Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287982: fltTcaCoppFilterStats1qtrPktsRateTr

Severity: variable

Explanation: This fault is caused by "Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F287983: fltTcaCoppFilterStats1yearPktsRateTr

Severity: variable

Explanation: This fault is caused by "Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2880: fltInfraRsPortDirectionPortp-config-failed-not-exist

Severity: minor

Explanation: This fault occurs when a PortDirecPol is failed to apply.

Recommended Action: If you see this fault, take the following actions:

1. Check if the port exists

F288032: fltTcaCoppIcmpAllow5minBytesLast

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288033: fltTcaCoppIcmpAllow15minBytesLast

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288034: fltTcaCoppIcmpAllow1hBytesLast

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288035: fltTcaCoppIcmpAllow1dBytesLast

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288036: fltTcaCoppIcmpAllow1wBytesLast

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288037: fltTcaCoppIcmpAllow1moBytesLast

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288038: fltTcaCoppIcmpAllow1qtrBytesLast

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288039: fltTcaCoppIcmpAllow1yearBytesLast

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288048: fltTcaCoppIcmpAllow5minBytesCum

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288049: fltTcaCoppIcmpAllow15minBytesCum

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288050: fltTcaCoppIcmpAllow1hBytesCum

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288051: fltTcaCoppIcmpAllow1dBytesCum

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288052: fltTcaCoppIcmpAllow1wBytesCum

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288053: fltTcaCoppIcmpAllow1moBytesCum

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288054: fltTcaCoppIcmpAllow1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288055: fltTcaCoppIcmpAllow1yearBytesCum

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288056: fltTcaCoppIcmpAllow5minBytesPer

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288057: fltTcaCoppIcmpAllow15minBytesPer

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288058: fltTcaCoppIcmpAllow1hBytesPer

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288059: fltTcaCoppIcmpAllow1dBytesPer

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288060: fltTcaCoppIcmpAllow1wBytesPer

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288061: fltTcaCoppIcmpAllow1moBytesPer

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288062: fltTcaCoppIcmpAllow1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288063: fltTcaCoppIcmpAllow1yearBytesPer

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288064: fltTcaCoppIcmpAllow5minBytesMin

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288065: fltTcaCoppIcmpAllow15minBytesMin

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288066: fltTcaCoppIcmpAllow1hBytesMin

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288067: fltTcaCoppIcmpAllow1dBytesMin

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288068: fltTcaCoppIcmpAllow1wBytesMin

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288069: fltTcaCoppIcmpAllow1moBytesMin

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288070: fltTcaCoppIcmpAllow1qtrBytesMin

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288071: fltTcaCoppIcmpAllow1yearBytesMin

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288072: fltTcaCoppIcmpAllow5minBytesMax

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288073: fltTcaCoppIcmpAllow15minBytesMax

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288074: fltTcaCoppIcmpAllow1hBytesMax

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288075: fltTcaCoppIcmpAllow1dBytesMax

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288076: fltTcaCoppIcmpAllow1wBytesMax

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288077: fltTcaCoppIcmpAllow1moBytesMax

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288078: fltTcaCoppIcmpAllow1qtrBytesMax

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288079: fltTcaCoppIcmpAllow1yearBytesMax

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288080: fltTcaCoppIcmpAllow5minBytesAvg

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288081: fltTcaCoppIcmpAllow15minBytesAvg

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288082: fltTcaCoppIcmpAllow1hBytesAvg

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288083: fltTcaCoppIcmpAllow1dBytesAvg

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288084: fltTcaCoppIcmpAllow1wBytesAvg

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288085: fltTcaCoppIcmpAllow1moBytesAvg

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288086: fltTcaCoppIcmpAllow1qtrBytesAvg

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288087: fltTcaCoppIcmpAllow1yearBytesAvg

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2881: fltInfraRsPortDirectionPortp-config-failed-pc

Severity: minor

Explanation: This fault occurs when a PortDirecPolPol is failed to apply.

Recommended Action: If you see this fault, take the following actions:

1. Check if the port has already associated with Port Channel

F288112: fltTcaCoppIcmpAllow5minBytesTr

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288113: fltTcaCoppIcmpAllow15minBytesTr

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288114: fltTcaCoppIcmpAllow1hBytesTr

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288115: fltTcaCoppIcmpAllow1dBytesTr

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288116: fltTcaCoppIcmpAllow1wBytesTr

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288117: fltTcaCoppIcmpAllow1moBytesTr

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288118: fltTcaCoppIcmpAllow1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288119: fltTcaCoppIcmpAllow1yearBytesTr

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288120: fltTcaCoppIcmpAllow5minBytesRate

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288121: fltTcaCoppIcmpAllow15minBytesRate

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288122: fltTcaCoppIcmpAllow1hBytesRate

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288123: fltTcaCoppIcmpAllow1dBytesRate

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288124: fltTcaCoppIcmpAllow1wBytesRate

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288125: fltTcaCoppIcmpAllow1moBytesRate

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288126: fltTcaCoppIcmpAllow1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288127: fltTcaCoppIcmpAllow1yearBytesRate

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288200: fltTcaCoppIcmpAllow5minBytesRateLast

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288201: fltTcaCoppIcmpAllow15minBytesRateLast

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288202: fltTcaCoppIcmpAllow1hBytesRateLast

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288203: fltTcaCoppIcmpAllow1dBytesRateLast

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288204: fltTcaCoppIcmpAllow1wBytesRateLast

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288205: fltTcaCoppIcmpAllow1moBytesRateLast

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288206: fltTcaCoppIcmpAllow1qtrBytesRateLast

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288207: fltTcaCoppIcmpAllow1yearBytesRateLast

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288208: fltTcaCoppIcmpAllow5minBytesRateMin

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288209: fltTcaCoppIcmpAllow15minBytesRateMin

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288210: fltTcaCoppIcmpAllow1hBytesRateMin

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288211: fltTcaCoppIcmpAllow1dBytesRateMin

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288212: fltTcaCoppIcmpAllow1wBytesRateMin

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288213: fltTcaCoppIcmpAllow1moBytesRateMin

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288214: fltTcaCoppIcmpAllow1qtrBytesRateMin

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288215: fltTcaCoppIcmpAllow1yearBytesRateMin

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288216: fltTcaCoppIcmpAllow5minBytesRateMax

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288217: fltTcaCoppIcmpAllow15minBytesRateMax

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288218: fltTcaCoppIcmpAllow1hBytesRateMax

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288219: fltTcaCoppIcmpAllow1dBytesRateMax

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288220: fltTcaCoppIcmpAllow1wBytesRateMax

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288221: fltTcaCoppIcmpAllow1moBytesRateMax

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288222: fltTcaCoppIcmpAllow1qtrBytesRateMax

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288223: fltTcaCoppIcmpAllow1yearBytesRateMax

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288224: fltTcaCoppIcmpAllow5minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288225: fltTcaCoppIcmpAllow15minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288226: fltTcaCoppIcmpAllow1hBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288227: fltTcaCoppIcmpAllow1dBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288228: fltTcaCoppIcmpAllow1wBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288229: fltTcaCoppIcmpAllow1moBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288230: fltTcaCoppIcmpAllow1qtrBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288231: fltTcaCoppIcmpAllow1yearBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288264: fltTcaCoppIcmpAllow5minBytesRateTr

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288265: fltTcaCoppIcmpAllow15minBytesRateTr

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288266: fltTcaCoppIcmpAllow1hBytesRateTr

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288267: fltTcaCoppIcmpAllow1dBytesRateTr

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288268: fltTcaCoppIcmpAllow1wBytesRateTr

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288269: fltTcaCoppIcmpAllow1moBytesRateTr

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288270: fltTcaCoppIcmpAllow1qtrBytesRateTr

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288271: fltTcaCoppIcmpAllow1yearBytesRateTr

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288320: fltTcaCoppIcmpAllow5minPktsLast

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288321: fltTcaCoppIcmpAllow15minPktsLast

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288322: fltTcaCoppIcmpAllow1hPktsLast

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288323: fltTcaCoppIcmpAllow1dPktsLast

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288324: fltTcaCoppIcmpAllow1wPktsLast

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288325: fltTcaCoppIcmpAllow1moPktsLast

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288326: fltTcaCoppIcmpAllow1qtrPktsLast

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288327: fltTcaCoppIcmpAllow1yearPktsLast

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288336: fltTcaCoppIcmpAllow5minPktsCum

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288337: fltTcaCoppIcmpAllow15minPktsCum

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288338: fltTcaCoppIcmpAllow1hPktsCum

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288339: fltTcaCoppIcmpAllow1dPktsCum

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288340: fltTcaCoppIcmpAllow1wPktsCum

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288341: fltTcaCoppIcmpAllow1moPktsCum

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288342: fltTcaCoppIcmpAllow1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288343: fltTcaCoppIcmpAllow1yearPktsCum

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288344: fltTcaCoppIcmpAllow5minPktsPer

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288345: fltTcaCoppIcmpAllow15minPktsPer

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288346: fltTcaCoppIcmpAllow1hPktsPer

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288347: fltTcaCoppIcmpAllow1dPktsPer

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288348: fltTcaCoppIcmpAllow1wPktsPer

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288349: fltTcaCoppIcmpAllow1moPktsPer

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288350: fltTcaCoppIcmpAllow1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288351: fltTcaCoppIcmpAllow1yearPktsPer

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288352: fltTcaCoppIcmpAllow5minPktsMin

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288353: fltTcaCoppIcmpAllow15minPktsMin

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288354: fltTcaCoppIcmpAllow1hPktsMin

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288355: fltTcaCoppIcmpAllow1dPktsMin

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288356: fltTcaCoppIcmpAllow1wPktsMin

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288357: fltTcaCoppIcmpAllow1moPktsMin

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288358: fltTcaCoppIcmpAllow1qtrPktsMin

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288359: fltTcaCoppIcmpAllow1yearPktsMin

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288360: fltTcaCoppIcmpAllow5minPktsMax

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288361: fltTcaCoppIcmpAllow15minPktsMax

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288362: fltTcaCoppIcmpAllow1hPktsMax

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288363: fltTcaCoppIcmpAllow1dPktsMax

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288364: fltTcaCoppIcmpAllow1wPktsMax

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288365: fltTcaCoppIcmpAllow1moPktsMax

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288366: fltTcaCoppIcmpAllow1qtrPktsMax

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288367: fltTcaCoppIcmpAllow1yearPktsMax

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288368: fltTcaCoppIcmpAllow5minPktsAvg

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288369: fltTcaCoppIcmpAllow15minPktsAvg

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288370: fltTcaCoppIcmpAllow1hPktsAvg

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288371: fltTcaCoppIcmpAllow1dPktsAvg

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288372: fltTcaCoppIcmpAllow1wPktsAvg

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288373: fltTcaCoppIcmpAllow1moPktsAvg

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288374: fltTcaCoppIcmpAllow1qtrPktsAvg

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288375: fltTcaCoppIcmpAllow1yearPktsAvg

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288400: fltTcaCoppIcmpAllow5minPktsTr

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288401: fltTcaCoppIcmpAllow15minPktsTr

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288402: fltTcaCoppIcmpAllow1hPktsTr

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288403: fltTcaCoppIcmpAllow1dPktsTr

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288404: fltTcaCoppIcmpAllow1wPktsTr

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288405: fltTcaCoppIcmpAllow1moPktsTr

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288406: fltTcaCoppIcmpAllow1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288407: fltTcaCoppIcmpAllow1yearPktsTr

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288408: fltTcaCoppIcmpAllow5minPktsRate

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288409: fltTcaCoppIcmpAllow15minPktsRate

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288410: fltTcaCoppIcmpAllow1hPktsRate

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288411: fltTcaCoppIcmpAllow1dPktsRate

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288412: fltTcaCoppIcmpAllow1wPktsRate

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288413: fltTcaCoppIcmpAllow1moPktsRate

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288414: fltTcaCoppIcmpAllow1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288415: fltTcaCoppIcmpAllow1yearPktsRate

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288488: fltTcaCoppIcmpAllow5minPktsRateLast

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288489: fltTcaCoppIcmpAllow15minPktsRateLast

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288490: fltTcaCoppIcmpAllow1hPktsRateLast

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288491: fltTcaCoppIcmpAllow1dPktsRateLast

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288492: fltTcaCoppIcmpAllow1wPktsRateLast

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288493: fltTcaCoppIcmpAllow1moPktsRateLast

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288494: fltTcaCoppIcmpAllow1qtrPktsRateLast

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288495: fltTcaCoppIcmpAllow1yearPktsRateLast

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288496: fltTcaCoppIcmpAllow5minPktsRateMin

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288497: fltTcaCoppIcmpAllow15minPktsRateMin

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288498: fltTcaCoppIcmpAllow1hPktsRateMin

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288499: fltTcaCoppIcmpAllow1dPktsRateMin

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288500: fltTcaCoppIcmpAllow1wPktsRateMin

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288501: fltTcaCoppIcmpAllow1moPktsRateMin

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288502: fltTcaCoppIcmpAllow1qtrPktsRateMin

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288503: fltTcaCoppIcmpAllow1yearPktsRateMin

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288504: fltTcaCoppIcmpAllow5minPktsRateMax

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288505: fltTcaCoppIcmpAllow15minPktsRateMax

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288506: fltTcaCoppIcmpAllow1hPktsRateMax

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288507: fltTcaCoppIcmpAllow1dPktsRateMax

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288508: fltTcaCoppIcmpAllow1wPktsRateMax

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288509: fltTcaCoppIcmpAllow1moPktsRateMax

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288510: fltTcaCoppIcmpAllow1qtrPktsRateMax

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288511: fltTcaCoppIcmpAllow1yearPktsRateMax

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288512: fltTcaCoppIcmpAllow5minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288513: fltTcaCoppIcmpAllow15minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288514: fltTcaCoppIcmpAllow1hPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288515: fltTcaCoppIcmpAllow1dPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288516: fltTcaCoppIcmpAllow1wPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288517: fltTcaCoppIcmpAllow1moPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288518: fltTcaCoppIcmpAllow1qtrPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288519: fltTcaCoppIcmpAllow1yearPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288552: fltTcaCoppIcmpAllow5minPktsRateTr

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288553: fltTcaCoppIcmpAllow15minPktsRateTr

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288554: fltTcaCoppIcmpAllow1hPktsRateTr

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288555: fltTcaCoppIcmpAllow1dPktsRateTr

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288556: fltTcaCoppIcmpAllow1wPktsRateTr

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288557: fltTcaCoppIcmpAllow1moPktsRateTr

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288558: fltTcaCoppIcmpAllow1qtrPktsRateTr

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288559: fltTcaCoppIcmpAllow1yearPktsRateTr

Severity: variable

Explanation: This fault is caused by "IcmpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288608: fltTcaCoppIcmpDrop5minBytesLast

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288609: fltTcaCoppIcmpDrop15minBytesLast

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288610: fltTcaCoppIcmpDrop1hBytesLast

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288611: fltTcaCoppIcmpDrop1dBytesLast

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288612: fltTcaCoppIcmpDrop1wBytesLast

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288613: fltTcaCoppIcmpDrop1moBytesLast

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288614: fltTcaCoppIcmpDrop1qtrBytesLast

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288615: fltTcaCoppIcmpDrop1yearBytesLast

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288624: fltTcaCoppIcmpDrop5minBytesCum

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288625: fltTcaCoppIcmpDrop15minBytesCum

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288626: fltTcaCoppIcmpDrop1hBytesCum

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288627: fltTcaCoppIcmpDrop1dBytesCum

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288628: fltTcaCoppIcmpDrop1wBytesCum

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288629: fltTcaCoppIcmpDrop1moBytesCum

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288630: fltTcaCoppIcmpDrop1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288631: fltTcaCoppIcmpDrop1yearBytesCum

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288632: fltTcaCoppIcmpDrop5minBytesPer

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288633: fltTcaCoppIcmpDrop15minBytesPer

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288634: fltTcaCoppIcmpDrop1hBytesPer

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288635: fltTcaCoppIcmpDrop1dBytesPer

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288636: fltTcaCoppIcmpDrop1wBytesPer

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288637: fltTcaCoppIcmpDrop1moBytesPer

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288638: fltTcaCoppIcmpDrop1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288639: fltTcaCoppIcmpDrop1yearBytesPer

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288640: fltTcaCoppIcmpDrop5minBytesMin

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288641: fltTcaCoppIcmpDrop15minBytesMin

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288642: fltTcaCoppIcmpDrop1hBytesMin

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288643: fltTcaCoppIcmpDrop1dBytesMin

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288644: fltTcaCoppIcmpDrop1wBytesMin

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288645: fltTcaCoppIcmpDrop1moBytesMin

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288646: fltTcaCoppIcmpDrop1qtrBytesMin

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288647: fltTcaCoppIcmpDrop1yearBytesMin

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288648: fltTcaCoppIcmpDrop5minBytesMax

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288649: fltTcaCoppIcmpDrop15minBytesMax

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288650: fltTcaCoppIcmpDrop1hBytesMax

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288651: fltTcaCoppIcmpDrop1dBytesMax

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288652: fltTcaCoppIcmpDrop1wBytesMax

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288653: fltTcaCoppIcmpDrop1moBytesMax

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288654: fltTcaCoppIcmpDrop1qtrBytesMax

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288655: fltTcaCoppIcmpDrop1yearBytesMax

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288656: fltTcaCoppIcmpDrop5minBytesAvg

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288657: fltTcaCoppIcmpDrop15minBytesAvg

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288658: fltTcaCoppIcmpDrop1hBytesAvg

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288659: fltTcaCoppIcmpDrop1dBytesAvg

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288660: fltTcaCoppIcmpDrop1wBytesAvg

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288661: fltTcaCoppIcmpDrop1moBytesAvg

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288662: fltTcaCoppIcmpDrop1qtrBytesAvg

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288663: fltTcaCoppIcmpDrop1yearBytesAvg

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288688: fltTcaCoppIcmpDrop5minBytesTr

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288689: fltTcaCoppIcmpDrop15minBytesTr

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288690: fltTcaCoppIcmpDrop1hBytesTr

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288691: fltTcaCoppIcmpDrop1dBytesTr

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288692: fltTcaCoppIcmpDrop1wBytesTr

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288693: fltTcaCoppIcmpDrop1moBytesTr

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288694: fltTcaCoppIcmpDrop1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288695: fltTcaCoppIcmpDrop1yearBytesTr

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288696: fltTcaCoppIcmpDrop5minBytesRate

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288697: fltTcaCoppIcmpDrop15minBytesRate

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288698: fltTcaCoppIcmpDrop1hBytesRate

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288699: fltTcaCoppIcmpDrop1dBytesRate

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2887: fltOrchsRsToFuncProfileResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F288700: fltTcaCoppIcmpDrop1wBytesRate

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288701: fltTcaCoppIcmpDrop1moBytesRate

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288702: fltTcaCoppIcmpDrop1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288703: fltTcaCoppIcmpDrop1yearBytesRate

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288776: fltTcaCoppIcmpDrop5minBytesRateLast

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288777: fltTcaCoppIcmpDrop15minBytesRateLast

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288778: fltTcaCoppIcmpDrop1hBytesRateLast

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288779: fltTcaCoppIcmpDrop1dBytesRateLast

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288780: fltTcaCoppIcmpDrop1wBytesRateLast

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288781: fltTcaCoppIcmpDrop1moBytesRateLast

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288782: fltTcaCoppIcmpDrop1qtrBytesRateLast

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288783: fltTcaCoppIcmpDrop1yearBytesRateLast

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288784: fltTcaCoppIcmpDrop5minBytesRateMin

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288785: fltTcaCoppIcmpDrop15minBytesRateMin

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288786: fltTcaCoppIcmpDrop1hBytesRateMin

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288787: fltTcaCoppIcmpDrop1dBytesRateMin

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288788: fltTcaCoppIcmpDrop1wBytesRateMin

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288789: fltTcaCoppIcmpDrop1moBytesRateMin

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288790: fltTcaCoppIcmpDrop1qtrBytesRateMin

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288791: fltTcaCoppIcmpDrop1yearBytesRateMin

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288792: fltTcaCoppIcmpDrop5minBytesRateMax

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288793: fltTcaCoppIcmpDrop15minBytesRateMax

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288794: fltTcaCoppIcmpDrop1hBytesRateMax

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288795: fltTcaCoppIcmpDrop1dBytesRateMax

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288796: fltTcaCoppIcmpDrop1wBytesRateMax

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288797: fltTcaCoppIcmpDrop1moBytesRateMax

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288798: fltTcaCoppIcmpDrop1qtrBytesRateMax

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288799: fltTcaCoppIcmpDrop1yearBytesRateMax

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2888: fltOrchsRsToMdevResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F288800: fltTcaCoppIcmpDrop5minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288801: fltTcaCoppIcmpDrop15minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288802: fltTcaCoppIcmpDrop1hBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288803: fltTcaCoppIcmpDrop1dBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288804: fltTcaCoppIcmpDrop1wBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288805: fltTcaCoppIcmpDrop1moBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288806: fltTcaCoppIcmpDrop1qtrBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288807: fltTcaCoppIcmpDrop1yearBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288840: fltTcaCoppIcmpDrop5minBytesRateTr

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288841: fltTcaCoppIcmpDrop15minBytesRateTr

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288842: fltTcaCoppIcmpDrop1hBytesRateTr

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288843: fltTcaCoppIcmpDrop1dBytesRateTr

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288844: fltTcaCoppIcmpDrop1wBytesRateTr

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288845: fltTcaCoppIcmpDrop1moBytesRateTr

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288846: fltTcaCoppIcmpDrop1qtrBytesRateTr

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288847: fltTcaCoppIcmpDrop1yearBytesRateTr

Severity: variable

Explanation: This fault is caused by "IcmpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288896: fltTcaCoppIcmpDrop5minPktsLast

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288897: fltTcaCoppIcmpDrop15minPktsLast

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288898: fltTcaCoppIcmpDrop1hPktsLast

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288899: fltTcaCoppIcmpDrop1dPktsLast

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2889: fltOrchsRsAbsGraphRefResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F288900: fltTcaCoppIcmpDrop1wPktsLast

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288901: fltTcaCoppIcmpDrop1moPktsLast

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288902: fltTcaCoppIcmpDrop1qtrPktsLast

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288903: fltTcaCoppIcmpDrop1yearPktsLast

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288912: fltTcaCoppIcmpDrop5minPktsCum

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288913: fltTcaCoppIcmpDrop15minPktsCum

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288914: fltTcaCoppIcmpDrop1hPktsCum

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288915: fltTcaCoppIcmpDrop1dPktsCum

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288916: fltTcaCoppIcmpDrop1wPktsCum

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288917: fltTcaCoppIcmpDrop1moPktsCum

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288918: fltTcaCoppIcmpDrop1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288919: fltTcaCoppIcmpDrop1yearPktsCum

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288920: fltTcaCoppIcmpDrop5minPktsPer

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288921: fltTcaCoppIcmpDrop15minPktsPer

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288922: fltTcaCoppIcmpDrop1hPktsPer

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288923: fltTcaCoppIcmpDrop1dPktsPer

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288924: fltTcaCoppIcmpDrop1wPktsPer

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288925: fltTcaCoppIcmpDrop1moPktsPer

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288926: fltTcaCoppIcmpDrop1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288927: fltTcaCoppIcmpDrop1yearPktsPer

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288928: fltTcaCoppIcmpDrop5minPktsMin

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288929: fltTcaCoppIcmpDrop15minPktsMin

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288930: fltTcaCoppIcmpDrop1hPktsMin

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288931: fltTcaCoppIcmpDrop1dPktsMin

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288932: fltTcaCoppIcmpDrop1wPktsMin

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288933: fltTcaCoppIcmpDrop1moPktsMin

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288934: fltTcaCoppIcmpDrop1qtrPktsMin

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288935: fltTcaCoppIcmpDrop1yearPktsMin

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288936: fltTcaCoppIcmpDrop5minPktsMax

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288937: fltTcaCoppIcmpDrop15minPktsMax

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288938: fltTcaCoppIcmpDrop1hPktsMax

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288939: fltTcaCoppIcmpDrop1dPktsMax

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288940: fltTcaCoppIcmpDrop1wPktsMax

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288941: fltTcaCoppIcmpDrop1moPktsMax

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288942: fltTcaCoppIcmpDrop1qtrPktsMax

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288943: fltTcaCoppIcmpDrop1yearPktsMax

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288944: fltTcaCoppIcmpDrop5minPktsAvg

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288945: fltTcaCoppIcmpDrop15minPktsAvg

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288946: fltTcaCoppIcmpDrop1hPktsAvg

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288947: fltTcaCoppIcmpDrop1dPktsAvg

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288948: fltTcaCoppIcmpDrop1wPktsAvg

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288949: fltTcaCoppIcmpDrop1moPktsAvg

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288950: fltTcaCoppIcmpDrop1qtrPktsAvg

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288951: fltTcaCoppIcmpDrop1yearPktsAvg

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288976: fltTcaCoppIcmpDrop5minPktsTr

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288977: fltTcaCoppIcmpDrop15minPktsTr

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288978: fltTcaCoppIcmpDrop1hPktsTr

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288979: fltTcaCoppIcmpDrop1dPktsTr

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288980: fltTcaCoppIcmpDrop1wPktsTr

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288981: fltTcaCoppIcmpDrop1moPktsTr

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288982: fltTcaCoppIcmpDrop1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288983: fltTcaCoppIcmpDrop1yearPktsTr

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288984: fltTcaCoppIcmpDrop5minPktsRate

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288985: fltTcaCoppIcmpDrop15minPktsRate

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288986: fltTcaCoppIcmpDrop1hPktsRate

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288987: fltTcaCoppIcmpDrop1dPktsRate

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288988: fltTcaCoppIcmpDrop1wPktsRate

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288989: fltTcaCoppIcmpDrop1moPktsRate

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288990: fltTcaCoppIcmpDrop1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F288991: fltTcaCoppIcmpDrop1yearPktsRate

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2890: fltOrchsRsIpPoolRefv2ResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F289064: fltTcaCoppIcmpDrop5minPktsRateLast

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289065: fltTcaCoppIcmpDrop15minPktsRateLast

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289066: fltTcaCoppIcmpDrop1hPktsRateLast

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289067: fltTcaCoppIcmpDrop1dPktsRateLast

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289068: fltTcaCoppIcmpDrop1wPktsRateLast

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289069: fltTcaCoppIcmpDrop1moPktsRateLast

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289070: fltTcaCoppIcmpDrop1qtrPktsRateLast

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289071: fltTcaCoppIcmpDrop1yearPktsRateLast

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289072: fltTcaCoppIcmpDrop5minPktsRateMin

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289073: fltTcaCoppIcmpDrop15minPktsRateMin

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289074: fltTcaCoppIcmpDrop1hPktsRateMin

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289075: fltTcaCoppIcmpDrop1dPktsRateMin

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289076: fltTcaCoppIcmpDrop1wPktsRateMin

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289077: fltTcaCoppIcmpDrop1moPktsRateMin

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289078: fltTcaCoppIcmpDrop1qtrPktsRateMin

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289079: fltTcaCoppIcmpDrop1yearPktsRateMin

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289080: fltTcaCoppIcmpDrop5minPktsRateMax

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289081: fltTcaCoppIcmpDrop15minPktsRateMax

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289082: fltTcaCoppIcmpDrop1hPktsRateMax

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289083: fltTcaCoppIcmpDrop1dPktsRateMax

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289084: fltTcaCoppIcmpDrop1wPktsRateMax

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289085: fltTcaCoppIcmpDrop1moPktsRateMax

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289086: fltTcaCoppIcmpDrop1qtrPktsRateMax

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289087: fltTcaCoppIcmpDrop1yearPktsRateMax

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289088: fltTcaCoppIcmpDrop5minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289089: fltTcaCoppIcmpDrop15minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289090: fltTcaCoppIcmpDrop1hPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289091: fltTcaCoppIcmpDrop1dPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289092: fltTcaCoppIcmpDrop1wPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289093: fltTcaCoppIcmpDrop1moPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289094: fltTcaCoppIcmpDrop1qtrPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289095: fltTcaCoppIcmpDrop1yearPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289128: fltTcaCoppIcmpDrop5minPktsRateTr

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289129: fltTcaCoppIcmpDrop15minPktsRateTr

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289130: fltTcaCoppIcmpDrop1hPktsRateTr

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289131: fltTcaCoppIcmpDrop1dPktsRateTr

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289132: fltTcaCoppIcmpDrop1wPktsRateTr

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289133: fltTcaCoppIcmpDrop1moPktsRateTr

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289134: fltTcaCoppIcmpDrop1qtrPktsRateTr

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289135: fltTcaCoppIcmpDrop1yearPktsRateTr

Severity: variable

Explanation: This fault is caused by "IcmpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IcmpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289184: fltTcaCoppLacpAllow5minBytesLast

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289185: fltTcaCoppLacpAllow15minBytesLast

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289186: fltTcaCoppLacpAllow1hBytesLast

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289187: fltTcaCoppLacpAllow1dBytesLast

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289188: fltTcaCoppLacpAllow1wBytesLast

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289189: fltTcaCoppLacpAllow1moBytesLast

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289190: fltTcaCoppLacpAllow1qtrBytesLast

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289191: fltTcaCoppLacpAllow1yearBytesLast

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289200: fltTcaCoppLacpAllow5minBytesCum

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289201: fltTcaCoppLacpAllow15minBytesCum

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289202: fltTcaCoppLacpAllow1hBytesCum

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289203: fltTcaCoppLacpAllow1dBytesCum

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289204: fltTcaCoppLacpAllow1wBytesCum

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289205: fltTcaCoppLacpAllow1moBytesCum

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289206: fltTcaCoppLacpAllow1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289207: fltTcaCoppLacpAllow1yearBytesCum

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289208: fltTcaCoppLacpAllow5minBytesPer

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289209: fltTcaCoppLacpAllow15minBytesPer

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289210: fltTcaCoppLacpAllow1hBytesPer

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289211: fltTcaCoppLacpAllow1dBytesPer

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289212: fltTcaCoppLacpAllow1wBytesPer

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289213: fltTcaCoppLacpAllow1moBytesPer

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289214: fltTcaCoppLacpAllow1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289215: fltTcaCoppLacpAllow1yearBytesPer

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289216: fltTcaCoppLacpAllow5minBytesMin

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289217: fltTcaCoppLacpAllow15minBytesMin

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289218: fltTcaCoppLacpAllow1hBytesMin

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289219: fltTcaCoppLacpAllow1dBytesMin

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289220: fltTcaCoppLacpAllow1wBytesMin

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289221: fltTcaCoppLacpAllow1moBytesMin

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289222: fltTcaCoppLacpAllow1qtrBytesMin

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289223: fltTcaCoppLacpAllow1yearBytesMin

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289224: fltTcaCoppLacpAllow5minBytesMax

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289225: fltTcaCoppLacpAllow15minBytesMax

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289226: fltTcaCoppLacpAllow1hBytesMax

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289227: fltTcaCoppLacpAllow1dBytesMax

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289228: fltTcaCoppLacpAllow1wBytesMax

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289229: fltTcaCoppLacpAllow1moBytesMax

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289230: fltTcaCoppLacpAllow1qtrBytesMax

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289231: fltTcaCoppLacpAllow1yearBytesMax

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289232: fltTcaCoppLacpAllow5minBytesAvg

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289233: fltTcaCoppLacpAllow15minBytesAvg

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289234: fltTcaCoppLacpAllow1hBytesAvg

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289235: fltTcaCoppLacpAllow1dBytesAvg

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289236: fltTcaCoppLacpAllow1wBytesAvg

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289237: fltTcaCoppLacpAllow1moBytesAvg

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289238: fltTcaCoppLacpAllow1qtrBytesAvg

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289239: fltTcaCoppLacpAllow1yearBytesAvg

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289264: fltTcaCoppLacpAllow5minBytesTr

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289265: fltTcaCoppLacpAllow15minBytesTr

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289266: fltTcaCoppLacpAllow1hBytesTr

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289267: fltTcaCoppLacpAllow1dBytesTr

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289268: fltTcaCoppLacpAllow1wBytesTr

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289269: fltTcaCoppLacpAllow1moBytesTr

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289270: fltTcaCoppLacpAllow1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289271: fltTcaCoppLacpAllow1yearBytesTr

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289272: fltTcaCoppLacpAllow5minBytesRate

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289273: fltTcaCoppLacpAllow15minBytesRate

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289274: fltTcaCoppLacpAllow1hBytesRate

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289275: fltTcaCoppLacpAllow1dBytesRate

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289276: fltTcaCoppLacpAllow1wBytesRate

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289277: fltTcaCoppLacpAllow1moBytesRate

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289278: fltTcaCoppLacpAllow1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289279: fltTcaCoppLacpAllow1yearBytesRate

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289352: fltTcaCoppLacpAllow5minBytesRateLast

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289353: fltTcaCoppLacpAllow15minBytesRateLast

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289354: fltTcaCoppLacpAllow1hBytesRateLast

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289355: fltTcaCoppLacpAllow1dBytesRateLast

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289356: fltTcaCoppLacpAllow1wBytesRateLast

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289357: fltTcaCoppLacpAllow1moBytesRateLast

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289358: fltTcaCoppLacpAllow1qtrBytesRateLast

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289359: fltTcaCoppLacpAllow1yearBytesRateLast

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289360: fltTcaCoppLacpAllow5minBytesRateMin

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289361: fltTcaCoppLacpAllow15minBytesRateMin

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289362: fltTcaCoppLacpAllow1hBytesRateMin

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289363: fltTcaCoppLacpAllow1dBytesRateMin

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289364: fltTcaCoppLacpAllow1wBytesRateMin

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289365: fltTcaCoppLacpAllow1moBytesRateMin

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289366: fltTcaCoppLacpAllow1qtrBytesRateMin

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289367: fltTcaCoppLacpAllow1yearBytesRateMin

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289368: fltTcaCoppLacpAllow5minBytesRateMax

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289369: fltTcaCoppLacpAllow15minBytesRateMax

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289370: fltTcaCoppLacpAllow1hBytesRateMax

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289371: fltTcaCoppLacpAllow1dBytesRateMax

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289372: fltTcaCoppLacpAllow1wBytesRateMax

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289373: fltTcaCoppLacpAllow1moBytesRateMax

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289374: fltTcaCoppLacpAllow1qtrBytesRateMax

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289375: fltTcaCoppLacpAllow1yearBytesRateMax

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289376: fltTcaCoppLacpAllow5minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289377: fltTcaCoppLacpAllow15minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289378: fltTcaCoppLacpAllow1hBytesRateAvg

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289379: fltTcaCoppLacpAllow1dBytesRateAvg

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289380: fltTcaCoppLacpAllow1wBytesRateAvg

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289381: fltTcaCoppLacpAllow1moBytesRateAvg

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289382: fltTcaCoppLacpAllow1qtrBytesRateAvg

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289383: fltTcaCoppLacpAllow1yearBytesRateAvg

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289416: fltTcaCoppLacpAllow5minBytesRateTr

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289417: fltTcaCoppLacpAllow15minBytesRateTr

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289418: fltTcaCoppLacpAllow1hBytesRateTr

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289419: fltTcaCoppLacpAllow1dBytesRateTr

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289420: fltTcaCoppLacpAllow1wBytesRateTr

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289421: fltTcaCoppLacpAllow1moBytesRateTr

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289422: fltTcaCoppLacpAllow1qtrBytesRateTr

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289423: fltTcaCoppLacpAllow1yearBytesRateTr

Severity: variable

Explanation: This fault is caused by "LacpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289472: fltTcaCoppLacpAllow5minPktsLast

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289473: fltTcaCoppLacpAllow15minPktsLast

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289474: fltTcaCoppLacpAllow1hPktsLast

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289475: fltTcaCoppLacpAllow1dPktsLast

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289476: fltTcaCoppLacpAllow1wPktsLast

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289477: fltTcaCoppLacpAllow1moPktsLast

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289478: fltTcaCoppLacpAllow1qtrPktsLast

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289479: fltTcaCoppLacpAllow1yearPktsLast

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289488: fltTcaCoppLacpAllow5minPktsCum

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289489: fltTcaCoppLacpAllow15minPktsCum

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289490: fltTcaCoppLacpAllow1hPktsCum

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289491: fltTcaCoppLacpAllow1dPktsCum

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289492: fltTcaCoppLacpAllow1wPktsCum

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289493: fltTcaCoppLacpAllow1moPktsCum

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289494: fltTcaCoppLacpAllow1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289495: fltTcaCoppLacpAllow1yearPktsCum

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289496: fltTcaCoppLacpAllow5minPktsPer

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289497: fltTcaCoppLacpAllow15minPktsPer

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289498: fltTcaCoppLacpAllow1hPktsPer

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289499: fltTcaCoppLacpAllow1dPktsPer

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289500: fltTcaCoppLacpAllow1wPktsPer

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289501: fltTcaCoppLacpAllow1moPktsPer

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289502: fltTcaCoppLacpAllow1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289503: fltTcaCoppLacpAllow1yearPktsPer

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289504: fltTcaCoppLacpAllow5minPktsMin

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289505: fltTcaCoppLacpAllow15minPktsMin

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289506: fltTcaCoppLacpAllow1hPktsMin

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289507: fltTcaCoppLacpAllow1dPktsMin

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289508: fltTcaCoppLacpAllow1wPktsMin

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289509: fltTcaCoppLacpAllow1moPktsMin

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289510: fltTcaCoppLacpAllow1qtrPktsMin

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289511: fltTcaCoppLacpAllow1yearPktsMin

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289512: fltTcaCoppLacpAllow5minPktsMax

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289513: fltTcaCoppLacpAllow15minPktsMax

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289514: fltTcaCoppLacpAllow1hPktsMax

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289515: fltTcaCoppLacpAllow1dPktsMax

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289516: fltTcaCoppLacpAllow1wPktsMax

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289517: fltTcaCoppLacpAllow1moPktsMax

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289518: fltTcaCoppLacpAllow1qtrPktsMax

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289519: fltTcaCoppLacpAllow1yearPktsMax

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289520: fltTcaCoppLacpAllow5minPktsAvg

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289521: fltTcaCoppLacpAllow15minPktsAvg

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289522: fltTcaCoppLacpAllow1hPktsAvg

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289523: fltTcaCoppLacpAllow1dPktsAvg

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289524: fltTcaCoppLacpAllow1wPktsAvg

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289525: fltTcaCoppLacpAllow1moPktsAvg

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289526: fltTcaCoppLacpAllow1qtrPktsAvg

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289527: fltTcaCoppLacpAllow1yearPktsAvg

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289552: fltTcaCoppLacpAllow5minPktsTr

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289553: fltTcaCoppLacpAllow15minPktsTr

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289554: fltTcaCoppLacpAllow1hPktsTr

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289555: fltTcaCoppLacpAllow1dPktsTr

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289556: fltTcaCoppLacpAllow1wPktsTr

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289557: fltTcaCoppLacpAllow1moPktsTr

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289558: fltTcaCoppLacpAllow1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289559: fltTcaCoppLacpAllow1yearPktsTr

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289560: fltTcaCoppLacpAllow5minPktsRate

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289561: fltTcaCoppLacpAllow15minPktsRate

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289562: fltTcaCoppLacpAllow1hPktsRate

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289563: fltTcaCoppLacpAllow1dPktsRate

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289564: fltTcaCoppLacpAllow1wPktsRate

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289565: fltTcaCoppLacpAllow1moPktsRate

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289566: fltTcaCoppLacpAllow1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289567: fltTcaCoppLacpAllow1yearPktsRate

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2896: fltOspfv3InstUnsupportedConfigErr

Severity: warning

Explanation: This fault occurs when the ospfv3 protocol is not supported on the platform

Recommended Action: To recover from this fault, Remove OSPFv3 ocnfigs from the switch

F289640: fltTcaCoppLacpAllow5minPktsRateLast

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289641: fltTcaCoppLacpAllow15minPktsRateLast

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289642: fltTcaCoppLacpAllow1hPktsRateLast

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289643: fltTcaCoppLacpAllow1dPktsRateLast

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289644: fltTcaCoppLacpAllow1wPktsRateLast

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289645: fltTcaCoppLacpAllow1moPktsRateLast

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289646: fltTcaCoppLacpAllow1qtrPktsRateLast

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289647: fltTcaCoppLacpAllow1yearPktsRateLast

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289648: fltTcaCoppLacpAllow5minPktsRateMin

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289649: fltTcaCoppLacpAllow15minPktsRateMin

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289650: fltTcaCoppLacpAllow1hPktsRateMin

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289651: fltTcaCoppLacpAllow1dPktsRateMin

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289652: fltTcaCoppLacpAllow1wPktsRateMin

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289653: fltTcaCoppLacpAllow1moPktsRateMin

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289654: fltTcaCoppLacpAllow1qtrPktsRateMin

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289655: fltTcaCoppLacpAllow1yearPktsRateMin

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289656: fltTcaCoppLacpAllow5minPktsRateMax

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289657: fltTcaCoppLacpAllow15minPktsRateMax

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289658: fltTcaCoppLacpAllow1hPktsRateMax

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289659: fltTcaCoppLacpAllow1dPktsRateMax

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289660: fltTcaCoppLacpAllow1wPktsRateMax

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289661: fltTcaCoppLacpAllow1moPktsRateMax

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289662: fltTcaCoppLacpAllow1qtrPktsRateMax

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289663: fltTcaCoppLacpAllow1yearPktsRateMax

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289664: fltTcaCoppLacpAllow5minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289665: fltTcaCoppLacpAllow15minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289666: fltTcaCoppLacpAllow1hPktsRateAvg

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289667: fltTcaCoppLacpAllow1dPktsRateAvg

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289668: fltTcaCoppLacpAllow1wPktsRateAvg

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289669: fltTcaCoppLacpAllow1moPktsRateAvg

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289670: fltTcaCoppLacpAllow1qtrPktsRateAvg

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289671: fltTcaCoppLacpAllow1yearPktsRateAvg

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2897: fltOspfInstUnsupportedConfigErr

Severity: warning

Explanation: This fault occurs when the ospf protocol is not supported on the platform

Recommended Action: To recover from this fault, Remove OSPF ocnfigs from the switch

F289704: fltTcaCoppLacpAllow5minPktsRateTr

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289705: fltTcaCoppLacpAllow15minPktsRateTr

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289706: fltTcaCoppLacpAllow1hPktsRateTr

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289707: fltTcaCoppLacpAllow1dPktsRateTr

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289708: fltTcaCoppLacpAllow1wPktsRateTr

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289709: fltTcaCoppLacpAllow1moPktsRateTr

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289710: fltTcaCoppLacpAllow1qtrPktsRateTr

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289711: fltTcaCoppLacpAllow1yearPktsRateTr

Severity: variable

Explanation: This fault is caused by "LacpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289760: fltTcaCoppLacpDrop5minBytesLast

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289761: fltTcaCoppLacpDrop15minBytesLast

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289762: fltTcaCoppLacpDrop1hBytesLast

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289763: fltTcaCoppLacpDrop1dBytesLast

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289764: fltTcaCoppLacpDrop1wBytesLast

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289765: fltTcaCoppLacpDrop1moBytesLast

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289766: fltTcaCoppLacpDrop1qtrBytesLast

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289767: fltTcaCoppLacpDrop1yearBytesLast

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289776: fltTcaCoppLacpDrop5minBytesCum

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289777: fltTcaCoppLacpDrop15minBytesCum

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289778: fltTcaCoppLacpDrop1hBytesCum

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289779: fltTcaCoppLacpDrop1dBytesCum

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289780: fltTcaCoppLacpDrop1wBytesCum

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289781: fltTcaCoppLacpDrop1moBytesCum

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289782: fltTcaCoppLacpDrop1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289783: fltTcaCoppLacpDrop1yearBytesCum

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289784: fltTcaCoppLacpDrop5minBytesPer

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289785: fltTcaCoppLacpDrop15minBytesPer

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289786: fltTcaCoppLacpDrop1hBytesPer

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289787: fltTcaCoppLacpDrop1dBytesPer

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289788: fltTcaCoppLacpDrop1wBytesPer

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289789: fltTcaCoppLacpDrop1moBytesPer

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289790: fltTcaCoppLacpDrop1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289791: fltTcaCoppLacpDrop1yearBytesPer

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289792: fltTcaCoppLacpDrop5minBytesMin

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289793: fltTcaCoppLacpDrop15minBytesMin

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289794: fltTcaCoppLacpDrop1hBytesMin

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289795: fltTcaCoppLacpDrop1dBytesMin

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289796: fltTcaCoppLacpDrop1wBytesMin

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289797: fltTcaCoppLacpDrop1moBytesMin

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289798: fltTcaCoppLacpDrop1qtrBytesMin

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289799: fltTcaCoppLacpDrop1yearBytesMin

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2898: fltDhcpRelayAddrDhcpCfgCtrl

Severity: warning

Explanation: This fault is caused by a hardware programming failure

Recommended Action: The system will periodically retry to program the hardware. If the failure is due to lack of hardware resources, free up resources by removing or simplifying existing configuration. One of the reasons for lack of hardware resources is exhaustion of VLANs in ToR. These hardware resources can be examined by looking at capacity dashboard under OPERATIONS tab. Please check entry against the number of VLANs in output of command show vlan summary issued at node where fault is generated to check whether it exceeds above advertised node capacity.

F289800: fltTcaCoppLacpDrop5minBytesMax

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289801: fltTcaCoppLacpDrop15minBytesMax

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289802: fltTcaCoppLacpDrop1hBytesMax

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289803: fltTcaCoppLacpDrop1dBytesMax

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289804: fltTcaCoppLacpDrop1wBytesMax

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289805: fltTcaCoppLacpDrop1moBytesMax

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289806: fltTcaCoppLacpDrop1qtrBytesMax

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289807: fltTcaCoppLacpDrop1yearBytesMax

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289808: fltTcaCoppLacpDrop5minBytesAvg

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289809: fltTcaCoppLacpDrop15minBytesAvg

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289810: fltTcaCoppLacpDrop1hBytesAvg

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289811: fltTcaCoppLacpDrop1dBytesAvg

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289812: fltTcaCoppLacpDrop1wBytesAvg

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289813: fltTcaCoppLacpDrop1moBytesAvg

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289814: fltTcaCoppLacpDrop1qtrBytesAvg

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289815: fltTcaCoppLacpDrop1yearBytesAvg

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289840: fltTcaCoppLacpDrop5minBytesTr

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289841: fltTcaCoppLacpDrop15minBytesTr

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289842: fltTcaCoppLacpDrop1hBytesTr

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289843: fltTcaCoppLacpDrop1dBytesTr

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289844: fltTcaCoppLacpDrop1wBytesTr

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289845: fltTcaCoppLacpDrop1moBytesTr

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289846: fltTcaCoppLacpDrop1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289847: fltTcaCoppLacpDrop1yearBytesTr

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289848: fltTcaCoppLacpDrop5minBytesRate

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289849: fltTcaCoppLacpDrop15minBytesRate

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289850: fltTcaCoppLacpDrop1hBytesRate

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289851: fltTcaCoppLacpDrop1dBytesRate

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289852: fltTcaCoppLacpDrop1wBytesRate

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289853: fltTcaCoppLacpDrop1moBytesRate

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289854: fltTcaCoppLacpDrop1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289855: fltTcaCoppLacpDrop1yearBytesRate

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2899: fltDbgacRsToAbsEpgForEpgToEpgResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F289928: fltTcaCoppLacpDrop5minBytesRateLast

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289929: fltTcaCoppLacpDrop15minBytesRateLast

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289930: fltTcaCoppLacpDrop1hBytesRateLast

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289931: fltTcaCoppLacpDrop1dBytesRateLast

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289932: fltTcaCoppLacpDrop1wBytesRateLast

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289933: fltTcaCoppLacpDrop1moBytesRateLast

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289934: fltTcaCoppLacpDrop1qtrBytesRateLast

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289935: fltTcaCoppLacpDrop1yearBytesRateLast

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289936: fltTcaCoppLacpDrop5minBytesRateMin

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289937: fltTcaCoppLacpDrop15minBytesRateMin

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289938: fltTcaCoppLacpDrop1hBytesRateMin

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289939: fltTcaCoppLacpDrop1dBytesRateMin

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289940: fltTcaCoppLacpDrop1wBytesRateMin

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289941: fltTcaCoppLacpDrop1moBytesRateMin

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289942: fltTcaCoppLacpDrop1qtrBytesRateMin

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289943: fltTcaCoppLacpDrop1yearBytesRateMin

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289944: fltTcaCoppLacpDrop5minBytesRateMax

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289945: fltTcaCoppLacpDrop15minBytesRateMax

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289946: fltTcaCoppLacpDrop1hBytesRateMax

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289947: fltTcaCoppLacpDrop1dBytesRateMax

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289948: fltTcaCoppLacpDrop1wBytesRateMax

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289949: fltTcaCoppLacpDrop1moBytesRateMax

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289950: fltTcaCoppLacpDrop1qtrBytesRateMax

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289951: fltTcaCoppLacpDrop1yearBytesRateMax

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289952: fltTcaCoppLacpDrop5minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289953: fltTcaCoppLacpDrop15minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289954: fltTcaCoppLacpDrop1hBytesRateAvg

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289955: fltTcaCoppLacpDrop1dBytesRateAvg

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289956: fltTcaCoppLacpDrop1wBytesRateAvg

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289957: fltTcaCoppLacpDrop1moBytesRateAvg

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289958: fltTcaCoppLacpDrop1qtrBytesRateAvg

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289959: fltTcaCoppLacpDrop1yearBytesRateAvg

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289992: fltTcaCoppLacpDrop5minBytesRateTr

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289993: fltTcaCoppLacpDrop15minBytesRateTr

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289994: fltTcaCoppLacpDrop1hBytesRateTr

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289995: fltTcaCoppLacpDrop1dBytesRateTr

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289996: fltTcaCoppLacpDrop1wBytesRateTr

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289997: fltTcaCoppLacpDrop1moBytesRateTr

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289998: fltTcaCoppLacpDrop1qtrBytesRateTr

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F289999: fltTcaCoppLacpDrop1yearBytesRateTr

Severity: variable

Explanation: This fault is caused by "LacpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2900: fltOrchsRsSvcsIpToIpPoolRefResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F290048: fltTcaCoppLacpDrop5minPktsLast

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290049: fltTcaCoppLacpDrop15minPktsLast

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290050: fltTcaCoppLacpDrop1hPktsLast

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290051: fltTcaCoppLacpDrop1dPktsLast

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290052: fltTcaCoppLacpDrop1wPktsLast

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290053: fltTcaCoppLacpDrop1moPktsLast

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290054: fltTcaCoppLacpDrop1qtrPktsLast

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290055: fltTcaCoppLacpDrop1yearPktsLast

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290064: fltTcaCoppLacpDrop5minPktsCum

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290065: fltTcaCoppLacpDrop15minPktsCum

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290066: fltTcaCoppLacpDrop1hPktsCum

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290067: fltTcaCoppLacpDrop1dPktsCum

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290068: fltTcaCoppLacpDrop1wPktsCum

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290069: fltTcaCoppLacpDrop1moPktsCum

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290070: fltTcaCoppLacpDrop1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290071: fltTcaCoppLacpDrop1yearPktsCum

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290072: fltTcaCoppLacpDrop5minPktsPer

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290073: fltTcaCoppLacpDrop15minPktsPer

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290074: fltTcaCoppLacpDrop1hPktsPer

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290075: fltTcaCoppLacpDrop1dPktsPer

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290076: fltTcaCoppLacpDrop1wPktsPer

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290077: fltTcaCoppLacpDrop1moPktsPer

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290078: fltTcaCoppLacpDrop1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290079: fltTcaCoppLacpDrop1yearPktsPer

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290080: fltTcaCoppLacpDrop5minPktsMin

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290081: fltTcaCoppLacpDrop15minPktsMin

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290082: fltTcaCoppLacpDrop1hPktsMin

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290083: fltTcaCoppLacpDrop1dPktsMin

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290084: fltTcaCoppLacpDrop1wPktsMin

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290085: fltTcaCoppLacpDrop1moPktsMin

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290086: fltTcaCoppLacpDrop1qtrPktsMin

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290087: fltTcaCoppLacpDrop1yearPktsMin

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290088: fltTcaCoppLacpDrop5minPktsMax

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290089: fltTcaCoppLacpDrop15minPktsMax

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290090: fltTcaCoppLacpDrop1hPktsMax

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290091: fltTcaCoppLacpDrop1dPktsMax

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290092: fltTcaCoppLacpDrop1wPktsMax

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290093: fltTcaCoppLacpDrop1moPktsMax

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290094: fltTcaCoppLacpDrop1qtrPktsMax

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290095: fltTcaCoppLacpDrop1yearPktsMax

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290096: fltTcaCoppLacpDrop5minPktsAvg

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290097: fltTcaCoppLacpDrop15minPktsAvg

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290098: fltTcaCoppLacpDrop1hPktsAvg

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290099: fltTcaCoppLacpDrop1dPktsAvg

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2901: fltInfraRsTopoctrlFastLinkFailoverInstPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F290100: fltTcaCoppLacpDrop1wPktsAvg

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290101: fltTcaCoppLacpDrop1moPktsAvg

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290102: fltTcaCoppLacpDrop1qtrPktsAvg

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290103: fltTcaCoppLacpDrop1yearPktsAvg

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290128: fltTcaCoppLacpDrop5minPktsTr

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290129: fltTcaCoppLacpDrop15minPktsTr

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290130: fltTcaCoppLacpDrop1hPktsTr

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290131: fltTcaCoppLacpDrop1dPktsTr

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290132: fltTcaCoppLacpDrop1wPktsTr

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290133: fltTcaCoppLacpDrop1moPktsTr

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290134: fltTcaCoppLacpDrop1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290135: fltTcaCoppLacpDrop1yearPktsTr

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290136: fltTcaCoppLacpDrop5minPktsRate

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290137: fltTcaCoppLacpDrop15minPktsRate

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290138: fltTcaCoppLacpDrop1hPktsRate

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290139: fltTcaCoppLacpDrop1dPktsRate

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290140: fltTcaCoppLacpDrop1wPktsRate

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290141: fltTcaCoppLacpDrop1moPktsRate

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290142: fltTcaCoppLacpDrop1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290143: fltTcaCoppLacpDrop1yearPktsRate

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290216: fltTcaCoppLacpDrop5minPktsRateLast

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290217: fltTcaCoppLacpDrop15minPktsRateLast

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290218: fltTcaCoppLacpDrop1hPktsRateLast

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290219: fltTcaCoppLacpDrop1dPktsRateLast

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290220: fltTcaCoppLacpDrop1wPktsRateLast

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290221: fltTcaCoppLacpDrop1moPktsRateLast

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290222: fltTcaCoppLacpDrop1qtrPktsRateLast

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290223: fltTcaCoppLacpDrop1yearPktsRateLast

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290224: fltTcaCoppLacpDrop5minPktsRateMin

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290225: fltTcaCoppLacpDrop15minPktsRateMin

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290226: fltTcaCoppLacpDrop1hPktsRateMin

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290227: fltTcaCoppLacpDrop1dPktsRateMin

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290228: fltTcaCoppLacpDrop1wPktsRateMin

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290229: fltTcaCoppLacpDrop1moPktsRateMin

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290230: fltTcaCoppLacpDrop1qtrPktsRateMin

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290231: fltTcaCoppLacpDrop1yearPktsRateMin

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290232: fltTcaCoppLacpDrop5minPktsRateMax

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290233: fltTcaCoppLacpDrop15minPktsRateMax

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290234: fltTcaCoppLacpDrop1hPktsRateMax

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290235: fltTcaCoppLacpDrop1dPktsRateMax

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290236: fltTcaCoppLacpDrop1wPktsRateMax

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290237: fltTcaCoppLacpDrop1moPktsRateMax

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290238: fltTcaCoppLacpDrop1qtrPktsRateMax

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290239: fltTcaCoppLacpDrop1yearPktsRateMax

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290240: fltTcaCoppLacpDrop5minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290241: fltTcaCoppLacpDrop15minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290242: fltTcaCoppLacpDrop1hPktsRateAvg

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290243: fltTcaCoppLacpDrop1dPktsRateAvg

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290244: fltTcaCoppLacpDrop1wPktsRateAvg

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290245: fltTcaCoppLacpDrop1moPktsRateAvg

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290246: fltTcaCoppLacpDrop1qtrPktsRateAvg

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290247: fltTcaCoppLacpDrop1yearPktsRateAvg

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290280: fltTcaCoppLacpDrop5minPktsRateTr

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290281: fltTcaCoppLacpDrop15minPktsRateTr

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290282: fltTcaCoppLacpDrop1hPktsRateTr

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290283: fltTcaCoppLacpDrop1dPktsRateTr

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290284: fltTcaCoppLacpDrop1wPktsRateTr

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290285: fltTcaCoppLacpDrop1moPktsRateTr

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290286: fltTcaCoppLacpDrop1qtrPktsRateTr

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290287: fltTcaCoppLacpDrop1yearPktsRateTr

Severity: variable

Explanation: This fault is caused by "LacpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LacpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2903: fltQinqCktEpQinQvlanCustomFault

Severity: warning

Explanation: This fault occurs when a QinQ EPG is deployed on an unsupported platform TOR

Recommended Action: To recover from this fault, take the following actions

1. Delete QinQ EPG deployment on the TOR

2. If the above action did not resolve the issue, generate the tech-support file and contact Cisco TAC.

F290336: fltTcaCoppLldpAllow5minBytesLast

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290337: fltTcaCoppLldpAllow15minBytesLast

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290338: fltTcaCoppLldpAllow1hBytesLast

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290339: fltTcaCoppLldpAllow1dBytesLast

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290340: fltTcaCoppLldpAllow1wBytesLast

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290341: fltTcaCoppLldpAllow1moBytesLast

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290342: fltTcaCoppLldpAllow1qtrBytesLast

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290343: fltTcaCoppLldpAllow1yearBytesLast

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290352: fltTcaCoppLldpAllow5minBytesCum

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290353: fltTcaCoppLldpAllow15minBytesCum

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290354: fltTcaCoppLldpAllow1hBytesCum

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290355: fltTcaCoppLldpAllow1dBytesCum

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290356: fltTcaCoppLldpAllow1wBytesCum

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290357: fltTcaCoppLldpAllow1moBytesCum

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290358: fltTcaCoppLldpAllow1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290359: fltTcaCoppLldpAllow1yearBytesCum

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290360: fltTcaCoppLldpAllow5minBytesPer

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290361: fltTcaCoppLldpAllow15minBytesPer

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290362: fltTcaCoppLldpAllow1hBytesPer

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290363: fltTcaCoppLldpAllow1dBytesPer

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290364: fltTcaCoppLldpAllow1wBytesPer

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290365: fltTcaCoppLldpAllow1moBytesPer

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290366: fltTcaCoppLldpAllow1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290367: fltTcaCoppLldpAllow1yearBytesPer

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290368: fltTcaCoppLldpAllow5minBytesMin

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290369: fltTcaCoppLldpAllow15minBytesMin

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290370: fltTcaCoppLldpAllow1hBytesMin

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290371: fltTcaCoppLldpAllow1dBytesMin

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290372: fltTcaCoppLldpAllow1wBytesMin

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290373: fltTcaCoppLldpAllow1moBytesMin

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290374: fltTcaCoppLldpAllow1qtrBytesMin

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290375: fltTcaCoppLldpAllow1yearBytesMin

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290376: fltTcaCoppLldpAllow5minBytesMax

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290377: fltTcaCoppLldpAllow15minBytesMax

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290378: fltTcaCoppLldpAllow1hBytesMax

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290379: fltTcaCoppLldpAllow1dBytesMax

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290380: fltTcaCoppLldpAllow1wBytesMax

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290381: fltTcaCoppLldpAllow1moBytesMax

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290382: fltTcaCoppLldpAllow1qtrBytesMax

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290383: fltTcaCoppLldpAllow1yearBytesMax

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290384: fltTcaCoppLldpAllow5minBytesAvg

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290385: fltTcaCoppLldpAllow15minBytesAvg

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290386: fltTcaCoppLldpAllow1hBytesAvg

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290387: fltTcaCoppLldpAllow1dBytesAvg

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290388: fltTcaCoppLldpAllow1wBytesAvg

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290389: fltTcaCoppLldpAllow1moBytesAvg

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290390: fltTcaCoppLldpAllow1qtrBytesAvg

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290391: fltTcaCoppLldpAllow1yearBytesAvg

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290416: fltTcaCoppLldpAllow5minBytesTr

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290417: fltTcaCoppLldpAllow15minBytesTr

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290418: fltTcaCoppLldpAllow1hBytesTr

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290419: fltTcaCoppLldpAllow1dBytesTr

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290420: fltTcaCoppLldpAllow1wBytesTr

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290421: fltTcaCoppLldpAllow1moBytesTr

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290422: fltTcaCoppLldpAllow1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290423: fltTcaCoppLldpAllow1yearBytesTr

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290424: fltTcaCoppLldpAllow5minBytesRate

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290425: fltTcaCoppLldpAllow15minBytesRate

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290426: fltTcaCoppLldpAllow1hBytesRate

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290427: fltTcaCoppLldpAllow1dBytesRate

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290428: fltTcaCoppLldpAllow1wBytesRate

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290429: fltTcaCoppLldpAllow1moBytesRate

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290430: fltTcaCoppLldpAllow1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290431: fltTcaCoppLldpAllow1yearBytesRate

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290504: fltTcaCoppLldpAllow5minBytesRateLast

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290505: fltTcaCoppLldpAllow15minBytesRateLast

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290506: fltTcaCoppLldpAllow1hBytesRateLast

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290507: fltTcaCoppLldpAllow1dBytesRateLast

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290508: fltTcaCoppLldpAllow1wBytesRateLast

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290509: fltTcaCoppLldpAllow1moBytesRateLast

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290510: fltTcaCoppLldpAllow1qtrBytesRateLast

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290511: fltTcaCoppLldpAllow1yearBytesRateLast

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290512: fltTcaCoppLldpAllow5minBytesRateMin

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290513: fltTcaCoppLldpAllow15minBytesRateMin

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290514: fltTcaCoppLldpAllow1hBytesRateMin

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290515: fltTcaCoppLldpAllow1dBytesRateMin

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290516: fltTcaCoppLldpAllow1wBytesRateMin

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290517: fltTcaCoppLldpAllow1moBytesRateMin

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290518: fltTcaCoppLldpAllow1qtrBytesRateMin

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290519: fltTcaCoppLldpAllow1yearBytesRateMin

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290520: fltTcaCoppLldpAllow5minBytesRateMax

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290521: fltTcaCoppLldpAllow15minBytesRateMax

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290522: fltTcaCoppLldpAllow1hBytesRateMax

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290523: fltTcaCoppLldpAllow1dBytesRateMax

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290524: fltTcaCoppLldpAllow1wBytesRateMax

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290525: fltTcaCoppLldpAllow1moBytesRateMax

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290526: fltTcaCoppLldpAllow1qtrBytesRateMax

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290527: fltTcaCoppLldpAllow1yearBytesRateMax

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290528: fltTcaCoppLldpAllow5minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290529: fltTcaCoppLldpAllow15minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290530: fltTcaCoppLldpAllow1hBytesRateAvg

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290531: fltTcaCoppLldpAllow1dBytesRateAvg

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290532: fltTcaCoppLldpAllow1wBytesRateAvg

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290533: fltTcaCoppLldpAllow1moBytesRateAvg

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290534: fltTcaCoppLldpAllow1qtrBytesRateAvg

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290535: fltTcaCoppLldpAllow1yearBytesRateAvg

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290568: fltTcaCoppLldpAllow5minBytesRateTr

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290569: fltTcaCoppLldpAllow15minBytesRateTr

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290570: fltTcaCoppLldpAllow1hBytesRateTr

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290571: fltTcaCoppLldpAllow1dBytesRateTr

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290572: fltTcaCoppLldpAllow1wBytesRateTr

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290573: fltTcaCoppLldpAllow1moBytesRateTr

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290574: fltTcaCoppLldpAllow1qtrBytesRateTr

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290575: fltTcaCoppLldpAllow1yearBytesRateTr

Severity: variable

Explanation: This fault is caused by "LldpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290624: fltTcaCoppLldpAllow5minPktsLast

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290625: fltTcaCoppLldpAllow15minPktsLast

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290626: fltTcaCoppLldpAllow1hPktsLast

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290627: fltTcaCoppLldpAllow1dPktsLast

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290628: fltTcaCoppLldpAllow1wPktsLast

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290629: fltTcaCoppLldpAllow1moPktsLast

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290630: fltTcaCoppLldpAllow1qtrPktsLast

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290631: fltTcaCoppLldpAllow1yearPktsLast

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290640: fltTcaCoppLldpAllow5minPktsCum

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290641: fltTcaCoppLldpAllow15minPktsCum

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290642: fltTcaCoppLldpAllow1hPktsCum

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290643: fltTcaCoppLldpAllow1dPktsCum

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290644: fltTcaCoppLldpAllow1wPktsCum

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290645: fltTcaCoppLldpAllow1moPktsCum

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290646: fltTcaCoppLldpAllow1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290647: fltTcaCoppLldpAllow1yearPktsCum

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290648: fltTcaCoppLldpAllow5minPktsPer

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290649: fltTcaCoppLldpAllow15minPktsPer

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290650: fltTcaCoppLldpAllow1hPktsPer

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290651: fltTcaCoppLldpAllow1dPktsPer

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290652: fltTcaCoppLldpAllow1wPktsPer

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290653: fltTcaCoppLldpAllow1moPktsPer

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290654: fltTcaCoppLldpAllow1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290655: fltTcaCoppLldpAllow1yearPktsPer

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290656: fltTcaCoppLldpAllow5minPktsMin

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290657: fltTcaCoppLldpAllow15minPktsMin

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290658: fltTcaCoppLldpAllow1hPktsMin

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290659: fltTcaCoppLldpAllow1dPktsMin

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290660: fltTcaCoppLldpAllow1wPktsMin

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290661: fltTcaCoppLldpAllow1moPktsMin

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290662: fltTcaCoppLldpAllow1qtrPktsMin

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290663: fltTcaCoppLldpAllow1yearPktsMin

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290664: fltTcaCoppLldpAllow5minPktsMax

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290665: fltTcaCoppLldpAllow15minPktsMax

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290666: fltTcaCoppLldpAllow1hPktsMax

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290667: fltTcaCoppLldpAllow1dPktsMax

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290668: fltTcaCoppLldpAllow1wPktsMax

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290669: fltTcaCoppLldpAllow1moPktsMax

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290670: fltTcaCoppLldpAllow1qtrPktsMax

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290671: fltTcaCoppLldpAllow1yearPktsMax

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290672: fltTcaCoppLldpAllow5minPktsAvg

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290673: fltTcaCoppLldpAllow15minPktsAvg

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290674: fltTcaCoppLldpAllow1hPktsAvg

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290675: fltTcaCoppLldpAllow1dPktsAvg

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290676: fltTcaCoppLldpAllow1wPktsAvg

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290677: fltTcaCoppLldpAllow1moPktsAvg

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290678: fltTcaCoppLldpAllow1qtrPktsAvg

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290679: fltTcaCoppLldpAllow1yearPktsAvg

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290704: fltTcaCoppLldpAllow5minPktsTr

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290705: fltTcaCoppLldpAllow15minPktsTr

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290706: fltTcaCoppLldpAllow1hPktsTr

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290707: fltTcaCoppLldpAllow1dPktsTr

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290708: fltTcaCoppLldpAllow1wPktsTr

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290709: fltTcaCoppLldpAllow1moPktsTr

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290710: fltTcaCoppLldpAllow1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290711: fltTcaCoppLldpAllow1yearPktsTr

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290712: fltTcaCoppLldpAllow5minPktsRate

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290713: fltTcaCoppLldpAllow15minPktsRate

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290714: fltTcaCoppLldpAllow1hPktsRate

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290715: fltTcaCoppLldpAllow1dPktsRate

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290716: fltTcaCoppLldpAllow1wPktsRate

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290717: fltTcaCoppLldpAllow1moPktsRate

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290718: fltTcaCoppLldpAllow1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290719: fltTcaCoppLldpAllow1yearPktsRate

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290792: fltTcaCoppLldpAllow5minPktsRateLast

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290793: fltTcaCoppLldpAllow15minPktsRateLast

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290794: fltTcaCoppLldpAllow1hPktsRateLast

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290795: fltTcaCoppLldpAllow1dPktsRateLast

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290796: fltTcaCoppLldpAllow1wPktsRateLast

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290797: fltTcaCoppLldpAllow1moPktsRateLast

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290798: fltTcaCoppLldpAllow1qtrPktsRateLast

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290799: fltTcaCoppLldpAllow1yearPktsRateLast

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290800: fltTcaCoppLldpAllow5minPktsRateMin

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290801: fltTcaCoppLldpAllow15minPktsRateMin

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290802: fltTcaCoppLldpAllow1hPktsRateMin

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290803: fltTcaCoppLldpAllow1dPktsRateMin

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290804: fltTcaCoppLldpAllow1wPktsRateMin

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290805: fltTcaCoppLldpAllow1moPktsRateMin

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290806: fltTcaCoppLldpAllow1qtrPktsRateMin

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290807: fltTcaCoppLldpAllow1yearPktsRateMin

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290808: fltTcaCoppLldpAllow5minPktsRateMax

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290809: fltTcaCoppLldpAllow15minPktsRateMax

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290810: fltTcaCoppLldpAllow1hPktsRateMax

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290811: fltTcaCoppLldpAllow1dPktsRateMax

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290812: fltTcaCoppLldpAllow1wPktsRateMax

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290813: fltTcaCoppLldpAllow1moPktsRateMax

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290814: fltTcaCoppLldpAllow1qtrPktsRateMax

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290815: fltTcaCoppLldpAllow1yearPktsRateMax

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290816: fltTcaCoppLldpAllow5minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290817: fltTcaCoppLldpAllow15minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290818: fltTcaCoppLldpAllow1hPktsRateAvg

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290819: fltTcaCoppLldpAllow1dPktsRateAvg

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290820: fltTcaCoppLldpAllow1wPktsRateAvg

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290821: fltTcaCoppLldpAllow1moPktsRateAvg

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290822: fltTcaCoppLldpAllow1qtrPktsRateAvg

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290823: fltTcaCoppLldpAllow1yearPktsRateAvg

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290856: fltTcaCoppLldpAllow5minPktsRateTr

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290857: fltTcaCoppLldpAllow15minPktsRateTr

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290858: fltTcaCoppLldpAllow1hPktsRateTr

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290859: fltTcaCoppLldpAllow1dPktsRateTr

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290860: fltTcaCoppLldpAllow1wPktsRateTr

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290861: fltTcaCoppLldpAllow1moPktsRateTr

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290862: fltTcaCoppLldpAllow1qtrPktsRateTr

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290863: fltTcaCoppLldpAllow1yearPktsRateTr

Severity: variable

Explanation: This fault is caused by "LldpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290912: fltTcaCoppLldpDrop5minBytesLast

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290913: fltTcaCoppLldpDrop15minBytesLast

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290914: fltTcaCoppLldpDrop1hBytesLast

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290915: fltTcaCoppLldpDrop1dBytesLast

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290916: fltTcaCoppLldpDrop1wBytesLast

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290917: fltTcaCoppLldpDrop1moBytesLast

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290918: fltTcaCoppLldpDrop1qtrBytesLast

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290919: fltTcaCoppLldpDrop1yearBytesLast

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290928: fltTcaCoppLldpDrop5minBytesCum

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290929: fltTcaCoppLldpDrop15minBytesCum

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290930: fltTcaCoppLldpDrop1hBytesCum

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290931: fltTcaCoppLldpDrop1dBytesCum

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290932: fltTcaCoppLldpDrop1wBytesCum

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290933: fltTcaCoppLldpDrop1moBytesCum

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290934: fltTcaCoppLldpDrop1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290935: fltTcaCoppLldpDrop1yearBytesCum

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290936: fltTcaCoppLldpDrop5minBytesPer

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290937: fltTcaCoppLldpDrop15minBytesPer

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290938: fltTcaCoppLldpDrop1hBytesPer

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290939: fltTcaCoppLldpDrop1dBytesPer

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290940: fltTcaCoppLldpDrop1wBytesPer

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290941: fltTcaCoppLldpDrop1moBytesPer

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290942: fltTcaCoppLldpDrop1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290943: fltTcaCoppLldpDrop1yearBytesPer

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290944: fltTcaCoppLldpDrop5minBytesMin

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290945: fltTcaCoppLldpDrop15minBytesMin

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290946: fltTcaCoppLldpDrop1hBytesMin

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290947: fltTcaCoppLldpDrop1dBytesMin

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290948: fltTcaCoppLldpDrop1wBytesMin

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290949: fltTcaCoppLldpDrop1moBytesMin

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290950: fltTcaCoppLldpDrop1qtrBytesMin

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290951: fltTcaCoppLldpDrop1yearBytesMin

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290952: fltTcaCoppLldpDrop5minBytesMax

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290953: fltTcaCoppLldpDrop15minBytesMax

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290954: fltTcaCoppLldpDrop1hBytesMax

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290955: fltTcaCoppLldpDrop1dBytesMax

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290956: fltTcaCoppLldpDrop1wBytesMax

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290957: fltTcaCoppLldpDrop1moBytesMax

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290958: fltTcaCoppLldpDrop1qtrBytesMax

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290959: fltTcaCoppLldpDrop1yearBytesMax

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290960: fltTcaCoppLldpDrop5minBytesAvg

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290961: fltTcaCoppLldpDrop15minBytesAvg

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290962: fltTcaCoppLldpDrop1hBytesAvg

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290963: fltTcaCoppLldpDrop1dBytesAvg

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290964: fltTcaCoppLldpDrop1wBytesAvg

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290965: fltTcaCoppLldpDrop1moBytesAvg

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290966: fltTcaCoppLldpDrop1qtrBytesAvg

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290967: fltTcaCoppLldpDrop1yearBytesAvg

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290992: fltTcaCoppLldpDrop5minBytesTr

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290993: fltTcaCoppLldpDrop15minBytesTr

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290994: fltTcaCoppLldpDrop1hBytesTr

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290995: fltTcaCoppLldpDrop1dBytesTr

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290996: fltTcaCoppLldpDrop1wBytesTr

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290997: fltTcaCoppLldpDrop1moBytesTr

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290998: fltTcaCoppLldpDrop1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F290999: fltTcaCoppLldpDrop1yearBytesTr

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291000: fltTcaCoppLldpDrop5minBytesRate

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291001: fltTcaCoppLldpDrop15minBytesRate

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291002: fltTcaCoppLldpDrop1hBytesRate

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291003: fltTcaCoppLldpDrop1dBytesRate

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291004: fltTcaCoppLldpDrop1wBytesRate

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291005: fltTcaCoppLldpDrop1moBytesRate

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291006: fltTcaCoppLldpDrop1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291007: fltTcaCoppLldpDrop1yearBytesRate

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291080: fltTcaCoppLldpDrop5minBytesRateLast

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291081: fltTcaCoppLldpDrop15minBytesRateLast

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291082: fltTcaCoppLldpDrop1hBytesRateLast

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291083: fltTcaCoppLldpDrop1dBytesRateLast

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291084: fltTcaCoppLldpDrop1wBytesRateLast

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291085: fltTcaCoppLldpDrop1moBytesRateLast

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291086: fltTcaCoppLldpDrop1qtrBytesRateLast

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291087: fltTcaCoppLldpDrop1yearBytesRateLast

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291088: fltTcaCoppLldpDrop5minBytesRateMin

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291089: fltTcaCoppLldpDrop15minBytesRateMin

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291090: fltTcaCoppLldpDrop1hBytesRateMin

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291091: fltTcaCoppLldpDrop1dBytesRateMin

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291092: fltTcaCoppLldpDrop1wBytesRateMin

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291093: fltTcaCoppLldpDrop1moBytesRateMin

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291094: fltTcaCoppLldpDrop1qtrBytesRateMin

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291095: fltTcaCoppLldpDrop1yearBytesRateMin

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291096: fltTcaCoppLldpDrop5minBytesRateMax

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291097: fltTcaCoppLldpDrop15minBytesRateMax

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291098: fltTcaCoppLldpDrop1hBytesRateMax

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291099: fltTcaCoppLldpDrop1dBytesRateMax

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2911: fltSvcredirHealthGrpOperStFailed

Severity: major

Explanation: This fault occurs when PBR health group goes down

Recommended Action: To recover from this fault, try the following actions

1. Health group becomes UP when all of its healthgrp dests are tracked as UP

F291100: fltTcaCoppLldpDrop1wBytesRateMax

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291101: fltTcaCoppLldpDrop1moBytesRateMax

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291102: fltTcaCoppLldpDrop1qtrBytesRateMax

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291103: fltTcaCoppLldpDrop1yearBytesRateMax

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291104: fltTcaCoppLldpDrop5minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291105: fltTcaCoppLldpDrop15minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291106: fltTcaCoppLldpDrop1hBytesRateAvg

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291107: fltTcaCoppLldpDrop1dBytesRateAvg

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291108: fltTcaCoppLldpDrop1wBytesRateAvg

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291109: fltTcaCoppLldpDrop1moBytesRateAvg

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291110: fltTcaCoppLldpDrop1qtrBytesRateAvg

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291111: fltTcaCoppLldpDrop1yearBytesRateAvg

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291144: fltTcaCoppLldpDrop5minBytesRateTr

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291145: fltTcaCoppLldpDrop15minBytesRateTr

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291146: fltTcaCoppLldpDrop1hBytesRateTr

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291147: fltTcaCoppLldpDrop1dBytesRateTr

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291148: fltTcaCoppLldpDrop1wBytesRateTr

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291149: fltTcaCoppLldpDrop1moBytesRateTr

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291150: fltTcaCoppLldpDrop1qtrBytesRateTr

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291151: fltTcaCoppLldpDrop1yearBytesRateTr

Severity: variable

Explanation: This fault is caused by "LldpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2912: fltCoppIfInstallationFailedTcamUnavailable

Severity: major

Explanation: This fault occurs when there is no space in the TCAM's SUP region.

Recommended Action: To recover from this fault, try the following actions

1. Delete any unused COPP protocol configuration on any port to make space int TCAM

F291200: fltTcaCoppLldpDrop5minPktsLast

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291201: fltTcaCoppLldpDrop15minPktsLast

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291202: fltTcaCoppLldpDrop1hPktsLast

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291203: fltTcaCoppLldpDrop1dPktsLast

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291204: fltTcaCoppLldpDrop1wPktsLast

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291205: fltTcaCoppLldpDrop1moPktsLast

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291206: fltTcaCoppLldpDrop1qtrPktsLast

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291207: fltTcaCoppLldpDrop1yearPktsLast

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291216: fltTcaCoppLldpDrop5minPktsCum

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291217: fltTcaCoppLldpDrop15minPktsCum

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291218: fltTcaCoppLldpDrop1hPktsCum

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291219: fltTcaCoppLldpDrop1dPktsCum

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291220: fltTcaCoppLldpDrop1wPktsCum

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291221: fltTcaCoppLldpDrop1moPktsCum

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291222: fltTcaCoppLldpDrop1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291223: fltTcaCoppLldpDrop1yearPktsCum

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291224: fltTcaCoppLldpDrop5minPktsPer

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291225: fltTcaCoppLldpDrop15minPktsPer

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291226: fltTcaCoppLldpDrop1hPktsPer

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291227: fltTcaCoppLldpDrop1dPktsPer

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291228: fltTcaCoppLldpDrop1wPktsPer

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291229: fltTcaCoppLldpDrop1moPktsPer

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291230: fltTcaCoppLldpDrop1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291231: fltTcaCoppLldpDrop1yearPktsPer

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291232: fltTcaCoppLldpDrop5minPktsMin

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291233: fltTcaCoppLldpDrop15minPktsMin

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291234: fltTcaCoppLldpDrop1hPktsMin

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291235: fltTcaCoppLldpDrop1dPktsMin

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291236: fltTcaCoppLldpDrop1wPktsMin

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291237: fltTcaCoppLldpDrop1moPktsMin

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291238: fltTcaCoppLldpDrop1qtrPktsMin

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291239: fltTcaCoppLldpDrop1yearPktsMin

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291240: fltTcaCoppLldpDrop5minPktsMax

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291241: fltTcaCoppLldpDrop15minPktsMax

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291242: fltTcaCoppLldpDrop1hPktsMax

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291243: fltTcaCoppLldpDrop1dPktsMax

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291244: fltTcaCoppLldpDrop1wPktsMax

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291245: fltTcaCoppLldpDrop1moPktsMax

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291246: fltTcaCoppLldpDrop1qtrPktsMax

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291247: fltTcaCoppLldpDrop1yearPktsMax

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291248: fltTcaCoppLldpDrop5minPktsAvg

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291249: fltTcaCoppLldpDrop15minPktsAvg

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291250: fltTcaCoppLldpDrop1hPktsAvg

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291251: fltTcaCoppLldpDrop1dPktsAvg

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291252: fltTcaCoppLldpDrop1wPktsAvg

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291253: fltTcaCoppLldpDrop1moPktsAvg

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291254: fltTcaCoppLldpDrop1qtrPktsAvg

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291255: fltTcaCoppLldpDrop1yearPktsAvg

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291280: fltTcaCoppLldpDrop5minPktsTr

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291281: fltTcaCoppLldpDrop15minPktsTr

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291282: fltTcaCoppLldpDrop1hPktsTr

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291283: fltTcaCoppLldpDrop1dPktsTr

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291284: fltTcaCoppLldpDrop1wPktsTr

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291285: fltTcaCoppLldpDrop1moPktsTr

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291286: fltTcaCoppLldpDrop1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291287: fltTcaCoppLldpDrop1yearPktsTr

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291288: fltTcaCoppLldpDrop5minPktsRate

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291289: fltTcaCoppLldpDrop15minPktsRate

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291290: fltTcaCoppLldpDrop1hPktsRate

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291291: fltTcaCoppLldpDrop1dPktsRate

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291292: fltTcaCoppLldpDrop1wPktsRate

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291293: fltTcaCoppLldpDrop1moPktsRate

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291294: fltTcaCoppLldpDrop1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291295: fltTcaCoppLldpDrop1yearPktsRate

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2913: fltCoppIfInstallationFailedIfAclLabelUnavailable

Severity: major

Explanation: This fault occurs when there is no more INTERFACE ACL LABELS.

Recommended Action: To recover from this fault, try the following actions

1. Delete any unused Per Interface Per Protocol COPP configuration on an interface or span sessions

F291368: fltTcaCoppLldpDrop5minPktsRateLast

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291369: fltTcaCoppLldpDrop15minPktsRateLast

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291370: fltTcaCoppLldpDrop1hPktsRateLast

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291371: fltTcaCoppLldpDrop1dPktsRateLast

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291372: fltTcaCoppLldpDrop1wPktsRateLast

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291373: fltTcaCoppLldpDrop1moPktsRateLast

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291374: fltTcaCoppLldpDrop1qtrPktsRateLast

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291375: fltTcaCoppLldpDrop1yearPktsRateLast

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291376: fltTcaCoppLldpDrop5minPktsRateMin

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291377: fltTcaCoppLldpDrop15minPktsRateMin

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291378: fltTcaCoppLldpDrop1hPktsRateMin

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291379: fltTcaCoppLldpDrop1dPktsRateMin

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291380: fltTcaCoppLldpDrop1wPktsRateMin

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291381: fltTcaCoppLldpDrop1moPktsRateMin

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291382: fltTcaCoppLldpDrop1qtrPktsRateMin

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291383: fltTcaCoppLldpDrop1yearPktsRateMin

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291384: fltTcaCoppLldpDrop5minPktsRateMax

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291385: fltTcaCoppLldpDrop15minPktsRateMax

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291386: fltTcaCoppLldpDrop1hPktsRateMax

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291387: fltTcaCoppLldpDrop1dPktsRateMax

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291388: fltTcaCoppLldpDrop1wPktsRateMax

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291389: fltTcaCoppLldpDrop1moPktsRateMax

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291390: fltTcaCoppLldpDrop1qtrPktsRateMax

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291391: fltTcaCoppLldpDrop1yearPktsRateMax

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291392: fltTcaCoppLldpDrop5minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291393: fltTcaCoppLldpDrop15minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291394: fltTcaCoppLldpDrop1hPktsRateAvg

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291395: fltTcaCoppLldpDrop1dPktsRateAvg

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291396: fltTcaCoppLldpDrop1wPktsRateAvg

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291397: fltTcaCoppLldpDrop1moPktsRateAvg

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291398: fltTcaCoppLldpDrop1qtrPktsRateAvg

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291399: fltTcaCoppLldpDrop1yearPktsRateAvg

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2914: fltCoppIfInstallationFailedHwErr

Severity: major

Explanation: This fault occurs due to errors in hardware installation.

Recommended Action: None set.

F291432: fltTcaCoppLldpDrop5minPktsRateTr

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291433: fltTcaCoppLldpDrop15minPktsRateTr

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291434: fltTcaCoppLldpDrop1hPktsRateTr

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291435: fltTcaCoppLldpDrop1dPktsRateTr

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291436: fltTcaCoppLldpDrop1wPktsRateTr

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291437: fltTcaCoppLldpDrop1moPktsRateTr

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291438: fltTcaCoppLldpDrop1qtrPktsRateTr

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291439: fltTcaCoppLldpDrop1yearPktsRateTr

Severity: variable

Explanation: This fault is caused by "LldpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LldpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291488: fltTcaCoppOspfAllow5minBytesLast

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291489: fltTcaCoppOspfAllow15minBytesLast

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291490: fltTcaCoppOspfAllow1hBytesLast

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291491: fltTcaCoppOspfAllow1dBytesLast

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291492: fltTcaCoppOspfAllow1wBytesLast

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291493: fltTcaCoppOspfAllow1moBytesLast

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291494: fltTcaCoppOspfAllow1qtrBytesLast

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291495: fltTcaCoppOspfAllow1yearBytesLast

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2915: fltCoppIfInstallationFailedInvalidRateBurst

Severity: major

Explanation: This fault occurs when tha values of rate/burst is incorrect.

Recommended Action: To recover from this fault, try the following actions

1. Modify policer. Minimum rate/burst = 0

F291504: fltTcaCoppOspfAllow5minBytesCum

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291505: fltTcaCoppOspfAllow15minBytesCum

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291506: fltTcaCoppOspfAllow1hBytesCum

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291507: fltTcaCoppOspfAllow1dBytesCum

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291508: fltTcaCoppOspfAllow1wBytesCum

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291509: fltTcaCoppOspfAllow1moBytesCum

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291510: fltTcaCoppOspfAllow1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291511: fltTcaCoppOspfAllow1yearBytesCum

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291512: fltTcaCoppOspfAllow5minBytesPer

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291513: fltTcaCoppOspfAllow15minBytesPer

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291514: fltTcaCoppOspfAllow1hBytesPer

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291515: fltTcaCoppOspfAllow1dBytesPer

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291516: fltTcaCoppOspfAllow1wBytesPer

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291517: fltTcaCoppOspfAllow1moBytesPer

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291518: fltTcaCoppOspfAllow1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291519: fltTcaCoppOspfAllow1yearBytesPer

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291520: fltTcaCoppOspfAllow5minBytesMin

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291521: fltTcaCoppOspfAllow15minBytesMin

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291522: fltTcaCoppOspfAllow1hBytesMin

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291523: fltTcaCoppOspfAllow1dBytesMin

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291524: fltTcaCoppOspfAllow1wBytesMin

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291525: fltTcaCoppOspfAllow1moBytesMin

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291526: fltTcaCoppOspfAllow1qtrBytesMin

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291527: fltTcaCoppOspfAllow1yearBytesMin

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291528: fltTcaCoppOspfAllow5minBytesMax

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291529: fltTcaCoppOspfAllow15minBytesMax

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291530: fltTcaCoppOspfAllow1hBytesMax

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291531: fltTcaCoppOspfAllow1dBytesMax

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291532: fltTcaCoppOspfAllow1wBytesMax

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291533: fltTcaCoppOspfAllow1moBytesMax

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291534: fltTcaCoppOspfAllow1qtrBytesMax

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291535: fltTcaCoppOspfAllow1yearBytesMax

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291536: fltTcaCoppOspfAllow5minBytesAvg

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291537: fltTcaCoppOspfAllow15minBytesAvg

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291538: fltTcaCoppOspfAllow1hBytesAvg

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291539: fltTcaCoppOspfAllow1dBytesAvg

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291540: fltTcaCoppOspfAllow1wBytesAvg

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291541: fltTcaCoppOspfAllow1moBytesAvg

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291542: fltTcaCoppOspfAllow1qtrBytesAvg

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291543: fltTcaCoppOspfAllow1yearBytesAvg

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291568: fltTcaCoppOspfAllow5minBytesTr

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291569: fltTcaCoppOspfAllow15minBytesTr

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291570: fltTcaCoppOspfAllow1hBytesTr

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291571: fltTcaCoppOspfAllow1dBytesTr

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291572: fltTcaCoppOspfAllow1wBytesTr

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291573: fltTcaCoppOspfAllow1moBytesTr

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291574: fltTcaCoppOspfAllow1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291575: fltTcaCoppOspfAllow1yearBytesTr

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291576: fltTcaCoppOspfAllow5minBytesRate

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291577: fltTcaCoppOspfAllow15minBytesRate

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291578: fltTcaCoppOspfAllow1hBytesRate

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291579: fltTcaCoppOspfAllow1dBytesRate

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291580: fltTcaCoppOspfAllow1wBytesRate

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291581: fltTcaCoppOspfAllow1moBytesRate

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291582: fltTcaCoppOspfAllow1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291583: fltTcaCoppOspfAllow1yearBytesRate

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2916: fltCoppIfInstallationFailedPolicerUnvailable

Severity: major

Explanation: This fault occurs when there is no more Policers free.

Recommended Action: To recover from this fault, try the following actions

1. Delete any unused Per Interface Per Protocol COPP configuration on an interface

F291656: fltTcaCoppOspfAllow5minBytesRateLast

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291657: fltTcaCoppOspfAllow15minBytesRateLast

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291658: fltTcaCoppOspfAllow1hBytesRateLast

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291659: fltTcaCoppOspfAllow1dBytesRateLast

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291660: fltTcaCoppOspfAllow1wBytesRateLast

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291661: fltTcaCoppOspfAllow1moBytesRateLast

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291662: fltTcaCoppOspfAllow1qtrBytesRateLast

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291663: fltTcaCoppOspfAllow1yearBytesRateLast

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291664: fltTcaCoppOspfAllow5minBytesRateMin

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291665: fltTcaCoppOspfAllow15minBytesRateMin

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291666: fltTcaCoppOspfAllow1hBytesRateMin

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291667: fltTcaCoppOspfAllow1dBytesRateMin

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291668: fltTcaCoppOspfAllow1wBytesRateMin

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291669: fltTcaCoppOspfAllow1moBytesRateMin

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291670: fltTcaCoppOspfAllow1qtrBytesRateMin

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291671: fltTcaCoppOspfAllow1yearBytesRateMin

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291672: fltTcaCoppOspfAllow5minBytesRateMax

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291673: fltTcaCoppOspfAllow15minBytesRateMax

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291674: fltTcaCoppOspfAllow1hBytesRateMax

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291675: fltTcaCoppOspfAllow1dBytesRateMax

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291676: fltTcaCoppOspfAllow1wBytesRateMax

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291677: fltTcaCoppOspfAllow1moBytesRateMax

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291678: fltTcaCoppOspfAllow1qtrBytesRateMax

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291679: fltTcaCoppOspfAllow1yearBytesRateMax

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291680: fltTcaCoppOspfAllow5minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291681: fltTcaCoppOspfAllow15minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291682: fltTcaCoppOspfAllow1hBytesRateAvg

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291683: fltTcaCoppOspfAllow1dBytesRateAvg

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291684: fltTcaCoppOspfAllow1wBytesRateAvg

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291685: fltTcaCoppOspfAllow1moBytesRateAvg

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291686: fltTcaCoppOspfAllow1qtrBytesRateAvg

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291687: fltTcaCoppOspfAllow1yearBytesRateAvg

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291720: fltTcaCoppOspfAllow5minBytesRateTr

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291721: fltTcaCoppOspfAllow15minBytesRateTr

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291722: fltTcaCoppOspfAllow1hBytesRateTr

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291723: fltTcaCoppOspfAllow1dBytesRateTr

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291724: fltTcaCoppOspfAllow1wBytesRateTr

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291725: fltTcaCoppOspfAllow1moBytesRateTr

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291726: fltTcaCoppOspfAllow1qtrBytesRateTr

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291727: fltTcaCoppOspfAllow1yearBytesRateTr

Severity: variable

Explanation: This fault is caused by "OspfAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291776: fltTcaCoppOspfAllow5minPktsLast

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291777: fltTcaCoppOspfAllow15minPktsLast

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291778: fltTcaCoppOspfAllow1hPktsLast

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291779: fltTcaCoppOspfAllow1dPktsLast

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291780: fltTcaCoppOspfAllow1wPktsLast

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291781: fltTcaCoppOspfAllow1moPktsLast

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291782: fltTcaCoppOspfAllow1qtrPktsLast

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291783: fltTcaCoppOspfAllow1yearPktsLast

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291792: fltTcaCoppOspfAllow5minPktsCum

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291793: fltTcaCoppOspfAllow15minPktsCum

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291794: fltTcaCoppOspfAllow1hPktsCum

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291795: fltTcaCoppOspfAllow1dPktsCum

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291796: fltTcaCoppOspfAllow1wPktsCum

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291797: fltTcaCoppOspfAllow1moPktsCum

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291798: fltTcaCoppOspfAllow1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291799: fltTcaCoppOspfAllow1yearPktsCum

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291800: fltTcaCoppOspfAllow5minPktsPer

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291801: fltTcaCoppOspfAllow15minPktsPer

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291802: fltTcaCoppOspfAllow1hPktsPer

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291803: fltTcaCoppOspfAllow1dPktsPer

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291804: fltTcaCoppOspfAllow1wPktsPer

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291805: fltTcaCoppOspfAllow1moPktsPer

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291806: fltTcaCoppOspfAllow1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291807: fltTcaCoppOspfAllow1yearPktsPer

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291808: fltTcaCoppOspfAllow5minPktsMin

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291809: fltTcaCoppOspfAllow15minPktsMin

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291810: fltTcaCoppOspfAllow1hPktsMin

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291811: fltTcaCoppOspfAllow1dPktsMin

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291812: fltTcaCoppOspfAllow1wPktsMin

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291813: fltTcaCoppOspfAllow1moPktsMin

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291814: fltTcaCoppOspfAllow1qtrPktsMin

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291815: fltTcaCoppOspfAllow1yearPktsMin

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291816: fltTcaCoppOspfAllow5minPktsMax

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291817: fltTcaCoppOspfAllow15minPktsMax

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291818: fltTcaCoppOspfAllow1hPktsMax

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291819: fltTcaCoppOspfAllow1dPktsMax

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291820: fltTcaCoppOspfAllow1wPktsMax

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291821: fltTcaCoppOspfAllow1moPktsMax

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291822: fltTcaCoppOspfAllow1qtrPktsMax

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291823: fltTcaCoppOspfAllow1yearPktsMax

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291824: fltTcaCoppOspfAllow5minPktsAvg

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291825: fltTcaCoppOspfAllow15minPktsAvg

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291826: fltTcaCoppOspfAllow1hPktsAvg

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291827: fltTcaCoppOspfAllow1dPktsAvg

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291828: fltTcaCoppOspfAllow1wPktsAvg

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291829: fltTcaCoppOspfAllow1moPktsAvg

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291830: fltTcaCoppOspfAllow1qtrPktsAvg

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291831: fltTcaCoppOspfAllow1yearPktsAvg

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291856: fltTcaCoppOspfAllow5minPktsTr

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291857: fltTcaCoppOspfAllow15minPktsTr

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291858: fltTcaCoppOspfAllow1hPktsTr

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291859: fltTcaCoppOspfAllow1dPktsTr

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291860: fltTcaCoppOspfAllow1wPktsTr

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291861: fltTcaCoppOspfAllow1moPktsTr

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291862: fltTcaCoppOspfAllow1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291863: fltTcaCoppOspfAllow1yearPktsTr

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291864: fltTcaCoppOspfAllow5minPktsRate

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291865: fltTcaCoppOspfAllow15minPktsRate

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291866: fltTcaCoppOspfAllow1hPktsRate

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291867: fltTcaCoppOspfAllow1dPktsRate

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291868: fltTcaCoppOspfAllow1wPktsRate

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291869: fltTcaCoppOspfAllow1moPktsRate

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291870: fltTcaCoppOspfAllow1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291871: fltTcaCoppOspfAllow1yearPktsRate

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291944: fltTcaCoppOspfAllow5minPktsRateLast

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291945: fltTcaCoppOspfAllow15minPktsRateLast

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291946: fltTcaCoppOspfAllow1hPktsRateLast

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291947: fltTcaCoppOspfAllow1dPktsRateLast

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291948: fltTcaCoppOspfAllow1wPktsRateLast

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291949: fltTcaCoppOspfAllow1moPktsRateLast

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291950: fltTcaCoppOspfAllow1qtrPktsRateLast

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291951: fltTcaCoppOspfAllow1yearPktsRateLast

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291952: fltTcaCoppOspfAllow5minPktsRateMin

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291953: fltTcaCoppOspfAllow15minPktsRateMin

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291954: fltTcaCoppOspfAllow1hPktsRateMin

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291955: fltTcaCoppOspfAllow1dPktsRateMin

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291956: fltTcaCoppOspfAllow1wPktsRateMin

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291957: fltTcaCoppOspfAllow1moPktsRateMin

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291958: fltTcaCoppOspfAllow1qtrPktsRateMin

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291959: fltTcaCoppOspfAllow1yearPktsRateMin

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291960: fltTcaCoppOspfAllow5minPktsRateMax

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291961: fltTcaCoppOspfAllow15minPktsRateMax

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291962: fltTcaCoppOspfAllow1hPktsRateMax

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291963: fltTcaCoppOspfAllow1dPktsRateMax

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291964: fltTcaCoppOspfAllow1wPktsRateMax

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291965: fltTcaCoppOspfAllow1moPktsRateMax

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291966: fltTcaCoppOspfAllow1qtrPktsRateMax

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291967: fltTcaCoppOspfAllow1yearPktsRateMax

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291968: fltTcaCoppOspfAllow5minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291969: fltTcaCoppOspfAllow15minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291970: fltTcaCoppOspfAllow1hPktsRateAvg

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291971: fltTcaCoppOspfAllow1dPktsRateAvg

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291972: fltTcaCoppOspfAllow1wPktsRateAvg

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291973: fltTcaCoppOspfAllow1moPktsRateAvg

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291974: fltTcaCoppOspfAllow1qtrPktsRateAvg

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F291975: fltTcaCoppOspfAllow1yearPktsRateAvg

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292008: fltTcaCoppOspfAllow5minPktsRateTr

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292009: fltTcaCoppOspfAllow15minPktsRateTr

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292010: fltTcaCoppOspfAllow1hPktsRateTr

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292011: fltTcaCoppOspfAllow1dPktsRateTr

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292012: fltTcaCoppOspfAllow1wPktsRateTr

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292013: fltTcaCoppOspfAllow1moPktsRateTr

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292014: fltTcaCoppOspfAllow1qtrPktsRateTr

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292015: fltTcaCoppOspfAllow1yearPktsRateTr

Severity: variable

Explanation: This fault is caused by "OspfAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292064: fltTcaCoppOspfDrop5minBytesLast

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292065: fltTcaCoppOspfDrop15minBytesLast

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292066: fltTcaCoppOspfDrop1hBytesLast

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292067: fltTcaCoppOspfDrop1dBytesLast

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292068: fltTcaCoppOspfDrop1wBytesLast

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292069: fltTcaCoppOspfDrop1moBytesLast

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292070: fltTcaCoppOspfDrop1qtrBytesLast

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292071: fltTcaCoppOspfDrop1yearBytesLast

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292080: fltTcaCoppOspfDrop5minBytesCum

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292081: fltTcaCoppOspfDrop15minBytesCum

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292082: fltTcaCoppOspfDrop1hBytesCum

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292083: fltTcaCoppOspfDrop1dBytesCum

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292084: fltTcaCoppOspfDrop1wBytesCum

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292085: fltTcaCoppOspfDrop1moBytesCum

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292086: fltTcaCoppOspfDrop1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292087: fltTcaCoppOspfDrop1yearBytesCum

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292088: fltTcaCoppOspfDrop5minBytesPer

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292089: fltTcaCoppOspfDrop15minBytesPer

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292090: fltTcaCoppOspfDrop1hBytesPer

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292091: fltTcaCoppOspfDrop1dBytesPer

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292092: fltTcaCoppOspfDrop1wBytesPer

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292093: fltTcaCoppOspfDrop1moBytesPer

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292094: fltTcaCoppOspfDrop1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292095: fltTcaCoppOspfDrop1yearBytesPer

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292096: fltTcaCoppOspfDrop5minBytesMin

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292097: fltTcaCoppOspfDrop15minBytesMin

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292098: fltTcaCoppOspfDrop1hBytesMin

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292099: fltTcaCoppOspfDrop1dBytesMin

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292100: fltTcaCoppOspfDrop1wBytesMin

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292101: fltTcaCoppOspfDrop1moBytesMin

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292102: fltTcaCoppOspfDrop1qtrBytesMin

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292103: fltTcaCoppOspfDrop1yearBytesMin

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292104: fltTcaCoppOspfDrop5minBytesMax

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292105: fltTcaCoppOspfDrop15minBytesMax

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292106: fltTcaCoppOspfDrop1hBytesMax

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292107: fltTcaCoppOspfDrop1dBytesMax

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292108: fltTcaCoppOspfDrop1wBytesMax

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292109: fltTcaCoppOspfDrop1moBytesMax

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292110: fltTcaCoppOspfDrop1qtrBytesMax

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292111: fltTcaCoppOspfDrop1yearBytesMax

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292112: fltTcaCoppOspfDrop5minBytesAvg

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292113: fltTcaCoppOspfDrop15minBytesAvg

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292114: fltTcaCoppOspfDrop1hBytesAvg

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292115: fltTcaCoppOspfDrop1dBytesAvg

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292116: fltTcaCoppOspfDrop1wBytesAvg

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292117: fltTcaCoppOspfDrop1moBytesAvg

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292118: fltTcaCoppOspfDrop1qtrBytesAvg

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292119: fltTcaCoppOspfDrop1yearBytesAvg

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292144: fltTcaCoppOspfDrop5minBytesTr

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292145: fltTcaCoppOspfDrop15minBytesTr

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292146: fltTcaCoppOspfDrop1hBytesTr

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292147: fltTcaCoppOspfDrop1dBytesTr

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292148: fltTcaCoppOspfDrop1wBytesTr

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292149: fltTcaCoppOspfDrop1moBytesTr

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292150: fltTcaCoppOspfDrop1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292151: fltTcaCoppOspfDrop1yearBytesTr

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292152: fltTcaCoppOspfDrop5minBytesRate

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292153: fltTcaCoppOspfDrop15minBytesRate

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292154: fltTcaCoppOspfDrop1hBytesRate

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292155: fltTcaCoppOspfDrop1dBytesRate

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292156: fltTcaCoppOspfDrop1wBytesRate

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292157: fltTcaCoppOspfDrop1moBytesRate

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292158: fltTcaCoppOspfDrop1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292159: fltTcaCoppOspfDrop1yearBytesRate

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2922: fltDot1xDAEpDot1xAuthFail

Severity: minor

Explanation: This fault occurs when Dot1x authentication fails

Recommended Action: If you see this fault, take the following actions

1. Check the Dot1x authentication credentials

F292232: fltTcaCoppOspfDrop5minBytesRateLast

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292233: fltTcaCoppOspfDrop15minBytesRateLast

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292234: fltTcaCoppOspfDrop1hBytesRateLast

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292235: fltTcaCoppOspfDrop1dBytesRateLast

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292236: fltTcaCoppOspfDrop1wBytesRateLast

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292237: fltTcaCoppOspfDrop1moBytesRateLast

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292238: fltTcaCoppOspfDrop1qtrBytesRateLast

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292239: fltTcaCoppOspfDrop1yearBytesRateLast

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292240: fltTcaCoppOspfDrop5minBytesRateMin

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292241: fltTcaCoppOspfDrop15minBytesRateMin

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292242: fltTcaCoppOspfDrop1hBytesRateMin

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292243: fltTcaCoppOspfDrop1dBytesRateMin

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292244: fltTcaCoppOspfDrop1wBytesRateMin

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292245: fltTcaCoppOspfDrop1moBytesRateMin

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292246: fltTcaCoppOspfDrop1qtrBytesRateMin

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292247: fltTcaCoppOspfDrop1yearBytesRateMin

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292248: fltTcaCoppOspfDrop5minBytesRateMax

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292249: fltTcaCoppOspfDrop15minBytesRateMax

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292250: fltTcaCoppOspfDrop1hBytesRateMax

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292251: fltTcaCoppOspfDrop1dBytesRateMax

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292252: fltTcaCoppOspfDrop1wBytesRateMax

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292253: fltTcaCoppOspfDrop1moBytesRateMax

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292254: fltTcaCoppOspfDrop1qtrBytesRateMax

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292255: fltTcaCoppOspfDrop1yearBytesRateMax

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292256: fltTcaCoppOspfDrop5minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292257: fltTcaCoppOspfDrop15minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292258: fltTcaCoppOspfDrop1hBytesRateAvg

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292259: fltTcaCoppOspfDrop1dBytesRateAvg

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292260: fltTcaCoppOspfDrop1wBytesRateAvg

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292261: fltTcaCoppOspfDrop1moBytesRateAvg

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292262: fltTcaCoppOspfDrop1qtrBytesRateAvg

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292263: fltTcaCoppOspfDrop1yearBytesRateAvg

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292296: fltTcaCoppOspfDrop5minBytesRateTr

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292297: fltTcaCoppOspfDrop15minBytesRateTr

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292298: fltTcaCoppOspfDrop1hBytesRateTr

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292299: fltTcaCoppOspfDrop1dBytesRateTr

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2923: fltCoppFilterPrefilterTcamUnvailable

Severity: major

Explanation: This fault occurs when there is no space available in the TCAM on at least one of the modules. Note: If hw has more than one module, CoPP prefilter ACL entry might have successfully installed on few modules and failed on few modules.

Recommended Action: To recover from this fault, try the following actions

1. Delete any unused installed CoPP prefilter ACL entry to make space in the TCAM.

F292300: fltTcaCoppOspfDrop1wBytesRateTr

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292301: fltTcaCoppOspfDrop1moBytesRateTr

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292302: fltTcaCoppOspfDrop1qtrBytesRateTr

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292303: fltTcaCoppOspfDrop1yearBytesRateTr

Severity: variable

Explanation: This fault is caused by "OspfDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292352: fltTcaCoppOspfDrop5minPktsLast

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292353: fltTcaCoppOspfDrop15minPktsLast

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292354: fltTcaCoppOspfDrop1hPktsLast

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292355: fltTcaCoppOspfDrop1dPktsLast

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292356: fltTcaCoppOspfDrop1wPktsLast

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292357: fltTcaCoppOspfDrop1moPktsLast

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292358: fltTcaCoppOspfDrop1qtrPktsLast

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292359: fltTcaCoppOspfDrop1yearPktsLast

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292368: fltTcaCoppOspfDrop5minPktsCum

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292369: fltTcaCoppOspfDrop15minPktsCum

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292370: fltTcaCoppOspfDrop1hPktsCum

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292371: fltTcaCoppOspfDrop1dPktsCum

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292372: fltTcaCoppOspfDrop1wPktsCum

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292373: fltTcaCoppOspfDrop1moPktsCum

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292374: fltTcaCoppOspfDrop1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292375: fltTcaCoppOspfDrop1yearPktsCum

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292376: fltTcaCoppOspfDrop5minPktsPer

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292377: fltTcaCoppOspfDrop15minPktsPer

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292378: fltTcaCoppOspfDrop1hPktsPer

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292379: fltTcaCoppOspfDrop1dPktsPer

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292380: fltTcaCoppOspfDrop1wPktsPer

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292381: fltTcaCoppOspfDrop1moPktsPer

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292382: fltTcaCoppOspfDrop1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292383: fltTcaCoppOspfDrop1yearPktsPer

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292384: fltTcaCoppOspfDrop5minPktsMin

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292385: fltTcaCoppOspfDrop15minPktsMin

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292386: fltTcaCoppOspfDrop1hPktsMin

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292387: fltTcaCoppOspfDrop1dPktsMin

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292388: fltTcaCoppOspfDrop1wPktsMin

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292389: fltTcaCoppOspfDrop1moPktsMin

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292390: fltTcaCoppOspfDrop1qtrPktsMin

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292391: fltTcaCoppOspfDrop1yearPktsMin

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292392: fltTcaCoppOspfDrop5minPktsMax

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292393: fltTcaCoppOspfDrop15minPktsMax

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292394: fltTcaCoppOspfDrop1hPktsMax

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292395: fltTcaCoppOspfDrop1dPktsMax

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292396: fltTcaCoppOspfDrop1wPktsMax

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292397: fltTcaCoppOspfDrop1moPktsMax

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292398: fltTcaCoppOspfDrop1qtrPktsMax

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292399: fltTcaCoppOspfDrop1yearPktsMax

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2924: fltCoppFilterPrefilterHardwareError

Severity: major

Explanation: This fault occurs when CoPP prefilter ACL entry installation failed due to hardware programming error.

Recommended Action: To recover from this fault, try the following actions

1. Look at any configuration issues.

2. Verify the configuration is correct/complete.

3. Delete the CoPP prefilter ACL entry and add it back.

4. If the above actions did not resolve the issue, try rebooting the switch using CLI or GUI.

F292400: fltTcaCoppOspfDrop5minPktsAvg

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292401: fltTcaCoppOspfDrop15minPktsAvg

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292402: fltTcaCoppOspfDrop1hPktsAvg

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292403: fltTcaCoppOspfDrop1dPktsAvg

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292404: fltTcaCoppOspfDrop1wPktsAvg

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292405: fltTcaCoppOspfDrop1moPktsAvg

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292406: fltTcaCoppOspfDrop1qtrPktsAvg

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292407: fltTcaCoppOspfDrop1yearPktsAvg

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292432: fltTcaCoppOspfDrop5minPktsTr

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292433: fltTcaCoppOspfDrop15minPktsTr

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292434: fltTcaCoppOspfDrop1hPktsTr

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292435: fltTcaCoppOspfDrop1dPktsTr

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292436: fltTcaCoppOspfDrop1wPktsTr

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292437: fltTcaCoppOspfDrop1moPktsTr

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292438: fltTcaCoppOspfDrop1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292439: fltTcaCoppOspfDrop1yearPktsTr

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292440: fltTcaCoppOspfDrop5minPktsRate

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292441: fltTcaCoppOspfDrop15minPktsRate

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292442: fltTcaCoppOspfDrop1hPktsRate

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292443: fltTcaCoppOspfDrop1dPktsRate

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292444: fltTcaCoppOspfDrop1wPktsRate

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292445: fltTcaCoppOspfDrop1moPktsRate

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292446: fltTcaCoppOspfDrop1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292447: fltTcaCoppOspfDrop1yearPktsRate

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2925: fltCoppFilterPrefilterHwUnsupported

Severity: major

Explanation: This fault occurs when CoPP prefilter ACL entry installation failed due to unsupported hardware.The broadcom based platforms are not supported.

Recommended Action: None set.

F292520: fltTcaCoppOspfDrop5minPktsRateLast

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292521: fltTcaCoppOspfDrop15minPktsRateLast

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292522: fltTcaCoppOspfDrop1hPktsRateLast

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292523: fltTcaCoppOspfDrop1dPktsRateLast

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292524: fltTcaCoppOspfDrop1wPktsRateLast

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292525: fltTcaCoppOspfDrop1moPktsRateLast

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292526: fltTcaCoppOspfDrop1qtrPktsRateLast

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292527: fltTcaCoppOspfDrop1yearPktsRateLast

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292528: fltTcaCoppOspfDrop5minPktsRateMin

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292529: fltTcaCoppOspfDrop15minPktsRateMin

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292530: fltTcaCoppOspfDrop1hPktsRateMin

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292531: fltTcaCoppOspfDrop1dPktsRateMin

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292532: fltTcaCoppOspfDrop1wPktsRateMin

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292533: fltTcaCoppOspfDrop1moPktsRateMin

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292534: fltTcaCoppOspfDrop1qtrPktsRateMin

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292535: fltTcaCoppOspfDrop1yearPktsRateMin

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292536: fltTcaCoppOspfDrop5minPktsRateMax

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292537: fltTcaCoppOspfDrop15minPktsRateMax

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292538: fltTcaCoppOspfDrop1hPktsRateMax

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292539: fltTcaCoppOspfDrop1dPktsRateMax

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292540: fltTcaCoppOspfDrop1wPktsRateMax

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292541: fltTcaCoppOspfDrop1moPktsRateMax

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292542: fltTcaCoppOspfDrop1qtrPktsRateMax

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292543: fltTcaCoppOspfDrop1yearPktsRateMax

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292544: fltTcaCoppOspfDrop5minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292545: fltTcaCoppOspfDrop15minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292546: fltTcaCoppOspfDrop1hPktsRateAvg

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292547: fltTcaCoppOspfDrop1dPktsRateAvg

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292548: fltTcaCoppOspfDrop1wPktsRateAvg

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292549: fltTcaCoppOspfDrop1moPktsRateAvg

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292550: fltTcaCoppOspfDrop1qtrPktsRateAvg

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292551: fltTcaCoppOspfDrop1yearPktsRateAvg

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292584: fltTcaCoppOspfDrop5minPktsRateTr

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292585: fltTcaCoppOspfDrop15minPktsRateTr

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292586: fltTcaCoppOspfDrop1hPktsRateTr

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292587: fltTcaCoppOspfDrop1dPktsRateTr

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292588: fltTcaCoppOspfDrop1wPktsRateTr

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292589: fltTcaCoppOspfDrop1moPktsRateTr

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292590: fltTcaCoppOspfDrop1qtrPktsRateTr

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292591: fltTcaCoppOspfDrop1yearPktsRateTr

Severity: variable

Explanation: This fault is caused by "OspfDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "OspfDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2926: fltCoppFilterPrefilterInvalidConfig

Severity: major

Explanation: This fault occurs when CoPP prefilter ACL entry config is invalid.

Recommended Action: To recover from this fault, try the following actions

1. Look at any configuration issues.

2. Verify the configuration is correct/complete.

3. Delete the CoPP prefilter ACL entry and add it back with valid configuration.

4. If the above actions did not resolve the issue, try rebooting the switch using CLI or GUI.

F292640: fltTcaCoppStpAllow5minBytesLast

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292641: fltTcaCoppStpAllow15minBytesLast

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292642: fltTcaCoppStpAllow1hBytesLast

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292643: fltTcaCoppStpAllow1dBytesLast

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292644: fltTcaCoppStpAllow1wBytesLast

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292645: fltTcaCoppStpAllow1moBytesLast

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292646: fltTcaCoppStpAllow1qtrBytesLast

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292647: fltTcaCoppStpAllow1yearBytesLast

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292656: fltTcaCoppStpAllow5minBytesCum

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292657: fltTcaCoppStpAllow15minBytesCum

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292658: fltTcaCoppStpAllow1hBytesCum

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292659: fltTcaCoppStpAllow1dBytesCum

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292660: fltTcaCoppStpAllow1wBytesCum

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292661: fltTcaCoppStpAllow1moBytesCum

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292662: fltTcaCoppStpAllow1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292663: fltTcaCoppStpAllow1yearBytesCum

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292664: fltTcaCoppStpAllow5minBytesPer

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292665: fltTcaCoppStpAllow15minBytesPer

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292666: fltTcaCoppStpAllow1hBytesPer

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292667: fltTcaCoppStpAllow1dBytesPer

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292668: fltTcaCoppStpAllow1wBytesPer

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292669: fltTcaCoppStpAllow1moBytesPer

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292670: fltTcaCoppStpAllow1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292671: fltTcaCoppStpAllow1yearBytesPer

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292672: fltTcaCoppStpAllow5minBytesMin

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292673: fltTcaCoppStpAllow15minBytesMin

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292674: fltTcaCoppStpAllow1hBytesMin

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292675: fltTcaCoppStpAllow1dBytesMin

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292676: fltTcaCoppStpAllow1wBytesMin

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292677: fltTcaCoppStpAllow1moBytesMin

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292678: fltTcaCoppStpAllow1qtrBytesMin

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292679: fltTcaCoppStpAllow1yearBytesMin

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292680: fltTcaCoppStpAllow5minBytesMax

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292681: fltTcaCoppStpAllow15minBytesMax

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292682: fltTcaCoppStpAllow1hBytesMax

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292683: fltTcaCoppStpAllow1dBytesMax

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292684: fltTcaCoppStpAllow1wBytesMax

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292685: fltTcaCoppStpAllow1moBytesMax

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292686: fltTcaCoppStpAllow1qtrBytesMax

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292687: fltTcaCoppStpAllow1yearBytesMax

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292688: fltTcaCoppStpAllow5minBytesAvg

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292689: fltTcaCoppStpAllow15minBytesAvg

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292690: fltTcaCoppStpAllow1hBytesAvg

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292691: fltTcaCoppStpAllow1dBytesAvg

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292692: fltTcaCoppStpAllow1wBytesAvg

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292693: fltTcaCoppStpAllow1moBytesAvg

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292694: fltTcaCoppStpAllow1qtrBytesAvg

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292695: fltTcaCoppStpAllow1yearBytesAvg

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2927: fltPkiKeyRingCustomKeyRingExpiring

Severity: major

Explanation: This fault occurs when the custom KeyRing X.509 Certificate is going to expire in one month.

Recommended Action: If you see this fault, take the following actions:

1. Update custom KeyRing X.509 Certificate soon.

F292720: fltTcaCoppStpAllow5minBytesTr

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292721: fltTcaCoppStpAllow15minBytesTr

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292722: fltTcaCoppStpAllow1hBytesTr

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292723: fltTcaCoppStpAllow1dBytesTr

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292724: fltTcaCoppStpAllow1wBytesTr

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292725: fltTcaCoppStpAllow1moBytesTr

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292726: fltTcaCoppStpAllow1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292727: fltTcaCoppStpAllow1yearBytesTr

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292728: fltTcaCoppStpAllow5minBytesRate

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292729: fltTcaCoppStpAllow15minBytesRate

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292730: fltTcaCoppStpAllow1hBytesRate

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292731: fltTcaCoppStpAllow1dBytesRate

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292732: fltTcaCoppStpAllow1wBytesRate

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292733: fltTcaCoppStpAllow1moBytesRate

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292734: fltTcaCoppStpAllow1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292735: fltTcaCoppStpAllow1yearBytesRate

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2928: fltPkiKeyRingCustomKeyRingExpired

Severity: critical

Explanation: This fault occurs when the custom KeyRing X.509 Certificate has expired.

Recommended Action: If you see this fault, take the following actions:

1. Update custom KeyRing X.509 Certificate immediately.

F292808: fltTcaCoppStpAllow5minBytesRateLast

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292809: fltTcaCoppStpAllow15minBytesRateLast

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292810: fltTcaCoppStpAllow1hBytesRateLast

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292811: fltTcaCoppStpAllow1dBytesRateLast

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292812: fltTcaCoppStpAllow1wBytesRateLast

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292813: fltTcaCoppStpAllow1moBytesRateLast

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292814: fltTcaCoppStpAllow1qtrBytesRateLast

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292815: fltTcaCoppStpAllow1yearBytesRateLast

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292816: fltTcaCoppStpAllow5minBytesRateMin

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292817: fltTcaCoppStpAllow15minBytesRateMin

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292818: fltTcaCoppStpAllow1hBytesRateMin

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292819: fltTcaCoppStpAllow1dBytesRateMin

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292820: fltTcaCoppStpAllow1wBytesRateMin

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292821: fltTcaCoppStpAllow1moBytesRateMin

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292822: fltTcaCoppStpAllow1qtrBytesRateMin

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292823: fltTcaCoppStpAllow1yearBytesRateMin

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292824: fltTcaCoppStpAllow5minBytesRateMax

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292825: fltTcaCoppStpAllow15minBytesRateMax

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292826: fltTcaCoppStpAllow1hBytesRateMax

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292827: fltTcaCoppStpAllow1dBytesRateMax

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292828: fltTcaCoppStpAllow1wBytesRateMax

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292829: fltTcaCoppStpAllow1moBytesRateMax

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292830: fltTcaCoppStpAllow1qtrBytesRateMax

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292831: fltTcaCoppStpAllow1yearBytesRateMax

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292832: fltTcaCoppStpAllow5minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292833: fltTcaCoppStpAllow15minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292834: fltTcaCoppStpAllow1hBytesRateAvg

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292835: fltTcaCoppStpAllow1dBytesRateAvg

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292836: fltTcaCoppStpAllow1wBytesRateAvg

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292837: fltTcaCoppStpAllow1moBytesRateAvg

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292838: fltTcaCoppStpAllow1qtrBytesRateAvg

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292839: fltTcaCoppStpAllow1yearBytesRateAvg

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292872: fltTcaCoppStpAllow5minBytesRateTr

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292873: fltTcaCoppStpAllow15minBytesRateTr

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292874: fltTcaCoppStpAllow1hBytesRateTr

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292875: fltTcaCoppStpAllow1dBytesRateTr

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292876: fltTcaCoppStpAllow1wBytesRateTr

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292877: fltTcaCoppStpAllow1moBytesRateTr

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292878: fltTcaCoppStpAllow1qtrBytesRateTr

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292879: fltTcaCoppStpAllow1yearBytesRateTr

Severity: variable

Explanation: This fault is caused by "StpAllowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2929: fltPkiTPTPExpiring

Severity: major

Explanation: This fault occurs when the TP X.509 Certificate is going to expire in one month.

Recommended Action: If you see this fault, take the following actions:

1. Update TP X.509 Certificate soon.

F292928: fltTcaCoppStpAllow5minPktsLast

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292929: fltTcaCoppStpAllow15minPktsLast

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292930: fltTcaCoppStpAllow1hPktsLast

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292931: fltTcaCoppStpAllow1dPktsLast

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292932: fltTcaCoppStpAllow1wPktsLast

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292933: fltTcaCoppStpAllow1moPktsLast

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292934: fltTcaCoppStpAllow1qtrPktsLast

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292935: fltTcaCoppStpAllow1yearPktsLast

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292944: fltTcaCoppStpAllow5minPktsCum

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292945: fltTcaCoppStpAllow15minPktsCum

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292946: fltTcaCoppStpAllow1hPktsCum

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292947: fltTcaCoppStpAllow1dPktsCum

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292948: fltTcaCoppStpAllow1wPktsCum

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292949: fltTcaCoppStpAllow1moPktsCum

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292950: fltTcaCoppStpAllow1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292951: fltTcaCoppStpAllow1yearPktsCum

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292952: fltTcaCoppStpAllow5minPktsPer

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292953: fltTcaCoppStpAllow15minPktsPer

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292954: fltTcaCoppStpAllow1hPktsPer

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292955: fltTcaCoppStpAllow1dPktsPer

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292956: fltTcaCoppStpAllow1wPktsPer

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292957: fltTcaCoppStpAllow1moPktsPer

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292958: fltTcaCoppStpAllow1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292959: fltTcaCoppStpAllow1yearPktsPer

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292960: fltTcaCoppStpAllow5minPktsMin

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292961: fltTcaCoppStpAllow15minPktsMin

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292962: fltTcaCoppStpAllow1hPktsMin

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292963: fltTcaCoppStpAllow1dPktsMin

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292964: fltTcaCoppStpAllow1wPktsMin

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292965: fltTcaCoppStpAllow1moPktsMin

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292966: fltTcaCoppStpAllow1qtrPktsMin

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292967: fltTcaCoppStpAllow1yearPktsMin

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292968: fltTcaCoppStpAllow5minPktsMax

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292969: fltTcaCoppStpAllow15minPktsMax

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292970: fltTcaCoppStpAllow1hPktsMax

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292971: fltTcaCoppStpAllow1dPktsMax

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292972: fltTcaCoppStpAllow1wPktsMax

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292973: fltTcaCoppStpAllow1moPktsMax

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292974: fltTcaCoppStpAllow1qtrPktsMax

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292975: fltTcaCoppStpAllow1yearPktsMax

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292976: fltTcaCoppStpAllow5minPktsAvg

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292977: fltTcaCoppStpAllow15minPktsAvg

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292978: fltTcaCoppStpAllow1hPktsAvg

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292979: fltTcaCoppStpAllow1dPktsAvg

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292980: fltTcaCoppStpAllow1wPktsAvg

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292981: fltTcaCoppStpAllow1moPktsAvg

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292982: fltTcaCoppStpAllow1qtrPktsAvg

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F292983: fltTcaCoppStpAllow1yearPktsAvg

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2930: fltPkiTPTPExpired

Severity: critical

Explanation: This fault occurs when the TP X.509 Certificate has expired.

Recommended Action: If you see this fault, take the following actions:

1. Update TP X.509 Certificate immediately.

F293008: fltTcaCoppStpAllow5minPktsTr

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293009: fltTcaCoppStpAllow15minPktsTr

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293010: fltTcaCoppStpAllow1hPktsTr

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293011: fltTcaCoppStpAllow1dPktsTr

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293012: fltTcaCoppStpAllow1wPktsTr

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293013: fltTcaCoppStpAllow1moPktsTr

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293014: fltTcaCoppStpAllow1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293015: fltTcaCoppStpAllow1yearPktsTr

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293016: fltTcaCoppStpAllow5minPktsRate

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293017: fltTcaCoppStpAllow15minPktsRate

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293018: fltTcaCoppStpAllow1hPktsRate

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293019: fltTcaCoppStpAllow1dPktsRate

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293020: fltTcaCoppStpAllow1wPktsRate

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293021: fltTcaCoppStpAllow1moPktsRate

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293022: fltTcaCoppStpAllow1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293023: fltTcaCoppStpAllow1yearPktsRate

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293096: fltTcaCoppStpAllow5minPktsRateLast

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293097: fltTcaCoppStpAllow15minPktsRateLast

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293098: fltTcaCoppStpAllow1hPktsRateLast

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293099: fltTcaCoppStpAllow1dPktsRateLast

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2931: fltAaaUserCertUserCertExpiring

Severity: major

Explanation: This fault occurs when thei User X.509 Certificate is going to expire in one month.

Recommended Action: If you see this fault, take the following actions:

1. Update User X.509 Certificate soon.

F293100: fltTcaCoppStpAllow1wPktsRateLast

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293101: fltTcaCoppStpAllow1moPktsRateLast

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293102: fltTcaCoppStpAllow1qtrPktsRateLast

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293103: fltTcaCoppStpAllow1yearPktsRateLast

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293104: fltTcaCoppStpAllow5minPktsRateMin

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293105: fltTcaCoppStpAllow15minPktsRateMin

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293106: fltTcaCoppStpAllow1hPktsRateMin

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293107: fltTcaCoppStpAllow1dPktsRateMin

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293108: fltTcaCoppStpAllow1wPktsRateMin

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293109: fltTcaCoppStpAllow1moPktsRateMin

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293110: fltTcaCoppStpAllow1qtrPktsRateMin

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293111: fltTcaCoppStpAllow1yearPktsRateMin

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293112: fltTcaCoppStpAllow5minPktsRateMax

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293113: fltTcaCoppStpAllow15minPktsRateMax

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293114: fltTcaCoppStpAllow1hPktsRateMax

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293115: fltTcaCoppStpAllow1dPktsRateMax

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293116: fltTcaCoppStpAllow1wPktsRateMax

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293117: fltTcaCoppStpAllow1moPktsRateMax

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293118: fltTcaCoppStpAllow1qtrPktsRateMax

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293119: fltTcaCoppStpAllow1yearPktsRateMax

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293120: fltTcaCoppStpAllow5minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293121: fltTcaCoppStpAllow15minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293122: fltTcaCoppStpAllow1hPktsRateAvg

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293123: fltTcaCoppStpAllow1dPktsRateAvg

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293124: fltTcaCoppStpAllow1wPktsRateAvg

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293125: fltTcaCoppStpAllow1moPktsRateAvg

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293126: fltTcaCoppStpAllow1qtrPktsRateAvg

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293127: fltTcaCoppStpAllow1yearPktsRateAvg

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293160: fltTcaCoppStpAllow5minPktsRateTr

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293161: fltTcaCoppStpAllow15minPktsRateTr

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293162: fltTcaCoppStpAllow1hPktsRateTr

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293163: fltTcaCoppStpAllow1dPktsRateTr

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293164: fltTcaCoppStpAllow1wPktsRateTr

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293165: fltTcaCoppStpAllow1moPktsRateTr

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293166: fltTcaCoppStpAllow1qtrPktsRateTr

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293167: fltTcaCoppStpAllow1yearPktsRateTr

Severity: variable

Explanation: This fault is caused by "StpAllowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpAllowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2932: fltAaaUserCertUserCertExpired

Severity: critical

Explanation: This fault occurs when the User X.509 Certificate has expired.

Recommended Action: If you see this fault, take the following actions:

1. Update User X.509 Certificate immediately.

F293216: fltTcaCoppStpDrop5minBytesLast

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293217: fltTcaCoppStpDrop15minBytesLast

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293218: fltTcaCoppStpDrop1hBytesLast

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293219: fltTcaCoppStpDrop1dBytesLast

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293220: fltTcaCoppStpDrop1wBytesLast

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293221: fltTcaCoppStpDrop1moBytesLast

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293222: fltTcaCoppStpDrop1qtrBytesLast

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293223: fltTcaCoppStpDrop1yearBytesLast

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293232: fltTcaCoppStpDrop5minBytesCum

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293233: fltTcaCoppStpDrop15minBytesCum

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293234: fltTcaCoppStpDrop1hBytesCum

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293235: fltTcaCoppStpDrop1dBytesCum

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293236: fltTcaCoppStpDrop1wBytesCum

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293237: fltTcaCoppStpDrop1moBytesCum

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293238: fltTcaCoppStpDrop1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293239: fltTcaCoppStpDrop1yearBytesCum

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293240: fltTcaCoppStpDrop5minBytesPer

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293241: fltTcaCoppStpDrop15minBytesPer

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293242: fltTcaCoppStpDrop1hBytesPer

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293243: fltTcaCoppStpDrop1dBytesPer

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293244: fltTcaCoppStpDrop1wBytesPer

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293245: fltTcaCoppStpDrop1moBytesPer

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293246: fltTcaCoppStpDrop1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293247: fltTcaCoppStpDrop1yearBytesPer

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293248: fltTcaCoppStpDrop5minBytesMin

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293249: fltTcaCoppStpDrop15minBytesMin

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293250: fltTcaCoppStpDrop1hBytesMin

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293251: fltTcaCoppStpDrop1dBytesMin

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293252: fltTcaCoppStpDrop1wBytesMin

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293253: fltTcaCoppStpDrop1moBytesMin

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293254: fltTcaCoppStpDrop1qtrBytesMin

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293255: fltTcaCoppStpDrop1yearBytesMin

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293256: fltTcaCoppStpDrop5minBytesMax

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293257: fltTcaCoppStpDrop15minBytesMax

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293258: fltTcaCoppStpDrop1hBytesMax

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293259: fltTcaCoppStpDrop1dBytesMax

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293260: fltTcaCoppStpDrop1wBytesMax

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293261: fltTcaCoppStpDrop1moBytesMax

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293262: fltTcaCoppStpDrop1qtrBytesMax

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293263: fltTcaCoppStpDrop1yearBytesMax

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293264: fltTcaCoppStpDrop5minBytesAvg

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293265: fltTcaCoppStpDrop15minBytesAvg

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293266: fltTcaCoppStpDrop1hBytesAvg

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293267: fltTcaCoppStpDrop1dBytesAvg

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293268: fltTcaCoppStpDrop1wBytesAvg

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293269: fltTcaCoppStpDrop1moBytesAvg

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293270: fltTcaCoppStpDrop1qtrBytesAvg

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293271: fltTcaCoppStpDrop1yearBytesAvg

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293296: fltTcaCoppStpDrop5minBytesTr

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293297: fltTcaCoppStpDrop15minBytesTr

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293298: fltTcaCoppStpDrop1hBytesTr

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293299: fltTcaCoppStpDrop1dBytesTr

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293300: fltTcaCoppStpDrop1wBytesTr

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293301: fltTcaCoppStpDrop1moBytesTr

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293302: fltTcaCoppStpDrop1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293303: fltTcaCoppStpDrop1yearBytesTr

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293304: fltTcaCoppStpDrop5minBytesRate

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293305: fltTcaCoppStpDrop15minBytesRate

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293306: fltTcaCoppStpDrop1hBytesRate

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293307: fltTcaCoppStpDrop1dBytesRate

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293308: fltTcaCoppStpDrop1wBytesRate

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293309: fltTcaCoppStpDrop1moBytesRate

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293310: fltTcaCoppStpDrop1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293311: fltTcaCoppStpDrop1yearBytesRate

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293384: fltTcaCoppStpDrop5minBytesRateLast

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293385: fltTcaCoppStpDrop15minBytesRateLast

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293386: fltTcaCoppStpDrop1hBytesRateLast

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293387: fltTcaCoppStpDrop1dBytesRateLast

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293388: fltTcaCoppStpDrop1wBytesRateLast

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293389: fltTcaCoppStpDrop1moBytesRateLast

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293390: fltTcaCoppStpDrop1qtrBytesRateLast

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293391: fltTcaCoppStpDrop1yearBytesRateLast

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293392: fltTcaCoppStpDrop5minBytesRateMin

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293393: fltTcaCoppStpDrop15minBytesRateMin

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293394: fltTcaCoppStpDrop1hBytesRateMin

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293395: fltTcaCoppStpDrop1dBytesRateMin

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293396: fltTcaCoppStpDrop1wBytesRateMin

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293397: fltTcaCoppStpDrop1moBytesRateMin

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293398: fltTcaCoppStpDrop1qtrBytesRateMin

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293399: fltTcaCoppStpDrop1yearBytesRateMin

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293400: fltTcaCoppStpDrop5minBytesRateMax

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293401: fltTcaCoppStpDrop15minBytesRateMax

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293402: fltTcaCoppStpDrop1hBytesRateMax

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293403: fltTcaCoppStpDrop1dBytesRateMax

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293404: fltTcaCoppStpDrop1wBytesRateMax

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293405: fltTcaCoppStpDrop1moBytesRateMax

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293406: fltTcaCoppStpDrop1qtrBytesRateMax

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293407: fltTcaCoppStpDrop1yearBytesRateMax

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293408: fltTcaCoppStpDrop5minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293409: fltTcaCoppStpDrop15minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293410: fltTcaCoppStpDrop1hBytesRateAvg

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293411: fltTcaCoppStpDrop1dBytesRateAvg

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293412: fltTcaCoppStpDrop1wBytesRateAvg

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293413: fltTcaCoppStpDrop1moBytesRateAvg

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293414: fltTcaCoppStpDrop1qtrBytesRateAvg

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293415: fltTcaCoppStpDrop1yearBytesRateAvg

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293448: fltTcaCoppStpDrop5minBytesRateTr

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293449: fltTcaCoppStpDrop15minBytesRateTr

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293450: fltTcaCoppStpDrop1hBytesRateTr

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293451: fltTcaCoppStpDrop1dBytesRateTr

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293452: fltTcaCoppStpDrop1wBytesRateTr

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293453: fltTcaCoppStpDrop1moBytesRateTr

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293454: fltTcaCoppStpDrop1qtrBytesRateTr

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293455: fltTcaCoppStpDrop1yearBytesRateTr

Severity: variable

Explanation: This fault is caused by "StpDropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293504: fltTcaCoppStpDrop5minPktsLast

Severity: variable

Explanation: This fault is caused by "StpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293505: fltTcaCoppStpDrop15minPktsLast

Severity: variable

Explanation: This fault is caused by "StpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293506: fltTcaCoppStpDrop1hPktsLast

Severity: variable

Explanation: This fault is caused by "StpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293507: fltTcaCoppStpDrop1dPktsLast

Severity: variable

Explanation: This fault is caused by "StpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293508: fltTcaCoppStpDrop1wPktsLast

Severity: variable

Explanation: This fault is caused by "StpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293509: fltTcaCoppStpDrop1moPktsLast

Severity: variable

Explanation: This fault is caused by "StpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293510: fltTcaCoppStpDrop1qtrPktsLast

Severity: variable

Explanation: This fault is caused by "StpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293511: fltTcaCoppStpDrop1yearPktsLast

Severity: variable

Explanation: This fault is caused by "StpDropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293520: fltTcaCoppStpDrop5minPktsCum

Severity: variable

Explanation: This fault is caused by "StpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293521: fltTcaCoppStpDrop15minPktsCum

Severity: variable

Explanation: This fault is caused by "StpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293522: fltTcaCoppStpDrop1hPktsCum

Severity: variable

Explanation: This fault is caused by "StpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293523: fltTcaCoppStpDrop1dPktsCum

Severity: variable

Explanation: This fault is caused by "StpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293524: fltTcaCoppStpDrop1wPktsCum

Severity: variable

Explanation: This fault is caused by "StpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293525: fltTcaCoppStpDrop1moPktsCum

Severity: variable

Explanation: This fault is caused by "StpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293526: fltTcaCoppStpDrop1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "StpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293527: fltTcaCoppStpDrop1yearPktsCum

Severity: variable

Explanation: This fault is caused by "StpDropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293528: fltTcaCoppStpDrop5minPktsPer

Severity: variable

Explanation: This fault is caused by "StpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293529: fltTcaCoppStpDrop15minPktsPer

Severity: variable

Explanation: This fault is caused by "StpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293530: fltTcaCoppStpDrop1hPktsPer

Severity: variable

Explanation: This fault is caused by "StpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293531: fltTcaCoppStpDrop1dPktsPer

Severity: variable

Explanation: This fault is caused by "StpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293532: fltTcaCoppStpDrop1wPktsPer

Severity: variable

Explanation: This fault is caused by "StpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293533: fltTcaCoppStpDrop1moPktsPer

Severity: variable

Explanation: This fault is caused by "StpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293534: fltTcaCoppStpDrop1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "StpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293535: fltTcaCoppStpDrop1yearPktsPer

Severity: variable

Explanation: This fault is caused by "StpDropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293536: fltTcaCoppStpDrop5minPktsMin

Severity: variable

Explanation: This fault is caused by "StpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293537: fltTcaCoppStpDrop15minPktsMin

Severity: variable

Explanation: This fault is caused by "StpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293538: fltTcaCoppStpDrop1hPktsMin

Severity: variable

Explanation: This fault is caused by "StpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293539: fltTcaCoppStpDrop1dPktsMin

Severity: variable

Explanation: This fault is caused by "StpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293540: fltTcaCoppStpDrop1wPktsMin

Severity: variable

Explanation: This fault is caused by "StpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293541: fltTcaCoppStpDrop1moPktsMin

Severity: variable

Explanation: This fault is caused by "StpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293542: fltTcaCoppStpDrop1qtrPktsMin

Severity: variable

Explanation: This fault is caused by "StpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293543: fltTcaCoppStpDrop1yearPktsMin

Severity: variable

Explanation: This fault is caused by "StpDropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293544: fltTcaCoppStpDrop5minPktsMax

Severity: variable

Explanation: This fault is caused by "StpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293545: fltTcaCoppStpDrop15minPktsMax

Severity: variable

Explanation: This fault is caused by "StpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293546: fltTcaCoppStpDrop1hPktsMax

Severity: variable

Explanation: This fault is caused by "StpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293547: fltTcaCoppStpDrop1dPktsMax

Severity: variable

Explanation: This fault is caused by "StpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293548: fltTcaCoppStpDrop1wPktsMax

Severity: variable

Explanation: This fault is caused by "StpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293549: fltTcaCoppStpDrop1moPktsMax

Severity: variable

Explanation: This fault is caused by "StpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293550: fltTcaCoppStpDrop1qtrPktsMax

Severity: variable

Explanation: This fault is caused by "StpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293551: fltTcaCoppStpDrop1yearPktsMax

Severity: variable

Explanation: This fault is caused by "StpDropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293552: fltTcaCoppStpDrop5minPktsAvg

Severity: variable

Explanation: This fault is caused by "StpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293553: fltTcaCoppStpDrop15minPktsAvg

Severity: variable

Explanation: This fault is caused by "StpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293554: fltTcaCoppStpDrop1hPktsAvg

Severity: variable

Explanation: This fault is caused by "StpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293555: fltTcaCoppStpDrop1dPktsAvg

Severity: variable

Explanation: This fault is caused by "StpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293556: fltTcaCoppStpDrop1wPktsAvg

Severity: variable

Explanation: This fault is caused by "StpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293557: fltTcaCoppStpDrop1moPktsAvg

Severity: variable

Explanation: This fault is caused by "StpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293558: fltTcaCoppStpDrop1qtrPktsAvg

Severity: variable

Explanation: This fault is caused by "StpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293559: fltTcaCoppStpDrop1yearPktsAvg

Severity: variable

Explanation: This fault is caused by "StpDropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293584: fltTcaCoppStpDrop5minPktsTr

Severity: variable

Explanation: This fault is caused by "StpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293585: fltTcaCoppStpDrop15minPktsTr

Severity: variable

Explanation: This fault is caused by "StpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293586: fltTcaCoppStpDrop1hPktsTr

Severity: variable

Explanation: This fault is caused by "StpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293587: fltTcaCoppStpDrop1dPktsTr

Severity: variable

Explanation: This fault is caused by "StpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293588: fltTcaCoppStpDrop1wPktsTr

Severity: variable

Explanation: This fault is caused by "StpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293589: fltTcaCoppStpDrop1moPktsTr

Severity: variable

Explanation: This fault is caused by "StpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293590: fltTcaCoppStpDrop1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "StpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293591: fltTcaCoppStpDrop1yearPktsTr

Severity: variable

Explanation: This fault is caused by "StpDropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293592: fltTcaCoppStpDrop5minPktsRate

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293593: fltTcaCoppStpDrop15minPktsRate

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293594: fltTcaCoppStpDrop1hPktsRate

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293595: fltTcaCoppStpDrop1dPktsRate

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293596: fltTcaCoppStpDrop1wPktsRate

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293597: fltTcaCoppStpDrop1moPktsRate

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293598: fltTcaCoppStpDrop1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293599: fltTcaCoppStpDrop1yearPktsRate

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293672: fltTcaCoppStpDrop5minPktsRateLast

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293673: fltTcaCoppStpDrop15minPktsRateLast

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293674: fltTcaCoppStpDrop1hPktsRateLast

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293675: fltTcaCoppStpDrop1dPktsRateLast

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293676: fltTcaCoppStpDrop1wPktsRateLast

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293677: fltTcaCoppStpDrop1moPktsRateLast

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293678: fltTcaCoppStpDrop1qtrPktsRateLast

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293679: fltTcaCoppStpDrop1yearPktsRateLast

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293680: fltTcaCoppStpDrop5minPktsRateMin

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293681: fltTcaCoppStpDrop15minPktsRateMin

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293682: fltTcaCoppStpDrop1hPktsRateMin

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293683: fltTcaCoppStpDrop1dPktsRateMin

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293684: fltTcaCoppStpDrop1wPktsRateMin

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293685: fltTcaCoppStpDrop1moPktsRateMin

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293686: fltTcaCoppStpDrop1qtrPktsRateMin

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293687: fltTcaCoppStpDrop1yearPktsRateMin

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293688: fltTcaCoppStpDrop5minPktsRateMax

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293689: fltTcaCoppStpDrop15minPktsRateMax

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293690: fltTcaCoppStpDrop1hPktsRateMax

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293691: fltTcaCoppStpDrop1dPktsRateMax

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293692: fltTcaCoppStpDrop1wPktsRateMax

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293693: fltTcaCoppStpDrop1moPktsRateMax

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293694: fltTcaCoppStpDrop1qtrPktsRateMax

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293695: fltTcaCoppStpDrop1yearPktsRateMax

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293696: fltTcaCoppStpDrop5minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293697: fltTcaCoppStpDrop15minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293698: fltTcaCoppStpDrop1hPktsRateAvg

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293699: fltTcaCoppStpDrop1dPktsRateAvg

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293700: fltTcaCoppStpDrop1wPktsRateAvg

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293701: fltTcaCoppStpDrop1moPktsRateAvg

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293702: fltTcaCoppStpDrop1qtrPktsRateAvg

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293703: fltTcaCoppStpDrop1yearPktsRateAvg

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293736: fltTcaCoppStpDrop5minPktsRateTr

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293737: fltTcaCoppStpDrop15minPktsRateTr

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293738: fltTcaCoppStpDrop1hPktsRateTr

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293739: fltTcaCoppStpDrop1dPktsRateTr

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293740: fltTcaCoppStpDrop1wPktsRateTr

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293741: fltTcaCoppStpDrop1moPktsRateTr

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293742: fltTcaCoppStpDrop1qtrPktsRateTr

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F293743: fltTcaCoppStpDrop1yearPktsRateTr

Severity: variable

Explanation: This fault is caused by "StpDropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "StpDropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2942: fltFabricRsDwdmFabIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2943: fltInfraRsDwdmIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2944: fltNdRsPfxPToNdPfxPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2948: fltFabricRsRemoteStatsServerResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2958: fltL2CktEpFloodInEncapNotSupported

Severity: warning

Explanation: This fault occurs when flood in encapsulation is enabled for an EPG in an unsupported platform

Recommended Action: To recover from this fault, try the following actions

1. Clear Flood in Encapsulation for this EPG

2. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F2959: fltL2CktEpIsolationAndFloodInEncapNotSupported

Severity: warning

Explanation: This fault occurs when intra-epg isolation and flood in enacapsulation is enabled for an EPG.

Recommended Action: To recover from this fault, try the following actions

1. Enable either intra-epg isolation or flood in enacapsulation on this EPG

2. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F296104: fltTcaDppIfCktAllow5minBytesLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296105: fltTcaDppIfCktAllow15minBytesLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296106: fltTcaDppIfCktAllow1hBytesLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296107: fltTcaDppIfCktAllow1dBytesLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296108: fltTcaDppIfCktAllow1wBytesLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296109: fltTcaDppIfCktAllow1moBytesLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296110: fltTcaDppIfCktAllow1qtrBytesLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296111: fltTcaDppIfCktAllow1yearBytesLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296120: fltTcaDppIfCktAllow5minBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296121: fltTcaDppIfCktAllow15minBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296122: fltTcaDppIfCktAllow1hBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296123: fltTcaDppIfCktAllow1dBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296124: fltTcaDppIfCktAllow1wBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296125: fltTcaDppIfCktAllow1moBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296126: fltTcaDppIfCktAllow1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296127: fltTcaDppIfCktAllow1yearBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296128: fltTcaDppIfCktAllow5minBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296129: fltTcaDppIfCktAllow15minBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296130: fltTcaDppIfCktAllow1hBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296131: fltTcaDppIfCktAllow1dBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296132: fltTcaDppIfCktAllow1wBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296133: fltTcaDppIfCktAllow1moBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296134: fltTcaDppIfCktAllow1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296135: fltTcaDppIfCktAllow1yearBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296136: fltTcaDppIfCktAllow5minBytesMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296137: fltTcaDppIfCktAllow15minBytesMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296138: fltTcaDppIfCktAllow1hBytesMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296139: fltTcaDppIfCktAllow1dBytesMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296140: fltTcaDppIfCktAllow1wBytesMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296141: fltTcaDppIfCktAllow1moBytesMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296142: fltTcaDppIfCktAllow1qtrBytesMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296143: fltTcaDppIfCktAllow1yearBytesMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296144: fltTcaDppIfCktAllow5minBytesMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296145: fltTcaDppIfCktAllow15minBytesMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296146: fltTcaDppIfCktAllow1hBytesMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296147: fltTcaDppIfCktAllow1dBytesMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296148: fltTcaDppIfCktAllow1wBytesMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296149: fltTcaDppIfCktAllow1moBytesMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296150: fltTcaDppIfCktAllow1qtrBytesMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296151: fltTcaDppIfCktAllow1yearBytesMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296152: fltTcaDppIfCktAllow5minBytesAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296153: fltTcaDppIfCktAllow15minBytesAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296154: fltTcaDppIfCktAllow1hBytesAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296155: fltTcaDppIfCktAllow1dBytesAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296156: fltTcaDppIfCktAllow1wBytesAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296157: fltTcaDppIfCktAllow1moBytesAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296158: fltTcaDppIfCktAllow1qtrBytesAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296159: fltTcaDppIfCktAllow1yearBytesAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296184: fltTcaDppIfCktAllow5minBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296185: fltTcaDppIfCktAllow15minBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296186: fltTcaDppIfCktAllow1hBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296187: fltTcaDppIfCktAllow1dBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296188: fltTcaDppIfCktAllow1wBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296189: fltTcaDppIfCktAllow1moBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296190: fltTcaDppIfCktAllow1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296191: fltTcaDppIfCktAllow1yearBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296192: fltTcaDppIfCktAllow5minBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296193: fltTcaDppIfCktAllow15minBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296194: fltTcaDppIfCktAllow1hBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296195: fltTcaDppIfCktAllow1dBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296196: fltTcaDppIfCktAllow1wBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296197: fltTcaDppIfCktAllow1moBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296198: fltTcaDppIfCktAllow1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296199: fltTcaDppIfCktAllow1yearBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2962: fltFabricRsNodeFlowServersResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F296272: fltTcaDppIfCktAllow5minBytesRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296273: fltTcaDppIfCktAllow15minBytesRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296274: fltTcaDppIfCktAllow1hBytesRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296275: fltTcaDppIfCktAllow1dBytesRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296276: fltTcaDppIfCktAllow1wBytesRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296277: fltTcaDppIfCktAllow1moBytesRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296278: fltTcaDppIfCktAllow1qtrBytesRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296279: fltTcaDppIfCktAllow1yearBytesRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296280: fltTcaDppIfCktAllow5minBytesRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296281: fltTcaDppIfCktAllow15minBytesRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296282: fltTcaDppIfCktAllow1hBytesRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296283: fltTcaDppIfCktAllow1dBytesRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296284: fltTcaDppIfCktAllow1wBytesRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296285: fltTcaDppIfCktAllow1moBytesRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296286: fltTcaDppIfCktAllow1qtrBytesRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296287: fltTcaDppIfCktAllow1yearBytesRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296288: fltTcaDppIfCktAllow5minBytesRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296289: fltTcaDppIfCktAllow15minBytesRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296290: fltTcaDppIfCktAllow1hBytesRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296291: fltTcaDppIfCktAllow1dBytesRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296292: fltTcaDppIfCktAllow1wBytesRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296293: fltTcaDppIfCktAllow1moBytesRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296294: fltTcaDppIfCktAllow1qtrBytesRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296295: fltTcaDppIfCktAllow1yearBytesRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296296: fltTcaDppIfCktAllow5minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296297: fltTcaDppIfCktAllow15minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296298: fltTcaDppIfCktAllow1hBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296299: fltTcaDppIfCktAllow1dBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296300: fltTcaDppIfCktAllow1wBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296301: fltTcaDppIfCktAllow1moBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296302: fltTcaDppIfCktAllow1qtrBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296303: fltTcaDppIfCktAllow1yearBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296336: fltTcaDppIfCktAllow5minBytesRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296337: fltTcaDppIfCktAllow15minBytesRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296338: fltTcaDppIfCktAllow1hBytesRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296339: fltTcaDppIfCktAllow1dBytesRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296340: fltTcaDppIfCktAllow1wBytesRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296341: fltTcaDppIfCktAllow1moBytesRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296342: fltTcaDppIfCktAllow1qtrBytesRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296343: fltTcaDppIfCktAllow1yearBytesRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296392: fltTcaDppIfCktAllow5minPktsLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296393: fltTcaDppIfCktAllow15minPktsLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296394: fltTcaDppIfCktAllow1hPktsLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296395: fltTcaDppIfCktAllow1dPktsLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296396: fltTcaDppIfCktAllow1wPktsLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296397: fltTcaDppIfCktAllow1moPktsLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296398: fltTcaDppIfCktAllow1qtrPktsLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296399: fltTcaDppIfCktAllow1yearPktsLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296408: fltTcaDppIfCktAllow5minPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296409: fltTcaDppIfCktAllow15minPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296410: fltTcaDppIfCktAllow1hPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296411: fltTcaDppIfCktAllow1dPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296412: fltTcaDppIfCktAllow1wPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296413: fltTcaDppIfCktAllow1moPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296414: fltTcaDppIfCktAllow1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296415: fltTcaDppIfCktAllow1yearPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296416: fltTcaDppIfCktAllow5minPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296417: fltTcaDppIfCktAllow15minPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296418: fltTcaDppIfCktAllow1hPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296419: fltTcaDppIfCktAllow1dPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296420: fltTcaDppIfCktAllow1wPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296421: fltTcaDppIfCktAllow1moPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296422: fltTcaDppIfCktAllow1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296423: fltTcaDppIfCktAllow1yearPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296424: fltTcaDppIfCktAllow5minPktsMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296425: fltTcaDppIfCktAllow15minPktsMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296426: fltTcaDppIfCktAllow1hPktsMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296427: fltTcaDppIfCktAllow1dPktsMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296428: fltTcaDppIfCktAllow1wPktsMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296429: fltTcaDppIfCktAllow1moPktsMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296430: fltTcaDppIfCktAllow1qtrPktsMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296431: fltTcaDppIfCktAllow1yearPktsMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296432: fltTcaDppIfCktAllow5minPktsMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296433: fltTcaDppIfCktAllow15minPktsMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296434: fltTcaDppIfCktAllow1hPktsMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296435: fltTcaDppIfCktAllow1dPktsMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296436: fltTcaDppIfCktAllow1wPktsMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296437: fltTcaDppIfCktAllow1moPktsMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296438: fltTcaDppIfCktAllow1qtrPktsMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296439: fltTcaDppIfCktAllow1yearPktsMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296440: fltTcaDppIfCktAllow5minPktsAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296441: fltTcaDppIfCktAllow15minPktsAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296442: fltTcaDppIfCktAllow1hPktsAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296443: fltTcaDppIfCktAllow1dPktsAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296444: fltTcaDppIfCktAllow1wPktsAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296445: fltTcaDppIfCktAllow1moPktsAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296446: fltTcaDppIfCktAllow1qtrPktsAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296447: fltTcaDppIfCktAllow1yearPktsAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296472: fltTcaDppIfCktAllow5minPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296473: fltTcaDppIfCktAllow15minPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296474: fltTcaDppIfCktAllow1hPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296475: fltTcaDppIfCktAllow1dPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296476: fltTcaDppIfCktAllow1wPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296477: fltTcaDppIfCktAllow1moPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296478: fltTcaDppIfCktAllow1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296479: fltTcaDppIfCktAllow1yearPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296480: fltTcaDppIfCktAllow5minPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296481: fltTcaDppIfCktAllow15minPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296482: fltTcaDppIfCktAllow1hPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296483: fltTcaDppIfCktAllow1dPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296484: fltTcaDppIfCktAllow1wPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296485: fltTcaDppIfCktAllow1moPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296486: fltTcaDppIfCktAllow1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296487: fltTcaDppIfCktAllow1yearPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296560: fltTcaDppIfCktAllow5minPktsRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296561: fltTcaDppIfCktAllow15minPktsRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296562: fltTcaDppIfCktAllow1hPktsRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296563: fltTcaDppIfCktAllow1dPktsRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296564: fltTcaDppIfCktAllow1wPktsRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296565: fltTcaDppIfCktAllow1moPktsRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296566: fltTcaDppIfCktAllow1qtrPktsRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296567: fltTcaDppIfCktAllow1yearPktsRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296568: fltTcaDppIfCktAllow5minPktsRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296569: fltTcaDppIfCktAllow15minPktsRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296570: fltTcaDppIfCktAllow1hPktsRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296571: fltTcaDppIfCktAllow1dPktsRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296572: fltTcaDppIfCktAllow1wPktsRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296573: fltTcaDppIfCktAllow1moPktsRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296574: fltTcaDppIfCktAllow1qtrPktsRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296575: fltTcaDppIfCktAllow1yearPktsRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296576: fltTcaDppIfCktAllow5minPktsRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296577: fltTcaDppIfCktAllow15minPktsRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296578: fltTcaDppIfCktAllow1hPktsRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296579: fltTcaDppIfCktAllow1dPktsRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296580: fltTcaDppIfCktAllow1wPktsRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296581: fltTcaDppIfCktAllow1moPktsRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296582: fltTcaDppIfCktAllow1qtrPktsRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296583: fltTcaDppIfCktAllow1yearPktsRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296584: fltTcaDppIfCktAllow5minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296585: fltTcaDppIfCktAllow15minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296586: fltTcaDppIfCktAllow1hPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296587: fltTcaDppIfCktAllow1dPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296588: fltTcaDppIfCktAllow1wPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296589: fltTcaDppIfCktAllow1moPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296590: fltTcaDppIfCktAllow1qtrPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296591: fltTcaDppIfCktAllow1yearPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2966: fltTelemetryRsToInbCtxDefResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F296624: fltTcaDppIfCktAllow5minPktsRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296625: fltTcaDppIfCktAllow15minPktsRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296626: fltTcaDppIfCktAllow1hPktsRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296627: fltTcaDppIfCktAllow1dPktsRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296628: fltTcaDppIfCktAllow1wPktsRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296629: fltTcaDppIfCktAllow1moPktsRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296630: fltTcaDppIfCktAllow1qtrPktsRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296631: fltTcaDppIfCktAllow1yearPktsRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296680: fltTcaDppIfCktDrop5minBytesLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296681: fltTcaDppIfCktDrop15minBytesLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296682: fltTcaDppIfCktDrop1hBytesLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296683: fltTcaDppIfCktDrop1dBytesLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296684: fltTcaDppIfCktDrop1wBytesLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296685: fltTcaDppIfCktDrop1moBytesLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296686: fltTcaDppIfCktDrop1qtrBytesLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296687: fltTcaDppIfCktDrop1yearBytesLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296696: fltTcaDppIfCktDrop5minBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296697: fltTcaDppIfCktDrop15minBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296698: fltTcaDppIfCktDrop1hBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296699: fltTcaDppIfCktDrop1dBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2967: fltRadiusServerHostRadiusConfigError

Severity: minor

Explanation: This fault occurs when Radius server host is configured with invalid VRF

Recommended Action: If you see this fault, take the following actions

1. Check the Radius host VRF configuration

F296700: fltTcaDppIfCktDrop1wBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296701: fltTcaDppIfCktDrop1moBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296702: fltTcaDppIfCktDrop1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296703: fltTcaDppIfCktDrop1yearBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296704: fltTcaDppIfCktDrop5minBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296705: fltTcaDppIfCktDrop15minBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296706: fltTcaDppIfCktDrop1hBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296707: fltTcaDppIfCktDrop1dBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296708: fltTcaDppIfCktDrop1wBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296709: fltTcaDppIfCktDrop1moBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296710: fltTcaDppIfCktDrop1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296711: fltTcaDppIfCktDrop1yearBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296712: fltTcaDppIfCktDrop5minBytesMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296713: fltTcaDppIfCktDrop15minBytesMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296714: fltTcaDppIfCktDrop1hBytesMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296715: fltTcaDppIfCktDrop1dBytesMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296716: fltTcaDppIfCktDrop1wBytesMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296717: fltTcaDppIfCktDrop1moBytesMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296718: fltTcaDppIfCktDrop1qtrBytesMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296719: fltTcaDppIfCktDrop1yearBytesMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296720: fltTcaDppIfCktDrop5minBytesMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296721: fltTcaDppIfCktDrop15minBytesMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296722: fltTcaDppIfCktDrop1hBytesMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296723: fltTcaDppIfCktDrop1dBytesMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296724: fltTcaDppIfCktDrop1wBytesMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296725: fltTcaDppIfCktDrop1moBytesMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296726: fltTcaDppIfCktDrop1qtrBytesMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296727: fltTcaDppIfCktDrop1yearBytesMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296728: fltTcaDppIfCktDrop5minBytesAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296729: fltTcaDppIfCktDrop15minBytesAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296730: fltTcaDppIfCktDrop1hBytesAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296731: fltTcaDppIfCktDrop1dBytesAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296732: fltTcaDppIfCktDrop1wBytesAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296733: fltTcaDppIfCktDrop1moBytesAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296734: fltTcaDppIfCktDrop1qtrBytesAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296735: fltTcaDppIfCktDrop1yearBytesAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296760: fltTcaDppIfCktDrop5minBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296761: fltTcaDppIfCktDrop15minBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296762: fltTcaDppIfCktDrop1hBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296763: fltTcaDppIfCktDrop1dBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296764: fltTcaDppIfCktDrop1wBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296765: fltTcaDppIfCktDrop1moBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296766: fltTcaDppIfCktDrop1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296767: fltTcaDppIfCktDrop1yearBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296768: fltTcaDppIfCktDrop5minBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296769: fltTcaDppIfCktDrop15minBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296770: fltTcaDppIfCktDrop1hBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296771: fltTcaDppIfCktDrop1dBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296772: fltTcaDppIfCktDrop1wBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296773: fltTcaDppIfCktDrop1moBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296774: fltTcaDppIfCktDrop1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296775: fltTcaDppIfCktDrop1yearBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2968: fltMacsecFabIfNWIssue

Severity: major

Explanation: This fault occurs because MACSec policy cannot be deployed on the interface.

Recommended Action: If you see this fault, talk appropriate action based on the specific fault.

F296848: fltTcaDppIfCktDrop5minBytesRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296849: fltTcaDppIfCktDrop15minBytesRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296850: fltTcaDppIfCktDrop1hBytesRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296851: fltTcaDppIfCktDrop1dBytesRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296852: fltTcaDppIfCktDrop1wBytesRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296853: fltTcaDppIfCktDrop1moBytesRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296854: fltTcaDppIfCktDrop1qtrBytesRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296855: fltTcaDppIfCktDrop1yearBytesRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296856: fltTcaDppIfCktDrop5minBytesRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296857: fltTcaDppIfCktDrop15minBytesRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296858: fltTcaDppIfCktDrop1hBytesRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296859: fltTcaDppIfCktDrop1dBytesRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296860: fltTcaDppIfCktDrop1wBytesRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296861: fltTcaDppIfCktDrop1moBytesRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296862: fltTcaDppIfCktDrop1qtrBytesRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296863: fltTcaDppIfCktDrop1yearBytesRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296864: fltTcaDppIfCktDrop5minBytesRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296865: fltTcaDppIfCktDrop15minBytesRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296866: fltTcaDppIfCktDrop1hBytesRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296867: fltTcaDppIfCktDrop1dBytesRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296868: fltTcaDppIfCktDrop1wBytesRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296869: fltTcaDppIfCktDrop1moBytesRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296870: fltTcaDppIfCktDrop1qtrBytesRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296871: fltTcaDppIfCktDrop1yearBytesRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296872: fltTcaDppIfCktDrop5minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296873: fltTcaDppIfCktDrop15minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296874: fltTcaDppIfCktDrop1hBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296875: fltTcaDppIfCktDrop1dBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296876: fltTcaDppIfCktDrop1wBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296877: fltTcaDppIfCktDrop1moBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296878: fltTcaDppIfCktDrop1qtrBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296879: fltTcaDppIfCktDrop1yearBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296912: fltTcaDppIfCktDrop5minBytesRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296913: fltTcaDppIfCktDrop15minBytesRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296914: fltTcaDppIfCktDrop1hBytesRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296915: fltTcaDppIfCktDrop1dBytesRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296916: fltTcaDppIfCktDrop1wBytesRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296917: fltTcaDppIfCktDrop1moBytesRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296918: fltTcaDppIfCktDrop1qtrBytesRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296919: fltTcaDppIfCktDrop1yearBytesRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296968: fltTcaDppIfCktDrop5minPktsLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296969: fltTcaDppIfCktDrop15minPktsLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296970: fltTcaDppIfCktDrop1hPktsLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296971: fltTcaDppIfCktDrop1dPktsLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296972: fltTcaDppIfCktDrop1wPktsLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296973: fltTcaDppIfCktDrop1moPktsLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296974: fltTcaDppIfCktDrop1qtrPktsLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296975: fltTcaDppIfCktDrop1yearPktsLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296984: fltTcaDppIfCktDrop5minPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296985: fltTcaDppIfCktDrop15minPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296986: fltTcaDppIfCktDrop1hPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296987: fltTcaDppIfCktDrop1dPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296988: fltTcaDppIfCktDrop1wPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296989: fltTcaDppIfCktDrop1moPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296990: fltTcaDppIfCktDrop1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296991: fltTcaDppIfCktDrop1yearPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296992: fltTcaDppIfCktDrop5minPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296993: fltTcaDppIfCktDrop15minPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296994: fltTcaDppIfCktDrop1hPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296995: fltTcaDppIfCktDrop1dPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296996: fltTcaDppIfCktDrop1wPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296997: fltTcaDppIfCktDrop1moPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296998: fltTcaDppIfCktDrop1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F296999: fltTcaDppIfCktDrop1yearPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297000: fltTcaDppIfCktDrop5minPktsMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297001: fltTcaDppIfCktDrop15minPktsMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297002: fltTcaDppIfCktDrop1hPktsMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297003: fltTcaDppIfCktDrop1dPktsMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297004: fltTcaDppIfCktDrop1wPktsMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297005: fltTcaDppIfCktDrop1moPktsMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297006: fltTcaDppIfCktDrop1qtrPktsMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297007: fltTcaDppIfCktDrop1yearPktsMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297008: fltTcaDppIfCktDrop5minPktsMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297009: fltTcaDppIfCktDrop15minPktsMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297010: fltTcaDppIfCktDrop1hPktsMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297011: fltTcaDppIfCktDrop1dPktsMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297012: fltTcaDppIfCktDrop1wPktsMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297013: fltTcaDppIfCktDrop1moPktsMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297014: fltTcaDppIfCktDrop1qtrPktsMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297015: fltTcaDppIfCktDrop1yearPktsMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297016: fltTcaDppIfCktDrop5minPktsAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297017: fltTcaDppIfCktDrop15minPktsAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297018: fltTcaDppIfCktDrop1hPktsAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297019: fltTcaDppIfCktDrop1dPktsAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297020: fltTcaDppIfCktDrop1wPktsAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297021: fltTcaDppIfCktDrop1moPktsAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297022: fltTcaDppIfCktDrop1qtrPktsAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297023: fltTcaDppIfCktDrop1yearPktsAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297048: fltTcaDppIfCktDrop5minPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297049: fltTcaDppIfCktDrop15minPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297050: fltTcaDppIfCktDrop1hPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297051: fltTcaDppIfCktDrop1dPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297052: fltTcaDppIfCktDrop1wPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297053: fltTcaDppIfCktDrop1moPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297054: fltTcaDppIfCktDrop1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297055: fltTcaDppIfCktDrop1yearPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297056: fltTcaDppIfCktDrop5minPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297057: fltTcaDppIfCktDrop15minPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297058: fltTcaDppIfCktDrop1hPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297059: fltTcaDppIfCktDrop1dPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297060: fltTcaDppIfCktDrop1wPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297061: fltTcaDppIfCktDrop1moPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297062: fltTcaDppIfCktDrop1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297063: fltTcaDppIfCktDrop1yearPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297136: fltTcaDppIfCktDrop5minPktsRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297137: fltTcaDppIfCktDrop15minPktsRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297138: fltTcaDppIfCktDrop1hPktsRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297139: fltTcaDppIfCktDrop1dPktsRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297140: fltTcaDppIfCktDrop1wPktsRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297141: fltTcaDppIfCktDrop1moPktsRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297142: fltTcaDppIfCktDrop1qtrPktsRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297143: fltTcaDppIfCktDrop1yearPktsRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297144: fltTcaDppIfCktDrop5minPktsRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297145: fltTcaDppIfCktDrop15minPktsRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297146: fltTcaDppIfCktDrop1hPktsRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297147: fltTcaDppIfCktDrop1dPktsRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297148: fltTcaDppIfCktDrop1wPktsRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297149: fltTcaDppIfCktDrop1moPktsRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297150: fltTcaDppIfCktDrop1qtrPktsRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297151: fltTcaDppIfCktDrop1yearPktsRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297152: fltTcaDppIfCktDrop5minPktsRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297153: fltTcaDppIfCktDrop15minPktsRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297154: fltTcaDppIfCktDrop1hPktsRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297155: fltTcaDppIfCktDrop1dPktsRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297156: fltTcaDppIfCktDrop1wPktsRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297157: fltTcaDppIfCktDrop1moPktsRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297158: fltTcaDppIfCktDrop1qtrPktsRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297159: fltTcaDppIfCktDrop1yearPktsRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297160: fltTcaDppIfCktDrop5minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297161: fltTcaDppIfCktDrop15minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297162: fltTcaDppIfCktDrop1hPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297163: fltTcaDppIfCktDrop1dPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297164: fltTcaDppIfCktDrop1wPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297165: fltTcaDppIfCktDrop1moPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297166: fltTcaDppIfCktDrop1qtrPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297167: fltTcaDppIfCktDrop1yearPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2972: fltEqptReloadSwitchNodeReloadRequest

Severity: major

Explanation: This Fault usually occurs if some feature requested the switch reboot.

Recommended Action: Reload the box where fault is getting generated.

F297200: fltTcaDppIfCktDrop5minPktsRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297201: fltTcaDppIfCktDrop15minPktsRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297202: fltTcaDppIfCktDrop1hPktsRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297203: fltTcaDppIfCktDrop1dPktsRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297204: fltTcaDppIfCktDrop1wPktsRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297205: fltTcaDppIfCktDrop1moPktsRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297206: fltTcaDppIfCktDrop1qtrPktsRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F297207: fltTcaDppIfCktDrop1yearPktsRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F2973: fltEqptPortPOperStNotSupported

Severity: warning

Explanation: This fault occurs when applying portp policy on a port fails.

Recommended Action: If the portp policy fails, check if the port supports portp configuration.

F2974: fltEpmSviIpEpEpIPSVI

Severity: warning

Explanation: This fault occurs when a duplicate learn is received for a SVI IP. This packet is dropped and a fault is raised

Recommended Action: If this fault is seen consistently, try the following actions

1. Remove the misconfiguration of having IP as same as SVI IP

2. If the above actions do not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F2975: fltFvRsVrfValidationPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2977: fltTelemetryRsToRemoteLogServerResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2978: fltTelemetryRsToLogServerGrpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2980: fltLatencyPtpModePtpNotEnabled

Severity: minor

Explanation: This fault occurs when we try to configure a latency policy while precision time protocol is disabled.

Recommended Action: If you see this fault, take the following actions:

1. Enable Precision Time Protocol

F2981: fltEqptPortPOperStLimitExceeded

Severity: warning

Explanation: This fault occurs when applying portp policy on a port exceeds the limit allowed.

Recommended Action: If the portp policy exceeds the limit allowed, check if the number of portp configuration.

F2982: fltFhsViolationEventFhsViolationWarning

Severity: minor

Explanation: This fault occurs when First Hop Security detects security violation

Recommended Action: To recover from this fault, try the following actions

1. Track the endpoint causing the violation to see if it is a real threat and remove it from the network, use the ep attributes displayed in the message to track its location

F2984: fltTelemetryRsToStatsServerGrpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2985: fltTelemetryRsToRemoteStatsServerResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2986: fltKcEntryNumMacSecKeysLimitExceeded

Severity: major

Explanation: This fault occurs when the number of MacSec keys is more than 64

Recommended Action: To recover from this fault, try the following actions

1. Delete the excess number of MacSec keys in keychain

F2987: fltVnsRsProfToCloudModeMDevResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2990: fltApAnomalyAnomalyDetected

Severity: major

Explanation: This fault occurs when an anomaly is reported on the app.

Recommended Action: If you see this fault, check for the reason in the fault message. Try to resolve based on the reason mentioned. If issue persist, contact Cisco TAC.

F2991: fltCompSvmNicInfoOperationalIssues

Severity: critical

Explanation: This fault is raised when both the opflex channels are down on AVE host.

Recommended Action: If you see this fault, take the following actions:

1. Do vem restart on AVE.

2. If the above command doesn't fix, check the vnics and portgroups on the vcenter.

3. Check the AEP configuration on the APIC.

4. Check the ipaddress for kni interfaces on AVE and try pinging leaf.

5. If the above actions did not resolve the issue, collect avs-tech-support file and contact Cisco TAC.

F2992: fltSvcredirRsDestAttOperStFailed

Severity: major

Explanation: This fault occurs when corresponding PBR service destination goes to failed state

Recommended Action: To recover from this fault, try the following actions

1. Check if hardware supports this feature

2. Look at any configuration issues

3. Verify the configuration is correct/complete

4. Check the routes and reachability of this dest

F2995: fltSvcredirHealthGrpDestOperStFailed

Severity: major

Explanation: This fault occurs when PBR health group dest goes down

Recommended Action: To recover from this fault, try the following actions

1. Health group destination should be tracked as UP

F2996: fltEqptFeatureExNodeFeatureRequest

Severity: major

Explanation: This Fault usually occurs if some feature enable was requested but failed due to mutual exclusion.

Recommended Action: Make sure the required feature is enabled. Do not enable multiple feature at once.

F2998: fltTelemetryRsToFltPolGrpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F2999: fltTelemetryRsToFlowServerGrpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

Chapter 7. ACI F3x Messages

- ACI F3* Commands

ACI F3* Commands

F3000: fltMacsecIfOperStSessionNotSecured

Severity: warning

Explanation: This fault occurs when the session is not secured

Recommended Action: This fault occurs when the session is not secured

F3001: fltMacsecFabIfOperStSessionNotSecured

Severity: warning

Explanation: This fault occurs when the session is not secured

Recommended Action: This fault occurs when the session is not secured

F3007: fltCallhomeRsSmartdestGroupResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3010: fltFabricRsTwampResponderPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3011: fltFabricRsTwampServerPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3013: fltEpmRogueIpEpEpIPRogue

Severity: warning

Explanation: This fault occurs when a IP endpoint turns rogue

Recommended Action: If this fault is consistently happening, try the following actions

1. Check endpoint connectivity

2. Shutdown endpoint

3. If the network connectivity is fine, generate the show tech-support file and contact Cisco TAC.

F3014: fltEpmRogueMacEpEpMACRogue

Severity: warning

Explanation: This fault occurs when a MAC endpoint turns rogue

Recommended Action: If this fault is consistently happening, try the following actions

1. Check endpoint connectivity

2. Shutdown endpoint

3. If the network connectivity is fine, generate the show tech-support file and contact Cisco TAC.

F301616: fltTcaCoppPermit5minBytesLast

Severity: variable

Explanation: This fault is caused by "Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301617: fltTcaCoppPermit15minBytesLast

Severity: variable

Explanation: This fault is caused by "Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301618: fltTcaCoppPermit1hBytesLast

Severity: variable

Explanation: This fault is caused by "Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301619: fltTcaCoppPermit1dBytesLast

Severity: variable

Explanation: This fault is caused by "Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301620: fltTcaCoppPermit1wBytesLast

Severity: variable

Explanation: This fault is caused by "Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301621: fltTcaCoppPermit1moBytesLast

Severity: variable

Explanation: This fault is caused by "Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301622: fltTcaCoppPermit1qtrBytesLast

Severity: variable

Explanation: This fault is caused by "Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301623: fltTcaCoppPermit1yearBytesLast

Severity: variable

Explanation: This fault is caused by "Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301632: fltTcaCoppPermit5minBytesCum

Severity: variable

Explanation: This fault is caused by "Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301633: fltTcaCoppPermit15minBytesCum

Severity: variable

Explanation: This fault is caused by "Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301634: fltTcaCoppPermit1hBytesCum

Severity: variable

Explanation: This fault is caused by "Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301635: fltTcaCoppPermit1dBytesCum

Severity: variable

Explanation: This fault is caused by "Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301636: fltTcaCoppPermit1wBytesCum

Severity: variable

Explanation: This fault is caused by "Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301637: fltTcaCoppPermit1moBytesCum

Severity: variable

Explanation: This fault is caused by "Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301638: fltTcaCoppPermit1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301639: fltTcaCoppPermit1yearBytesCum

Severity: variable

Explanation: This fault is caused by "Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301640: fltTcaCoppPermit5minBytesPer

Severity: variable

Explanation: This fault is caused by "Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301641: fltTcaCoppPermit15minBytesPer

Severity: variable

Explanation: This fault is caused by "Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301642: fltTcaCoppPermit1hBytesPer

Severity: variable

Explanation: This fault is caused by "Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301643: fltTcaCoppPermit1dBytesPer

Severity: variable

Explanation: This fault is caused by "Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301644: fltTcaCoppPermit1wBytesPer

Severity: variable

Explanation: This fault is caused by "Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301645: fltTcaCoppPermit1moBytesPer

Severity: variable

Explanation: This fault is caused by "Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301646: fltTcaCoppPermit1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301647: fltTcaCoppPermit1yearBytesPer

Severity: variable

Explanation: This fault is caused by "Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301648: fltTcaCoppPermit5minBytesMin

Severity: variable

Explanation: This fault is caused by "Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301649: fltTcaCoppPermit15minBytesMin

Severity: variable

Explanation: This fault is caused by "Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301650: fltTcaCoppPermit1hBytesMin

Severity: variable

Explanation: This fault is caused by "Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301651: fltTcaCoppPermit1dBytesMin

Severity: variable

Explanation: This fault is caused by "Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301652: fltTcaCoppPermit1wBytesMin

Severity: variable

Explanation: This fault is caused by "Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301653: fltTcaCoppPermit1moBytesMin

Severity: variable

Explanation: This fault is caused by "Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301654: fltTcaCoppPermit1qtrBytesMin

Severity: variable

Explanation: This fault is caused by "Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301655: fltTcaCoppPermit1yearBytesMin

Severity: variable

Explanation: This fault is caused by "Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301656: fltTcaCoppPermit5minBytesMax

Severity: variable

Explanation: This fault is caused by "Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301657: fltTcaCoppPermit15minBytesMax

Severity: variable

Explanation: This fault is caused by "Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301658: fltTcaCoppPermit1hBytesMax

Severity: variable

Explanation: This fault is caused by "Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301659: fltTcaCoppPermit1dBytesMax

Severity: variable

Explanation: This fault is caused by "Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301660: fltTcaCoppPermit1wBytesMax

Severity: variable

Explanation: This fault is caused by "Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301661: fltTcaCoppPermit1moBytesMax

Severity: variable

Explanation: This fault is caused by "Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301662: fltTcaCoppPermit1qtrBytesMax

Severity: variable

Explanation: This fault is caused by "Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301663: fltTcaCoppPermit1yearBytesMax

Severity: variable

Explanation: This fault is caused by "Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301664: fltTcaCoppPermit5minBytesAvg

Severity: variable

Explanation: This fault is caused by "Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301665: fltTcaCoppPermit15minBytesAvg

Severity: variable

Explanation: This fault is caused by "Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301666: fltTcaCoppPermit1hBytesAvg

Severity: variable

Explanation: This fault is caused by "Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301667: fltTcaCoppPermit1dBytesAvg

Severity: variable

Explanation: This fault is caused by "Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301668: fltTcaCoppPermit1wBytesAvg

Severity: variable

Explanation: This fault is caused by "Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301669: fltTcaCoppPermit1moBytesAvg

Severity: variable

Explanation: This fault is caused by "Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301670: fltTcaCoppPermit1qtrBytesAvg

Severity: variable

Explanation: This fault is caused by "Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301671: fltTcaCoppPermit1yearBytesAvg

Severity: variable

Explanation: This fault is caused by "Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301696: fltTcaCoppPermit5minBytesTr

Severity: variable

Explanation: This fault is caused by "Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301697: fltTcaCoppPermit15minBytesTr

Severity: variable

Explanation: This fault is caused by "Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301698: fltTcaCoppPermit1hBytesTr

Severity: variable

Explanation: This fault is caused by "Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301699: fltTcaCoppPermit1dBytesTr

Severity: variable

Explanation: This fault is caused by "Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301700: fltTcaCoppPermit1wBytesTr

Severity: variable

Explanation: This fault is caused by "Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301701: fltTcaCoppPermit1moBytesTr

Severity: variable

Explanation: This fault is caused by "Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301702: fltTcaCoppPermit1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301703: fltTcaCoppPermit1yearBytesTr

Severity: variable

Explanation: This fault is caused by "Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301704: fltTcaCoppPermit5minBytesRate

Severity: variable

Explanation: This fault is caused by "Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301705: fltTcaCoppPermit15minBytesRate

Severity: variable

Explanation: This fault is caused by "Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301706: fltTcaCoppPermit1hBytesRate

Severity: variable

Explanation: This fault is caused by "Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301707: fltTcaCoppPermit1dBytesRate

Severity: variable

Explanation: This fault is caused by "Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301708: fltTcaCoppPermit1wBytesRate

Severity: variable

Explanation: This fault is caused by "Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301709: fltTcaCoppPermit1moBytesRate

Severity: variable

Explanation: This fault is caused by "Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301710: fltTcaCoppPermit1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301711: fltTcaCoppPermit1yearBytesRate

Severity: variable

Explanation: This fault is caused by "Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301784: fltTcaCoppPermit5minBytesRateLast

Severity: variable

Explanation: This fault is caused by "Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301785: fltTcaCoppPermit15minBytesRateLast

Severity: variable

Explanation: This fault is caused by "Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301786: fltTcaCoppPermit1hBytesRateLast

Severity: variable

Explanation: This fault is caused by "Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301787: fltTcaCoppPermit1dBytesRateLast

Severity: variable

Explanation: This fault is caused by "Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301788: fltTcaCoppPermit1wBytesRateLast

Severity: variable

Explanation: This fault is caused by "Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301789: fltTcaCoppPermit1moBytesRateLast

Severity: variable

Explanation: This fault is caused by "Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301790: fltTcaCoppPermit1qtrBytesRateLast

Severity: variable

Explanation: This fault is caused by "Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301791: fltTcaCoppPermit1yearBytesRateLast

Severity: variable

Explanation: This fault is caused by "Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301792: fltTcaCoppPermit5minBytesRateMin

Severity: variable

Explanation: This fault is caused by "Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301793: fltTcaCoppPermit15minBytesRateMin

Severity: variable

Explanation: This fault is caused by "Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301794: fltTcaCoppPermit1hBytesRateMin

Severity: variable

Explanation: This fault is caused by "Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301795: fltTcaCoppPermit1dBytesRateMin

Severity: variable

Explanation: This fault is caused by "Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301796: fltTcaCoppPermit1wBytesRateMin

Severity: variable

Explanation: This fault is caused by "Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301797: fltTcaCoppPermit1moBytesRateMin

Severity: variable

Explanation: This fault is caused by "Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301798: fltTcaCoppPermit1qtrBytesRateMin

Severity: variable

Explanation: This fault is caused by "Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301799: fltTcaCoppPermit1yearBytesRateMin

Severity: variable

Explanation: This fault is caused by "Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3018: fltSpanRsSpanSrcToL3OutAttOperStFailed

Severity: major

Explanation: This fault occurs when span source on a l3out interface goes to failed state

Recommended Action: To recover from this fault, try the following actions

1. Look at any configuration issues in associating port with l3out interface

2. Verify the configuration is correct/complete

3. Check network connectivity and ensure the l3out interface is up

F301800: fltTcaCoppPermit5minBytesRateMax

Severity: variable

Explanation: This fault is caused by "Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301801: fltTcaCoppPermit15minBytesRateMax

Severity: variable

Explanation: This fault is caused by "Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301802: fltTcaCoppPermit1hBytesRateMax

Severity: variable

Explanation: This fault is caused by "Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301803: fltTcaCoppPermit1dBytesRateMax

Severity: variable

Explanation: This fault is caused by "Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301804: fltTcaCoppPermit1wBytesRateMax

Severity: variable

Explanation: This fault is caused by "Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301805: fltTcaCoppPermit1moBytesRateMax

Severity: variable

Explanation: This fault is caused by "Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301806: fltTcaCoppPermit1qtrBytesRateMax

Severity: variable

Explanation: This fault is caused by "Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301807: fltTcaCoppPermit1yearBytesRateMax

Severity: variable

Explanation: This fault is caused by "Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301808: fltTcaCoppPermit5minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301809: fltTcaCoppPermit15minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301810: fltTcaCoppPermit1hBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301811: fltTcaCoppPermit1dBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301812: fltTcaCoppPermit1wBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301813: fltTcaCoppPermit1moBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301814: fltTcaCoppPermit1qtrBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301815: fltTcaCoppPermit1yearBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301848: fltTcaCoppPermit5minBytesRateTr

Severity: variable

Explanation: This fault is caused by "Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301849: fltTcaCoppPermit15minBytesRateTr

Severity: variable

Explanation: This fault is caused by "Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301850: fltTcaCoppPermit1hBytesRateTr

Severity: variable

Explanation: This fault is caused by "Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301851: fltTcaCoppPermit1dBytesRateTr

Severity: variable

Explanation: This fault is caused by "Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301852: fltTcaCoppPermit1wBytesRateTr

Severity: variable

Explanation: This fault is caused by "Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301853: fltTcaCoppPermit1moBytesRateTr

Severity: variable

Explanation: This fault is caused by "Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301854: fltTcaCoppPermit1qtrBytesRateTr

Severity: variable

Explanation: This fault is caused by "Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301855: fltTcaCoppPermit1yearBytesRateTr

Severity: variable

Explanation: This fault is caused by "Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3019: fltCompTagContRemoteOperIssues

Severity: major

Explanation: This fault is raised when ACI controller failed to retrieve complete Tagging information.

Recommended Action: If you see this fault, take the following actions:

1. Check vCenter and validate that Tagging information is available.

2. Verify that all Tag and Category entries have non-empty Description

3. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F301904: fltTcaCoppPermit5minPktsLast

Severity: variable

Explanation: This fault is caused by "Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301905: fltTcaCoppPermit15minPktsLast

Severity: variable

Explanation: This fault is caused by "Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301906: fltTcaCoppPermit1hPktsLast

Severity: variable

Explanation: This fault is caused by "Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301907: fltTcaCoppPermit1dPktsLast

Severity: variable

Explanation: This fault is caused by "Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301908: fltTcaCoppPermit1wPktsLast

Severity: variable

Explanation: This fault is caused by "Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301909: fltTcaCoppPermit1moPktsLast

Severity: variable

Explanation: This fault is caused by "Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301910: fltTcaCoppPermit1qtrPktsLast

Severity: variable

Explanation: This fault is caused by "Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301911: fltTcaCoppPermit1yearPktsLast

Severity: variable

Explanation: This fault is caused by "Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301920: fltTcaCoppPermit5minPktsCum

Severity: variable

Explanation: This fault is caused by "Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301921: fltTcaCoppPermit15minPktsCum

Severity: variable

Explanation: This fault is caused by "Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301922: fltTcaCoppPermit1hPktsCum

Severity: variable

Explanation: This fault is caused by "Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301923: fltTcaCoppPermit1dPktsCum

Severity: variable

Explanation: This fault is caused by "Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301924: fltTcaCoppPermit1wPktsCum

Severity: variable

Explanation: This fault is caused by "Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301925: fltTcaCoppPermit1moPktsCum

Severity: variable

Explanation: This fault is caused by "Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301926: fltTcaCoppPermit1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301927: fltTcaCoppPermit1yearPktsCum

Severity: variable

Explanation: This fault is caused by "Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301928: fltTcaCoppPermit5minPktsPer

Severity: variable

Explanation: This fault is caused by "Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301929: fltTcaCoppPermit15minPktsPer

Severity: variable

Explanation: This fault is caused by "Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301930: fltTcaCoppPermit1hPktsPer

Severity: variable

Explanation: This fault is caused by "Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301931: fltTcaCoppPermit1dPktsPer

Severity: variable

Explanation: This fault is caused by "Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301932: fltTcaCoppPermit1wPktsPer

Severity: variable

Explanation: This fault is caused by "Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301933: fltTcaCoppPermit1moPktsPer

Severity: variable

Explanation: This fault is caused by "Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301934: fltTcaCoppPermit1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301935: fltTcaCoppPermit1yearPktsPer

Severity: variable

Explanation: This fault is caused by "Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301936: fltTcaCoppPermit5minPktsMin

Severity: variable

Explanation: This fault is caused by "Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301937: fltTcaCoppPermit15minPktsMin

Severity: variable

Explanation: This fault is caused by "Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301938: fltTcaCoppPermit1hPktsMin

Severity: variable

Explanation: This fault is caused by "Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301939: fltTcaCoppPermit1dPktsMin

Severity: variable

Explanation: This fault is caused by "Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301940: fltTcaCoppPermit1wPktsMin

Severity: variable

Explanation: This fault is caused by "Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301941: fltTcaCoppPermit1moPktsMin

Severity: variable

Explanation: This fault is caused by "Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301942: fltTcaCoppPermit1qtrPktsMin

Severity: variable

Explanation: This fault is caused by "Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301943: fltTcaCoppPermit1yearPktsMin

Severity: variable

Explanation: This fault is caused by "Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301944: fltTcaCoppPermit5minPktsMax

Severity: variable

Explanation: This fault is caused by "Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301945: fltTcaCoppPermit15minPktsMax

Severity: variable

Explanation: This fault is caused by "Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301946: fltTcaCoppPermit1hPktsMax

Severity: variable

Explanation: This fault is caused by "Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301947: fltTcaCoppPermit1dPktsMax

Severity: variable

Explanation: This fault is caused by "Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301948: fltTcaCoppPermit1wPktsMax

Severity: variable

Explanation: This fault is caused by "Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301949: fltTcaCoppPermit1moPktsMax

Severity: variable

Explanation: This fault is caused by "Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301950: fltTcaCoppPermit1qtrPktsMax

Severity: variable

Explanation: This fault is caused by "Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301951: fltTcaCoppPermit1yearPktsMax

Severity: variable

Explanation: This fault is caused by "Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301952: fltTcaCoppPermit5minPktsAvg

Severity: variable

Explanation: This fault is caused by "Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301953: fltTcaCoppPermit15minPktsAvg

Severity: variable

Explanation: This fault is caused by "Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301954: fltTcaCoppPermit1hPktsAvg

Severity: variable

Explanation: This fault is caused by "Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301955: fltTcaCoppPermit1dPktsAvg

Severity: variable

Explanation: This fault is caused by "Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301956: fltTcaCoppPermit1wPktsAvg

Severity: variable

Explanation: This fault is caused by "Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301957: fltTcaCoppPermit1moPktsAvg

Severity: variable

Explanation: This fault is caused by "Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301958: fltTcaCoppPermit1qtrPktsAvg

Severity: variable

Explanation: This fault is caused by "Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301959: fltTcaCoppPermit1yearPktsAvg

Severity: variable

Explanation: This fault is caused by "Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301984: fltTcaCoppPermit5minPktsTr

Severity: variable

Explanation: This fault is caused by "Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301985: fltTcaCoppPermit15minPktsTr

Severity: variable

Explanation: This fault is caused by "Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301986: fltTcaCoppPermit1hPktsTr

Severity: variable

Explanation: This fault is caused by "Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301987: fltTcaCoppPermit1dPktsTr

Severity: variable

Explanation: This fault is caused by "Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301988: fltTcaCoppPermit1wPktsTr

Severity: variable

Explanation: This fault is caused by "Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301989: fltTcaCoppPermit1moPktsTr

Severity: variable

Explanation: This fault is caused by "Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301990: fltTcaCoppPermit1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301991: fltTcaCoppPermit1yearPktsTr

Severity: variable

Explanation: This fault is caused by "Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301992: fltTcaCoppPermit5minPktsRate

Severity: variable

Explanation: This fault is caused by "Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301993: fltTcaCoppPermit15minPktsRate

Severity: variable

Explanation: This fault is caused by "Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301994: fltTcaCoppPermit1hPktsRate

Severity: variable

Explanation: This fault is caused by "Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301995: fltTcaCoppPermit1dPktsRate

Severity: variable

Explanation: This fault is caused by "Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301996: fltTcaCoppPermit1wPktsRate

Severity: variable

Explanation: This fault is caused by "Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301997: fltTcaCoppPermit1moPktsRate

Severity: variable

Explanation: This fault is caused by "Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301998: fltTcaCoppPermit1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F301999: fltTcaCoppPermit1yearPktsRate

Severity: variable

Explanation: This fault is caused by "Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3020: fltL1RtEncPhysRtdConfPcmCfgCtrl

Severity: warning

Explanation: This fault is caused by a hardware programming failure

Recommended Action: The system will periodically retry to program the hardware. If the failure is due to lack of hardware resources, free up resources by removing or simplifying existing configuration. One of the reasons for lack of hardware resources is exhaustion of VLANs in ToR. These hardware resources can be examined by looking at capacity dashboard under OPERATIONS tab. Please check entry against the number of VLANs in output of command show vlan summary issued at node where fault is generated to check whether it exceeds above advertised node capacity.

F302072: fltTcaCoppPermit5minPktsRateLast

Severity: variable

Explanation: This fault is caused by "Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302073: fltTcaCoppPermit15minPktsRateLast

Severity: variable

Explanation: This fault is caused by "Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302074: fltTcaCoppPermit1hPktsRateLast

Severity: variable

Explanation: This fault is caused by "Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302075: fltTcaCoppPermit1dPktsRateLast

Severity: variable

Explanation: This fault is caused by "Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302076: fltTcaCoppPermit1wPktsRateLast

Severity: variable

Explanation: This fault is caused by "Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302077: fltTcaCoppPermit1moPktsRateLast

Severity: variable

Explanation: This fault is caused by "Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302078: fltTcaCoppPermit1qtrPktsRateLast

Severity: variable

Explanation: This fault is caused by "Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302079: fltTcaCoppPermit1yearPktsRateLast

Severity: variable

Explanation: This fault is caused by "Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302080: fltTcaCoppPermit5minPktsRateMin

Severity: variable

Explanation: This fault is caused by "Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302081: fltTcaCoppPermit15minPktsRateMin

Severity: variable

Explanation: This fault is caused by "Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302082: fltTcaCoppPermit1hPktsRateMin

Severity: variable

Explanation: This fault is caused by "Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302083: fltTcaCoppPermit1dPktsRateMin

Severity: variable

Explanation: This fault is caused by "Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302084: fltTcaCoppPermit1wPktsRateMin

Severity: variable

Explanation: This fault is caused by "Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302085: fltTcaCoppPermit1moPktsRateMin

Severity: variable

Explanation: This fault is caused by "Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302086: fltTcaCoppPermit1qtrPktsRateMin

Severity: variable

Explanation: This fault is caused by "Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302087: fltTcaCoppPermit1yearPktsRateMin

Severity: variable

Explanation: This fault is caused by "Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302088: fltTcaCoppPermit5minPktsRateMax

Severity: variable

Explanation: This fault is caused by "Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302089: fltTcaCoppPermit15minPktsRateMax

Severity: variable

Explanation: This fault is caused by "Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302090: fltTcaCoppPermit1hPktsRateMax

Severity: variable

Explanation: This fault is caused by "Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302091: fltTcaCoppPermit1dPktsRateMax

Severity: variable

Explanation: This fault is caused by "Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302092: fltTcaCoppPermit1wPktsRateMax

Severity: variable

Explanation: This fault is caused by "Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302093: fltTcaCoppPermit1moPktsRateMax

Severity: variable

Explanation: This fault is caused by "Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302094: fltTcaCoppPermit1qtrPktsRateMax

Severity: variable

Explanation: This fault is caused by "Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302095: fltTcaCoppPermit1yearPktsRateMax

Severity: variable

Explanation: This fault is caused by "Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302096: fltTcaCoppPermit5minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302097: fltTcaCoppPermit15minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302098: fltTcaCoppPermit1hPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302099: fltTcaCoppPermit1dPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302100: fltTcaCoppPermit1wPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302101: fltTcaCoppPermit1moPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302102: fltTcaCoppPermit1qtrPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302103: fltTcaCoppPermit1yearPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302136: fltTcaCoppPermit5minPktsRateTr

Severity: variable

Explanation: This fault is caused by "Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302137: fltTcaCoppPermit15minPktsRateTr

Severity: variable

Explanation: This fault is caused by "Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302138: fltTcaCoppPermit1hPktsRateTr

Severity: variable

Explanation: This fault is caused by "Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302139: fltTcaCoppPermit1dPktsRateTr

Severity: variable

Explanation: This fault is caused by "Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302140: fltTcaCoppPermit1wPktsRateTr

Severity: variable

Explanation: This fault is caused by "Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302141: fltTcaCoppPermit1moPktsRateTr

Severity: variable

Explanation: This fault is caused by "Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302142: fltTcaCoppPermit1qtrPktsRateTr

Severity: variable

Explanation: This fault is caused by "Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302143: fltTcaCoppPermit1yearPktsRateTr

Severity: variable

Explanation: This fault is caused by "Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302256: fltTcaCoppDropped5minBytesLast

Severity: variable

Explanation: This fault is caused by "Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302257: fltTcaCoppDropped15minBytesLast

Severity: variable

Explanation: This fault is caused by "Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302258: fltTcaCoppDropped1hBytesLast

Severity: variable

Explanation: This fault is caused by "Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302259: fltTcaCoppDropped1dBytesLast

Severity: variable

Explanation: This fault is caused by "Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302260: fltTcaCoppDropped1wBytesLast

Severity: variable

Explanation: This fault is caused by "Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302261: fltTcaCoppDropped1moBytesLast

Severity: variable

Explanation: This fault is caused by "Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302262: fltTcaCoppDropped1qtrBytesLast

Severity: variable

Explanation: This fault is caused by "Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302263: fltTcaCoppDropped1yearBytesLast

Severity: variable

Explanation: This fault is caused by "Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302264: fltTcaCoppDropped5minBytesMin

Severity: variable

Explanation: This fault is caused by "Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302265: fltTcaCoppDropped15minBytesMin

Severity: variable

Explanation: This fault is caused by "Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302266: fltTcaCoppDropped1hBytesMin

Severity: variable

Explanation: This fault is caused by "Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302267: fltTcaCoppDropped1dBytesMin

Severity: variable

Explanation: This fault is caused by "Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302268: fltTcaCoppDropped1wBytesMin

Severity: variable

Explanation: This fault is caused by "Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302269: fltTcaCoppDropped1moBytesMin

Severity: variable

Explanation: This fault is caused by "Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302270: fltTcaCoppDropped1qtrBytesMin

Severity: variable

Explanation: This fault is caused by "Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302271: fltTcaCoppDropped1yearBytesMin

Severity: variable

Explanation: This fault is caused by "Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302272: fltTcaCoppDropped5minBytesMax

Severity: variable

Explanation: This fault is caused by "Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302273: fltTcaCoppDropped15minBytesMax

Severity: variable

Explanation: This fault is caused by "Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302274: fltTcaCoppDropped1hBytesMax

Severity: variable

Explanation: This fault is caused by "Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302275: fltTcaCoppDropped1dBytesMax

Severity: variable

Explanation: This fault is caused by "Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302276: fltTcaCoppDropped1wBytesMax

Severity: variable

Explanation: This fault is caused by "Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302277: fltTcaCoppDropped1moBytesMax

Severity: variable

Explanation: This fault is caused by "Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302278: fltTcaCoppDropped1qtrBytesMax

Severity: variable

Explanation: This fault is caused by "Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302279: fltTcaCoppDropped1yearBytesMax

Severity: variable

Explanation: This fault is caused by "Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302280: fltTcaCoppDropped5minBytesAvg

Severity: variable

Explanation: This fault is caused by "Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302281: fltTcaCoppDropped15minBytesAvg

Severity: variable

Explanation: This fault is caused by "Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302282: fltTcaCoppDropped1hBytesAvg

Severity: variable

Explanation: This fault is caused by "Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302283: fltTcaCoppDropped1dBytesAvg

Severity: variable

Explanation: This fault is caused by "Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302284: fltTcaCoppDropped1wBytesAvg

Severity: variable

Explanation: This fault is caused by "Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302285: fltTcaCoppDropped1moBytesAvg

Severity: variable

Explanation: This fault is caused by "Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302286: fltTcaCoppDropped1qtrBytesAvg

Severity: variable

Explanation: This fault is caused by "Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302287: fltTcaCoppDropped1yearBytesAvg

Severity: variable

Explanation: This fault is caused by "Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302320: fltTcaCoppDropped5minBytesTr

Severity: variable

Explanation: This fault is caused by "Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302321: fltTcaCoppDropped15minBytesTr

Severity: variable

Explanation: This fault is caused by "Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302322: fltTcaCoppDropped1hBytesTr

Severity: variable

Explanation: This fault is caused by "Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302323: fltTcaCoppDropped1dBytesTr

Severity: variable

Explanation: This fault is caused by "Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302324: fltTcaCoppDropped1wBytesTr

Severity: variable

Explanation: This fault is caused by "Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302325: fltTcaCoppDropped1moBytesTr

Severity: variable

Explanation: This fault is caused by "Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302326: fltTcaCoppDropped1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302327: fltTcaCoppDropped1yearBytesTr

Severity: variable

Explanation: This fault is caused by "Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302376: fltTcaCoppDropped5minPktsLast

Severity: variable

Explanation: This fault is caused by "Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302377: fltTcaCoppDropped15minPktsLast

Severity: variable

Explanation: This fault is caused by "Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302378: fltTcaCoppDropped1hPktsLast

Severity: variable

Explanation: This fault is caused by "Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302379: fltTcaCoppDropped1dPktsLast

Severity: variable

Explanation: This fault is caused by "Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302380: fltTcaCoppDropped1wPktsLast

Severity: variable

Explanation: This fault is caused by "Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302381: fltTcaCoppDropped1moPktsLast

Severity: variable

Explanation: This fault is caused by "Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302382: fltTcaCoppDropped1qtrPktsLast

Severity: variable

Explanation: This fault is caused by "Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302383: fltTcaCoppDropped1yearPktsLast

Severity: variable

Explanation: This fault is caused by "Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302384: fltTcaCoppDropped5minPktsMin

Severity: variable

Explanation: This fault is caused by "Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302385: fltTcaCoppDropped15minPktsMin

Severity: variable

Explanation: This fault is caused by "Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302386: fltTcaCoppDropped1hPktsMin

Severity: variable

Explanation: This fault is caused by "Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302387: fltTcaCoppDropped1dPktsMin

Severity: variable

Explanation: This fault is caused by "Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302388: fltTcaCoppDropped1wPktsMin

Severity: variable

Explanation: This fault is caused by "Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302389: fltTcaCoppDropped1moPktsMin

Severity: variable

Explanation: This fault is caused by "Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302390: fltTcaCoppDropped1qtrPktsMin

Severity: variable

Explanation: This fault is caused by "Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302391: fltTcaCoppDropped1yearPktsMin

Severity: variable

Explanation: This fault is caused by "Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302392: fltTcaCoppDropped5minPktsMax

Severity: variable

Explanation: This fault is caused by "Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302393: fltTcaCoppDropped15minPktsMax

Severity: variable

Explanation: This fault is caused by "Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302394: fltTcaCoppDropped1hPktsMax

Severity: variable

Explanation: This fault is caused by "Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302395: fltTcaCoppDropped1dPktsMax

Severity: variable

Explanation: This fault is caused by "Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302396: fltTcaCoppDropped1wPktsMax

Severity: variable

Explanation: This fault is caused by "Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302397: fltTcaCoppDropped1moPktsMax

Severity: variable

Explanation: This fault is caused by "Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302398: fltTcaCoppDropped1qtrPktsMax

Severity: variable

Explanation: This fault is caused by "Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302399: fltTcaCoppDropped1yearPktsMax

Severity: variable

Explanation: This fault is caused by "Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3024: fltKcMACSecKeyKeyIssue

Severity: major

Explanation: This fault occurs because MACSec Key policy has an issue.

Recommended Action: If you see this fault, talk appropriate action based on the specific fault.

F302400: fltTcaCoppDropped5minPktsAvg

Severity: variable

Explanation: This fault is caused by "Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302401: fltTcaCoppDropped15minPktsAvg

Severity: variable

Explanation: This fault is caused by "Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302402: fltTcaCoppDropped1hPktsAvg

Severity: variable

Explanation: This fault is caused by "Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302403: fltTcaCoppDropped1dPktsAvg

Severity: variable

Explanation: This fault is caused by "Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302404: fltTcaCoppDropped1wPktsAvg

Severity: variable

Explanation: This fault is caused by "Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302405: fltTcaCoppDropped1moPktsAvg

Severity: variable

Explanation: This fault is caused by "Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302406: fltTcaCoppDropped1qtrPktsAvg

Severity: variable

Explanation: This fault is caused by "Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302407: fltTcaCoppDropped1yearPktsAvg

Severity: variable

Explanation: This fault is caused by "Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302440: fltTcaCoppDropped5minPktsTr

Severity: variable

Explanation: This fault is caused by "Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302441: fltTcaCoppDropped15minPktsTr

Severity: variable

Explanation: This fault is caused by "Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302442: fltTcaCoppDropped1hPktsTr

Severity: variable

Explanation: This fault is caused by "Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302443: fltTcaCoppDropped1dPktsTr

Severity: variable

Explanation: This fault is caused by "Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302444: fltTcaCoppDropped1wPktsTr

Severity: variable

Explanation: This fault is caused by "Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302445: fltTcaCoppDropped1moPktsTr

Severity: variable

Explanation: This fault is caused by "Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302446: fltTcaCoppDropped1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F302447: fltTcaCoppDropped1yearPktsTr

Severity: variable

Explanation: This fault is caused by "Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3026: fltTwampServerInstOperStQual

Severity: minor

Explanation: This fault occurs when TWAMP Server on a node becomes operationally down

Recommended Action: If you see this fault, take the following actions:

1. Ensure both the server and responder policies are enabled and are properly configured on the affected node

2. Review the fault message and add missing or remove/modify invalid configuration

3. If above actions did not resolve the issue, create a tech-support file and contact Cisco TAC.

F3027: fltTwampResponderInstOperStQual

Severity: minor

Explanation: This fault occurs when TWAMP Responder on a node becomes operationally down

Recommended Action: If you see this fault, take the following actions:

1. Ensure both the server and responder policies are enabled and are properly configured on the affected node

2. Review the fault message and add missing or remove/modify invalid configuration

3. If above actions did not resolve the issue, create a tech-support file and contact Cisco TAC.

F3028: fltNdStAdjEpOperStDown

Severity: warning

Explanation: This fault occurs when the operational state of the nd adjacency is down

Recommended Action: To recover from this fault, try the following actions

1. Look at any configuration issues

2. Verify the configuration is correct/complete

3. Ensure the port is up on which ND is configured

F3029: fltVpcDomSplitBrainDown

Severity: critical

Explanation: This fault occurs when the peers are reachable but the zmq connection cannot be established between the peers. To avoid a split brain scenario, the vpc links only on the secondary are brought down. The fault is also raised only on the secondary.

Recommended Action: Please check if there is an issue with l3 traffic between the peers.

F3031: fltPkiFabricNodeSSLCertificateNodeCertInvalid

Severity: critical

Explanation: This fault occurs when the Device X.509 Certificate is invalid.

Recommended Action: If you see this fault, take the following actions:

1. Look for message in the fault about the certificate error condition.

2. Install correct Device X.509 Certificate.

F303472: fltTcaDppIfCktAllowPart5minBytesLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303473: fltTcaDppIfCktAllowPart15minBytesLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303474: fltTcaDppIfCktAllowPart1hBytesLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303475: fltTcaDppIfCktAllowPart1dBytesLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303476: fltTcaDppIfCktAllowPart1wBytesLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303477: fltTcaDppIfCktAllowPart1moBytesLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303478: fltTcaDppIfCktAllowPart1qtrBytesLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303479: fltTcaDppIfCktAllowPart1yearBytesLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303488: fltTcaDppIfCktAllowPart5minBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303489: fltTcaDppIfCktAllowPart15minBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303490: fltTcaDppIfCktAllowPart1hBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303491: fltTcaDppIfCktAllowPart1dBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303492: fltTcaDppIfCktAllowPart1wBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303493: fltTcaDppIfCktAllowPart1moBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303494: fltTcaDppIfCktAllowPart1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303495: fltTcaDppIfCktAllowPart1yearBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303496: fltTcaDppIfCktAllowPart5minBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303497: fltTcaDppIfCktAllowPart15minBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303498: fltTcaDppIfCktAllowPart1hBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303499: fltTcaDppIfCktAllowPart1dBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303500: fltTcaDppIfCktAllowPart1wBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303501: fltTcaDppIfCktAllowPart1moBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303502: fltTcaDppIfCktAllowPart1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303503: fltTcaDppIfCktAllowPart1yearBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303504: fltTcaDppIfCktAllowPart5minBytesMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303505: fltTcaDppIfCktAllowPart15minBytesMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303506: fltTcaDppIfCktAllowPart1hBytesMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303507: fltTcaDppIfCktAllowPart1dBytesMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303508: fltTcaDppIfCktAllowPart1wBytesMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303509: fltTcaDppIfCktAllowPart1moBytesMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303510: fltTcaDppIfCktAllowPart1qtrBytesMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303511: fltTcaDppIfCktAllowPart1yearBytesMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303512: fltTcaDppIfCktAllowPart5minBytesMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303513: fltTcaDppIfCktAllowPart15minBytesMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303514: fltTcaDppIfCktAllowPart1hBytesMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303515: fltTcaDppIfCktAllowPart1dBytesMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303516: fltTcaDppIfCktAllowPart1wBytesMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303517: fltTcaDppIfCktAllowPart1moBytesMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303518: fltTcaDppIfCktAllowPart1qtrBytesMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303519: fltTcaDppIfCktAllowPart1yearBytesMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303520: fltTcaDppIfCktAllowPart5minBytesAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303521: fltTcaDppIfCktAllowPart15minBytesAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303522: fltTcaDppIfCktAllowPart1hBytesAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303523: fltTcaDppIfCktAllowPart1dBytesAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303524: fltTcaDppIfCktAllowPart1wBytesAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303525: fltTcaDppIfCktAllowPart1moBytesAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303526: fltTcaDppIfCktAllowPart1qtrBytesAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303527: fltTcaDppIfCktAllowPart1yearBytesAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303552: fltTcaDppIfCktAllowPart5minBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303553: fltTcaDppIfCktAllowPart15minBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303554: fltTcaDppIfCktAllowPart1hBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303555: fltTcaDppIfCktAllowPart1dBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303556: fltTcaDppIfCktAllowPart1wBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303557: fltTcaDppIfCktAllowPart1moBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303558: fltTcaDppIfCktAllowPart1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303559: fltTcaDppIfCktAllowPart1yearBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303560: fltTcaDppIfCktAllowPart5minBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303561: fltTcaDppIfCktAllowPart15minBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303562: fltTcaDppIfCktAllowPart1hBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303563: fltTcaDppIfCktAllowPart1dBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303564: fltTcaDppIfCktAllowPart1wBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303565: fltTcaDppIfCktAllowPart1moBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303566: fltTcaDppIfCktAllowPart1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303567: fltTcaDppIfCktAllowPart1yearBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3036: fltFvCtxConfigIssuesConfig-error

Severity: minor

Explanation: This fault occurs on a specific configuration error in DNS label on a tenant mgmt VRF. Allowed use on DNS label is only the label default for outband-mgmt VRFs

Recommended Action: If you see this fault, take the following actions:

1. For dns-label-not-default issue: Add all the DNS servers in non-default DNS Profiles as DNS Providers in the default DNS Profile. Enter only default as DNS Label in the outbound mgmt VRF.

2. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F303640: fltTcaDppIfCktAllowAg5minBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303641: fltTcaDppIfCktAllowAg15minBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303642: fltTcaDppIfCktAllowAg1hBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303643: fltTcaDppIfCktAllowAg1dBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303644: fltTcaDppIfCktAllowAg1wBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303645: fltTcaDppIfCktAllowAg1moBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303646: fltTcaDppIfCktAllowAg1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303647: fltTcaDppIfCktAllowAg1yearBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303648: fltTcaDppIfCktAllowAg5minBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303649: fltTcaDppIfCktAllowAg15minBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303650: fltTcaDppIfCktAllowAg1hBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303651: fltTcaDppIfCktAllowAg1dBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303652: fltTcaDppIfCktAllowAg1wBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303653: fltTcaDppIfCktAllowAg1moBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303654: fltTcaDppIfCktAllowAg1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303655: fltTcaDppIfCktAllowAg1yearBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303680: fltTcaDppIfCktAllowAg5minBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303681: fltTcaDppIfCktAllowAg15minBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303682: fltTcaDppIfCktAllowAg1hBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303683: fltTcaDppIfCktAllowAg1dBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303684: fltTcaDppIfCktAllowAg1wBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303685: fltTcaDppIfCktAllowAg1moBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303686: fltTcaDppIfCktAllowAg1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303687: fltTcaDppIfCktAllowAg1yearBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303688: fltTcaDppIfCktAllowAg5minBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303689: fltTcaDppIfCktAllowAg15minBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303690: fltTcaDppIfCktAllowAg1hBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303691: fltTcaDppIfCktAllowAg1dBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303692: fltTcaDppIfCktAllowAg1wBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303693: fltTcaDppIfCktAllowAg1moBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303694: fltTcaDppIfCktAllowAg1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303695: fltTcaDppIfCktAllowAg1yearBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303744: fltTcaDppIfCktAllowPart5minBytesRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303745: fltTcaDppIfCktAllowPart15minBytesRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303746: fltTcaDppIfCktAllowPart1hBytesRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303747: fltTcaDppIfCktAllowPart1dBytesRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303748: fltTcaDppIfCktAllowPart1wBytesRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303749: fltTcaDppIfCktAllowPart1moBytesRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303750: fltTcaDppIfCktAllowPart1qtrBytesRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303751: fltTcaDppIfCktAllowPart1yearBytesRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303752: fltTcaDppIfCktAllowPart5minBytesRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303753: fltTcaDppIfCktAllowPart15minBytesRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303754: fltTcaDppIfCktAllowPart1hBytesRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303755: fltTcaDppIfCktAllowPart1dBytesRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303756: fltTcaDppIfCktAllowPart1wBytesRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303757: fltTcaDppIfCktAllowPart1moBytesRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303758: fltTcaDppIfCktAllowPart1qtrBytesRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303759: fltTcaDppIfCktAllowPart1yearBytesRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303760: fltTcaDppIfCktAllowPart5minBytesRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303761: fltTcaDppIfCktAllowPart15minBytesRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303762: fltTcaDppIfCktAllowPart1hBytesRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303763: fltTcaDppIfCktAllowPart1dBytesRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303764: fltTcaDppIfCktAllowPart1wBytesRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303765: fltTcaDppIfCktAllowPart1moBytesRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303766: fltTcaDppIfCktAllowPart1qtrBytesRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303767: fltTcaDppIfCktAllowPart1yearBytesRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303768: fltTcaDppIfCktAllowPart5minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303769: fltTcaDppIfCktAllowPart15minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303770: fltTcaDppIfCktAllowPart1hBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303771: fltTcaDppIfCktAllowPart1dBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303772: fltTcaDppIfCktAllowPart1wBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303773: fltTcaDppIfCktAllowPart1moBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303774: fltTcaDppIfCktAllowPart1qtrBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303775: fltTcaDppIfCktAllowPart1yearBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303808: fltTcaDppIfCktAllowPart5minBytesRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303809: fltTcaDppIfCktAllowPart15minBytesRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303810: fltTcaDppIfCktAllowPart1hBytesRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303811: fltTcaDppIfCktAllowPart1dBytesRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303812: fltTcaDppIfCktAllowPart1wBytesRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303813: fltTcaDppIfCktAllowPart1moBytesRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303814: fltTcaDppIfCktAllowPart1qtrBytesRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303815: fltTcaDppIfCktAllowPart1yearBytesRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303864: fltTcaDppIfCktAllowPart5minPktsLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303865: fltTcaDppIfCktAllowPart15minPktsLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303866: fltTcaDppIfCktAllowPart1hPktsLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303867: fltTcaDppIfCktAllowPart1dPktsLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303868: fltTcaDppIfCktAllowPart1wPktsLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303869: fltTcaDppIfCktAllowPart1moPktsLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303870: fltTcaDppIfCktAllowPart1qtrPktsLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303871: fltTcaDppIfCktAllowPart1yearPktsLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303880: fltTcaDppIfCktAllowPart5minPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303881: fltTcaDppIfCktAllowPart15minPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303882: fltTcaDppIfCktAllowPart1hPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303883: fltTcaDppIfCktAllowPart1dPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303884: fltTcaDppIfCktAllowPart1wPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303885: fltTcaDppIfCktAllowPart1moPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303886: fltTcaDppIfCktAllowPart1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303887: fltTcaDppIfCktAllowPart1yearPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303888: fltTcaDppIfCktAllowPart5minPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303889: fltTcaDppIfCktAllowPart15minPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303890: fltTcaDppIfCktAllowPart1hPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303891: fltTcaDppIfCktAllowPart1dPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303892: fltTcaDppIfCktAllowPart1wPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303893: fltTcaDppIfCktAllowPart1moPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303894: fltTcaDppIfCktAllowPart1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303895: fltTcaDppIfCktAllowPart1yearPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303896: fltTcaDppIfCktAllowPart5minPktsMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303897: fltTcaDppIfCktAllowPart15minPktsMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303898: fltTcaDppIfCktAllowPart1hPktsMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303899: fltTcaDppIfCktAllowPart1dPktsMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303900: fltTcaDppIfCktAllowPart1wPktsMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303901: fltTcaDppIfCktAllowPart1moPktsMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303902: fltTcaDppIfCktAllowPart1qtrPktsMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303903: fltTcaDppIfCktAllowPart1yearPktsMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303904: fltTcaDppIfCktAllowPart5minPktsMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303905: fltTcaDppIfCktAllowPart15minPktsMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303906: fltTcaDppIfCktAllowPart1hPktsMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303907: fltTcaDppIfCktAllowPart1dPktsMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303908: fltTcaDppIfCktAllowPart1wPktsMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303909: fltTcaDppIfCktAllowPart1moPktsMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303910: fltTcaDppIfCktAllowPart1qtrPktsMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303911: fltTcaDppIfCktAllowPart1yearPktsMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303912: fltTcaDppIfCktAllowPart5minPktsAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303913: fltTcaDppIfCktAllowPart15minPktsAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303914: fltTcaDppIfCktAllowPart1hPktsAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303915: fltTcaDppIfCktAllowPart1dPktsAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303916: fltTcaDppIfCktAllowPart1wPktsAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303917: fltTcaDppIfCktAllowPart1moPktsAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303918: fltTcaDppIfCktAllowPart1qtrPktsAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303919: fltTcaDppIfCktAllowPart1yearPktsAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303944: fltTcaDppIfCktAllowPart5minPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303945: fltTcaDppIfCktAllowPart15minPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303946: fltTcaDppIfCktAllowPart1hPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303947: fltTcaDppIfCktAllowPart1dPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303948: fltTcaDppIfCktAllowPart1wPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303949: fltTcaDppIfCktAllowPart1moPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303950: fltTcaDppIfCktAllowPart1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303951: fltTcaDppIfCktAllowPart1yearPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303952: fltTcaDppIfCktAllowPart5minPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303953: fltTcaDppIfCktAllowPart15minPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303954: fltTcaDppIfCktAllowPart1hPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303955: fltTcaDppIfCktAllowPart1dPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303956: fltTcaDppIfCktAllowPart1wPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303957: fltTcaDppIfCktAllowPart1moPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303958: fltTcaDppIfCktAllowPart1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F303959: fltTcaDppIfCktAllowPart1yearPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304032: fltTcaDppIfCktAllowAg5minPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304033: fltTcaDppIfCktAllowAg15minPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304034: fltTcaDppIfCktAllowAg1hPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304035: fltTcaDppIfCktAllowAg1dPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304036: fltTcaDppIfCktAllowAg1wPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304037: fltTcaDppIfCktAllowAg1moPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304038: fltTcaDppIfCktAllowAg1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304039: fltTcaDppIfCktAllowAg1yearPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304040: fltTcaDppIfCktAllowAg5minPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304041: fltTcaDppIfCktAllowAg15minPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304042: fltTcaDppIfCktAllowAg1hPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304043: fltTcaDppIfCktAllowAg1dPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304044: fltTcaDppIfCktAllowAg1wPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304045: fltTcaDppIfCktAllowAg1moPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304046: fltTcaDppIfCktAllowAg1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304047: fltTcaDppIfCktAllowAg1yearPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304072: fltTcaDppIfCktAllowAg5minPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304073: fltTcaDppIfCktAllowAg15minPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304074: fltTcaDppIfCktAllowAg1hPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304075: fltTcaDppIfCktAllowAg1dPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304076: fltTcaDppIfCktAllowAg1wPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304077: fltTcaDppIfCktAllowAg1moPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304078: fltTcaDppIfCktAllowAg1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304079: fltTcaDppIfCktAllowAg1yearPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304080: fltTcaDppIfCktAllowAg5minPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304081: fltTcaDppIfCktAllowAg15minPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304082: fltTcaDppIfCktAllowAg1hPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304083: fltTcaDppIfCktAllowAg1dPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304084: fltTcaDppIfCktAllowAg1wPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304085: fltTcaDppIfCktAllowAg1moPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304086: fltTcaDppIfCktAllowAg1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304087: fltTcaDppIfCktAllowAg1yearPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3041: fltUnifiedportsIfInvalidPortType

Severity: critical

Explanation: This fault occurs when unified port type configuration is invalid.

Recommended Action: To recover from this fault, try the following actions

1. Check if the FC Ports are configured in groups of 4. If not Correct it.

2. Check if the Ports are configured in Mixed Mode (Ex : 1-4 Ethernet 5-8 FC 9-12 Ethernet). If yes Consolidate them in Two Groups.

F304136: fltTcaDppIfCktAllowPart5minPktsRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304137: fltTcaDppIfCktAllowPart15minPktsRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304138: fltTcaDppIfCktAllowPart1hPktsRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304139: fltTcaDppIfCktAllowPart1dPktsRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304140: fltTcaDppIfCktAllowPart1wPktsRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304141: fltTcaDppIfCktAllowPart1moPktsRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304142: fltTcaDppIfCktAllowPart1qtrPktsRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304143: fltTcaDppIfCktAllowPart1yearPktsRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304144: fltTcaDppIfCktAllowPart5minPktsRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304145: fltTcaDppIfCktAllowPart15minPktsRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304146: fltTcaDppIfCktAllowPart1hPktsRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304147: fltTcaDppIfCktAllowPart1dPktsRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304148: fltTcaDppIfCktAllowPart1wPktsRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304149: fltTcaDppIfCktAllowPart1moPktsRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304150: fltTcaDppIfCktAllowPart1qtrPktsRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304151: fltTcaDppIfCktAllowPart1yearPktsRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304152: fltTcaDppIfCktAllowPart5minPktsRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304153: fltTcaDppIfCktAllowPart15minPktsRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304154: fltTcaDppIfCktAllowPart1hPktsRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304155: fltTcaDppIfCktAllowPart1dPktsRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304156: fltTcaDppIfCktAllowPart1wPktsRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304157: fltTcaDppIfCktAllowPart1moPktsRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304158: fltTcaDppIfCktAllowPart1qtrPktsRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304159: fltTcaDppIfCktAllowPart1yearPktsRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304160: fltTcaDppIfCktAllowPart5minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304161: fltTcaDppIfCktAllowPart15minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304162: fltTcaDppIfCktAllowPart1hPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304163: fltTcaDppIfCktAllowPart1dPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304164: fltTcaDppIfCktAllowPart1wPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304165: fltTcaDppIfCktAllowPart1moPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304166: fltTcaDppIfCktAllowPart1qtrPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304167: fltTcaDppIfCktAllowPart1yearPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304200: fltTcaDppIfCktAllowPart5minPktsRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304201: fltTcaDppIfCktAllowPart15minPktsRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304202: fltTcaDppIfCktAllowPart1hPktsRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304203: fltTcaDppIfCktAllowPart1dPktsRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304204: fltTcaDppIfCktAllowPart1wPktsRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304205: fltTcaDppIfCktAllowPart1moPktsRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304206: fltTcaDppIfCktAllowPart1qtrPktsRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304207: fltTcaDppIfCktAllowPart1yearPktsRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Allowed Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Allowed Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304256: fltTcaDppIfCktDropPart5minBytesLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304257: fltTcaDppIfCktDropPart15minBytesLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304258: fltTcaDppIfCktDropPart1hBytesLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304259: fltTcaDppIfCktDropPart1dBytesLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304260: fltTcaDppIfCktDropPart1wBytesLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304261: fltTcaDppIfCktDropPart1moBytesLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304262: fltTcaDppIfCktDropPart1qtrBytesLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304263: fltTcaDppIfCktDropPart1yearBytesLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304272: fltTcaDppIfCktDropPart5minBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304273: fltTcaDppIfCktDropPart15minBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304274: fltTcaDppIfCktDropPart1hBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304275: fltTcaDppIfCktDropPart1dBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304276: fltTcaDppIfCktDropPart1wBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304277: fltTcaDppIfCktDropPart1moBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304278: fltTcaDppIfCktDropPart1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304279: fltTcaDppIfCktDropPart1yearBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304280: fltTcaDppIfCktDropPart5minBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304281: fltTcaDppIfCktDropPart15minBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304282: fltTcaDppIfCktDropPart1hBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304283: fltTcaDppIfCktDropPart1dBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304284: fltTcaDppIfCktDropPart1wBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304285: fltTcaDppIfCktDropPart1moBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304286: fltTcaDppIfCktDropPart1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304287: fltTcaDppIfCktDropPart1yearBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304288: fltTcaDppIfCktDropPart5minBytesMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304289: fltTcaDppIfCktDropPart15minBytesMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304290: fltTcaDppIfCktDropPart1hBytesMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304291: fltTcaDppIfCktDropPart1dBytesMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304292: fltTcaDppIfCktDropPart1wBytesMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304293: fltTcaDppIfCktDropPart1moBytesMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304294: fltTcaDppIfCktDropPart1qtrBytesMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304295: fltTcaDppIfCktDropPart1yearBytesMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304296: fltTcaDppIfCktDropPart5minBytesMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304297: fltTcaDppIfCktDropPart15minBytesMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304298: fltTcaDppIfCktDropPart1hBytesMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304299: fltTcaDppIfCktDropPart1dBytesMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3043: fltInfraRsFcLagPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F304300: fltTcaDppIfCktDropPart1wBytesMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304301: fltTcaDppIfCktDropPart1moBytesMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304302: fltTcaDppIfCktDropPart1qtrBytesMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304303: fltTcaDppIfCktDropPart1yearBytesMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304304: fltTcaDppIfCktDropPart5minBytesAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304305: fltTcaDppIfCktDropPart15minBytesAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304306: fltTcaDppIfCktDropPart1hBytesAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304307: fltTcaDppIfCktDropPart1dBytesAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304308: fltTcaDppIfCktDropPart1wBytesAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304309: fltTcaDppIfCktDropPart1moBytesAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304310: fltTcaDppIfCktDropPart1qtrBytesAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304311: fltTcaDppIfCktDropPart1yearBytesAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304336: fltTcaDppIfCktDropPart5minBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304337: fltTcaDppIfCktDropPart15minBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304338: fltTcaDppIfCktDropPart1hBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304339: fltTcaDppIfCktDropPart1dBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304340: fltTcaDppIfCktDropPart1wBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304341: fltTcaDppIfCktDropPart1moBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304342: fltTcaDppIfCktDropPart1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304343: fltTcaDppIfCktDropPart1yearBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304344: fltTcaDppIfCktDropPart5minBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304345: fltTcaDppIfCktDropPart15minBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304346: fltTcaDppIfCktDropPart1hBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304347: fltTcaDppIfCktDropPart1dBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304348: fltTcaDppIfCktDropPart1wBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304349: fltTcaDppIfCktDropPart1moBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304350: fltTcaDppIfCktDropPart1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304351: fltTcaDppIfCktDropPart1yearBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304424: fltTcaDppIfCktDropAg5minBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304425: fltTcaDppIfCktDropAg15minBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304426: fltTcaDppIfCktDropAg1hBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304427: fltTcaDppIfCktDropAg1dBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304428: fltTcaDppIfCktDropAg1wBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304429: fltTcaDppIfCktDropAg1moBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304430: fltTcaDppIfCktDropAg1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304431: fltTcaDppIfCktDropAg1yearBytesCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304432: fltTcaDppIfCktDropAg5minBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304433: fltTcaDppIfCktDropAg15minBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304434: fltTcaDppIfCktDropAg1hBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304435: fltTcaDppIfCktDropAg1dBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304436: fltTcaDppIfCktDropAg1wBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304437: fltTcaDppIfCktDropAg1moBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304438: fltTcaDppIfCktDropAg1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304439: fltTcaDppIfCktDropAg1yearBytesPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304464: fltTcaDppIfCktDropAg5minBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304465: fltTcaDppIfCktDropAg15minBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304466: fltTcaDppIfCktDropAg1hBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304467: fltTcaDppIfCktDropAg1dBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304468: fltTcaDppIfCktDropAg1wBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304469: fltTcaDppIfCktDropAg1moBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304470: fltTcaDppIfCktDropAg1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304471: fltTcaDppIfCktDropAg1yearBytesTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304472: fltTcaDppIfCktDropAg5minBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304473: fltTcaDppIfCktDropAg15minBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304474: fltTcaDppIfCktDropAg1hBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304475: fltTcaDppIfCktDropAg1dBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304476: fltTcaDppIfCktDropAg1wBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304477: fltTcaDppIfCktDropAg1moBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304478: fltTcaDppIfCktDropAg1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304479: fltTcaDppIfCktDropAg1yearBytesRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3045: fltInfraRsFcAttEntPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F304528: fltTcaDppIfCktDropPart5minBytesRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304529: fltTcaDppIfCktDropPart15minBytesRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304530: fltTcaDppIfCktDropPart1hBytesRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304531: fltTcaDppIfCktDropPart1dBytesRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304532: fltTcaDppIfCktDropPart1wBytesRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304533: fltTcaDppIfCktDropPart1moBytesRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304534: fltTcaDppIfCktDropPart1qtrBytesRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304535: fltTcaDppIfCktDropPart1yearBytesRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304536: fltTcaDppIfCktDropPart5minBytesRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304537: fltTcaDppIfCktDropPart15minBytesRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304538: fltTcaDppIfCktDropPart1hBytesRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304539: fltTcaDppIfCktDropPart1dBytesRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304540: fltTcaDppIfCktDropPart1wBytesRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304541: fltTcaDppIfCktDropPart1moBytesRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304542: fltTcaDppIfCktDropPart1qtrBytesRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304543: fltTcaDppIfCktDropPart1yearBytesRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304544: fltTcaDppIfCktDropPart5minBytesRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304545: fltTcaDppIfCktDropPart15minBytesRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304546: fltTcaDppIfCktDropPart1hBytesRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304547: fltTcaDppIfCktDropPart1dBytesRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304548: fltTcaDppIfCktDropPart1wBytesRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304549: fltTcaDppIfCktDropPart1moBytesRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304550: fltTcaDppIfCktDropPart1qtrBytesRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304551: fltTcaDppIfCktDropPart1yearBytesRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304552: fltTcaDppIfCktDropPart5minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304553: fltTcaDppIfCktDropPart15minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304554: fltTcaDppIfCktDropPart1hBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304555: fltTcaDppIfCktDropPart1dBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304556: fltTcaDppIfCktDropPart1wBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304557: fltTcaDppIfCktDropPart1moBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304558: fltTcaDppIfCktDropPart1qtrBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304559: fltTcaDppIfCktDropPart1yearBytesRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304592: fltTcaDppIfCktDropPart5minBytesRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304593: fltTcaDppIfCktDropPart15minBytesRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304594: fltTcaDppIfCktDropPart1hBytesRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304595: fltTcaDppIfCktDropPart1dBytesRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304596: fltTcaDppIfCktDropPart1wBytesRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304597: fltTcaDppIfCktDropPart1moBytesRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304598: fltTcaDppIfCktDropPart1qtrBytesRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304599: fltTcaDppIfCktDropPart1yearBytesRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3046: fltInfraRsFcL2IfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F304648: fltTcaDppIfCktDropPart5minPktsLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304649: fltTcaDppIfCktDropPart15minPktsLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304650: fltTcaDppIfCktDropPart1hPktsLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304651: fltTcaDppIfCktDropPart1dPktsLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304652: fltTcaDppIfCktDropPart1wPktsLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304653: fltTcaDppIfCktDropPart1moPktsLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304654: fltTcaDppIfCktDropPart1qtrPktsLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304655: fltTcaDppIfCktDropPart1yearPktsLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304664: fltTcaDppIfCktDropPart5minPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304665: fltTcaDppIfCktDropPart15minPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304666: fltTcaDppIfCktDropPart1hPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304667: fltTcaDppIfCktDropPart1dPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304668: fltTcaDppIfCktDropPart1wPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304669: fltTcaDppIfCktDropPart1moPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304670: fltTcaDppIfCktDropPart1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304671: fltTcaDppIfCktDropPart1yearPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304672: fltTcaDppIfCktDropPart5minPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304673: fltTcaDppIfCktDropPart15minPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304674: fltTcaDppIfCktDropPart1hPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304675: fltTcaDppIfCktDropPart1dPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304676: fltTcaDppIfCktDropPart1wPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304677: fltTcaDppIfCktDropPart1moPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304678: fltTcaDppIfCktDropPart1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304679: fltTcaDppIfCktDropPart1yearPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304680: fltTcaDppIfCktDropPart5minPktsMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304681: fltTcaDppIfCktDropPart15minPktsMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304682: fltTcaDppIfCktDropPart1hPktsMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304683: fltTcaDppIfCktDropPart1dPktsMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304684: fltTcaDppIfCktDropPart1wPktsMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304685: fltTcaDppIfCktDropPart1moPktsMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304686: fltTcaDppIfCktDropPart1qtrPktsMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304687: fltTcaDppIfCktDropPart1yearPktsMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304688: fltTcaDppIfCktDropPart5minPktsMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304689: fltTcaDppIfCktDropPart15minPktsMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304690: fltTcaDppIfCktDropPart1hPktsMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304691: fltTcaDppIfCktDropPart1dPktsMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304692: fltTcaDppIfCktDropPart1wPktsMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304693: fltTcaDppIfCktDropPart1moPktsMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304694: fltTcaDppIfCktDropPart1qtrPktsMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304695: fltTcaDppIfCktDropPart1yearPktsMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304696: fltTcaDppIfCktDropPart5minPktsAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304697: fltTcaDppIfCktDropPart15minPktsAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304698: fltTcaDppIfCktDropPart1hPktsAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304699: fltTcaDppIfCktDropPart1dPktsAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304700: fltTcaDppIfCktDropPart1wPktsAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304701: fltTcaDppIfCktDropPart1moPktsAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304702: fltTcaDppIfCktDropPart1qtrPktsAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304703: fltTcaDppIfCktDropPart1yearPktsAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304728: fltTcaDppIfCktDropPart5minPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304729: fltTcaDppIfCktDropPart15minPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304730: fltTcaDppIfCktDropPart1hPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304731: fltTcaDppIfCktDropPart1dPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304732: fltTcaDppIfCktDropPart1wPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304733: fltTcaDppIfCktDropPart1moPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304734: fltTcaDppIfCktDropPart1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304735: fltTcaDppIfCktDropPart1yearPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304736: fltTcaDppIfCktDropPart5minPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304737: fltTcaDppIfCktDropPart15minPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304738: fltTcaDppIfCktDropPart1hPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304739: fltTcaDppIfCktDropPart1dPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304740: fltTcaDppIfCktDropPart1wPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304741: fltTcaDppIfCktDropPart1moPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304742: fltTcaDppIfCktDropPart1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304743: fltTcaDppIfCktDropPart1yearPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304816: fltTcaDppIfCktDropAg5minPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304817: fltTcaDppIfCktDropAg15minPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304818: fltTcaDppIfCktDropAg1hPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304819: fltTcaDppIfCktDropAg1dPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304820: fltTcaDppIfCktDropAg1wPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304821: fltTcaDppIfCktDropAg1moPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304822: fltTcaDppIfCktDropAg1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304823: fltTcaDppIfCktDropAg1yearPktsCum

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304824: fltTcaDppIfCktDropAg5minPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304825: fltTcaDppIfCktDropAg15minPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304826: fltTcaDppIfCktDropAg1hPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304827: fltTcaDppIfCktDropAg1dPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304828: fltTcaDppIfCktDropAg1wPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304829: fltTcaDppIfCktDropAg1moPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304830: fltTcaDppIfCktDropAg1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304831: fltTcaDppIfCktDropAg1yearPktsPer

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304856: fltTcaDppIfCktDropAg5minPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304857: fltTcaDppIfCktDropAg15minPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304858: fltTcaDppIfCktDropAg1hPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304859: fltTcaDppIfCktDropAg1dPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304860: fltTcaDppIfCktDropAg1wPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304861: fltTcaDppIfCktDropAg1moPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304862: fltTcaDppIfCktDropAg1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304863: fltTcaDppIfCktDropAg1yearPktsTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304864: fltTcaDppIfCktDropAg5minPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304865: fltTcaDppIfCktDropAg15minPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304866: fltTcaDppIfCktDropAg1hPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304867: fltTcaDppIfCktDropAg1dPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304868: fltTcaDppIfCktDropAg1wPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304869: fltTcaDppIfCktDropAg1moPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304870: fltTcaDppIfCktDropAg1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304871: fltTcaDppIfCktDropAg1yearPktsRate

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304920: fltTcaDppIfCktDropPart5minPktsRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304921: fltTcaDppIfCktDropPart15minPktsRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304922: fltTcaDppIfCktDropPart1hPktsRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304923: fltTcaDppIfCktDropPart1dPktsRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304924: fltTcaDppIfCktDropPart1wPktsRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304925: fltTcaDppIfCktDropPart1moPktsRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304926: fltTcaDppIfCktDropPart1qtrPktsRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304927: fltTcaDppIfCktDropPart1yearPktsRateLast

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304928: fltTcaDppIfCktDropPart5minPktsRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304929: fltTcaDppIfCktDropPart15minPktsRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304930: fltTcaDppIfCktDropPart1hPktsRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304931: fltTcaDppIfCktDropPart1dPktsRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304932: fltTcaDppIfCktDropPart1wPktsRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304933: fltTcaDppIfCktDropPart1moPktsRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304934: fltTcaDppIfCktDropPart1qtrPktsRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304935: fltTcaDppIfCktDropPart1yearPktsRateMin

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304936: fltTcaDppIfCktDropPart5minPktsRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304937: fltTcaDppIfCktDropPart15minPktsRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304938: fltTcaDppIfCktDropPart1hPktsRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304939: fltTcaDppIfCktDropPart1dPktsRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304940: fltTcaDppIfCktDropPart1wPktsRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304941: fltTcaDppIfCktDropPart1moPktsRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304942: fltTcaDppIfCktDropPart1qtrPktsRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304943: fltTcaDppIfCktDropPart1yearPktsRateMax

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304944: fltTcaDppIfCktDropPart5minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304945: fltTcaDppIfCktDropPart15minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304946: fltTcaDppIfCktDropPart1hPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304947: fltTcaDppIfCktDropPart1dPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304948: fltTcaDppIfCktDropPart1wPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304949: fltTcaDppIfCktDropPart1moPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304950: fltTcaDppIfCktDropPart1qtrPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304951: fltTcaDppIfCktDropPart1yearPktsRateAvg

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304984: fltTcaDppIfCktDropPart5minPktsRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304985: fltTcaDppIfCktDropPart15minPktsRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304986: fltTcaDppIfCktDropPart1hPktsRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304987: fltTcaDppIfCktDropPart1dPktsRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304988: fltTcaDppIfCktDropPart1wPktsRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304989: fltTcaDppIfCktDropPart1moPktsRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304990: fltTcaDppIfCktDropPart1qtrPktsRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F304991: fltTcaDppIfCktDropPart1yearPktsRateTr

Severity: variable

Explanation: This fault is caused by "IfCkt Ingress Policer Dropped Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "IfCkt Ingress Policer Dropped Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3053: fltPcFcAggrIfFcpmCfgCtrl

Severity: warning

Explanation: This fault is caused by a hardware programming failure

Recommended Action: The system will periodically retry to program the hardware. If the failure is due to lack of hardware resources, free up resources by removing or simplifying existing configuration. One of the reasons for lack of hardware resources is exhaustion of VLANs in ToR. These hardware resources can be examined by looking at capacity dashboard under OPERATIONS tab. Please check entry against the number of VLANs in output of command show vlan summary issued at node where fault is generated to check whether it exceeds above advertised node capacity.

F3054: fltPcFcAggrIfSan_pcmCfgCtrl

Severity: warning

Explanation: This fault is caused by a hardware programming failure

Recommended Action: The system will periodically retry to program the hardware. If the failure is due to lack of hardware resources, free up resources by removing or simplifying existing configuration. One of the reasons for lack of hardware resources is exhaustion of VLANs in ToR. These hardware resources can be examined by looking at capacity dashboard under OPERATIONS tab. Please check entry against the number of VLANs in output of command show vlan summary issued at node where fault is generated to check whether it exceeds above advertised node capacity.

F3055: fltL1VethIfEthpmCfgCtrl

Severity: warning

Explanation: This fault is caused by a hardware programming failure

Recommended Action: The system will periodically retry to program the hardware. If the failure is due to lack of hardware resources, free up resources by removing or simplifying existing configuration. One of the reasons for lack of hardware resources is exhaustion of VLANs in ToR. These hardware resources can be examined by looking at capacity dashboard under OPERATIONS tab. Please check entry against the number of VLANs in output of command show vlan summary issued at node where fault is generated to check whether it exceeds above advertised node capacity.

F3056: fltPcRsFcMbrIfsSan_pcmCfgCtrl

Severity: warning

Explanation: This fault is caused by a hardware programming failure

Recommended Action: The system will periodically retry to program the hardware. If the failure is due to lack of hardware resources, free up resources by removing or simplifying existing configuration. One of the reasons for lack of hardware resources is exhaustion of VLANs in ToR. These hardware resources can be examined by looking at capacity dashboard under OPERATIONS tab. Please check entry against the number of VLANs in output of command show vlan summary issued at node where fault is generated to check whether it exceeds above advertised node capacity.

F3057: fltLicenseManagerProductNotRegistered

Severity: warning

Explanation: This fault is raised when APIC smart licensing network settings are not configured and APIC cannot report license usage to Cisco Smart Software Manager (CSSM).

Recommended Action: If you see this fault, take the following actions:

1. Log on APIC UI, navigate to System -> Smart Licensing window and configure network settings.

F3058: fltLicenseManagerRegistrationFailure

Severity: major

Explanation: This fault is raised when the configuration of APIC smart licensing network settings is failed.

Recommended Action: If you see this fault, take the following actions:

1. The ID token might be invalid or expired. Log on the smart account in Cisco Smart Software Manager (CSSM) web site to create a new ID token.

2. Then, configure network settings again.

F3059: fltLicenseManagerLicenseOutOfCompliance

Severity: major

Explanation: This fault is raised when APIC Controller receives license out of compliance notification from CSSM.

Recommended Action: If you see this fault, take the following actions:

1. A number of issues can cause license out of compliance: (1) purchased licenses are not input in CSSM, (2) number of license in use exceeds number of license purchased, and (3) subscription-based licenses are expired in CSSM.

2. Log on customer's license account in CSSM and find out the exact issue that causes license out of compliance.

F3060: fltLicenseManagerLicenseAuthorizationExpired

Severity: major

Explanation: This fault is raised when APIC Controller receives license authorization expired notification from SA (Smart Agent), which indicates that APIC controller cannot communicate with CSSM. A user must resolve the issue as soon as possible. Otherwise, ID certificate could be expired, which requires re-register the product again.

Recommended Action: If you see this fault, take the following actions:

1. First check if APIC Controller can communicate with CSSM either directly or indirectly via satellite manager and proxy server.

2. After the network connectivity issue is resolved, manually renew license authorization as well as renew ID certificate.

F3061: fltLicenseManagerIdCertificateExpired

Severity: major

Explanation: This fault is raised when APIC Controller receives ID certificate expired notification from SA (Smart Agent).

Recommended Action: If you see this fault, take the following actions:

1. ID certificate is valid for one year. Normally, APIC controller can automatically renew ID certificate before it is expired. Before there is a network connectivity issue, it causes auto renewal of ID certificate failure.

2. Create a registration token from customer's license account in CSSM and register APIC product again.

F3062: fltLicenseEvaluationEvaluationExpired

Severity: major

Explanation: This fault is raised when product license evaluation period (90 days) is expired.

Recommended Action: If you see this fault, take the following actions:

1. Create a registration token from customer's license account in CSSM and register APIC Controller product using the registration token.

F3068: fltEpmAnycastIpEpEpIPAnycast

Severity: major

Explanation: This fault occurs when a learn for anycast IP is encountered with non-anycast MAC

Recommended Action: If this fault is consistently happening, try the following actions

1. Check learn source and MAC/IP pair

2. Ensure anycast MAC is configured with anycast IP

F3069: fltIpv4L3AnycastEPIpv4L3AnycastEpConfigFailed

Severity: warning

Explanation: This fault occurs when Anycast EP Reachability configuration is deployed on an unsupported platform TOR. The reason could be that this configuration is on a VRF that stretches to the unsupported TOR

Recommended Action: If this fault is seen consistently, try the following actions

1. Delete VRF deployment from the node

2. If the above actions do not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F3070: fltIpv6L3AnycastEPIpv6L3AnycastEpConfigFailed

Severity: warning

Explanation: This fault occurs when Anycast EP Reachability configuration is deployed on an unsupported platform TOR. The reason could be that this configuration is on a VRF that stretches to the unsupported TOR

Recommended Action: If this fault is seen consistently, try the following actions

1. Delete VRF deployment from the node

2. If the above actions do not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F3071: fltL2L2AnycastEPL2AnycastEpConfigFailed

Severity: warning

Explanation: This fault occurs when Anycast MAC EP Reachability configuration is deployed on an unsupported platform TOR. The reason could be that this configuration is on a BD that stretches to the unsupported TOR

Recommended Action: If this fault is seen consistently, try the following actions

1. Delete BD deployment from the node

2. If the above actions do not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F3072: fltLicenseManagerIdCertificateExpiredWarning

Severity: major

Explanation: This fault is raised when APIC Controller receives ID certificate expired warning notification from SA (Smart Agent), which indicates that APIC controller cannot communicate with CSSM. A user must resolve the issue as soon as possible. Otherwise, ID certificate could be expired, which requires registering the product again.

Recommended Action: If you see this fault, take the following actions:

1. First check if APIC Controller can communicate with CSSM either directly or indirectly via satellite manager and proxy server.

2. After the network connectivity issue is resolved, manually renew license authorization as well as renew ID certificate.

F3073: fltEqptFlashFlash-worn-out

Severity: major

Explanation: This fault occurs if the flash lifetime usage has reached 90% endurance limit

Recommended Action: If you see this fault, take the following actions:

1. Replace Switch/Supervisor as soon as possible.

2. If the above actions did not resolve the issue, create a show tech-support file and contact Cisco TAC.

F3074: fltEqptFlashFlash-minor-alarm

Severity: minor

Explanation: This fault occurs if the flash lifetime usage has reached 80% endurance limit

Recommended Action: If you see this fault, take the following actions:

1. Plan for Switch/Supervisor replacement soon.

2. If the above actions did not resolve the issue, create a show tech-support file and contact Cisco TAC.

F3080: fltBgpDomBGPSessionFlap

Severity: warning

Explanation: This fault occurs when the bgp dom router-id changes

Recommended Action: To recover from this fault, try the following actions

1. Look at any configuration issues

2. Verify the configuration is correct/complete

3. Verify if router-id was changed.

4. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F3081: fltAaaSamlEncCertSamlEncCertExpiring

Severity: major

Explanation: This fault occurs when the SAML X.509 Certificate is going to expire in one month.

Recommended Action: If you see this fault, take the following actions:

1. Update SAML X.509 Certificate soon.

F3082: fltAaaSamlEncCertSamlEncCertExpired

Severity: critical

Explanation: This fault occurs when the SAML X.509 Certificate has expired.

Recommended Action: If you see this fault, take the following actions:

1. Update SAML X.509 Certificate by going to Admin->AAA->Authentication->SAML.

F3083: fltFvIpConfig-error

Severity: major

Explanation: This fault occurs when multiple MACs have same IP address in the same VRF.

Recommended Action: None set.

F3086: fltTelemetryRsToCtxDefResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3088: fltTacacsRsDestGroupResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F308928: fltTcaCoppPermitPart5minBytesLast

Severity: variable

Explanation: This fault is caused by "Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308929: fltTcaCoppPermitPart15minBytesLast

Severity: variable

Explanation: This fault is caused by "Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308930: fltTcaCoppPermitPart1hBytesLast

Severity: variable

Explanation: This fault is caused by "Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308931: fltTcaCoppPermitPart1dBytesLast

Severity: variable

Explanation: This fault is caused by "Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308932: fltTcaCoppPermitPart1wBytesLast

Severity: variable

Explanation: This fault is caused by "Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308933: fltTcaCoppPermitPart1moBytesLast

Severity: variable

Explanation: This fault is caused by "Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308934: fltTcaCoppPermitPart1qtrBytesLast

Severity: variable

Explanation: This fault is caused by "Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308935: fltTcaCoppPermitPart1yearBytesLast

Severity: variable

Explanation: This fault is caused by "Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308944: fltTcaCoppPermitPart5minBytesCum

Severity: variable

Explanation: This fault is caused by "Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308945: fltTcaCoppPermitPart15minBytesCum

Severity: variable

Explanation: This fault is caused by "Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308946: fltTcaCoppPermitPart1hBytesCum

Severity: variable

Explanation: This fault is caused by "Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308947: fltTcaCoppPermitPart1dBytesCum

Severity: variable

Explanation: This fault is caused by "Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308948: fltTcaCoppPermitPart1wBytesCum

Severity: variable

Explanation: This fault is caused by "Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308949: fltTcaCoppPermitPart1moBytesCum

Severity: variable

Explanation: This fault is caused by "Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308950: fltTcaCoppPermitPart1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308951: fltTcaCoppPermitPart1yearBytesCum

Severity: variable

Explanation: This fault is caused by "Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308952: fltTcaCoppPermitPart5minBytesPer

Severity: variable

Explanation: This fault is caused by "Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308953: fltTcaCoppPermitPart15minBytesPer

Severity: variable

Explanation: This fault is caused by "Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308954: fltTcaCoppPermitPart1hBytesPer

Severity: variable

Explanation: This fault is caused by "Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308955: fltTcaCoppPermitPart1dBytesPer

Severity: variable

Explanation: This fault is caused by "Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308956: fltTcaCoppPermitPart1wBytesPer

Severity: variable

Explanation: This fault is caused by "Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308957: fltTcaCoppPermitPart1moBytesPer

Severity: variable

Explanation: This fault is caused by "Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308958: fltTcaCoppPermitPart1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308959: fltTcaCoppPermitPart1yearBytesPer

Severity: variable

Explanation: This fault is caused by "Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308960: fltTcaCoppPermitPart5minBytesMin

Severity: variable

Explanation: This fault is caused by "Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308961: fltTcaCoppPermitPart15minBytesMin

Severity: variable

Explanation: This fault is caused by "Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308962: fltTcaCoppPermitPart1hBytesMin

Severity: variable

Explanation: This fault is caused by "Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308963: fltTcaCoppPermitPart1dBytesMin

Severity: variable

Explanation: This fault is caused by "Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308964: fltTcaCoppPermitPart1wBytesMin

Severity: variable

Explanation: This fault is caused by "Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308965: fltTcaCoppPermitPart1moBytesMin

Severity: variable

Explanation: This fault is caused by "Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308966: fltTcaCoppPermitPart1qtrBytesMin

Severity: variable

Explanation: This fault is caused by "Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308967: fltTcaCoppPermitPart1yearBytesMin

Severity: variable

Explanation: This fault is caused by "Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308968: fltTcaCoppPermitPart5minBytesMax

Severity: variable

Explanation: This fault is caused by "Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308969: fltTcaCoppPermitPart15minBytesMax

Severity: variable

Explanation: This fault is caused by "Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308970: fltTcaCoppPermitPart1hBytesMax

Severity: variable

Explanation: This fault is caused by "Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308971: fltTcaCoppPermitPart1dBytesMax

Severity: variable

Explanation: This fault is caused by "Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308972: fltTcaCoppPermitPart1wBytesMax

Severity: variable

Explanation: This fault is caused by "Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308973: fltTcaCoppPermitPart1moBytesMax

Severity: variable

Explanation: This fault is caused by "Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308974: fltTcaCoppPermitPart1qtrBytesMax

Severity: variable

Explanation: This fault is caused by "Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308975: fltTcaCoppPermitPart1yearBytesMax

Severity: variable

Explanation: This fault is caused by "Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308976: fltTcaCoppPermitPart5minBytesAvg

Severity: variable

Explanation: This fault is caused by "Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308977: fltTcaCoppPermitPart15minBytesAvg

Severity: variable

Explanation: This fault is caused by "Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308978: fltTcaCoppPermitPart1hBytesAvg

Severity: variable

Explanation: This fault is caused by "Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308979: fltTcaCoppPermitPart1dBytesAvg

Severity: variable

Explanation: This fault is caused by "Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308980: fltTcaCoppPermitPart1wBytesAvg

Severity: variable

Explanation: This fault is caused by "Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308981: fltTcaCoppPermitPart1moBytesAvg

Severity: variable

Explanation: This fault is caused by "Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308982: fltTcaCoppPermitPart1qtrBytesAvg

Severity: variable

Explanation: This fault is caused by "Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F308983: fltTcaCoppPermitPart1yearBytesAvg

Severity: variable

Explanation: This fault is caused by "Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309008: fltTcaCoppPermitPart5minBytesTr

Severity: variable

Explanation: This fault is caused by "Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309009: fltTcaCoppPermitPart15minBytesTr

Severity: variable

Explanation: This fault is caused by "Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309010: fltTcaCoppPermitPart1hBytesTr

Severity: variable

Explanation: This fault is caused by "Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309011: fltTcaCoppPermitPart1dBytesTr

Severity: variable

Explanation: This fault is caused by "Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309012: fltTcaCoppPermitPart1wBytesTr

Severity: variable

Explanation: This fault is caused by "Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309013: fltTcaCoppPermitPart1moBytesTr

Severity: variable

Explanation: This fault is caused by "Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309014: fltTcaCoppPermitPart1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309015: fltTcaCoppPermitPart1yearBytesTr

Severity: variable

Explanation: This fault is caused by "Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309016: fltTcaCoppPermitPart5minBytesRate

Severity: variable

Explanation: This fault is caused by "Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309017: fltTcaCoppPermitPart15minBytesRate

Severity: variable

Explanation: This fault is caused by "Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309018: fltTcaCoppPermitPart1hBytesRate

Severity: variable

Explanation: This fault is caused by "Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309019: fltTcaCoppPermitPart1dBytesRate

Severity: variable

Explanation: This fault is caused by "Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309020: fltTcaCoppPermitPart1wBytesRate

Severity: variable

Explanation: This fault is caused by "Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309021: fltTcaCoppPermitPart1moBytesRate

Severity: variable

Explanation: This fault is caused by "Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309022: fltTcaCoppPermitPart1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309023: fltTcaCoppPermitPart1yearBytesRate

Severity: variable

Explanation: This fault is caused by "Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309096: fltTcaCoppPermitAg5minBytesCum

Severity: variable

Explanation: This fault is caused by "Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309097: fltTcaCoppPermitAg15minBytesCum

Severity: variable

Explanation: This fault is caused by "Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309098: fltTcaCoppPermitAg1hBytesCum

Severity: variable

Explanation: This fault is caused by "Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309099: fltTcaCoppPermitAg1dBytesCum

Severity: variable

Explanation: This fault is caused by "Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309100: fltTcaCoppPermitAg1wBytesCum

Severity: variable

Explanation: This fault is caused by "Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309101: fltTcaCoppPermitAg1moBytesCum

Severity: variable

Explanation: This fault is caused by "Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309102: fltTcaCoppPermitAg1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309103: fltTcaCoppPermitAg1yearBytesCum

Severity: variable

Explanation: This fault is caused by "Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309104: fltTcaCoppPermitAg5minBytesPer

Severity: variable

Explanation: This fault is caused by "Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309105: fltTcaCoppPermitAg15minBytesPer

Severity: variable

Explanation: This fault is caused by "Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309106: fltTcaCoppPermitAg1hBytesPer

Severity: variable

Explanation: This fault is caused by "Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309107: fltTcaCoppPermitAg1dBytesPer

Severity: variable

Explanation: This fault is caused by "Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309108: fltTcaCoppPermitAg1wBytesPer

Severity: variable

Explanation: This fault is caused by "Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309109: fltTcaCoppPermitAg1moBytesPer

Severity: variable

Explanation: This fault is caused by "Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309110: fltTcaCoppPermitAg1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309111: fltTcaCoppPermitAg1yearBytesPer

Severity: variable

Explanation: This fault is caused by "Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309136: fltTcaCoppPermitAg5minBytesTr

Severity: variable

Explanation: This fault is caused by "Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309137: fltTcaCoppPermitAg15minBytesTr

Severity: variable

Explanation: This fault is caused by "Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309138: fltTcaCoppPermitAg1hBytesTr

Severity: variable

Explanation: This fault is caused by "Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309139: fltTcaCoppPermitAg1dBytesTr

Severity: variable

Explanation: This fault is caused by "Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309140: fltTcaCoppPermitAg1wBytesTr

Severity: variable

Explanation: This fault is caused by "Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309141: fltTcaCoppPermitAg1moBytesTr

Severity: variable

Explanation: This fault is caused by "Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309142: fltTcaCoppPermitAg1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309143: fltTcaCoppPermitAg1yearBytesTr

Severity: variable

Explanation: This fault is caused by "Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309144: fltTcaCoppPermitAg5minBytesRate

Severity: variable

Explanation: This fault is caused by "Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309145: fltTcaCoppPermitAg15minBytesRate

Severity: variable

Explanation: This fault is caused by "Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309146: fltTcaCoppPermitAg1hBytesRate

Severity: variable

Explanation: This fault is caused by "Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309147: fltTcaCoppPermitAg1dBytesRate

Severity: variable

Explanation: This fault is caused by "Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309148: fltTcaCoppPermitAg1wBytesRate

Severity: variable

Explanation: This fault is caused by "Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309149: fltTcaCoppPermitAg1moBytesRate

Severity: variable

Explanation: This fault is caused by "Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309150: fltTcaCoppPermitAg1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309151: fltTcaCoppPermitAg1yearBytesRate

Severity: variable

Explanation: This fault is caused by "Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309200: fltTcaCoppPermitPart5minBytesRateLast

Severity: variable

Explanation: This fault is caused by "Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309201: fltTcaCoppPermitPart15minBytesRateLast

Severity: variable

Explanation: This fault is caused by "Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309202: fltTcaCoppPermitPart1hBytesRateLast

Severity: variable

Explanation: This fault is caused by "Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309203: fltTcaCoppPermitPart1dBytesRateLast

Severity: variable

Explanation: This fault is caused by "Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309204: fltTcaCoppPermitPart1wBytesRateLast

Severity: variable

Explanation: This fault is caused by "Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309205: fltTcaCoppPermitPart1moBytesRateLast

Severity: variable

Explanation: This fault is caused by "Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309206: fltTcaCoppPermitPart1qtrBytesRateLast

Severity: variable

Explanation: This fault is caused by "Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309207: fltTcaCoppPermitPart1yearBytesRateLast

Severity: variable

Explanation: This fault is caused by "Bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309208: fltTcaCoppPermitPart5minBytesRateMin

Severity: variable

Explanation: This fault is caused by "Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309209: fltTcaCoppPermitPart15minBytesRateMin

Severity: variable

Explanation: This fault is caused by "Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309210: fltTcaCoppPermitPart1hBytesRateMin

Severity: variable

Explanation: This fault is caused by "Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309211: fltTcaCoppPermitPart1dBytesRateMin

Severity: variable

Explanation: This fault is caused by "Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309212: fltTcaCoppPermitPart1wBytesRateMin

Severity: variable

Explanation: This fault is caused by "Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309213: fltTcaCoppPermitPart1moBytesRateMin

Severity: variable

Explanation: This fault is caused by "Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309214: fltTcaCoppPermitPart1qtrBytesRateMin

Severity: variable

Explanation: This fault is caused by "Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309215: fltTcaCoppPermitPart1yearBytesRateMin

Severity: variable

Explanation: This fault is caused by "Bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309216: fltTcaCoppPermitPart5minBytesRateMax

Severity: variable

Explanation: This fault is caused by "Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309217: fltTcaCoppPermitPart15minBytesRateMax

Severity: variable

Explanation: This fault is caused by "Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309218: fltTcaCoppPermitPart1hBytesRateMax

Severity: variable

Explanation: This fault is caused by "Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309219: fltTcaCoppPermitPart1dBytesRateMax

Severity: variable

Explanation: This fault is caused by "Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309220: fltTcaCoppPermitPart1wBytesRateMax

Severity: variable

Explanation: This fault is caused by "Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309221: fltTcaCoppPermitPart1moBytesRateMax

Severity: variable

Explanation: This fault is caused by "Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309222: fltTcaCoppPermitPart1qtrBytesRateMax

Severity: variable

Explanation: This fault is caused by "Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309223: fltTcaCoppPermitPart1yearBytesRateMax

Severity: variable

Explanation: This fault is caused by "Bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309224: fltTcaCoppPermitPart5minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309225: fltTcaCoppPermitPart15minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309226: fltTcaCoppPermitPart1hBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309227: fltTcaCoppPermitPart1dBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309228: fltTcaCoppPermitPart1wBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309229: fltTcaCoppPermitPart1moBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309230: fltTcaCoppPermitPart1qtrBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309231: fltTcaCoppPermitPart1yearBytesRateAvg

Severity: variable

Explanation: This fault is caused by "Bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309264: fltTcaCoppPermitPart5minBytesRateTr

Severity: variable

Explanation: This fault is caused by "Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309265: fltTcaCoppPermitPart15minBytesRateTr

Severity: variable

Explanation: This fault is caused by "Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309266: fltTcaCoppPermitPart1hBytesRateTr

Severity: variable

Explanation: This fault is caused by "Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309267: fltTcaCoppPermitPart1dBytesRateTr

Severity: variable

Explanation: This fault is caused by "Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309268: fltTcaCoppPermitPart1wBytesRateTr

Severity: variable

Explanation: This fault is caused by "Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309269: fltTcaCoppPermitPart1moBytesRateTr

Severity: variable

Explanation: This fault is caused by "Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309270: fltTcaCoppPermitPart1qtrBytesRateTr

Severity: variable

Explanation: This fault is caused by "Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309271: fltTcaCoppPermitPart1yearBytesRateTr

Severity: variable

Explanation: This fault is caused by "Bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309320: fltTcaCoppPermitPart5minPktsLast

Severity: variable

Explanation: This fault is caused by "Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309321: fltTcaCoppPermitPart15minPktsLast

Severity: variable

Explanation: This fault is caused by "Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309322: fltTcaCoppPermitPart1hPktsLast

Severity: variable

Explanation: This fault is caused by "Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309323: fltTcaCoppPermitPart1dPktsLast

Severity: variable

Explanation: This fault is caused by "Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309324: fltTcaCoppPermitPart1wPktsLast

Severity: variable

Explanation: This fault is caused by "Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309325: fltTcaCoppPermitPart1moPktsLast

Severity: variable

Explanation: This fault is caused by "Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309326: fltTcaCoppPermitPart1qtrPktsLast

Severity: variable

Explanation: This fault is caused by "Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309327: fltTcaCoppPermitPart1yearPktsLast

Severity: variable

Explanation: This fault is caused by "Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309336: fltTcaCoppPermitPart5minPktsCum

Severity: variable

Explanation: This fault is caused by "Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309337: fltTcaCoppPermitPart15minPktsCum

Severity: variable

Explanation: This fault is caused by "Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309338: fltTcaCoppPermitPart1hPktsCum

Severity: variable

Explanation: This fault is caused by "Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309339: fltTcaCoppPermitPart1dPktsCum

Severity: variable

Explanation: This fault is caused by "Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309340: fltTcaCoppPermitPart1wPktsCum

Severity: variable

Explanation: This fault is caused by "Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309341: fltTcaCoppPermitPart1moPktsCum

Severity: variable

Explanation: This fault is caused by "Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309342: fltTcaCoppPermitPart1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309343: fltTcaCoppPermitPart1yearPktsCum

Severity: variable

Explanation: This fault is caused by "Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309344: fltTcaCoppPermitPart5minPktsPer

Severity: variable

Explanation: This fault is caused by "Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309345: fltTcaCoppPermitPart15minPktsPer

Severity: variable

Explanation: This fault is caused by "Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309346: fltTcaCoppPermitPart1hPktsPer

Severity: variable

Explanation: This fault is caused by "Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309347: fltTcaCoppPermitPart1dPktsPer

Severity: variable

Explanation: This fault is caused by "Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309348: fltTcaCoppPermitPart1wPktsPer

Severity: variable

Explanation: This fault is caused by "Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309349: fltTcaCoppPermitPart1moPktsPer

Severity: variable

Explanation: This fault is caused by "Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309350: fltTcaCoppPermitPart1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309351: fltTcaCoppPermitPart1yearPktsPer

Severity: variable

Explanation: This fault is caused by "Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309352: fltTcaCoppPermitPart5minPktsMin

Severity: variable

Explanation: This fault is caused by "Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309353: fltTcaCoppPermitPart15minPktsMin

Severity: variable

Explanation: This fault is caused by "Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309354: fltTcaCoppPermitPart1hPktsMin

Severity: variable

Explanation: This fault is caused by "Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309355: fltTcaCoppPermitPart1dPktsMin

Severity: variable

Explanation: This fault is caused by "Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309356: fltTcaCoppPermitPart1wPktsMin

Severity: variable

Explanation: This fault is caused by "Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309357: fltTcaCoppPermitPart1moPktsMin

Severity: variable

Explanation: This fault is caused by "Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309358: fltTcaCoppPermitPart1qtrPktsMin

Severity: variable

Explanation: This fault is caused by "Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309359: fltTcaCoppPermitPart1yearPktsMin

Severity: variable

Explanation: This fault is caused by "Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309360: fltTcaCoppPermitPart5minPktsMax

Severity: variable

Explanation: This fault is caused by "Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309361: fltTcaCoppPermitPart15minPktsMax

Severity: variable

Explanation: This fault is caused by "Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309362: fltTcaCoppPermitPart1hPktsMax

Severity: variable

Explanation: This fault is caused by "Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309363: fltTcaCoppPermitPart1dPktsMax

Severity: variable

Explanation: This fault is caused by "Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309364: fltTcaCoppPermitPart1wPktsMax

Severity: variable

Explanation: This fault is caused by "Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309365: fltTcaCoppPermitPart1moPktsMax

Severity: variable

Explanation: This fault is caused by "Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309366: fltTcaCoppPermitPart1qtrPktsMax

Severity: variable

Explanation: This fault is caused by "Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309367: fltTcaCoppPermitPart1yearPktsMax

Severity: variable

Explanation: This fault is caused by "Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309368: fltTcaCoppPermitPart5minPktsAvg

Severity: variable

Explanation: This fault is caused by "Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309369: fltTcaCoppPermitPart15minPktsAvg

Severity: variable

Explanation: This fault is caused by "Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309370: fltTcaCoppPermitPart1hPktsAvg

Severity: variable

Explanation: This fault is caused by "Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309371: fltTcaCoppPermitPart1dPktsAvg

Severity: variable

Explanation: This fault is caused by "Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309372: fltTcaCoppPermitPart1wPktsAvg

Severity: variable

Explanation: This fault is caused by "Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309373: fltTcaCoppPermitPart1moPktsAvg

Severity: variable

Explanation: This fault is caused by "Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309374: fltTcaCoppPermitPart1qtrPktsAvg

Severity: variable

Explanation: This fault is caused by "Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309375: fltTcaCoppPermitPart1yearPktsAvg

Severity: variable

Explanation: This fault is caused by "Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309400: fltTcaCoppPermitPart5minPktsTr

Severity: variable

Explanation: This fault is caused by "Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309401: fltTcaCoppPermitPart15minPktsTr

Severity: variable

Explanation: This fault is caused by "Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309402: fltTcaCoppPermitPart1hPktsTr

Severity: variable

Explanation: This fault is caused by "Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309403: fltTcaCoppPermitPart1dPktsTr

Severity: variable

Explanation: This fault is caused by "Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309404: fltTcaCoppPermitPart1wPktsTr

Severity: variable

Explanation: This fault is caused by "Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309405: fltTcaCoppPermitPart1moPktsTr

Severity: variable

Explanation: This fault is caused by "Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309406: fltTcaCoppPermitPart1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309407: fltTcaCoppPermitPart1yearPktsTr

Severity: variable

Explanation: This fault is caused by "Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309408: fltTcaCoppPermitPart5minPktsRate

Severity: variable

Explanation: This fault is caused by "Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309409: fltTcaCoppPermitPart15minPktsRate

Severity: variable

Explanation: This fault is caused by "Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309410: fltTcaCoppPermitPart1hPktsRate

Severity: variable

Explanation: This fault is caused by "Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309411: fltTcaCoppPermitPart1dPktsRate

Severity: variable

Explanation: This fault is caused by "Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309412: fltTcaCoppPermitPart1wPktsRate

Severity: variable

Explanation: This fault is caused by "Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309413: fltTcaCoppPermitPart1moPktsRate

Severity: variable

Explanation: This fault is caused by "Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309414: fltTcaCoppPermitPart1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309415: fltTcaCoppPermitPart1yearPktsRate

Severity: variable

Explanation: This fault is caused by "Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309488: fltTcaCoppPermitAg5minPktsCum

Severity: variable

Explanation: This fault is caused by "Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309489: fltTcaCoppPermitAg15minPktsCum

Severity: variable

Explanation: This fault is caused by "Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309490: fltTcaCoppPermitAg1hPktsCum

Severity: variable

Explanation: This fault is caused by "Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309491: fltTcaCoppPermitAg1dPktsCum

Severity: variable

Explanation: This fault is caused by "Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309492: fltTcaCoppPermitAg1wPktsCum

Severity: variable

Explanation: This fault is caused by "Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309493: fltTcaCoppPermitAg1moPktsCum

Severity: variable

Explanation: This fault is caused by "Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309494: fltTcaCoppPermitAg1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309495: fltTcaCoppPermitAg1yearPktsCum

Severity: variable

Explanation: This fault is caused by "Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309496: fltTcaCoppPermitAg5minPktsPer

Severity: variable

Explanation: This fault is caused by "Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309497: fltTcaCoppPermitAg15minPktsPer

Severity: variable

Explanation: This fault is caused by "Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309498: fltTcaCoppPermitAg1hPktsPer

Severity: variable

Explanation: This fault is caused by "Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309499: fltTcaCoppPermitAg1dPktsPer

Severity: variable

Explanation: This fault is caused by "Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309500: fltTcaCoppPermitAg1wPktsPer

Severity: variable

Explanation: This fault is caused by "Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309501: fltTcaCoppPermitAg1moPktsPer

Severity: variable

Explanation: This fault is caused by "Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309502: fltTcaCoppPermitAg1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309503: fltTcaCoppPermitAg1yearPktsPer

Severity: variable

Explanation: This fault is caused by "Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309528: fltTcaCoppPermitAg5minPktsTr

Severity: variable

Explanation: This fault is caused by "Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309529: fltTcaCoppPermitAg15minPktsTr

Severity: variable

Explanation: This fault is caused by "Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309530: fltTcaCoppPermitAg1hPktsTr

Severity: variable

Explanation: This fault is caused by "Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309531: fltTcaCoppPermitAg1dPktsTr

Severity: variable

Explanation: This fault is caused by "Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309532: fltTcaCoppPermitAg1wPktsTr

Severity: variable

Explanation: This fault is caused by "Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309533: fltTcaCoppPermitAg1moPktsTr

Severity: variable

Explanation: This fault is caused by "Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309534: fltTcaCoppPermitAg1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309535: fltTcaCoppPermitAg1yearPktsTr

Severity: variable

Explanation: This fault is caused by "Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309536: fltTcaCoppPermitAg5minPktsRate

Severity: variable

Explanation: This fault is caused by "Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309537: fltTcaCoppPermitAg15minPktsRate

Severity: variable

Explanation: This fault is caused by "Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309538: fltTcaCoppPermitAg1hPktsRate

Severity: variable

Explanation: This fault is caused by "Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309539: fltTcaCoppPermitAg1dPktsRate

Severity: variable

Explanation: This fault is caused by "Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309540: fltTcaCoppPermitAg1wPktsRate

Severity: variable

Explanation: This fault is caused by "Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309541: fltTcaCoppPermitAg1moPktsRate

Severity: variable

Explanation: This fault is caused by "Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309542: fltTcaCoppPermitAg1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309543: fltTcaCoppPermitAg1yearPktsRate

Severity: variable

Explanation: This fault is caused by "Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309592: fltTcaCoppPermitPart5minPktsRateLast

Severity: variable

Explanation: This fault is caused by "Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309593: fltTcaCoppPermitPart15minPktsRateLast

Severity: variable

Explanation: This fault is caused by "Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309594: fltTcaCoppPermitPart1hPktsRateLast

Severity: variable

Explanation: This fault is caused by "Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309595: fltTcaCoppPermitPart1dPktsRateLast

Severity: variable

Explanation: This fault is caused by "Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309596: fltTcaCoppPermitPart1wPktsRateLast

Severity: variable

Explanation: This fault is caused by "Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309597: fltTcaCoppPermitPart1moPktsRateLast

Severity: variable

Explanation: This fault is caused by "Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309598: fltTcaCoppPermitPart1qtrPktsRateLast

Severity: variable

Explanation: This fault is caused by "Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309599: fltTcaCoppPermitPart1yearPktsRateLast

Severity: variable

Explanation: This fault is caused by "Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309600: fltTcaCoppPermitPart5minPktsRateMin

Severity: variable

Explanation: This fault is caused by "Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309601: fltTcaCoppPermitPart15minPktsRateMin

Severity: variable

Explanation: This fault is caused by "Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309602: fltTcaCoppPermitPart1hPktsRateMin

Severity: variable

Explanation: This fault is caused by "Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309603: fltTcaCoppPermitPart1dPktsRateMin

Severity: variable

Explanation: This fault is caused by "Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309604: fltTcaCoppPermitPart1wPktsRateMin

Severity: variable

Explanation: This fault is caused by "Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309605: fltTcaCoppPermitPart1moPktsRateMin

Severity: variable

Explanation: This fault is caused by "Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309606: fltTcaCoppPermitPart1qtrPktsRateMin

Severity: variable

Explanation: This fault is caused by "Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309607: fltTcaCoppPermitPart1yearPktsRateMin

Severity: variable

Explanation: This fault is caused by "Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309608: fltTcaCoppPermitPart5minPktsRateMax

Severity: variable

Explanation: This fault is caused by "Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309609: fltTcaCoppPermitPart15minPktsRateMax

Severity: variable

Explanation: This fault is caused by "Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309610: fltTcaCoppPermitPart1hPktsRateMax

Severity: variable

Explanation: This fault is caused by "Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309611: fltTcaCoppPermitPart1dPktsRateMax

Severity: variable

Explanation: This fault is caused by "Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309612: fltTcaCoppPermitPart1wPktsRateMax

Severity: variable

Explanation: This fault is caused by "Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309613: fltTcaCoppPermitPart1moPktsRateMax

Severity: variable

Explanation: This fault is caused by "Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309614: fltTcaCoppPermitPart1qtrPktsRateMax

Severity: variable

Explanation: This fault is caused by "Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309615: fltTcaCoppPermitPart1yearPktsRateMax

Severity: variable

Explanation: This fault is caused by "Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309616: fltTcaCoppPermitPart5minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309617: fltTcaCoppPermitPart15minPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309618: fltTcaCoppPermitPart1hPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309619: fltTcaCoppPermitPart1dPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309620: fltTcaCoppPermitPart1wPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309621: fltTcaCoppPermitPart1moPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309622: fltTcaCoppPermitPart1qtrPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309623: fltTcaCoppPermitPart1yearPktsRateAvg

Severity: variable

Explanation: This fault is caused by "Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309656: fltTcaCoppPermitPart5minPktsRateTr

Severity: variable

Explanation: This fault is caused by "Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309657: fltTcaCoppPermitPart15minPktsRateTr

Severity: variable

Explanation: This fault is caused by "Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309658: fltTcaCoppPermitPart1hPktsRateTr

Severity: variable

Explanation: This fault is caused by "Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309659: fltTcaCoppPermitPart1dPktsRateTr

Severity: variable

Explanation: This fault is caused by "Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309660: fltTcaCoppPermitPart1wPktsRateTr

Severity: variable

Explanation: This fault is caused by "Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309661: fltTcaCoppPermitPart1moPktsRateTr

Severity: variable

Explanation: This fault is caused by "Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309662: fltTcaCoppPermitPart1qtrPktsRateTr

Severity: variable

Explanation: This fault is caused by "Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F309663: fltTcaCoppPermitPart1yearPktsRateTr

Severity: variable

Explanation: This fault is caused by "Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3103: fltDot1xIfInvalidConfiguration

Severity: minor

Explanation: This fault occurs when Dot1x and MACSEC policies are configured on the same port

Recommended Action: If you see this fault, take the following actions

1. Dot1x and MACSEC policies should not be configured on the same port

2. MACSEC traffic might be affected by this configuration

F3105: fltSvcredirDestGrpHwprog-failed

Severity: major

Explanation: This fault occurs when PBR service dest group goes to failed state due to number of redir dests crosses limit of 128

Recommended Action: To recover from this fault, try the following actions

1. reduce the number of dests to 128 or less

F3108: fltL3extRsLIfPCustQosPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3109: fltVnsRsLIfCtxToCustQosPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3113: fltFcpmFcotBaseInvalidTransceiver

Severity: critical

Explanation: This fault occurs when a transceiver is invalid or has hardware issues.

Recommended Action: To recover from this fault, try the following actions

1. Remove the defective transceiver and replace with valid one.

2. Push in the transceiver if loose.

F3117: fltVnsRsL1L2RedirectHealthGroupResolveFail

Severity: minor

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3118: fltMacsecIfPolConfigStConfigConflict

Severity: warning

Explanation: This fault occurs when the Macsec policy conflicts with dot1x policy

Recommended Action: This fault occurs when you are trying to configure MACSec on

1. An interface already configured with dot1x

F312240: fltTcaOpflexOvsContract5minBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312241: fltTcaOpflexOvsContract15minBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312242: fltTcaOpflexOvsContract1hBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312243: fltTcaOpflexOvsContract1dBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312244: fltTcaOpflexOvsContract1wBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312245: fltTcaOpflexOvsContract1moBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312246: fltTcaOpflexOvsContract1qtrBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312247: fltTcaOpflexOvsContract1yearBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312256: fltTcaOpflexOvsContract5minBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312257: fltTcaOpflexOvsContract15minBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312258: fltTcaOpflexOvsContract1hBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312259: fltTcaOpflexOvsContract1dBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312260: fltTcaOpflexOvsContract1wBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312261: fltTcaOpflexOvsContract1moBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312262: fltTcaOpflexOvsContract1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312263: fltTcaOpflexOvsContract1yearBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312264: fltTcaOpflexOvsContract5minBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312265: fltTcaOpflexOvsContract15minBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312266: fltTcaOpflexOvsContract1hBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312267: fltTcaOpflexOvsContract1dBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312268: fltTcaOpflexOvsContract1wBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312269: fltTcaOpflexOvsContract1moBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312270: fltTcaOpflexOvsContract1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312271: fltTcaOpflexOvsContract1yearBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312272: fltTcaOpflexOvsContract5minBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312273: fltTcaOpflexOvsContract15minBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312274: fltTcaOpflexOvsContract1hBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312275: fltTcaOpflexOvsContract1dBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312276: fltTcaOpflexOvsContract1wBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312277: fltTcaOpflexOvsContract1moBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312278: fltTcaOpflexOvsContract1qtrBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312279: fltTcaOpflexOvsContract1yearBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312280: fltTcaOpflexOvsContract5minBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312281: fltTcaOpflexOvsContract15minBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312282: fltTcaOpflexOvsContract1hBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312283: fltTcaOpflexOvsContract1dBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312284: fltTcaOpflexOvsContract1wBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312285: fltTcaOpflexOvsContract1moBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312286: fltTcaOpflexOvsContract1qtrBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312287: fltTcaOpflexOvsContract1yearBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312288: fltTcaOpflexOvsContract5minBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312289: fltTcaOpflexOvsContract15minBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312290: fltTcaOpflexOvsContract1hBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312291: fltTcaOpflexOvsContract1dBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312292: fltTcaOpflexOvsContract1wBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312293: fltTcaOpflexOvsContract1moBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312294: fltTcaOpflexOvsContract1qtrBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312295: fltTcaOpflexOvsContract1yearBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312320: fltTcaOpflexOvsContract5minBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312321: fltTcaOpflexOvsContract15minBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312322: fltTcaOpflexOvsContract1hBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312323: fltTcaOpflexOvsContract1dBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312324: fltTcaOpflexOvsContract1wBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312325: fltTcaOpflexOvsContract1moBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312326: fltTcaOpflexOvsContract1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312327: fltTcaOpflexOvsContract1yearBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312328: fltTcaOpflexOvsContract5minBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312329: fltTcaOpflexOvsContract15minBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312330: fltTcaOpflexOvsContract1hBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312331: fltTcaOpflexOvsContract1dBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312332: fltTcaOpflexOvsContract1wBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312333: fltTcaOpflexOvsContract1moBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312334: fltTcaOpflexOvsContract1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312335: fltTcaOpflexOvsContract1yearBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312408: fltTcaOpflexOvsContractPart5minBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312409: fltTcaOpflexOvsContractPart15minBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312410: fltTcaOpflexOvsContractPart1hBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312411: fltTcaOpflexOvsContractPart1dBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312412: fltTcaOpflexOvsContractPart1wBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312413: fltTcaOpflexOvsContractPart1moBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312414: fltTcaOpflexOvsContractPart1qtrBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312415: fltTcaOpflexOvsContractPart1yearBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312424: fltTcaOpflexOvsContractPart5minBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312425: fltTcaOpflexOvsContractPart15minBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312426: fltTcaOpflexOvsContractPart1hBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312427: fltTcaOpflexOvsContractPart1dBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312428: fltTcaOpflexOvsContractPart1wBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312429: fltTcaOpflexOvsContractPart1moBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312430: fltTcaOpflexOvsContractPart1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312431: fltTcaOpflexOvsContractPart1yearBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312432: fltTcaOpflexOvsContractPart5minBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312433: fltTcaOpflexOvsContractPart15minBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312434: fltTcaOpflexOvsContractPart1hBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312435: fltTcaOpflexOvsContractPart1dBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312436: fltTcaOpflexOvsContractPart1wBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312437: fltTcaOpflexOvsContractPart1moBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312438: fltTcaOpflexOvsContractPart1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312439: fltTcaOpflexOvsContractPart1yearBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312440: fltTcaOpflexOvsContractPart5minBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312441: fltTcaOpflexOvsContractPart15minBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312442: fltTcaOpflexOvsContractPart1hBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312443: fltTcaOpflexOvsContractPart1dBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312444: fltTcaOpflexOvsContractPart1wBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312445: fltTcaOpflexOvsContractPart1moBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312446: fltTcaOpflexOvsContractPart1qtrBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312447: fltTcaOpflexOvsContractPart1yearBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312448: fltTcaOpflexOvsContractPart5minBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312449: fltTcaOpflexOvsContractPart15minBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312450: fltTcaOpflexOvsContractPart1hBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312451: fltTcaOpflexOvsContractPart1dBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312452: fltTcaOpflexOvsContractPart1wBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312453: fltTcaOpflexOvsContractPart1moBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312454: fltTcaOpflexOvsContractPart1qtrBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312455: fltTcaOpflexOvsContractPart1yearBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312456: fltTcaOpflexOvsContractPart5minBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312457: fltTcaOpflexOvsContractPart15minBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312458: fltTcaOpflexOvsContractPart1hBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312459: fltTcaOpflexOvsContractPart1dBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312460: fltTcaOpflexOvsContractPart1wBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312461: fltTcaOpflexOvsContractPart1moBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312462: fltTcaOpflexOvsContractPart1qtrBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312463: fltTcaOpflexOvsContractPart1yearBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312488: fltTcaOpflexOvsContractPart5minBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312489: fltTcaOpflexOvsContractPart15minBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312490: fltTcaOpflexOvsContractPart1hBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312491: fltTcaOpflexOvsContractPart1dBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312492: fltTcaOpflexOvsContractPart1wBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312493: fltTcaOpflexOvsContractPart1moBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312494: fltTcaOpflexOvsContractPart1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312495: fltTcaOpflexOvsContractPart1yearBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312496: fltTcaOpflexOvsContractPart5minBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312497: fltTcaOpflexOvsContractPart15minBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312498: fltTcaOpflexOvsContractPart1hBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312499: fltTcaOpflexOvsContractPart1dBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312500: fltTcaOpflexOvsContractPart1wBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312501: fltTcaOpflexOvsContractPart1moBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312502: fltTcaOpflexOvsContractPart1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312503: fltTcaOpflexOvsContractPart1yearBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312576: fltTcaOpflexOvsContractAg5minBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312577: fltTcaOpflexOvsContractAg15minBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312578: fltTcaOpflexOvsContractAg1hBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312579: fltTcaOpflexOvsContractAg1dBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312580: fltTcaOpflexOvsContractAg1wBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312581: fltTcaOpflexOvsContractAg1moBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312582: fltTcaOpflexOvsContractAg1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312583: fltTcaOpflexOvsContractAg1yearBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312584: fltTcaOpflexOvsContractAg5minBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312585: fltTcaOpflexOvsContractAg15minBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312586: fltTcaOpflexOvsContractAg1hBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312587: fltTcaOpflexOvsContractAg1dBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312588: fltTcaOpflexOvsContractAg1wBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312589: fltTcaOpflexOvsContractAg1moBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312590: fltTcaOpflexOvsContractAg1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312591: fltTcaOpflexOvsContractAg1yearBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3126: fltCompInstRemoteOperIssues

Severity: major

Explanation: This fault is raised when ACI controller fails to deploy vm in vcenter.

Recommended Action: If you see this fault, take the following actions:

1. Check in VCenter if dataStore selected is appropriate for the configured resource pool

2. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F312616: fltTcaOpflexOvsContractAg5minBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312617: fltTcaOpflexOvsContractAg15minBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312618: fltTcaOpflexOvsContractAg1hBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312619: fltTcaOpflexOvsContractAg1dBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312620: fltTcaOpflexOvsContractAg1wBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312621: fltTcaOpflexOvsContractAg1moBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312622: fltTcaOpflexOvsContractAg1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312623: fltTcaOpflexOvsContractAg1yearBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312624: fltTcaOpflexOvsContractAg5minBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312625: fltTcaOpflexOvsContractAg15minBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312626: fltTcaOpflexOvsContractAg1hBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312627: fltTcaOpflexOvsContractAg1dBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312628: fltTcaOpflexOvsContractAg1wBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312629: fltTcaOpflexOvsContractAg1moBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312630: fltTcaOpflexOvsContractAg1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312631: fltTcaOpflexOvsContractAg1yearBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312680: fltTcaOpflexOvsContract5minPktsLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312681: fltTcaOpflexOvsContract15minPktsLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312682: fltTcaOpflexOvsContract1hPktsLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312683: fltTcaOpflexOvsContract1dPktsLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312684: fltTcaOpflexOvsContract1wPktsLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312685: fltTcaOpflexOvsContract1moPktsLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312686: fltTcaOpflexOvsContract1qtrPktsLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312687: fltTcaOpflexOvsContract1yearPktsLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312696: fltTcaOpflexOvsContract5minPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312697: fltTcaOpflexOvsContract15minPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312698: fltTcaOpflexOvsContract1hPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312699: fltTcaOpflexOvsContract1dPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3127: fltCompDataStoreRemoteOperIssues

Severity: major

Explanation: This fault is raised when ACI controller fails to update the datastore information.

Recommended Action: If you see this fault, take the following actions:

1. Check in VCenter whether there is any faults raised for the data store in question and resolve the faults via VCenter

2. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F312700: fltTcaOpflexOvsContract1wPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312701: fltTcaOpflexOvsContract1moPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312702: fltTcaOpflexOvsContract1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312703: fltTcaOpflexOvsContract1yearPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312704: fltTcaOpflexOvsContract5minPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312705: fltTcaOpflexOvsContract15minPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312706: fltTcaOpflexOvsContract1hPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312707: fltTcaOpflexOvsContract1dPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312708: fltTcaOpflexOvsContract1wPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312709: fltTcaOpflexOvsContract1moPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312710: fltTcaOpflexOvsContract1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312711: fltTcaOpflexOvsContract1yearPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312712: fltTcaOpflexOvsContract5minPktsMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312713: fltTcaOpflexOvsContract15minPktsMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312714: fltTcaOpflexOvsContract1hPktsMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312715: fltTcaOpflexOvsContract1dPktsMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312716: fltTcaOpflexOvsContract1wPktsMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312717: fltTcaOpflexOvsContract1moPktsMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312718: fltTcaOpflexOvsContract1qtrPktsMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312719: fltTcaOpflexOvsContract1yearPktsMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312720: fltTcaOpflexOvsContract5minPktsMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312721: fltTcaOpflexOvsContract15minPktsMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312722: fltTcaOpflexOvsContract1hPktsMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312723: fltTcaOpflexOvsContract1dPktsMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312724: fltTcaOpflexOvsContract1wPktsMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312725: fltTcaOpflexOvsContract1moPktsMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312726: fltTcaOpflexOvsContract1qtrPktsMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312727: fltTcaOpflexOvsContract1yearPktsMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312728: fltTcaOpflexOvsContract5minPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312729: fltTcaOpflexOvsContract15minPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312730: fltTcaOpflexOvsContract1hPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312731: fltTcaOpflexOvsContract1dPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312732: fltTcaOpflexOvsContract1wPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312733: fltTcaOpflexOvsContract1moPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312734: fltTcaOpflexOvsContract1qtrPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312735: fltTcaOpflexOvsContract1yearPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312760: fltTcaOpflexOvsContract5minPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312761: fltTcaOpflexOvsContract15minPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312762: fltTcaOpflexOvsContract1hPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312763: fltTcaOpflexOvsContract1dPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312764: fltTcaOpflexOvsContract1wPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312765: fltTcaOpflexOvsContract1moPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312766: fltTcaOpflexOvsContract1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312767: fltTcaOpflexOvsContract1yearPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312768: fltTcaOpflexOvsContract5minPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312769: fltTcaOpflexOvsContract15minPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312770: fltTcaOpflexOvsContract1hPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312771: fltTcaOpflexOvsContract1dPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312772: fltTcaOpflexOvsContract1wPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312773: fltTcaOpflexOvsContract1moPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312774: fltTcaOpflexOvsContract1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312775: fltTcaOpflexOvsContract1yearPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3128: fltCompResourcePoolRemoteOperIssues

Severity: major

Explanation: This fault is raised when ACI controller fails to update the resource pool information.

Recommended Action: If you see this fault, take the following actions:

1. Check in VCenter whether there is any faults raised for the resource pool in question and resolve the faults via VCenter

2. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F312848: fltTcaOpflexOvsContractPart5minPktsLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312849: fltTcaOpflexOvsContractPart15minPktsLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312850: fltTcaOpflexOvsContractPart1hPktsLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312851: fltTcaOpflexOvsContractPart1dPktsLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312852: fltTcaOpflexOvsContractPart1wPktsLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312853: fltTcaOpflexOvsContractPart1moPktsLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312854: fltTcaOpflexOvsContractPart1qtrPktsLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312855: fltTcaOpflexOvsContractPart1yearPktsLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312864: fltTcaOpflexOvsContractPart5minPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312865: fltTcaOpflexOvsContractPart15minPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312866: fltTcaOpflexOvsContractPart1hPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312867: fltTcaOpflexOvsContractPart1dPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312868: fltTcaOpflexOvsContractPart1wPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312869: fltTcaOpflexOvsContractPart1moPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312870: fltTcaOpflexOvsContractPart1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312871: fltTcaOpflexOvsContractPart1yearPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312872: fltTcaOpflexOvsContractPart5minPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312873: fltTcaOpflexOvsContractPart15minPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312874: fltTcaOpflexOvsContractPart1hPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312875: fltTcaOpflexOvsContractPart1dPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312876: fltTcaOpflexOvsContractPart1wPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312877: fltTcaOpflexOvsContractPart1moPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312878: fltTcaOpflexOvsContractPart1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312879: fltTcaOpflexOvsContractPart1yearPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312880: fltTcaOpflexOvsContractPart5minPktsMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312881: fltTcaOpflexOvsContractPart15minPktsMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312882: fltTcaOpflexOvsContractPart1hPktsMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312883: fltTcaOpflexOvsContractPart1dPktsMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312884: fltTcaOpflexOvsContractPart1wPktsMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312885: fltTcaOpflexOvsContractPart1moPktsMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312886: fltTcaOpflexOvsContractPart1qtrPktsMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312887: fltTcaOpflexOvsContractPart1yearPktsMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312888: fltTcaOpflexOvsContractPart5minPktsMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312889: fltTcaOpflexOvsContractPart15minPktsMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312890: fltTcaOpflexOvsContractPart1hPktsMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312891: fltTcaOpflexOvsContractPart1dPktsMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312892: fltTcaOpflexOvsContractPart1wPktsMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312893: fltTcaOpflexOvsContractPart1moPktsMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312894: fltTcaOpflexOvsContractPart1qtrPktsMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312895: fltTcaOpflexOvsContractPart1yearPktsMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312896: fltTcaOpflexOvsContractPart5minPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312897: fltTcaOpflexOvsContractPart15minPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312898: fltTcaOpflexOvsContractPart1hPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312899: fltTcaOpflexOvsContractPart1dPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312900: fltTcaOpflexOvsContractPart1wPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312901: fltTcaOpflexOvsContractPart1moPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312902: fltTcaOpflexOvsContractPart1qtrPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312903: fltTcaOpflexOvsContractPart1yearPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312928: fltTcaOpflexOvsContractPart5minPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312929: fltTcaOpflexOvsContractPart15minPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312930: fltTcaOpflexOvsContractPart1hPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312931: fltTcaOpflexOvsContractPart1dPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312932: fltTcaOpflexOvsContractPart1wPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312933: fltTcaOpflexOvsContractPart1moPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312934: fltTcaOpflexOvsContractPart1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312935: fltTcaOpflexOvsContractPart1yearPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312936: fltTcaOpflexOvsContractPart5minPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312937: fltTcaOpflexOvsContractPart15minPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312938: fltTcaOpflexOvsContractPart1hPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312939: fltTcaOpflexOvsContractPart1dPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312940: fltTcaOpflexOvsContractPart1wPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312941: fltTcaOpflexOvsContractPart1moPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312942: fltTcaOpflexOvsContractPart1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F312943: fltTcaOpflexOvsContractPart1yearPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313016: fltTcaOpflexOvsContractAg5minPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313017: fltTcaOpflexOvsContractAg15minPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313018: fltTcaOpflexOvsContractAg1hPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313019: fltTcaOpflexOvsContractAg1dPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313020: fltTcaOpflexOvsContractAg1wPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313021: fltTcaOpflexOvsContractAg1moPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313022: fltTcaOpflexOvsContractAg1qtrPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313023: fltTcaOpflexOvsContractAg1yearPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313024: fltTcaOpflexOvsContractAg5minPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313025: fltTcaOpflexOvsContractAg15minPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313026: fltTcaOpflexOvsContractAg1hPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313027: fltTcaOpflexOvsContractAg1dPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313028: fltTcaOpflexOvsContractAg1wPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313029: fltTcaOpflexOvsContractAg1moPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313030: fltTcaOpflexOvsContractAg1qtrPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313031: fltTcaOpflexOvsContractAg1yearPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313056: fltTcaOpflexOvsContractAg5minPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313057: fltTcaOpflexOvsContractAg15minPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313058: fltTcaOpflexOvsContractAg1hPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313059: fltTcaOpflexOvsContractAg1dPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313060: fltTcaOpflexOvsContractAg1wPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313061: fltTcaOpflexOvsContractAg1moPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313062: fltTcaOpflexOvsContractAg1qtrPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313063: fltTcaOpflexOvsContractAg1yearPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313064: fltTcaOpflexOvsContractAg5minPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313065: fltTcaOpflexOvsContractAg15minPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313066: fltTcaOpflexOvsContractAg1hPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313067: fltTcaOpflexOvsContractAg1dPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313068: fltTcaOpflexOvsContractAg1wPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313069: fltTcaOpflexOvsContractAg1moPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313070: fltTcaOpflexOvsContractAg1qtrPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313071: fltTcaOpflexOvsContractAg1yearPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313120: fltTcaOpflexOvsContract5minRevBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313121: fltTcaOpflexOvsContract15minRevBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313122: fltTcaOpflexOvsContract1hRevBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313123: fltTcaOpflexOvsContract1dRevBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313124: fltTcaOpflexOvsContract1wRevBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313125: fltTcaOpflexOvsContract1moRevBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313126: fltTcaOpflexOvsContract1qtrRevBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313127: fltTcaOpflexOvsContract1yearRevBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313136: fltTcaOpflexOvsContract5minRevBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313137: fltTcaOpflexOvsContract15minRevBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313138: fltTcaOpflexOvsContract1hRevBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313139: fltTcaOpflexOvsContract1dRevBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313140: fltTcaOpflexOvsContract1wRevBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313141: fltTcaOpflexOvsContract1moRevBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313142: fltTcaOpflexOvsContract1qtrRevBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313143: fltTcaOpflexOvsContract1yearRevBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313144: fltTcaOpflexOvsContract5minRevBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313145: fltTcaOpflexOvsContract15minRevBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313146: fltTcaOpflexOvsContract1hRevBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313147: fltTcaOpflexOvsContract1dRevBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313148: fltTcaOpflexOvsContract1wRevBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313149: fltTcaOpflexOvsContract1moRevBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313150: fltTcaOpflexOvsContract1qtrRevBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313151: fltTcaOpflexOvsContract1yearRevBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313152: fltTcaOpflexOvsContract5minRevBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313153: fltTcaOpflexOvsContract15minRevBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313154: fltTcaOpflexOvsContract1hRevBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313155: fltTcaOpflexOvsContract1dRevBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313156: fltTcaOpflexOvsContract1wRevBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313157: fltTcaOpflexOvsContract1moRevBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313158: fltTcaOpflexOvsContract1qtrRevBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313159: fltTcaOpflexOvsContract1yearRevBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313160: fltTcaOpflexOvsContract5minRevBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313161: fltTcaOpflexOvsContract15minRevBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313162: fltTcaOpflexOvsContract1hRevBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313163: fltTcaOpflexOvsContract1dRevBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313164: fltTcaOpflexOvsContract1wRevBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313165: fltTcaOpflexOvsContract1moRevBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313166: fltTcaOpflexOvsContract1qtrRevBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313167: fltTcaOpflexOvsContract1yearRevBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313168: fltTcaOpflexOvsContract5minRevBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313169: fltTcaOpflexOvsContract15minRevBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313170: fltTcaOpflexOvsContract1hRevBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313171: fltTcaOpflexOvsContract1dRevBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313172: fltTcaOpflexOvsContract1wRevBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313173: fltTcaOpflexOvsContract1moRevBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313174: fltTcaOpflexOvsContract1qtrRevBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313175: fltTcaOpflexOvsContract1yearRevBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313200: fltTcaOpflexOvsContract5minRevBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313201: fltTcaOpflexOvsContract15minRevBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313202: fltTcaOpflexOvsContract1hRevBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313203: fltTcaOpflexOvsContract1dRevBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313204: fltTcaOpflexOvsContract1wRevBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313205: fltTcaOpflexOvsContract1moRevBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313206: fltTcaOpflexOvsContract1qtrRevBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313207: fltTcaOpflexOvsContract1yearRevBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313208: fltTcaOpflexOvsContract5minRevBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313209: fltTcaOpflexOvsContract15minRevBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313210: fltTcaOpflexOvsContract1hRevBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313211: fltTcaOpflexOvsContract1dRevBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313212: fltTcaOpflexOvsContract1wRevBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313213: fltTcaOpflexOvsContract1moRevBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313214: fltTcaOpflexOvsContract1qtrRevBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313215: fltTcaOpflexOvsContract1yearRevBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313288: fltTcaOpflexOvsContractPart5minRevBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313289: fltTcaOpflexOvsContractPart15minRevBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313290: fltTcaOpflexOvsContractPart1hRevBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313291: fltTcaOpflexOvsContractPart1dRevBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313292: fltTcaOpflexOvsContractPart1wRevBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313293: fltTcaOpflexOvsContractPart1moRevBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313294: fltTcaOpflexOvsContractPart1qtrRevBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313295: fltTcaOpflexOvsContractPart1yearRevBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313304: fltTcaOpflexOvsContractPart5minRevBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313305: fltTcaOpflexOvsContractPart15minRevBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313306: fltTcaOpflexOvsContractPart1hRevBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313307: fltTcaOpflexOvsContractPart1dRevBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313308: fltTcaOpflexOvsContractPart1wRevBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313309: fltTcaOpflexOvsContractPart1moRevBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313310: fltTcaOpflexOvsContractPart1qtrRevBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313311: fltTcaOpflexOvsContractPart1yearRevBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313312: fltTcaOpflexOvsContractPart5minRevBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313313: fltTcaOpflexOvsContractPart15minRevBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313314: fltTcaOpflexOvsContractPart1hRevBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313315: fltTcaOpflexOvsContractPart1dRevBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313316: fltTcaOpflexOvsContractPart1wRevBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313317: fltTcaOpflexOvsContractPart1moRevBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313318: fltTcaOpflexOvsContractPart1qtrRevBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313319: fltTcaOpflexOvsContractPart1yearRevBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313320: fltTcaOpflexOvsContractPart5minRevBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313321: fltTcaOpflexOvsContractPart15minRevBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313322: fltTcaOpflexOvsContractPart1hRevBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313323: fltTcaOpflexOvsContractPart1dRevBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313324: fltTcaOpflexOvsContractPart1wRevBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313325: fltTcaOpflexOvsContractPart1moRevBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313326: fltTcaOpflexOvsContractPart1qtrRevBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313327: fltTcaOpflexOvsContractPart1yearRevBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313328: fltTcaOpflexOvsContractPart5minRevBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313329: fltTcaOpflexOvsContractPart15minRevBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313330: fltTcaOpflexOvsContractPart1hRevBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313331: fltTcaOpflexOvsContractPart1dRevBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313332: fltTcaOpflexOvsContractPart1wRevBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313333: fltTcaOpflexOvsContractPart1moRevBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313334: fltTcaOpflexOvsContractPart1qtrRevBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313335: fltTcaOpflexOvsContractPart1yearRevBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313336: fltTcaOpflexOvsContractPart5minRevBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313337: fltTcaOpflexOvsContractPart15minRevBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313338: fltTcaOpflexOvsContractPart1hRevBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313339: fltTcaOpflexOvsContractPart1dRevBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313340: fltTcaOpflexOvsContractPart1wRevBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313341: fltTcaOpflexOvsContractPart1moRevBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313342: fltTcaOpflexOvsContractPart1qtrRevBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313343: fltTcaOpflexOvsContractPart1yearRevBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313368: fltTcaOpflexOvsContractPart5minRevBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313369: fltTcaOpflexOvsContractPart15minRevBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313370: fltTcaOpflexOvsContractPart1hRevBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313371: fltTcaOpflexOvsContractPart1dRevBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313372: fltTcaOpflexOvsContractPart1wRevBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313373: fltTcaOpflexOvsContractPart1moRevBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313374: fltTcaOpflexOvsContractPart1qtrRevBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313375: fltTcaOpflexOvsContractPart1yearRevBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313376: fltTcaOpflexOvsContractPart5minRevBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313377: fltTcaOpflexOvsContractPart15minRevBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313378: fltTcaOpflexOvsContractPart1hRevBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313379: fltTcaOpflexOvsContractPart1dRevBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313380: fltTcaOpflexOvsContractPart1wRevBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313381: fltTcaOpflexOvsContractPart1moRevBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313382: fltTcaOpflexOvsContractPart1qtrRevBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313383: fltTcaOpflexOvsContractPart1yearRevBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3134: fltVnsRsInstPolToVmmConfigFileResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F313456: fltTcaOpflexOvsContractAg5minRevBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313457: fltTcaOpflexOvsContractAg15minRevBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313458: fltTcaOpflexOvsContractAg1hRevBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313459: fltTcaOpflexOvsContractAg1dRevBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313460: fltTcaOpflexOvsContractAg1wRevBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313461: fltTcaOpflexOvsContractAg1moRevBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313462: fltTcaOpflexOvsContractAg1qtrRevBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313463: fltTcaOpflexOvsContractAg1yearRevBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313464: fltTcaOpflexOvsContractAg5minRevBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313465: fltTcaOpflexOvsContractAg15minRevBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313466: fltTcaOpflexOvsContractAg1hRevBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313467: fltTcaOpflexOvsContractAg1dRevBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313468: fltTcaOpflexOvsContractAg1wRevBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313469: fltTcaOpflexOvsContractAg1moRevBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313470: fltTcaOpflexOvsContractAg1qtrRevBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313471: fltTcaOpflexOvsContractAg1yearRevBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313496: fltTcaOpflexOvsContractAg5minRevBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313497: fltTcaOpflexOvsContractAg15minRevBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313498: fltTcaOpflexOvsContractAg1hRevBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313499: fltTcaOpflexOvsContractAg1dRevBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3135: fltVnsRsLDevVipToInstPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F313500: fltTcaOpflexOvsContractAg1wRevBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313501: fltTcaOpflexOvsContractAg1moRevBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313502: fltTcaOpflexOvsContractAg1qtrRevBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313503: fltTcaOpflexOvsContractAg1yearRevBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313504: fltTcaOpflexOvsContractAg5minRevBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313505: fltTcaOpflexOvsContractAg15minRevBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313506: fltTcaOpflexOvsContractAg1hRevBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313507: fltTcaOpflexOvsContractAg1dRevBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313508: fltTcaOpflexOvsContractAg1wRevBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313509: fltTcaOpflexOvsContractAg1moRevBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313510: fltTcaOpflexOvsContractAg1qtrRevBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313511: fltTcaOpflexOvsContractAg1yearRevBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313560: fltTcaOpflexOvsContract5minRevPktsLast

Severity: variable

Explanation: This fault is caused by "received packets (reverse) current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313561: fltTcaOpflexOvsContract15minRevPktsLast

Severity: variable

Explanation: This fault is caused by "received packets (reverse) current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313562: fltTcaOpflexOvsContract1hRevPktsLast

Severity: variable

Explanation: This fault is caused by "received packets (reverse) current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313563: fltTcaOpflexOvsContract1dRevPktsLast

Severity: variable

Explanation: This fault is caused by "received packets (reverse) current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313564: fltTcaOpflexOvsContract1wRevPktsLast

Severity: variable

Explanation: This fault is caused by "received packets (reverse) current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313565: fltTcaOpflexOvsContract1moRevPktsLast

Severity: variable

Explanation: This fault is caused by "received packets (reverse) current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313566: fltTcaOpflexOvsContract1qtrRevPktsLast

Severity: variable

Explanation: This fault is caused by "received packets (reverse) current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313567: fltTcaOpflexOvsContract1yearRevPktsLast

Severity: variable

Explanation: This fault is caused by "received packets (reverse) current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313576: fltTcaOpflexOvsContract5minRevPktsCum

Severity: variable

Explanation: This fault is caused by "received packets (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313577: fltTcaOpflexOvsContract15minRevPktsCum

Severity: variable

Explanation: This fault is caused by "received packets (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313578: fltTcaOpflexOvsContract1hRevPktsCum

Severity: variable

Explanation: This fault is caused by "received packets (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313579: fltTcaOpflexOvsContract1dRevPktsCum

Severity: variable

Explanation: This fault is caused by "received packets (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313580: fltTcaOpflexOvsContract1wRevPktsCum

Severity: variable

Explanation: This fault is caused by "received packets (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313581: fltTcaOpflexOvsContract1moRevPktsCum

Severity: variable

Explanation: This fault is caused by "received packets (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313582: fltTcaOpflexOvsContract1qtrRevPktsCum

Severity: variable

Explanation: This fault is caused by "received packets (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313583: fltTcaOpflexOvsContract1yearRevPktsCum

Severity: variable

Explanation: This fault is caused by "received packets (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313584: fltTcaOpflexOvsContract5minRevPktsPer

Severity: variable

Explanation: This fault is caused by "received packets (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313585: fltTcaOpflexOvsContract15minRevPktsPer

Severity: variable

Explanation: This fault is caused by "received packets (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313586: fltTcaOpflexOvsContract1hRevPktsPer

Severity: variable

Explanation: This fault is caused by "received packets (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313587: fltTcaOpflexOvsContract1dRevPktsPer

Severity: variable

Explanation: This fault is caused by "received packets (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313588: fltTcaOpflexOvsContract1wRevPktsPer

Severity: variable

Explanation: This fault is caused by "received packets (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313589: fltTcaOpflexOvsContract1moRevPktsPer

Severity: variable

Explanation: This fault is caused by "received packets (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313590: fltTcaOpflexOvsContract1qtrRevPktsPer

Severity: variable

Explanation: This fault is caused by "received packets (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313591: fltTcaOpflexOvsContract1yearRevPktsPer

Severity: variable

Explanation: This fault is caused by "received packets (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313592: fltTcaOpflexOvsContract5minRevPktsMin

Severity: variable

Explanation: This fault is caused by "received packets (reverse) minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313593: fltTcaOpflexOvsContract15minRevPktsMin

Severity: variable

Explanation: This fault is caused by "received packets (reverse) minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313594: fltTcaOpflexOvsContract1hRevPktsMin

Severity: variable

Explanation: This fault is caused by "received packets (reverse) minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313595: fltTcaOpflexOvsContract1dRevPktsMin

Severity: variable

Explanation: This fault is caused by "received packets (reverse) minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313596: fltTcaOpflexOvsContract1wRevPktsMin

Severity: variable

Explanation: This fault is caused by "received packets (reverse) minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313597: fltTcaOpflexOvsContract1moRevPktsMin

Severity: variable

Explanation: This fault is caused by "received packets (reverse) minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313598: fltTcaOpflexOvsContract1qtrRevPktsMin

Severity: variable

Explanation: This fault is caused by "received packets (reverse) minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313599: fltTcaOpflexOvsContract1yearRevPktsMin

Severity: variable

Explanation: This fault is caused by "received packets (reverse) minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313600: fltTcaOpflexOvsContract5minRevPktsMax

Severity: variable

Explanation: This fault is caused by "received packets (reverse) maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313601: fltTcaOpflexOvsContract15minRevPktsMax

Severity: variable

Explanation: This fault is caused by "received packets (reverse) maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313602: fltTcaOpflexOvsContract1hRevPktsMax

Severity: variable

Explanation: This fault is caused by "received packets (reverse) maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313603: fltTcaOpflexOvsContract1dRevPktsMax

Severity: variable

Explanation: This fault is caused by "received packets (reverse) maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313604: fltTcaOpflexOvsContract1wRevPktsMax

Severity: variable

Explanation: This fault is caused by "received packets (reverse) maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313605: fltTcaOpflexOvsContract1moRevPktsMax

Severity: variable

Explanation: This fault is caused by "received packets (reverse) maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313606: fltTcaOpflexOvsContract1qtrRevPktsMax

Severity: variable

Explanation: This fault is caused by "received packets (reverse) maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313607: fltTcaOpflexOvsContract1yearRevPktsMax

Severity: variable

Explanation: This fault is caused by "received packets (reverse) maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313608: fltTcaOpflexOvsContract5minRevPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets (reverse) average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313609: fltTcaOpflexOvsContract15minRevPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets (reverse) average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313610: fltTcaOpflexOvsContract1hRevPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets (reverse) average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313611: fltTcaOpflexOvsContract1dRevPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets (reverse) average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313612: fltTcaOpflexOvsContract1wRevPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets (reverse) average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313613: fltTcaOpflexOvsContract1moRevPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets (reverse) average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313614: fltTcaOpflexOvsContract1qtrRevPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets (reverse) average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313615: fltTcaOpflexOvsContract1yearRevPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets (reverse) average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313640: fltTcaOpflexOvsContract5minRevPktsTr

Severity: variable

Explanation: This fault is caused by "received packets (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313641: fltTcaOpflexOvsContract15minRevPktsTr

Severity: variable

Explanation: This fault is caused by "received packets (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313642: fltTcaOpflexOvsContract1hRevPktsTr

Severity: variable

Explanation: This fault is caused by "received packets (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313643: fltTcaOpflexOvsContract1dRevPktsTr

Severity: variable

Explanation: This fault is caused by "received packets (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313644: fltTcaOpflexOvsContract1wRevPktsTr

Severity: variable

Explanation: This fault is caused by "received packets (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313645: fltTcaOpflexOvsContract1moRevPktsTr

Severity: variable

Explanation: This fault is caused by "received packets (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313646: fltTcaOpflexOvsContract1qtrRevPktsTr

Severity: variable

Explanation: This fault is caused by "received packets (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313647: fltTcaOpflexOvsContract1yearRevPktsTr

Severity: variable

Explanation: This fault is caused by "received packets (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313648: fltTcaOpflexOvsContract5minRevPktsRate

Severity: variable

Explanation: This fault is caused by "received packets (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313649: fltTcaOpflexOvsContract15minRevPktsRate

Severity: variable

Explanation: This fault is caused by "received packets (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313650: fltTcaOpflexOvsContract1hRevPktsRate

Severity: variable

Explanation: This fault is caused by "received packets (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313651: fltTcaOpflexOvsContract1dRevPktsRate

Severity: variable

Explanation: This fault is caused by "received packets (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313652: fltTcaOpflexOvsContract1wRevPktsRate

Severity: variable

Explanation: This fault is caused by "received packets (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313653: fltTcaOpflexOvsContract1moRevPktsRate

Severity: variable

Explanation: This fault is caused by "received packets (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313654: fltTcaOpflexOvsContract1qtrRevPktsRate

Severity: variable

Explanation: This fault is caused by "received packets (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313655: fltTcaOpflexOvsContract1yearRevPktsRate

Severity: variable

Explanation: This fault is caused by "received packets (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313728: fltTcaOpflexOvsContractPart5minRevPktsLast

Severity: variable

Explanation: This fault is caused by "received packets (reverse) current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313729: fltTcaOpflexOvsContractPart15minRevPktsLast

Severity: variable

Explanation: This fault is caused by "received packets (reverse) current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313730: fltTcaOpflexOvsContractPart1hRevPktsLast

Severity: variable

Explanation: This fault is caused by "received packets (reverse) current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313731: fltTcaOpflexOvsContractPart1dRevPktsLast

Severity: variable

Explanation: This fault is caused by "received packets (reverse) current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313732: fltTcaOpflexOvsContractPart1wRevPktsLast

Severity: variable

Explanation: This fault is caused by "received packets (reverse) current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313733: fltTcaOpflexOvsContractPart1moRevPktsLast

Severity: variable

Explanation: This fault is caused by "received packets (reverse) current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313734: fltTcaOpflexOvsContractPart1qtrRevPktsLast

Severity: variable

Explanation: This fault is caused by "received packets (reverse) current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313735: fltTcaOpflexOvsContractPart1yearRevPktsLast

Severity: variable

Explanation: This fault is caused by "received packets (reverse) current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313744: fltTcaOpflexOvsContractPart5minRevPktsCum

Severity: variable

Explanation: This fault is caused by "received packets (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313745: fltTcaOpflexOvsContractPart15minRevPktsCum

Severity: variable

Explanation: This fault is caused by "received packets (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313746: fltTcaOpflexOvsContractPart1hRevPktsCum

Severity: variable

Explanation: This fault is caused by "received packets (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313747: fltTcaOpflexOvsContractPart1dRevPktsCum

Severity: variable

Explanation: This fault is caused by "received packets (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313748: fltTcaOpflexOvsContractPart1wRevPktsCum

Severity: variable

Explanation: This fault is caused by "received packets (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313749: fltTcaOpflexOvsContractPart1moRevPktsCum

Severity: variable

Explanation: This fault is caused by "received packets (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313750: fltTcaOpflexOvsContractPart1qtrRevPktsCum

Severity: variable

Explanation: This fault is caused by "received packets (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313751: fltTcaOpflexOvsContractPart1yearRevPktsCum

Severity: variable

Explanation: This fault is caused by "received packets (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313752: fltTcaOpflexOvsContractPart5minRevPktsPer

Severity: variable

Explanation: This fault is caused by "received packets (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313753: fltTcaOpflexOvsContractPart15minRevPktsPer

Severity: variable

Explanation: This fault is caused by "received packets (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313754: fltTcaOpflexOvsContractPart1hRevPktsPer

Severity: variable

Explanation: This fault is caused by "received packets (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313755: fltTcaOpflexOvsContractPart1dRevPktsPer

Severity: variable

Explanation: This fault is caused by "received packets (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313756: fltTcaOpflexOvsContractPart1wRevPktsPer

Severity: variable

Explanation: This fault is caused by "received packets (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313757: fltTcaOpflexOvsContractPart1moRevPktsPer

Severity: variable

Explanation: This fault is caused by "received packets (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313758: fltTcaOpflexOvsContractPart1qtrRevPktsPer

Severity: variable

Explanation: This fault is caused by "received packets (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313759: fltTcaOpflexOvsContractPart1yearRevPktsPer

Severity: variable

Explanation: This fault is caused by "received packets (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313760: fltTcaOpflexOvsContractPart5minRevPktsMin

Severity: variable

Explanation: This fault is caused by "received packets (reverse) minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313761: fltTcaOpflexOvsContractPart15minRevPktsMin

Severity: variable

Explanation: This fault is caused by "received packets (reverse) minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313762: fltTcaOpflexOvsContractPart1hRevPktsMin

Severity: variable

Explanation: This fault is caused by "received packets (reverse) minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313763: fltTcaOpflexOvsContractPart1dRevPktsMin

Severity: variable

Explanation: This fault is caused by "received packets (reverse) minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313764: fltTcaOpflexOvsContractPart1wRevPktsMin

Severity: variable

Explanation: This fault is caused by "received packets (reverse) minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313765: fltTcaOpflexOvsContractPart1moRevPktsMin

Severity: variable

Explanation: This fault is caused by "received packets (reverse) minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313766: fltTcaOpflexOvsContractPart1qtrRevPktsMin

Severity: variable

Explanation: This fault is caused by "received packets (reverse) minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313767: fltTcaOpflexOvsContractPart1yearRevPktsMin

Severity: variable

Explanation: This fault is caused by "received packets (reverse) minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313768: fltTcaOpflexOvsContractPart5minRevPktsMax

Severity: variable

Explanation: This fault is caused by "received packets (reverse) maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313769: fltTcaOpflexOvsContractPart15minRevPktsMax

Severity: variable

Explanation: This fault is caused by "received packets (reverse) maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313770: fltTcaOpflexOvsContractPart1hRevPktsMax

Severity: variable

Explanation: This fault is caused by "received packets (reverse) maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313771: fltTcaOpflexOvsContractPart1dRevPktsMax

Severity: variable

Explanation: This fault is caused by "received packets (reverse) maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313772: fltTcaOpflexOvsContractPart1wRevPktsMax

Severity: variable

Explanation: This fault is caused by "received packets (reverse) maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313773: fltTcaOpflexOvsContractPart1moRevPktsMax

Severity: variable

Explanation: This fault is caused by "received packets (reverse) maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313774: fltTcaOpflexOvsContractPart1qtrRevPktsMax

Severity: variable

Explanation: This fault is caused by "received packets (reverse) maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313775: fltTcaOpflexOvsContractPart1yearRevPktsMax

Severity: variable

Explanation: This fault is caused by "received packets (reverse) maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313776: fltTcaOpflexOvsContractPart5minRevPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets (reverse) average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313777: fltTcaOpflexOvsContractPart15minRevPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets (reverse) average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313778: fltTcaOpflexOvsContractPart1hRevPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets (reverse) average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313779: fltTcaOpflexOvsContractPart1dRevPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets (reverse) average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313780: fltTcaOpflexOvsContractPart1wRevPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets (reverse) average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313781: fltTcaOpflexOvsContractPart1moRevPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets (reverse) average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313782: fltTcaOpflexOvsContractPart1qtrRevPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets (reverse) average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313783: fltTcaOpflexOvsContractPart1yearRevPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets (reverse) average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3138: fltCommRsClientCertCAResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F313808: fltTcaOpflexOvsContractPart5minRevPktsTr

Severity: variable

Explanation: This fault is caused by "received packets (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313809: fltTcaOpflexOvsContractPart15minRevPktsTr

Severity: variable

Explanation: This fault is caused by "received packets (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313810: fltTcaOpflexOvsContractPart1hRevPktsTr

Severity: variable

Explanation: This fault is caused by "received packets (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313811: fltTcaOpflexOvsContractPart1dRevPktsTr

Severity: variable

Explanation: This fault is caused by "received packets (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313812: fltTcaOpflexOvsContractPart1wRevPktsTr

Severity: variable

Explanation: This fault is caused by "received packets (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313813: fltTcaOpflexOvsContractPart1moRevPktsTr

Severity: variable

Explanation: This fault is caused by "received packets (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313814: fltTcaOpflexOvsContractPart1qtrRevPktsTr

Severity: variable

Explanation: This fault is caused by "received packets (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313815: fltTcaOpflexOvsContractPart1yearRevPktsTr

Severity: variable

Explanation: This fault is caused by "received packets (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313816: fltTcaOpflexOvsContractPart5minRevPktsRate

Severity: variable

Explanation: This fault is caused by "received packets (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313817: fltTcaOpflexOvsContractPart15minRevPktsRate

Severity: variable

Explanation: This fault is caused by "received packets (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313818: fltTcaOpflexOvsContractPart1hRevPktsRate

Severity: variable

Explanation: This fault is caused by "received packets (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313819: fltTcaOpflexOvsContractPart1dRevPktsRate

Severity: variable

Explanation: This fault is caused by "received packets (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313820: fltTcaOpflexOvsContractPart1wRevPktsRate

Severity: variable

Explanation: This fault is caused by "received packets (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313821: fltTcaOpflexOvsContractPart1moRevPktsRate

Severity: variable

Explanation: This fault is caused by "received packets (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313822: fltTcaOpflexOvsContractPart1qtrRevPktsRate

Severity: variable

Explanation: This fault is caused by "received packets (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313823: fltTcaOpflexOvsContractPart1yearRevPktsRate

Severity: variable

Explanation: This fault is caused by "received packets (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313896: fltTcaOpflexOvsContractAg5minRevPktsCum

Severity: variable

Explanation: This fault is caused by "received packets (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313897: fltTcaOpflexOvsContractAg15minRevPktsCum

Severity: variable

Explanation: This fault is caused by "received packets (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313898: fltTcaOpflexOvsContractAg1hRevPktsCum

Severity: variable

Explanation: This fault is caused by "received packets (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313899: fltTcaOpflexOvsContractAg1dRevPktsCum

Severity: variable

Explanation: This fault is caused by "received packets (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313900: fltTcaOpflexOvsContractAg1wRevPktsCum

Severity: variable

Explanation: This fault is caused by "received packets (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313901: fltTcaOpflexOvsContractAg1moRevPktsCum

Severity: variable

Explanation: This fault is caused by "received packets (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313902: fltTcaOpflexOvsContractAg1qtrRevPktsCum

Severity: variable

Explanation: This fault is caused by "received packets (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313903: fltTcaOpflexOvsContractAg1yearRevPktsCum

Severity: variable

Explanation: This fault is caused by "received packets (reverse) cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313904: fltTcaOpflexOvsContractAg5minRevPktsPer

Severity: variable

Explanation: This fault is caused by "received packets (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313905: fltTcaOpflexOvsContractAg15minRevPktsPer

Severity: variable

Explanation: This fault is caused by "received packets (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313906: fltTcaOpflexOvsContractAg1hRevPktsPer

Severity: variable

Explanation: This fault is caused by "received packets (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313907: fltTcaOpflexOvsContractAg1dRevPktsPer

Severity: variable

Explanation: This fault is caused by "received packets (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313908: fltTcaOpflexOvsContractAg1wRevPktsPer

Severity: variable

Explanation: This fault is caused by "received packets (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313909: fltTcaOpflexOvsContractAg1moRevPktsPer

Severity: variable

Explanation: This fault is caused by "received packets (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313910: fltTcaOpflexOvsContractAg1qtrRevPktsPer

Severity: variable

Explanation: This fault is caused by "received packets (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313911: fltTcaOpflexOvsContractAg1yearRevPktsPer

Severity: variable

Explanation: This fault is caused by "received packets (reverse) periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313936: fltTcaOpflexOvsContractAg5minRevPktsTr

Severity: variable

Explanation: This fault is caused by "received packets (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313937: fltTcaOpflexOvsContractAg15minRevPktsTr

Severity: variable

Explanation: This fault is caused by "received packets (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313938: fltTcaOpflexOvsContractAg1hRevPktsTr

Severity: variable

Explanation: This fault is caused by "received packets (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313939: fltTcaOpflexOvsContractAg1dRevPktsTr

Severity: variable

Explanation: This fault is caused by "received packets (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313940: fltTcaOpflexOvsContractAg1wRevPktsTr

Severity: variable

Explanation: This fault is caused by "received packets (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313941: fltTcaOpflexOvsContractAg1moRevPktsTr

Severity: variable

Explanation: This fault is caused by "received packets (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313942: fltTcaOpflexOvsContractAg1qtrRevPktsTr

Severity: variable

Explanation: This fault is caused by "received packets (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313943: fltTcaOpflexOvsContractAg1yearRevPktsTr

Severity: variable

Explanation: This fault is caused by "received packets (reverse) trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313944: fltTcaOpflexOvsContractAg5minRevPktsRate

Severity: variable

Explanation: This fault is caused by "received packets (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313945: fltTcaOpflexOvsContractAg15minRevPktsRate

Severity: variable

Explanation: This fault is caused by "received packets (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313946: fltTcaOpflexOvsContractAg1hRevPktsRate

Severity: variable

Explanation: This fault is caused by "received packets (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313947: fltTcaOpflexOvsContractAg1dRevPktsRate

Severity: variable

Explanation: This fault is caused by "received packets (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313948: fltTcaOpflexOvsContractAg1wRevPktsRate

Severity: variable

Explanation: This fault is caused by "received packets (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313949: fltTcaOpflexOvsContractAg1moRevPktsRate

Severity: variable

Explanation: This fault is caused by "received packets (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313950: fltTcaOpflexOvsContractAg1qtrRevPktsRate

Severity: variable

Explanation: This fault is caused by "received packets (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F313951: fltTcaOpflexOvsContractAg1yearRevPktsRate

Severity: variable

Explanation: This fault is caused by "received packets (reverse) rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets (reverse)" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314000: fltTcaOpflexOvsHpp5minRxBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314001: fltTcaOpflexOvsHpp15minRxBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314002: fltTcaOpflexOvsHpp1hRxBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314003: fltTcaOpflexOvsHpp1dRxBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314004: fltTcaOpflexOvsHpp1wRxBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314005: fltTcaOpflexOvsHpp1moRxBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314006: fltTcaOpflexOvsHpp1qtrRxBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314007: fltTcaOpflexOvsHpp1yearRxBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314016: fltTcaOpflexOvsHpp5minRxBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314017: fltTcaOpflexOvsHpp15minRxBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314018: fltTcaOpflexOvsHpp1hRxBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314019: fltTcaOpflexOvsHpp1dRxBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314020: fltTcaOpflexOvsHpp1wRxBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314021: fltTcaOpflexOvsHpp1moRxBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314022: fltTcaOpflexOvsHpp1qtrRxBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314023: fltTcaOpflexOvsHpp1yearRxBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314024: fltTcaOpflexOvsHpp5minRxBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314025: fltTcaOpflexOvsHpp15minRxBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314026: fltTcaOpflexOvsHpp1hRxBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314027: fltTcaOpflexOvsHpp1dRxBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314028: fltTcaOpflexOvsHpp1wRxBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314029: fltTcaOpflexOvsHpp1moRxBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314030: fltTcaOpflexOvsHpp1qtrRxBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314031: fltTcaOpflexOvsHpp1yearRxBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314032: fltTcaOpflexOvsHpp5minRxBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314033: fltTcaOpflexOvsHpp15minRxBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314034: fltTcaOpflexOvsHpp1hRxBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314035: fltTcaOpflexOvsHpp1dRxBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314036: fltTcaOpflexOvsHpp1wRxBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314037: fltTcaOpflexOvsHpp1moRxBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314038: fltTcaOpflexOvsHpp1qtrRxBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314039: fltTcaOpflexOvsHpp1yearRxBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314040: fltTcaOpflexOvsHpp5minRxBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314041: fltTcaOpflexOvsHpp15minRxBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314042: fltTcaOpflexOvsHpp1hRxBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314043: fltTcaOpflexOvsHpp1dRxBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314044: fltTcaOpflexOvsHpp1wRxBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314045: fltTcaOpflexOvsHpp1moRxBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314046: fltTcaOpflexOvsHpp1qtrRxBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314047: fltTcaOpflexOvsHpp1yearRxBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314048: fltTcaOpflexOvsHpp5minRxBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314049: fltTcaOpflexOvsHpp15minRxBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314050: fltTcaOpflexOvsHpp1hRxBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314051: fltTcaOpflexOvsHpp1dRxBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314052: fltTcaOpflexOvsHpp1wRxBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314053: fltTcaOpflexOvsHpp1moRxBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314054: fltTcaOpflexOvsHpp1qtrRxBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314055: fltTcaOpflexOvsHpp1yearRxBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314080: fltTcaOpflexOvsHpp5minRxBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314081: fltTcaOpflexOvsHpp15minRxBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314082: fltTcaOpflexOvsHpp1hRxBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314083: fltTcaOpflexOvsHpp1dRxBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314084: fltTcaOpflexOvsHpp1wRxBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314085: fltTcaOpflexOvsHpp1moRxBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314086: fltTcaOpflexOvsHpp1qtrRxBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314087: fltTcaOpflexOvsHpp1yearRxBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314088: fltTcaOpflexOvsHpp5minRxBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314089: fltTcaOpflexOvsHpp15minRxBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314090: fltTcaOpflexOvsHpp1hRxBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314091: fltTcaOpflexOvsHpp1dRxBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314092: fltTcaOpflexOvsHpp1wRxBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314093: fltTcaOpflexOvsHpp1moRxBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314094: fltTcaOpflexOvsHpp1qtrRxBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314095: fltTcaOpflexOvsHpp1yearRxBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3141: fltL2VfcIfVfcCfgStFailure

Severity: warning

Explanation: This fault occurs when VFC interface is created with per-port vlan config

Recommended Action: If you see this fault, take the following actions

1. Delete the VFC interface with per-port vlan configuration

F314168: fltTcaOpflexOvsHppPart5minRxBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314169: fltTcaOpflexOvsHppPart15minRxBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314170: fltTcaOpflexOvsHppPart1hRxBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314171: fltTcaOpflexOvsHppPart1dRxBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314172: fltTcaOpflexOvsHppPart1wRxBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314173: fltTcaOpflexOvsHppPart1moRxBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314174: fltTcaOpflexOvsHppPart1qtrRxBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314175: fltTcaOpflexOvsHppPart1yearRxBytesLast

Severity: variable

Explanation: This fault is caused by "received bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314184: fltTcaOpflexOvsHppPart5minRxBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314185: fltTcaOpflexOvsHppPart15minRxBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314186: fltTcaOpflexOvsHppPart1hRxBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314187: fltTcaOpflexOvsHppPart1dRxBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314188: fltTcaOpflexOvsHppPart1wRxBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314189: fltTcaOpflexOvsHppPart1moRxBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314190: fltTcaOpflexOvsHppPart1qtrRxBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314191: fltTcaOpflexOvsHppPart1yearRxBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314192: fltTcaOpflexOvsHppPart5minRxBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314193: fltTcaOpflexOvsHppPart15minRxBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314194: fltTcaOpflexOvsHppPart1hRxBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314195: fltTcaOpflexOvsHppPart1dRxBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314196: fltTcaOpflexOvsHppPart1wRxBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314197: fltTcaOpflexOvsHppPart1moRxBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314198: fltTcaOpflexOvsHppPart1qtrRxBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314199: fltTcaOpflexOvsHppPart1yearRxBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314200: fltTcaOpflexOvsHppPart5minRxBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314201: fltTcaOpflexOvsHppPart15minRxBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314202: fltTcaOpflexOvsHppPart1hRxBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314203: fltTcaOpflexOvsHppPart1dRxBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314204: fltTcaOpflexOvsHppPart1wRxBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314205: fltTcaOpflexOvsHppPart1moRxBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314206: fltTcaOpflexOvsHppPart1qtrRxBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314207: fltTcaOpflexOvsHppPart1yearRxBytesMin

Severity: variable

Explanation: This fault is caused by "received bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314208: fltTcaOpflexOvsHppPart5minRxBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314209: fltTcaOpflexOvsHppPart15minRxBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314210: fltTcaOpflexOvsHppPart1hRxBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314211: fltTcaOpflexOvsHppPart1dRxBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314212: fltTcaOpflexOvsHppPart1wRxBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314213: fltTcaOpflexOvsHppPart1moRxBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314214: fltTcaOpflexOvsHppPart1qtrRxBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314215: fltTcaOpflexOvsHppPart1yearRxBytesMax

Severity: variable

Explanation: This fault is caused by "received bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314216: fltTcaOpflexOvsHppPart5minRxBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314217: fltTcaOpflexOvsHppPart15minRxBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314218: fltTcaOpflexOvsHppPart1hRxBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314219: fltTcaOpflexOvsHppPart1dRxBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314220: fltTcaOpflexOvsHppPart1wRxBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314221: fltTcaOpflexOvsHppPart1moRxBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314222: fltTcaOpflexOvsHppPart1qtrRxBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314223: fltTcaOpflexOvsHppPart1yearRxBytesAvg

Severity: variable

Explanation: This fault is caused by "received bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314248: fltTcaOpflexOvsHppPart5minRxBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314249: fltTcaOpflexOvsHppPart15minRxBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314250: fltTcaOpflexOvsHppPart1hRxBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314251: fltTcaOpflexOvsHppPart1dRxBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314252: fltTcaOpflexOvsHppPart1wRxBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314253: fltTcaOpflexOvsHppPart1moRxBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314254: fltTcaOpflexOvsHppPart1qtrRxBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314255: fltTcaOpflexOvsHppPart1yearRxBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314256: fltTcaOpflexOvsHppPart5minRxBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314257: fltTcaOpflexOvsHppPart15minRxBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314258: fltTcaOpflexOvsHppPart1hRxBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314259: fltTcaOpflexOvsHppPart1dRxBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314260: fltTcaOpflexOvsHppPart1wRxBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314261: fltTcaOpflexOvsHppPart1moRxBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314262: fltTcaOpflexOvsHppPart1qtrRxBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314263: fltTcaOpflexOvsHppPart1yearRxBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314336: fltTcaOpflexOvsHppAg5minRxBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314337: fltTcaOpflexOvsHppAg15minRxBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314338: fltTcaOpflexOvsHppAg1hRxBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314339: fltTcaOpflexOvsHppAg1dRxBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314340: fltTcaOpflexOvsHppAg1wRxBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314341: fltTcaOpflexOvsHppAg1moRxBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314342: fltTcaOpflexOvsHppAg1qtrRxBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314343: fltTcaOpflexOvsHppAg1yearRxBytesCum

Severity: variable

Explanation: This fault is caused by "received bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314344: fltTcaOpflexOvsHppAg5minRxBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314345: fltTcaOpflexOvsHppAg15minRxBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314346: fltTcaOpflexOvsHppAg1hRxBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314347: fltTcaOpflexOvsHppAg1dRxBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314348: fltTcaOpflexOvsHppAg1wRxBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314349: fltTcaOpflexOvsHppAg1moRxBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314350: fltTcaOpflexOvsHppAg1qtrRxBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314351: fltTcaOpflexOvsHppAg1yearRxBytesPer

Severity: variable

Explanation: This fault is caused by "received bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314376: fltTcaOpflexOvsHppAg5minRxBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314377: fltTcaOpflexOvsHppAg15minRxBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314378: fltTcaOpflexOvsHppAg1hRxBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314379: fltTcaOpflexOvsHppAg1dRxBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314380: fltTcaOpflexOvsHppAg1wRxBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314381: fltTcaOpflexOvsHppAg1moRxBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314382: fltTcaOpflexOvsHppAg1qtrRxBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314383: fltTcaOpflexOvsHppAg1yearRxBytesTr

Severity: variable

Explanation: This fault is caused by "received bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314384: fltTcaOpflexOvsHppAg5minRxBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314385: fltTcaOpflexOvsHppAg15minRxBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314386: fltTcaOpflexOvsHppAg1hRxBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314387: fltTcaOpflexOvsHppAg1dRxBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314388: fltTcaOpflexOvsHppAg1wRxBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314389: fltTcaOpflexOvsHppAg1moRxBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314390: fltTcaOpflexOvsHppAg1qtrRxBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314391: fltTcaOpflexOvsHppAg1yearRxBytesRate

Severity: variable

Explanation: This fault is caused by "received bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314440: fltTcaOpflexOvsHpp5minRxPktsLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314441: fltTcaOpflexOvsHpp15minRxPktsLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314442: fltTcaOpflexOvsHpp1hRxPktsLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314443: fltTcaOpflexOvsHpp1dRxPktsLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314444: fltTcaOpflexOvsHpp1wRxPktsLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314445: fltTcaOpflexOvsHpp1moRxPktsLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314446: fltTcaOpflexOvsHpp1qtrRxPktsLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314447: fltTcaOpflexOvsHpp1yearRxPktsLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314456: fltTcaOpflexOvsHpp5minRxPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314457: fltTcaOpflexOvsHpp15minRxPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314458: fltTcaOpflexOvsHpp1hRxPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314459: fltTcaOpflexOvsHpp1dRxPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314460: fltTcaOpflexOvsHpp1wRxPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314461: fltTcaOpflexOvsHpp1moRxPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314462: fltTcaOpflexOvsHpp1qtrRxPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314463: fltTcaOpflexOvsHpp1yearRxPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314464: fltTcaOpflexOvsHpp5minRxPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314465: fltTcaOpflexOvsHpp15minRxPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314466: fltTcaOpflexOvsHpp1hRxPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314467: fltTcaOpflexOvsHpp1dRxPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314468: fltTcaOpflexOvsHpp1wRxPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314469: fltTcaOpflexOvsHpp1moRxPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314470: fltTcaOpflexOvsHpp1qtrRxPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314471: fltTcaOpflexOvsHpp1yearRxPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314472: fltTcaOpflexOvsHpp5minRxPktsMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314473: fltTcaOpflexOvsHpp15minRxPktsMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314474: fltTcaOpflexOvsHpp1hRxPktsMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314475: fltTcaOpflexOvsHpp1dRxPktsMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314476: fltTcaOpflexOvsHpp1wRxPktsMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314477: fltTcaOpflexOvsHpp1moRxPktsMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314478: fltTcaOpflexOvsHpp1qtrRxPktsMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314479: fltTcaOpflexOvsHpp1yearRxPktsMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314480: fltTcaOpflexOvsHpp5minRxPktsMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314481: fltTcaOpflexOvsHpp15minRxPktsMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314482: fltTcaOpflexOvsHpp1hRxPktsMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314483: fltTcaOpflexOvsHpp1dRxPktsMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314484: fltTcaOpflexOvsHpp1wRxPktsMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314485: fltTcaOpflexOvsHpp1moRxPktsMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314486: fltTcaOpflexOvsHpp1qtrRxPktsMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314487: fltTcaOpflexOvsHpp1yearRxPktsMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314488: fltTcaOpflexOvsHpp5minRxPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314489: fltTcaOpflexOvsHpp15minRxPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314490: fltTcaOpflexOvsHpp1hRxPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314491: fltTcaOpflexOvsHpp1dRxPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314492: fltTcaOpflexOvsHpp1wRxPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314493: fltTcaOpflexOvsHpp1moRxPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314494: fltTcaOpflexOvsHpp1qtrRxPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314495: fltTcaOpflexOvsHpp1yearRxPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3145: fltTopoctrlEndpointControlPEPControlPolicyHoldIntervalConfigFailed

Severity: minor

Explanation: This fault occurs when there is a mismatch between user config and EPM config Defaulting rogue EP hold interval to 1800 seconds

Recommended Action: Rogue EP hold interval has to be more than 1800 seconds

F314520: fltTcaOpflexOvsHpp5minRxPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314521: fltTcaOpflexOvsHpp15minRxPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314522: fltTcaOpflexOvsHpp1hRxPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314523: fltTcaOpflexOvsHpp1dRxPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314524: fltTcaOpflexOvsHpp1wRxPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314525: fltTcaOpflexOvsHpp1moRxPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314526: fltTcaOpflexOvsHpp1qtrRxPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314527: fltTcaOpflexOvsHpp1yearRxPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314528: fltTcaOpflexOvsHpp5minRxPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314529: fltTcaOpflexOvsHpp15minRxPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314530: fltTcaOpflexOvsHpp1hRxPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314531: fltTcaOpflexOvsHpp1dRxPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314532: fltTcaOpflexOvsHpp1wRxPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314533: fltTcaOpflexOvsHpp1moRxPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314534: fltTcaOpflexOvsHpp1qtrRxPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314535: fltTcaOpflexOvsHpp1yearRxPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3146: fltTopoctrlEndpointControlPEPControlPolicyDetectMultipleConfigFailed

Severity: minor

Explanation: This fault occurs when there is a mismatch between user config and EPM config Defaulting rogue EP detect multiple to 10

Recommended Action: Rogue EP detect multiple has to be less than 10

F314608: fltTcaOpflexOvsHppPart5minRxPktsLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314609: fltTcaOpflexOvsHppPart15minRxPktsLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314610: fltTcaOpflexOvsHppPart1hRxPktsLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314611: fltTcaOpflexOvsHppPart1dRxPktsLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314612: fltTcaOpflexOvsHppPart1wRxPktsLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314613: fltTcaOpflexOvsHppPart1moRxPktsLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314614: fltTcaOpflexOvsHppPart1qtrRxPktsLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314615: fltTcaOpflexOvsHppPart1yearRxPktsLast

Severity: variable

Explanation: This fault is caused by "received packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314624: fltTcaOpflexOvsHppPart5minRxPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314625: fltTcaOpflexOvsHppPart15minRxPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314626: fltTcaOpflexOvsHppPart1hRxPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314627: fltTcaOpflexOvsHppPart1dRxPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314628: fltTcaOpflexOvsHppPart1wRxPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314629: fltTcaOpflexOvsHppPart1moRxPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314630: fltTcaOpflexOvsHppPart1qtrRxPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314631: fltTcaOpflexOvsHppPart1yearRxPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314632: fltTcaOpflexOvsHppPart5minRxPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314633: fltTcaOpflexOvsHppPart15minRxPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314634: fltTcaOpflexOvsHppPart1hRxPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314635: fltTcaOpflexOvsHppPart1dRxPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314636: fltTcaOpflexOvsHppPart1wRxPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314637: fltTcaOpflexOvsHppPart1moRxPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314638: fltTcaOpflexOvsHppPart1qtrRxPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314639: fltTcaOpflexOvsHppPart1yearRxPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314640: fltTcaOpflexOvsHppPart5minRxPktsMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314641: fltTcaOpflexOvsHppPart15minRxPktsMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314642: fltTcaOpflexOvsHppPart1hRxPktsMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314643: fltTcaOpflexOvsHppPart1dRxPktsMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314644: fltTcaOpflexOvsHppPart1wRxPktsMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314645: fltTcaOpflexOvsHppPart1moRxPktsMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314646: fltTcaOpflexOvsHppPart1qtrRxPktsMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314647: fltTcaOpflexOvsHppPart1yearRxPktsMin

Severity: variable

Explanation: This fault is caused by "received packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314648: fltTcaOpflexOvsHppPart5minRxPktsMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314649: fltTcaOpflexOvsHppPart15minRxPktsMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314650: fltTcaOpflexOvsHppPart1hRxPktsMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314651: fltTcaOpflexOvsHppPart1dRxPktsMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314652: fltTcaOpflexOvsHppPart1wRxPktsMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314653: fltTcaOpflexOvsHppPart1moRxPktsMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314654: fltTcaOpflexOvsHppPart1qtrRxPktsMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314655: fltTcaOpflexOvsHppPart1yearRxPktsMax

Severity: variable

Explanation: This fault is caused by "received packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314656: fltTcaOpflexOvsHppPart5minRxPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314657: fltTcaOpflexOvsHppPart15minRxPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314658: fltTcaOpflexOvsHppPart1hRxPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314659: fltTcaOpflexOvsHppPart1dRxPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314660: fltTcaOpflexOvsHppPart1wRxPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314661: fltTcaOpflexOvsHppPart1moRxPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314662: fltTcaOpflexOvsHppPart1qtrRxPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314663: fltTcaOpflexOvsHppPart1yearRxPktsAvg

Severity: variable

Explanation: This fault is caused by "received packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314688: fltTcaOpflexOvsHppPart5minRxPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314689: fltTcaOpflexOvsHppPart15minRxPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314690: fltTcaOpflexOvsHppPart1hRxPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314691: fltTcaOpflexOvsHppPart1dRxPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314692: fltTcaOpflexOvsHppPart1wRxPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314693: fltTcaOpflexOvsHppPart1moRxPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314694: fltTcaOpflexOvsHppPart1qtrRxPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314695: fltTcaOpflexOvsHppPart1yearRxPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314696: fltTcaOpflexOvsHppPart5minRxPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314697: fltTcaOpflexOvsHppPart15minRxPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314698: fltTcaOpflexOvsHppPart1hRxPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314699: fltTcaOpflexOvsHppPart1dRxPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3147: fltDot1xIfHardwareNotSupported

Severity: minor

Explanation: This fault occurs when Dot1x was deployed on an unsupported hardware platform

Recommended Action: If you see this fault, take the following actions

1. Dot1x is not supported on this hardware

F314700: fltTcaOpflexOvsHppPart1wRxPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314701: fltTcaOpflexOvsHppPart1moRxPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314702: fltTcaOpflexOvsHppPart1qtrRxPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314703: fltTcaOpflexOvsHppPart1yearRxPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314776: fltTcaOpflexOvsHppAg5minRxPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314777: fltTcaOpflexOvsHppAg15minRxPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314778: fltTcaOpflexOvsHppAg1hRxPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314779: fltTcaOpflexOvsHppAg1dRxPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314780: fltTcaOpflexOvsHppAg1wRxPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314781: fltTcaOpflexOvsHppAg1moRxPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314782: fltTcaOpflexOvsHppAg1qtrRxPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314783: fltTcaOpflexOvsHppAg1yearRxPktsCum

Severity: variable

Explanation: This fault is caused by "received packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314784: fltTcaOpflexOvsHppAg5minRxPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314785: fltTcaOpflexOvsHppAg15minRxPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314786: fltTcaOpflexOvsHppAg1hRxPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314787: fltTcaOpflexOvsHppAg1dRxPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314788: fltTcaOpflexOvsHppAg1wRxPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314789: fltTcaOpflexOvsHppAg1moRxPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314790: fltTcaOpflexOvsHppAg1qtrRxPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314791: fltTcaOpflexOvsHppAg1yearRxPktsPer

Severity: variable

Explanation: This fault is caused by "received packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3148: fltTelemetryRequirementInbandEPgNotConfigured

Severity: major

Explanation: This fault occurs when inband ips are not confiured on apic nodes.

Recommended Action: Configure inband Ips on apic nodes

F314816: fltTcaOpflexOvsHppAg5minRxPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314817: fltTcaOpflexOvsHppAg15minRxPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314818: fltTcaOpflexOvsHppAg1hRxPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314819: fltTcaOpflexOvsHppAg1dRxPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314820: fltTcaOpflexOvsHppAg1wRxPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314821: fltTcaOpflexOvsHppAg1moRxPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314822: fltTcaOpflexOvsHppAg1qtrRxPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314823: fltTcaOpflexOvsHppAg1yearRxPktsTr

Severity: variable

Explanation: This fault is caused by "received packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314824: fltTcaOpflexOvsHppAg5minRxPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314825: fltTcaOpflexOvsHppAg15minRxPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314826: fltTcaOpflexOvsHppAg1hRxPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314827: fltTcaOpflexOvsHppAg1dRxPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314828: fltTcaOpflexOvsHppAg1wRxPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314829: fltTcaOpflexOvsHppAg1moRxPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314830: fltTcaOpflexOvsHppAg1qtrRxPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314831: fltTcaOpflexOvsHppAg1yearRxPktsRate

Severity: variable

Explanation: This fault is caused by "received packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "received packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314880: fltTcaOpflexOvsHpp5minTxBytesLast

Severity: variable

Explanation: This fault is caused by "transmitted bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314881: fltTcaOpflexOvsHpp15minTxBytesLast

Severity: variable

Explanation: This fault is caused by "transmitted bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314882: fltTcaOpflexOvsHpp1hTxBytesLast

Severity: variable

Explanation: This fault is caused by "transmitted bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314883: fltTcaOpflexOvsHpp1dTxBytesLast

Severity: variable

Explanation: This fault is caused by "transmitted bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314884: fltTcaOpflexOvsHpp1wTxBytesLast

Severity: variable

Explanation: This fault is caused by "transmitted bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314885: fltTcaOpflexOvsHpp1moTxBytesLast

Severity: variable

Explanation: This fault is caused by "transmitted bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314886: fltTcaOpflexOvsHpp1qtrTxBytesLast

Severity: variable

Explanation: This fault is caused by "transmitted bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314887: fltTcaOpflexOvsHpp1yearTxBytesLast

Severity: variable

Explanation: This fault is caused by "transmitted bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314896: fltTcaOpflexOvsHpp5minTxBytesCum

Severity: variable

Explanation: This fault is caused by "transmitted bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314897: fltTcaOpflexOvsHpp15minTxBytesCum

Severity: variable

Explanation: This fault is caused by "transmitted bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314898: fltTcaOpflexOvsHpp1hTxBytesCum

Severity: variable

Explanation: This fault is caused by "transmitted bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314899: fltTcaOpflexOvsHpp1dTxBytesCum

Severity: variable

Explanation: This fault is caused by "transmitted bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3149: fltTelemetryRequirementInbandNotConfigured

Severity: major

Explanation: This fault occurs when inband ips are not confiured on apic nodes.

Recommended Action: Configure inband Ips on apic nodes

F314900: fltTcaOpflexOvsHpp1wTxBytesCum

Severity: variable

Explanation: This fault is caused by "transmitted bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314901: fltTcaOpflexOvsHpp1moTxBytesCum

Severity: variable

Explanation: This fault is caused by "transmitted bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314902: fltTcaOpflexOvsHpp1qtrTxBytesCum

Severity: variable

Explanation: This fault is caused by "transmitted bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314903: fltTcaOpflexOvsHpp1yearTxBytesCum

Severity: variable

Explanation: This fault is caused by "transmitted bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314904: fltTcaOpflexOvsHpp5minTxBytesPer

Severity: variable

Explanation: This fault is caused by "transmitted bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314905: fltTcaOpflexOvsHpp15minTxBytesPer

Severity: variable

Explanation: This fault is caused by "transmitted bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314906: fltTcaOpflexOvsHpp1hTxBytesPer

Severity: variable

Explanation: This fault is caused by "transmitted bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314907: fltTcaOpflexOvsHpp1dTxBytesPer

Severity: variable

Explanation: This fault is caused by "transmitted bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314908: fltTcaOpflexOvsHpp1wTxBytesPer

Severity: variable

Explanation: This fault is caused by "transmitted bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314909: fltTcaOpflexOvsHpp1moTxBytesPer

Severity: variable

Explanation: This fault is caused by "transmitted bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314910: fltTcaOpflexOvsHpp1qtrTxBytesPer

Severity: variable

Explanation: This fault is caused by "transmitted bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314911: fltTcaOpflexOvsHpp1yearTxBytesPer

Severity: variable

Explanation: This fault is caused by "transmitted bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314912: fltTcaOpflexOvsHpp5minTxBytesMin

Severity: variable

Explanation: This fault is caused by "transmitted bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314913: fltTcaOpflexOvsHpp15minTxBytesMin

Severity: variable

Explanation: This fault is caused by "transmitted bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314914: fltTcaOpflexOvsHpp1hTxBytesMin

Severity: variable

Explanation: This fault is caused by "transmitted bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314915: fltTcaOpflexOvsHpp1dTxBytesMin

Severity: variable

Explanation: This fault is caused by "transmitted bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314916: fltTcaOpflexOvsHpp1wTxBytesMin

Severity: variable

Explanation: This fault is caused by "transmitted bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314917: fltTcaOpflexOvsHpp1moTxBytesMin

Severity: variable

Explanation: This fault is caused by "transmitted bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314918: fltTcaOpflexOvsHpp1qtrTxBytesMin

Severity: variable

Explanation: This fault is caused by "transmitted bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314919: fltTcaOpflexOvsHpp1yearTxBytesMin

Severity: variable

Explanation: This fault is caused by "transmitted bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314920: fltTcaOpflexOvsHpp5minTxBytesMax

Severity: variable

Explanation: This fault is caused by "transmitted bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314921: fltTcaOpflexOvsHpp15minTxBytesMax

Severity: variable

Explanation: This fault is caused by "transmitted bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314922: fltTcaOpflexOvsHpp1hTxBytesMax

Severity: variable

Explanation: This fault is caused by "transmitted bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314923: fltTcaOpflexOvsHpp1dTxBytesMax

Severity: variable

Explanation: This fault is caused by "transmitted bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314924: fltTcaOpflexOvsHpp1wTxBytesMax

Severity: variable

Explanation: This fault is caused by "transmitted bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314925: fltTcaOpflexOvsHpp1moTxBytesMax

Severity: variable

Explanation: This fault is caused by "transmitted bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314926: fltTcaOpflexOvsHpp1qtrTxBytesMax

Severity: variable

Explanation: This fault is caused by "transmitted bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314927: fltTcaOpflexOvsHpp1yearTxBytesMax

Severity: variable

Explanation: This fault is caused by "transmitted bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314928: fltTcaOpflexOvsHpp5minTxBytesAvg

Severity: variable

Explanation: This fault is caused by "transmitted bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314929: fltTcaOpflexOvsHpp15minTxBytesAvg

Severity: variable

Explanation: This fault is caused by "transmitted bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314930: fltTcaOpflexOvsHpp1hTxBytesAvg

Severity: variable

Explanation: This fault is caused by "transmitted bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314931: fltTcaOpflexOvsHpp1dTxBytesAvg

Severity: variable

Explanation: This fault is caused by "transmitted bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314932: fltTcaOpflexOvsHpp1wTxBytesAvg

Severity: variable

Explanation: This fault is caused by "transmitted bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314933: fltTcaOpflexOvsHpp1moTxBytesAvg

Severity: variable

Explanation: This fault is caused by "transmitted bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314934: fltTcaOpflexOvsHpp1qtrTxBytesAvg

Severity: variable

Explanation: This fault is caused by "transmitted bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314935: fltTcaOpflexOvsHpp1yearTxBytesAvg

Severity: variable

Explanation: This fault is caused by "transmitted bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314960: fltTcaOpflexOvsHpp5minTxBytesTr

Severity: variable

Explanation: This fault is caused by "transmitted bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314961: fltTcaOpflexOvsHpp15minTxBytesTr

Severity: variable

Explanation: This fault is caused by "transmitted bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314962: fltTcaOpflexOvsHpp1hTxBytesTr

Severity: variable

Explanation: This fault is caused by "transmitted bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314963: fltTcaOpflexOvsHpp1dTxBytesTr

Severity: variable

Explanation: This fault is caused by "transmitted bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314964: fltTcaOpflexOvsHpp1wTxBytesTr

Severity: variable

Explanation: This fault is caused by "transmitted bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314965: fltTcaOpflexOvsHpp1moTxBytesTr

Severity: variable

Explanation: This fault is caused by "transmitted bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314966: fltTcaOpflexOvsHpp1qtrTxBytesTr

Severity: variable

Explanation: This fault is caused by "transmitted bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314967: fltTcaOpflexOvsHpp1yearTxBytesTr

Severity: variable

Explanation: This fault is caused by "transmitted bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314968: fltTcaOpflexOvsHpp5minTxBytesRate

Severity: variable

Explanation: This fault is caused by "transmitted bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314969: fltTcaOpflexOvsHpp15minTxBytesRate

Severity: variable

Explanation: This fault is caused by "transmitted bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314970: fltTcaOpflexOvsHpp1hTxBytesRate

Severity: variable

Explanation: This fault is caused by "transmitted bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314971: fltTcaOpflexOvsHpp1dTxBytesRate

Severity: variable

Explanation: This fault is caused by "transmitted bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314972: fltTcaOpflexOvsHpp1wTxBytesRate

Severity: variable

Explanation: This fault is caused by "transmitted bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314973: fltTcaOpflexOvsHpp1moTxBytesRate

Severity: variable

Explanation: This fault is caused by "transmitted bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314974: fltTcaOpflexOvsHpp1qtrTxBytesRate

Severity: variable

Explanation: This fault is caused by "transmitted bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F314975: fltTcaOpflexOvsHpp1yearTxBytesRate

Severity: variable

Explanation: This fault is caused by "transmitted bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3150: fltTelemetryRequirementPtpNotEnabled

Severity: major

Explanation: This fault occurs when PTP is not enabled in the fabric and FlowCollector policy is enabled

Recommended Action: Enable PTP

F315048: fltTcaOpflexOvsHppPart5minTxBytesLast

Severity: variable

Explanation: This fault is caused by "transmitted bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315049: fltTcaOpflexOvsHppPart15minTxBytesLast

Severity: variable

Explanation: This fault is caused by "transmitted bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315050: fltTcaOpflexOvsHppPart1hTxBytesLast

Severity: variable

Explanation: This fault is caused by "transmitted bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315051: fltTcaOpflexOvsHppPart1dTxBytesLast

Severity: variable

Explanation: This fault is caused by "transmitted bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315052: fltTcaOpflexOvsHppPart1wTxBytesLast

Severity: variable

Explanation: This fault is caused by "transmitted bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315053: fltTcaOpflexOvsHppPart1moTxBytesLast

Severity: variable

Explanation: This fault is caused by "transmitted bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315054: fltTcaOpflexOvsHppPart1qtrTxBytesLast

Severity: variable

Explanation: This fault is caused by "transmitted bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315055: fltTcaOpflexOvsHppPart1yearTxBytesLast

Severity: variable

Explanation: This fault is caused by "transmitted bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315064: fltTcaOpflexOvsHppPart5minTxBytesCum

Severity: variable

Explanation: This fault is caused by "transmitted bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315065: fltTcaOpflexOvsHppPart15minTxBytesCum

Severity: variable

Explanation: This fault is caused by "transmitted bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315066: fltTcaOpflexOvsHppPart1hTxBytesCum

Severity: variable

Explanation: This fault is caused by "transmitted bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315067: fltTcaOpflexOvsHppPart1dTxBytesCum

Severity: variable

Explanation: This fault is caused by "transmitted bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315068: fltTcaOpflexOvsHppPart1wTxBytesCum

Severity: variable

Explanation: This fault is caused by "transmitted bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315069: fltTcaOpflexOvsHppPart1moTxBytesCum

Severity: variable

Explanation: This fault is caused by "transmitted bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315070: fltTcaOpflexOvsHppPart1qtrTxBytesCum

Severity: variable

Explanation: This fault is caused by "transmitted bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315071: fltTcaOpflexOvsHppPart1yearTxBytesCum

Severity: variable

Explanation: This fault is caused by "transmitted bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315072: fltTcaOpflexOvsHppPart5minTxBytesPer

Severity: variable

Explanation: This fault is caused by "transmitted bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315073: fltTcaOpflexOvsHppPart15minTxBytesPer

Severity: variable

Explanation: This fault is caused by "transmitted bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315074: fltTcaOpflexOvsHppPart1hTxBytesPer

Severity: variable

Explanation: This fault is caused by "transmitted bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315075: fltTcaOpflexOvsHppPart1dTxBytesPer

Severity: variable

Explanation: This fault is caused by "transmitted bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315076: fltTcaOpflexOvsHppPart1wTxBytesPer

Severity: variable

Explanation: This fault is caused by "transmitted bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315077: fltTcaOpflexOvsHppPart1moTxBytesPer

Severity: variable

Explanation: This fault is caused by "transmitted bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315078: fltTcaOpflexOvsHppPart1qtrTxBytesPer

Severity: variable

Explanation: This fault is caused by "transmitted bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315079: fltTcaOpflexOvsHppPart1yearTxBytesPer

Severity: variable

Explanation: This fault is caused by "transmitted bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315080: fltTcaOpflexOvsHppPart5minTxBytesMin

Severity: variable

Explanation: This fault is caused by "transmitted bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315081: fltTcaOpflexOvsHppPart15minTxBytesMin

Severity: variable

Explanation: This fault is caused by "transmitted bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315082: fltTcaOpflexOvsHppPart1hTxBytesMin

Severity: variable

Explanation: This fault is caused by "transmitted bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315083: fltTcaOpflexOvsHppPart1dTxBytesMin

Severity: variable

Explanation: This fault is caused by "transmitted bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315084: fltTcaOpflexOvsHppPart1wTxBytesMin

Severity: variable

Explanation: This fault is caused by "transmitted bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315085: fltTcaOpflexOvsHppPart1moTxBytesMin

Severity: variable

Explanation: This fault is caused by "transmitted bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315086: fltTcaOpflexOvsHppPart1qtrTxBytesMin

Severity: variable

Explanation: This fault is caused by "transmitted bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315087: fltTcaOpflexOvsHppPart1yearTxBytesMin

Severity: variable

Explanation: This fault is caused by "transmitted bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315088: fltTcaOpflexOvsHppPart5minTxBytesMax

Severity: variable

Explanation: This fault is caused by "transmitted bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315089: fltTcaOpflexOvsHppPart15minTxBytesMax

Severity: variable

Explanation: This fault is caused by "transmitted bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315090: fltTcaOpflexOvsHppPart1hTxBytesMax

Severity: variable

Explanation: This fault is caused by "transmitted bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315091: fltTcaOpflexOvsHppPart1dTxBytesMax

Severity: variable

Explanation: This fault is caused by "transmitted bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315092: fltTcaOpflexOvsHppPart1wTxBytesMax

Severity: variable

Explanation: This fault is caused by "transmitted bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315093: fltTcaOpflexOvsHppPart1moTxBytesMax

Severity: variable

Explanation: This fault is caused by "transmitted bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315094: fltTcaOpflexOvsHppPart1qtrTxBytesMax

Severity: variable

Explanation: This fault is caused by "transmitted bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315095: fltTcaOpflexOvsHppPart1yearTxBytesMax

Severity: variable

Explanation: This fault is caused by "transmitted bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315096: fltTcaOpflexOvsHppPart5minTxBytesAvg

Severity: variable

Explanation: This fault is caused by "transmitted bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315097: fltTcaOpflexOvsHppPart15minTxBytesAvg

Severity: variable

Explanation: This fault is caused by "transmitted bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315098: fltTcaOpflexOvsHppPart1hTxBytesAvg

Severity: variable

Explanation: This fault is caused by "transmitted bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315099: fltTcaOpflexOvsHppPart1dTxBytesAvg

Severity: variable

Explanation: This fault is caused by "transmitted bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3151: fltCloudsecIfOperStDown

Severity: major

Explanation: This fault occurs when the operational state of the Cloudsec Interface is changed to due to deployement failures on the device

Recommended Action: To recover from this fault, try the following actions

1. For unsupported-platform fault, change the hardware platform that supports cloudsec, refer the feature release notes

2. For unsupported-interface fault, change interface to subif that supports cloudsec, refer the feature release notes

3. For hw-error fault, disable and re-enable cloudsec for the site showing this fault

4. For hw-table-full-error fault, disable cloudsec for other site to get this site participate

5. For if-vlan-encap-hw-error fault, disable and re-enable cloudsec for the site showing this fault

F315100: fltTcaOpflexOvsHppPart1wTxBytesAvg

Severity: variable

Explanation: This fault is caused by "transmitted bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315101: fltTcaOpflexOvsHppPart1moTxBytesAvg

Severity: variable

Explanation: This fault is caused by "transmitted bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315102: fltTcaOpflexOvsHppPart1qtrTxBytesAvg

Severity: variable

Explanation: This fault is caused by "transmitted bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315103: fltTcaOpflexOvsHppPart1yearTxBytesAvg

Severity: variable

Explanation: This fault is caused by "transmitted bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315128: fltTcaOpflexOvsHppPart5minTxBytesTr

Severity: variable

Explanation: This fault is caused by "transmitted bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315129: fltTcaOpflexOvsHppPart15minTxBytesTr

Severity: variable

Explanation: This fault is caused by "transmitted bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315130: fltTcaOpflexOvsHppPart1hTxBytesTr

Severity: variable

Explanation: This fault is caused by "transmitted bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315131: fltTcaOpflexOvsHppPart1dTxBytesTr

Severity: variable

Explanation: This fault is caused by "transmitted bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315132: fltTcaOpflexOvsHppPart1wTxBytesTr

Severity: variable

Explanation: This fault is caused by "transmitted bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315133: fltTcaOpflexOvsHppPart1moTxBytesTr

Severity: variable

Explanation: This fault is caused by "transmitted bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315134: fltTcaOpflexOvsHppPart1qtrTxBytesTr

Severity: variable

Explanation: This fault is caused by "transmitted bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315135: fltTcaOpflexOvsHppPart1yearTxBytesTr

Severity: variable

Explanation: This fault is caused by "transmitted bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315136: fltTcaOpflexOvsHppPart5minTxBytesRate

Severity: variable

Explanation: This fault is caused by "transmitted bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315137: fltTcaOpflexOvsHppPart15minTxBytesRate

Severity: variable

Explanation: This fault is caused by "transmitted bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315138: fltTcaOpflexOvsHppPart1hTxBytesRate

Severity: variable

Explanation: This fault is caused by "transmitted bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315139: fltTcaOpflexOvsHppPart1dTxBytesRate

Severity: variable

Explanation: This fault is caused by "transmitted bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315140: fltTcaOpflexOvsHppPart1wTxBytesRate

Severity: variable

Explanation: This fault is caused by "transmitted bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315141: fltTcaOpflexOvsHppPart1moTxBytesRate

Severity: variable

Explanation: This fault is caused by "transmitted bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315142: fltTcaOpflexOvsHppPart1qtrTxBytesRate

Severity: variable

Explanation: This fault is caused by "transmitted bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315143: fltTcaOpflexOvsHppPart1yearTxBytesRate

Severity: variable

Explanation: This fault is caused by "transmitted bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3152: fltCloudsecSaPeerOperStDown

Severity: major

Explanation: This fault occurs when the operational state of the Cloudsec SaPeer is changed to due to deployement failures on the device

Recommended Action: To recover from this fault, try the following actions

1. For unsupported-platform fault, change the hardware platform that supports cloudsec, refer the feature release notes

2. For unsupported-interface fault, change interface to subif that supports cloudsec, refer the feature release notes

3. For hw-error fault, disable and re-enable cloudsec for the site showing this fault

4. For hw-table-full-error fault, disable cloudsec for other site to get this site participate

5. For if-vlan-encap-hw-error fault, disable and re-enable cloudsec for the site showing this fault

6. For peer-addr-hw-error fault, disable and re-enable cloudsec for the site showing this fault

F315216: fltTcaOpflexOvsHppAg5minTxBytesCum

Severity: variable

Explanation: This fault is caused by "transmitted bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315217: fltTcaOpflexOvsHppAg15minTxBytesCum

Severity: variable

Explanation: This fault is caused by "transmitted bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315218: fltTcaOpflexOvsHppAg1hTxBytesCum

Severity: variable

Explanation: This fault is caused by "transmitted bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315219: fltTcaOpflexOvsHppAg1dTxBytesCum

Severity: variable

Explanation: This fault is caused by "transmitted bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315220: fltTcaOpflexOvsHppAg1wTxBytesCum

Severity: variable

Explanation: This fault is caused by "transmitted bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315221: fltTcaOpflexOvsHppAg1moTxBytesCum

Severity: variable

Explanation: This fault is caused by "transmitted bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315222: fltTcaOpflexOvsHppAg1qtrTxBytesCum

Severity: variable

Explanation: This fault is caused by "transmitted bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315223: fltTcaOpflexOvsHppAg1yearTxBytesCum

Severity: variable

Explanation: This fault is caused by "transmitted bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315224: fltTcaOpflexOvsHppAg5minTxBytesPer

Severity: variable

Explanation: This fault is caused by "transmitted bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315225: fltTcaOpflexOvsHppAg15minTxBytesPer

Severity: variable

Explanation: This fault is caused by "transmitted bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315226: fltTcaOpflexOvsHppAg1hTxBytesPer

Severity: variable

Explanation: This fault is caused by "transmitted bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315227: fltTcaOpflexOvsHppAg1dTxBytesPer

Severity: variable

Explanation: This fault is caused by "transmitted bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315228: fltTcaOpflexOvsHppAg1wTxBytesPer

Severity: variable

Explanation: This fault is caused by "transmitted bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315229: fltTcaOpflexOvsHppAg1moTxBytesPer

Severity: variable

Explanation: This fault is caused by "transmitted bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315230: fltTcaOpflexOvsHppAg1qtrTxBytesPer

Severity: variable

Explanation: This fault is caused by "transmitted bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315231: fltTcaOpflexOvsHppAg1yearTxBytesPer

Severity: variable

Explanation: This fault is caused by "transmitted bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315256: fltTcaOpflexOvsHppAg5minTxBytesTr

Severity: variable

Explanation: This fault is caused by "transmitted bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315257: fltTcaOpflexOvsHppAg15minTxBytesTr

Severity: variable

Explanation: This fault is caused by "transmitted bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315258: fltTcaOpflexOvsHppAg1hTxBytesTr

Severity: variable

Explanation: This fault is caused by "transmitted bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315259: fltTcaOpflexOvsHppAg1dTxBytesTr

Severity: variable

Explanation: This fault is caused by "transmitted bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315260: fltTcaOpflexOvsHppAg1wTxBytesTr

Severity: variable

Explanation: This fault is caused by "transmitted bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315261: fltTcaOpflexOvsHppAg1moTxBytesTr

Severity: variable

Explanation: This fault is caused by "transmitted bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315262: fltTcaOpflexOvsHppAg1qtrTxBytesTr

Severity: variable

Explanation: This fault is caused by "transmitted bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315263: fltTcaOpflexOvsHppAg1yearTxBytesTr

Severity: variable

Explanation: This fault is caused by "transmitted bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315264: fltTcaOpflexOvsHppAg5minTxBytesRate

Severity: variable

Explanation: This fault is caused by "transmitted bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315265: fltTcaOpflexOvsHppAg15minTxBytesRate

Severity: variable

Explanation: This fault is caused by "transmitted bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315266: fltTcaOpflexOvsHppAg1hTxBytesRate

Severity: variable

Explanation: This fault is caused by "transmitted bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315267: fltTcaOpflexOvsHppAg1dTxBytesRate

Severity: variable

Explanation: This fault is caused by "transmitted bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315268: fltTcaOpflexOvsHppAg1wTxBytesRate

Severity: variable

Explanation: This fault is caused by "transmitted bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315269: fltTcaOpflexOvsHppAg1moTxBytesRate

Severity: variable

Explanation: This fault is caused by "transmitted bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315270: fltTcaOpflexOvsHppAg1qtrTxBytesRate

Severity: variable

Explanation: This fault is caused by "transmitted bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315271: fltTcaOpflexOvsHppAg1yearTxBytesRate

Severity: variable

Explanation: This fault is caused by "transmitted bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3153: fltCloudsecSaTxKeyOperStDown

Severity: major

Explanation: This fault occurs when the operational state of the Cloudsec Tx Key is changed to due to deployement failures on the device

Recommended Action: To recover from this fault, try the following actions

1. For unsupported-platform fault, change the hardware platform that supports cloudsec, refer the feature release notes

2. For unsupported-interface fault, change interface to subif that supports cloudsec, refer the feature release notes

3. For hw-error fault, disable and re-enable cloudsec for the site showing this fault

4. For hw-table-full-error fault, disable cloudsec for other site to get this site participate

5. For if-vlan-encap-hw-error fault, disable and re-enable cloudsec for the site showing this fault

6. For peer-addr-hw-error fault, disable and re-enable cloudsec for the site showing this fault

7. For sak-hw-error fault, disable and re-enable cloudsec for the site showing this fault

8. For sak-an-hw-error fault, disable and re-enable cloudsec for the site showing this fault

9. For sak-sci-hw-error fault, disable and re-enable cloudsec for the site showing this fault

F315320: fltTcaOpflexOvsHpp5minTxPktsLast

Severity: variable

Explanation: This fault is caused by "transmitted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315321: fltTcaOpflexOvsHpp15minTxPktsLast

Severity: variable

Explanation: This fault is caused by "transmitted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315322: fltTcaOpflexOvsHpp1hTxPktsLast

Severity: variable

Explanation: This fault is caused by "transmitted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315323: fltTcaOpflexOvsHpp1dTxPktsLast

Severity: variable

Explanation: This fault is caused by "transmitted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315324: fltTcaOpflexOvsHpp1wTxPktsLast

Severity: variable

Explanation: This fault is caused by "transmitted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315325: fltTcaOpflexOvsHpp1moTxPktsLast

Severity: variable

Explanation: This fault is caused by "transmitted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315326: fltTcaOpflexOvsHpp1qtrTxPktsLast

Severity: variable

Explanation: This fault is caused by "transmitted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315327: fltTcaOpflexOvsHpp1yearTxPktsLast

Severity: variable

Explanation: This fault is caused by "transmitted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315336: fltTcaOpflexOvsHpp5minTxPktsCum

Severity: variable

Explanation: This fault is caused by "transmitted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315337: fltTcaOpflexOvsHpp15minTxPktsCum

Severity: variable

Explanation: This fault is caused by "transmitted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315338: fltTcaOpflexOvsHpp1hTxPktsCum

Severity: variable

Explanation: This fault is caused by "transmitted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315339: fltTcaOpflexOvsHpp1dTxPktsCum

Severity: variable

Explanation: This fault is caused by "transmitted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315340: fltTcaOpflexOvsHpp1wTxPktsCum

Severity: variable

Explanation: This fault is caused by "transmitted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315341: fltTcaOpflexOvsHpp1moTxPktsCum

Severity: variable

Explanation: This fault is caused by "transmitted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315342: fltTcaOpflexOvsHpp1qtrTxPktsCum

Severity: variable

Explanation: This fault is caused by "transmitted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315343: fltTcaOpflexOvsHpp1yearTxPktsCum

Severity: variable

Explanation: This fault is caused by "transmitted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315344: fltTcaOpflexOvsHpp5minTxPktsPer

Severity: variable

Explanation: This fault is caused by "transmitted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315345: fltTcaOpflexOvsHpp15minTxPktsPer

Severity: variable

Explanation: This fault is caused by "transmitted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315346: fltTcaOpflexOvsHpp1hTxPktsPer

Severity: variable

Explanation: This fault is caused by "transmitted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315347: fltTcaOpflexOvsHpp1dTxPktsPer

Severity: variable

Explanation: This fault is caused by "transmitted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315348: fltTcaOpflexOvsHpp1wTxPktsPer

Severity: variable

Explanation: This fault is caused by "transmitted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315349: fltTcaOpflexOvsHpp1moTxPktsPer

Severity: variable

Explanation: This fault is caused by "transmitted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315350: fltTcaOpflexOvsHpp1qtrTxPktsPer

Severity: variable

Explanation: This fault is caused by "transmitted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315351: fltTcaOpflexOvsHpp1yearTxPktsPer

Severity: variable

Explanation: This fault is caused by "transmitted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315352: fltTcaOpflexOvsHpp5minTxPktsMin

Severity: variable

Explanation: This fault is caused by "transmitted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315353: fltTcaOpflexOvsHpp15minTxPktsMin

Severity: variable

Explanation: This fault is caused by "transmitted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315354: fltTcaOpflexOvsHpp1hTxPktsMin

Severity: variable

Explanation: This fault is caused by "transmitted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315355: fltTcaOpflexOvsHpp1dTxPktsMin

Severity: variable

Explanation: This fault is caused by "transmitted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315356: fltTcaOpflexOvsHpp1wTxPktsMin

Severity: variable

Explanation: This fault is caused by "transmitted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315357: fltTcaOpflexOvsHpp1moTxPktsMin

Severity: variable

Explanation: This fault is caused by "transmitted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315358: fltTcaOpflexOvsHpp1qtrTxPktsMin

Severity: variable

Explanation: This fault is caused by "transmitted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315359: fltTcaOpflexOvsHpp1yearTxPktsMin

Severity: variable

Explanation: This fault is caused by "transmitted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315360: fltTcaOpflexOvsHpp5minTxPktsMax

Severity: variable

Explanation: This fault is caused by "transmitted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315361: fltTcaOpflexOvsHpp15minTxPktsMax

Severity: variable

Explanation: This fault is caused by "transmitted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315362: fltTcaOpflexOvsHpp1hTxPktsMax

Severity: variable

Explanation: This fault is caused by "transmitted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315363: fltTcaOpflexOvsHpp1dTxPktsMax

Severity: variable

Explanation: This fault is caused by "transmitted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315364: fltTcaOpflexOvsHpp1wTxPktsMax

Severity: variable

Explanation: This fault is caused by "transmitted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315365: fltTcaOpflexOvsHpp1moTxPktsMax

Severity: variable

Explanation: This fault is caused by "transmitted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315366: fltTcaOpflexOvsHpp1qtrTxPktsMax

Severity: variable

Explanation: This fault is caused by "transmitted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315367: fltTcaOpflexOvsHpp1yearTxPktsMax

Severity: variable

Explanation: This fault is caused by "transmitted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315368: fltTcaOpflexOvsHpp5minTxPktsAvg

Severity: variable

Explanation: This fault is caused by "transmitted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315369: fltTcaOpflexOvsHpp15minTxPktsAvg

Severity: variable

Explanation: This fault is caused by "transmitted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315370: fltTcaOpflexOvsHpp1hTxPktsAvg

Severity: variable

Explanation: This fault is caused by "transmitted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315371: fltTcaOpflexOvsHpp1dTxPktsAvg

Severity: variable

Explanation: This fault is caused by "transmitted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315372: fltTcaOpflexOvsHpp1wTxPktsAvg

Severity: variable

Explanation: This fault is caused by "transmitted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315373: fltTcaOpflexOvsHpp1moTxPktsAvg

Severity: variable

Explanation: This fault is caused by "transmitted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315374: fltTcaOpflexOvsHpp1qtrTxPktsAvg

Severity: variable

Explanation: This fault is caused by "transmitted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315375: fltTcaOpflexOvsHpp1yearTxPktsAvg

Severity: variable

Explanation: This fault is caused by "transmitted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3154: fltCloudsecSaRxKeyOperStDown

Severity: major

Explanation: This fault occurs when the operational state of the Cloudsec Rx Key is changed to due to deployement failures on the device

Recommended Action: To recover from this fault, try the following actions

1. For unsupported-platform fault, change the hardware platform that supports cloudsec, refer the feature release notes

2. For unsupported-interface fault, change interface to subif that supports cloudsec, refer the feature release notes

3. For hw-error fault, disable and re-enable cloudsec for the site showing this fault

4. For hw-table-full-error fault, disable cloudsec for other site to get this site participate

5. For if-vlan-encap-hw-error fault, disable and re-enable cloudsec for the site showing this fault

6. For peer-addr-hw-error fault, disable and re-enable cloudsec for the site showing this fault

7. For sak-hw-error fault, disable and re-enable cloudsec for the site showing this fault

8. For sak-an-hw-error fault, disable and re-enable cloudsec for the site showing this fault

9. For sak-sci-hw-error fault, disable and re-enable cloudsec for the site showing this fault

F315400: fltTcaOpflexOvsHpp5minTxPktsTr

Severity: variable

Explanation: This fault is caused by "transmitted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315401: fltTcaOpflexOvsHpp15minTxPktsTr

Severity: variable

Explanation: This fault is caused by "transmitted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315402: fltTcaOpflexOvsHpp1hTxPktsTr

Severity: variable

Explanation: This fault is caused by "transmitted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315403: fltTcaOpflexOvsHpp1dTxPktsTr

Severity: variable

Explanation: This fault is caused by "transmitted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315404: fltTcaOpflexOvsHpp1wTxPktsTr

Severity: variable

Explanation: This fault is caused by "transmitted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315405: fltTcaOpflexOvsHpp1moTxPktsTr

Severity: variable

Explanation: This fault is caused by "transmitted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315406: fltTcaOpflexOvsHpp1qtrTxPktsTr

Severity: variable

Explanation: This fault is caused by "transmitted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315407: fltTcaOpflexOvsHpp1yearTxPktsTr

Severity: variable

Explanation: This fault is caused by "transmitted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315408: fltTcaOpflexOvsHpp5minTxPktsRate

Severity: variable

Explanation: This fault is caused by "transmitted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315409: fltTcaOpflexOvsHpp15minTxPktsRate

Severity: variable

Explanation: This fault is caused by "transmitted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315410: fltTcaOpflexOvsHpp1hTxPktsRate

Severity: variable

Explanation: This fault is caused by "transmitted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315411: fltTcaOpflexOvsHpp1dTxPktsRate

Severity: variable

Explanation: This fault is caused by "transmitted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315412: fltTcaOpflexOvsHpp1wTxPktsRate

Severity: variable

Explanation: This fault is caused by "transmitted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315413: fltTcaOpflexOvsHpp1moTxPktsRate

Severity: variable

Explanation: This fault is caused by "transmitted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315414: fltTcaOpflexOvsHpp1qtrTxPktsRate

Severity: variable

Explanation: This fault is caused by "transmitted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315415: fltTcaOpflexOvsHpp1yearTxPktsRate

Severity: variable

Explanation: This fault is caused by "transmitted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315488: fltTcaOpflexOvsHppPart5minTxPktsLast

Severity: variable

Explanation: This fault is caused by "transmitted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315489: fltTcaOpflexOvsHppPart15minTxPktsLast

Severity: variable

Explanation: This fault is caused by "transmitted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315490: fltTcaOpflexOvsHppPart1hTxPktsLast

Severity: variable

Explanation: This fault is caused by "transmitted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315491: fltTcaOpflexOvsHppPart1dTxPktsLast

Severity: variable

Explanation: This fault is caused by "transmitted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315492: fltTcaOpflexOvsHppPart1wTxPktsLast

Severity: variable

Explanation: This fault is caused by "transmitted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315493: fltTcaOpflexOvsHppPart1moTxPktsLast

Severity: variable

Explanation: This fault is caused by "transmitted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315494: fltTcaOpflexOvsHppPart1qtrTxPktsLast

Severity: variable

Explanation: This fault is caused by "transmitted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315495: fltTcaOpflexOvsHppPart1yearTxPktsLast

Severity: variable

Explanation: This fault is caused by "transmitted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315504: fltTcaOpflexOvsHppPart5minTxPktsCum

Severity: variable

Explanation: This fault is caused by "transmitted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315505: fltTcaOpflexOvsHppPart15minTxPktsCum

Severity: variable

Explanation: This fault is caused by "transmitted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315506: fltTcaOpflexOvsHppPart1hTxPktsCum

Severity: variable

Explanation: This fault is caused by "transmitted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315507: fltTcaOpflexOvsHppPart1dTxPktsCum

Severity: variable

Explanation: This fault is caused by "transmitted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315508: fltTcaOpflexOvsHppPart1wTxPktsCum

Severity: variable

Explanation: This fault is caused by "transmitted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315509: fltTcaOpflexOvsHppPart1moTxPktsCum

Severity: variable

Explanation: This fault is caused by "transmitted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315510: fltTcaOpflexOvsHppPart1qtrTxPktsCum

Severity: variable

Explanation: This fault is caused by "transmitted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315511: fltTcaOpflexOvsHppPart1yearTxPktsCum

Severity: variable

Explanation: This fault is caused by "transmitted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315512: fltTcaOpflexOvsHppPart5minTxPktsPer

Severity: variable

Explanation: This fault is caused by "transmitted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315513: fltTcaOpflexOvsHppPart15minTxPktsPer

Severity: variable

Explanation: This fault is caused by "transmitted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315514: fltTcaOpflexOvsHppPart1hTxPktsPer

Severity: variable

Explanation: This fault is caused by "transmitted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315515: fltTcaOpflexOvsHppPart1dTxPktsPer

Severity: variable

Explanation: This fault is caused by "transmitted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315516: fltTcaOpflexOvsHppPart1wTxPktsPer

Severity: variable

Explanation: This fault is caused by "transmitted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315517: fltTcaOpflexOvsHppPart1moTxPktsPer

Severity: variable

Explanation: This fault is caused by "transmitted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315518: fltTcaOpflexOvsHppPart1qtrTxPktsPer

Severity: variable

Explanation: This fault is caused by "transmitted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315519: fltTcaOpflexOvsHppPart1yearTxPktsPer

Severity: variable

Explanation: This fault is caused by "transmitted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315520: fltTcaOpflexOvsHppPart5minTxPktsMin

Severity: variable

Explanation: This fault is caused by "transmitted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315521: fltTcaOpflexOvsHppPart15minTxPktsMin

Severity: variable

Explanation: This fault is caused by "transmitted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315522: fltTcaOpflexOvsHppPart1hTxPktsMin

Severity: variable

Explanation: This fault is caused by "transmitted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315523: fltTcaOpflexOvsHppPart1dTxPktsMin

Severity: variable

Explanation: This fault is caused by "transmitted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315524: fltTcaOpflexOvsHppPart1wTxPktsMin

Severity: variable

Explanation: This fault is caused by "transmitted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315525: fltTcaOpflexOvsHppPart1moTxPktsMin

Severity: variable

Explanation: This fault is caused by "transmitted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315526: fltTcaOpflexOvsHppPart1qtrTxPktsMin

Severity: variable

Explanation: This fault is caused by "transmitted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315527: fltTcaOpflexOvsHppPart1yearTxPktsMin

Severity: variable

Explanation: This fault is caused by "transmitted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315528: fltTcaOpflexOvsHppPart5minTxPktsMax

Severity: variable

Explanation: This fault is caused by "transmitted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315529: fltTcaOpflexOvsHppPart15minTxPktsMax

Severity: variable

Explanation: This fault is caused by "transmitted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315530: fltTcaOpflexOvsHppPart1hTxPktsMax

Severity: variable

Explanation: This fault is caused by "transmitted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315531: fltTcaOpflexOvsHppPart1dTxPktsMax

Severity: variable

Explanation: This fault is caused by "transmitted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315532: fltTcaOpflexOvsHppPart1wTxPktsMax

Severity: variable

Explanation: This fault is caused by "transmitted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315533: fltTcaOpflexOvsHppPart1moTxPktsMax

Severity: variable

Explanation: This fault is caused by "transmitted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315534: fltTcaOpflexOvsHppPart1qtrTxPktsMax

Severity: variable

Explanation: This fault is caused by "transmitted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315535: fltTcaOpflexOvsHppPart1yearTxPktsMax

Severity: variable

Explanation: This fault is caused by "transmitted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315536: fltTcaOpflexOvsHppPart5minTxPktsAvg

Severity: variable

Explanation: This fault is caused by "transmitted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315537: fltTcaOpflexOvsHppPart15minTxPktsAvg

Severity: variable

Explanation: This fault is caused by "transmitted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315538: fltTcaOpflexOvsHppPart1hTxPktsAvg

Severity: variable

Explanation: This fault is caused by "transmitted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315539: fltTcaOpflexOvsHppPart1dTxPktsAvg

Severity: variable

Explanation: This fault is caused by "transmitted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315540: fltTcaOpflexOvsHppPart1wTxPktsAvg

Severity: variable

Explanation: This fault is caused by "transmitted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315541: fltTcaOpflexOvsHppPart1moTxPktsAvg

Severity: variable

Explanation: This fault is caused by "transmitted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315542: fltTcaOpflexOvsHppPart1qtrTxPktsAvg

Severity: variable

Explanation: This fault is caused by "transmitted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315543: fltTcaOpflexOvsHppPart1yearTxPktsAvg

Severity: variable

Explanation: This fault is caused by "transmitted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315568: fltTcaOpflexOvsHppPart5minTxPktsTr

Severity: variable

Explanation: This fault is caused by "transmitted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315569: fltTcaOpflexOvsHppPart15minTxPktsTr

Severity: variable

Explanation: This fault is caused by "transmitted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315570: fltTcaOpflexOvsHppPart1hTxPktsTr

Severity: variable

Explanation: This fault is caused by "transmitted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315571: fltTcaOpflexOvsHppPart1dTxPktsTr

Severity: variable

Explanation: This fault is caused by "transmitted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315572: fltTcaOpflexOvsHppPart1wTxPktsTr

Severity: variable

Explanation: This fault is caused by "transmitted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315573: fltTcaOpflexOvsHppPart1moTxPktsTr

Severity: variable

Explanation: This fault is caused by "transmitted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315574: fltTcaOpflexOvsHppPart1qtrTxPktsTr

Severity: variable

Explanation: This fault is caused by "transmitted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315575: fltTcaOpflexOvsHppPart1yearTxPktsTr

Severity: variable

Explanation: This fault is caused by "transmitted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315576: fltTcaOpflexOvsHppPart5minTxPktsRate

Severity: variable

Explanation: This fault is caused by "transmitted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315577: fltTcaOpflexOvsHppPart15minTxPktsRate

Severity: variable

Explanation: This fault is caused by "transmitted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315578: fltTcaOpflexOvsHppPart1hTxPktsRate

Severity: variable

Explanation: This fault is caused by "transmitted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315579: fltTcaOpflexOvsHppPart1dTxPktsRate

Severity: variable

Explanation: This fault is caused by "transmitted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315580: fltTcaOpflexOvsHppPart1wTxPktsRate

Severity: variable

Explanation: This fault is caused by "transmitted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315581: fltTcaOpflexOvsHppPart1moTxPktsRate

Severity: variable

Explanation: This fault is caused by "transmitted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315582: fltTcaOpflexOvsHppPart1qtrTxPktsRate

Severity: variable

Explanation: This fault is caused by "transmitted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315583: fltTcaOpflexOvsHppPart1yearTxPktsRate

Severity: variable

Explanation: This fault is caused by "transmitted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315656: fltTcaOpflexOvsHppAg5minTxPktsCum

Severity: variable

Explanation: This fault is caused by "transmitted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315657: fltTcaOpflexOvsHppAg15minTxPktsCum

Severity: variable

Explanation: This fault is caused by "transmitted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315658: fltTcaOpflexOvsHppAg1hTxPktsCum

Severity: variable

Explanation: This fault is caused by "transmitted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315659: fltTcaOpflexOvsHppAg1dTxPktsCum

Severity: variable

Explanation: This fault is caused by "transmitted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315660: fltTcaOpflexOvsHppAg1wTxPktsCum

Severity: variable

Explanation: This fault is caused by "transmitted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315661: fltTcaOpflexOvsHppAg1moTxPktsCum

Severity: variable

Explanation: This fault is caused by "transmitted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315662: fltTcaOpflexOvsHppAg1qtrTxPktsCum

Severity: variable

Explanation: This fault is caused by "transmitted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315663: fltTcaOpflexOvsHppAg1yearTxPktsCum

Severity: variable

Explanation: This fault is caused by "transmitted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315664: fltTcaOpflexOvsHppAg5minTxPktsPer

Severity: variable

Explanation: This fault is caused by "transmitted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315665: fltTcaOpflexOvsHppAg15minTxPktsPer

Severity: variable

Explanation: This fault is caused by "transmitted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315666: fltTcaOpflexOvsHppAg1hTxPktsPer

Severity: variable

Explanation: This fault is caused by "transmitted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315667: fltTcaOpflexOvsHppAg1dTxPktsPer

Severity: variable

Explanation: This fault is caused by "transmitted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315668: fltTcaOpflexOvsHppAg1wTxPktsPer

Severity: variable

Explanation: This fault is caused by "transmitted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315669: fltTcaOpflexOvsHppAg1moTxPktsPer

Severity: variable

Explanation: This fault is caused by "transmitted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315670: fltTcaOpflexOvsHppAg1qtrTxPktsPer

Severity: variable

Explanation: This fault is caused by "transmitted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315671: fltTcaOpflexOvsHppAg1yearTxPktsPer

Severity: variable

Explanation: This fault is caused by "transmitted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315696: fltTcaOpflexOvsHppAg5minTxPktsTr

Severity: variable

Explanation: This fault is caused by "transmitted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315697: fltTcaOpflexOvsHppAg15minTxPktsTr

Severity: variable

Explanation: This fault is caused by "transmitted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315698: fltTcaOpflexOvsHppAg1hTxPktsTr

Severity: variable

Explanation: This fault is caused by "transmitted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315699: fltTcaOpflexOvsHppAg1dTxPktsTr

Severity: variable

Explanation: This fault is caused by "transmitted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3157: fltTraceroutepRsTrExtEpIpDstResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F315700: fltTcaOpflexOvsHppAg1wTxPktsTr

Severity: variable

Explanation: This fault is caused by "transmitted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315701: fltTcaOpflexOvsHppAg1moTxPktsTr

Severity: variable

Explanation: This fault is caused by "transmitted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315702: fltTcaOpflexOvsHppAg1qtrTxPktsTr

Severity: variable

Explanation: This fault is caused by "transmitted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315703: fltTcaOpflexOvsHppAg1yearTxPktsTr

Severity: variable

Explanation: This fault is caused by "transmitted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315704: fltTcaOpflexOvsHppAg5minTxPktsRate

Severity: variable

Explanation: This fault is caused by "transmitted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315705: fltTcaOpflexOvsHppAg15minTxPktsRate

Severity: variable

Explanation: This fault is caused by "transmitted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315706: fltTcaOpflexOvsHppAg1hTxPktsRate

Severity: variable

Explanation: This fault is caused by "transmitted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315707: fltTcaOpflexOvsHppAg1dTxPktsRate

Severity: variable

Explanation: This fault is caused by "transmitted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315708: fltTcaOpflexOvsHppAg1wTxPktsRate

Severity: variable

Explanation: This fault is caused by "transmitted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315709: fltTcaOpflexOvsHppAg1moTxPktsRate

Severity: variable

Explanation: This fault is caused by "transmitted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315710: fltTcaOpflexOvsHppAg1qtrTxPktsRate

Severity: variable

Explanation: This fault is caused by "transmitted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F315711: fltTcaOpflexOvsHppAg1yearTxPktsRate

Severity: variable

Explanation: This fault is caused by "transmitted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmitted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3158: fltQospClassOperStError

Severity: major

Explanation: This fault occurs when qos manager fails to activate a class due to exceeding max allowed strict priority classes

Recommended Action: To recover from this fault, try the following actions

1. Look at any configuration issues

2. Verify the configuration is correct/complete

3. Ensure the number of strict priority classes is less than or equal to the max allowed on each platform

4. If the above actions did not resolve the issue, try rebooting the switch using CLI or GUI.

5. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F3160: fltAdepgSvrConnectFailed

Severity: major

Explanation: This fault is raised when the APIC is unable to connect to the external Identity server. Recovery is in process.

Recommended Action: If you see this fault repeatedly, take the following actions:

1. Verify that there is network connectivity to external Identity server.

2. Verify that the user credentials to external Identity server are correct.

3. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F316272: fltTcaEqptcapacityWideTcamPrefixEntries5minExtNormalizedLast

Severity: variable

Explanation: This fault is caused by "External Subnet v6 /84 to /127 prefix entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316273: fltTcaEqptcapacityWideTcamPrefixEntries15minExtNormalizedLast

Severity: variable

Explanation: This fault is caused by "External Subnet v6 /84 to /127 prefix entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316274: fltTcaEqptcapacityWideTcamPrefixEntries1hExtNormalizedLast

Severity: variable

Explanation: This fault is caused by "External Subnet v6 /84 to /127 prefix entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316275: fltTcaEqptcapacityWideTcamPrefixEntries1dExtNormalizedLast

Severity: variable

Explanation: This fault is caused by "External Subnet v6 /84 to /127 prefix entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316276: fltTcaEqptcapacityWideTcamPrefixEntries1wExtNormalizedLast

Severity: variable

Explanation: This fault is caused by "External Subnet v6 /84 to /127 prefix entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316277: fltTcaEqptcapacityWideTcamPrefixEntries1moExtNormalizedLast

Severity: variable

Explanation: This fault is caused by "External Subnet v6 /84 to /127 prefix entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316278: fltTcaEqptcapacityWideTcamPrefixEntries1qtrExtNormalizedLast

Severity: variable

Explanation: This fault is caused by "External Subnet v6 /84 to /127 prefix entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316279: fltTcaEqptcapacityWideTcamPrefixEntries1yearExtNormalizedLast

Severity: variable

Explanation: This fault is caused by "External Subnet v6 /84 to /127 prefix entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316280: fltTcaEqptcapacityWideTcamPrefixEntries5minExtNormalizedMin

Severity: variable

Explanation: This fault is caused by "External Subnet v6 /84 to /127 prefix entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316281: fltTcaEqptcapacityWideTcamPrefixEntries15minExtNormalizedMin

Severity: variable

Explanation: This fault is caused by "External Subnet v6 /84 to /127 prefix entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316282: fltTcaEqptcapacityWideTcamPrefixEntries1hExtNormalizedMin

Severity: variable

Explanation: This fault is caused by "External Subnet v6 /84 to /127 prefix entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316283: fltTcaEqptcapacityWideTcamPrefixEntries1dExtNormalizedMin

Severity: variable

Explanation: This fault is caused by "External Subnet v6 /84 to /127 prefix entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316284: fltTcaEqptcapacityWideTcamPrefixEntries1wExtNormalizedMin

Severity: variable

Explanation: This fault is caused by "External Subnet v6 /84 to /127 prefix entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316285: fltTcaEqptcapacityWideTcamPrefixEntries1moExtNormalizedMin

Severity: variable

Explanation: This fault is caused by "External Subnet v6 /84 to /127 prefix entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316286: fltTcaEqptcapacityWideTcamPrefixEntries1qtrExtNormalizedMin

Severity: variable

Explanation: This fault is caused by "External Subnet v6 /84 to /127 prefix entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316287: fltTcaEqptcapacityWideTcamPrefixEntries1yearExtNormalizedMin

Severity: variable

Explanation: This fault is caused by "External Subnet v6 /84 to /127 prefix entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316288: fltTcaEqptcapacityWideTcamPrefixEntries5minExtNormalizedMax

Severity: variable

Explanation: This fault is caused by "External Subnet v6 /84 to /127 prefix entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316289: fltTcaEqptcapacityWideTcamPrefixEntries15minExtNormalizedMax

Severity: variable

Explanation: This fault is caused by "External Subnet v6 /84 to /127 prefix entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316290: fltTcaEqptcapacityWideTcamPrefixEntries1hExtNormalizedMax

Severity: variable

Explanation: This fault is caused by "External Subnet v6 /84 to /127 prefix entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316291: fltTcaEqptcapacityWideTcamPrefixEntries1dExtNormalizedMax

Severity: variable

Explanation: This fault is caused by "External Subnet v6 /84 to /127 prefix entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316292: fltTcaEqptcapacityWideTcamPrefixEntries1wExtNormalizedMax

Severity: variable

Explanation: This fault is caused by "External Subnet v6 /84 to /127 prefix entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316293: fltTcaEqptcapacityWideTcamPrefixEntries1moExtNormalizedMax

Severity: variable

Explanation: This fault is caused by "External Subnet v6 /84 to /127 prefix entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316294: fltTcaEqptcapacityWideTcamPrefixEntries1qtrExtNormalizedMax

Severity: variable

Explanation: This fault is caused by "External Subnet v6 /84 to /127 prefix entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316295: fltTcaEqptcapacityWideTcamPrefixEntries1yearExtNormalizedMax

Severity: variable

Explanation: This fault is caused by "External Subnet v6 /84 to /127 prefix entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316296: fltTcaEqptcapacityWideTcamPrefixEntries5minExtNormalizedAvg

Severity: variable

Explanation: This fault is caused by "External Subnet v6 /84 to /127 prefix entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316297: fltTcaEqptcapacityWideTcamPrefixEntries15minExtNormalizedAvg

Severity: variable

Explanation: This fault is caused by "External Subnet v6 /84 to /127 prefix entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316298: fltTcaEqptcapacityWideTcamPrefixEntries1hExtNormalizedAvg

Severity: variable

Explanation: This fault is caused by "External Subnet v6 /84 to /127 prefix entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316299: fltTcaEqptcapacityWideTcamPrefixEntries1dExtNormalizedAvg

Severity: variable

Explanation: This fault is caused by "External Subnet v6 /84 to /127 prefix entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316300: fltTcaEqptcapacityWideTcamPrefixEntries1wExtNormalizedAvg

Severity: variable

Explanation: This fault is caused by "External Subnet v6 /84 to /127 prefix entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316301: fltTcaEqptcapacityWideTcamPrefixEntries1moExtNormalizedAvg

Severity: variable

Explanation: This fault is caused by "External Subnet v6 /84 to /127 prefix entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316302: fltTcaEqptcapacityWideTcamPrefixEntries1qtrExtNormalizedAvg

Severity: variable

Explanation: This fault is caused by "External Subnet v6 /84 to /127 prefix entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316303: fltTcaEqptcapacityWideTcamPrefixEntries1yearExtNormalizedAvg

Severity: variable

Explanation: This fault is caused by "External Subnet v6 /84 to /127 prefix entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316336: fltTcaEqptcapacityWideTcamPrefixEntries5minExtNormalizedTr

Severity: variable

Explanation: This fault is caused by "External Subnet v6 /84 to /127 prefix entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316337: fltTcaEqptcapacityWideTcamPrefixEntries15minExtNormalizedTr

Severity: variable

Explanation: This fault is caused by "External Subnet v6 /84 to /127 prefix entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316338: fltTcaEqptcapacityWideTcamPrefixEntries1hExtNormalizedTr

Severity: variable

Explanation: This fault is caused by "External Subnet v6 /84 to /127 prefix entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316339: fltTcaEqptcapacityWideTcamPrefixEntries1dExtNormalizedTr

Severity: variable

Explanation: This fault is caused by "External Subnet v6 /84 to /127 prefix entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316340: fltTcaEqptcapacityWideTcamPrefixEntries1wExtNormalizedTr

Severity: variable

Explanation: This fault is caused by "External Subnet v6 /84 to /127 prefix entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316341: fltTcaEqptcapacityWideTcamPrefixEntries1moExtNormalizedTr

Severity: variable

Explanation: This fault is caused by "External Subnet v6 /84 to /127 prefix entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316342: fltTcaEqptcapacityWideTcamPrefixEntries1qtrExtNormalizedTr

Severity: variable

Explanation: This fault is caused by "External Subnet v6 /84 to /127 prefix entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316343: fltTcaEqptcapacityWideTcamPrefixEntries1yearExtNormalizedTr

Severity: variable

Explanation: This fault is caused by "External Subnet v6 /84 to /127 prefix entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "External Subnet v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316392: fltTcaEqptcapacityWideTcamPrefixEntries5minFabNormalizedLast

Severity: variable

Explanation: This fault is caused by "v6 /84 to /127 prefix entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316393: fltTcaEqptcapacityWideTcamPrefixEntries15minFabNormalizedLast

Severity: variable

Explanation: This fault is caused by "v6 /84 to /127 prefix entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316394: fltTcaEqptcapacityWideTcamPrefixEntries1hFabNormalizedLast

Severity: variable

Explanation: This fault is caused by "v6 /84 to /127 prefix entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316395: fltTcaEqptcapacityWideTcamPrefixEntries1dFabNormalizedLast

Severity: variable

Explanation: This fault is caused by "v6 /84 to /127 prefix entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316396: fltTcaEqptcapacityWideTcamPrefixEntries1wFabNormalizedLast

Severity: variable

Explanation: This fault is caused by "v6 /84 to /127 prefix entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316397: fltTcaEqptcapacityWideTcamPrefixEntries1moFabNormalizedLast

Severity: variable

Explanation: This fault is caused by "v6 /84 to /127 prefix entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316398: fltTcaEqptcapacityWideTcamPrefixEntries1qtrFabNormalizedLast

Severity: variable

Explanation: This fault is caused by "v6 /84 to /127 prefix entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316399: fltTcaEqptcapacityWideTcamPrefixEntries1yearFabNormalizedLast

Severity: variable

Explanation: This fault is caused by "v6 /84 to /127 prefix entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316400: fltTcaEqptcapacityWideTcamPrefixEntries5minFabNormalizedMin

Severity: variable

Explanation: This fault is caused by "v6 /84 to /127 prefix entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316401: fltTcaEqptcapacityWideTcamPrefixEntries15minFabNormalizedMin

Severity: variable

Explanation: This fault is caused by "v6 /84 to /127 prefix entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316402: fltTcaEqptcapacityWideTcamPrefixEntries1hFabNormalizedMin

Severity: variable

Explanation: This fault is caused by "v6 /84 to /127 prefix entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316403: fltTcaEqptcapacityWideTcamPrefixEntries1dFabNormalizedMin

Severity: variable

Explanation: This fault is caused by "v6 /84 to /127 prefix entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316404: fltTcaEqptcapacityWideTcamPrefixEntries1wFabNormalizedMin

Severity: variable

Explanation: This fault is caused by "v6 /84 to /127 prefix entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316405: fltTcaEqptcapacityWideTcamPrefixEntries1moFabNormalizedMin

Severity: variable

Explanation: This fault is caused by "v6 /84 to /127 prefix entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316406: fltTcaEqptcapacityWideTcamPrefixEntries1qtrFabNormalizedMin

Severity: variable

Explanation: This fault is caused by "v6 /84 to /127 prefix entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316407: fltTcaEqptcapacityWideTcamPrefixEntries1yearFabNormalizedMin

Severity: variable

Explanation: This fault is caused by "v6 /84 to /127 prefix entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316408: fltTcaEqptcapacityWideTcamPrefixEntries5minFabNormalizedMax

Severity: variable

Explanation: This fault is caused by "v6 /84 to /127 prefix entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316409: fltTcaEqptcapacityWideTcamPrefixEntries15minFabNormalizedMax

Severity: variable

Explanation: This fault is caused by "v6 /84 to /127 prefix entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316410: fltTcaEqptcapacityWideTcamPrefixEntries1hFabNormalizedMax

Severity: variable

Explanation: This fault is caused by "v6 /84 to /127 prefix entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316411: fltTcaEqptcapacityWideTcamPrefixEntries1dFabNormalizedMax

Severity: variable

Explanation: This fault is caused by "v6 /84 to /127 prefix entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316412: fltTcaEqptcapacityWideTcamPrefixEntries1wFabNormalizedMax

Severity: variable

Explanation: This fault is caused by "v6 /84 to /127 prefix entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316413: fltTcaEqptcapacityWideTcamPrefixEntries1moFabNormalizedMax

Severity: variable

Explanation: This fault is caused by "v6 /84 to /127 prefix entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316414: fltTcaEqptcapacityWideTcamPrefixEntries1qtrFabNormalizedMax

Severity: variable

Explanation: This fault is caused by "v6 /84 to /127 prefix entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316415: fltTcaEqptcapacityWideTcamPrefixEntries1yearFabNormalizedMax

Severity: variable

Explanation: This fault is caused by "v6 /84 to /127 prefix entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316416: fltTcaEqptcapacityWideTcamPrefixEntries5minFabNormalizedAvg

Severity: variable

Explanation: This fault is caused by "v6 /84 to /127 prefix entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316417: fltTcaEqptcapacityWideTcamPrefixEntries15minFabNormalizedAvg

Severity: variable

Explanation: This fault is caused by "v6 /84 to /127 prefix entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316418: fltTcaEqptcapacityWideTcamPrefixEntries1hFabNormalizedAvg

Severity: variable

Explanation: This fault is caused by "v6 /84 to /127 prefix entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316419: fltTcaEqptcapacityWideTcamPrefixEntries1dFabNormalizedAvg

Severity: variable

Explanation: This fault is caused by "v6 /84 to /127 prefix entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316420: fltTcaEqptcapacityWideTcamPrefixEntries1wFabNormalizedAvg

Severity: variable

Explanation: This fault is caused by "v6 /84 to /127 prefix entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316421: fltTcaEqptcapacityWideTcamPrefixEntries1moFabNormalizedAvg

Severity: variable

Explanation: This fault is caused by "v6 /84 to /127 prefix entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316422: fltTcaEqptcapacityWideTcamPrefixEntries1qtrFabNormalizedAvg

Severity: variable

Explanation: This fault is caused by "v6 /84 to /127 prefix entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316423: fltTcaEqptcapacityWideTcamPrefixEntries1yearFabNormalizedAvg

Severity: variable

Explanation: This fault is caused by "v6 /84 to /127 prefix entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316456: fltTcaEqptcapacityWideTcamPrefixEntries5minFabNormalizedTr

Severity: variable

Explanation: This fault is caused by "v6 /84 to /127 prefix entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316457: fltTcaEqptcapacityWideTcamPrefixEntries15minFabNormalizedTr

Severity: variable

Explanation: This fault is caused by "v6 /84 to /127 prefix entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316458: fltTcaEqptcapacityWideTcamPrefixEntries1hFabNormalizedTr

Severity: variable

Explanation: This fault is caused by "v6 /84 to /127 prefix entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316459: fltTcaEqptcapacityWideTcamPrefixEntries1dFabNormalizedTr

Severity: variable

Explanation: This fault is caused by "v6 /84 to /127 prefix entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316460: fltTcaEqptcapacityWideTcamPrefixEntries1wFabNormalizedTr

Severity: variable

Explanation: This fault is caused by "v6 /84 to /127 prefix entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316461: fltTcaEqptcapacityWideTcamPrefixEntries1moFabNormalizedTr

Severity: variable

Explanation: This fault is caused by "v6 /84 to /127 prefix entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316462: fltTcaEqptcapacityWideTcamPrefixEntries1qtrFabNormalizedTr

Severity: variable

Explanation: This fault is caused by "v6 /84 to /127 prefix entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316463: fltTcaEqptcapacityWideTcamPrefixEntries1yearFabNormalizedTr

Severity: variable

Explanation: This fault is caused by "v6 /84 to /127 prefix entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 /84 to /127 prefix entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316512: fltTcaEqptcapacityWideTcamPrefixEntries5minNormalizedLast

Severity: variable

Explanation: This fault is caused by "Deprecated.. current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316513: fltTcaEqptcapacityWideTcamPrefixEntries15minNormalizedLast

Severity: variable

Explanation: This fault is caused by "Deprecated.. current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316514: fltTcaEqptcapacityWideTcamPrefixEntries1hNormalizedLast

Severity: variable

Explanation: This fault is caused by "Deprecated.. current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316515: fltTcaEqptcapacityWideTcamPrefixEntries1dNormalizedLast

Severity: variable

Explanation: This fault is caused by "Deprecated.. current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316516: fltTcaEqptcapacityWideTcamPrefixEntries1wNormalizedLast

Severity: variable

Explanation: This fault is caused by "Deprecated.. current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316517: fltTcaEqptcapacityWideTcamPrefixEntries1moNormalizedLast

Severity: variable

Explanation: This fault is caused by "Deprecated.. current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316518: fltTcaEqptcapacityWideTcamPrefixEntries1qtrNormalizedLast

Severity: variable

Explanation: This fault is caused by "Deprecated.. current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316519: fltTcaEqptcapacityWideTcamPrefixEntries1yearNormalizedLast

Severity: variable

Explanation: This fault is caused by "Deprecated.. current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316520: fltTcaEqptcapacityWideTcamPrefixEntries5minNormalizedMin

Severity: variable

Explanation: This fault is caused by "Deprecated.. minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316521: fltTcaEqptcapacityWideTcamPrefixEntries15minNormalizedMin

Severity: variable

Explanation: This fault is caused by "Deprecated.. minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316522: fltTcaEqptcapacityWideTcamPrefixEntries1hNormalizedMin

Severity: variable

Explanation: This fault is caused by "Deprecated.. minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316523: fltTcaEqptcapacityWideTcamPrefixEntries1dNormalizedMin

Severity: variable

Explanation: This fault is caused by "Deprecated.. minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316524: fltTcaEqptcapacityWideTcamPrefixEntries1wNormalizedMin

Severity: variable

Explanation: This fault is caused by "Deprecated.. minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316525: fltTcaEqptcapacityWideTcamPrefixEntries1moNormalizedMin

Severity: variable

Explanation: This fault is caused by "Deprecated.. minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316526: fltTcaEqptcapacityWideTcamPrefixEntries1qtrNormalizedMin

Severity: variable

Explanation: This fault is caused by "Deprecated.. minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316527: fltTcaEqptcapacityWideTcamPrefixEntries1yearNormalizedMin

Severity: variable

Explanation: This fault is caused by "Deprecated.. minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316528: fltTcaEqptcapacityWideTcamPrefixEntries5minNormalizedMax

Severity: variable

Explanation: This fault is caused by "Deprecated.. maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316529: fltTcaEqptcapacityWideTcamPrefixEntries15minNormalizedMax

Severity: variable

Explanation: This fault is caused by "Deprecated.. maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316530: fltTcaEqptcapacityWideTcamPrefixEntries1hNormalizedMax

Severity: variable

Explanation: This fault is caused by "Deprecated.. maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316531: fltTcaEqptcapacityWideTcamPrefixEntries1dNormalizedMax

Severity: variable

Explanation: This fault is caused by "Deprecated.. maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316532: fltTcaEqptcapacityWideTcamPrefixEntries1wNormalizedMax

Severity: variable

Explanation: This fault is caused by "Deprecated.. maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316533: fltTcaEqptcapacityWideTcamPrefixEntries1moNormalizedMax

Severity: variable

Explanation: This fault is caused by "Deprecated.. maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316534: fltTcaEqptcapacityWideTcamPrefixEntries1qtrNormalizedMax

Severity: variable

Explanation: This fault is caused by "Deprecated.. maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316535: fltTcaEqptcapacityWideTcamPrefixEntries1yearNormalizedMax

Severity: variable

Explanation: This fault is caused by "Deprecated.. maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316536: fltTcaEqptcapacityWideTcamPrefixEntries5minNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Deprecated.. average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316537: fltTcaEqptcapacityWideTcamPrefixEntries15minNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Deprecated.. average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316538: fltTcaEqptcapacityWideTcamPrefixEntries1hNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Deprecated.. average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316539: fltTcaEqptcapacityWideTcamPrefixEntries1dNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Deprecated.. average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316540: fltTcaEqptcapacityWideTcamPrefixEntries1wNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Deprecated.. average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316541: fltTcaEqptcapacityWideTcamPrefixEntries1moNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Deprecated.. average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316542: fltTcaEqptcapacityWideTcamPrefixEntries1qtrNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Deprecated.. average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316543: fltTcaEqptcapacityWideTcamPrefixEntries1yearNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Deprecated.. average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316576: fltTcaEqptcapacityWideTcamPrefixEntries5minNormalizedTr

Severity: variable

Explanation: This fault is caused by "Deprecated.. trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316577: fltTcaEqptcapacityWideTcamPrefixEntries15minNormalizedTr

Severity: variable

Explanation: This fault is caused by "Deprecated.. trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316578: fltTcaEqptcapacityWideTcamPrefixEntries1hNormalizedTr

Severity: variable

Explanation: This fault is caused by "Deprecated.. trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316579: fltTcaEqptcapacityWideTcamPrefixEntries1dNormalizedTr

Severity: variable

Explanation: This fault is caused by "Deprecated.. trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316580: fltTcaEqptcapacityWideTcamPrefixEntries1wNormalizedTr

Severity: variable

Explanation: This fault is caused by "Deprecated.. trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316581: fltTcaEqptcapacityWideTcamPrefixEntries1moNormalizedTr

Severity: variable

Explanation: This fault is caused by "Deprecated.. trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316582: fltTcaEqptcapacityWideTcamPrefixEntries1qtrNormalizedTr

Severity: variable

Explanation: This fault is caused by "Deprecated.. trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F316583: fltTcaEqptcapacityWideTcamPrefixEntries1yearNormalizedTr

Severity: variable

Explanation: This fault is caused by "Deprecated.. trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Deprecated.." statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3180: fltAdepgRsSvrCertChainResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3181: fltAdepgRsSvrKeyRingResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3182: fltAuthRsSvrToMonPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3183: fltExtdevRsNicProfToDomPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3189: fltOpflexpVmmODevFaultInfoOperationalIssues

Severity: major

Explanation: This fault is raised when there is an operational issue with respect to the Opflex device

Recommended Action: If you see this fault, take the following actions:

1. From the fault description resolve the issue on the opflex device

2. If the above actions did not resolve the issue, collect avs-tech-support file and contact Cisco TAC.

F3190: fltOpflexpVmmODevFaultInfoMinorOperationalIssues

Severity: minor

Explanation: This fault is raised when there is an operational issue with respect to the Opflex device

Recommended Action: If you see this fault, take the following actions:

1. From the fault description resolve the issue on the opflex device

2. If the above actions did not resolve the issue, collect avs-tech-support file and contact Cisco TAC.

F3191: fltOpflexpVmmODevFaultInfoCriticalOperationalIssues

Severity: critical

Explanation: This fault is raised when there is an operational issue with respect to the Opflex device

Recommended Action: If you see this fault, take the following actions:

1. From the fault description resolve the issue on the opflex device

2. If the above actions did not resolve the issue, collect avs-tech-support file and contact Cisco TAC.

F3192: fltOpflexpVmmODevFaultInfoWarningOperationalIssues

Severity: warning

Explanation: This fault is raised when there is an operational issue with respect to the Opflex device

Recommended Action: If you see this fault, take the following actions:

1. From the fault description resolve the issue on the opflex device

2. If the above actions did not resolve the issue, collect avs-tech-support file and contact Cisco TAC.

F3193: fltOpflexpVmmIDEpFaultInfoOperationalIssues

Severity: major

Explanation: This fault is raised when there is an operational issue with respect to the OpFlex End Points.

Recommended Action: If you see this fault, take the following actions:

1. From the fault description resolve the issue for the end point

2. If the above actions did not resolve the issue, collect avs-tech-support file and contact Cisco TAC.

F3194: fltOpflexpVmmIDEpFaultInfoMinorOperationalIssues

Severity: minor

Explanation: This fault is raised when there is an operational issue with respect to the OpFlex End Points.

Recommended Action: If you see this fault, take the following actions:

1. From the fault description resolve the issue for the end point

2. If the above actions did not resolve the issue, collect avs-tech-support file and contact Cisco TAC.

F3195: fltOpflexpVmmIDEpFaultInfoCriticalOperationalIssues

Severity: critical

Explanation: This fault is raised when there is an operational issue with respect to the OpFlex End Points.

Recommended Action: If you see this fault, take the following actions:

1. From the fault description resolve the issue for the end point

2. If the above actions did not resolve the issue, collect avs-tech-support file and contact Cisco TAC.

F3196: fltOpflexpVmmIDEpFaultInfoWarningOperationalIssues

Severity: warning

Explanation: This fault is raised when there is an operational issue with respect to the OpFlex End Points.

Recommended Action: If you see this fault, take the following actions:

1. From the fault description resolve the issue for the end point

2. If the above actions did not resolve the issue, collect avs-tech-support file and contact Cisco TAC.

F3206: fltL2NodeAuthPolNodeAuthPolMisconfigured

Severity: minor

Explanation: This fault occurs when failed EPg or Vlan field is empty for l2NodeAuthPol

Recommended Action: If you see this fault, take the following actions:

1. Ensure both failed EPg and Vlan are set

F3208: fltEdmMgrConnectFailed

Severity: major

Explanation: This fault is raised when the APIC is unable to connect to the External Device. Recovery is in process.

Recommended Action: If you see this fault repeatedly, take the following actions:

1. Verify that there is network connectivity to External Device Manager.

2. Verify that the user credentials to External Device are correct.

3. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F3209: fltEdmMgrConfigFailed

Severity: major

Explanation: This fault is raised when the APIC is unable to connect to the External Device. Recovery is in process.

Recommended Action: If you see this fault repeatedly, take the following actions:

1. Verify that there is network connectivity to External Device Manager.

2. Verify that the user credentials to External Device are correct.

3. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F3210: fltEdmNicProfNicprofileMissing

Severity: minor

Explanation: This fault is raised when the NIC Profile has been configured but is not present on the External Device.

Recommended Action: If you see this fault, take the following actions:

1. Verify that the configured NIC Profile name and ID match the name and ID on the External Device.

2. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F3211: fltEdmUplinkProfUplinkprofMissing

Severity: minor

Explanation: This fault is raised when the Uplink Profile has been configured but is not present on the External Device.

Recommended Action: If you see this fault, take the following actions:

1. Verify that the configured Uplink Profile name and ID match the name and ID on the External Device.

2. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F3218: fltCloudsecIfCloudsecCfgCtrl

Severity: warning

Explanation: This fault is caused by a hardware programming failure

Recommended Action: The system will periodically retry to program the hardware. If the failure is due to lack of hardware resources, free up resources by removing or simplifying existing configuration. One of the reasons for lack of hardware resources is exhaustion of VLANs in ToR. These hardware resources can be examined by looking at capacity dashboard under OPERATIONS tab. Please check entry against the number of VLANs in output of command show vlan summary issued at node where fault is generated to check whether it exceeds above advertised node capacity.

F3219: fltCloudsecSaPeerCloudsecCfgCtrl

Severity: warning

Explanation: This fault is caused by a hardware programming failure

Recommended Action: The system will periodically retry to program the hardware. If the failure is due to lack of hardware resources, free up resources by removing or simplifying existing configuration. One of the reasons for lack of hardware resources is exhaustion of VLANs in ToR. These hardware resources can be examined by looking at capacity dashboard under OPERATIONS tab. Please check entry against the number of VLANs in output of command show vlan summary issued at node where fault is generated to check whether it exceeds above advertised node capacity.

F3220: fltCloudsecSaRxKeyCloudsecCfgCtrl

Severity: warning

Explanation: This fault is caused by a hardware programming failure

Recommended Action: The system will periodically retry to program the hardware. If the failure is due to lack of hardware resources, free up resources by removing or simplifying existing configuration. One of the reasons for lack of hardware resources is exhaustion of VLANs in ToR. These hardware resources can be examined by looking at capacity dashboard under OPERATIONS tab. Please check entry against the number of VLANs in output of command show vlan summary issued at node where fault is generated to check whether it exceeds above advertised node capacity.

F3221: fltCloudsecSaTxKeyCloudsecCfgCtrl

Severity: warning

Explanation: This fault is caused by a hardware programming failure

Recommended Action: The system will periodically retry to program the hardware. If the failure is due to lack of hardware resources, free up resources by removing or simplifying existing configuration. One of the reasons for lack of hardware resources is exhaustion of VLANs in ToR. These hardware resources can be examined by looking at capacity dashboard under OPERATIONS tab. Please check entry against the number of VLANs in output of command show vlan summary issued at node where fault is generated to check whether it exceeds above advertised node capacity.

F3222: fltIdentNsResourcePoolUsage

Severity: warning

Explanation: This fault occurs when any Vlan pool has been consumed to a limit.

Recommended Action: Create new pools to manage IDs

1. If you are still seeing this, create tech-support ticket and contact Cisco TAC

F3227: fltConfigpushTxContProcessingConfigurationChangeFailed

Severity: major

Explanation: This fault occurs when ACI fails processing an already accepted configuration change.

Recommended Action: If you see this fault, create a tech-support file and contact Cisco TAC

F3232: fltInfraReplicaSnapshotState

Severity: major

Explanation: This fault occurs when a controller reports snapshot for a given service did not succeed.

Recommended Action: If you see this fault, take the following actions:

1. Check cluster connectivity. All controllers need to be listed and reported as available.

2. Ensure that the cluster configuration is stable. Make note of any any frequent and brief interruptions of cluster availability or prolonged unavailability.

3. If any controllers are missing from the cluster, check if those controllers are accessible via other means like ssh.

4. Check for other faults related to cluster health and availability

5. If the above actions did not resolve the issue, create a tech-support file and contact Cisco TAC.

F3235: fltVnsCDevVmOp

Severity: minor

Explanation: This fault occurs when there service vm deployed using compute-orchestration is deleted from VCenter.

Recommended Action: If you see this fault, take the following actions:

1. Delete the concrete device(vns:CDev) and create a new one under same logical device(vns:LDevVip)

F3236: fltVnsRsLIfCtxToSvcEPgPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3238: fltVnsRsCDevTemplateToAddrInstResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3242: fltPoeIfPolVlanEncapNotPresent

Severity: warning

Explanation: This fault occurs when vlan and EPG for PoE policy is not configured together.

Recommended Action: Specify vlan encap and EPG for the PoE policy together

1. If you are still seeing this, create tech-support ticket and contact Cisco TAC

F324240: fltTcaEqptcapacityL2RemoteUsage5minRemoteEpCapLast

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324241: fltTcaEqptcapacityL2RemoteUsage15minRemoteEpCapLast

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324242: fltTcaEqptcapacityL2RemoteUsage1hRemoteEpCapLast

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324243: fltTcaEqptcapacityL2RemoteUsage1dRemoteEpCapLast

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324244: fltTcaEqptcapacityL2RemoteUsage1wRemoteEpCapLast

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324245: fltTcaEqptcapacityL2RemoteUsage1moRemoteEpCapLast

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324246: fltTcaEqptcapacityL2RemoteUsage1qtrRemoteEpCapLast

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324247: fltTcaEqptcapacityL2RemoteUsage1yearRemoteEpCapLast

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324272: fltTcaEqptcapacityL2RemoteUsage5minRemoteEpCapMin

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324273: fltTcaEqptcapacityL2RemoteUsage15minRemoteEpCapMin

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324274: fltTcaEqptcapacityL2RemoteUsage1hRemoteEpCapMin

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324275: fltTcaEqptcapacityL2RemoteUsage1dRemoteEpCapMin

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324276: fltTcaEqptcapacityL2RemoteUsage1wRemoteEpCapMin

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324277: fltTcaEqptcapacityL2RemoteUsage1moRemoteEpCapMin

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324278: fltTcaEqptcapacityL2RemoteUsage1qtrRemoteEpCapMin

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324279: fltTcaEqptcapacityL2RemoteUsage1yearRemoteEpCapMin

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324280: fltTcaEqptcapacityL2RemoteUsage5minRemoteEpCapMax

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324281: fltTcaEqptcapacityL2RemoteUsage15minRemoteEpCapMax

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324282: fltTcaEqptcapacityL2RemoteUsage1hRemoteEpCapMax

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324283: fltTcaEqptcapacityL2RemoteUsage1dRemoteEpCapMax

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324284: fltTcaEqptcapacityL2RemoteUsage1wRemoteEpCapMax

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324285: fltTcaEqptcapacityL2RemoteUsage1moRemoteEpCapMax

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324286: fltTcaEqptcapacityL2RemoteUsage1qtrRemoteEpCapMax

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324287: fltTcaEqptcapacityL2RemoteUsage1yearRemoteEpCapMax

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324288: fltTcaEqptcapacityL2RemoteUsage5minRemoteEpCapAvg

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324289: fltTcaEqptcapacityL2RemoteUsage15minRemoteEpCapAvg

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324290: fltTcaEqptcapacityL2RemoteUsage1hRemoteEpCapAvg

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324291: fltTcaEqptcapacityL2RemoteUsage1dRemoteEpCapAvg

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324292: fltTcaEqptcapacityL2RemoteUsage1wRemoteEpCapAvg

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324293: fltTcaEqptcapacityL2RemoteUsage1moRemoteEpCapAvg

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324294: fltTcaEqptcapacityL2RemoteUsage1qtrRemoteEpCapAvg

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324295: fltTcaEqptcapacityL2RemoteUsage1yearRemoteEpCapAvg

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3243: fltFvRsVmmVSwitchEnhancedLagPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F324320: fltTcaEqptcapacityL2RemoteUsage5minRemoteEpCapTr

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324321: fltTcaEqptcapacityL2RemoteUsage15minRemoteEpCapTr

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324322: fltTcaEqptcapacityL2RemoteUsage1hRemoteEpCapTr

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324323: fltTcaEqptcapacityL2RemoteUsage1dRemoteEpCapTr

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324324: fltTcaEqptcapacityL2RemoteUsage1wRemoteEpCapTr

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324325: fltTcaEqptcapacityL2RemoteUsage1moRemoteEpCapTr

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324326: fltTcaEqptcapacityL2RemoteUsage1qtrRemoteEpCapTr

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324327: fltTcaEqptcapacityL2RemoteUsage1yearRemoteEpCapTr

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3244: fltPoeRsPoeEpgResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F324408: fltTcaEqptcapacityL2RemoteUsage5minRemoteEpLast

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324409: fltTcaEqptcapacityL2RemoteUsage15minRemoteEpLast

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324410: fltTcaEqptcapacityL2RemoteUsage1hRemoteEpLast

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324411: fltTcaEqptcapacityL2RemoteUsage1dRemoteEpLast

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324412: fltTcaEqptcapacityL2RemoteUsage1wRemoteEpLast

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324413: fltTcaEqptcapacityL2RemoteUsage1moRemoteEpLast

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324414: fltTcaEqptcapacityL2RemoteUsage1qtrRemoteEpLast

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324415: fltTcaEqptcapacityL2RemoteUsage1yearRemoteEpLast

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324440: fltTcaEqptcapacityL2RemoteUsage5minRemoteEpMin

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324441: fltTcaEqptcapacityL2RemoteUsage15minRemoteEpMin

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324442: fltTcaEqptcapacityL2RemoteUsage1hRemoteEpMin

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324443: fltTcaEqptcapacityL2RemoteUsage1dRemoteEpMin

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324444: fltTcaEqptcapacityL2RemoteUsage1wRemoteEpMin

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324445: fltTcaEqptcapacityL2RemoteUsage1moRemoteEpMin

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324446: fltTcaEqptcapacityL2RemoteUsage1qtrRemoteEpMin

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324447: fltTcaEqptcapacityL2RemoteUsage1yearRemoteEpMin

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324448: fltTcaEqptcapacityL2RemoteUsage5minRemoteEpMax

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324449: fltTcaEqptcapacityL2RemoteUsage15minRemoteEpMax

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324450: fltTcaEqptcapacityL2RemoteUsage1hRemoteEpMax

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324451: fltTcaEqptcapacityL2RemoteUsage1dRemoteEpMax

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324452: fltTcaEqptcapacityL2RemoteUsage1wRemoteEpMax

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324453: fltTcaEqptcapacityL2RemoteUsage1moRemoteEpMax

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324454: fltTcaEqptcapacityL2RemoteUsage1qtrRemoteEpMax

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324455: fltTcaEqptcapacityL2RemoteUsage1yearRemoteEpMax

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324456: fltTcaEqptcapacityL2RemoteUsage5minRemoteEpAvg

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324457: fltTcaEqptcapacityL2RemoteUsage15minRemoteEpAvg

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324458: fltTcaEqptcapacityL2RemoteUsage1hRemoteEpAvg

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324459: fltTcaEqptcapacityL2RemoteUsage1dRemoteEpAvg

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324460: fltTcaEqptcapacityL2RemoteUsage1wRemoteEpAvg

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324461: fltTcaEqptcapacityL2RemoteUsage1moRemoteEpAvg

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324462: fltTcaEqptcapacityL2RemoteUsage1qtrRemoteEpAvg

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324463: fltTcaEqptcapacityL2RemoteUsage1yearRemoteEpAvg

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324488: fltTcaEqptcapacityL2RemoteUsage5minRemoteEpTr

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324489: fltTcaEqptcapacityL2RemoteUsage15minRemoteEpTr

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324490: fltTcaEqptcapacityL2RemoteUsage1hRemoteEpTr

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324491: fltTcaEqptcapacityL2RemoteUsage1dRemoteEpTr

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324492: fltTcaEqptcapacityL2RemoteUsage1wRemoteEpTr

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324493: fltTcaEqptcapacityL2RemoteUsage1moRemoteEpTr

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324494: fltTcaEqptcapacityL2RemoteUsage1qtrRemoteEpTr

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324495: fltTcaEqptcapacityL2RemoteUsage1yearRemoteEpTr

Severity: variable

Explanation: This fault is caused by "Remote L2 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3245: fltVmmRsPrefEnhancedLagPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F324576: fltTcaEqptcapacityL2RemoteUsage5minRemoteNormalizedLast

Severity: variable

Explanation: This fault is caused by "Remote L2 entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324577: fltTcaEqptcapacityL2RemoteUsage15minRemoteNormalizedLast

Severity: variable

Explanation: This fault is caused by "Remote L2 entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324578: fltTcaEqptcapacityL2RemoteUsage1hRemoteNormalizedLast

Severity: variable

Explanation: This fault is caused by "Remote L2 entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324579: fltTcaEqptcapacityL2RemoteUsage1dRemoteNormalizedLast

Severity: variable

Explanation: This fault is caused by "Remote L2 entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324580: fltTcaEqptcapacityL2RemoteUsage1wRemoteNormalizedLast

Severity: variable

Explanation: This fault is caused by "Remote L2 entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324581: fltTcaEqptcapacityL2RemoteUsage1moRemoteNormalizedLast

Severity: variable

Explanation: This fault is caused by "Remote L2 entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324582: fltTcaEqptcapacityL2RemoteUsage1qtrRemoteNormalizedLast

Severity: variable

Explanation: This fault is caused by "Remote L2 entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324583: fltTcaEqptcapacityL2RemoteUsage1yearRemoteNormalizedLast

Severity: variable

Explanation: This fault is caused by "Remote L2 entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324584: fltTcaEqptcapacityL2RemoteUsage5minRemoteNormalizedMin

Severity: variable

Explanation: This fault is caused by "Remote L2 entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324585: fltTcaEqptcapacityL2RemoteUsage15minRemoteNormalizedMin

Severity: variable

Explanation: This fault is caused by "Remote L2 entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324586: fltTcaEqptcapacityL2RemoteUsage1hRemoteNormalizedMin

Severity: variable

Explanation: This fault is caused by "Remote L2 entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324587: fltTcaEqptcapacityL2RemoteUsage1dRemoteNormalizedMin

Severity: variable

Explanation: This fault is caused by "Remote L2 entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324588: fltTcaEqptcapacityL2RemoteUsage1wRemoteNormalizedMin

Severity: variable

Explanation: This fault is caused by "Remote L2 entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324589: fltTcaEqptcapacityL2RemoteUsage1moRemoteNormalizedMin

Severity: variable

Explanation: This fault is caused by "Remote L2 entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324590: fltTcaEqptcapacityL2RemoteUsage1qtrRemoteNormalizedMin

Severity: variable

Explanation: This fault is caused by "Remote L2 entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324591: fltTcaEqptcapacityL2RemoteUsage1yearRemoteNormalizedMin

Severity: variable

Explanation: This fault is caused by "Remote L2 entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324592: fltTcaEqptcapacityL2RemoteUsage5minRemoteNormalizedMax

Severity: variable

Explanation: This fault is caused by "Remote L2 entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324593: fltTcaEqptcapacityL2RemoteUsage15minRemoteNormalizedMax

Severity: variable

Explanation: This fault is caused by "Remote L2 entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324594: fltTcaEqptcapacityL2RemoteUsage1hRemoteNormalizedMax

Severity: variable

Explanation: This fault is caused by "Remote L2 entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324595: fltTcaEqptcapacityL2RemoteUsage1dRemoteNormalizedMax

Severity: variable

Explanation: This fault is caused by "Remote L2 entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324596: fltTcaEqptcapacityL2RemoteUsage1wRemoteNormalizedMax

Severity: variable

Explanation: This fault is caused by "Remote L2 entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324597: fltTcaEqptcapacityL2RemoteUsage1moRemoteNormalizedMax

Severity: variable

Explanation: This fault is caused by "Remote L2 entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324598: fltTcaEqptcapacityL2RemoteUsage1qtrRemoteNormalizedMax

Severity: variable

Explanation: This fault is caused by "Remote L2 entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324599: fltTcaEqptcapacityL2RemoteUsage1yearRemoteNormalizedMax

Severity: variable

Explanation: This fault is caused by "Remote L2 entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324600: fltTcaEqptcapacityL2RemoteUsage5minRemoteNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Remote L2 entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324601: fltTcaEqptcapacityL2RemoteUsage15minRemoteNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Remote L2 entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324602: fltTcaEqptcapacityL2RemoteUsage1hRemoteNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Remote L2 entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324603: fltTcaEqptcapacityL2RemoteUsage1dRemoteNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Remote L2 entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324604: fltTcaEqptcapacityL2RemoteUsage1wRemoteNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Remote L2 entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324605: fltTcaEqptcapacityL2RemoteUsage1moRemoteNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Remote L2 entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324606: fltTcaEqptcapacityL2RemoteUsage1qtrRemoteNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Remote L2 entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324607: fltTcaEqptcapacityL2RemoteUsage1yearRemoteNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Remote L2 entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324640: fltTcaEqptcapacityL2RemoteUsage5minRemoteNormalizedTr

Severity: variable

Explanation: This fault is caused by "Remote L2 entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324641: fltTcaEqptcapacityL2RemoteUsage15minRemoteNormalizedTr

Severity: variable

Explanation: This fault is caused by "Remote L2 entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324642: fltTcaEqptcapacityL2RemoteUsage1hRemoteNormalizedTr

Severity: variable

Explanation: This fault is caused by "Remote L2 entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324643: fltTcaEqptcapacityL2RemoteUsage1dRemoteNormalizedTr

Severity: variable

Explanation: This fault is caused by "Remote L2 entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324644: fltTcaEqptcapacityL2RemoteUsage1wRemoteNormalizedTr

Severity: variable

Explanation: This fault is caused by "Remote L2 entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324645: fltTcaEqptcapacityL2RemoteUsage1moRemoteNormalizedTr

Severity: variable

Explanation: This fault is caused by "Remote L2 entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324646: fltTcaEqptcapacityL2RemoteUsage1qtrRemoteNormalizedTr

Severity: variable

Explanation: This fault is caused by "Remote L2 entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324647: fltTcaEqptcapacityL2RemoteUsage1yearRemoteNormalizedTr

Severity: variable

Explanation: This fault is caused by "Remote L2 entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324696: fltTcaEqptcapacityL2TotalUsage5minTotalEpCapLast

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324697: fltTcaEqptcapacityL2TotalUsage15minTotalEpCapLast

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324698: fltTcaEqptcapacityL2TotalUsage1hTotalEpCapLast

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324699: fltTcaEqptcapacityL2TotalUsage1dTotalEpCapLast

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3247: fltCloudsecCapabilityLocalConfIssue

Severity: minor

Explanation: This fault occurs due to missing PSK in cloudsec Interface Policy.

Recommended Action: If you see this fault, please fix the cloudsec Interface Policy configuraiton.

F324700: fltTcaEqptcapacityL2TotalUsage1wTotalEpCapLast

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324701: fltTcaEqptcapacityL2TotalUsage1moTotalEpCapLast

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324702: fltTcaEqptcapacityL2TotalUsage1qtrTotalEpCapLast

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324703: fltTcaEqptcapacityL2TotalUsage1yearTotalEpCapLast

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324728: fltTcaEqptcapacityL2TotalUsage5minTotalEpCapMin

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324729: fltTcaEqptcapacityL2TotalUsage15minTotalEpCapMin

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324730: fltTcaEqptcapacityL2TotalUsage1hTotalEpCapMin

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324731: fltTcaEqptcapacityL2TotalUsage1dTotalEpCapMin

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324732: fltTcaEqptcapacityL2TotalUsage1wTotalEpCapMin

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324733: fltTcaEqptcapacityL2TotalUsage1moTotalEpCapMin

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324734: fltTcaEqptcapacityL2TotalUsage1qtrTotalEpCapMin

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324735: fltTcaEqptcapacityL2TotalUsage1yearTotalEpCapMin

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324736: fltTcaEqptcapacityL2TotalUsage5minTotalEpCapMax

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324737: fltTcaEqptcapacityL2TotalUsage15minTotalEpCapMax

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324738: fltTcaEqptcapacityL2TotalUsage1hTotalEpCapMax

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324739: fltTcaEqptcapacityL2TotalUsage1dTotalEpCapMax

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324740: fltTcaEqptcapacityL2TotalUsage1wTotalEpCapMax

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324741: fltTcaEqptcapacityL2TotalUsage1moTotalEpCapMax

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324742: fltTcaEqptcapacityL2TotalUsage1qtrTotalEpCapMax

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324743: fltTcaEqptcapacityL2TotalUsage1yearTotalEpCapMax

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324744: fltTcaEqptcapacityL2TotalUsage5minTotalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324745: fltTcaEqptcapacityL2TotalUsage15minTotalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324746: fltTcaEqptcapacityL2TotalUsage1hTotalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324747: fltTcaEqptcapacityL2TotalUsage1dTotalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324748: fltTcaEqptcapacityL2TotalUsage1wTotalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324749: fltTcaEqptcapacityL2TotalUsage1moTotalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324750: fltTcaEqptcapacityL2TotalUsage1qtrTotalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324751: fltTcaEqptcapacityL2TotalUsage1yearTotalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324776: fltTcaEqptcapacityL2TotalUsage5minTotalEpCapTr

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324777: fltTcaEqptcapacityL2TotalUsage15minTotalEpCapTr

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324778: fltTcaEqptcapacityL2TotalUsage1hTotalEpCapTr

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324779: fltTcaEqptcapacityL2TotalUsage1dTotalEpCapTr

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324780: fltTcaEqptcapacityL2TotalUsage1wTotalEpCapTr

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324781: fltTcaEqptcapacityL2TotalUsage1moTotalEpCapTr

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324782: fltTcaEqptcapacityL2TotalUsage1qtrTotalEpCapTr

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324783: fltTcaEqptcapacityL2TotalUsage1yearTotalEpCapTr

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3248: fltL1FcIfFcPortUnsupportedConfig

Severity: warning

Explanation: This fault occurs when user tries to configure unsupported configuration for FC ports

Recommended Action: To recover from this fault, correct the FC port configuration

F324864: fltTcaEqptcapacityL2TotalUsage5minTotalEpLast

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324865: fltTcaEqptcapacityL2TotalUsage15minTotalEpLast

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324866: fltTcaEqptcapacityL2TotalUsage1hTotalEpLast

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324867: fltTcaEqptcapacityL2TotalUsage1dTotalEpLast

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324868: fltTcaEqptcapacityL2TotalUsage1wTotalEpLast

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324869: fltTcaEqptcapacityL2TotalUsage1moTotalEpLast

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324870: fltTcaEqptcapacityL2TotalUsage1qtrTotalEpLast

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324871: fltTcaEqptcapacityL2TotalUsage1yearTotalEpLast

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324896: fltTcaEqptcapacityL2TotalUsage5minTotalEpMin

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324897: fltTcaEqptcapacityL2TotalUsage15minTotalEpMin

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324898: fltTcaEqptcapacityL2TotalUsage1hTotalEpMin

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324899: fltTcaEqptcapacityL2TotalUsage1dTotalEpMin

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324900: fltTcaEqptcapacityL2TotalUsage1wTotalEpMin

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324901: fltTcaEqptcapacityL2TotalUsage1moTotalEpMin

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324902: fltTcaEqptcapacityL2TotalUsage1qtrTotalEpMin

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324903: fltTcaEqptcapacityL2TotalUsage1yearTotalEpMin

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324904: fltTcaEqptcapacityL2TotalUsage5minTotalEpMax

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324905: fltTcaEqptcapacityL2TotalUsage15minTotalEpMax

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324906: fltTcaEqptcapacityL2TotalUsage1hTotalEpMax

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324907: fltTcaEqptcapacityL2TotalUsage1dTotalEpMax

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324908: fltTcaEqptcapacityL2TotalUsage1wTotalEpMax

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324909: fltTcaEqptcapacityL2TotalUsage1moTotalEpMax

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324910: fltTcaEqptcapacityL2TotalUsage1qtrTotalEpMax

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324911: fltTcaEqptcapacityL2TotalUsage1yearTotalEpMax

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324912: fltTcaEqptcapacityL2TotalUsage5minTotalEpAvg

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324913: fltTcaEqptcapacityL2TotalUsage15minTotalEpAvg

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324914: fltTcaEqptcapacityL2TotalUsage1hTotalEpAvg

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324915: fltTcaEqptcapacityL2TotalUsage1dTotalEpAvg

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324916: fltTcaEqptcapacityL2TotalUsage1wTotalEpAvg

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324917: fltTcaEqptcapacityL2TotalUsage1moTotalEpAvg

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324918: fltTcaEqptcapacityL2TotalUsage1qtrTotalEpAvg

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324919: fltTcaEqptcapacityL2TotalUsage1yearTotalEpAvg

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324944: fltTcaEqptcapacityL2TotalUsage5minTotalEpTr

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324945: fltTcaEqptcapacityL2TotalUsage15minTotalEpTr

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324946: fltTcaEqptcapacityL2TotalUsage1hTotalEpTr

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324947: fltTcaEqptcapacityL2TotalUsage1dTotalEpTr

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324948: fltTcaEqptcapacityL2TotalUsage1wTotalEpTr

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324949: fltTcaEqptcapacityL2TotalUsage1moTotalEpTr

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324950: fltTcaEqptcapacityL2TotalUsage1qtrTotalEpTr

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F324951: fltTcaEqptcapacityL2TotalUsage1yearTotalEpTr

Severity: variable

Explanation: This fault is caused by "Total L2 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3250: fltLicenseManagerDLCTimeout

Severity: major

Explanation: This fault is raised when the Claim Device Licenses operation is timeout after 5 minutes.

Recommended Action: If you see this fault, take the following actions:

1. Log on CSSM (Cisco Smart Software Manager) and check if DLC (Device Led Conversion) is enabled on your smart account and/or virtual account. If not, enable DLC on your smart account and/or virtual account. Then, log on APIC GUI and trigger "Claim Device Licenses" again.

F325032: fltTcaEqptcapacityL2TotalUsage5minTotalNormalizedLast

Severity: variable

Explanation: This fault is caused by "Total L2 entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325033: fltTcaEqptcapacityL2TotalUsage15minTotalNormalizedLast

Severity: variable

Explanation: This fault is caused by "Total L2 entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325034: fltTcaEqptcapacityL2TotalUsage1hTotalNormalizedLast

Severity: variable

Explanation: This fault is caused by "Total L2 entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325035: fltTcaEqptcapacityL2TotalUsage1dTotalNormalizedLast

Severity: variable

Explanation: This fault is caused by "Total L2 entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325036: fltTcaEqptcapacityL2TotalUsage1wTotalNormalizedLast

Severity: variable

Explanation: This fault is caused by "Total L2 entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325037: fltTcaEqptcapacityL2TotalUsage1moTotalNormalizedLast

Severity: variable

Explanation: This fault is caused by "Total L2 entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325038: fltTcaEqptcapacityL2TotalUsage1qtrTotalNormalizedLast

Severity: variable

Explanation: This fault is caused by "Total L2 entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325039: fltTcaEqptcapacityL2TotalUsage1yearTotalNormalizedLast

Severity: variable

Explanation: This fault is caused by "Total L2 entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325040: fltTcaEqptcapacityL2TotalUsage5minTotalNormalizedMin

Severity: variable

Explanation: This fault is caused by "Total L2 entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325041: fltTcaEqptcapacityL2TotalUsage15minTotalNormalizedMin

Severity: variable

Explanation: This fault is caused by "Total L2 entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325042: fltTcaEqptcapacityL2TotalUsage1hTotalNormalizedMin

Severity: variable

Explanation: This fault is caused by "Total L2 entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325043: fltTcaEqptcapacityL2TotalUsage1dTotalNormalizedMin

Severity: variable

Explanation: This fault is caused by "Total L2 entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325044: fltTcaEqptcapacityL2TotalUsage1wTotalNormalizedMin

Severity: variable

Explanation: This fault is caused by "Total L2 entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325045: fltTcaEqptcapacityL2TotalUsage1moTotalNormalizedMin

Severity: variable

Explanation: This fault is caused by "Total L2 entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325046: fltTcaEqptcapacityL2TotalUsage1qtrTotalNormalizedMin

Severity: variable

Explanation: This fault is caused by "Total L2 entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325047: fltTcaEqptcapacityL2TotalUsage1yearTotalNormalizedMin

Severity: variable

Explanation: This fault is caused by "Total L2 entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325048: fltTcaEqptcapacityL2TotalUsage5minTotalNormalizedMax

Severity: variable

Explanation: This fault is caused by "Total L2 entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325049: fltTcaEqptcapacityL2TotalUsage15minTotalNormalizedMax

Severity: variable

Explanation: This fault is caused by "Total L2 entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325050: fltTcaEqptcapacityL2TotalUsage1hTotalNormalizedMax

Severity: variable

Explanation: This fault is caused by "Total L2 entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325051: fltTcaEqptcapacityL2TotalUsage1dTotalNormalizedMax

Severity: variable

Explanation: This fault is caused by "Total L2 entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325052: fltTcaEqptcapacityL2TotalUsage1wTotalNormalizedMax

Severity: variable

Explanation: This fault is caused by "Total L2 entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325053: fltTcaEqptcapacityL2TotalUsage1moTotalNormalizedMax

Severity: variable

Explanation: This fault is caused by "Total L2 entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325054: fltTcaEqptcapacityL2TotalUsage1qtrTotalNormalizedMax

Severity: variable

Explanation: This fault is caused by "Total L2 entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325055: fltTcaEqptcapacityL2TotalUsage1yearTotalNormalizedMax

Severity: variable

Explanation: This fault is caused by "Total L2 entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325056: fltTcaEqptcapacityL2TotalUsage5minTotalNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Total L2 entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325057: fltTcaEqptcapacityL2TotalUsage15minTotalNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Total L2 entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325058: fltTcaEqptcapacityL2TotalUsage1hTotalNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Total L2 entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325059: fltTcaEqptcapacityL2TotalUsage1dTotalNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Total L2 entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325060: fltTcaEqptcapacityL2TotalUsage1wTotalNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Total L2 entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325061: fltTcaEqptcapacityL2TotalUsage1moTotalNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Total L2 entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325062: fltTcaEqptcapacityL2TotalUsage1qtrTotalNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Total L2 entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325063: fltTcaEqptcapacityL2TotalUsage1yearTotalNormalizedAvg

Severity: variable

Explanation: This fault is caused by "Total L2 entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325096: fltTcaEqptcapacityL2TotalUsage5minTotalNormalizedTr

Severity: variable

Explanation: This fault is caused by "Total L2 entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325097: fltTcaEqptcapacityL2TotalUsage15minTotalNormalizedTr

Severity: variable

Explanation: This fault is caused by "Total L2 entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325098: fltTcaEqptcapacityL2TotalUsage1hTotalNormalizedTr

Severity: variable

Explanation: This fault is caused by "Total L2 entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325099: fltTcaEqptcapacityL2TotalUsage1dTotalNormalizedTr

Severity: variable

Explanation: This fault is caused by "Total L2 entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325100: fltTcaEqptcapacityL2TotalUsage1wTotalNormalizedTr

Severity: variable

Explanation: This fault is caused by "Total L2 entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325101: fltTcaEqptcapacityL2TotalUsage1moTotalNormalizedTr

Severity: variable

Explanation: This fault is caused by "Total L2 entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325102: fltTcaEqptcapacityL2TotalUsage1qtrTotalNormalizedTr

Severity: variable

Explanation: This fault is caused by "Total L2 entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325103: fltTcaEqptcapacityL2TotalUsage1yearTotalNormalizedTr

Severity: variable

Explanation: This fault is caused by "Total L2 entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L2 entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325152: fltTcaEqptcapacityL3RemoteUsage5minV4RemoteEpLast

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325153: fltTcaEqptcapacityL3RemoteUsage15minV4RemoteEpLast

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325154: fltTcaEqptcapacityL3RemoteUsage1hV4RemoteEpLast

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325155: fltTcaEqptcapacityL3RemoteUsage1dV4RemoteEpLast

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325156: fltTcaEqptcapacityL3RemoteUsage1wV4RemoteEpLast

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325157: fltTcaEqptcapacityL3RemoteUsage1moV4RemoteEpLast

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325158: fltTcaEqptcapacityL3RemoteUsage1qtrV4RemoteEpLast

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325159: fltTcaEqptcapacityL3RemoteUsage1yearV4RemoteEpLast

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325184: fltTcaEqptcapacityL3RemoteUsage5minV4RemoteEpMin

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325185: fltTcaEqptcapacityL3RemoteUsage15minV4RemoteEpMin

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325186: fltTcaEqptcapacityL3RemoteUsage1hV4RemoteEpMin

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325187: fltTcaEqptcapacityL3RemoteUsage1dV4RemoteEpMin

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325188: fltTcaEqptcapacityL3RemoteUsage1wV4RemoteEpMin

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325189: fltTcaEqptcapacityL3RemoteUsage1moV4RemoteEpMin

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325190: fltTcaEqptcapacityL3RemoteUsage1qtrV4RemoteEpMin

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325191: fltTcaEqptcapacityL3RemoteUsage1yearV4RemoteEpMin

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325192: fltTcaEqptcapacityL3RemoteUsage5minV4RemoteEpMax

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325193: fltTcaEqptcapacityL3RemoteUsage15minV4RemoteEpMax

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325194: fltTcaEqptcapacityL3RemoteUsage1hV4RemoteEpMax

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325195: fltTcaEqptcapacityL3RemoteUsage1dV4RemoteEpMax

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325196: fltTcaEqptcapacityL3RemoteUsage1wV4RemoteEpMax

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325197: fltTcaEqptcapacityL3RemoteUsage1moV4RemoteEpMax

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325198: fltTcaEqptcapacityL3RemoteUsage1qtrV4RemoteEpMax

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325199: fltTcaEqptcapacityL3RemoteUsage1yearV4RemoteEpMax

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325200: fltTcaEqptcapacityL3RemoteUsage5minV4RemoteEpAvg

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325201: fltTcaEqptcapacityL3RemoteUsage15minV4RemoteEpAvg

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325202: fltTcaEqptcapacityL3RemoteUsage1hV4RemoteEpAvg

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325203: fltTcaEqptcapacityL3RemoteUsage1dV4RemoteEpAvg

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325204: fltTcaEqptcapacityL3RemoteUsage1wV4RemoteEpAvg

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325205: fltTcaEqptcapacityL3RemoteUsage1moV4RemoteEpAvg

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325206: fltTcaEqptcapacityL3RemoteUsage1qtrV4RemoteEpAvg

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325207: fltTcaEqptcapacityL3RemoteUsage1yearV4RemoteEpAvg

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325232: fltTcaEqptcapacityL3RemoteUsage5minV4RemoteEpTr

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325233: fltTcaEqptcapacityL3RemoteUsage15minV4RemoteEpTr

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325234: fltTcaEqptcapacityL3RemoteUsage1hV4RemoteEpTr

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325235: fltTcaEqptcapacityL3RemoteUsage1dV4RemoteEpTr

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325236: fltTcaEqptcapacityL3RemoteUsage1wV4RemoteEpTr

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325237: fltTcaEqptcapacityL3RemoteUsage1moV4RemoteEpTr

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325238: fltTcaEqptcapacityL3RemoteUsage1qtrV4RemoteEpTr

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325239: fltTcaEqptcapacityL3RemoteUsage1yearV4RemoteEpTr

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325320: fltTcaEqptcapacityL3RemoteUsage5minV6RemoteEpLast

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325321: fltTcaEqptcapacityL3RemoteUsage15minV6RemoteEpLast

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325322: fltTcaEqptcapacityL3RemoteUsage1hV6RemoteEpLast

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325323: fltTcaEqptcapacityL3RemoteUsage1dV6RemoteEpLast

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325324: fltTcaEqptcapacityL3RemoteUsage1wV6RemoteEpLast

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325325: fltTcaEqptcapacityL3RemoteUsage1moV6RemoteEpLast

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325326: fltTcaEqptcapacityL3RemoteUsage1qtrV6RemoteEpLast

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325327: fltTcaEqptcapacityL3RemoteUsage1yearV6RemoteEpLast

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325352: fltTcaEqptcapacityL3RemoteUsage5minV6RemoteEpMin

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325353: fltTcaEqptcapacityL3RemoteUsage15minV6RemoteEpMin

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325354: fltTcaEqptcapacityL3RemoteUsage1hV6RemoteEpMin

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325355: fltTcaEqptcapacityL3RemoteUsage1dV6RemoteEpMin

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325356: fltTcaEqptcapacityL3RemoteUsage1wV6RemoteEpMin

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325357: fltTcaEqptcapacityL3RemoteUsage1moV6RemoteEpMin

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325358: fltTcaEqptcapacityL3RemoteUsage1qtrV6RemoteEpMin

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325359: fltTcaEqptcapacityL3RemoteUsage1yearV6RemoteEpMin

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325360: fltTcaEqptcapacityL3RemoteUsage5minV6RemoteEpMax

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325361: fltTcaEqptcapacityL3RemoteUsage15minV6RemoteEpMax

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325362: fltTcaEqptcapacityL3RemoteUsage1hV6RemoteEpMax

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325363: fltTcaEqptcapacityL3RemoteUsage1dV6RemoteEpMax

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325364: fltTcaEqptcapacityL3RemoteUsage1wV6RemoteEpMax

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325365: fltTcaEqptcapacityL3RemoteUsage1moV6RemoteEpMax

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325366: fltTcaEqptcapacityL3RemoteUsage1qtrV6RemoteEpMax

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325367: fltTcaEqptcapacityL3RemoteUsage1yearV6RemoteEpMax

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325368: fltTcaEqptcapacityL3RemoteUsage5minV6RemoteEpAvg

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325369: fltTcaEqptcapacityL3RemoteUsage15minV6RemoteEpAvg

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325370: fltTcaEqptcapacityL3RemoteUsage1hV6RemoteEpAvg

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325371: fltTcaEqptcapacityL3RemoteUsage1dV6RemoteEpAvg

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325372: fltTcaEqptcapacityL3RemoteUsage1wV6RemoteEpAvg

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325373: fltTcaEqptcapacityL3RemoteUsage1moV6RemoteEpAvg

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325374: fltTcaEqptcapacityL3RemoteUsage1qtrV6RemoteEpAvg

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325375: fltTcaEqptcapacityL3RemoteUsage1yearV6RemoteEpAvg

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3254: fltApPluginPluginHealthNotOk

Severity: minor

Explanation: Plugin health is not OK.

Recommended Action: If you see this fault, please raise a TAC case. Uninstall/Install App may help resolve the issue.

F325400: fltTcaEqptcapacityL3RemoteUsage5minV6RemoteEpTr

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325401: fltTcaEqptcapacityL3RemoteUsage15minV6RemoteEpTr

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325402: fltTcaEqptcapacityL3RemoteUsage1hV6RemoteEpTr

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325403: fltTcaEqptcapacityL3RemoteUsage1dV6RemoteEpTr

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325404: fltTcaEqptcapacityL3RemoteUsage1wV6RemoteEpTr

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325405: fltTcaEqptcapacityL3RemoteUsage1moV6RemoteEpTr

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325406: fltTcaEqptcapacityL3RemoteUsage1qtrV6RemoteEpTr

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325407: fltTcaEqptcapacityL3RemoteUsage1yearV6RemoteEpTr

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325488: fltTcaEqptcapacityL3RemoteUsageCap5minV4RemoteEpCapLast

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325489: fltTcaEqptcapacityL3RemoteUsageCap15minV4RemoteEpCapLast

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325490: fltTcaEqptcapacityL3RemoteUsageCap1hV4RemoteEpCapLast

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325491: fltTcaEqptcapacityL3RemoteUsageCap1dV4RemoteEpCapLast

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325492: fltTcaEqptcapacityL3RemoteUsageCap1wV4RemoteEpCapLast

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325493: fltTcaEqptcapacityL3RemoteUsageCap1moV4RemoteEpCapLast

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325494: fltTcaEqptcapacityL3RemoteUsageCap1qtrV4RemoteEpCapLast

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325495: fltTcaEqptcapacityL3RemoteUsageCap1yearV4RemoteEpCapLast

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3255: fltFvAbsDefDciSubsCollided

Severity: major

Explanation: This fault occurs when same PC Tag value is used for more than one instances of a class.

Recommended Action: If you see this fault, push the corresponding schema again from Multi-Site Controller.

F325520: fltTcaEqptcapacityL3RemoteUsageCap5minV4RemoteEpCapMin

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325521: fltTcaEqptcapacityL3RemoteUsageCap15minV4RemoteEpCapMin

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325522: fltTcaEqptcapacityL3RemoteUsageCap1hV4RemoteEpCapMin

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325523: fltTcaEqptcapacityL3RemoteUsageCap1dV4RemoteEpCapMin

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325524: fltTcaEqptcapacityL3RemoteUsageCap1wV4RemoteEpCapMin

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325525: fltTcaEqptcapacityL3RemoteUsageCap1moV4RemoteEpCapMin

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325526: fltTcaEqptcapacityL3RemoteUsageCap1qtrV4RemoteEpCapMin

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325527: fltTcaEqptcapacityL3RemoteUsageCap1yearV4RemoteEpCapMin

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325528: fltTcaEqptcapacityL3RemoteUsageCap5minV4RemoteEpCapMax

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325529: fltTcaEqptcapacityL3RemoteUsageCap15minV4RemoteEpCapMax

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325530: fltTcaEqptcapacityL3RemoteUsageCap1hV4RemoteEpCapMax

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325531: fltTcaEqptcapacityL3RemoteUsageCap1dV4RemoteEpCapMax

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325532: fltTcaEqptcapacityL3RemoteUsageCap1wV4RemoteEpCapMax

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325533: fltTcaEqptcapacityL3RemoteUsageCap1moV4RemoteEpCapMax

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325534: fltTcaEqptcapacityL3RemoteUsageCap1qtrV4RemoteEpCapMax

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325535: fltTcaEqptcapacityL3RemoteUsageCap1yearV4RemoteEpCapMax

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325536: fltTcaEqptcapacityL3RemoteUsageCap5minV4RemoteEpCapAvg

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325537: fltTcaEqptcapacityL3RemoteUsageCap15minV4RemoteEpCapAvg

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325538: fltTcaEqptcapacityL3RemoteUsageCap1hV4RemoteEpCapAvg

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325539: fltTcaEqptcapacityL3RemoteUsageCap1dV4RemoteEpCapAvg

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325540: fltTcaEqptcapacityL3RemoteUsageCap1wV4RemoteEpCapAvg

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325541: fltTcaEqptcapacityL3RemoteUsageCap1moV4RemoteEpCapAvg

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325542: fltTcaEqptcapacityL3RemoteUsageCap1qtrV4RemoteEpCapAvg

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325543: fltTcaEqptcapacityL3RemoteUsageCap1yearV4RemoteEpCapAvg

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325568: fltTcaEqptcapacityL3RemoteUsageCap5minV4RemoteEpCapTr

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325569: fltTcaEqptcapacityL3RemoteUsageCap15minV4RemoteEpCapTr

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325570: fltTcaEqptcapacityL3RemoteUsageCap1hV4RemoteEpCapTr

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325571: fltTcaEqptcapacityL3RemoteUsageCap1dV4RemoteEpCapTr

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325572: fltTcaEqptcapacityL3RemoteUsageCap1wV4RemoteEpCapTr

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325573: fltTcaEqptcapacityL3RemoteUsageCap1moV4RemoteEpCapTr

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325574: fltTcaEqptcapacityL3RemoteUsageCap1qtrV4RemoteEpCapTr

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325575: fltTcaEqptcapacityL3RemoteUsageCap1yearV4RemoteEpCapTr

Severity: variable

Explanation: This fault is caused by "Remote v4 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325656: fltTcaEqptcapacityL3RemoteUsageCap5minV6RemoteEpCapLast

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325657: fltTcaEqptcapacityL3RemoteUsageCap15minV6RemoteEpCapLast

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325658: fltTcaEqptcapacityL3RemoteUsageCap1hV6RemoteEpCapLast

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325659: fltTcaEqptcapacityL3RemoteUsageCap1dV6RemoteEpCapLast

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325660: fltTcaEqptcapacityL3RemoteUsageCap1wV6RemoteEpCapLast

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325661: fltTcaEqptcapacityL3RemoteUsageCap1moV6RemoteEpCapLast

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325662: fltTcaEqptcapacityL3RemoteUsageCap1qtrV6RemoteEpCapLast

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325663: fltTcaEqptcapacityL3RemoteUsageCap1yearV6RemoteEpCapLast

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325688: fltTcaEqptcapacityL3RemoteUsageCap5minV6RemoteEpCapMin

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325689: fltTcaEqptcapacityL3RemoteUsageCap15minV6RemoteEpCapMin

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325690: fltTcaEqptcapacityL3RemoteUsageCap1hV6RemoteEpCapMin

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325691: fltTcaEqptcapacityL3RemoteUsageCap1dV6RemoteEpCapMin

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325692: fltTcaEqptcapacityL3RemoteUsageCap1wV6RemoteEpCapMin

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325693: fltTcaEqptcapacityL3RemoteUsageCap1moV6RemoteEpCapMin

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325694: fltTcaEqptcapacityL3RemoteUsageCap1qtrV6RemoteEpCapMin

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325695: fltTcaEqptcapacityL3RemoteUsageCap1yearV6RemoteEpCapMin

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325696: fltTcaEqptcapacityL3RemoteUsageCap5minV6RemoteEpCapMax

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325697: fltTcaEqptcapacityL3RemoteUsageCap15minV6RemoteEpCapMax

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325698: fltTcaEqptcapacityL3RemoteUsageCap1hV6RemoteEpCapMax

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325699: fltTcaEqptcapacityL3RemoteUsageCap1dV6RemoteEpCapMax

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325700: fltTcaEqptcapacityL3RemoteUsageCap1wV6RemoteEpCapMax

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325701: fltTcaEqptcapacityL3RemoteUsageCap1moV6RemoteEpCapMax

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325702: fltTcaEqptcapacityL3RemoteUsageCap1qtrV6RemoteEpCapMax

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325703: fltTcaEqptcapacityL3RemoteUsageCap1yearV6RemoteEpCapMax

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325704: fltTcaEqptcapacityL3RemoteUsageCap5minV6RemoteEpCapAvg

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325705: fltTcaEqptcapacityL3RemoteUsageCap15minV6RemoteEpCapAvg

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325706: fltTcaEqptcapacityL3RemoteUsageCap1hV6RemoteEpCapAvg

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325707: fltTcaEqptcapacityL3RemoteUsageCap1dV6RemoteEpCapAvg

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325708: fltTcaEqptcapacityL3RemoteUsageCap1wV6RemoteEpCapAvg

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325709: fltTcaEqptcapacityL3RemoteUsageCap1moV6RemoteEpCapAvg

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325710: fltTcaEqptcapacityL3RemoteUsageCap1qtrV6RemoteEpCapAvg

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325711: fltTcaEqptcapacityL3RemoteUsageCap1yearV6RemoteEpCapAvg

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325736: fltTcaEqptcapacityL3RemoteUsageCap5minV6RemoteEpCapTr

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325737: fltTcaEqptcapacityL3RemoteUsageCap15minV6RemoteEpCapTr

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325738: fltTcaEqptcapacityL3RemoteUsageCap1hV6RemoteEpCapTr

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325739: fltTcaEqptcapacityL3RemoteUsageCap1dV6RemoteEpCapTr

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325740: fltTcaEqptcapacityL3RemoteUsageCap1wV6RemoteEpCapTr

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325741: fltTcaEqptcapacityL3RemoteUsageCap1moV6RemoteEpCapTr

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325742: fltTcaEqptcapacityL3RemoteUsageCap1qtrV6RemoteEpCapTr

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325743: fltTcaEqptcapacityL3RemoteUsageCap1yearV6RemoteEpCapTr

Severity: variable

Explanation: This fault is caused by "Remote v6 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325824: fltTcaEqptcapacityL3RemoteUsagePer5minNormalizedRemotev4Last

Severity: variable

Explanation: This fault is caused by "Remote v4 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325825: fltTcaEqptcapacityL3RemoteUsagePer15minNormalizedRemotev4Last

Severity: variable

Explanation: This fault is caused by "Remote v4 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325826: fltTcaEqptcapacityL3RemoteUsagePer1hNormalizedRemotev4Last

Severity: variable

Explanation: This fault is caused by "Remote v4 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325827: fltTcaEqptcapacityL3RemoteUsagePer1dNormalizedRemotev4Last

Severity: variable

Explanation: This fault is caused by "Remote v4 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325828: fltTcaEqptcapacityL3RemoteUsagePer1wNormalizedRemotev4Last

Severity: variable

Explanation: This fault is caused by "Remote v4 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325829: fltTcaEqptcapacityL3RemoteUsagePer1moNormalizedRemotev4Last

Severity: variable

Explanation: This fault is caused by "Remote v4 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325830: fltTcaEqptcapacityL3RemoteUsagePer1qtrNormalizedRemotev4Last

Severity: variable

Explanation: This fault is caused by "Remote v4 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325831: fltTcaEqptcapacityL3RemoteUsagePer1yearNormalizedRemotev4Last

Severity: variable

Explanation: This fault is caused by "Remote v4 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325832: fltTcaEqptcapacityL3RemoteUsagePer5minNormalizedRemotev4Min

Severity: variable

Explanation: This fault is caused by "Remote v4 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325833: fltTcaEqptcapacityL3RemoteUsagePer15minNormalizedRemotev4Min

Severity: variable

Explanation: This fault is caused by "Remote v4 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325834: fltTcaEqptcapacityL3RemoteUsagePer1hNormalizedRemotev4Min

Severity: variable

Explanation: This fault is caused by "Remote v4 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325835: fltTcaEqptcapacityL3RemoteUsagePer1dNormalizedRemotev4Min

Severity: variable

Explanation: This fault is caused by "Remote v4 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325836: fltTcaEqptcapacityL3RemoteUsagePer1wNormalizedRemotev4Min

Severity: variable

Explanation: This fault is caused by "Remote v4 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325837: fltTcaEqptcapacityL3RemoteUsagePer1moNormalizedRemotev4Min

Severity: variable

Explanation: This fault is caused by "Remote v4 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325838: fltTcaEqptcapacityL3RemoteUsagePer1qtrNormalizedRemotev4Min

Severity: variable

Explanation: This fault is caused by "Remote v4 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325839: fltTcaEqptcapacityL3RemoteUsagePer1yearNormalizedRemotev4Min

Severity: variable

Explanation: This fault is caused by "Remote v4 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325840: fltTcaEqptcapacityL3RemoteUsagePer5minNormalizedRemotev4Max

Severity: variable

Explanation: This fault is caused by "Remote v4 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325841: fltTcaEqptcapacityL3RemoteUsagePer15minNormalizedRemotev4Max

Severity: variable

Explanation: This fault is caused by "Remote v4 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325842: fltTcaEqptcapacityL3RemoteUsagePer1hNormalizedRemotev4Max

Severity: variable

Explanation: This fault is caused by "Remote v4 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325843: fltTcaEqptcapacityL3RemoteUsagePer1dNormalizedRemotev4Max

Severity: variable

Explanation: This fault is caused by "Remote v4 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325844: fltTcaEqptcapacityL3RemoteUsagePer1wNormalizedRemotev4Max

Severity: variable

Explanation: This fault is caused by "Remote v4 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325845: fltTcaEqptcapacityL3RemoteUsagePer1moNormalizedRemotev4Max

Severity: variable

Explanation: This fault is caused by "Remote v4 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325846: fltTcaEqptcapacityL3RemoteUsagePer1qtrNormalizedRemotev4Max

Severity: variable

Explanation: This fault is caused by "Remote v4 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325847: fltTcaEqptcapacityL3RemoteUsagePer1yearNormalizedRemotev4Max

Severity: variable

Explanation: This fault is caused by "Remote v4 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325848: fltTcaEqptcapacityL3RemoteUsagePer5minNormalizedRemotev4Avg

Severity: variable

Explanation: This fault is caused by "Remote v4 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325849: fltTcaEqptcapacityL3RemoteUsagePer15minNormalizedRemotev4Avg

Severity: variable

Explanation: This fault is caused by "Remote v4 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325850: fltTcaEqptcapacityL3RemoteUsagePer1hNormalizedRemotev4Avg

Severity: variable

Explanation: This fault is caused by "Remote v4 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325851: fltTcaEqptcapacityL3RemoteUsagePer1dNormalizedRemotev4Avg

Severity: variable

Explanation: This fault is caused by "Remote v4 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325852: fltTcaEqptcapacityL3RemoteUsagePer1wNormalizedRemotev4Avg

Severity: variable

Explanation: This fault is caused by "Remote v4 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325853: fltTcaEqptcapacityL3RemoteUsagePer1moNormalizedRemotev4Avg

Severity: variable

Explanation: This fault is caused by "Remote v4 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325854: fltTcaEqptcapacityL3RemoteUsagePer1qtrNormalizedRemotev4Avg

Severity: variable

Explanation: This fault is caused by "Remote v4 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325855: fltTcaEqptcapacityL3RemoteUsagePer1yearNormalizedRemotev4Avg

Severity: variable

Explanation: This fault is caused by "Remote v4 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325888: fltTcaEqptcapacityL3RemoteUsagePer5minNormalizedRemotev4Tr

Severity: variable

Explanation: This fault is caused by "Remote v4 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325889: fltTcaEqptcapacityL3RemoteUsagePer15minNormalizedRemotev4Tr

Severity: variable

Explanation: This fault is caused by "Remote v4 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325890: fltTcaEqptcapacityL3RemoteUsagePer1hNormalizedRemotev4Tr

Severity: variable

Explanation: This fault is caused by "Remote v4 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325891: fltTcaEqptcapacityL3RemoteUsagePer1dNormalizedRemotev4Tr

Severity: variable

Explanation: This fault is caused by "Remote v4 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325892: fltTcaEqptcapacityL3RemoteUsagePer1wNormalizedRemotev4Tr

Severity: variable

Explanation: This fault is caused by "Remote v4 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325893: fltTcaEqptcapacityL3RemoteUsagePer1moNormalizedRemotev4Tr

Severity: variable

Explanation: This fault is caused by "Remote v4 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325894: fltTcaEqptcapacityL3RemoteUsagePer1qtrNormalizedRemotev4Tr

Severity: variable

Explanation: This fault is caused by "Remote v4 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325895: fltTcaEqptcapacityL3RemoteUsagePer1yearNormalizedRemotev4Tr

Severity: variable

Explanation: This fault is caused by "Remote v4 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325944: fltTcaEqptcapacityL3RemoteUsagePer5minNormalizedRemotev6Last

Severity: variable

Explanation: This fault is caused by "Remote v6 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325945: fltTcaEqptcapacityL3RemoteUsagePer15minNormalizedRemotev6Last

Severity: variable

Explanation: This fault is caused by "Remote v6 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325946: fltTcaEqptcapacityL3RemoteUsagePer1hNormalizedRemotev6Last

Severity: variable

Explanation: This fault is caused by "Remote v6 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325947: fltTcaEqptcapacityL3RemoteUsagePer1dNormalizedRemotev6Last

Severity: variable

Explanation: This fault is caused by "Remote v6 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325948: fltTcaEqptcapacityL3RemoteUsagePer1wNormalizedRemotev6Last

Severity: variable

Explanation: This fault is caused by "Remote v6 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325949: fltTcaEqptcapacityL3RemoteUsagePer1moNormalizedRemotev6Last

Severity: variable

Explanation: This fault is caused by "Remote v6 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325950: fltTcaEqptcapacityL3RemoteUsagePer1qtrNormalizedRemotev6Last

Severity: variable

Explanation: This fault is caused by "Remote v6 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325951: fltTcaEqptcapacityL3RemoteUsagePer1yearNormalizedRemotev6Last

Severity: variable

Explanation: This fault is caused by "Remote v6 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325952: fltTcaEqptcapacityL3RemoteUsagePer5minNormalizedRemotev6Min

Severity: variable

Explanation: This fault is caused by "Remote v6 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325953: fltTcaEqptcapacityL3RemoteUsagePer15minNormalizedRemotev6Min

Severity: variable

Explanation: This fault is caused by "Remote v6 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325954: fltTcaEqptcapacityL3RemoteUsagePer1hNormalizedRemotev6Min

Severity: variable

Explanation: This fault is caused by "Remote v6 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325955: fltTcaEqptcapacityL3RemoteUsagePer1dNormalizedRemotev6Min

Severity: variable

Explanation: This fault is caused by "Remote v6 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325956: fltTcaEqptcapacityL3RemoteUsagePer1wNormalizedRemotev6Min

Severity: variable

Explanation: This fault is caused by "Remote v6 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325957: fltTcaEqptcapacityL3RemoteUsagePer1moNormalizedRemotev6Min

Severity: variable

Explanation: This fault is caused by "Remote v6 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325958: fltTcaEqptcapacityL3RemoteUsagePer1qtrNormalizedRemotev6Min

Severity: variable

Explanation: This fault is caused by "Remote v6 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325959: fltTcaEqptcapacityL3RemoteUsagePer1yearNormalizedRemotev6Min

Severity: variable

Explanation: This fault is caused by "Remote v6 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325960: fltTcaEqptcapacityL3RemoteUsagePer5minNormalizedRemotev6Max

Severity: variable

Explanation: This fault is caused by "Remote v6 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325961: fltTcaEqptcapacityL3RemoteUsagePer15minNormalizedRemotev6Max

Severity: variable

Explanation: This fault is caused by "Remote v6 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325962: fltTcaEqptcapacityL3RemoteUsagePer1hNormalizedRemotev6Max

Severity: variable

Explanation: This fault is caused by "Remote v6 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325963: fltTcaEqptcapacityL3RemoteUsagePer1dNormalizedRemotev6Max

Severity: variable

Explanation: This fault is caused by "Remote v6 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325964: fltTcaEqptcapacityL3RemoteUsagePer1wNormalizedRemotev6Max

Severity: variable

Explanation: This fault is caused by "Remote v6 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325965: fltTcaEqptcapacityL3RemoteUsagePer1moNormalizedRemotev6Max

Severity: variable

Explanation: This fault is caused by "Remote v6 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325966: fltTcaEqptcapacityL3RemoteUsagePer1qtrNormalizedRemotev6Max

Severity: variable

Explanation: This fault is caused by "Remote v6 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325967: fltTcaEqptcapacityL3RemoteUsagePer1yearNormalizedRemotev6Max

Severity: variable

Explanation: This fault is caused by "Remote v6 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325968: fltTcaEqptcapacityL3RemoteUsagePer5minNormalizedRemotev6Avg

Severity: variable

Explanation: This fault is caused by "Remote v6 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325969: fltTcaEqptcapacityL3RemoteUsagePer15minNormalizedRemotev6Avg

Severity: variable

Explanation: This fault is caused by "Remote v6 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325970: fltTcaEqptcapacityL3RemoteUsagePer1hNormalizedRemotev6Avg

Severity: variable

Explanation: This fault is caused by "Remote v6 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325971: fltTcaEqptcapacityL3RemoteUsagePer1dNormalizedRemotev6Avg

Severity: variable

Explanation: This fault is caused by "Remote v6 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325972: fltTcaEqptcapacityL3RemoteUsagePer1wNormalizedRemotev6Avg

Severity: variable

Explanation: This fault is caused by "Remote v6 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325973: fltTcaEqptcapacityL3RemoteUsagePer1moNormalizedRemotev6Avg

Severity: variable

Explanation: This fault is caused by "Remote v6 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325974: fltTcaEqptcapacityL3RemoteUsagePer1qtrNormalizedRemotev6Avg

Severity: variable

Explanation: This fault is caused by "Remote v6 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F325975: fltTcaEqptcapacityL3RemoteUsagePer1yearNormalizedRemotev6Avg

Severity: variable

Explanation: This fault is caused by "Remote v6 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326008: fltTcaEqptcapacityL3RemoteUsagePer5minNormalizedRemotev6Tr

Severity: variable

Explanation: This fault is caused by "Remote v6 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326009: fltTcaEqptcapacityL3RemoteUsagePer15minNormalizedRemotev6Tr

Severity: variable

Explanation: This fault is caused by "Remote v6 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326010: fltTcaEqptcapacityL3RemoteUsagePer1hNormalizedRemotev6Tr

Severity: variable

Explanation: This fault is caused by "Remote v6 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326011: fltTcaEqptcapacityL3RemoteUsagePer1dNormalizedRemotev6Tr

Severity: variable

Explanation: This fault is caused by "Remote v6 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326012: fltTcaEqptcapacityL3RemoteUsagePer1wNormalizedRemotev6Tr

Severity: variable

Explanation: This fault is caused by "Remote v6 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326013: fltTcaEqptcapacityL3RemoteUsagePer1moNormalizedRemotev6Tr

Severity: variable

Explanation: This fault is caused by "Remote v6 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326014: fltTcaEqptcapacityL3RemoteUsagePer1qtrNormalizedRemotev6Tr

Severity: variable

Explanation: This fault is caused by "Remote v6 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326015: fltTcaEqptcapacityL3RemoteUsagePer1yearNormalizedRemotev6Tr

Severity: variable

Explanation: This fault is caused by "Remote v6 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Remote v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326064: fltTcaEqptcapacityL3TotalUsage5minV4TotalEpLast

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326065: fltTcaEqptcapacityL3TotalUsage15minV4TotalEpLast

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326066: fltTcaEqptcapacityL3TotalUsage1hV4TotalEpLast

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326067: fltTcaEqptcapacityL3TotalUsage1dV4TotalEpLast

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326068: fltTcaEqptcapacityL3TotalUsage1wV4TotalEpLast

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326069: fltTcaEqptcapacityL3TotalUsage1moV4TotalEpLast

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326070: fltTcaEqptcapacityL3TotalUsage1qtrV4TotalEpLast

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326071: fltTcaEqptcapacityL3TotalUsage1yearV4TotalEpLast

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326096: fltTcaEqptcapacityL3TotalUsage5minV4TotalEpMin

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326097: fltTcaEqptcapacityL3TotalUsage15minV4TotalEpMin

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326098: fltTcaEqptcapacityL3TotalUsage1hV4TotalEpMin

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326099: fltTcaEqptcapacityL3TotalUsage1dV4TotalEpMin

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3261: fltL2BDLoopDetected

Severity: major

Explanation: This fault occurs when the ep learning is disabled because of loop detection

Recommended Action: If this fault is consistently happening, try the following actions

1. Check network connectivity for stp flaps

2. If the network connectivity is fine, generate the show tech-support file and contact Cisco TAC.

F326100: fltTcaEqptcapacityL3TotalUsage1wV4TotalEpMin

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326101: fltTcaEqptcapacityL3TotalUsage1moV4TotalEpMin

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326102: fltTcaEqptcapacityL3TotalUsage1qtrV4TotalEpMin

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326103: fltTcaEqptcapacityL3TotalUsage1yearV4TotalEpMin

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326104: fltTcaEqptcapacityL3TotalUsage5minV4TotalEpMax

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326105: fltTcaEqptcapacityL3TotalUsage15minV4TotalEpMax

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326106: fltTcaEqptcapacityL3TotalUsage1hV4TotalEpMax

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326107: fltTcaEqptcapacityL3TotalUsage1dV4TotalEpMax

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326108: fltTcaEqptcapacityL3TotalUsage1wV4TotalEpMax

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326109: fltTcaEqptcapacityL3TotalUsage1moV4TotalEpMax

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326110: fltTcaEqptcapacityL3TotalUsage1qtrV4TotalEpMax

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326111: fltTcaEqptcapacityL3TotalUsage1yearV4TotalEpMax

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326112: fltTcaEqptcapacityL3TotalUsage5minV4TotalEpAvg

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326113: fltTcaEqptcapacityL3TotalUsage15minV4TotalEpAvg

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326114: fltTcaEqptcapacityL3TotalUsage1hV4TotalEpAvg

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326115: fltTcaEqptcapacityL3TotalUsage1dV4TotalEpAvg

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326116: fltTcaEqptcapacityL3TotalUsage1wV4TotalEpAvg

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326117: fltTcaEqptcapacityL3TotalUsage1moV4TotalEpAvg

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326118: fltTcaEqptcapacityL3TotalUsage1qtrV4TotalEpAvg

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326119: fltTcaEqptcapacityL3TotalUsage1yearV4TotalEpAvg

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326144: fltTcaEqptcapacityL3TotalUsage5minV4TotalEpTr

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326145: fltTcaEqptcapacityL3TotalUsage15minV4TotalEpTr

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326146: fltTcaEqptcapacityL3TotalUsage1hV4TotalEpTr

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326147: fltTcaEqptcapacityL3TotalUsage1dV4TotalEpTr

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326148: fltTcaEqptcapacityL3TotalUsage1wV4TotalEpTr

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326149: fltTcaEqptcapacityL3TotalUsage1moV4TotalEpTr

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326150: fltTcaEqptcapacityL3TotalUsage1qtrV4TotalEpTr

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326151: fltTcaEqptcapacityL3TotalUsage1yearV4TotalEpTr

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326232: fltTcaEqptcapacityL3TotalUsage5minV6TotalEpLast

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326233: fltTcaEqptcapacityL3TotalUsage15minV6TotalEpLast

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326234: fltTcaEqptcapacityL3TotalUsage1hV6TotalEpLast

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326235: fltTcaEqptcapacityL3TotalUsage1dV6TotalEpLast

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326236: fltTcaEqptcapacityL3TotalUsage1wV6TotalEpLast

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326237: fltTcaEqptcapacityL3TotalUsage1moV6TotalEpLast

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326238: fltTcaEqptcapacityL3TotalUsage1qtrV6TotalEpLast

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326239: fltTcaEqptcapacityL3TotalUsage1yearV6TotalEpLast

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326264: fltTcaEqptcapacityL3TotalUsage5minV6TotalEpMin

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326265: fltTcaEqptcapacityL3TotalUsage15minV6TotalEpMin

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326266: fltTcaEqptcapacityL3TotalUsage1hV6TotalEpMin

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326267: fltTcaEqptcapacityL3TotalUsage1dV6TotalEpMin

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326268: fltTcaEqptcapacityL3TotalUsage1wV6TotalEpMin

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326269: fltTcaEqptcapacityL3TotalUsage1moV6TotalEpMin

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326270: fltTcaEqptcapacityL3TotalUsage1qtrV6TotalEpMin

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326271: fltTcaEqptcapacityL3TotalUsage1yearV6TotalEpMin

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326272: fltTcaEqptcapacityL3TotalUsage5minV6TotalEpMax

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326273: fltTcaEqptcapacityL3TotalUsage15minV6TotalEpMax

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326274: fltTcaEqptcapacityL3TotalUsage1hV6TotalEpMax

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326275: fltTcaEqptcapacityL3TotalUsage1dV6TotalEpMax

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326276: fltTcaEqptcapacityL3TotalUsage1wV6TotalEpMax

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326277: fltTcaEqptcapacityL3TotalUsage1moV6TotalEpMax

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326278: fltTcaEqptcapacityL3TotalUsage1qtrV6TotalEpMax

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326279: fltTcaEqptcapacityL3TotalUsage1yearV6TotalEpMax

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326280: fltTcaEqptcapacityL3TotalUsage5minV6TotalEpAvg

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326281: fltTcaEqptcapacityL3TotalUsage15minV6TotalEpAvg

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326282: fltTcaEqptcapacityL3TotalUsage1hV6TotalEpAvg

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326283: fltTcaEqptcapacityL3TotalUsage1dV6TotalEpAvg

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326284: fltTcaEqptcapacityL3TotalUsage1wV6TotalEpAvg

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326285: fltTcaEqptcapacityL3TotalUsage1moV6TotalEpAvg

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326286: fltTcaEqptcapacityL3TotalUsage1qtrV6TotalEpAvg

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326287: fltTcaEqptcapacityL3TotalUsage1yearV6TotalEpAvg

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326312: fltTcaEqptcapacityL3TotalUsage5minV6TotalEpTr

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326313: fltTcaEqptcapacityL3TotalUsage15minV6TotalEpTr

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326314: fltTcaEqptcapacityL3TotalUsage1hV6TotalEpTr

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326315: fltTcaEqptcapacityL3TotalUsage1dV6TotalEpTr

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326316: fltTcaEqptcapacityL3TotalUsage1wV6TotalEpTr

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326317: fltTcaEqptcapacityL3TotalUsage1moV6TotalEpTr

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326318: fltTcaEqptcapacityL3TotalUsage1qtrV6TotalEpTr

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326319: fltTcaEqptcapacityL3TotalUsage1yearV6TotalEpTr

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3264: fltFabricSetupPInvalidConfiguration

Severity: major

Explanation: This fault is raised when there are Node Identity or Secondary Subnet issues

Recommended Action: If you see this fault, take the following actions:

1. For "Primary dhcpServer not configured" - Configure the Node Identity policy for node configured as primary dhcp server

2. For "Secondary dhcpServer not configured" - Configure the Node Identity policy for node configured as secondary dhcp server

3. For "Secondary subnet not configured" - Configure AssociatedSetupP for the virtual pod

4. If the above actions did not resolve the issue, collect a tech-support file and contact Cisco TAC.

F326400: fltTcaEqptcapacityL3TotalUsageCap5minV4TotalEpCapLast

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326401: fltTcaEqptcapacityL3TotalUsageCap15minV4TotalEpCapLast

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326402: fltTcaEqptcapacityL3TotalUsageCap1hV4TotalEpCapLast

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326403: fltTcaEqptcapacityL3TotalUsageCap1dV4TotalEpCapLast

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326404: fltTcaEqptcapacityL3TotalUsageCap1wV4TotalEpCapLast

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326405: fltTcaEqptcapacityL3TotalUsageCap1moV4TotalEpCapLast

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326406: fltTcaEqptcapacityL3TotalUsageCap1qtrV4TotalEpCapLast

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326407: fltTcaEqptcapacityL3TotalUsageCap1yearV4TotalEpCapLast

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326432: fltTcaEqptcapacityL3TotalUsageCap5minV4TotalEpCapMin

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326433: fltTcaEqptcapacityL3TotalUsageCap15minV4TotalEpCapMin

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326434: fltTcaEqptcapacityL3TotalUsageCap1hV4TotalEpCapMin

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326435: fltTcaEqptcapacityL3TotalUsageCap1dV4TotalEpCapMin

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326436: fltTcaEqptcapacityL3TotalUsageCap1wV4TotalEpCapMin

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326437: fltTcaEqptcapacityL3TotalUsageCap1moV4TotalEpCapMin

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326438: fltTcaEqptcapacityL3TotalUsageCap1qtrV4TotalEpCapMin

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326439: fltTcaEqptcapacityL3TotalUsageCap1yearV4TotalEpCapMin

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326440: fltTcaEqptcapacityL3TotalUsageCap5minV4TotalEpCapMax

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326441: fltTcaEqptcapacityL3TotalUsageCap15minV4TotalEpCapMax

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326442: fltTcaEqptcapacityL3TotalUsageCap1hV4TotalEpCapMax

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326443: fltTcaEqptcapacityL3TotalUsageCap1dV4TotalEpCapMax

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326444: fltTcaEqptcapacityL3TotalUsageCap1wV4TotalEpCapMax

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326445: fltTcaEqptcapacityL3TotalUsageCap1moV4TotalEpCapMax

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326446: fltTcaEqptcapacityL3TotalUsageCap1qtrV4TotalEpCapMax

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326447: fltTcaEqptcapacityL3TotalUsageCap1yearV4TotalEpCapMax

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326448: fltTcaEqptcapacityL3TotalUsageCap5minV4TotalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326449: fltTcaEqptcapacityL3TotalUsageCap15minV4TotalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326450: fltTcaEqptcapacityL3TotalUsageCap1hV4TotalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326451: fltTcaEqptcapacityL3TotalUsageCap1dV4TotalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326452: fltTcaEqptcapacityL3TotalUsageCap1wV4TotalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326453: fltTcaEqptcapacityL3TotalUsageCap1moV4TotalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326454: fltTcaEqptcapacityL3TotalUsageCap1qtrV4TotalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326455: fltTcaEqptcapacityL3TotalUsageCap1yearV4TotalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326480: fltTcaEqptcapacityL3TotalUsageCap5minV4TotalEpCapTr

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326481: fltTcaEqptcapacityL3TotalUsageCap15minV4TotalEpCapTr

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326482: fltTcaEqptcapacityL3TotalUsageCap1hV4TotalEpCapTr

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326483: fltTcaEqptcapacityL3TotalUsageCap1dV4TotalEpCapTr

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326484: fltTcaEqptcapacityL3TotalUsageCap1wV4TotalEpCapTr

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326485: fltTcaEqptcapacityL3TotalUsageCap1moV4TotalEpCapTr

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326486: fltTcaEqptcapacityL3TotalUsageCap1qtrV4TotalEpCapTr

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326487: fltTcaEqptcapacityL3TotalUsageCap1yearV4TotalEpCapTr

Severity: variable

Explanation: This fault is caused by "Total v4 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3265: fltFabricExtRoutableNodeDefAddressAssignmentFailed

Severity: major

Explanation: This fault is raised when the Policy Manager is not able to assign routable IP address to a node

Recommended Action: If you see this fault, take the following actions:

1. Configure the fabricExtRoutablePodSubnet for the pod and make sure that the number of available IPs are sufficient

2. If the above actions did not resolve the issue, collect tech-support and contact Cisco TAC.

F326568: fltTcaEqptcapacityL3TotalUsageCap5minV6TotalEpCapLast

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326569: fltTcaEqptcapacityL3TotalUsageCap15minV6TotalEpCapLast

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326570: fltTcaEqptcapacityL3TotalUsageCap1hV6TotalEpCapLast

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326571: fltTcaEqptcapacityL3TotalUsageCap1dV6TotalEpCapLast

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326572: fltTcaEqptcapacityL3TotalUsageCap1wV6TotalEpCapLast

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326573: fltTcaEqptcapacityL3TotalUsageCap1moV6TotalEpCapLast

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326574: fltTcaEqptcapacityL3TotalUsageCap1qtrV6TotalEpCapLast

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326575: fltTcaEqptcapacityL3TotalUsageCap1yearV6TotalEpCapLast

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326600: fltTcaEqptcapacityL3TotalUsageCap5minV6TotalEpCapMin

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326601: fltTcaEqptcapacityL3TotalUsageCap15minV6TotalEpCapMin

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326602: fltTcaEqptcapacityL3TotalUsageCap1hV6TotalEpCapMin

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326603: fltTcaEqptcapacityL3TotalUsageCap1dV6TotalEpCapMin

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326604: fltTcaEqptcapacityL3TotalUsageCap1wV6TotalEpCapMin

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326605: fltTcaEqptcapacityL3TotalUsageCap1moV6TotalEpCapMin

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326606: fltTcaEqptcapacityL3TotalUsageCap1qtrV6TotalEpCapMin

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326607: fltTcaEqptcapacityL3TotalUsageCap1yearV6TotalEpCapMin

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326608: fltTcaEqptcapacityL3TotalUsageCap5minV6TotalEpCapMax

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326609: fltTcaEqptcapacityL3TotalUsageCap15minV6TotalEpCapMax

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326610: fltTcaEqptcapacityL3TotalUsageCap1hV6TotalEpCapMax

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326611: fltTcaEqptcapacityL3TotalUsageCap1dV6TotalEpCapMax

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326612: fltTcaEqptcapacityL3TotalUsageCap1wV6TotalEpCapMax

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326613: fltTcaEqptcapacityL3TotalUsageCap1moV6TotalEpCapMax

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326614: fltTcaEqptcapacityL3TotalUsageCap1qtrV6TotalEpCapMax

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326615: fltTcaEqptcapacityL3TotalUsageCap1yearV6TotalEpCapMax

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326616: fltTcaEqptcapacityL3TotalUsageCap5minV6TotalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326617: fltTcaEqptcapacityL3TotalUsageCap15minV6TotalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326618: fltTcaEqptcapacityL3TotalUsageCap1hV6TotalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326619: fltTcaEqptcapacityL3TotalUsageCap1dV6TotalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326620: fltTcaEqptcapacityL3TotalUsageCap1wV6TotalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326621: fltTcaEqptcapacityL3TotalUsageCap1moV6TotalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326622: fltTcaEqptcapacityL3TotalUsageCap1qtrV6TotalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326623: fltTcaEqptcapacityL3TotalUsageCap1yearV6TotalEpCapAvg

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326648: fltTcaEqptcapacityL3TotalUsageCap5minV6TotalEpCapTr

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326649: fltTcaEqptcapacityL3TotalUsageCap15minV6TotalEpCapTr

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326650: fltTcaEqptcapacityL3TotalUsageCap1hV6TotalEpCapTr

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326651: fltTcaEqptcapacityL3TotalUsageCap1dV6TotalEpCapTr

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326652: fltTcaEqptcapacityL3TotalUsageCap1wV6TotalEpCapTr

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326653: fltTcaEqptcapacityL3TotalUsageCap1moV6TotalEpCapTr

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326654: fltTcaEqptcapacityL3TotalUsageCap1qtrV6TotalEpCapTr

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326655: fltTcaEqptcapacityL3TotalUsageCap1yearV6TotalEpCapTr

Severity: variable

Explanation: This fault is caused by "Total v6 Endpoints capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 Endpoints capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326736: fltTcaEqptcapacityL3TotalUsagePer5minNormalizedTotalv4Last

Severity: variable

Explanation: This fault is caused by "Total v4 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326737: fltTcaEqptcapacityL3TotalUsagePer15minNormalizedTotalv4Last

Severity: variable

Explanation: This fault is caused by "Total v4 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326738: fltTcaEqptcapacityL3TotalUsagePer1hNormalizedTotalv4Last

Severity: variable

Explanation: This fault is caused by "Total v4 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326739: fltTcaEqptcapacityL3TotalUsagePer1dNormalizedTotalv4Last

Severity: variable

Explanation: This fault is caused by "Total v4 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326740: fltTcaEqptcapacityL3TotalUsagePer1wNormalizedTotalv4Last

Severity: variable

Explanation: This fault is caused by "Total v4 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326741: fltTcaEqptcapacityL3TotalUsagePer1moNormalizedTotalv4Last

Severity: variable

Explanation: This fault is caused by "Total v4 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326742: fltTcaEqptcapacityL3TotalUsagePer1qtrNormalizedTotalv4Last

Severity: variable

Explanation: This fault is caused by "Total v4 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326743: fltTcaEqptcapacityL3TotalUsagePer1yearNormalizedTotalv4Last

Severity: variable

Explanation: This fault is caused by "Total v4 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326744: fltTcaEqptcapacityL3TotalUsagePer5minNormalizedTotalv4Min

Severity: variable

Explanation: This fault is caused by "Total v4 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326745: fltTcaEqptcapacityL3TotalUsagePer15minNormalizedTotalv4Min

Severity: variable

Explanation: This fault is caused by "Total v4 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326746: fltTcaEqptcapacityL3TotalUsagePer1hNormalizedTotalv4Min

Severity: variable

Explanation: This fault is caused by "Total v4 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326747: fltTcaEqptcapacityL3TotalUsagePer1dNormalizedTotalv4Min

Severity: variable

Explanation: This fault is caused by "Total v4 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326748: fltTcaEqptcapacityL3TotalUsagePer1wNormalizedTotalv4Min

Severity: variable

Explanation: This fault is caused by "Total v4 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326749: fltTcaEqptcapacityL3TotalUsagePer1moNormalizedTotalv4Min

Severity: variable

Explanation: This fault is caused by "Total v4 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326750: fltTcaEqptcapacityL3TotalUsagePer1qtrNormalizedTotalv4Min

Severity: variable

Explanation: This fault is caused by "Total v4 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326751: fltTcaEqptcapacityL3TotalUsagePer1yearNormalizedTotalv4Min

Severity: variable

Explanation: This fault is caused by "Total v4 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326752: fltTcaEqptcapacityL3TotalUsagePer5minNormalizedTotalv4Max

Severity: variable

Explanation: This fault is caused by "Total v4 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326753: fltTcaEqptcapacityL3TotalUsagePer15minNormalizedTotalv4Max

Severity: variable

Explanation: This fault is caused by "Total v4 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326754: fltTcaEqptcapacityL3TotalUsagePer1hNormalizedTotalv4Max

Severity: variable

Explanation: This fault is caused by "Total v4 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326755: fltTcaEqptcapacityL3TotalUsagePer1dNormalizedTotalv4Max

Severity: variable

Explanation: This fault is caused by "Total v4 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326756: fltTcaEqptcapacityL3TotalUsagePer1wNormalizedTotalv4Max

Severity: variable

Explanation: This fault is caused by "Total v4 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326757: fltTcaEqptcapacityL3TotalUsagePer1moNormalizedTotalv4Max

Severity: variable

Explanation: This fault is caused by "Total v4 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326758: fltTcaEqptcapacityL3TotalUsagePer1qtrNormalizedTotalv4Max

Severity: variable

Explanation: This fault is caused by "Total v4 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326759: fltTcaEqptcapacityL3TotalUsagePer1yearNormalizedTotalv4Max

Severity: variable

Explanation: This fault is caused by "Total v4 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326760: fltTcaEqptcapacityL3TotalUsagePer5minNormalizedTotalv4Avg

Severity: variable

Explanation: This fault is caused by "Total v4 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326761: fltTcaEqptcapacityL3TotalUsagePer15minNormalizedTotalv4Avg

Severity: variable

Explanation: This fault is caused by "Total v4 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326762: fltTcaEqptcapacityL3TotalUsagePer1hNormalizedTotalv4Avg

Severity: variable

Explanation: This fault is caused by "Total v4 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326763: fltTcaEqptcapacityL3TotalUsagePer1dNormalizedTotalv4Avg

Severity: variable

Explanation: This fault is caused by "Total v4 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326764: fltTcaEqptcapacityL3TotalUsagePer1wNormalizedTotalv4Avg

Severity: variable

Explanation: This fault is caused by "Total v4 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326765: fltTcaEqptcapacityL3TotalUsagePer1moNormalizedTotalv4Avg

Severity: variable

Explanation: This fault is caused by "Total v4 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326766: fltTcaEqptcapacityL3TotalUsagePer1qtrNormalizedTotalv4Avg

Severity: variable

Explanation: This fault is caused by "Total v4 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326767: fltTcaEqptcapacityL3TotalUsagePer1yearNormalizedTotalv4Avg

Severity: variable

Explanation: This fault is caused by "Total v4 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326800: fltTcaEqptcapacityL3TotalUsagePer5minNormalizedTotalv4Tr

Severity: variable

Explanation: This fault is caused by "Total v4 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326801: fltTcaEqptcapacityL3TotalUsagePer15minNormalizedTotalv4Tr

Severity: variable

Explanation: This fault is caused by "Total v4 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326802: fltTcaEqptcapacityL3TotalUsagePer1hNormalizedTotalv4Tr

Severity: variable

Explanation: This fault is caused by "Total v4 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326803: fltTcaEqptcapacityL3TotalUsagePer1dNormalizedTotalv4Tr

Severity: variable

Explanation: This fault is caused by "Total v4 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326804: fltTcaEqptcapacityL3TotalUsagePer1wNormalizedTotalv4Tr

Severity: variable

Explanation: This fault is caused by "Total v4 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326805: fltTcaEqptcapacityL3TotalUsagePer1moNormalizedTotalv4Tr

Severity: variable

Explanation: This fault is caused by "Total v4 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326806: fltTcaEqptcapacityL3TotalUsagePer1qtrNormalizedTotalv4Tr

Severity: variable

Explanation: This fault is caused by "Total v4 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326807: fltTcaEqptcapacityL3TotalUsagePer1yearNormalizedTotalv4Tr

Severity: variable

Explanation: This fault is caused by "Total v4 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326856: fltTcaEqptcapacityL3TotalUsagePer5minNormalizedTotalv6Last

Severity: variable

Explanation: This fault is caused by "Total v6 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326857: fltTcaEqptcapacityL3TotalUsagePer15minNormalizedTotalv6Last

Severity: variable

Explanation: This fault is caused by "Total v6 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326858: fltTcaEqptcapacityL3TotalUsagePer1hNormalizedTotalv6Last

Severity: variable

Explanation: This fault is caused by "Total v6 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326859: fltTcaEqptcapacityL3TotalUsagePer1dNormalizedTotalv6Last

Severity: variable

Explanation: This fault is caused by "Total v6 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326860: fltTcaEqptcapacityL3TotalUsagePer1wNormalizedTotalv6Last

Severity: variable

Explanation: This fault is caused by "Total v6 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326861: fltTcaEqptcapacityL3TotalUsagePer1moNormalizedTotalv6Last

Severity: variable

Explanation: This fault is caused by "Total v6 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326862: fltTcaEqptcapacityL3TotalUsagePer1qtrNormalizedTotalv6Last

Severity: variable

Explanation: This fault is caused by "Total v6 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326863: fltTcaEqptcapacityL3TotalUsagePer1yearNormalizedTotalv6Last

Severity: variable

Explanation: This fault is caused by "Total v6 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326864: fltTcaEqptcapacityL3TotalUsagePer5minNormalizedTotalv6Min

Severity: variable

Explanation: This fault is caused by "Total v6 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326865: fltTcaEqptcapacityL3TotalUsagePer15minNormalizedTotalv6Min

Severity: variable

Explanation: This fault is caused by "Total v6 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326866: fltTcaEqptcapacityL3TotalUsagePer1hNormalizedTotalv6Min

Severity: variable

Explanation: This fault is caused by "Total v6 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326867: fltTcaEqptcapacityL3TotalUsagePer1dNormalizedTotalv6Min

Severity: variable

Explanation: This fault is caused by "Total v6 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326868: fltTcaEqptcapacityL3TotalUsagePer1wNormalizedTotalv6Min

Severity: variable

Explanation: This fault is caused by "Total v6 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326869: fltTcaEqptcapacityL3TotalUsagePer1moNormalizedTotalv6Min

Severity: variable

Explanation: This fault is caused by "Total v6 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326870: fltTcaEqptcapacityL3TotalUsagePer1qtrNormalizedTotalv6Min

Severity: variable

Explanation: This fault is caused by "Total v6 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326871: fltTcaEqptcapacityL3TotalUsagePer1yearNormalizedTotalv6Min

Severity: variable

Explanation: This fault is caused by "Total v6 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326872: fltTcaEqptcapacityL3TotalUsagePer5minNormalizedTotalv6Max

Severity: variable

Explanation: This fault is caused by "Total v6 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326873: fltTcaEqptcapacityL3TotalUsagePer15minNormalizedTotalv6Max

Severity: variable

Explanation: This fault is caused by "Total v6 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326874: fltTcaEqptcapacityL3TotalUsagePer1hNormalizedTotalv6Max

Severity: variable

Explanation: This fault is caused by "Total v6 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326875: fltTcaEqptcapacityL3TotalUsagePer1dNormalizedTotalv6Max

Severity: variable

Explanation: This fault is caused by "Total v6 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326876: fltTcaEqptcapacityL3TotalUsagePer1wNormalizedTotalv6Max

Severity: variable

Explanation: This fault is caused by "Total v6 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326877: fltTcaEqptcapacityL3TotalUsagePer1moNormalizedTotalv6Max

Severity: variable

Explanation: This fault is caused by "Total v6 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326878: fltTcaEqptcapacityL3TotalUsagePer1qtrNormalizedTotalv6Max

Severity: variable

Explanation: This fault is caused by "Total v6 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326879: fltTcaEqptcapacityL3TotalUsagePer1yearNormalizedTotalv6Max

Severity: variable

Explanation: This fault is caused by "Total v6 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326880: fltTcaEqptcapacityL3TotalUsagePer5minNormalizedTotalv6Avg

Severity: variable

Explanation: This fault is caused by "Total v6 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326881: fltTcaEqptcapacityL3TotalUsagePer15minNormalizedTotalv6Avg

Severity: variable

Explanation: This fault is caused by "Total v6 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326882: fltTcaEqptcapacityL3TotalUsagePer1hNormalizedTotalv6Avg

Severity: variable

Explanation: This fault is caused by "Total v6 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326883: fltTcaEqptcapacityL3TotalUsagePer1dNormalizedTotalv6Avg

Severity: variable

Explanation: This fault is caused by "Total v6 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326884: fltTcaEqptcapacityL3TotalUsagePer1wNormalizedTotalv6Avg

Severity: variable

Explanation: This fault is caused by "Total v6 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326885: fltTcaEqptcapacityL3TotalUsagePer1moNormalizedTotalv6Avg

Severity: variable

Explanation: This fault is caused by "Total v6 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326886: fltTcaEqptcapacityL3TotalUsagePer1qtrNormalizedTotalv6Avg

Severity: variable

Explanation: This fault is caused by "Total v6 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326887: fltTcaEqptcapacityL3TotalUsagePer1yearNormalizedTotalv6Avg

Severity: variable

Explanation: This fault is caused by "Total v6 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326920: fltTcaEqptcapacityL3TotalUsagePer5minNormalizedTotalv6Tr

Severity: variable

Explanation: This fault is caused by "Total v6 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326921: fltTcaEqptcapacityL3TotalUsagePer15minNormalizedTotalv6Tr

Severity: variable

Explanation: This fault is caused by "Total v6 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326922: fltTcaEqptcapacityL3TotalUsagePer1hNormalizedTotalv6Tr

Severity: variable

Explanation: This fault is caused by "Total v6 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326923: fltTcaEqptcapacityL3TotalUsagePer1dNormalizedTotalv6Tr

Severity: variable

Explanation: This fault is caused by "Total v6 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326924: fltTcaEqptcapacityL3TotalUsagePer1wNormalizedTotalv6Tr

Severity: variable

Explanation: This fault is caused by "Total v6 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326925: fltTcaEqptcapacityL3TotalUsagePer1moNormalizedTotalv6Tr

Severity: variable

Explanation: This fault is caused by "Total v6 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326926: fltTcaEqptcapacityL3TotalUsagePer1qtrNormalizedTotalv6Tr

Severity: variable

Explanation: This fault is caused by "Total v6 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F326927: fltTcaEqptcapacityL3TotalUsagePer1yearNormalizedTotalv6Tr

Severity: variable

Explanation: This fault is caused by "Total v6 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3272: fltL1FcPhysIfFcpmCfgCtrl

Severity: warning

Explanation: This fault is caused by a hardware programming failure

Recommended Action: The system will periodically retry to program the hardware. If the failure is due to lack of hardware resources, free up resources by removing or simplifying existing configuration. One of the reasons for lack of hardware resources is exhaustion of VLANs in ToR. These hardware resources can be examined by looking at capacity dashboard under OPERATIONS tab. Please check entry against the number of VLANs in output of command show vlan summary issued at node where fault is generated to check whether it exceeds above advertised node capacity.

F3273: fltL2FcAggrIfFcpmCfgCtrl

Severity: warning

Explanation: This fault is caused by a hardware programming failure

Recommended Action: The system will periodically retry to program the hardware. If the failure is due to lack of hardware resources, free up resources by removing or simplifying existing configuration. One of the reasons for lack of hardware resources is exhaustion of VLANs in ToR. These hardware resources can be examined by looking at capacity dashboard under OPERATIONS tab. Please check entry against the number of VLANs in output of command show vlan summary issued at node where fault is generated to check whether it exceeds above advertised node capacity.

F3274: fltVpcIfIfFabricEncapMismatch

Severity: critical

Explanation: This event occurs when there is a mismatch for the fabric VNID encapsulation allocated for the EPG between vpc peers. This can occur if there are multiple domains associated to the EPG with overlapping vlan pools.

Recommended Action: For each vlan-encap configured under the EPG, ensure that there is only one domain associated to the EPG with a vlan pool that includes the corresponding vlan-encap.

F3276: fltOpflexODevODevAveNgMissHeartbeat

Severity: major

Explanation: This fault is raised when there is an issue with respect to the OpFlex device of type ave-ng

Recommended Action: If you see this fault, take the following actions:

1. To restore, delete and re-add the OpFlex device.

2. Check connectivity to the OpFlex device.

3. Try restarting the device.

4. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F3278: fltCompHvHealthOperationalIssues

Severity: major

Explanation: This fault is raised when both the opflex channels have not received HBs for the specified AVE Timeout duration.

Recommended Action: If you see this fault, take the following actions:

1. Do vem restart on AVE.

2. If the above command doesn't fix, check the vnics and portgroups on the vcenter.

3. Check the AEP configuration on the APIC.

4. Check the ipaddress for kni interfaces on AVE and try pinging leaf.

5. If the above actions did not resolve the issue, collect avs-tech-support file and contact Cisco TAC.

F3279: fltL2VfcIfVfcCfgStFailed

Severity: warning

Explanation: This fault occurs on the event of FCF-Mac-Pool exhaustion during VFC interface creation

Recommended Action: If you see this fault, take the following actions

1. Delete the VFC interface and check the FCF-Mac-Pool limit

F3280: fltFvRsOtmListMemberResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3281: fltFvRsIpslaMonPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3282: fltIpRsRouteTrackResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3283: fltTunnelIfRemoteLeafDropTcamUnavailable

Severity: major

Explanation: This fault occurs when there is no space available in the TCAM on at least one of the modules. Note: If hw has more than one module Remote Leaf Drop , ACL entry might have successfully installed on few modules and failed on few modules.

Recommended Action: To recover from this fault, try the following actions

1. Delete any unused Remote Leaf or Remote Leaf VPC tunnel.

F3284: fltTunnelIfRemoteLeafFilterHwUnsupported

Severity: major

Explanation: This fault occurs when Remote Leaf ACL entry installation failed due to unsupported hardware.

Recommended Action: None set.

F3285: fltTunnelIfRemoteLeafFilterInvalidConfig

Severity: major

Explanation: This fault occurs when Remote Leaf ACL entry config is invalid.

Recommended Action: None set.

F3286: fltL2TrafficMapConfIssueTrafficMapConfigfault

Severity: minor

Explanation: This fault occurs when traffic map configuration failed

Recommended Action: If you see this fault, take the following actions

1. Check if the configured NP port is the same as current one

2. Remove the traffic map config, shutdown the F port and then config traffic map again

F3287: fltIpRsNexthopRouteTrackResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3288: fltVnsRsToCIfResolveFail

Severity: minor

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3290: fltHvsEnhancedLagPolOperIssues

Severity: minor

Explanation: This fault is raised when issues are detected with EnhancedLag policies learned from vCenter. E.g. missing Enhanced Lacp policy

Recommended Action: If you see this fault, take the following actions:

1. Fix the issue by creating the policy based on the fault description

2. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F3291: fltL3RsL3dot1pRuleAttConfig-failed

Severity: major

Explanation: This fault occurs when qos manager fails to activate a dot1p rule due to hardware programming failure

Recommended Action: To recover from this fault, try the following actions

1. Look at any configuration issues

2. Verify the configuration is correct/complete

3. Reduce the number of rules and retry

F3292: fltL3RsL3dscpRuleAttConfig-failed

Severity: major

Explanation: This fault occurs when qos manager fails to activate a dscp rule due to hardware programming failure

Recommended Action: To recover from this fault, try the following actions

1. Look at any configuration issues

2. Verify the configuration is correct/complete

3. Reduce the number of rules and retry

F3293: fltApPluginStopPluginFailed

Severity: minor

Explanation: Plugin has failed to stop.

Recommended Action: If you see this fault, please raise a TAC case. Uninstall/Install App may help resolve the issue.

F3295: fltSvcredirDestGrpOperStFailed2

Severity: major

Explanation: This fault occurs when PBR service dest group goes to failed state due to both l1/l2 device being active

Recommended Action: To recover from this fault, try the following actions

1. number of active dests in the group should be one for l1/l2 devices

F3299: fltMldsnoopInstMldsnoopLocalLearningDisabledFault

Severity: major

Explanation: This fault occurs when the mld snooping local learning is disabled

Recommended Action: To recover from this fault, try the following actions

1. Reduce the number of multicast groups in the network behind the leaf node

2. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F3300: fltMldsnoopInstMldsnoopFabricearningDisabledFault

Severity: major

Explanation: This fault occurs when the mld snooping fabric learning is disabled

Recommended Action: To recover from this fault, try the following actions

1. Reduce the number of multicast groups in the fabric

2. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F3301: fltMldsnoopQuerierStQuerierIpConflict

Severity: warning

Explanation: This fault occurs when the switch querier is the same as the BD SVI querier

Recommended Action: To remove this fault, configure a different switch querier IP address or remove the switch querier config if routing is enabled

1. configure different IP for switch (layer-2) querier from the SVI querier or remove the switch querier config if routing is enabled

2. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F3302: fltFvRsMldsnResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3303: fltFvPodDhcpServerInfoInvalidConfiguration

Severity: major

Explanation: This fault is raised when there are Dhcp Server issues

Recommended Action: If you see this fault, take the following actions:

1. For "Invalid dhcpServer configuration" – Dhcp server configured on a node that is not a vTor. Please unconfigure and reconfigure it with nodeId of a vTor

F3306: fltPcFcAggrMbrIfPortSuspended

Severity: major

Explanation: This fault occurs when port has been suspended by LACP.

Recommended Action: Please verify the configuration on both ends of the port-channel.

F3307: fltFcpmIfPortDownFc

Severity: major

Explanation: This fault occurs when an FC port is down

Recommended Action: If you see this fault, take the following actions

1. Check the port down reason and try resolving the issue

2. Remove the configuration or administratively shut the port if the port is not in use

3. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F3308: fltPim6DomNwIssue

Severity: minor

Explanation: This fault occurs because PIM IPV6 is enabled on a VRF which is deployed on a a leaf which does not support multicast configuratio n.

Recommended Action: If you see this fault, please disable PIM IPV6 on of VRF that is deployed on on leaf that does not support multicast.

F3309: fltPimRsV6IfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3311: fltIpRsNHTrackMemberResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3318: fltSpanRsSpanSsnToFltGrpAttOperStFailed

Severity: major

Explanation: This fault occurs when span sessio to fltgrp relation is created on oldgen tor

Recommended Action: To recover from this fault, try the following actions

1. Try on a new gen tor

F3319: fltSpanRsSpanSrcToFltGrpAttOperStFailed

Severity: major

Explanation: This fault occurs when span Source to Filter group relation is created on oldgen tor

Recommended Action: To recover from this fault, try the following actions

1. Try on a new gen tor

F3326: fltEdmRsCtrlrToDomResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3327: fltEdmRsToNicProfToDomResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3328: fltEdmRsToSvrNicResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3329: fltVmmRsToExtDevMgrResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3330: fltVzRsSdwanPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3332: fltEigrpRsKeyChainPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3335: fltApPluginRequiredPlatformNotAvailable

Severity: minor

Explanation: Required platform not available.

Recommended Action: If you see this fault, you MUST either Uninstall/Install App, or bring back up APICs whose type is the same as APICs hosting this APP initially.

F3336: fltL1StormCtrlPStormActionSoakInstCfgIsNotSupported

Severity: warning

Explanation: This fault occurs when user tries to configure storm control action or soak instance count on unsupported hardware

Recommended Action: To recover from this fault, switch to default Storm Control action and soak instance

1. Modify Storm Control config to default DROP action and set SoakInst to 3

F3337: fltTelemetryAlertAnomalyDetected

Severity: major

Explanation: This fault occurs when a node has an anomaly

Recommended Action: If you see this fault, take the following action:

1. Goto NIR app and check for more details about the anomaly

2. If the anomaly stays for longer time, contact Cisco TAC

F3341: fltPoeIfPoeConfigFailRecoverable

Severity: warning

Explanation: This fault occurs when a recoverable error happens on a PoE configured port

Recommended Action: If you see this fault, take the following actions

1. PoE should be configured only on Front panel ports not on fabric ports

2. PoE is not supported on this hardware platform

F3342: fltPoeIfPoeConfigFailUnrecoverable

Severity: warning

Explanation: This fault occurs when a unrecoverable error happens on a PoE configured port

Recommended Action: If you see this fault, take the following actions

1. PoE should be configured only on Front panel ports not on fabric ports

2. PoE is not supported on this hardware platform

F3361: fltHcl1PhysicalIfOperPhysIntfOperStateDown

Severity: minor

Explanation: This is a fault state which occurs when a physical interface is not reachable or has not been correctly configured.

Recommended Action: If you see this fault, take the following actions depending on the fault message:

1. Invalid address: Private ip not in correct format. Please check the config that was posted and try again.

2. Multiple interface under same subnet: More than one interface was defined under the same subnet. Please check the config that was posted and try again.

3. IP address is unassigned: the ip address for the interface is not assigned. To confirm this please login to the CSR with the fault using: ssh username@csr_ip_address Run: show ip int brief Once this is confirmed, please try out the following:

1. If the fault is generated on GigabitEthernet{id}, try to locate the hcloudEndPointOper corresponding to interface physical{id-1}. From the MO, get the privateIpv4Addr. Execute the following commands in the CSR CLI: &nbsp&nbsp&nbsp&nbsp conf t &nbsp&nbsp&nbsp&nbsp int Gig {id} &nbsp&nbsp&nbsp&nbsp ip address privateIpv4Addr mask &nbsp&nbsp&nbsp&nbsp exit &nbsp&nbsp&nbsp&nbsp exit Please wait for a sometime and check again to see if the fault is cleared.

2. If the above did not work, please try executing the following line in the CSR CLI: &nbsp&nbsp&nbsp&nbsp conf t &nbsp&nbsp&nbsp&nbsp int Gig {id} &nbsp&nbsp&nbsp&nbsp shut &nbsp&nbsp&nbsp&nbsp no shut &nbsp&nbsp&nbsp&nbsp exit &nbsp&nbsp&nbsp&nbsp exit

4. If the fault has not been cleared for a prolonged period, contact CISCO TAC

F3362: fltHctunnIfOperTunnIfOperStateDown

Severity: minor

Explanation: This is a transient fault state which occurs when a tunnel interface is not reachable.

Recommended Action: If you see this fault, take the following actions:

1. Fault should get autocleared, try waiting for sometime.

2. If fault has not been cleared for a prologed period, contact Cisco TAC.

F3363: fltHcl3LoopbackRoutedIfOperLoopbackOperStateDown

Severity: minor

Explanation: This fault occurs when an erroneous configuration is pushed for creating a Loopback.

Recommended Action: If you see this fault, take the following actions:

1. Please check the fault message and make necessary changes to the config for creating Loopback.

2. If fault still has not cleared, please contact Cisco TAC.

F3364: fltHcnveIfOperNveOperStateDown

Severity: minor

Explanation: This fault occurs when an erroneous configuration is pushed for creating a NVE.

Recommended Action: If you see this fault, take the following actions:

1. Please check the fault message and make necessary changes to the config for creating NVE.

2. If fault still has not cleared, please contact Cisco TAC.

F3365: fltHcbgpPeerOperBgpOperStateDown

Severity: minor

Explanation: This fault occurs when an erroneous configuration is pushed for creating a Bgp session.

Recommended Action: If you see this fault, take the following actions:

1. Please check the fault message and make necessary changes to the config for creating the BGP session.

2. If fault still has not cleared, please contact Cisco TAC.

F3366: fltHcospfOspfLoopbackIfOperOspfLoopbackOperStateDown

Severity: minor

Explanation: This fault occurs when an erroneous configuration is pushed for creating a Loopback OSPF session .

Recommended Action: If you see this fault, take the following actions:

1. Please check the fault message and make necessary changes to the config for creating the OSPF sessionk.

2. If fault still has not cleared, please contact Cisco TAC.

F3367: fltHcospfOspfTunnIfOperOspfTunnelOperStateDown

Severity: minor

Explanation: This fault occurs when an erroneous configuration is pushed for creating a Tunnel OSPF session.

Recommended Action: If you see this fault, take the following actions:

1. Please check the fault message and make necessary changes to the config for creating the OSPF session.

2. If fault still has not cleared, please contact Cisco TAC.

F3369: fltCloudRsCloudEPgCtxResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3370: fltCloudRsToLogGrpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3371: fltCloudRsCtxProfileToRegionResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3372: fltCloudRsCtxToFlowLogResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3373: fltCloudRsToCtxResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3374: fltCloudRsIsakmpPhase1PolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3375: fltCloudRsIsakmpPhase2PolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3377: fltCloudRsToHostRouterPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3378: fltCloudRsToVpnGwPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3380: fltCloudRsZoneAttachResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3381: fltHcbgpRsBgpPeerTohcl3RoutedIfResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3382: fltHcbgpRsBgpPeerTohctunnIfResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3383: fltHcbgpRsBgpPeerTolbRoutedIfResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3384: fltHcipsecRsProfileToTransformSetResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3385: fltHcisakmpRsProfileToKeyringResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3389: fltHcloudRsQueueToTopicSubscriptionResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3390: fltHcloudRsNetworkInterfaceToSubnetResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3391: fltHcloudRsNextHopToIgwResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3392: fltHcloudRsNextHopToNwIfResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3393: fltHcloudRsNextHopToVgwResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3394: fltHcloudRsSubnetToRaclResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3395: fltHcloudRsSubnetToRouteTableResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3396: fltHcloudRsSubnetFlowToLogGrpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3397: fltHcloudRsTopicToCsrResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3398: fltHcloudRsVpnConnToCgwResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3399: fltHcloudRsFlowToLogGrpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3403: fltHinventoryRsNicToInstanceResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3404: fltHinventoryRsNicToSGResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3405: fltHinventoryRsRtToSubResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3406: fltHinventoryRsNexthopIgwResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3407: fltHinventoryRsNexthopNicResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3408: fltHinventoryRsNexthopVgwResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3409: fltHinventoryRsConnToCgwResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3410: fltHinventoryRsConnToVgwResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3411: fltHinventoryRsVgwToCtxResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3412: fltIsakmpRsProfileToKeyringResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3425: fltTunnelIfSrcDown

Severity: major

Explanation: This fault occurs when the tunnel source IP does not exist on the local switch or if the interface associated with the IP address is down.

Recommended Action: If you see this fault, take the following actions:

1. Collect a tech-support file and contact Cisco TAC.

F3426: fltDhcpServerInfoDhcpHAFailed

Severity: major

Explanation: This fault is raised when the DHCP server running on vtor state changes from normal

Recommended Action: If you see this fault, take the following actions:

1. Make sure this vtor is able to connect to its partner vtor

2. Check if the partner vtor is up

3. Ping the infra ip of its partner to check the connection

4. Do a stateful reload of both vtors in HA

5. If the above actions did not resolve the issue, collect a tech-support file and contact Cisco TAC.

F3428: fltIpv4NlbVipUnsupported-hw

Severity: major

Explanation: This fault occurs when NLB VIP configuration is deployed on an unsupported platform TOR.

Recommended Action: If this fault is consistently happening, try the following actions

1. Delete the NLB VIP from unsupported platform TOR.

F3429: fltIpv6NlbVipUnsupported-hw

Severity: major

Explanation: This fault occurs when NLB VIP configuration is deployed on an unsupported platform TOR.

Recommended Action: If this fault is consistently happening, try the following actions

1. Delete the NLB VIP from unsupported platform TOR.

F3430: fltIpv4NlbVipUnsupported-bd-proxy-config

Severity: major

Explanation: This fault occurs when there is a NLB BD configuration error: - NLB BD is in proxy mode

Recommended Action: If this fault is consistently happening, try the following actions

1. Change NLB BD "L2 Unknown Unicast" to flood.

F3431: fltIpv6NlbVipUnsupported-bd-proxy-config

Severity: major

Explanation: This fault occurs when there is a NLB BD configuration error: - NLB BD is in proxy mode

Recommended Action: If this fault is consistently happening, try the following actions

1. Change NLB BD "L2 Unknown Unicast" to flood.

F3432: fltIpv4NlbVipUnsupported-pim-config

Severity: major

Explanation: This fault occurs when there is a NLB BD configuration error: - PIM is enabled on NLB BD

Recommended Action: If this fault is consistently happening, try the following actions

1. Disable PIM on NLB BD.

F3433: fltIpv6NlbVipUnsupported-pim-config

Severity: major

Explanation: This fault occurs when there is a NLB BD configuration error: - PIM is enabled on NLB BD

Recommended Action: If this fault is consistently happening, try the following actions

1. Disable PIM on NLB BD.

F3434: fltIpv4NlbVipMaxNlbVipLimitReached

Severity: major

Explanation: This fault occurs when max NLB VIP limit(128) is reached

Recommended Action: If this fault is consistently happening, try the following actions

1. Reduce the number of NLb VIP to 128

F3435: fltIpv6NlbVipMaxNlbVipLimitReached

Severity: major

Explanation: This fault occurs when max NLB VIP limit(128) is reached.

Recommended Action: If this fault is consistently happening, try the following actions

1. Reduce the number of NLb VIP's to 128

F3436: fltIpv4NlbVipInvalid-group-config

Severity: major

Explanation: This fault occurs when NLB IGMP group is in use by some other NLB VIP.

Recommended Action: If this fault is consistently happening, try the following actions

1. Use a differnt IGMP group

F3437: fltIpv6NlbVipInvalid-group-config

Severity: major

Explanation: This fault occurs when NLB IGMP group is in use by some other NLB VIP.

Recommended Action: If this fault is consistently happening, try the following actions

1. Use a differnt IGMP group

F3438: fltHcloudCtxOperCloudCtxOperStateDown

Severity: minor

Explanation: This fault occurs when an erroneous configuration is pushed for creating a CtxProfile.

Recommended Action: If you see this fault, take the following actions:

1. Please check the fault message and make necessary changes to the config for creating the CtxProfile.

2. If fault still has not cleared, please contact Cisco TAC.

F3439: fltHcloudCidrOperCloudCidrOperStateDown

Severity: minor

Explanation: This fault occurs when an erroneous configuration is pushed for creating a Cidr.

Recommended Action: If you see this fault, take the following actions:

1. Please check the fault message and make necessary changes to the config for creating the Cidr.

2. If fault still has not cleared, please contact Cisco TAC.

F3440: fltHcloudSubnetOperCloudSubnetOperStateDown

Severity: minor

Explanation: This fault occurs when an erroneous configuration is pushed for creating a Subnet.

Recommended Action: If you see this fault, take the following actions:

1. Please check the fault message and make necessary changes to the config for creating the Subnet.

2. If fault still has not cleared, please contact Cisco TAC.

F3441: fltHcloudRouteTableOperCloudRouteTableOperStateDown

Severity: minor

Explanation: This fault occurs when an erroneous configuration is pushed for creating a RouteTable.

Recommended Action: If you see this fault, take the following actions:

1. The allowed resources could have maxed out. Please check the corresponding resource availability.

2. Please check the fault message and make necessary changes to the config for creating the Subnet.

3. If fault still has not cleared, please contact Cisco TAC.

F3442: fltHcloudInstanceOperCloudInstanceOperStateDown

Severity: major

Explanation: This fault occurs when an erroneous configuration is pushed for creating a CloudRouter.

Recommended Action: If you see this fault, take the following actions:

1. Please check the fault message and make necessary changes to the config for creating the CloudRouter.

2. If fault still has not cleared, please contact Cisco TAC.

F3443: fltHcloudEndPointOperCloudEndPointOperStateDown

Severity: major

Explanation: This fault occurs when an erroneous configuration is pushed for creating a CloudRouter interface.

Recommended Action: If you see this fault, take the following actions:

1. Please check the fault message and make necessary changes to the config for creating the CloudRouter interface.

2. If fault still has not cleared, please contact Cisco TAC.

F3455: fltCloudRsLDevToCloudSubnetResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3456: fltCloudRsListenerToCertResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3460: fltHcloudRsActionToTargetGroupResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3461: fltHcloudRsLBToSecurityGroupResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3462: fltHcloudRsLBToSubnetResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3464: fltHcloudRsTgToSecurityGroupResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3465: fltVnsRsNodeToCloudLDevResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3466: fltVnsRsNodeInstToCloudLDevResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3468: fltTopoctrlHashPOperStFailed

Severity: major

Explanation: This fault occurs when gtp is created on oldgen tor or any spine

Recommended Action: To recover from this fault, try the following actions

1. Try on a new gen tor

F3471: fltApPluginAppInconsistentState

Severity: major

Explanation: User is trying to downgrade the app to an unsupported version i.e Pre 4.0 release.

Recommended Action: User should not delete the app in a Pre 4.0 release. User should delete and reinstall the app after upgrading to a release 4.0 or greater.

F3474: fltL3extRsArpIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3479: fltIpv4NlbVipNlb-vip-same-as-svi-ip

Severity: major

Explanation: This fault occurs when NLB VIP used is same as SVI IP.

Recommended Action: If this fault is consistently happening, try the following actions

1. Use a differnt NLB VIP

F3480: fltIpv6NlbVipNlb-vip-same-as-svi-ip

Severity: major

Explanation: This fault occurs when NLB VIP used is same as SVI IP.

Recommended Action: If this fault is consistently happening, try the following actions

1. Use a differnt NLB VIP

F3481: fltIpv4NlbVipNlb-vip-same-as-ep-reach-vip

Severity: major

Explanation: This fault occurs when NLB VIP used is same as ep reachability VIP.

Recommended Action: If this fault is consistently happening, try the following actions

1. Use a differnt NLB VIP

F3482: fltIpv6NlbVipNlb-vip-same-as-ep-reach-vip

Severity: major

Explanation: This fault occurs when NLB VIP used is same as ep reachability VIP.

Recommended Action: If this fault is consistently happening, try the following actions

1. Use a differnt NLB VIP

F3483: fltIpv4NlbVipNlb-vip-same-as-anycast-vip

Severity: major

Explanation: This fault occurs when NLB VIP used is same as anycast VIP.

Recommended Action: If this fault is consistently happening, try the following actions

1. Use a differnt NLB VIP

F3484: fltIpv6NlbVipNlb-vip-same-as-anycast-vip

Severity: major

Explanation: This fault occurs when NLB VIP used is same as anycast VIP.

Recommended Action: If this fault is consistently happening, try the following actions

1. Use a differnt NLB VIP

F3485: fltIpv4NlbVipNlb-mac-same-as-anycast-mac

Severity: major

Explanation: This fault occurs when NLB MAC used is same as anycast MAC.

Recommended Action: If this fault is consistently happening, try the following actions

1. Use a differnt MAC for NLB

F3486: fltIpv6NlbVipNlb-mac-same-as-anycast-mac

Severity: major

Explanation: This fault occurs when NLB MAC used is same as anycast MAC.

Recommended Action: If this fault is consistently happening, try the following actions

1. Use a differnt MAC for NLB

F3487: fltHcloudRsEpToSecurityGroupResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3488: fltBgpPeerPInvalidConfigBgpPeerP

Severity: critical

Explanation: This fault occurs when router id is not used as loopback and explict loopback interface is not configured for a node and bgp peer configured under logical node profile.

Recommended Action: If you see this fault, take the following actions:

1. Add loopback interface under node.

2. If the above actions did not resolve the issue, collect a tech-support file and contact Cisco TAC.

F3489: fltExtdevRsFromDevMgrToAppResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3501: fltCloudRsActionDefToPoolDefResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3503: fltHcloudRsListenerToCertResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3505: fltHcloudNativeLBOperNativeLBOperStateDown

Severity: major

Explanation: This fault occurs when an erroneous configuration is pushed for creating a Native Load balancer.

Recommended Action: If you see this fault, take the following actions:

1. Please check the fault message and make necessary changes to the config for creating the Native service Load balancer.

2. If fault still has not cleared, please contact Cisco TAC.

F3506: fltHcloudListenerOperListenerOperStateDown

Severity: minor

Explanation: This fault occurs when an erroneous configuration is pushed for creating a Native service Listener.

Recommended Action: If you see this fault, take the following actions:

1. Please check the fault message and make necessary changes to the config for creating the Native LB listener.

2. If fault still has not cleared, please contact Cisco TAC.

F3507: fltHcloudListenerRuleOperListenerRuleOperStateDown

Severity: minor

Explanation: This fault occurs when an erroneous configuration is pushed for creating a Native service Listener Rule.

Recommended Action: If you see this fault, take the following actions:

1. Please check the fault message and make necessary changes to the config for creating the Native LB listener rule.

2. If fault still has not cleared, please contact Cisco TAC.

F3508: fltHcloudTargetGroupOperTargetGroupOperStateDown

Severity: minor

Explanation: This fault occurs when an erroneous configuration is pushed for creating a Native service Target Group.

Recommended Action: If you see this fault, take the following actions:

1. Please check the fault message and make necessary changes to the config for creating the Native service provider Epg representing target server pool.

2. If fault still has not cleared, please contact Cisco TAC.

F3509: fltHcloudCertificateOperCertificateOperStateDown

Severity: minor

Explanation: This fault occurs when an erroneous configuration is pushed for creating a Certificate.

Recommended Action: If you see this fault, take the following actions:

1. Please check the fault message and make necessary changes to the config for creating the certificate required for HTTPS based listener.

2. If fault still has not cleared, please contact Cisco TAC.

F3511: fltFvRsToRemoteRtdCtxDefResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3516: fltEpmRogueMacEpEpMaxIPFlowControl

Severity: warning

Explanation: This fault occurs when maximum number of IPs per MAC exceeds the threshold

Recommended Action: If this fault is consistently happening, try the following actions

1. Check if the maximum number of IPs per MAC is allowed per deployment

2. Otherwise, generate the show tech-support file and contact Cisco TAC.

F3524: fltVmmRsUsrAggrLagPolAttResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3525: fltEqptFlashFlash-warning-alarm

Severity: warning

Explanation: This warning occurs when abnormally frequent Solid State Drive interactions are observed

Recommended Action: If you see this warning, take the following actions:

1. Check switch activity and contact Cisco TAC.

F3526: fltHcloudAccountOperAccountConfigProblem

Severity: major

Explanation: This fault occurs when cloud provider for a tenant information is not correct. For example, provider crendentials can be incorrect or for trusted tenants, trust relationship with the infra provider(account) has not been established.

Recommended Action: If you see this fault, take the following actions:

1. Please check the fault message and give correct provider credentials if it is untrusted tenant.

2. For trusted tenants, check the tenant's hcloudAccountOper fault that has the details for creating a trusted role in the tenant account.

3. If fault still has not cleared, please contact Cisco TAC.

F3527: fltHcplatformLicenseOperCloudLicenseRegistrationFailed

Severity: major

Explanation: This fault occurs when the License State of a CSR is not REGISTERED.

Recommended Action: If you see this fault, take the following actions:

1. Please register the corresponding CSR with a valid smart license.

2. If fault still has not cleared, please contact Cisco TAC.

F3528: fltHcloudRsVpnConnToCgwOperCloudVpnConnFault

Severity: major

Explanation: This fault occurs when an error configuring a VPN connection.

Recommended Action: If you see this fault, take the following actions:

1. Please check the fault message and make necessary changes to the config for creating the VPN connection.

2. If fault still has not cleared, please contact Cisco TAC.

F3529: fltHcloudCtxPeeringOperCloudPeeringConnFault

Severity: minor

Explanation: This fault occurs when an erroneous configuration is pushed for creating a CtxPeering.

Recommended Action: If you see this fault, take the following actions:

1. Please check the fault message and make necessary changes to the config for creating the CtxPeering.

2. If fault still has not cleared, please contact Cisco TAC.

F3530: fltHcloudRsEpToInstResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3531: fltInfraRsEquipmentFlashConfigPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3532: fltHcbdiIfOperBdiIfOperStateDown

Severity: minor

Explanation: This fault occurs when there is a problem configuring the BDI.

Recommended Action: If you see this fault, take the following actions:

1. Please check the fault message and make necessary changes to the config for creating Loopback.

2. If fault has not been cleared for a prologed period, contact Cisco TAC.

F3533: fltHcloudSecurityGroupOperCloudSGOperStateDown

Severity: minor

Explanation: This fault occurs when an erroneous configuration is pushed for creating a CloudEPg.

Recommended Action: If you see this fault, take the following actions:

1. Please check the fault message and make necessary changes to the config for creating the CloudEPg.

2. In case of error in delete operation, please check if any pending dependency resources have to be cleaned up first on cloud provider.

3. If fault still has not cleared, please contact Cisco TAC.

F3534: fltHcloudIpIngressRuleOperCloudIpIngressRuleOperStateDown

Severity: minor

Explanation: This fault occurs when an erroneous configuration is pushed for creating a contract.

Recommended Action: If you see this fault, take the following actions:

1. Please check the fault message and make necessary changes to the config for creating the vzFilter and vzEntry.

2. If fault still has not cleared, please contact Cisco TAC.

F3535: fltHcloudIpEgressRuleOperCloudIpEgressRuleOperStateDown

Severity: minor

Explanation: This fault occurs when an erroneous configuration is pushed for creating a contract.

Recommended Action: If you see this fault, take the following actions:

1. Please check the fault message and make necessary changes to the config for creating the vzFilter and vzEntry.

2. If fault still has not cleared, please contact Cisco TAC.

F3536: fltHcloudSgIngressRuleOperCloudSgIngressRuleOperStateDown

Severity: minor

Explanation: This fault occurs when an erroneous configuration is pushed for creating a contract.

Recommended Action: If you see this fault, take the following actions:

1. Please check the fault message and make necessary changes to the config for creating the vzFilter and vzEntry.

2. Please check if the other end of this contract (consumer or provider EPg) has deployed correctly or if it has a fault associated.

3. If fault still has not cleared, please contact Cisco TAC.

F3537: fltHcloudSgEgressRuleOperCloudSgEgressRuleOperStateDown

Severity: minor

Explanation: This fault occurs when an erroneous configuration is pushed for creating a contract.

Recommended Action: If you see this fault, take the following actions:

1. Please check the fault message and make necessary changes to the config for creating the vzFilter and vzEntry.

2. Please check if the other end of this contract (consumer or provider EPg) has deployed correctly or if it has a fault associated.

3. If fault still has not cleared, please contact Cisco TAC.

F3538: fltHcloudConfigTaskErrorCloudConfigTaskError

Severity: major

Explanation: This fault occurs when Configuration Task encounters an error while programming cloud provider.

Recommended Action: If you see this fault, take the following actions:

1. Please check the fault message and make necessary changes to the config if the error suggests it is due to a wrong configuration.

2. Please make sure that CAPIC is able to connect to internet and DNS was properly configured.

3. Please make sure that cloud specific credentials are correct in your configuration and they have the right permissions.

4. If fault still has not cleared, please contact Cisco TAC.

F3539: fltHcloudInventoryTaskErrorCloudInventoryTaskError

Severity: major

Explanation: This fault occurs when Inventory Task encounters an error while querying cloud provider.

Recommended Action: If you see this fault, take the following actions:

1. Please make sure that CAPIC is able to connect to internet and DNS was properly configured.

2. Please make sure that cloud specific credentials are correct in your configuration and they have the right permissions.

3. If fault still has not cleared, please contact Cisco TAC.

F3540: fltHcloudGarbageCollectorErrorCloudGarbageCollectorError

Severity: major

Explanation: This fault occurs when Garbage Collector encounters an error while deleting stale resources from cloud provider.

Recommended Action: If you see this fault, take the following actions:

1. Please make sure that the cloud resource under deletion has no other dependency outside the scope of CAPIC, that is unmanaged resources.

2. Please make sure that CAPIC is able to connect to internet and DNS was properly configured.

3. Please make sure that cloud specific credentials are correct in your configuration and they have the right permissions.

4. If fault still has not cleared, please contact Cisco TAC.

F3541: fltMldRsMldsnoopAccessGroupFilterRMapResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3542: fltDatetimeNtpqNTPAuthFailed

Severity: minor

Explanation: This fault occurs when a software upgrade fails on a controller

Recommended Action: If you see this fault, take the following actions:

1. If upgrade is done via API, check if the image version entered is correct.

2. Delete the image from repo, delete and repost the firmware policy.

3. Free-up stale/old images, delete and repost the firmware policy.

4. Reboot the controller and retry the software installation using a policy based upgrade.

5. Reboot the controller and retry the software installation using the command line interface.

6. If above actions did not resolve the issue, create a tech-support file and contact Cisco TAC.

F3543: fltDatetimeRsNtpProvToNtpIFFClientKeyResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3544: fltActrlStatsReportPreFixProgFailed

Severity: major

Explanation: This fault occurs when the policy manager on the affected object fails to activate a prefix entry due to either a hardware or software programming failure

Recommended Action: To recover from this fault, try the following actions

1. Verify Policy CAM usage on the Operations Capacity Dashboard

2. Remove unused contracts and filters applied to EPGs

3. Collect an on-demand techsupport which includes the leaf switches described in the affected object and contact TAC

F3545: fltActrlStatsReportZoneRuleProgFailed

Severity: major

Explanation: This fault occurs when the policy manager fails to activate a contract filter rule on the affected object due to either a hardware or software programming failure

Recommended Action: To recover from this fault, try the following actions

1. Verify Policy CAM usage on the Operations Capacity Dashboard

2. Remove unused contracts and filters applied to EPGs

3. Collect an on-demand techsupport which includes the leaf switches described in the affected object and contact TAC

F3546: fltDnsConfIssuesConfig-error

Severity: minor

Explanation: This fault is raised when a DNS Profile (dns:Profile) fails to apply due to configuration issues.

Recommended Action: If you see this fault, take the following actions:

1. For provider-limit-exceeded: If the total of DNS Providers exceeds 2, APIC will not be able to use any DNS providers after the first 2. Make sure the first 2 DNS providers you provide are able to resolve all/most addresses you would need.

2. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F3549: fltHcloudCweErrorCloudEventTaskCweError

Severity: major

Explanation: This fault occurs where there are errors encountered while performing cloudwatch events related programming on AWS

Recommended Action: If you see this fault, take the following actions:

1. If the error indicates Access Denied or permissions related issues, check the IAM access permissions.

2. If the error indicates resource exhaustion, check to see if the AWS limits are being exceeded.

3. For other errors, please take action based on the error message.

4. If fault still has not cleared, please contact Cisco TAC.

F3550: fltHcloudSqsErrorCloudEventTaskSqsError

Severity: major

Explanation: This fault occurs where there are errors encountered while performing SQS related programming on AWS

Recommended Action: If you see this fault, take the following actions:

1. If the error indicates Access Denied or permissions related issues, check the IAM access permissions.

2. If the error indicates resource exhaustion, check to see if the AWS limits are being exceeded.

3. For other errors, please take action based on the error message.

4. If fault still has not cleared, please contact Cisco TAC.

F3551: fltHcloudS3ErrorCloudEventTaskS3Error

Severity: major

Explanation: This fault occurs where there are errors encountered while performing S3 related programming on AWS

Recommended Action: If you see this fault, take the following actions:

1. If the error indicates Access Denied or permissions related issues, check the IAM access permissions.

2. If the error indicates resource exhaustion, check to see if the AWS limits are being exceeded.

3. For other errors, please take action based on the error message.

4. If fault still has not cleared, please contact Cisco TAC.

F3552: fltHcloudCtErrorCloudEventTaskCtError

Severity: major

Explanation: This fault occurs where there are errors encountered while performing cloudtrail related programming on AWS

Recommended Action: If you see this fault, take the following actions:

1. If the error indicates Access Denied or permissions related issues, check the IAM access permissions.

2. If the error indicates resource exhaustion, check to see if the AWS limits are being exceeded.

3. For other errors, please take action based on the error message.

4. If fault still has not cleared, please contact Cisco TAC.

F3553: fltHcloudGenericErrorCloudEventTaskGenericError

Severity: major

Explanation: This fault is raised for any event channel generic error

Recommended Action: If you see this fault, take the following actions:

1. take action based on the error message.

2. If fault still has not cleared, please contact Cisco TAC.

F3554: fltFabricRsApplTechSupOnDemandResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3556: fltHcloudRsTgToEndPointResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3565: fltL3extRsDynPathAttResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3566: fltVnsRsVLIfPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3571: fltBgpRsPeerToProfileResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3572: fltVnsRsBackupPolResolveFail

Severity: minor

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3576: fltFvBDConfigIssuesInvalidConfiguration

Severity: critical

Explanation: This fault occurs when BD is stretched and has Epg deployed on the Remote Leaf

Recommended Action: If you see this fault, take the following actions:

1. undeploy the Epg on the remote leaf.

2. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F3580: fltL3extRsRedistributePolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3581: fltInfraRsLeafPGrpToCdpIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3582: fltInfraRsLeafPGrpToLldpIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3583: fltInfraRsSpinePGrpToCdpIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3584: fltInfraRsSpinePGrpToLldpIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3588: fltApPluginAppInstallationFailed

Severity: minor

Explanation: Application installation failed.

Recommended Action: APP installation keeps getting retried until it is successful. Please raise a TAC case only if this fault does not get cleared within one hour. Uninstall/Install App may help resolve the issue.

F3592: fltOspfIfMtuConfigMismatchErr

Severity: warning

Explanation: This fault occurs when there is an interface mtu config mismatch between ospf neighbours

Recommended Action: To recover from this fault, fix the mismatch interface mtu configs from the switch

F3593: fltOspfv3IfMtuConfigMismatchErr

Severity: warning

Explanation: This fault occurs when there is an interface mtu config mismatch between ospf neighbours

Recommended Action: To recover from this fault, fix the mismatch interface mtu configs from the switch

F3596: fltCloudRsToStatsFilterResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3602: fltFvAEPgConfig-warning

Severity: warning

Explanation: This fault occurs when an End Point Group is not correctly configred

Recommended Action: If you see this fault, take the following actions:

1. Look at the configuration for issues

2. Verify the End Point Group configuration is correct and complete

3. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F3603: fltCloudRsCredentialsResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3604: fltFvRsCloudAccountResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3605: fltCloudRsADResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3606: fltHinventoryRsAsgToRegionResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3607: fltHinventoryRsInstToRegionResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3609: fltHinventoryRsInstSetToRegionResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3612: fltHinventoryRsCtxToRegionResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3613: fltHinventoryRsCgwToRegionResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3615: fltHinventoryRsLbToRegionResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3616: fltHinventoryRsLbToSubnetResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3617: fltHinventoryRsNicToAsgResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3618: fltHinventoryRsNicToPublicIPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3619: fltHinventoryRsNicToRegionResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3620: fltHinventoryRsNicToSubnetResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3621: fltHinventoryRsResGrpToRegionResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3622: fltHinventoryRsRtToRegionResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3625: fltHinventoryRsSqlServerToRegionResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3626: fltHinventoryRsSqlServerToSubnetResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3627: fltHinventoryRsStorageAcctToRegionResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F362792: fltTcaFcInputBytes5minClass2Last

Severity: variable

Explanation: This fault is caused by "input class2 bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362793: fltTcaFcInputBytes15minClass2Last

Severity: variable

Explanation: This fault is caused by "input class2 bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362794: fltTcaFcInputBytes1hClass2Last

Severity: variable

Explanation: This fault is caused by "input class2 bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362795: fltTcaFcInputBytes1dClass2Last

Severity: variable

Explanation: This fault is caused by "input class2 bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362796: fltTcaFcInputBytes1wClass2Last

Severity: variable

Explanation: This fault is caused by "input class2 bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362797: fltTcaFcInputBytes1moClass2Last

Severity: variable

Explanation: This fault is caused by "input class2 bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362798: fltTcaFcInputBytes1qtrClass2Last

Severity: variable

Explanation: This fault is caused by "input class2 bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362799: fltTcaFcInputBytes1yearClass2Last

Severity: variable

Explanation: This fault is caused by "input class2 bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3628: fltHinventoryRsStorageAcctToSubnetResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F362808: fltTcaFcInputBytes5minClass2Cum

Severity: variable

Explanation: This fault is caused by "input class2 bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362809: fltTcaFcInputBytes15minClass2Cum

Severity: variable

Explanation: This fault is caused by "input class2 bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362810: fltTcaFcInputBytes1hClass2Cum

Severity: variable

Explanation: This fault is caused by "input class2 bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362811: fltTcaFcInputBytes1dClass2Cum

Severity: variable

Explanation: This fault is caused by "input class2 bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362812: fltTcaFcInputBytes1wClass2Cum

Severity: variable

Explanation: This fault is caused by "input class2 bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362813: fltTcaFcInputBytes1moClass2Cum

Severity: variable

Explanation: This fault is caused by "input class2 bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362814: fltTcaFcInputBytes1qtrClass2Cum

Severity: variable

Explanation: This fault is caused by "input class2 bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362815: fltTcaFcInputBytes1yearClass2Cum

Severity: variable

Explanation: This fault is caused by "input class2 bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362816: fltTcaFcInputBytes5minClass2Per

Severity: variable

Explanation: This fault is caused by "input class2 bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362817: fltTcaFcInputBytes15minClass2Per

Severity: variable

Explanation: This fault is caused by "input class2 bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362818: fltTcaFcInputBytes1hClass2Per

Severity: variable

Explanation: This fault is caused by "input class2 bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362819: fltTcaFcInputBytes1dClass2Per

Severity: variable

Explanation: This fault is caused by "input class2 bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362820: fltTcaFcInputBytes1wClass2Per

Severity: variable

Explanation: This fault is caused by "input class2 bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362821: fltTcaFcInputBytes1moClass2Per

Severity: variable

Explanation: This fault is caused by "input class2 bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362822: fltTcaFcInputBytes1qtrClass2Per

Severity: variable

Explanation: This fault is caused by "input class2 bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362823: fltTcaFcInputBytes1yearClass2Per

Severity: variable

Explanation: This fault is caused by "input class2 bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362824: fltTcaFcInputBytes5minClass2Min

Severity: variable

Explanation: This fault is caused by "input class2 bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362825: fltTcaFcInputBytes15minClass2Min

Severity: variable

Explanation: This fault is caused by "input class2 bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362826: fltTcaFcInputBytes1hClass2Min

Severity: variable

Explanation: This fault is caused by "input class2 bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362827: fltTcaFcInputBytes1dClass2Min

Severity: variable

Explanation: This fault is caused by "input class2 bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362828: fltTcaFcInputBytes1wClass2Min

Severity: variable

Explanation: This fault is caused by "input class2 bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362829: fltTcaFcInputBytes1moClass2Min

Severity: variable

Explanation: This fault is caused by "input class2 bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362830: fltTcaFcInputBytes1qtrClass2Min

Severity: variable

Explanation: This fault is caused by "input class2 bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362831: fltTcaFcInputBytes1yearClass2Min

Severity: variable

Explanation: This fault is caused by "input class2 bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362832: fltTcaFcInputBytes5minClass2Max

Severity: variable

Explanation: This fault is caused by "input class2 bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362833: fltTcaFcInputBytes15minClass2Max

Severity: variable

Explanation: This fault is caused by "input class2 bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362834: fltTcaFcInputBytes1hClass2Max

Severity: variable

Explanation: This fault is caused by "input class2 bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362835: fltTcaFcInputBytes1dClass2Max

Severity: variable

Explanation: This fault is caused by "input class2 bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362836: fltTcaFcInputBytes1wClass2Max

Severity: variable

Explanation: This fault is caused by "input class2 bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362837: fltTcaFcInputBytes1moClass2Max

Severity: variable

Explanation: This fault is caused by "input class2 bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362838: fltTcaFcInputBytes1qtrClass2Max

Severity: variable

Explanation: This fault is caused by "input class2 bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362839: fltTcaFcInputBytes1yearClass2Max

Severity: variable

Explanation: This fault is caused by "input class2 bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362840: fltTcaFcInputBytes5minClass2Avg

Severity: variable

Explanation: This fault is caused by "input class2 bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362841: fltTcaFcInputBytes15minClass2Avg

Severity: variable

Explanation: This fault is caused by "input class2 bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362842: fltTcaFcInputBytes1hClass2Avg

Severity: variable

Explanation: This fault is caused by "input class2 bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362843: fltTcaFcInputBytes1dClass2Avg

Severity: variable

Explanation: This fault is caused by "input class2 bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362844: fltTcaFcInputBytes1wClass2Avg

Severity: variable

Explanation: This fault is caused by "input class2 bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362845: fltTcaFcInputBytes1moClass2Avg

Severity: variable

Explanation: This fault is caused by "input class2 bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362846: fltTcaFcInputBytes1qtrClass2Avg

Severity: variable

Explanation: This fault is caused by "input class2 bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362847: fltTcaFcInputBytes1yearClass2Avg

Severity: variable

Explanation: This fault is caused by "input class2 bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362872: fltTcaFcInputBytes5minClass2Tr

Severity: variable

Explanation: This fault is caused by "input class2 bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362873: fltTcaFcInputBytes15minClass2Tr

Severity: variable

Explanation: This fault is caused by "input class2 bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362874: fltTcaFcInputBytes1hClass2Tr

Severity: variable

Explanation: This fault is caused by "input class2 bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362875: fltTcaFcInputBytes1dClass2Tr

Severity: variable

Explanation: This fault is caused by "input class2 bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362876: fltTcaFcInputBytes1wClass2Tr

Severity: variable

Explanation: This fault is caused by "input class2 bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362877: fltTcaFcInputBytes1moClass2Tr

Severity: variable

Explanation: This fault is caused by "input class2 bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362878: fltTcaFcInputBytes1qtrClass2Tr

Severity: variable

Explanation: This fault is caused by "input class2 bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362879: fltTcaFcInputBytes1yearClass2Tr

Severity: variable

Explanation: This fault is caused by "input class2 bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362880: fltTcaFcInputBytes5minClass2Rate

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362881: fltTcaFcInputBytes15minClass2Rate

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362882: fltTcaFcInputBytes1hClass2Rate

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362883: fltTcaFcInputBytes1dClass2Rate

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362884: fltTcaFcInputBytes1wClass2Rate

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362885: fltTcaFcInputBytes1moClass2Rate

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362886: fltTcaFcInputBytes1qtrClass2Rate

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362887: fltTcaFcInputBytes1yearClass2Rate

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3629: fltHinventoryRsConnToRegionResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F362960: fltTcaFcInputBytes5minClass2RateLast

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362961: fltTcaFcInputBytes15minClass2RateLast

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362962: fltTcaFcInputBytes1hClass2RateLast

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362963: fltTcaFcInputBytes1dClass2RateLast

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362964: fltTcaFcInputBytes1wClass2RateLast

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362965: fltTcaFcInputBytes1moClass2RateLast

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362966: fltTcaFcInputBytes1qtrClass2RateLast

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362967: fltTcaFcInputBytes1yearClass2RateLast

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362968: fltTcaFcInputBytes5minClass2RateMin

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362969: fltTcaFcInputBytes15minClass2RateMin

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362970: fltTcaFcInputBytes1hClass2RateMin

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362971: fltTcaFcInputBytes1dClass2RateMin

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362972: fltTcaFcInputBytes1wClass2RateMin

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362973: fltTcaFcInputBytes1moClass2RateMin

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362974: fltTcaFcInputBytes1qtrClass2RateMin

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362975: fltTcaFcInputBytes1yearClass2RateMin

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362976: fltTcaFcInputBytes5minClass2RateMax

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362977: fltTcaFcInputBytes15minClass2RateMax

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362978: fltTcaFcInputBytes1hClass2RateMax

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362979: fltTcaFcInputBytes1dClass2RateMax

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362980: fltTcaFcInputBytes1wClass2RateMax

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362981: fltTcaFcInputBytes1moClass2RateMax

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362982: fltTcaFcInputBytes1qtrClass2RateMax

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362983: fltTcaFcInputBytes1yearClass2RateMax

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362984: fltTcaFcInputBytes5minClass2RateAvg

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362985: fltTcaFcInputBytes15minClass2RateAvg

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362986: fltTcaFcInputBytes1hClass2RateAvg

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362987: fltTcaFcInputBytes1dClass2RateAvg

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362988: fltTcaFcInputBytes1wClass2RateAvg

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362989: fltTcaFcInputBytes1moClass2RateAvg

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362990: fltTcaFcInputBytes1qtrClass2RateAvg

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F362991: fltTcaFcInputBytes1yearClass2RateAvg

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363024: fltTcaFcInputBytes5minClass2RateTr

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363025: fltTcaFcInputBytes15minClass2RateTr

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363026: fltTcaFcInputBytes1hClass2RateTr

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363027: fltTcaFcInputBytes1dClass2RateTr

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363028: fltTcaFcInputBytes1wClass2RateTr

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363029: fltTcaFcInputBytes1moClass2RateTr

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363030: fltTcaFcInputBytes1qtrClass2RateTr

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363031: fltTcaFcInputBytes1yearClass2RateTr

Severity: variable

Explanation: This fault is caused by "input class2 bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363080: fltTcaFcInputBytes5minClass3Last

Severity: variable

Explanation: This fault is caused by "input class3 bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363081: fltTcaFcInputBytes15minClass3Last

Severity: variable

Explanation: This fault is caused by "input class3 bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363082: fltTcaFcInputBytes1hClass3Last

Severity: variable

Explanation: This fault is caused by "input class3 bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363083: fltTcaFcInputBytes1dClass3Last

Severity: variable

Explanation: This fault is caused by "input class3 bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363084: fltTcaFcInputBytes1wClass3Last

Severity: variable

Explanation: This fault is caused by "input class3 bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363085: fltTcaFcInputBytes1moClass3Last

Severity: variable

Explanation: This fault is caused by "input class3 bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363086: fltTcaFcInputBytes1qtrClass3Last

Severity: variable

Explanation: This fault is caused by "input class3 bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363087: fltTcaFcInputBytes1yearClass3Last

Severity: variable

Explanation: This fault is caused by "input class3 bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363096: fltTcaFcInputBytes5minClass3Cum

Severity: variable

Explanation: This fault is caused by "input class3 bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363097: fltTcaFcInputBytes15minClass3Cum

Severity: variable

Explanation: This fault is caused by "input class3 bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363098: fltTcaFcInputBytes1hClass3Cum

Severity: variable

Explanation: This fault is caused by "input class3 bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363099: fltTcaFcInputBytes1dClass3Cum

Severity: variable

Explanation: This fault is caused by "input class3 bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3631: fltHinventoryRsVgwToRegionResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F363100: fltTcaFcInputBytes1wClass3Cum

Severity: variable

Explanation: This fault is caused by "input class3 bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363101: fltTcaFcInputBytes1moClass3Cum

Severity: variable

Explanation: This fault is caused by "input class3 bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363102: fltTcaFcInputBytes1qtrClass3Cum

Severity: variable

Explanation: This fault is caused by "input class3 bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363103: fltTcaFcInputBytes1yearClass3Cum

Severity: variable

Explanation: This fault is caused by "input class3 bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363104: fltTcaFcInputBytes5minClass3Per

Severity: variable

Explanation: This fault is caused by "input class3 bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363105: fltTcaFcInputBytes15minClass3Per

Severity: variable

Explanation: This fault is caused by "input class3 bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363106: fltTcaFcInputBytes1hClass3Per

Severity: variable

Explanation: This fault is caused by "input class3 bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363107: fltTcaFcInputBytes1dClass3Per

Severity: variable

Explanation: This fault is caused by "input class3 bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363108: fltTcaFcInputBytes1wClass3Per

Severity: variable

Explanation: This fault is caused by "input class3 bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363109: fltTcaFcInputBytes1moClass3Per

Severity: variable

Explanation: This fault is caused by "input class3 bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363110: fltTcaFcInputBytes1qtrClass3Per

Severity: variable

Explanation: This fault is caused by "input class3 bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363111: fltTcaFcInputBytes1yearClass3Per

Severity: variable

Explanation: This fault is caused by "input class3 bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363112: fltTcaFcInputBytes5minClass3Min

Severity: variable

Explanation: This fault is caused by "input class3 bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363113: fltTcaFcInputBytes15minClass3Min

Severity: variable

Explanation: This fault is caused by "input class3 bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363114: fltTcaFcInputBytes1hClass3Min

Severity: variable

Explanation: This fault is caused by "input class3 bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363115: fltTcaFcInputBytes1dClass3Min

Severity: variable

Explanation: This fault is caused by "input class3 bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363116: fltTcaFcInputBytes1wClass3Min

Severity: variable

Explanation: This fault is caused by "input class3 bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363117: fltTcaFcInputBytes1moClass3Min

Severity: variable

Explanation: This fault is caused by "input class3 bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363118: fltTcaFcInputBytes1qtrClass3Min

Severity: variable

Explanation: This fault is caused by "input class3 bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363119: fltTcaFcInputBytes1yearClass3Min

Severity: variable

Explanation: This fault is caused by "input class3 bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363120: fltTcaFcInputBytes5minClass3Max

Severity: variable

Explanation: This fault is caused by "input class3 bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363121: fltTcaFcInputBytes15minClass3Max

Severity: variable

Explanation: This fault is caused by "input class3 bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363122: fltTcaFcInputBytes1hClass3Max

Severity: variable

Explanation: This fault is caused by "input class3 bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363123: fltTcaFcInputBytes1dClass3Max

Severity: variable

Explanation: This fault is caused by "input class3 bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363124: fltTcaFcInputBytes1wClass3Max

Severity: variable

Explanation: This fault is caused by "input class3 bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363125: fltTcaFcInputBytes1moClass3Max

Severity: variable

Explanation: This fault is caused by "input class3 bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363126: fltTcaFcInputBytes1qtrClass3Max

Severity: variable

Explanation: This fault is caused by "input class3 bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363127: fltTcaFcInputBytes1yearClass3Max

Severity: variable

Explanation: This fault is caused by "input class3 bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363128: fltTcaFcInputBytes5minClass3Avg

Severity: variable

Explanation: This fault is caused by "input class3 bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363129: fltTcaFcInputBytes15minClass3Avg

Severity: variable

Explanation: This fault is caused by "input class3 bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363130: fltTcaFcInputBytes1hClass3Avg

Severity: variable

Explanation: This fault is caused by "input class3 bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363131: fltTcaFcInputBytes1dClass3Avg

Severity: variable

Explanation: This fault is caused by "input class3 bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363132: fltTcaFcInputBytes1wClass3Avg

Severity: variable

Explanation: This fault is caused by "input class3 bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363133: fltTcaFcInputBytes1moClass3Avg

Severity: variable

Explanation: This fault is caused by "input class3 bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363134: fltTcaFcInputBytes1qtrClass3Avg

Severity: variable

Explanation: This fault is caused by "input class3 bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363135: fltTcaFcInputBytes1yearClass3Avg

Severity: variable

Explanation: This fault is caused by "input class3 bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363160: fltTcaFcInputBytes5minClass3Tr

Severity: variable

Explanation: This fault is caused by "input class3 bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363161: fltTcaFcInputBytes15minClass3Tr

Severity: variable

Explanation: This fault is caused by "input class3 bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363162: fltTcaFcInputBytes1hClass3Tr

Severity: variable

Explanation: This fault is caused by "input class3 bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363163: fltTcaFcInputBytes1dClass3Tr

Severity: variable

Explanation: This fault is caused by "input class3 bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363164: fltTcaFcInputBytes1wClass3Tr

Severity: variable

Explanation: This fault is caused by "input class3 bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363165: fltTcaFcInputBytes1moClass3Tr

Severity: variable

Explanation: This fault is caused by "input class3 bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363166: fltTcaFcInputBytes1qtrClass3Tr

Severity: variable

Explanation: This fault is caused by "input class3 bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363167: fltTcaFcInputBytes1yearClass3Tr

Severity: variable

Explanation: This fault is caused by "input class3 bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363168: fltTcaFcInputBytes5minClass3Rate

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363169: fltTcaFcInputBytes15minClass3Rate

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363170: fltTcaFcInputBytes1hClass3Rate

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363171: fltTcaFcInputBytes1dClass3Rate

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363172: fltTcaFcInputBytes1wClass3Rate

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363173: fltTcaFcInputBytes1moClass3Rate

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363174: fltTcaFcInputBytes1qtrClass3Rate

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363175: fltTcaFcInputBytes1yearClass3Rate

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3632: fltAnalyticsRsRecordSsxAttResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F363248: fltTcaFcInputBytes5minClass3RateLast

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363249: fltTcaFcInputBytes15minClass3RateLast

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363250: fltTcaFcInputBytes1hClass3RateLast

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363251: fltTcaFcInputBytes1dClass3RateLast

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363252: fltTcaFcInputBytes1wClass3RateLast

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363253: fltTcaFcInputBytes1moClass3RateLast

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363254: fltTcaFcInputBytes1qtrClass3RateLast

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363255: fltTcaFcInputBytes1yearClass3RateLast

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363256: fltTcaFcInputBytes5minClass3RateMin

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363257: fltTcaFcInputBytes15minClass3RateMin

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363258: fltTcaFcInputBytes1hClass3RateMin

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363259: fltTcaFcInputBytes1dClass3RateMin

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363260: fltTcaFcInputBytes1wClass3RateMin

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363261: fltTcaFcInputBytes1moClass3RateMin

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363262: fltTcaFcInputBytes1qtrClass3RateMin

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363263: fltTcaFcInputBytes1yearClass3RateMin

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363264: fltTcaFcInputBytes5minClass3RateMax

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363265: fltTcaFcInputBytes15minClass3RateMax

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363266: fltTcaFcInputBytes1hClass3RateMax

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363267: fltTcaFcInputBytes1dClass3RateMax

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363268: fltTcaFcInputBytes1wClass3RateMax

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363269: fltTcaFcInputBytes1moClass3RateMax

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363270: fltTcaFcInputBytes1qtrClass3RateMax

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363271: fltTcaFcInputBytes1yearClass3RateMax

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363272: fltTcaFcInputBytes5minClass3RateAvg

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363273: fltTcaFcInputBytes15minClass3RateAvg

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363274: fltTcaFcInputBytes1hClass3RateAvg

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363275: fltTcaFcInputBytes1dClass3RateAvg

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363276: fltTcaFcInputBytes1wClass3RateAvg

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363277: fltTcaFcInputBytes1moClass3RateAvg

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363278: fltTcaFcInputBytes1qtrClass3RateAvg

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363279: fltTcaFcInputBytes1yearClass3RateAvg

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363312: fltTcaFcInputBytes5minClass3RateTr

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363313: fltTcaFcInputBytes15minClass3RateTr

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363314: fltTcaFcInputBytes1hClass3RateTr

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363315: fltTcaFcInputBytes1dClass3RateTr

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363316: fltTcaFcInputBytes1wClass3RateTr

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363317: fltTcaFcInputBytes1moClass3RateTr

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363318: fltTcaFcInputBytes1qtrClass3RateTr

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363319: fltTcaFcInputBytes1yearClass3RateTr

Severity: variable

Explanation: This fault is caused by "input class3 bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363368: fltTcaFcInputBytes5minClassfLast

Severity: variable

Explanation: This fault is caused by "input classf bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363369: fltTcaFcInputBytes15minClassfLast

Severity: variable

Explanation: This fault is caused by "input classf bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363370: fltTcaFcInputBytes1hClassfLast

Severity: variable

Explanation: This fault is caused by "input classf bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363371: fltTcaFcInputBytes1dClassfLast

Severity: variable

Explanation: This fault is caused by "input classf bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363372: fltTcaFcInputBytes1wClassfLast

Severity: variable

Explanation: This fault is caused by "input classf bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363373: fltTcaFcInputBytes1moClassfLast

Severity: variable

Explanation: This fault is caused by "input classf bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363374: fltTcaFcInputBytes1qtrClassfLast

Severity: variable

Explanation: This fault is caused by "input classf bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363375: fltTcaFcInputBytes1yearClassfLast

Severity: variable

Explanation: This fault is caused by "input classf bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363384: fltTcaFcInputBytes5minClassfCum

Severity: variable

Explanation: This fault is caused by "input classf bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363385: fltTcaFcInputBytes15minClassfCum

Severity: variable

Explanation: This fault is caused by "input classf bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363386: fltTcaFcInputBytes1hClassfCum

Severity: variable

Explanation: This fault is caused by "input classf bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363387: fltTcaFcInputBytes1dClassfCum

Severity: variable

Explanation: This fault is caused by "input classf bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363388: fltTcaFcInputBytes1wClassfCum

Severity: variable

Explanation: This fault is caused by "input classf bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363389: fltTcaFcInputBytes1moClassfCum

Severity: variable

Explanation: This fault is caused by "input classf bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363390: fltTcaFcInputBytes1qtrClassfCum

Severity: variable

Explanation: This fault is caused by "input classf bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363391: fltTcaFcInputBytes1yearClassfCum

Severity: variable

Explanation: This fault is caused by "input classf bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363392: fltTcaFcInputBytes5minClassfPer

Severity: variable

Explanation: This fault is caused by "input classf bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363393: fltTcaFcInputBytes15minClassfPer

Severity: variable

Explanation: This fault is caused by "input classf bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363394: fltTcaFcInputBytes1hClassfPer

Severity: variable

Explanation: This fault is caused by "input classf bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363395: fltTcaFcInputBytes1dClassfPer

Severity: variable

Explanation: This fault is caused by "input classf bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363396: fltTcaFcInputBytes1wClassfPer

Severity: variable

Explanation: This fault is caused by "input classf bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363397: fltTcaFcInputBytes1moClassfPer

Severity: variable

Explanation: This fault is caused by "input classf bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363398: fltTcaFcInputBytes1qtrClassfPer

Severity: variable

Explanation: This fault is caused by "input classf bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363399: fltTcaFcInputBytes1yearClassfPer

Severity: variable

Explanation: This fault is caused by "input classf bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3634: fltBgpRsBestPathCtrlPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F363400: fltTcaFcInputBytes5minClassfMin

Severity: variable

Explanation: This fault is caused by "input classf bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363401: fltTcaFcInputBytes15minClassfMin

Severity: variable

Explanation: This fault is caused by "input classf bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363402: fltTcaFcInputBytes1hClassfMin

Severity: variable

Explanation: This fault is caused by "input classf bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363403: fltTcaFcInputBytes1dClassfMin

Severity: variable

Explanation: This fault is caused by "input classf bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363404: fltTcaFcInputBytes1wClassfMin

Severity: variable

Explanation: This fault is caused by "input classf bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363405: fltTcaFcInputBytes1moClassfMin

Severity: variable

Explanation: This fault is caused by "input classf bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363406: fltTcaFcInputBytes1qtrClassfMin

Severity: variable

Explanation: This fault is caused by "input classf bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363407: fltTcaFcInputBytes1yearClassfMin

Severity: variable

Explanation: This fault is caused by "input classf bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363408: fltTcaFcInputBytes5minClassfMax

Severity: variable

Explanation: This fault is caused by "input classf bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363409: fltTcaFcInputBytes15minClassfMax

Severity: variable

Explanation: This fault is caused by "input classf bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363410: fltTcaFcInputBytes1hClassfMax

Severity: variable

Explanation: This fault is caused by "input classf bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363411: fltTcaFcInputBytes1dClassfMax

Severity: variable

Explanation: This fault is caused by "input classf bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363412: fltTcaFcInputBytes1wClassfMax

Severity: variable

Explanation: This fault is caused by "input classf bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363413: fltTcaFcInputBytes1moClassfMax

Severity: variable

Explanation: This fault is caused by "input classf bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363414: fltTcaFcInputBytes1qtrClassfMax

Severity: variable

Explanation: This fault is caused by "input classf bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363415: fltTcaFcInputBytes1yearClassfMax

Severity: variable

Explanation: This fault is caused by "input classf bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363416: fltTcaFcInputBytes5minClassfAvg

Severity: variable

Explanation: This fault is caused by "input classf bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363417: fltTcaFcInputBytes15minClassfAvg

Severity: variable

Explanation: This fault is caused by "input classf bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363418: fltTcaFcInputBytes1hClassfAvg

Severity: variable

Explanation: This fault is caused by "input classf bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363419: fltTcaFcInputBytes1dClassfAvg

Severity: variable

Explanation: This fault is caused by "input classf bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363420: fltTcaFcInputBytes1wClassfAvg

Severity: variable

Explanation: This fault is caused by "input classf bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363421: fltTcaFcInputBytes1moClassfAvg

Severity: variable

Explanation: This fault is caused by "input classf bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363422: fltTcaFcInputBytes1qtrClassfAvg

Severity: variable

Explanation: This fault is caused by "input classf bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363423: fltTcaFcInputBytes1yearClassfAvg

Severity: variable

Explanation: This fault is caused by "input classf bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363448: fltTcaFcInputBytes5minClassfTr

Severity: variable

Explanation: This fault is caused by "input classf bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363449: fltTcaFcInputBytes15minClassfTr

Severity: variable

Explanation: This fault is caused by "input classf bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363450: fltTcaFcInputBytes1hClassfTr

Severity: variable

Explanation: This fault is caused by "input classf bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363451: fltTcaFcInputBytes1dClassfTr

Severity: variable

Explanation: This fault is caused by "input classf bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363452: fltTcaFcInputBytes1wClassfTr

Severity: variable

Explanation: This fault is caused by "input classf bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363453: fltTcaFcInputBytes1moClassfTr

Severity: variable

Explanation: This fault is caused by "input classf bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363454: fltTcaFcInputBytes1qtrClassfTr

Severity: variable

Explanation: This fault is caused by "input classf bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363455: fltTcaFcInputBytes1yearClassfTr

Severity: variable

Explanation: This fault is caused by "input classf bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363456: fltTcaFcInputBytes5minClassfRate

Severity: variable

Explanation: This fault is caused by "input classf bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363457: fltTcaFcInputBytes15minClassfRate

Severity: variable

Explanation: This fault is caused by "input classf bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363458: fltTcaFcInputBytes1hClassfRate

Severity: variable

Explanation: This fault is caused by "input classf bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363459: fltTcaFcInputBytes1dClassfRate

Severity: variable

Explanation: This fault is caused by "input classf bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363460: fltTcaFcInputBytes1wClassfRate

Severity: variable

Explanation: This fault is caused by "input classf bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363461: fltTcaFcInputBytes1moClassfRate

Severity: variable

Explanation: This fault is caused by "input classf bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363462: fltTcaFcInputBytes1qtrClassfRate

Severity: variable

Explanation: This fault is caused by "input classf bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363463: fltTcaFcInputBytes1yearClassfRate

Severity: variable

Explanation: This fault is caused by "input classf bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363536: fltTcaFcInputDisFrames5minCrcLast

Severity: variable

Explanation: This fault is caused by "input crc frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363537: fltTcaFcInputDisFrames15minCrcLast

Severity: variable

Explanation: This fault is caused by "input crc frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363538: fltTcaFcInputDisFrames1hCrcLast

Severity: variable

Explanation: This fault is caused by "input crc frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363539: fltTcaFcInputDisFrames1dCrcLast

Severity: variable

Explanation: This fault is caused by "input crc frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363540: fltTcaFcInputDisFrames1wCrcLast

Severity: variable

Explanation: This fault is caused by "input crc frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363541: fltTcaFcInputDisFrames1moCrcLast

Severity: variable

Explanation: This fault is caused by "input crc frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363542: fltTcaFcInputDisFrames1qtrCrcLast

Severity: variable

Explanation: This fault is caused by "input crc frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363543: fltTcaFcInputDisFrames1yearCrcLast

Severity: variable

Explanation: This fault is caused by "input crc frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363552: fltTcaFcInputDisFrames5minCrcCum

Severity: variable

Explanation: This fault is caused by "input crc frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363553: fltTcaFcInputDisFrames15minCrcCum

Severity: variable

Explanation: This fault is caused by "input crc frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363554: fltTcaFcInputDisFrames1hCrcCum

Severity: variable

Explanation: This fault is caused by "input crc frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363555: fltTcaFcInputDisFrames1dCrcCum

Severity: variable

Explanation: This fault is caused by "input crc frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363556: fltTcaFcInputDisFrames1wCrcCum

Severity: variable

Explanation: This fault is caused by "input crc frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363557: fltTcaFcInputDisFrames1moCrcCum

Severity: variable

Explanation: This fault is caused by "input crc frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363558: fltTcaFcInputDisFrames1qtrCrcCum

Severity: variable

Explanation: This fault is caused by "input crc frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363559: fltTcaFcInputDisFrames1yearCrcCum

Severity: variable

Explanation: This fault is caused by "input crc frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363560: fltTcaFcInputDisFrames5minCrcPer

Severity: variable

Explanation: This fault is caused by "input crc frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363561: fltTcaFcInputDisFrames15minCrcPer

Severity: variable

Explanation: This fault is caused by "input crc frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363562: fltTcaFcInputDisFrames1hCrcPer

Severity: variable

Explanation: This fault is caused by "input crc frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363563: fltTcaFcInputDisFrames1dCrcPer

Severity: variable

Explanation: This fault is caused by "input crc frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363564: fltTcaFcInputDisFrames1wCrcPer

Severity: variable

Explanation: This fault is caused by "input crc frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363565: fltTcaFcInputDisFrames1moCrcPer

Severity: variable

Explanation: This fault is caused by "input crc frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363566: fltTcaFcInputDisFrames1qtrCrcPer

Severity: variable

Explanation: This fault is caused by "input crc frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363567: fltTcaFcInputDisFrames1yearCrcPer

Severity: variable

Explanation: This fault is caused by "input crc frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363568: fltTcaFcInputDisFrames5minCrcMin

Severity: variable

Explanation: This fault is caused by "input crc frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363569: fltTcaFcInputDisFrames15minCrcMin

Severity: variable

Explanation: This fault is caused by "input crc frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363570: fltTcaFcInputDisFrames1hCrcMin

Severity: variable

Explanation: This fault is caused by "input crc frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363571: fltTcaFcInputDisFrames1dCrcMin

Severity: variable

Explanation: This fault is caused by "input crc frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363572: fltTcaFcInputDisFrames1wCrcMin

Severity: variable

Explanation: This fault is caused by "input crc frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363573: fltTcaFcInputDisFrames1moCrcMin

Severity: variable

Explanation: This fault is caused by "input crc frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363574: fltTcaFcInputDisFrames1qtrCrcMin

Severity: variable

Explanation: This fault is caused by "input crc frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363575: fltTcaFcInputDisFrames1yearCrcMin

Severity: variable

Explanation: This fault is caused by "input crc frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363576: fltTcaFcInputDisFrames5minCrcMax

Severity: variable

Explanation: This fault is caused by "input crc frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363577: fltTcaFcInputDisFrames15minCrcMax

Severity: variable

Explanation: This fault is caused by "input crc frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363578: fltTcaFcInputDisFrames1hCrcMax

Severity: variable

Explanation: This fault is caused by "input crc frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363579: fltTcaFcInputDisFrames1dCrcMax

Severity: variable

Explanation: This fault is caused by "input crc frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363580: fltTcaFcInputDisFrames1wCrcMax

Severity: variable

Explanation: This fault is caused by "input crc frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363581: fltTcaFcInputDisFrames1moCrcMax

Severity: variable

Explanation: This fault is caused by "input crc frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363582: fltTcaFcInputDisFrames1qtrCrcMax

Severity: variable

Explanation: This fault is caused by "input crc frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363583: fltTcaFcInputDisFrames1yearCrcMax

Severity: variable

Explanation: This fault is caused by "input crc frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363584: fltTcaFcInputDisFrames5minCrcAvg

Severity: variable

Explanation: This fault is caused by "input crc frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363585: fltTcaFcInputDisFrames15minCrcAvg

Severity: variable

Explanation: This fault is caused by "input crc frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363586: fltTcaFcInputDisFrames1hCrcAvg

Severity: variable

Explanation: This fault is caused by "input crc frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363587: fltTcaFcInputDisFrames1dCrcAvg

Severity: variable

Explanation: This fault is caused by "input crc frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363588: fltTcaFcInputDisFrames1wCrcAvg

Severity: variable

Explanation: This fault is caused by "input crc frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363589: fltTcaFcInputDisFrames1moCrcAvg

Severity: variable

Explanation: This fault is caused by "input crc frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363590: fltTcaFcInputDisFrames1qtrCrcAvg

Severity: variable

Explanation: This fault is caused by "input crc frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363591: fltTcaFcInputDisFrames1yearCrcAvg

Severity: variable

Explanation: This fault is caused by "input crc frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363616: fltTcaFcInputDisFrames5minCrcTr

Severity: variable

Explanation: This fault is caused by "input crc frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363617: fltTcaFcInputDisFrames15minCrcTr

Severity: variable

Explanation: This fault is caused by "input crc frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363618: fltTcaFcInputDisFrames1hCrcTr

Severity: variable

Explanation: This fault is caused by "input crc frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363619: fltTcaFcInputDisFrames1dCrcTr

Severity: variable

Explanation: This fault is caused by "input crc frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363620: fltTcaFcInputDisFrames1wCrcTr

Severity: variable

Explanation: This fault is caused by "input crc frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363621: fltTcaFcInputDisFrames1moCrcTr

Severity: variable

Explanation: This fault is caused by "input crc frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363622: fltTcaFcInputDisFrames1qtrCrcTr

Severity: variable

Explanation: This fault is caused by "input crc frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363623: fltTcaFcInputDisFrames1yearCrcTr

Severity: variable

Explanation: This fault is caused by "input crc frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363624: fltTcaFcInputDisFrames5minCrcRate

Severity: variable

Explanation: This fault is caused by "input crc frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363625: fltTcaFcInputDisFrames15minCrcRate

Severity: variable

Explanation: This fault is caused by "input crc frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363626: fltTcaFcInputDisFrames1hCrcRate

Severity: variable

Explanation: This fault is caused by "input crc frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363627: fltTcaFcInputDisFrames1dCrcRate

Severity: variable

Explanation: This fault is caused by "input crc frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363628: fltTcaFcInputDisFrames1wCrcRate

Severity: variable

Explanation: This fault is caused by "input crc frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363629: fltTcaFcInputDisFrames1moCrcRate

Severity: variable

Explanation: This fault is caused by "input crc frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363630: fltTcaFcInputDisFrames1qtrCrcRate

Severity: variable

Explanation: This fault is caused by "input crc frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363631: fltTcaFcInputDisFrames1yearCrcRate

Severity: variable

Explanation: This fault is caused by "input crc frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input crc frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363704: fltTcaFcInputDisFrames5minDiscardsLast

Severity: variable

Explanation: This fault is caused by "input discards frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363705: fltTcaFcInputDisFrames15minDiscardsLast

Severity: variable

Explanation: This fault is caused by "input discards frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363706: fltTcaFcInputDisFrames1hDiscardsLast

Severity: variable

Explanation: This fault is caused by "input discards frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363707: fltTcaFcInputDisFrames1dDiscardsLast

Severity: variable

Explanation: This fault is caused by "input discards frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363708: fltTcaFcInputDisFrames1wDiscardsLast

Severity: variable

Explanation: This fault is caused by "input discards frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363709: fltTcaFcInputDisFrames1moDiscardsLast

Severity: variable

Explanation: This fault is caused by "input discards frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363710: fltTcaFcInputDisFrames1qtrDiscardsLast

Severity: variable

Explanation: This fault is caused by "input discards frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363711: fltTcaFcInputDisFrames1yearDiscardsLast

Severity: variable

Explanation: This fault is caused by "input discards frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363720: fltTcaFcInputDisFrames5minDiscardsCum

Severity: variable

Explanation: This fault is caused by "input discards frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363721: fltTcaFcInputDisFrames15minDiscardsCum

Severity: variable

Explanation: This fault is caused by "input discards frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363722: fltTcaFcInputDisFrames1hDiscardsCum

Severity: variable

Explanation: This fault is caused by "input discards frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363723: fltTcaFcInputDisFrames1dDiscardsCum

Severity: variable

Explanation: This fault is caused by "input discards frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363724: fltTcaFcInputDisFrames1wDiscardsCum

Severity: variable

Explanation: This fault is caused by "input discards frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363725: fltTcaFcInputDisFrames1moDiscardsCum

Severity: variable

Explanation: This fault is caused by "input discards frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363726: fltTcaFcInputDisFrames1qtrDiscardsCum

Severity: variable

Explanation: This fault is caused by "input discards frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363727: fltTcaFcInputDisFrames1yearDiscardsCum

Severity: variable

Explanation: This fault is caused by "input discards frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363728: fltTcaFcInputDisFrames5minDiscardsPer

Severity: variable

Explanation: This fault is caused by "input discards frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363729: fltTcaFcInputDisFrames15minDiscardsPer

Severity: variable

Explanation: This fault is caused by "input discards frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363730: fltTcaFcInputDisFrames1hDiscardsPer

Severity: variable

Explanation: This fault is caused by "input discards frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363731: fltTcaFcInputDisFrames1dDiscardsPer

Severity: variable

Explanation: This fault is caused by "input discards frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363732: fltTcaFcInputDisFrames1wDiscardsPer

Severity: variable

Explanation: This fault is caused by "input discards frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363733: fltTcaFcInputDisFrames1moDiscardsPer

Severity: variable

Explanation: This fault is caused by "input discards frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363734: fltTcaFcInputDisFrames1qtrDiscardsPer

Severity: variable

Explanation: This fault is caused by "input discards frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363735: fltTcaFcInputDisFrames1yearDiscardsPer

Severity: variable

Explanation: This fault is caused by "input discards frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363736: fltTcaFcInputDisFrames5minDiscardsMin

Severity: variable

Explanation: This fault is caused by "input discards frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363737: fltTcaFcInputDisFrames15minDiscardsMin

Severity: variable

Explanation: This fault is caused by "input discards frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363738: fltTcaFcInputDisFrames1hDiscardsMin

Severity: variable

Explanation: This fault is caused by "input discards frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363739: fltTcaFcInputDisFrames1dDiscardsMin

Severity: variable

Explanation: This fault is caused by "input discards frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363740: fltTcaFcInputDisFrames1wDiscardsMin

Severity: variable

Explanation: This fault is caused by "input discards frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363741: fltTcaFcInputDisFrames1moDiscardsMin

Severity: variable

Explanation: This fault is caused by "input discards frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363742: fltTcaFcInputDisFrames1qtrDiscardsMin

Severity: variable

Explanation: This fault is caused by "input discards frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363743: fltTcaFcInputDisFrames1yearDiscardsMin

Severity: variable

Explanation: This fault is caused by "input discards frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363744: fltTcaFcInputDisFrames5minDiscardsMax

Severity: variable

Explanation: This fault is caused by "input discards frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363745: fltTcaFcInputDisFrames15minDiscardsMax

Severity: variable

Explanation: This fault is caused by "input discards frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363746: fltTcaFcInputDisFrames1hDiscardsMax

Severity: variable

Explanation: This fault is caused by "input discards frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363747: fltTcaFcInputDisFrames1dDiscardsMax

Severity: variable

Explanation: This fault is caused by "input discards frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363748: fltTcaFcInputDisFrames1wDiscardsMax

Severity: variable

Explanation: This fault is caused by "input discards frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363749: fltTcaFcInputDisFrames1moDiscardsMax

Severity: variable

Explanation: This fault is caused by "input discards frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363750: fltTcaFcInputDisFrames1qtrDiscardsMax

Severity: variable

Explanation: This fault is caused by "input discards frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363751: fltTcaFcInputDisFrames1yearDiscardsMax

Severity: variable

Explanation: This fault is caused by "input discards frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363752: fltTcaFcInputDisFrames5minDiscardsAvg

Severity: variable

Explanation: This fault is caused by "input discards frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363753: fltTcaFcInputDisFrames15minDiscardsAvg

Severity: variable

Explanation: This fault is caused by "input discards frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363754: fltTcaFcInputDisFrames1hDiscardsAvg

Severity: variable

Explanation: This fault is caused by "input discards frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363755: fltTcaFcInputDisFrames1dDiscardsAvg

Severity: variable

Explanation: This fault is caused by "input discards frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363756: fltTcaFcInputDisFrames1wDiscardsAvg

Severity: variable

Explanation: This fault is caused by "input discards frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363757: fltTcaFcInputDisFrames1moDiscardsAvg

Severity: variable

Explanation: This fault is caused by "input discards frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363758: fltTcaFcInputDisFrames1qtrDiscardsAvg

Severity: variable

Explanation: This fault is caused by "input discards frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363759: fltTcaFcInputDisFrames1yearDiscardsAvg

Severity: variable

Explanation: This fault is caused by "input discards frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363784: fltTcaFcInputDisFrames5minDiscardsTr

Severity: variable

Explanation: This fault is caused by "input discards frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363785: fltTcaFcInputDisFrames15minDiscardsTr

Severity: variable

Explanation: This fault is caused by "input discards frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363786: fltTcaFcInputDisFrames1hDiscardsTr

Severity: variable

Explanation: This fault is caused by "input discards frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363787: fltTcaFcInputDisFrames1dDiscardsTr

Severity: variable

Explanation: This fault is caused by "input discards frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363788: fltTcaFcInputDisFrames1wDiscardsTr

Severity: variable

Explanation: This fault is caused by "input discards frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363789: fltTcaFcInputDisFrames1moDiscardsTr

Severity: variable

Explanation: This fault is caused by "input discards frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363790: fltTcaFcInputDisFrames1qtrDiscardsTr

Severity: variable

Explanation: This fault is caused by "input discards frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363791: fltTcaFcInputDisFrames1yearDiscardsTr

Severity: variable

Explanation: This fault is caused by "input discards frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363792: fltTcaFcInputDisFrames5minDiscardsRate

Severity: variable

Explanation: This fault is caused by "input discards frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363793: fltTcaFcInputDisFrames15minDiscardsRate

Severity: variable

Explanation: This fault is caused by "input discards frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363794: fltTcaFcInputDisFrames1hDiscardsRate

Severity: variable

Explanation: This fault is caused by "input discards frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363795: fltTcaFcInputDisFrames1dDiscardsRate

Severity: variable

Explanation: This fault is caused by "input discards frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363796: fltTcaFcInputDisFrames1wDiscardsRate

Severity: variable

Explanation: This fault is caused by "input discards frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363797: fltTcaFcInputDisFrames1moDiscardsRate

Severity: variable

Explanation: This fault is caused by "input discards frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363798: fltTcaFcInputDisFrames1qtrDiscardsRate

Severity: variable

Explanation: This fault is caused by "input discards frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363799: fltTcaFcInputDisFrames1yearDiscardsRate

Severity: variable

Explanation: This fault is caused by "input discards frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363872: fltTcaFcInputDisFrames5minErrorsLast

Severity: variable

Explanation: This fault is caused by "input errors frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363873: fltTcaFcInputDisFrames15minErrorsLast

Severity: variable

Explanation: This fault is caused by "input errors frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363874: fltTcaFcInputDisFrames1hErrorsLast

Severity: variable

Explanation: This fault is caused by "input errors frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363875: fltTcaFcInputDisFrames1dErrorsLast

Severity: variable

Explanation: This fault is caused by "input errors frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363876: fltTcaFcInputDisFrames1wErrorsLast

Severity: variable

Explanation: This fault is caused by "input errors frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363877: fltTcaFcInputDisFrames1moErrorsLast

Severity: variable

Explanation: This fault is caused by "input errors frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363878: fltTcaFcInputDisFrames1qtrErrorsLast

Severity: variable

Explanation: This fault is caused by "input errors frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363879: fltTcaFcInputDisFrames1yearErrorsLast

Severity: variable

Explanation: This fault is caused by "input errors frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363888: fltTcaFcInputDisFrames5minErrorsCum

Severity: variable

Explanation: This fault is caused by "input errors frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363889: fltTcaFcInputDisFrames15minErrorsCum

Severity: variable

Explanation: This fault is caused by "input errors frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363890: fltTcaFcInputDisFrames1hErrorsCum

Severity: variable

Explanation: This fault is caused by "input errors frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363891: fltTcaFcInputDisFrames1dErrorsCum

Severity: variable

Explanation: This fault is caused by "input errors frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363892: fltTcaFcInputDisFrames1wErrorsCum

Severity: variable

Explanation: This fault is caused by "input errors frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363893: fltTcaFcInputDisFrames1moErrorsCum

Severity: variable

Explanation: This fault is caused by "input errors frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363894: fltTcaFcInputDisFrames1qtrErrorsCum

Severity: variable

Explanation: This fault is caused by "input errors frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363895: fltTcaFcInputDisFrames1yearErrorsCum

Severity: variable

Explanation: This fault is caused by "input errors frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363896: fltTcaFcInputDisFrames5minErrorsPer

Severity: variable

Explanation: This fault is caused by "input errors frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363897: fltTcaFcInputDisFrames15minErrorsPer

Severity: variable

Explanation: This fault is caused by "input errors frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363898: fltTcaFcInputDisFrames1hErrorsPer

Severity: variable

Explanation: This fault is caused by "input errors frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363899: fltTcaFcInputDisFrames1dErrorsPer

Severity: variable

Explanation: This fault is caused by "input errors frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363900: fltTcaFcInputDisFrames1wErrorsPer

Severity: variable

Explanation: This fault is caused by "input errors frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363901: fltTcaFcInputDisFrames1moErrorsPer

Severity: variable

Explanation: This fault is caused by "input errors frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363902: fltTcaFcInputDisFrames1qtrErrorsPer

Severity: variable

Explanation: This fault is caused by "input errors frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363903: fltTcaFcInputDisFrames1yearErrorsPer

Severity: variable

Explanation: This fault is caused by "input errors frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363904: fltTcaFcInputDisFrames5minErrorsMin

Severity: variable

Explanation: This fault is caused by "input errors frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363905: fltTcaFcInputDisFrames15minErrorsMin

Severity: variable

Explanation: This fault is caused by "input errors frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363906: fltTcaFcInputDisFrames1hErrorsMin

Severity: variable

Explanation: This fault is caused by "input errors frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363907: fltTcaFcInputDisFrames1dErrorsMin

Severity: variable

Explanation: This fault is caused by "input errors frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363908: fltTcaFcInputDisFrames1wErrorsMin

Severity: variable

Explanation: This fault is caused by "input errors frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363909: fltTcaFcInputDisFrames1moErrorsMin

Severity: variable

Explanation: This fault is caused by "input errors frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363910: fltTcaFcInputDisFrames1qtrErrorsMin

Severity: variable

Explanation: This fault is caused by "input errors frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363911: fltTcaFcInputDisFrames1yearErrorsMin

Severity: variable

Explanation: This fault is caused by "input errors frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363912: fltTcaFcInputDisFrames5minErrorsMax

Severity: variable

Explanation: This fault is caused by "input errors frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363913: fltTcaFcInputDisFrames15minErrorsMax

Severity: variable

Explanation: This fault is caused by "input errors frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363914: fltTcaFcInputDisFrames1hErrorsMax

Severity: variable

Explanation: This fault is caused by "input errors frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363915: fltTcaFcInputDisFrames1dErrorsMax

Severity: variable

Explanation: This fault is caused by "input errors frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363916: fltTcaFcInputDisFrames1wErrorsMax

Severity: variable

Explanation: This fault is caused by "input errors frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363917: fltTcaFcInputDisFrames1moErrorsMax

Severity: variable

Explanation: This fault is caused by "input errors frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363918: fltTcaFcInputDisFrames1qtrErrorsMax

Severity: variable

Explanation: This fault is caused by "input errors frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363919: fltTcaFcInputDisFrames1yearErrorsMax

Severity: variable

Explanation: This fault is caused by "input errors frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363920: fltTcaFcInputDisFrames5minErrorsAvg

Severity: variable

Explanation: This fault is caused by "input errors frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363921: fltTcaFcInputDisFrames15minErrorsAvg

Severity: variable

Explanation: This fault is caused by "input errors frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363922: fltTcaFcInputDisFrames1hErrorsAvg

Severity: variable

Explanation: This fault is caused by "input errors frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363923: fltTcaFcInputDisFrames1dErrorsAvg

Severity: variable

Explanation: This fault is caused by "input errors frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363924: fltTcaFcInputDisFrames1wErrorsAvg

Severity: variable

Explanation: This fault is caused by "input errors frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363925: fltTcaFcInputDisFrames1moErrorsAvg

Severity: variable

Explanation: This fault is caused by "input errors frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363926: fltTcaFcInputDisFrames1qtrErrorsAvg

Severity: variable

Explanation: This fault is caused by "input errors frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363927: fltTcaFcInputDisFrames1yearErrorsAvg

Severity: variable

Explanation: This fault is caused by "input errors frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363952: fltTcaFcInputDisFrames5minErrorsTr

Severity: variable

Explanation: This fault is caused by "input errors frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363953: fltTcaFcInputDisFrames15minErrorsTr

Severity: variable

Explanation: This fault is caused by "input errors frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363954: fltTcaFcInputDisFrames1hErrorsTr

Severity: variable

Explanation: This fault is caused by "input errors frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363955: fltTcaFcInputDisFrames1dErrorsTr

Severity: variable

Explanation: This fault is caused by "input errors frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363956: fltTcaFcInputDisFrames1wErrorsTr

Severity: variable

Explanation: This fault is caused by "input errors frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363957: fltTcaFcInputDisFrames1moErrorsTr

Severity: variable

Explanation: This fault is caused by "input errors frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363958: fltTcaFcInputDisFrames1qtrErrorsTr

Severity: variable

Explanation: This fault is caused by "input errors frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363959: fltTcaFcInputDisFrames1yearErrorsTr

Severity: variable

Explanation: This fault is caused by "input errors frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363960: fltTcaFcInputDisFrames5minErrorsRate

Severity: variable

Explanation: This fault is caused by "input errors frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363961: fltTcaFcInputDisFrames15minErrorsRate

Severity: variable

Explanation: This fault is caused by "input errors frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363962: fltTcaFcInputDisFrames1hErrorsRate

Severity: variable

Explanation: This fault is caused by "input errors frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363963: fltTcaFcInputDisFrames1dErrorsRate

Severity: variable

Explanation: This fault is caused by "input errors frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363964: fltTcaFcInputDisFrames1wErrorsRate

Severity: variable

Explanation: This fault is caused by "input errors frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363965: fltTcaFcInputDisFrames1moErrorsRate

Severity: variable

Explanation: This fault is caused by "input errors frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363966: fltTcaFcInputDisFrames1qtrErrorsRate

Severity: variable

Explanation: This fault is caused by "input errors frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F363967: fltTcaFcInputDisFrames1yearErrorsRate

Severity: variable

Explanation: This fault is caused by "input errors frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364040: fltTcaFcInputFrames5minClass2Last

Severity: variable

Explanation: This fault is caused by "input class2 frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364041: fltTcaFcInputFrames15minClass2Last

Severity: variable

Explanation: This fault is caused by "input class2 frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364042: fltTcaFcInputFrames1hClass2Last

Severity: variable

Explanation: This fault is caused by "input class2 frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364043: fltTcaFcInputFrames1dClass2Last

Severity: variable

Explanation: This fault is caused by "input class2 frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364044: fltTcaFcInputFrames1wClass2Last

Severity: variable

Explanation: This fault is caused by "input class2 frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364045: fltTcaFcInputFrames1moClass2Last

Severity: variable

Explanation: This fault is caused by "input class2 frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364046: fltTcaFcInputFrames1qtrClass2Last

Severity: variable

Explanation: This fault is caused by "input class2 frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364047: fltTcaFcInputFrames1yearClass2Last

Severity: variable

Explanation: This fault is caused by "input class2 frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364056: fltTcaFcInputFrames5minClass2Cum

Severity: variable

Explanation: This fault is caused by "input class2 frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364057: fltTcaFcInputFrames15minClass2Cum

Severity: variable

Explanation: This fault is caused by "input class2 frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364058: fltTcaFcInputFrames1hClass2Cum

Severity: variable

Explanation: This fault is caused by "input class2 frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364059: fltTcaFcInputFrames1dClass2Cum

Severity: variable

Explanation: This fault is caused by "input class2 frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364060: fltTcaFcInputFrames1wClass2Cum

Severity: variable

Explanation: This fault is caused by "input class2 frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364061: fltTcaFcInputFrames1moClass2Cum

Severity: variable

Explanation: This fault is caused by "input class2 frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364062: fltTcaFcInputFrames1qtrClass2Cum

Severity: variable

Explanation: This fault is caused by "input class2 frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364063: fltTcaFcInputFrames1yearClass2Cum

Severity: variable

Explanation: This fault is caused by "input class2 frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364064: fltTcaFcInputFrames5minClass2Per

Severity: variable

Explanation: This fault is caused by "input class2 frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364065: fltTcaFcInputFrames15minClass2Per

Severity: variable

Explanation: This fault is caused by "input class2 frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364066: fltTcaFcInputFrames1hClass2Per

Severity: variable

Explanation: This fault is caused by "input class2 frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364067: fltTcaFcInputFrames1dClass2Per

Severity: variable

Explanation: This fault is caused by "input class2 frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364068: fltTcaFcInputFrames1wClass2Per

Severity: variable

Explanation: This fault is caused by "input class2 frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364069: fltTcaFcInputFrames1moClass2Per

Severity: variable

Explanation: This fault is caused by "input class2 frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364070: fltTcaFcInputFrames1qtrClass2Per

Severity: variable

Explanation: This fault is caused by "input class2 frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364071: fltTcaFcInputFrames1yearClass2Per

Severity: variable

Explanation: This fault is caused by "input class2 frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364072: fltTcaFcInputFrames5minClass2Min

Severity: variable

Explanation: This fault is caused by "input class2 frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364073: fltTcaFcInputFrames15minClass2Min

Severity: variable

Explanation: This fault is caused by "input class2 frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364074: fltTcaFcInputFrames1hClass2Min

Severity: variable

Explanation: This fault is caused by "input class2 frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364075: fltTcaFcInputFrames1dClass2Min

Severity: variable

Explanation: This fault is caused by "input class2 frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364076: fltTcaFcInputFrames1wClass2Min

Severity: variable

Explanation: This fault is caused by "input class2 frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364077: fltTcaFcInputFrames1moClass2Min

Severity: variable

Explanation: This fault is caused by "input class2 frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364078: fltTcaFcInputFrames1qtrClass2Min

Severity: variable

Explanation: This fault is caused by "input class2 frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364079: fltTcaFcInputFrames1yearClass2Min

Severity: variable

Explanation: This fault is caused by "input class2 frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364080: fltTcaFcInputFrames5minClass2Max

Severity: variable

Explanation: This fault is caused by "input class2 frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364081: fltTcaFcInputFrames15minClass2Max

Severity: variable

Explanation: This fault is caused by "input class2 frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364082: fltTcaFcInputFrames1hClass2Max

Severity: variable

Explanation: This fault is caused by "input class2 frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364083: fltTcaFcInputFrames1dClass2Max

Severity: variable

Explanation: This fault is caused by "input class2 frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364084: fltTcaFcInputFrames1wClass2Max

Severity: variable

Explanation: This fault is caused by "input class2 frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364085: fltTcaFcInputFrames1moClass2Max

Severity: variable

Explanation: This fault is caused by "input class2 frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364086: fltTcaFcInputFrames1qtrClass2Max

Severity: variable

Explanation: This fault is caused by "input class2 frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364087: fltTcaFcInputFrames1yearClass2Max

Severity: variable

Explanation: This fault is caused by "input class2 frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364088: fltTcaFcInputFrames5minClass2Avg

Severity: variable

Explanation: This fault is caused by "input class2 frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364089: fltTcaFcInputFrames15minClass2Avg

Severity: variable

Explanation: This fault is caused by "input class2 frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364090: fltTcaFcInputFrames1hClass2Avg

Severity: variable

Explanation: This fault is caused by "input class2 frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364091: fltTcaFcInputFrames1dClass2Avg

Severity: variable

Explanation: This fault is caused by "input class2 frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364092: fltTcaFcInputFrames1wClass2Avg

Severity: variable

Explanation: This fault is caused by "input class2 frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364093: fltTcaFcInputFrames1moClass2Avg

Severity: variable

Explanation: This fault is caused by "input class2 frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364094: fltTcaFcInputFrames1qtrClass2Avg

Severity: variable

Explanation: This fault is caused by "input class2 frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364095: fltTcaFcInputFrames1yearClass2Avg

Severity: variable

Explanation: This fault is caused by "input class2 frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364120: fltTcaFcInputFrames5minClass2Tr

Severity: variable

Explanation: This fault is caused by "input class2 frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364121: fltTcaFcInputFrames15minClass2Tr

Severity: variable

Explanation: This fault is caused by "input class2 frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364122: fltTcaFcInputFrames1hClass2Tr

Severity: variable

Explanation: This fault is caused by "input class2 frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364123: fltTcaFcInputFrames1dClass2Tr

Severity: variable

Explanation: This fault is caused by "input class2 frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364124: fltTcaFcInputFrames1wClass2Tr

Severity: variable

Explanation: This fault is caused by "input class2 frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364125: fltTcaFcInputFrames1moClass2Tr

Severity: variable

Explanation: This fault is caused by "input class2 frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364126: fltTcaFcInputFrames1qtrClass2Tr

Severity: variable

Explanation: This fault is caused by "input class2 frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364127: fltTcaFcInputFrames1yearClass2Tr

Severity: variable

Explanation: This fault is caused by "input class2 frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364128: fltTcaFcInputFrames5minClass2Rate

Severity: variable

Explanation: This fault is caused by "input class2 frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364129: fltTcaFcInputFrames15minClass2Rate

Severity: variable

Explanation: This fault is caused by "input class2 frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364130: fltTcaFcInputFrames1hClass2Rate

Severity: variable

Explanation: This fault is caused by "input class2 frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364131: fltTcaFcInputFrames1dClass2Rate

Severity: variable

Explanation: This fault is caused by "input class2 frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364132: fltTcaFcInputFrames1wClass2Rate

Severity: variable

Explanation: This fault is caused by "input class2 frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364133: fltTcaFcInputFrames1moClass2Rate

Severity: variable

Explanation: This fault is caused by "input class2 frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364134: fltTcaFcInputFrames1qtrClass2Rate

Severity: variable

Explanation: This fault is caused by "input class2 frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364135: fltTcaFcInputFrames1yearClass2Rate

Severity: variable

Explanation: This fault is caused by "input class2 frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364208: fltTcaFcInputFrames5minClass3Last

Severity: variable

Explanation: This fault is caused by "input class3 frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364209: fltTcaFcInputFrames15minClass3Last

Severity: variable

Explanation: This fault is caused by "input class3 frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364210: fltTcaFcInputFrames1hClass3Last

Severity: variable

Explanation: This fault is caused by "input class3 frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364211: fltTcaFcInputFrames1dClass3Last

Severity: variable

Explanation: This fault is caused by "input class3 frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364212: fltTcaFcInputFrames1wClass3Last

Severity: variable

Explanation: This fault is caused by "input class3 frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364213: fltTcaFcInputFrames1moClass3Last

Severity: variable

Explanation: This fault is caused by "input class3 frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364214: fltTcaFcInputFrames1qtrClass3Last

Severity: variable

Explanation: This fault is caused by "input class3 frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364215: fltTcaFcInputFrames1yearClass3Last

Severity: variable

Explanation: This fault is caused by "input class3 frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364224: fltTcaFcInputFrames5minClass3Cum

Severity: variable

Explanation: This fault is caused by "input class3 frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364225: fltTcaFcInputFrames15minClass3Cum

Severity: variable

Explanation: This fault is caused by "input class3 frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364226: fltTcaFcInputFrames1hClass3Cum

Severity: variable

Explanation: This fault is caused by "input class3 frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364227: fltTcaFcInputFrames1dClass3Cum

Severity: variable

Explanation: This fault is caused by "input class3 frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364228: fltTcaFcInputFrames1wClass3Cum

Severity: variable

Explanation: This fault is caused by "input class3 frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364229: fltTcaFcInputFrames1moClass3Cum

Severity: variable

Explanation: This fault is caused by "input class3 frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364230: fltTcaFcInputFrames1qtrClass3Cum

Severity: variable

Explanation: This fault is caused by "input class3 frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364231: fltTcaFcInputFrames1yearClass3Cum

Severity: variable

Explanation: This fault is caused by "input class3 frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364232: fltTcaFcInputFrames5minClass3Per

Severity: variable

Explanation: This fault is caused by "input class3 frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364233: fltTcaFcInputFrames15minClass3Per

Severity: variable

Explanation: This fault is caused by "input class3 frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364234: fltTcaFcInputFrames1hClass3Per

Severity: variable

Explanation: This fault is caused by "input class3 frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364235: fltTcaFcInputFrames1dClass3Per

Severity: variable

Explanation: This fault is caused by "input class3 frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364236: fltTcaFcInputFrames1wClass3Per

Severity: variable

Explanation: This fault is caused by "input class3 frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364237: fltTcaFcInputFrames1moClass3Per

Severity: variable

Explanation: This fault is caused by "input class3 frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364238: fltTcaFcInputFrames1qtrClass3Per

Severity: variable

Explanation: This fault is caused by "input class3 frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364239: fltTcaFcInputFrames1yearClass3Per

Severity: variable

Explanation: This fault is caused by "input class3 frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364240: fltTcaFcInputFrames5minClass3Min

Severity: variable

Explanation: This fault is caused by "input class3 frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364241: fltTcaFcInputFrames15minClass3Min

Severity: variable

Explanation: This fault is caused by "input class3 frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364242: fltTcaFcInputFrames1hClass3Min

Severity: variable

Explanation: This fault is caused by "input class3 frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364243: fltTcaFcInputFrames1dClass3Min

Severity: variable

Explanation: This fault is caused by "input class3 frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364244: fltTcaFcInputFrames1wClass3Min

Severity: variable

Explanation: This fault is caused by "input class3 frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364245: fltTcaFcInputFrames1moClass3Min

Severity: variable

Explanation: This fault is caused by "input class3 frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364246: fltTcaFcInputFrames1qtrClass3Min

Severity: variable

Explanation: This fault is caused by "input class3 frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364247: fltTcaFcInputFrames1yearClass3Min

Severity: variable

Explanation: This fault is caused by "input class3 frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364248: fltTcaFcInputFrames5minClass3Max

Severity: variable

Explanation: This fault is caused by "input class3 frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364249: fltTcaFcInputFrames15minClass3Max

Severity: variable

Explanation: This fault is caused by "input class3 frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364250: fltTcaFcInputFrames1hClass3Max

Severity: variable

Explanation: This fault is caused by "input class3 frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364251: fltTcaFcInputFrames1dClass3Max

Severity: variable

Explanation: This fault is caused by "input class3 frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364252: fltTcaFcInputFrames1wClass3Max

Severity: variable

Explanation: This fault is caused by "input class3 frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364253: fltTcaFcInputFrames1moClass3Max

Severity: variable

Explanation: This fault is caused by "input class3 frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364254: fltTcaFcInputFrames1qtrClass3Max

Severity: variable

Explanation: This fault is caused by "input class3 frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364255: fltTcaFcInputFrames1yearClass3Max

Severity: variable

Explanation: This fault is caused by "input class3 frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364256: fltTcaFcInputFrames5minClass3Avg

Severity: variable

Explanation: This fault is caused by "input class3 frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364257: fltTcaFcInputFrames15minClass3Avg

Severity: variable

Explanation: This fault is caused by "input class3 frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364258: fltTcaFcInputFrames1hClass3Avg

Severity: variable

Explanation: This fault is caused by "input class3 frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364259: fltTcaFcInputFrames1dClass3Avg

Severity: variable

Explanation: This fault is caused by "input class3 frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364260: fltTcaFcInputFrames1wClass3Avg

Severity: variable

Explanation: This fault is caused by "input class3 frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364261: fltTcaFcInputFrames1moClass3Avg

Severity: variable

Explanation: This fault is caused by "input class3 frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364262: fltTcaFcInputFrames1qtrClass3Avg

Severity: variable

Explanation: This fault is caused by "input class3 frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364263: fltTcaFcInputFrames1yearClass3Avg

Severity: variable

Explanation: This fault is caused by "input class3 frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364288: fltTcaFcInputFrames5minClass3Tr

Severity: variable

Explanation: This fault is caused by "input class3 frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364289: fltTcaFcInputFrames15minClass3Tr

Severity: variable

Explanation: This fault is caused by "input class3 frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364290: fltTcaFcInputFrames1hClass3Tr

Severity: variable

Explanation: This fault is caused by "input class3 frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364291: fltTcaFcInputFrames1dClass3Tr

Severity: variable

Explanation: This fault is caused by "input class3 frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364292: fltTcaFcInputFrames1wClass3Tr

Severity: variable

Explanation: This fault is caused by "input class3 frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364293: fltTcaFcInputFrames1moClass3Tr

Severity: variable

Explanation: This fault is caused by "input class3 frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364294: fltTcaFcInputFrames1qtrClass3Tr

Severity: variable

Explanation: This fault is caused by "input class3 frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364295: fltTcaFcInputFrames1yearClass3Tr

Severity: variable

Explanation: This fault is caused by "input class3 frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364296: fltTcaFcInputFrames5minClass3Rate

Severity: variable

Explanation: This fault is caused by "input class3 frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364297: fltTcaFcInputFrames15minClass3Rate

Severity: variable

Explanation: This fault is caused by "input class3 frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364298: fltTcaFcInputFrames1hClass3Rate

Severity: variable

Explanation: This fault is caused by "input class3 frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364299: fltTcaFcInputFrames1dClass3Rate

Severity: variable

Explanation: This fault is caused by "input class3 frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364300: fltTcaFcInputFrames1wClass3Rate

Severity: variable

Explanation: This fault is caused by "input class3 frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364301: fltTcaFcInputFrames1moClass3Rate

Severity: variable

Explanation: This fault is caused by "input class3 frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364302: fltTcaFcInputFrames1qtrClass3Rate

Severity: variable

Explanation: This fault is caused by "input class3 frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364303: fltTcaFcInputFrames1yearClass3Rate

Severity: variable

Explanation: This fault is caused by "input class3 frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364376: fltTcaFcInputFrames5minClassfLast

Severity: variable

Explanation: This fault is caused by "input classf frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364377: fltTcaFcInputFrames15minClassfLast

Severity: variable

Explanation: This fault is caused by "input classf frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364378: fltTcaFcInputFrames1hClassfLast

Severity: variable

Explanation: This fault is caused by "input classf frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364379: fltTcaFcInputFrames1dClassfLast

Severity: variable

Explanation: This fault is caused by "input classf frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364380: fltTcaFcInputFrames1wClassfLast

Severity: variable

Explanation: This fault is caused by "input classf frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364381: fltTcaFcInputFrames1moClassfLast

Severity: variable

Explanation: This fault is caused by "input classf frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364382: fltTcaFcInputFrames1qtrClassfLast

Severity: variable

Explanation: This fault is caused by "input classf frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364383: fltTcaFcInputFrames1yearClassfLast

Severity: variable

Explanation: This fault is caused by "input classf frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364392: fltTcaFcInputFrames5minClassfCum

Severity: variable

Explanation: This fault is caused by "input classf frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364393: fltTcaFcInputFrames15minClassfCum

Severity: variable

Explanation: This fault is caused by "input classf frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364394: fltTcaFcInputFrames1hClassfCum

Severity: variable

Explanation: This fault is caused by "input classf frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364395: fltTcaFcInputFrames1dClassfCum

Severity: variable

Explanation: This fault is caused by "input classf frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364396: fltTcaFcInputFrames1wClassfCum

Severity: variable

Explanation: This fault is caused by "input classf frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364397: fltTcaFcInputFrames1moClassfCum

Severity: variable

Explanation: This fault is caused by "input classf frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364398: fltTcaFcInputFrames1qtrClassfCum

Severity: variable

Explanation: This fault is caused by "input classf frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364399: fltTcaFcInputFrames1yearClassfCum

Severity: variable

Explanation: This fault is caused by "input classf frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364400: fltTcaFcInputFrames5minClassfPer

Severity: variable

Explanation: This fault is caused by "input classf frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364401: fltTcaFcInputFrames15minClassfPer

Severity: variable

Explanation: This fault is caused by "input classf frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364402: fltTcaFcInputFrames1hClassfPer

Severity: variable

Explanation: This fault is caused by "input classf frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364403: fltTcaFcInputFrames1dClassfPer

Severity: variable

Explanation: This fault is caused by "input classf frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364404: fltTcaFcInputFrames1wClassfPer

Severity: variable

Explanation: This fault is caused by "input classf frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364405: fltTcaFcInputFrames1moClassfPer

Severity: variable

Explanation: This fault is caused by "input classf frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364406: fltTcaFcInputFrames1qtrClassfPer

Severity: variable

Explanation: This fault is caused by "input classf frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364407: fltTcaFcInputFrames1yearClassfPer

Severity: variable

Explanation: This fault is caused by "input classf frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364408: fltTcaFcInputFrames5minClassfMin

Severity: variable

Explanation: This fault is caused by "input classf frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364409: fltTcaFcInputFrames15minClassfMin

Severity: variable

Explanation: This fault is caused by "input classf frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364410: fltTcaFcInputFrames1hClassfMin

Severity: variable

Explanation: This fault is caused by "input classf frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364411: fltTcaFcInputFrames1dClassfMin

Severity: variable

Explanation: This fault is caused by "input classf frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364412: fltTcaFcInputFrames1wClassfMin

Severity: variable

Explanation: This fault is caused by "input classf frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364413: fltTcaFcInputFrames1moClassfMin

Severity: variable

Explanation: This fault is caused by "input classf frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364414: fltTcaFcInputFrames1qtrClassfMin

Severity: variable

Explanation: This fault is caused by "input classf frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364415: fltTcaFcInputFrames1yearClassfMin

Severity: variable

Explanation: This fault is caused by "input classf frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364416: fltTcaFcInputFrames5minClassfMax

Severity: variable

Explanation: This fault is caused by "input classf frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364417: fltTcaFcInputFrames15minClassfMax

Severity: variable

Explanation: This fault is caused by "input classf frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364418: fltTcaFcInputFrames1hClassfMax

Severity: variable

Explanation: This fault is caused by "input classf frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364419: fltTcaFcInputFrames1dClassfMax

Severity: variable

Explanation: This fault is caused by "input classf frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364420: fltTcaFcInputFrames1wClassfMax

Severity: variable

Explanation: This fault is caused by "input classf frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364421: fltTcaFcInputFrames1moClassfMax

Severity: variable

Explanation: This fault is caused by "input classf frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364422: fltTcaFcInputFrames1qtrClassfMax

Severity: variable

Explanation: This fault is caused by "input classf frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364423: fltTcaFcInputFrames1yearClassfMax

Severity: variable

Explanation: This fault is caused by "input classf frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364424: fltTcaFcInputFrames5minClassfAvg

Severity: variable

Explanation: This fault is caused by "input classf frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364425: fltTcaFcInputFrames15minClassfAvg

Severity: variable

Explanation: This fault is caused by "input classf frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364426: fltTcaFcInputFrames1hClassfAvg

Severity: variable

Explanation: This fault is caused by "input classf frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364427: fltTcaFcInputFrames1dClassfAvg

Severity: variable

Explanation: This fault is caused by "input classf frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364428: fltTcaFcInputFrames1wClassfAvg

Severity: variable

Explanation: This fault is caused by "input classf frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364429: fltTcaFcInputFrames1moClassfAvg

Severity: variable

Explanation: This fault is caused by "input classf frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364430: fltTcaFcInputFrames1qtrClassfAvg

Severity: variable

Explanation: This fault is caused by "input classf frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364431: fltTcaFcInputFrames1yearClassfAvg

Severity: variable

Explanation: This fault is caused by "input classf frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364456: fltTcaFcInputFrames5minClassfTr

Severity: variable

Explanation: This fault is caused by "input classf frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364457: fltTcaFcInputFrames15minClassfTr

Severity: variable

Explanation: This fault is caused by "input classf frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364458: fltTcaFcInputFrames1hClassfTr

Severity: variable

Explanation: This fault is caused by "input classf frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364459: fltTcaFcInputFrames1dClassfTr

Severity: variable

Explanation: This fault is caused by "input classf frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364460: fltTcaFcInputFrames1wClassfTr

Severity: variable

Explanation: This fault is caused by "input classf frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364461: fltTcaFcInputFrames1moClassfTr

Severity: variable

Explanation: This fault is caused by "input classf frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364462: fltTcaFcInputFrames1qtrClassfTr

Severity: variable

Explanation: This fault is caused by "input classf frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364463: fltTcaFcInputFrames1yearClassfTr

Severity: variable

Explanation: This fault is caused by "input classf frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364464: fltTcaFcInputFrames5minClassfRate

Severity: variable

Explanation: This fault is caused by "input classf frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364465: fltTcaFcInputFrames15minClassfRate

Severity: variable

Explanation: This fault is caused by "input classf frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364466: fltTcaFcInputFrames1hClassfRate

Severity: variable

Explanation: This fault is caused by "input classf frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364467: fltTcaFcInputFrames1dClassfRate

Severity: variable

Explanation: This fault is caused by "input classf frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364468: fltTcaFcInputFrames1wClassfRate

Severity: variable

Explanation: This fault is caused by "input classf frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364469: fltTcaFcInputFrames1moClassfRate

Severity: variable

Explanation: This fault is caused by "input classf frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364470: fltTcaFcInputFrames1qtrClassfRate

Severity: variable

Explanation: This fault is caused by "input classf frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364471: fltTcaFcInputFrames1yearClassfRate

Severity: variable

Explanation: This fault is caused by "input classf frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364544: fltTcaFcInputLink5minLoopinitsLast

Severity: variable

Explanation: This fault is caused by "input loop inits current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364545: fltTcaFcInputLink15minLoopinitsLast

Severity: variable

Explanation: This fault is caused by "input loop inits current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364546: fltTcaFcInputLink1hLoopinitsLast

Severity: variable

Explanation: This fault is caused by "input loop inits current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364547: fltTcaFcInputLink1dLoopinitsLast

Severity: variable

Explanation: This fault is caused by "input loop inits current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364548: fltTcaFcInputLink1wLoopinitsLast

Severity: variable

Explanation: This fault is caused by "input loop inits current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364549: fltTcaFcInputLink1moLoopinitsLast

Severity: variable

Explanation: This fault is caused by "input loop inits current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364550: fltTcaFcInputLink1qtrLoopinitsLast

Severity: variable

Explanation: This fault is caused by "input loop inits current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364551: fltTcaFcInputLink1yearLoopinitsLast

Severity: variable

Explanation: This fault is caused by "input loop inits current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364560: fltTcaFcInputLink5minLoopinitsCum

Severity: variable

Explanation: This fault is caused by "input loop inits cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364561: fltTcaFcInputLink15minLoopinitsCum

Severity: variable

Explanation: This fault is caused by "input loop inits cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364562: fltTcaFcInputLink1hLoopinitsCum

Severity: variable

Explanation: This fault is caused by "input loop inits cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364563: fltTcaFcInputLink1dLoopinitsCum

Severity: variable

Explanation: This fault is caused by "input loop inits cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364564: fltTcaFcInputLink1wLoopinitsCum

Severity: variable

Explanation: This fault is caused by "input loop inits cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364565: fltTcaFcInputLink1moLoopinitsCum

Severity: variable

Explanation: This fault is caused by "input loop inits cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364566: fltTcaFcInputLink1qtrLoopinitsCum

Severity: variable

Explanation: This fault is caused by "input loop inits cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364567: fltTcaFcInputLink1yearLoopinitsCum

Severity: variable

Explanation: This fault is caused by "input loop inits cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364568: fltTcaFcInputLink5minLoopinitsPer

Severity: variable

Explanation: This fault is caused by "input loop inits periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364569: fltTcaFcInputLink15minLoopinitsPer

Severity: variable

Explanation: This fault is caused by "input loop inits periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364570: fltTcaFcInputLink1hLoopinitsPer

Severity: variable

Explanation: This fault is caused by "input loop inits periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364571: fltTcaFcInputLink1dLoopinitsPer

Severity: variable

Explanation: This fault is caused by "input loop inits periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364572: fltTcaFcInputLink1wLoopinitsPer

Severity: variable

Explanation: This fault is caused by "input loop inits periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364573: fltTcaFcInputLink1moLoopinitsPer

Severity: variable

Explanation: This fault is caused by "input loop inits periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364574: fltTcaFcInputLink1qtrLoopinitsPer

Severity: variable

Explanation: This fault is caused by "input loop inits periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364575: fltTcaFcInputLink1yearLoopinitsPer

Severity: variable

Explanation: This fault is caused by "input loop inits periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364576: fltTcaFcInputLink5minLoopinitsMin

Severity: variable

Explanation: This fault is caused by "input loop inits minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364577: fltTcaFcInputLink15minLoopinitsMin

Severity: variable

Explanation: This fault is caused by "input loop inits minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364578: fltTcaFcInputLink1hLoopinitsMin

Severity: variable

Explanation: This fault is caused by "input loop inits minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364579: fltTcaFcInputLink1dLoopinitsMin

Severity: variable

Explanation: This fault is caused by "input loop inits minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364580: fltTcaFcInputLink1wLoopinitsMin

Severity: variable

Explanation: This fault is caused by "input loop inits minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364581: fltTcaFcInputLink1moLoopinitsMin

Severity: variable

Explanation: This fault is caused by "input loop inits minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364582: fltTcaFcInputLink1qtrLoopinitsMin

Severity: variable

Explanation: This fault is caused by "input loop inits minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364583: fltTcaFcInputLink1yearLoopinitsMin

Severity: variable

Explanation: This fault is caused by "input loop inits minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364584: fltTcaFcInputLink5minLoopinitsMax

Severity: variable

Explanation: This fault is caused by "input loop inits maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364585: fltTcaFcInputLink15minLoopinitsMax

Severity: variable

Explanation: This fault is caused by "input loop inits maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364586: fltTcaFcInputLink1hLoopinitsMax

Severity: variable

Explanation: This fault is caused by "input loop inits maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364587: fltTcaFcInputLink1dLoopinitsMax

Severity: variable

Explanation: This fault is caused by "input loop inits maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364588: fltTcaFcInputLink1wLoopinitsMax

Severity: variable

Explanation: This fault is caused by "input loop inits maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364589: fltTcaFcInputLink1moLoopinitsMax

Severity: variable

Explanation: This fault is caused by "input loop inits maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364590: fltTcaFcInputLink1qtrLoopinitsMax

Severity: variable

Explanation: This fault is caused by "input loop inits maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364591: fltTcaFcInputLink1yearLoopinitsMax

Severity: variable

Explanation: This fault is caused by "input loop inits maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364592: fltTcaFcInputLink5minLoopinitsAvg

Severity: variable

Explanation: This fault is caused by "input loop inits average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364593: fltTcaFcInputLink15minLoopinitsAvg

Severity: variable

Explanation: This fault is caused by "input loop inits average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364594: fltTcaFcInputLink1hLoopinitsAvg

Severity: variable

Explanation: This fault is caused by "input loop inits average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364595: fltTcaFcInputLink1dLoopinitsAvg

Severity: variable

Explanation: This fault is caused by "input loop inits average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364596: fltTcaFcInputLink1wLoopinitsAvg

Severity: variable

Explanation: This fault is caused by "input loop inits average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364597: fltTcaFcInputLink1moLoopinitsAvg

Severity: variable

Explanation: This fault is caused by "input loop inits average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364598: fltTcaFcInputLink1qtrLoopinitsAvg

Severity: variable

Explanation: This fault is caused by "input loop inits average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364599: fltTcaFcInputLink1yearLoopinitsAvg

Severity: variable

Explanation: This fault is caused by "input loop inits average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364624: fltTcaFcInputLink5minLoopinitsTr

Severity: variable

Explanation: This fault is caused by "input loop inits trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364625: fltTcaFcInputLink15minLoopinitsTr

Severity: variable

Explanation: This fault is caused by "input loop inits trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364626: fltTcaFcInputLink1hLoopinitsTr

Severity: variable

Explanation: This fault is caused by "input loop inits trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364627: fltTcaFcInputLink1dLoopinitsTr

Severity: variable

Explanation: This fault is caused by "input loop inits trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364628: fltTcaFcInputLink1wLoopinitsTr

Severity: variable

Explanation: This fault is caused by "input loop inits trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364629: fltTcaFcInputLink1moLoopinitsTr

Severity: variable

Explanation: This fault is caused by "input loop inits trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364630: fltTcaFcInputLink1qtrLoopinitsTr

Severity: variable

Explanation: This fault is caused by "input loop inits trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364631: fltTcaFcInputLink1yearLoopinitsTr

Severity: variable

Explanation: This fault is caused by "input loop inits trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364632: fltTcaFcInputLink5minLoopinitsRate

Severity: variable

Explanation: This fault is caused by "input loop inits rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364633: fltTcaFcInputLink15minLoopinitsRate

Severity: variable

Explanation: This fault is caused by "input loop inits rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364634: fltTcaFcInputLink1hLoopinitsRate

Severity: variable

Explanation: This fault is caused by "input loop inits rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364635: fltTcaFcInputLink1dLoopinitsRate

Severity: variable

Explanation: This fault is caused by "input loop inits rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364636: fltTcaFcInputLink1wLoopinitsRate

Severity: variable

Explanation: This fault is caused by "input loop inits rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364637: fltTcaFcInputLink1moLoopinitsRate

Severity: variable

Explanation: This fault is caused by "input loop inits rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364638: fltTcaFcInputLink1qtrLoopinitsRate

Severity: variable

Explanation: This fault is caused by "input loop inits rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364639: fltTcaFcInputLink1yearLoopinitsRate

Severity: variable

Explanation: This fault is caused by "input loop inits rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364712: fltTcaFcInputLink5minLrrLast

Severity: variable

Explanation: This fault is caused by "input link Reset Response current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364713: fltTcaFcInputLink15minLrrLast

Severity: variable

Explanation: This fault is caused by "input link Reset Response current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364714: fltTcaFcInputLink1hLrrLast

Severity: variable

Explanation: This fault is caused by "input link Reset Response current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364715: fltTcaFcInputLink1dLrrLast

Severity: variable

Explanation: This fault is caused by "input link Reset Response current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364716: fltTcaFcInputLink1wLrrLast

Severity: variable

Explanation: This fault is caused by "input link Reset Response current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364717: fltTcaFcInputLink1moLrrLast

Severity: variable

Explanation: This fault is caused by "input link Reset Response current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364718: fltTcaFcInputLink1qtrLrrLast

Severity: variable

Explanation: This fault is caused by "input link Reset Response current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364719: fltTcaFcInputLink1yearLrrLast

Severity: variable

Explanation: This fault is caused by "input link Reset Response current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364728: fltTcaFcInputLink5minLrrCum

Severity: variable

Explanation: This fault is caused by "input link Reset Response cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364729: fltTcaFcInputLink15minLrrCum

Severity: variable

Explanation: This fault is caused by "input link Reset Response cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364730: fltTcaFcInputLink1hLrrCum

Severity: variable

Explanation: This fault is caused by "input link Reset Response cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364731: fltTcaFcInputLink1dLrrCum

Severity: variable

Explanation: This fault is caused by "input link Reset Response cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364732: fltTcaFcInputLink1wLrrCum

Severity: variable

Explanation: This fault is caused by "input link Reset Response cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364733: fltTcaFcInputLink1moLrrCum

Severity: variable

Explanation: This fault is caused by "input link Reset Response cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364734: fltTcaFcInputLink1qtrLrrCum

Severity: variable

Explanation: This fault is caused by "input link Reset Response cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364735: fltTcaFcInputLink1yearLrrCum

Severity: variable

Explanation: This fault is caused by "input link Reset Response cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364736: fltTcaFcInputLink5minLrrPer

Severity: variable

Explanation: This fault is caused by "input link Reset Response periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364737: fltTcaFcInputLink15minLrrPer

Severity: variable

Explanation: This fault is caused by "input link Reset Response periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364738: fltTcaFcInputLink1hLrrPer

Severity: variable

Explanation: This fault is caused by "input link Reset Response periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364739: fltTcaFcInputLink1dLrrPer

Severity: variable

Explanation: This fault is caused by "input link Reset Response periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364740: fltTcaFcInputLink1wLrrPer

Severity: variable

Explanation: This fault is caused by "input link Reset Response periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364741: fltTcaFcInputLink1moLrrPer

Severity: variable

Explanation: This fault is caused by "input link Reset Response periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364742: fltTcaFcInputLink1qtrLrrPer

Severity: variable

Explanation: This fault is caused by "input link Reset Response periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364743: fltTcaFcInputLink1yearLrrPer

Severity: variable

Explanation: This fault is caused by "input link Reset Response periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364744: fltTcaFcInputLink5minLrrMin

Severity: variable

Explanation: This fault is caused by "input link Reset Response minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364745: fltTcaFcInputLink15minLrrMin

Severity: variable

Explanation: This fault is caused by "input link Reset Response minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364746: fltTcaFcInputLink1hLrrMin

Severity: variable

Explanation: This fault is caused by "input link Reset Response minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364747: fltTcaFcInputLink1dLrrMin

Severity: variable

Explanation: This fault is caused by "input link Reset Response minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364748: fltTcaFcInputLink1wLrrMin

Severity: variable

Explanation: This fault is caused by "input link Reset Response minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364749: fltTcaFcInputLink1moLrrMin

Severity: variable

Explanation: This fault is caused by "input link Reset Response minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364750: fltTcaFcInputLink1qtrLrrMin

Severity: variable

Explanation: This fault is caused by "input link Reset Response minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364751: fltTcaFcInputLink1yearLrrMin

Severity: variable

Explanation: This fault is caused by "input link Reset Response minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364752: fltTcaFcInputLink5minLrrMax

Severity: variable

Explanation: This fault is caused by "input link Reset Response maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364753: fltTcaFcInputLink15minLrrMax

Severity: variable

Explanation: This fault is caused by "input link Reset Response maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364754: fltTcaFcInputLink1hLrrMax

Severity: variable

Explanation: This fault is caused by "input link Reset Response maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364755: fltTcaFcInputLink1dLrrMax

Severity: variable

Explanation: This fault is caused by "input link Reset Response maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364756: fltTcaFcInputLink1wLrrMax

Severity: variable

Explanation: This fault is caused by "input link Reset Response maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364757: fltTcaFcInputLink1moLrrMax

Severity: variable

Explanation: This fault is caused by "input link Reset Response maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364758: fltTcaFcInputLink1qtrLrrMax

Severity: variable

Explanation: This fault is caused by "input link Reset Response maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364759: fltTcaFcInputLink1yearLrrMax

Severity: variable

Explanation: This fault is caused by "input link Reset Response maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364760: fltTcaFcInputLink5minLrrAvg

Severity: variable

Explanation: This fault is caused by "input link Reset Response average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364761: fltTcaFcInputLink15minLrrAvg

Severity: variable

Explanation: This fault is caused by "input link Reset Response average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364762: fltTcaFcInputLink1hLrrAvg

Severity: variable

Explanation: This fault is caused by "input link Reset Response average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364763: fltTcaFcInputLink1dLrrAvg

Severity: variable

Explanation: This fault is caused by "input link Reset Response average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364764: fltTcaFcInputLink1wLrrAvg

Severity: variable

Explanation: This fault is caused by "input link Reset Response average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364765: fltTcaFcInputLink1moLrrAvg

Severity: variable

Explanation: This fault is caused by "input link Reset Response average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364766: fltTcaFcInputLink1qtrLrrAvg

Severity: variable

Explanation: This fault is caused by "input link Reset Response average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364767: fltTcaFcInputLink1yearLrrAvg

Severity: variable

Explanation: This fault is caused by "input link Reset Response average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364792: fltTcaFcInputLink5minLrrTr

Severity: variable

Explanation: This fault is caused by "input link Reset Response trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364793: fltTcaFcInputLink15minLrrTr

Severity: variable

Explanation: This fault is caused by "input link Reset Response trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364794: fltTcaFcInputLink1hLrrTr

Severity: variable

Explanation: This fault is caused by "input link Reset Response trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364795: fltTcaFcInputLink1dLrrTr

Severity: variable

Explanation: This fault is caused by "input link Reset Response trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364796: fltTcaFcInputLink1wLrrTr

Severity: variable

Explanation: This fault is caused by "input link Reset Response trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364797: fltTcaFcInputLink1moLrrTr

Severity: variable

Explanation: This fault is caused by "input link Reset Response trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364798: fltTcaFcInputLink1qtrLrrTr

Severity: variable

Explanation: This fault is caused by "input link Reset Response trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364799: fltTcaFcInputLink1yearLrrTr

Severity: variable

Explanation: This fault is caused by "input link Reset Response trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364800: fltTcaFcInputLink5minLrrRate

Severity: variable

Explanation: This fault is caused by "input link Reset Response rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364801: fltTcaFcInputLink15minLrrRate

Severity: variable

Explanation: This fault is caused by "input link Reset Response rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364802: fltTcaFcInputLink1hLrrRate

Severity: variable

Explanation: This fault is caused by "input link Reset Response rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364803: fltTcaFcInputLink1dLrrRate

Severity: variable

Explanation: This fault is caused by "input link Reset Response rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364804: fltTcaFcInputLink1wLrrRate

Severity: variable

Explanation: This fault is caused by "input link Reset Response rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364805: fltTcaFcInputLink1moLrrRate

Severity: variable

Explanation: This fault is caused by "input link Reset Response rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364806: fltTcaFcInputLink1qtrLrrRate

Severity: variable

Explanation: This fault is caused by "input link Reset Response rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364807: fltTcaFcInputLink1yearLrrRate

Severity: variable

Explanation: This fault is caused by "input link Reset Response rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364880: fltTcaFcInputLink5minNosLast

Severity: variable

Explanation: This fault is caused by "input not operational current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364881: fltTcaFcInputLink15minNosLast

Severity: variable

Explanation: This fault is caused by "input not operational current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364882: fltTcaFcInputLink1hNosLast

Severity: variable

Explanation: This fault is caused by "input not operational current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364883: fltTcaFcInputLink1dNosLast

Severity: variable

Explanation: This fault is caused by "input not operational current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364884: fltTcaFcInputLink1wNosLast

Severity: variable

Explanation: This fault is caused by "input not operational current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364885: fltTcaFcInputLink1moNosLast

Severity: variable

Explanation: This fault is caused by "input not operational current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364886: fltTcaFcInputLink1qtrNosLast

Severity: variable

Explanation: This fault is caused by "input not operational current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364887: fltTcaFcInputLink1yearNosLast

Severity: variable

Explanation: This fault is caused by "input not operational current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364896: fltTcaFcInputLink5minNosCum

Severity: variable

Explanation: This fault is caused by "input not operational cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364897: fltTcaFcInputLink15minNosCum

Severity: variable

Explanation: This fault is caused by "input not operational cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364898: fltTcaFcInputLink1hNosCum

Severity: variable

Explanation: This fault is caused by "input not operational cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364899: fltTcaFcInputLink1dNosCum

Severity: variable

Explanation: This fault is caused by "input not operational cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3649: fltRpmEntityInstMemAlertCritical

Severity: critical

Explanation: This fault occurs when the rpm entity shared memory alert is critical or major

Recommended Action: To recover from this fault, try the following actions

1. Look at any configuration issues

2. Verify the configuration is correct/complete

3. If the above actions did not resolve the issue, generate the show tech-support file and contact Cisco TAC.

F364900: fltTcaFcInputLink1wNosCum

Severity: variable

Explanation: This fault is caused by "input not operational cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364901: fltTcaFcInputLink1moNosCum

Severity: variable

Explanation: This fault is caused by "input not operational cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364902: fltTcaFcInputLink1qtrNosCum

Severity: variable

Explanation: This fault is caused by "input not operational cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364903: fltTcaFcInputLink1yearNosCum

Severity: variable

Explanation: This fault is caused by "input not operational cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364904: fltTcaFcInputLink5minNosPer

Severity: variable

Explanation: This fault is caused by "input not operational periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364905: fltTcaFcInputLink15minNosPer

Severity: variable

Explanation: This fault is caused by "input not operational periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364906: fltTcaFcInputLink1hNosPer

Severity: variable

Explanation: This fault is caused by "input not operational periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364907: fltTcaFcInputLink1dNosPer

Severity: variable

Explanation: This fault is caused by "input not operational periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364908: fltTcaFcInputLink1wNosPer

Severity: variable

Explanation: This fault is caused by "input not operational periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364909: fltTcaFcInputLink1moNosPer

Severity: variable

Explanation: This fault is caused by "input not operational periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364910: fltTcaFcInputLink1qtrNosPer

Severity: variable

Explanation: This fault is caused by "input not operational periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364911: fltTcaFcInputLink1yearNosPer

Severity: variable

Explanation: This fault is caused by "input not operational periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364912: fltTcaFcInputLink5minNosMin

Severity: variable

Explanation: This fault is caused by "input not operational minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364913: fltTcaFcInputLink15minNosMin

Severity: variable

Explanation: This fault is caused by "input not operational minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364914: fltTcaFcInputLink1hNosMin

Severity: variable

Explanation: This fault is caused by "input not operational minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364915: fltTcaFcInputLink1dNosMin

Severity: variable

Explanation: This fault is caused by "input not operational minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364916: fltTcaFcInputLink1wNosMin

Severity: variable

Explanation: This fault is caused by "input not operational minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364917: fltTcaFcInputLink1moNosMin

Severity: variable

Explanation: This fault is caused by "input not operational minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364918: fltTcaFcInputLink1qtrNosMin

Severity: variable

Explanation: This fault is caused by "input not operational minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364919: fltTcaFcInputLink1yearNosMin

Severity: variable

Explanation: This fault is caused by "input not operational minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364920: fltTcaFcInputLink5minNosMax

Severity: variable

Explanation: This fault is caused by "input not operational maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364921: fltTcaFcInputLink15minNosMax

Severity: variable

Explanation: This fault is caused by "input not operational maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364922: fltTcaFcInputLink1hNosMax

Severity: variable

Explanation: This fault is caused by "input not operational maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364923: fltTcaFcInputLink1dNosMax

Severity: variable

Explanation: This fault is caused by "input not operational maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364924: fltTcaFcInputLink1wNosMax

Severity: variable

Explanation: This fault is caused by "input not operational maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364925: fltTcaFcInputLink1moNosMax

Severity: variable

Explanation: This fault is caused by "input not operational maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364926: fltTcaFcInputLink1qtrNosMax

Severity: variable

Explanation: This fault is caused by "input not operational maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364927: fltTcaFcInputLink1yearNosMax

Severity: variable

Explanation: This fault is caused by "input not operational maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364928: fltTcaFcInputLink5minNosAvg

Severity: variable

Explanation: This fault is caused by "input not operational average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364929: fltTcaFcInputLink15minNosAvg

Severity: variable

Explanation: This fault is caused by "input not operational average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364930: fltTcaFcInputLink1hNosAvg

Severity: variable

Explanation: This fault is caused by "input not operational average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364931: fltTcaFcInputLink1dNosAvg

Severity: variable

Explanation: This fault is caused by "input not operational average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364932: fltTcaFcInputLink1wNosAvg

Severity: variable

Explanation: This fault is caused by "input not operational average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364933: fltTcaFcInputLink1moNosAvg

Severity: variable

Explanation: This fault is caused by "input not operational average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364934: fltTcaFcInputLink1qtrNosAvg

Severity: variable

Explanation: This fault is caused by "input not operational average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364935: fltTcaFcInputLink1yearNosAvg

Severity: variable

Explanation: This fault is caused by "input not operational average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364960: fltTcaFcInputLink5minNosTr

Severity: variable

Explanation: This fault is caused by "input not operational trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364961: fltTcaFcInputLink15minNosTr

Severity: variable

Explanation: This fault is caused by "input not operational trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364962: fltTcaFcInputLink1hNosTr

Severity: variable

Explanation: This fault is caused by "input not operational trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364963: fltTcaFcInputLink1dNosTr

Severity: variable

Explanation: This fault is caused by "input not operational trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364964: fltTcaFcInputLink1wNosTr

Severity: variable

Explanation: This fault is caused by "input not operational trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364965: fltTcaFcInputLink1moNosTr

Severity: variable

Explanation: This fault is caused by "input not operational trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364966: fltTcaFcInputLink1qtrNosTr

Severity: variable

Explanation: This fault is caused by "input not operational trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364967: fltTcaFcInputLink1yearNosTr

Severity: variable

Explanation: This fault is caused by "input not operational trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364968: fltTcaFcInputLink5minNosRate

Severity: variable

Explanation: This fault is caused by "input not operational rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364969: fltTcaFcInputLink15minNosRate

Severity: variable

Explanation: This fault is caused by "input not operational rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364970: fltTcaFcInputLink1hNosRate

Severity: variable

Explanation: This fault is caused by "input not operational rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364971: fltTcaFcInputLink1dNosRate

Severity: variable

Explanation: This fault is caused by "input not operational rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364972: fltTcaFcInputLink1wNosRate

Severity: variable

Explanation: This fault is caused by "input not operational rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364973: fltTcaFcInputLink1moNosRate

Severity: variable

Explanation: This fault is caused by "input not operational rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364974: fltTcaFcInputLink1qtrNosRate

Severity: variable

Explanation: This fault is caused by "input not operational rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F364975: fltTcaFcInputLink1yearNosRate

Severity: variable

Explanation: This fault is caused by "input not operational rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3650: fltRpmEntityInstMemAlertMinor

Severity: warning

Explanation: This fault occurs when the rpm entity shared memory alert is minor

Recommended Action: None set.

F365048: fltTcaFcInputLink5minOlsLast

Severity: variable

Explanation: This fault is caused by "input offline current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365049: fltTcaFcInputLink15minOlsLast

Severity: variable

Explanation: This fault is caused by "input offline current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365050: fltTcaFcInputLink1hOlsLast

Severity: variable

Explanation: This fault is caused by "input offline current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365051: fltTcaFcInputLink1dOlsLast

Severity: variable

Explanation: This fault is caused by "input offline current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365052: fltTcaFcInputLink1wOlsLast

Severity: variable

Explanation: This fault is caused by "input offline current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365053: fltTcaFcInputLink1moOlsLast

Severity: variable

Explanation: This fault is caused by "input offline current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365054: fltTcaFcInputLink1qtrOlsLast

Severity: variable

Explanation: This fault is caused by "input offline current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365055: fltTcaFcInputLink1yearOlsLast

Severity: variable

Explanation: This fault is caused by "input offline current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365064: fltTcaFcInputLink5minOlsCum

Severity: variable

Explanation: This fault is caused by "input offline cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365065: fltTcaFcInputLink15minOlsCum

Severity: variable

Explanation: This fault is caused by "input offline cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365066: fltTcaFcInputLink1hOlsCum

Severity: variable

Explanation: This fault is caused by "input offline cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365067: fltTcaFcInputLink1dOlsCum

Severity: variable

Explanation: This fault is caused by "input offline cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365068: fltTcaFcInputLink1wOlsCum

Severity: variable

Explanation: This fault is caused by "input offline cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365069: fltTcaFcInputLink1moOlsCum

Severity: variable

Explanation: This fault is caused by "input offline cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365070: fltTcaFcInputLink1qtrOlsCum

Severity: variable

Explanation: This fault is caused by "input offline cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365071: fltTcaFcInputLink1yearOlsCum

Severity: variable

Explanation: This fault is caused by "input offline cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365072: fltTcaFcInputLink5minOlsPer

Severity: variable

Explanation: This fault is caused by "input offline periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365073: fltTcaFcInputLink15minOlsPer

Severity: variable

Explanation: This fault is caused by "input offline periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365074: fltTcaFcInputLink1hOlsPer

Severity: variable

Explanation: This fault is caused by "input offline periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365075: fltTcaFcInputLink1dOlsPer

Severity: variable

Explanation: This fault is caused by "input offline periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365076: fltTcaFcInputLink1wOlsPer

Severity: variable

Explanation: This fault is caused by "input offline periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365077: fltTcaFcInputLink1moOlsPer

Severity: variable

Explanation: This fault is caused by "input offline periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365078: fltTcaFcInputLink1qtrOlsPer

Severity: variable

Explanation: This fault is caused by "input offline periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365079: fltTcaFcInputLink1yearOlsPer

Severity: variable

Explanation: This fault is caused by "input offline periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365080: fltTcaFcInputLink5minOlsMin

Severity: variable

Explanation: This fault is caused by "input offline minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365081: fltTcaFcInputLink15minOlsMin

Severity: variable

Explanation: This fault is caused by "input offline minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365082: fltTcaFcInputLink1hOlsMin

Severity: variable

Explanation: This fault is caused by "input offline minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365083: fltTcaFcInputLink1dOlsMin

Severity: variable

Explanation: This fault is caused by "input offline minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365084: fltTcaFcInputLink1wOlsMin

Severity: variable

Explanation: This fault is caused by "input offline minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365085: fltTcaFcInputLink1moOlsMin

Severity: variable

Explanation: This fault is caused by "input offline minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365086: fltTcaFcInputLink1qtrOlsMin

Severity: variable

Explanation: This fault is caused by "input offline minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365087: fltTcaFcInputLink1yearOlsMin

Severity: variable

Explanation: This fault is caused by "input offline minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365088: fltTcaFcInputLink5minOlsMax

Severity: variable

Explanation: This fault is caused by "input offline maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365089: fltTcaFcInputLink15minOlsMax

Severity: variable

Explanation: This fault is caused by "input offline maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365090: fltTcaFcInputLink1hOlsMax

Severity: variable

Explanation: This fault is caused by "input offline maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365091: fltTcaFcInputLink1dOlsMax

Severity: variable

Explanation: This fault is caused by "input offline maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365092: fltTcaFcInputLink1wOlsMax

Severity: variable

Explanation: This fault is caused by "input offline maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365093: fltTcaFcInputLink1moOlsMax

Severity: variable

Explanation: This fault is caused by "input offline maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365094: fltTcaFcInputLink1qtrOlsMax

Severity: variable

Explanation: This fault is caused by "input offline maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365095: fltTcaFcInputLink1yearOlsMax

Severity: variable

Explanation: This fault is caused by "input offline maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365096: fltTcaFcInputLink5minOlsAvg

Severity: variable

Explanation: This fault is caused by "input offline average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365097: fltTcaFcInputLink15minOlsAvg

Severity: variable

Explanation: This fault is caused by "input offline average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365098: fltTcaFcInputLink1hOlsAvg

Severity: variable

Explanation: This fault is caused by "input offline average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365099: fltTcaFcInputLink1dOlsAvg

Severity: variable

Explanation: This fault is caused by "input offline average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3651: fltHcloudResourceGroupOperCloudResourceGroupError

Severity: major

Explanation: This fault occurs when an erroneous configuration is pushed for creating a Cloud Resource Group.

Recommended Action: If you see this fault, take the following actions:

1. Please check the fault message and make necessary changes to the config for creating the Cloud Resource Group.

2. If fault still has not cleared, please contact Cisco TAC.

F365100: fltTcaFcInputLink1wOlsAvg

Severity: variable

Explanation: This fault is caused by "input offline average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365101: fltTcaFcInputLink1moOlsAvg

Severity: variable

Explanation: This fault is caused by "input offline average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365102: fltTcaFcInputLink1qtrOlsAvg

Severity: variable

Explanation: This fault is caused by "input offline average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365103: fltTcaFcInputLink1yearOlsAvg

Severity: variable

Explanation: This fault is caused by "input offline average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365128: fltTcaFcInputLink5minOlsTr

Severity: variable

Explanation: This fault is caused by "input offline trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365129: fltTcaFcInputLink15minOlsTr

Severity: variable

Explanation: This fault is caused by "input offline trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365130: fltTcaFcInputLink1hOlsTr

Severity: variable

Explanation: This fault is caused by "input offline trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365131: fltTcaFcInputLink1dOlsTr

Severity: variable

Explanation: This fault is caused by "input offline trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365132: fltTcaFcInputLink1wOlsTr

Severity: variable

Explanation: This fault is caused by "input offline trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365133: fltTcaFcInputLink1moOlsTr

Severity: variable

Explanation: This fault is caused by "input offline trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365134: fltTcaFcInputLink1qtrOlsTr

Severity: variable

Explanation: This fault is caused by "input offline trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365135: fltTcaFcInputLink1yearOlsTr

Severity: variable

Explanation: This fault is caused by "input offline trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365136: fltTcaFcInputLink5minOlsRate

Severity: variable

Explanation: This fault is caused by "input offline rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365137: fltTcaFcInputLink15minOlsRate

Severity: variable

Explanation: This fault is caused by "input offline rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365138: fltTcaFcInputLink1hOlsRate

Severity: variable

Explanation: This fault is caused by "input offline rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365139: fltTcaFcInputLink1dOlsRate

Severity: variable

Explanation: This fault is caused by "input offline rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365140: fltTcaFcInputLink1wOlsRate

Severity: variable

Explanation: This fault is caused by "input offline rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365141: fltTcaFcInputLink1moOlsRate

Severity: variable

Explanation: This fault is caused by "input offline rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365142: fltTcaFcInputLink1qtrOlsRate

Severity: variable

Explanation: This fault is caused by "input offline rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365143: fltTcaFcInputLink1yearOlsRate

Severity: variable

Explanation: This fault is caused by "input offline rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365216: fltTcaFcInputTotalByte5minBytesLast

Severity: variable

Explanation: This fault is caused by "total input bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365217: fltTcaFcInputTotalByte15minBytesLast

Severity: variable

Explanation: This fault is caused by "total input bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365218: fltTcaFcInputTotalByte1hBytesLast

Severity: variable

Explanation: This fault is caused by "total input bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365219: fltTcaFcInputTotalByte1dBytesLast

Severity: variable

Explanation: This fault is caused by "total input bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365220: fltTcaFcInputTotalByte1wBytesLast

Severity: variable

Explanation: This fault is caused by "total input bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365221: fltTcaFcInputTotalByte1moBytesLast

Severity: variable

Explanation: This fault is caused by "total input bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365222: fltTcaFcInputTotalByte1qtrBytesLast

Severity: variable

Explanation: This fault is caused by "total input bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365223: fltTcaFcInputTotalByte1yearBytesLast

Severity: variable

Explanation: This fault is caused by "total input bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365232: fltTcaFcInputTotalByte5minBytesCum

Severity: variable

Explanation: This fault is caused by "total input bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365233: fltTcaFcInputTotalByte15minBytesCum

Severity: variable

Explanation: This fault is caused by "total input bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365234: fltTcaFcInputTotalByte1hBytesCum

Severity: variable

Explanation: This fault is caused by "total input bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365235: fltTcaFcInputTotalByte1dBytesCum

Severity: variable

Explanation: This fault is caused by "total input bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365236: fltTcaFcInputTotalByte1wBytesCum

Severity: variable

Explanation: This fault is caused by "total input bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365237: fltTcaFcInputTotalByte1moBytesCum

Severity: variable

Explanation: This fault is caused by "total input bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365238: fltTcaFcInputTotalByte1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "total input bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365239: fltTcaFcInputTotalByte1yearBytesCum

Severity: variable

Explanation: This fault is caused by "total input bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365240: fltTcaFcInputTotalByte5minBytesPer

Severity: variable

Explanation: This fault is caused by "total input bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365241: fltTcaFcInputTotalByte15minBytesPer

Severity: variable

Explanation: This fault is caused by "total input bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365242: fltTcaFcInputTotalByte1hBytesPer

Severity: variable

Explanation: This fault is caused by "total input bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365243: fltTcaFcInputTotalByte1dBytesPer

Severity: variable

Explanation: This fault is caused by "total input bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365244: fltTcaFcInputTotalByte1wBytesPer

Severity: variable

Explanation: This fault is caused by "total input bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365245: fltTcaFcInputTotalByte1moBytesPer

Severity: variable

Explanation: This fault is caused by "total input bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365246: fltTcaFcInputTotalByte1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "total input bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365247: fltTcaFcInputTotalByte1yearBytesPer

Severity: variable

Explanation: This fault is caused by "total input bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365248: fltTcaFcInputTotalByte5minBytesMin

Severity: variable

Explanation: This fault is caused by "total input bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365249: fltTcaFcInputTotalByte15minBytesMin

Severity: variable

Explanation: This fault is caused by "total input bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365250: fltTcaFcInputTotalByte1hBytesMin

Severity: variable

Explanation: This fault is caused by "total input bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365251: fltTcaFcInputTotalByte1dBytesMin

Severity: variable

Explanation: This fault is caused by "total input bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365252: fltTcaFcInputTotalByte1wBytesMin

Severity: variable

Explanation: This fault is caused by "total input bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365253: fltTcaFcInputTotalByte1moBytesMin

Severity: variable

Explanation: This fault is caused by "total input bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365254: fltTcaFcInputTotalByte1qtrBytesMin

Severity: variable

Explanation: This fault is caused by "total input bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365255: fltTcaFcInputTotalByte1yearBytesMin

Severity: variable

Explanation: This fault is caused by "total input bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365256: fltTcaFcInputTotalByte5minBytesMax

Severity: variable

Explanation: This fault is caused by "total input bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365257: fltTcaFcInputTotalByte15minBytesMax

Severity: variable

Explanation: This fault is caused by "total input bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365258: fltTcaFcInputTotalByte1hBytesMax

Severity: variable

Explanation: This fault is caused by "total input bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365259: fltTcaFcInputTotalByte1dBytesMax

Severity: variable

Explanation: This fault is caused by "total input bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365260: fltTcaFcInputTotalByte1wBytesMax

Severity: variable

Explanation: This fault is caused by "total input bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365261: fltTcaFcInputTotalByte1moBytesMax

Severity: variable

Explanation: This fault is caused by "total input bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365262: fltTcaFcInputTotalByte1qtrBytesMax

Severity: variable

Explanation: This fault is caused by "total input bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365263: fltTcaFcInputTotalByte1yearBytesMax

Severity: variable

Explanation: This fault is caused by "total input bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365264: fltTcaFcInputTotalByte5minBytesAvg

Severity: variable

Explanation: This fault is caused by "total input bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365265: fltTcaFcInputTotalByte15minBytesAvg

Severity: variable

Explanation: This fault is caused by "total input bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365266: fltTcaFcInputTotalByte1hBytesAvg

Severity: variable

Explanation: This fault is caused by "total input bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365267: fltTcaFcInputTotalByte1dBytesAvg

Severity: variable

Explanation: This fault is caused by "total input bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365268: fltTcaFcInputTotalByte1wBytesAvg

Severity: variable

Explanation: This fault is caused by "total input bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365269: fltTcaFcInputTotalByte1moBytesAvg

Severity: variable

Explanation: This fault is caused by "total input bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365270: fltTcaFcInputTotalByte1qtrBytesAvg

Severity: variable

Explanation: This fault is caused by "total input bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365271: fltTcaFcInputTotalByte1yearBytesAvg

Severity: variable

Explanation: This fault is caused by "total input bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365296: fltTcaFcInputTotalByte5minBytesTr

Severity: variable

Explanation: This fault is caused by "total input bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365297: fltTcaFcInputTotalByte15minBytesTr

Severity: variable

Explanation: This fault is caused by "total input bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365298: fltTcaFcInputTotalByte1hBytesTr

Severity: variable

Explanation: This fault is caused by "total input bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365299: fltTcaFcInputTotalByte1dBytesTr

Severity: variable

Explanation: This fault is caused by "total input bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365300: fltTcaFcInputTotalByte1wBytesTr

Severity: variable

Explanation: This fault is caused by "total input bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365301: fltTcaFcInputTotalByte1moBytesTr

Severity: variable

Explanation: This fault is caused by "total input bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365302: fltTcaFcInputTotalByte1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "total input bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365303: fltTcaFcInputTotalByte1yearBytesTr

Severity: variable

Explanation: This fault is caused by "total input bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365304: fltTcaFcInputTotalByte5minBytesRate

Severity: variable

Explanation: This fault is caused by "total input bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365305: fltTcaFcInputTotalByte15minBytesRate

Severity: variable

Explanation: This fault is caused by "total input bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365306: fltTcaFcInputTotalByte1hBytesRate

Severity: variable

Explanation: This fault is caused by "total input bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365307: fltTcaFcInputTotalByte1dBytesRate

Severity: variable

Explanation: This fault is caused by "total input bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365308: fltTcaFcInputTotalByte1wBytesRate

Severity: variable

Explanation: This fault is caused by "total input bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365309: fltTcaFcInputTotalByte1moBytesRate

Severity: variable

Explanation: This fault is caused by "total input bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365310: fltTcaFcInputTotalByte1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "total input bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365311: fltTcaFcInputTotalByte1yearBytesRate

Severity: variable

Explanation: This fault is caused by "total input bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365384: fltTcaFcInputTotalByte5minBytesRateLast

Severity: variable

Explanation: This fault is caused by "total input bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365385: fltTcaFcInputTotalByte15minBytesRateLast

Severity: variable

Explanation: This fault is caused by "total input bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365386: fltTcaFcInputTotalByte1hBytesRateLast

Severity: variable

Explanation: This fault is caused by "total input bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365387: fltTcaFcInputTotalByte1dBytesRateLast

Severity: variable

Explanation: This fault is caused by "total input bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365388: fltTcaFcInputTotalByte1wBytesRateLast

Severity: variable

Explanation: This fault is caused by "total input bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365389: fltTcaFcInputTotalByte1moBytesRateLast

Severity: variable

Explanation: This fault is caused by "total input bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365390: fltTcaFcInputTotalByte1qtrBytesRateLast

Severity: variable

Explanation: This fault is caused by "total input bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365391: fltTcaFcInputTotalByte1yearBytesRateLast

Severity: variable

Explanation: This fault is caused by "total input bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365392: fltTcaFcInputTotalByte5minBytesRateMin

Severity: variable

Explanation: This fault is caused by "total input bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365393: fltTcaFcInputTotalByte15minBytesRateMin

Severity: variable

Explanation: This fault is caused by "total input bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365394: fltTcaFcInputTotalByte1hBytesRateMin

Severity: variable

Explanation: This fault is caused by "total input bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365395: fltTcaFcInputTotalByte1dBytesRateMin

Severity: variable

Explanation: This fault is caused by "total input bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365396: fltTcaFcInputTotalByte1wBytesRateMin

Severity: variable

Explanation: This fault is caused by "total input bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365397: fltTcaFcInputTotalByte1moBytesRateMin

Severity: variable

Explanation: This fault is caused by "total input bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365398: fltTcaFcInputTotalByte1qtrBytesRateMin

Severity: variable

Explanation: This fault is caused by "total input bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365399: fltTcaFcInputTotalByte1yearBytesRateMin

Severity: variable

Explanation: This fault is caused by "total input bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365400: fltTcaFcInputTotalByte5minBytesRateMax

Severity: variable

Explanation: This fault is caused by "total input bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365401: fltTcaFcInputTotalByte15minBytesRateMax

Severity: variable

Explanation: This fault is caused by "total input bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365402: fltTcaFcInputTotalByte1hBytesRateMax

Severity: variable

Explanation: This fault is caused by "total input bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365403: fltTcaFcInputTotalByte1dBytesRateMax

Severity: variable

Explanation: This fault is caused by "total input bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365404: fltTcaFcInputTotalByte1wBytesRateMax

Severity: variable

Explanation: This fault is caused by "total input bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365405: fltTcaFcInputTotalByte1moBytesRateMax

Severity: variable

Explanation: This fault is caused by "total input bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365406: fltTcaFcInputTotalByte1qtrBytesRateMax

Severity: variable

Explanation: This fault is caused by "total input bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365407: fltTcaFcInputTotalByte1yearBytesRateMax

Severity: variable

Explanation: This fault is caused by "total input bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365408: fltTcaFcInputTotalByte5minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "total input bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365409: fltTcaFcInputTotalByte15minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "total input bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365410: fltTcaFcInputTotalByte1hBytesRateAvg

Severity: variable

Explanation: This fault is caused by "total input bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365411: fltTcaFcInputTotalByte1dBytesRateAvg

Severity: variable

Explanation: This fault is caused by "total input bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365412: fltTcaFcInputTotalByte1wBytesRateAvg

Severity: variable

Explanation: This fault is caused by "total input bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365413: fltTcaFcInputTotalByte1moBytesRateAvg

Severity: variable

Explanation: This fault is caused by "total input bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365414: fltTcaFcInputTotalByte1qtrBytesRateAvg

Severity: variable

Explanation: This fault is caused by "total input bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365415: fltTcaFcInputTotalByte1yearBytesRateAvg

Severity: variable

Explanation: This fault is caused by "total input bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365448: fltTcaFcInputTotalByte5minBytesRateTr

Severity: variable

Explanation: This fault is caused by "total input bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365449: fltTcaFcInputTotalByte15minBytesRateTr

Severity: variable

Explanation: This fault is caused by "total input bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365450: fltTcaFcInputTotalByte1hBytesRateTr

Severity: variable

Explanation: This fault is caused by "total input bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365451: fltTcaFcInputTotalByte1dBytesRateTr

Severity: variable

Explanation: This fault is caused by "total input bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365452: fltTcaFcInputTotalByte1wBytesRateTr

Severity: variable

Explanation: This fault is caused by "total input bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365453: fltTcaFcInputTotalByte1moBytesRateTr

Severity: variable

Explanation: This fault is caused by "total input bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365454: fltTcaFcInputTotalByte1qtrBytesRateTr

Severity: variable

Explanation: This fault is caused by "total input bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365455: fltTcaFcInputTotalByte1yearBytesRateTr

Severity: variable

Explanation: This fault is caused by "total input bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total input bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365504: fltTcaFcInputTotalByte5minUtilLast

Severity: variable

Explanation: This fault is caused by "ingress link utilization current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365505: fltTcaFcInputTotalByte15minUtilLast

Severity: variable

Explanation: This fault is caused by "ingress link utilization current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365506: fltTcaFcInputTotalByte1hUtilLast

Severity: variable

Explanation: This fault is caused by "ingress link utilization current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365507: fltTcaFcInputTotalByte1dUtilLast

Severity: variable

Explanation: This fault is caused by "ingress link utilization current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365508: fltTcaFcInputTotalByte1wUtilLast

Severity: variable

Explanation: This fault is caused by "ingress link utilization current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365509: fltTcaFcInputTotalByte1moUtilLast

Severity: variable

Explanation: This fault is caused by "ingress link utilization current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365510: fltTcaFcInputTotalByte1qtrUtilLast

Severity: variable

Explanation: This fault is caused by "ingress link utilization current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365511: fltTcaFcInputTotalByte1yearUtilLast

Severity: variable

Explanation: This fault is caused by "ingress link utilization current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365512: fltTcaFcInputTotalByte5minUtilMin

Severity: variable

Explanation: This fault is caused by "ingress link utilization minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365513: fltTcaFcInputTotalByte15minUtilMin

Severity: variable

Explanation: This fault is caused by "ingress link utilization minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365514: fltTcaFcInputTotalByte1hUtilMin

Severity: variable

Explanation: This fault is caused by "ingress link utilization minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365515: fltTcaFcInputTotalByte1dUtilMin

Severity: variable

Explanation: This fault is caused by "ingress link utilization minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365516: fltTcaFcInputTotalByte1wUtilMin

Severity: variable

Explanation: This fault is caused by "ingress link utilization minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365517: fltTcaFcInputTotalByte1moUtilMin

Severity: variable

Explanation: This fault is caused by "ingress link utilization minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365518: fltTcaFcInputTotalByte1qtrUtilMin

Severity: variable

Explanation: This fault is caused by "ingress link utilization minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365519: fltTcaFcInputTotalByte1yearUtilMin

Severity: variable

Explanation: This fault is caused by "ingress link utilization minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365520: fltTcaFcInputTotalByte5minUtilMax

Severity: variable

Explanation: This fault is caused by "ingress link utilization maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365521: fltTcaFcInputTotalByte15minUtilMax

Severity: variable

Explanation: This fault is caused by "ingress link utilization maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365522: fltTcaFcInputTotalByte1hUtilMax

Severity: variable

Explanation: This fault is caused by "ingress link utilization maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365523: fltTcaFcInputTotalByte1dUtilMax

Severity: variable

Explanation: This fault is caused by "ingress link utilization maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365524: fltTcaFcInputTotalByte1wUtilMax

Severity: variable

Explanation: This fault is caused by "ingress link utilization maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365525: fltTcaFcInputTotalByte1moUtilMax

Severity: variable

Explanation: This fault is caused by "ingress link utilization maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365526: fltTcaFcInputTotalByte1qtrUtilMax

Severity: variable

Explanation: This fault is caused by "ingress link utilization maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365527: fltTcaFcInputTotalByte1yearUtilMax

Severity: variable

Explanation: This fault is caused by "ingress link utilization maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365528: fltTcaFcInputTotalByte5minUtilAvg

Severity: variable

Explanation: This fault is caused by "ingress link utilization average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365529: fltTcaFcInputTotalByte15minUtilAvg

Severity: variable

Explanation: This fault is caused by "ingress link utilization average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365530: fltTcaFcInputTotalByte1hUtilAvg

Severity: variable

Explanation: This fault is caused by "ingress link utilization average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365531: fltTcaFcInputTotalByte1dUtilAvg

Severity: variable

Explanation: This fault is caused by "ingress link utilization average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365532: fltTcaFcInputTotalByte1wUtilAvg

Severity: variable

Explanation: This fault is caused by "ingress link utilization average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365533: fltTcaFcInputTotalByte1moUtilAvg

Severity: variable

Explanation: This fault is caused by "ingress link utilization average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365534: fltTcaFcInputTotalByte1qtrUtilAvg

Severity: variable

Explanation: This fault is caused by "ingress link utilization average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365535: fltTcaFcInputTotalByte1yearUtilAvg

Severity: variable

Explanation: This fault is caused by "ingress link utilization average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365568: fltTcaFcInputTotalByte5minUtilTr

Severity: variable

Explanation: This fault is caused by "ingress link utilization trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365569: fltTcaFcInputTotalByte15minUtilTr

Severity: variable

Explanation: This fault is caused by "ingress link utilization trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365570: fltTcaFcInputTotalByte1hUtilTr

Severity: variable

Explanation: This fault is caused by "ingress link utilization trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365571: fltTcaFcInputTotalByte1dUtilTr

Severity: variable

Explanation: This fault is caused by "ingress link utilization trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365572: fltTcaFcInputTotalByte1wUtilTr

Severity: variable

Explanation: This fault is caused by "ingress link utilization trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365573: fltTcaFcInputTotalByte1moUtilTr

Severity: variable

Explanation: This fault is caused by "ingress link utilization trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365574: fltTcaFcInputTotalByte1qtrUtilTr

Severity: variable

Explanation: This fault is caused by "ingress link utilization trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365575: fltTcaFcInputTotalByte1yearUtilTr

Severity: variable

Explanation: This fault is caused by "ingress link utilization trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365624: fltTcaFcInputUnkClass5minToolongLast

Severity: variable

Explanation: This fault is caused by "input too long frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365625: fltTcaFcInputUnkClass15minToolongLast

Severity: variable

Explanation: This fault is caused by "input too long frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365626: fltTcaFcInputUnkClass1hToolongLast

Severity: variable

Explanation: This fault is caused by "input too long frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365627: fltTcaFcInputUnkClass1dToolongLast

Severity: variable

Explanation: This fault is caused by "input too long frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365628: fltTcaFcInputUnkClass1wToolongLast

Severity: variable

Explanation: This fault is caused by "input too long frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365629: fltTcaFcInputUnkClass1moToolongLast

Severity: variable

Explanation: This fault is caused by "input too long frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365630: fltTcaFcInputUnkClass1qtrToolongLast

Severity: variable

Explanation: This fault is caused by "input too long frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365631: fltTcaFcInputUnkClass1yearToolongLast

Severity: variable

Explanation: This fault is caused by "input too long frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365640: fltTcaFcInputUnkClass5minToolongCum

Severity: variable

Explanation: This fault is caused by "input too long frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365641: fltTcaFcInputUnkClass15minToolongCum

Severity: variable

Explanation: This fault is caused by "input too long frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365642: fltTcaFcInputUnkClass1hToolongCum

Severity: variable

Explanation: This fault is caused by "input too long frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365643: fltTcaFcInputUnkClass1dToolongCum

Severity: variable

Explanation: This fault is caused by "input too long frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365644: fltTcaFcInputUnkClass1wToolongCum

Severity: variable

Explanation: This fault is caused by "input too long frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365645: fltTcaFcInputUnkClass1moToolongCum

Severity: variable

Explanation: This fault is caused by "input too long frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365646: fltTcaFcInputUnkClass1qtrToolongCum

Severity: variable

Explanation: This fault is caused by "input too long frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365647: fltTcaFcInputUnkClass1yearToolongCum

Severity: variable

Explanation: This fault is caused by "input too long frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365648: fltTcaFcInputUnkClass5minToolongPer

Severity: variable

Explanation: This fault is caused by "input too long frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365649: fltTcaFcInputUnkClass15minToolongPer

Severity: variable

Explanation: This fault is caused by "input too long frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365650: fltTcaFcInputUnkClass1hToolongPer

Severity: variable

Explanation: This fault is caused by "input too long frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365651: fltTcaFcInputUnkClass1dToolongPer

Severity: variable

Explanation: This fault is caused by "input too long frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365652: fltTcaFcInputUnkClass1wToolongPer

Severity: variable

Explanation: This fault is caused by "input too long frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365653: fltTcaFcInputUnkClass1moToolongPer

Severity: variable

Explanation: This fault is caused by "input too long frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365654: fltTcaFcInputUnkClass1qtrToolongPer

Severity: variable

Explanation: This fault is caused by "input too long frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365655: fltTcaFcInputUnkClass1yearToolongPer

Severity: variable

Explanation: This fault is caused by "input too long frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365656: fltTcaFcInputUnkClass5minToolongMin

Severity: variable

Explanation: This fault is caused by "input too long frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365657: fltTcaFcInputUnkClass15minToolongMin

Severity: variable

Explanation: This fault is caused by "input too long frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365658: fltTcaFcInputUnkClass1hToolongMin

Severity: variable

Explanation: This fault is caused by "input too long frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365659: fltTcaFcInputUnkClass1dToolongMin

Severity: variable

Explanation: This fault is caused by "input too long frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365660: fltTcaFcInputUnkClass1wToolongMin

Severity: variable

Explanation: This fault is caused by "input too long frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365661: fltTcaFcInputUnkClass1moToolongMin

Severity: variable

Explanation: This fault is caused by "input too long frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365662: fltTcaFcInputUnkClass1qtrToolongMin

Severity: variable

Explanation: This fault is caused by "input too long frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365663: fltTcaFcInputUnkClass1yearToolongMin

Severity: variable

Explanation: This fault is caused by "input too long frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365664: fltTcaFcInputUnkClass5minToolongMax

Severity: variable

Explanation: This fault is caused by "input too long frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365665: fltTcaFcInputUnkClass15minToolongMax

Severity: variable

Explanation: This fault is caused by "input too long frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365666: fltTcaFcInputUnkClass1hToolongMax

Severity: variable

Explanation: This fault is caused by "input too long frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365667: fltTcaFcInputUnkClass1dToolongMax

Severity: variable

Explanation: This fault is caused by "input too long frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365668: fltTcaFcInputUnkClass1wToolongMax

Severity: variable

Explanation: This fault is caused by "input too long frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365669: fltTcaFcInputUnkClass1moToolongMax

Severity: variable

Explanation: This fault is caused by "input too long frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365670: fltTcaFcInputUnkClass1qtrToolongMax

Severity: variable

Explanation: This fault is caused by "input too long frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365671: fltTcaFcInputUnkClass1yearToolongMax

Severity: variable

Explanation: This fault is caused by "input too long frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365672: fltTcaFcInputUnkClass5minToolongAvg

Severity: variable

Explanation: This fault is caused by "input too long frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365673: fltTcaFcInputUnkClass15minToolongAvg

Severity: variable

Explanation: This fault is caused by "input too long frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365674: fltTcaFcInputUnkClass1hToolongAvg

Severity: variable

Explanation: This fault is caused by "input too long frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365675: fltTcaFcInputUnkClass1dToolongAvg

Severity: variable

Explanation: This fault is caused by "input too long frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365676: fltTcaFcInputUnkClass1wToolongAvg

Severity: variable

Explanation: This fault is caused by "input too long frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365677: fltTcaFcInputUnkClass1moToolongAvg

Severity: variable

Explanation: This fault is caused by "input too long frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365678: fltTcaFcInputUnkClass1qtrToolongAvg

Severity: variable

Explanation: This fault is caused by "input too long frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365679: fltTcaFcInputUnkClass1yearToolongAvg

Severity: variable

Explanation: This fault is caused by "input too long frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365704: fltTcaFcInputUnkClass5minToolongTr

Severity: variable

Explanation: This fault is caused by "input too long frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365705: fltTcaFcInputUnkClass15minToolongTr

Severity: variable

Explanation: This fault is caused by "input too long frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365706: fltTcaFcInputUnkClass1hToolongTr

Severity: variable

Explanation: This fault is caused by "input too long frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365707: fltTcaFcInputUnkClass1dToolongTr

Severity: variable

Explanation: This fault is caused by "input too long frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365708: fltTcaFcInputUnkClass1wToolongTr

Severity: variable

Explanation: This fault is caused by "input too long frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365709: fltTcaFcInputUnkClass1moToolongTr

Severity: variable

Explanation: This fault is caused by "input too long frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365710: fltTcaFcInputUnkClass1qtrToolongTr

Severity: variable

Explanation: This fault is caused by "input too long frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365711: fltTcaFcInputUnkClass1yearToolongTr

Severity: variable

Explanation: This fault is caused by "input too long frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365712: fltTcaFcInputUnkClass5minToolongRate

Severity: variable

Explanation: This fault is caused by "input too long frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365713: fltTcaFcInputUnkClass15minToolongRate

Severity: variable

Explanation: This fault is caused by "input too long frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365714: fltTcaFcInputUnkClass1hToolongRate

Severity: variable

Explanation: This fault is caused by "input too long frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365715: fltTcaFcInputUnkClass1dToolongRate

Severity: variable

Explanation: This fault is caused by "input too long frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365716: fltTcaFcInputUnkClass1wToolongRate

Severity: variable

Explanation: This fault is caused by "input too long frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365717: fltTcaFcInputUnkClass1moToolongRate

Severity: variable

Explanation: This fault is caused by "input too long frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365718: fltTcaFcInputUnkClass1qtrToolongRate

Severity: variable

Explanation: This fault is caused by "input too long frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365719: fltTcaFcInputUnkClass1yearToolongRate

Severity: variable

Explanation: This fault is caused by "input too long frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input too long frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365792: fltTcaFcInputUnkClass5minTooshortLast

Severity: variable

Explanation: This fault is caused by "input too short frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365793: fltTcaFcInputUnkClass15minTooshortLast

Severity: variable

Explanation: This fault is caused by "input too short frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365794: fltTcaFcInputUnkClass1hTooshortLast

Severity: variable

Explanation: This fault is caused by "input too short frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365795: fltTcaFcInputUnkClass1dTooshortLast

Severity: variable

Explanation: This fault is caused by "input too short frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365796: fltTcaFcInputUnkClass1wTooshortLast

Severity: variable

Explanation: This fault is caused by "input too short frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365797: fltTcaFcInputUnkClass1moTooshortLast

Severity: variable

Explanation: This fault is caused by "input too short frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365798: fltTcaFcInputUnkClass1qtrTooshortLast

Severity: variable

Explanation: This fault is caused by "input too short frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365799: fltTcaFcInputUnkClass1yearTooshortLast

Severity: variable

Explanation: This fault is caused by "input too short frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365808: fltTcaFcInputUnkClass5minTooshortCum

Severity: variable

Explanation: This fault is caused by "input too short frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365809: fltTcaFcInputUnkClass15minTooshortCum

Severity: variable

Explanation: This fault is caused by "input too short frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365810: fltTcaFcInputUnkClass1hTooshortCum

Severity: variable

Explanation: This fault is caused by "input too short frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365811: fltTcaFcInputUnkClass1dTooshortCum

Severity: variable

Explanation: This fault is caused by "input too short frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365812: fltTcaFcInputUnkClass1wTooshortCum

Severity: variable

Explanation: This fault is caused by "input too short frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365813: fltTcaFcInputUnkClass1moTooshortCum

Severity: variable

Explanation: This fault is caused by "input too short frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365814: fltTcaFcInputUnkClass1qtrTooshortCum

Severity: variable

Explanation: This fault is caused by "input too short frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365815: fltTcaFcInputUnkClass1yearTooshortCum

Severity: variable

Explanation: This fault is caused by "input too short frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365816: fltTcaFcInputUnkClass5minTooshortPer

Severity: variable

Explanation: This fault is caused by "input too short frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365817: fltTcaFcInputUnkClass15minTooshortPer

Severity: variable

Explanation: This fault is caused by "input too short frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365818: fltTcaFcInputUnkClass1hTooshortPer

Severity: variable

Explanation: This fault is caused by "input too short frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365819: fltTcaFcInputUnkClass1dTooshortPer

Severity: variable

Explanation: This fault is caused by "input too short frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365820: fltTcaFcInputUnkClass1wTooshortPer

Severity: variable

Explanation: This fault is caused by "input too short frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365821: fltTcaFcInputUnkClass1moTooshortPer

Severity: variable

Explanation: This fault is caused by "input too short frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365822: fltTcaFcInputUnkClass1qtrTooshortPer

Severity: variable

Explanation: This fault is caused by "input too short frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365823: fltTcaFcInputUnkClass1yearTooshortPer

Severity: variable

Explanation: This fault is caused by "input too short frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365824: fltTcaFcInputUnkClass5minTooshortMin

Severity: variable

Explanation: This fault is caused by "input too short frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365825: fltTcaFcInputUnkClass15minTooshortMin

Severity: variable

Explanation: This fault is caused by "input too short frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365826: fltTcaFcInputUnkClass1hTooshortMin

Severity: variable

Explanation: This fault is caused by "input too short frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365827: fltTcaFcInputUnkClass1dTooshortMin

Severity: variable

Explanation: This fault is caused by "input too short frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365828: fltTcaFcInputUnkClass1wTooshortMin

Severity: variable

Explanation: This fault is caused by "input too short frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365829: fltTcaFcInputUnkClass1moTooshortMin

Severity: variable

Explanation: This fault is caused by "input too short frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365830: fltTcaFcInputUnkClass1qtrTooshortMin

Severity: variable

Explanation: This fault is caused by "input too short frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365831: fltTcaFcInputUnkClass1yearTooshortMin

Severity: variable

Explanation: This fault is caused by "input too short frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365832: fltTcaFcInputUnkClass5minTooshortMax

Severity: variable

Explanation: This fault is caused by "input too short frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365833: fltTcaFcInputUnkClass15minTooshortMax

Severity: variable

Explanation: This fault is caused by "input too short frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365834: fltTcaFcInputUnkClass1hTooshortMax

Severity: variable

Explanation: This fault is caused by "input too short frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365835: fltTcaFcInputUnkClass1dTooshortMax

Severity: variable

Explanation: This fault is caused by "input too short frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365836: fltTcaFcInputUnkClass1wTooshortMax

Severity: variable

Explanation: This fault is caused by "input too short frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365837: fltTcaFcInputUnkClass1moTooshortMax

Severity: variable

Explanation: This fault is caused by "input too short frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365838: fltTcaFcInputUnkClass1qtrTooshortMax

Severity: variable

Explanation: This fault is caused by "input too short frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365839: fltTcaFcInputUnkClass1yearTooshortMax

Severity: variable

Explanation: This fault is caused by "input too short frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365840: fltTcaFcInputUnkClass5minTooshortAvg

Severity: variable

Explanation: This fault is caused by "input too short frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365841: fltTcaFcInputUnkClass15minTooshortAvg

Severity: variable

Explanation: This fault is caused by "input too short frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365842: fltTcaFcInputUnkClass1hTooshortAvg

Severity: variable

Explanation: This fault is caused by "input too short frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365843: fltTcaFcInputUnkClass1dTooshortAvg

Severity: variable

Explanation: This fault is caused by "input too short frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365844: fltTcaFcInputUnkClass1wTooshortAvg

Severity: variable

Explanation: This fault is caused by "input too short frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365845: fltTcaFcInputUnkClass1moTooshortAvg

Severity: variable

Explanation: This fault is caused by "input too short frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365846: fltTcaFcInputUnkClass1qtrTooshortAvg

Severity: variable

Explanation: This fault is caused by "input too short frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365847: fltTcaFcInputUnkClass1yearTooshortAvg

Severity: variable

Explanation: This fault is caused by "input too short frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365872: fltTcaFcInputUnkClass5minTooshortTr

Severity: variable

Explanation: This fault is caused by "input too short frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365873: fltTcaFcInputUnkClass15minTooshortTr

Severity: variable

Explanation: This fault is caused by "input too short frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365874: fltTcaFcInputUnkClass1hTooshortTr

Severity: variable

Explanation: This fault is caused by "input too short frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365875: fltTcaFcInputUnkClass1dTooshortTr

Severity: variable

Explanation: This fault is caused by "input too short frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365876: fltTcaFcInputUnkClass1wTooshortTr

Severity: variable

Explanation: This fault is caused by "input too short frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365877: fltTcaFcInputUnkClass1moTooshortTr

Severity: variable

Explanation: This fault is caused by "input too short frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365878: fltTcaFcInputUnkClass1qtrTooshortTr

Severity: variable

Explanation: This fault is caused by "input too short frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365879: fltTcaFcInputUnkClass1yearTooshortTr

Severity: variable

Explanation: This fault is caused by "input too short frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365880: fltTcaFcInputUnkClass5minTooshortRate

Severity: variable

Explanation: This fault is caused by "input too short frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365881: fltTcaFcInputUnkClass15minTooshortRate

Severity: variable

Explanation: This fault is caused by "input too short frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365882: fltTcaFcInputUnkClass1hTooshortRate

Severity: variable

Explanation: This fault is caused by "input too short frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365883: fltTcaFcInputUnkClass1dTooshortRate

Severity: variable

Explanation: This fault is caused by "input too short frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365884: fltTcaFcInputUnkClass1wTooshortRate

Severity: variable

Explanation: This fault is caused by "input too short frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365885: fltTcaFcInputUnkClass1moTooshortRate

Severity: variable

Explanation: This fault is caused by "input too short frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365886: fltTcaFcInputUnkClass1qtrTooshortRate

Severity: variable

Explanation: This fault is caused by "input too short frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365887: fltTcaFcInputUnkClass1yearTooshortRate

Severity: variable

Explanation: This fault is caused by "input too short frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input too short frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3659: fltFvRsCtxToSDWanVpnResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F365960: fltTcaFcInputUnkClass5minUnknownLast

Severity: variable

Explanation: This fault is caused by "input unknown frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365961: fltTcaFcInputUnkClass15minUnknownLast

Severity: variable

Explanation: This fault is caused by "input unknown frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365962: fltTcaFcInputUnkClass1hUnknownLast

Severity: variable

Explanation: This fault is caused by "input unknown frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365963: fltTcaFcInputUnkClass1dUnknownLast

Severity: variable

Explanation: This fault is caused by "input unknown frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365964: fltTcaFcInputUnkClass1wUnknownLast

Severity: variable

Explanation: This fault is caused by "input unknown frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365965: fltTcaFcInputUnkClass1moUnknownLast

Severity: variable

Explanation: This fault is caused by "input unknown frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365966: fltTcaFcInputUnkClass1qtrUnknownLast

Severity: variable

Explanation: This fault is caused by "input unknown frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365967: fltTcaFcInputUnkClass1yearUnknownLast

Severity: variable

Explanation: This fault is caused by "input unknown frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365976: fltTcaFcInputUnkClass5minUnknownCum

Severity: variable

Explanation: This fault is caused by "input unknown frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365977: fltTcaFcInputUnkClass15minUnknownCum

Severity: variable

Explanation: This fault is caused by "input unknown frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365978: fltTcaFcInputUnkClass1hUnknownCum

Severity: variable

Explanation: This fault is caused by "input unknown frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365979: fltTcaFcInputUnkClass1dUnknownCum

Severity: variable

Explanation: This fault is caused by "input unknown frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365980: fltTcaFcInputUnkClass1wUnknownCum

Severity: variable

Explanation: This fault is caused by "input unknown frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365981: fltTcaFcInputUnkClass1moUnknownCum

Severity: variable

Explanation: This fault is caused by "input unknown frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365982: fltTcaFcInputUnkClass1qtrUnknownCum

Severity: variable

Explanation: This fault is caused by "input unknown frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365983: fltTcaFcInputUnkClass1yearUnknownCum

Severity: variable

Explanation: This fault is caused by "input unknown frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365984: fltTcaFcInputUnkClass5minUnknownPer

Severity: variable

Explanation: This fault is caused by "input unknown frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365985: fltTcaFcInputUnkClass15minUnknownPer

Severity: variable

Explanation: This fault is caused by "input unknown frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365986: fltTcaFcInputUnkClass1hUnknownPer

Severity: variable

Explanation: This fault is caused by "input unknown frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365987: fltTcaFcInputUnkClass1dUnknownPer

Severity: variable

Explanation: This fault is caused by "input unknown frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365988: fltTcaFcInputUnkClass1wUnknownPer

Severity: variable

Explanation: This fault is caused by "input unknown frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365989: fltTcaFcInputUnkClass1moUnknownPer

Severity: variable

Explanation: This fault is caused by "input unknown frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365990: fltTcaFcInputUnkClass1qtrUnknownPer

Severity: variable

Explanation: This fault is caused by "input unknown frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365991: fltTcaFcInputUnkClass1yearUnknownPer

Severity: variable

Explanation: This fault is caused by "input unknown frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365992: fltTcaFcInputUnkClass5minUnknownMin

Severity: variable

Explanation: This fault is caused by "input unknown frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365993: fltTcaFcInputUnkClass15minUnknownMin

Severity: variable

Explanation: This fault is caused by "input unknown frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365994: fltTcaFcInputUnkClass1hUnknownMin

Severity: variable

Explanation: This fault is caused by "input unknown frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365995: fltTcaFcInputUnkClass1dUnknownMin

Severity: variable

Explanation: This fault is caused by "input unknown frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365996: fltTcaFcInputUnkClass1wUnknownMin

Severity: variable

Explanation: This fault is caused by "input unknown frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365997: fltTcaFcInputUnkClass1moUnknownMin

Severity: variable

Explanation: This fault is caused by "input unknown frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365998: fltTcaFcInputUnkClass1qtrUnknownMin

Severity: variable

Explanation: This fault is caused by "input unknown frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F365999: fltTcaFcInputUnkClass1yearUnknownMin

Severity: variable

Explanation: This fault is caused by "input unknown frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366000: fltTcaFcInputUnkClass5minUnknownMax

Severity: variable

Explanation: This fault is caused by "input unknown frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366001: fltTcaFcInputUnkClass15minUnknownMax

Severity: variable

Explanation: This fault is caused by "input unknown frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366002: fltTcaFcInputUnkClass1hUnknownMax

Severity: variable

Explanation: This fault is caused by "input unknown frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366003: fltTcaFcInputUnkClass1dUnknownMax

Severity: variable

Explanation: This fault is caused by "input unknown frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366004: fltTcaFcInputUnkClass1wUnknownMax

Severity: variable

Explanation: This fault is caused by "input unknown frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366005: fltTcaFcInputUnkClass1moUnknownMax

Severity: variable

Explanation: This fault is caused by "input unknown frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366006: fltTcaFcInputUnkClass1qtrUnknownMax

Severity: variable

Explanation: This fault is caused by "input unknown frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366007: fltTcaFcInputUnkClass1yearUnknownMax

Severity: variable

Explanation: This fault is caused by "input unknown frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366008: fltTcaFcInputUnkClass5minUnknownAvg

Severity: variable

Explanation: This fault is caused by "input unknown frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366009: fltTcaFcInputUnkClass15minUnknownAvg

Severity: variable

Explanation: This fault is caused by "input unknown frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366010: fltTcaFcInputUnkClass1hUnknownAvg

Severity: variable

Explanation: This fault is caused by "input unknown frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366011: fltTcaFcInputUnkClass1dUnknownAvg

Severity: variable

Explanation: This fault is caused by "input unknown frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366012: fltTcaFcInputUnkClass1wUnknownAvg

Severity: variable

Explanation: This fault is caused by "input unknown frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366013: fltTcaFcInputUnkClass1moUnknownAvg

Severity: variable

Explanation: This fault is caused by "input unknown frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366014: fltTcaFcInputUnkClass1qtrUnknownAvg

Severity: variable

Explanation: This fault is caused by "input unknown frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366015: fltTcaFcInputUnkClass1yearUnknownAvg

Severity: variable

Explanation: This fault is caused by "input unknown frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366040: fltTcaFcInputUnkClass5minUnknownTr

Severity: variable

Explanation: This fault is caused by "input unknown frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366041: fltTcaFcInputUnkClass15minUnknownTr

Severity: variable

Explanation: This fault is caused by "input unknown frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366042: fltTcaFcInputUnkClass1hUnknownTr

Severity: variable

Explanation: This fault is caused by "input unknown frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366043: fltTcaFcInputUnkClass1dUnknownTr

Severity: variable

Explanation: This fault is caused by "input unknown frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366044: fltTcaFcInputUnkClass1wUnknownTr

Severity: variable

Explanation: This fault is caused by "input unknown frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366045: fltTcaFcInputUnkClass1moUnknownTr

Severity: variable

Explanation: This fault is caused by "input unknown frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366046: fltTcaFcInputUnkClass1qtrUnknownTr

Severity: variable

Explanation: This fault is caused by "input unknown frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366047: fltTcaFcInputUnkClass1yearUnknownTr

Severity: variable

Explanation: This fault is caused by "input unknown frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366048: fltTcaFcInputUnkClass5minUnknownRate

Severity: variable

Explanation: This fault is caused by "input unknown frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366049: fltTcaFcInputUnkClass15minUnknownRate

Severity: variable

Explanation: This fault is caused by "input unknown frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366050: fltTcaFcInputUnkClass1hUnknownRate

Severity: variable

Explanation: This fault is caused by "input unknown frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366051: fltTcaFcInputUnkClass1dUnknownRate

Severity: variable

Explanation: This fault is caused by "input unknown frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366052: fltTcaFcInputUnkClass1wUnknownRate

Severity: variable

Explanation: This fault is caused by "input unknown frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366053: fltTcaFcInputUnkClass1moUnknownRate

Severity: variable

Explanation: This fault is caused by "input unknown frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366054: fltTcaFcInputUnkClass1qtrUnknownRate

Severity: variable

Explanation: This fault is caused by "input unknown frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366055: fltTcaFcInputUnkClass1yearUnknownRate

Severity: variable

Explanation: This fault is caused by "input unknown frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input unknown frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3661: fltSpanRsVSrcGrpToFilterGrpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F366128: fltTcaFcLinkFail5minLinkfailLast

Severity: variable

Explanation: This fault is caused by "link failures current value" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366129: fltTcaFcLinkFail15minLinkfailLast

Severity: variable

Explanation: This fault is caused by "link failures current value" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366130: fltTcaFcLinkFail1hLinkfailLast

Severity: variable

Explanation: This fault is caused by "link failures current value" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366131: fltTcaFcLinkFail1dLinkfailLast

Severity: variable

Explanation: This fault is caused by "link failures current value" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366132: fltTcaFcLinkFail1wLinkfailLast

Severity: variable

Explanation: This fault is caused by "link failures current value" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366133: fltTcaFcLinkFail1moLinkfailLast

Severity: variable

Explanation: This fault is caused by "link failures current value" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366134: fltTcaFcLinkFail1qtrLinkfailLast

Severity: variable

Explanation: This fault is caused by "link failures current value" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366135: fltTcaFcLinkFail1yearLinkfailLast

Severity: variable

Explanation: This fault is caused by "link failures current value" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366144: fltTcaFcLinkFail5minLinkfailCum

Severity: variable

Explanation: This fault is caused by "link failures cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366145: fltTcaFcLinkFail15minLinkfailCum

Severity: variable

Explanation: This fault is caused by "link failures cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366146: fltTcaFcLinkFail1hLinkfailCum

Severity: variable

Explanation: This fault is caused by "link failures cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366147: fltTcaFcLinkFail1dLinkfailCum

Severity: variable

Explanation: This fault is caused by "link failures cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366148: fltTcaFcLinkFail1wLinkfailCum

Severity: variable

Explanation: This fault is caused by "link failures cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366149: fltTcaFcLinkFail1moLinkfailCum

Severity: variable

Explanation: This fault is caused by "link failures cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366150: fltTcaFcLinkFail1qtrLinkfailCum

Severity: variable

Explanation: This fault is caused by "link failures cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366151: fltTcaFcLinkFail1yearLinkfailCum

Severity: variable

Explanation: This fault is caused by "link failures cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366152: fltTcaFcLinkFail5minLinkfailPer

Severity: variable

Explanation: This fault is caused by "link failures periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366153: fltTcaFcLinkFail15minLinkfailPer

Severity: variable

Explanation: This fault is caused by "link failures periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366154: fltTcaFcLinkFail1hLinkfailPer

Severity: variable

Explanation: This fault is caused by "link failures periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366155: fltTcaFcLinkFail1dLinkfailPer

Severity: variable

Explanation: This fault is caused by "link failures periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366156: fltTcaFcLinkFail1wLinkfailPer

Severity: variable

Explanation: This fault is caused by "link failures periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366157: fltTcaFcLinkFail1moLinkfailPer

Severity: variable

Explanation: This fault is caused by "link failures periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366158: fltTcaFcLinkFail1qtrLinkfailPer

Severity: variable

Explanation: This fault is caused by "link failures periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366159: fltTcaFcLinkFail1yearLinkfailPer

Severity: variable

Explanation: This fault is caused by "link failures periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366160: fltTcaFcLinkFail5minLinkfailMin

Severity: variable

Explanation: This fault is caused by "link failures minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366161: fltTcaFcLinkFail15minLinkfailMin

Severity: variable

Explanation: This fault is caused by "link failures minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366162: fltTcaFcLinkFail1hLinkfailMin

Severity: variable

Explanation: This fault is caused by "link failures minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366163: fltTcaFcLinkFail1dLinkfailMin

Severity: variable

Explanation: This fault is caused by "link failures minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366164: fltTcaFcLinkFail1wLinkfailMin

Severity: variable

Explanation: This fault is caused by "link failures minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366165: fltTcaFcLinkFail1moLinkfailMin

Severity: variable

Explanation: This fault is caused by "link failures minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366166: fltTcaFcLinkFail1qtrLinkfailMin

Severity: variable

Explanation: This fault is caused by "link failures minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366167: fltTcaFcLinkFail1yearLinkfailMin

Severity: variable

Explanation: This fault is caused by "link failures minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366168: fltTcaFcLinkFail5minLinkfailMax

Severity: variable

Explanation: This fault is caused by "link failures maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366169: fltTcaFcLinkFail15minLinkfailMax

Severity: variable

Explanation: This fault is caused by "link failures maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366170: fltTcaFcLinkFail1hLinkfailMax

Severity: variable

Explanation: This fault is caused by "link failures maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366171: fltTcaFcLinkFail1dLinkfailMax

Severity: variable

Explanation: This fault is caused by "link failures maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366172: fltTcaFcLinkFail1wLinkfailMax

Severity: variable

Explanation: This fault is caused by "link failures maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366173: fltTcaFcLinkFail1moLinkfailMax

Severity: variable

Explanation: This fault is caused by "link failures maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366174: fltTcaFcLinkFail1qtrLinkfailMax

Severity: variable

Explanation: This fault is caused by "link failures maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366175: fltTcaFcLinkFail1yearLinkfailMax

Severity: variable

Explanation: This fault is caused by "link failures maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366176: fltTcaFcLinkFail5minLinkfailAvg

Severity: variable

Explanation: This fault is caused by "link failures average value" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366177: fltTcaFcLinkFail15minLinkfailAvg

Severity: variable

Explanation: This fault is caused by "link failures average value" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366178: fltTcaFcLinkFail1hLinkfailAvg

Severity: variable

Explanation: This fault is caused by "link failures average value" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366179: fltTcaFcLinkFail1dLinkfailAvg

Severity: variable

Explanation: This fault is caused by "link failures average value" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366180: fltTcaFcLinkFail1wLinkfailAvg

Severity: variable

Explanation: This fault is caused by "link failures average value" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366181: fltTcaFcLinkFail1moLinkfailAvg

Severity: variable

Explanation: This fault is caused by "link failures average value" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366182: fltTcaFcLinkFail1qtrLinkfailAvg

Severity: variable

Explanation: This fault is caused by "link failures average value" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366183: fltTcaFcLinkFail1yearLinkfailAvg

Severity: variable

Explanation: This fault is caused by "link failures average value" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366208: fltTcaFcLinkFail5minLinkfailTr

Severity: variable

Explanation: This fault is caused by "link failures trend" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366209: fltTcaFcLinkFail15minLinkfailTr

Severity: variable

Explanation: This fault is caused by "link failures trend" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366210: fltTcaFcLinkFail1hLinkfailTr

Severity: variable

Explanation: This fault is caused by "link failures trend" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366211: fltTcaFcLinkFail1dLinkfailTr

Severity: variable

Explanation: This fault is caused by "link failures trend" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366212: fltTcaFcLinkFail1wLinkfailTr

Severity: variable

Explanation: This fault is caused by "link failures trend" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366213: fltTcaFcLinkFail1moLinkfailTr

Severity: variable

Explanation: This fault is caused by "link failures trend" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366214: fltTcaFcLinkFail1qtrLinkfailTr

Severity: variable

Explanation: This fault is caused by "link failures trend" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366215: fltTcaFcLinkFail1yearLinkfailTr

Severity: variable

Explanation: This fault is caused by "link failures trend" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366216: fltTcaFcLinkFail5minLinkfailRate

Severity: variable

Explanation: This fault is caused by "link failures rate" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366217: fltTcaFcLinkFail15minLinkfailRate

Severity: variable

Explanation: This fault is caused by "link failures rate" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366218: fltTcaFcLinkFail1hLinkfailRate

Severity: variable

Explanation: This fault is caused by "link failures rate" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366219: fltTcaFcLinkFail1dLinkfailRate

Severity: variable

Explanation: This fault is caused by "link failures rate" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366220: fltTcaFcLinkFail1wLinkfailRate

Severity: variable

Explanation: This fault is caused by "link failures rate" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366221: fltTcaFcLinkFail1moLinkfailRate

Severity: variable

Explanation: This fault is caused by "link failures rate" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366222: fltTcaFcLinkFail1qtrLinkfailRate

Severity: variable

Explanation: This fault is caused by "link failures rate" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366223: fltTcaFcLinkFail1yearLinkfailRate

Severity: variable

Explanation: This fault is caused by "link failures rate" statistical property crossing threshold level.

Recommended Action: Check the values of "link failures" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366296: fltTcaFcLinkFail5minSignlossLast

Severity: variable

Explanation: This fault is caused by "signal losses current value" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366297: fltTcaFcLinkFail15minSignlossLast

Severity: variable

Explanation: This fault is caused by "signal losses current value" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366298: fltTcaFcLinkFail1hSignlossLast

Severity: variable

Explanation: This fault is caused by "signal losses current value" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366299: fltTcaFcLinkFail1dSignlossLast

Severity: variable

Explanation: This fault is caused by "signal losses current value" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3663: fltCloudRsCtxProfileToStatsPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F366300: fltTcaFcLinkFail1wSignlossLast

Severity: variable

Explanation: This fault is caused by "signal losses current value" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366301: fltTcaFcLinkFail1moSignlossLast

Severity: variable

Explanation: This fault is caused by "signal losses current value" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366302: fltTcaFcLinkFail1qtrSignlossLast

Severity: variable

Explanation: This fault is caused by "signal losses current value" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366303: fltTcaFcLinkFail1yearSignlossLast

Severity: variable

Explanation: This fault is caused by "signal losses current value" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366312: fltTcaFcLinkFail5minSignlossCum

Severity: variable

Explanation: This fault is caused by "signal losses cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366313: fltTcaFcLinkFail15minSignlossCum

Severity: variable

Explanation: This fault is caused by "signal losses cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366314: fltTcaFcLinkFail1hSignlossCum

Severity: variable

Explanation: This fault is caused by "signal losses cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366315: fltTcaFcLinkFail1dSignlossCum

Severity: variable

Explanation: This fault is caused by "signal losses cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366316: fltTcaFcLinkFail1wSignlossCum

Severity: variable

Explanation: This fault is caused by "signal losses cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366317: fltTcaFcLinkFail1moSignlossCum

Severity: variable

Explanation: This fault is caused by "signal losses cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366318: fltTcaFcLinkFail1qtrSignlossCum

Severity: variable

Explanation: This fault is caused by "signal losses cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366319: fltTcaFcLinkFail1yearSignlossCum

Severity: variable

Explanation: This fault is caused by "signal losses cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366320: fltTcaFcLinkFail5minSignlossPer

Severity: variable

Explanation: This fault is caused by "signal losses periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366321: fltTcaFcLinkFail15minSignlossPer

Severity: variable

Explanation: This fault is caused by "signal losses periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366322: fltTcaFcLinkFail1hSignlossPer

Severity: variable

Explanation: This fault is caused by "signal losses periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366323: fltTcaFcLinkFail1dSignlossPer

Severity: variable

Explanation: This fault is caused by "signal losses periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366324: fltTcaFcLinkFail1wSignlossPer

Severity: variable

Explanation: This fault is caused by "signal losses periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366325: fltTcaFcLinkFail1moSignlossPer

Severity: variable

Explanation: This fault is caused by "signal losses periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366326: fltTcaFcLinkFail1qtrSignlossPer

Severity: variable

Explanation: This fault is caused by "signal losses periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366327: fltTcaFcLinkFail1yearSignlossPer

Severity: variable

Explanation: This fault is caused by "signal losses periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366328: fltTcaFcLinkFail5minSignlossMin

Severity: variable

Explanation: This fault is caused by "signal losses minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366329: fltTcaFcLinkFail15minSignlossMin

Severity: variable

Explanation: This fault is caused by "signal losses minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366330: fltTcaFcLinkFail1hSignlossMin

Severity: variable

Explanation: This fault is caused by "signal losses minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366331: fltTcaFcLinkFail1dSignlossMin

Severity: variable

Explanation: This fault is caused by "signal losses minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366332: fltTcaFcLinkFail1wSignlossMin

Severity: variable

Explanation: This fault is caused by "signal losses minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366333: fltTcaFcLinkFail1moSignlossMin

Severity: variable

Explanation: This fault is caused by "signal losses minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366334: fltTcaFcLinkFail1qtrSignlossMin

Severity: variable

Explanation: This fault is caused by "signal losses minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366335: fltTcaFcLinkFail1yearSignlossMin

Severity: variable

Explanation: This fault is caused by "signal losses minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366336: fltTcaFcLinkFail5minSignlossMax

Severity: variable

Explanation: This fault is caused by "signal losses maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366337: fltTcaFcLinkFail15minSignlossMax

Severity: variable

Explanation: This fault is caused by "signal losses maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366338: fltTcaFcLinkFail1hSignlossMax

Severity: variable

Explanation: This fault is caused by "signal losses maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366339: fltTcaFcLinkFail1dSignlossMax

Severity: variable

Explanation: This fault is caused by "signal losses maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366340: fltTcaFcLinkFail1wSignlossMax

Severity: variable

Explanation: This fault is caused by "signal losses maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366341: fltTcaFcLinkFail1moSignlossMax

Severity: variable

Explanation: This fault is caused by "signal losses maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366342: fltTcaFcLinkFail1qtrSignlossMax

Severity: variable

Explanation: This fault is caused by "signal losses maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366343: fltTcaFcLinkFail1yearSignlossMax

Severity: variable

Explanation: This fault is caused by "signal losses maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366344: fltTcaFcLinkFail5minSignlossAvg

Severity: variable

Explanation: This fault is caused by "signal losses average value" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366345: fltTcaFcLinkFail15minSignlossAvg

Severity: variable

Explanation: This fault is caused by "signal losses average value" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366346: fltTcaFcLinkFail1hSignlossAvg

Severity: variable

Explanation: This fault is caused by "signal losses average value" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366347: fltTcaFcLinkFail1dSignlossAvg

Severity: variable

Explanation: This fault is caused by "signal losses average value" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366348: fltTcaFcLinkFail1wSignlossAvg

Severity: variable

Explanation: This fault is caused by "signal losses average value" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366349: fltTcaFcLinkFail1moSignlossAvg

Severity: variable

Explanation: This fault is caused by "signal losses average value" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366350: fltTcaFcLinkFail1qtrSignlossAvg

Severity: variable

Explanation: This fault is caused by "signal losses average value" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366351: fltTcaFcLinkFail1yearSignlossAvg

Severity: variable

Explanation: This fault is caused by "signal losses average value" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366376: fltTcaFcLinkFail5minSignlossTr

Severity: variable

Explanation: This fault is caused by "signal losses trend" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366377: fltTcaFcLinkFail15minSignlossTr

Severity: variable

Explanation: This fault is caused by "signal losses trend" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366378: fltTcaFcLinkFail1hSignlossTr

Severity: variable

Explanation: This fault is caused by "signal losses trend" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366379: fltTcaFcLinkFail1dSignlossTr

Severity: variable

Explanation: This fault is caused by "signal losses trend" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366380: fltTcaFcLinkFail1wSignlossTr

Severity: variable

Explanation: This fault is caused by "signal losses trend" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366381: fltTcaFcLinkFail1moSignlossTr

Severity: variable

Explanation: This fault is caused by "signal losses trend" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366382: fltTcaFcLinkFail1qtrSignlossTr

Severity: variable

Explanation: This fault is caused by "signal losses trend" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366383: fltTcaFcLinkFail1yearSignlossTr

Severity: variable

Explanation: This fault is caused by "signal losses trend" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366384: fltTcaFcLinkFail5minSignlossRate

Severity: variable

Explanation: This fault is caused by "signal losses rate" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366385: fltTcaFcLinkFail15minSignlossRate

Severity: variable

Explanation: This fault is caused by "signal losses rate" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366386: fltTcaFcLinkFail1hSignlossRate

Severity: variable

Explanation: This fault is caused by "signal losses rate" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366387: fltTcaFcLinkFail1dSignlossRate

Severity: variable

Explanation: This fault is caused by "signal losses rate" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366388: fltTcaFcLinkFail1wSignlossRate

Severity: variable

Explanation: This fault is caused by "signal losses rate" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366389: fltTcaFcLinkFail1moSignlossRate

Severity: variable

Explanation: This fault is caused by "signal losses rate" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366390: fltTcaFcLinkFail1qtrSignlossRate

Severity: variable

Explanation: This fault is caused by "signal losses rate" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366391: fltTcaFcLinkFail1yearSignlossRate

Severity: variable

Explanation: This fault is caused by "signal losses rate" statistical property crossing threshold level.

Recommended Action: Check the values of "signal losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366464: fltTcaFcLinkFail5minSynclossLast

Severity: variable

Explanation: This fault is caused by "sync losses current value" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366465: fltTcaFcLinkFail15minSynclossLast

Severity: variable

Explanation: This fault is caused by "sync losses current value" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366466: fltTcaFcLinkFail1hSynclossLast

Severity: variable

Explanation: This fault is caused by "sync losses current value" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366467: fltTcaFcLinkFail1dSynclossLast

Severity: variable

Explanation: This fault is caused by "sync losses current value" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366468: fltTcaFcLinkFail1wSynclossLast

Severity: variable

Explanation: This fault is caused by "sync losses current value" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366469: fltTcaFcLinkFail1moSynclossLast

Severity: variable

Explanation: This fault is caused by "sync losses current value" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366470: fltTcaFcLinkFail1qtrSynclossLast

Severity: variable

Explanation: This fault is caused by "sync losses current value" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366471: fltTcaFcLinkFail1yearSynclossLast

Severity: variable

Explanation: This fault is caused by "sync losses current value" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366480: fltTcaFcLinkFail5minSynclossCum

Severity: variable

Explanation: This fault is caused by "sync losses cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366481: fltTcaFcLinkFail15minSynclossCum

Severity: variable

Explanation: This fault is caused by "sync losses cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366482: fltTcaFcLinkFail1hSynclossCum

Severity: variable

Explanation: This fault is caused by "sync losses cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366483: fltTcaFcLinkFail1dSynclossCum

Severity: variable

Explanation: This fault is caused by "sync losses cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366484: fltTcaFcLinkFail1wSynclossCum

Severity: variable

Explanation: This fault is caused by "sync losses cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366485: fltTcaFcLinkFail1moSynclossCum

Severity: variable

Explanation: This fault is caused by "sync losses cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366486: fltTcaFcLinkFail1qtrSynclossCum

Severity: variable

Explanation: This fault is caused by "sync losses cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366487: fltTcaFcLinkFail1yearSynclossCum

Severity: variable

Explanation: This fault is caused by "sync losses cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366488: fltTcaFcLinkFail5minSynclossPer

Severity: variable

Explanation: This fault is caused by "sync losses periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366489: fltTcaFcLinkFail15minSynclossPer

Severity: variable

Explanation: This fault is caused by "sync losses periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366490: fltTcaFcLinkFail1hSynclossPer

Severity: variable

Explanation: This fault is caused by "sync losses periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366491: fltTcaFcLinkFail1dSynclossPer

Severity: variable

Explanation: This fault is caused by "sync losses periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366492: fltTcaFcLinkFail1wSynclossPer

Severity: variable

Explanation: This fault is caused by "sync losses periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366493: fltTcaFcLinkFail1moSynclossPer

Severity: variable

Explanation: This fault is caused by "sync losses periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366494: fltTcaFcLinkFail1qtrSynclossPer

Severity: variable

Explanation: This fault is caused by "sync losses periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366495: fltTcaFcLinkFail1yearSynclossPer

Severity: variable

Explanation: This fault is caused by "sync losses periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366496: fltTcaFcLinkFail5minSynclossMin

Severity: variable

Explanation: This fault is caused by "sync losses minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366497: fltTcaFcLinkFail15minSynclossMin

Severity: variable

Explanation: This fault is caused by "sync losses minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366498: fltTcaFcLinkFail1hSynclossMin

Severity: variable

Explanation: This fault is caused by "sync losses minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366499: fltTcaFcLinkFail1dSynclossMin

Severity: variable

Explanation: This fault is caused by "sync losses minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366500: fltTcaFcLinkFail1wSynclossMin

Severity: variable

Explanation: This fault is caused by "sync losses minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366501: fltTcaFcLinkFail1moSynclossMin

Severity: variable

Explanation: This fault is caused by "sync losses minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366502: fltTcaFcLinkFail1qtrSynclossMin

Severity: variable

Explanation: This fault is caused by "sync losses minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366503: fltTcaFcLinkFail1yearSynclossMin

Severity: variable

Explanation: This fault is caused by "sync losses minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366504: fltTcaFcLinkFail5minSynclossMax

Severity: variable

Explanation: This fault is caused by "sync losses maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366505: fltTcaFcLinkFail15minSynclossMax

Severity: variable

Explanation: This fault is caused by "sync losses maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366506: fltTcaFcLinkFail1hSynclossMax

Severity: variable

Explanation: This fault is caused by "sync losses maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366507: fltTcaFcLinkFail1dSynclossMax

Severity: variable

Explanation: This fault is caused by "sync losses maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366508: fltTcaFcLinkFail1wSynclossMax

Severity: variable

Explanation: This fault is caused by "sync losses maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366509: fltTcaFcLinkFail1moSynclossMax

Severity: variable

Explanation: This fault is caused by "sync losses maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366510: fltTcaFcLinkFail1qtrSynclossMax

Severity: variable

Explanation: This fault is caused by "sync losses maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366511: fltTcaFcLinkFail1yearSynclossMax

Severity: variable

Explanation: This fault is caused by "sync losses maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366512: fltTcaFcLinkFail5minSynclossAvg

Severity: variable

Explanation: This fault is caused by "sync losses average value" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366513: fltTcaFcLinkFail15minSynclossAvg

Severity: variable

Explanation: This fault is caused by "sync losses average value" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366514: fltTcaFcLinkFail1hSynclossAvg

Severity: variable

Explanation: This fault is caused by "sync losses average value" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366515: fltTcaFcLinkFail1dSynclossAvg

Severity: variable

Explanation: This fault is caused by "sync losses average value" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366516: fltTcaFcLinkFail1wSynclossAvg

Severity: variable

Explanation: This fault is caused by "sync losses average value" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366517: fltTcaFcLinkFail1moSynclossAvg

Severity: variable

Explanation: This fault is caused by "sync losses average value" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366518: fltTcaFcLinkFail1qtrSynclossAvg

Severity: variable

Explanation: This fault is caused by "sync losses average value" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366519: fltTcaFcLinkFail1yearSynclossAvg

Severity: variable

Explanation: This fault is caused by "sync losses average value" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366544: fltTcaFcLinkFail5minSynclossTr

Severity: variable

Explanation: This fault is caused by "sync losses trend" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366545: fltTcaFcLinkFail15minSynclossTr

Severity: variable

Explanation: This fault is caused by "sync losses trend" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366546: fltTcaFcLinkFail1hSynclossTr

Severity: variable

Explanation: This fault is caused by "sync losses trend" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366547: fltTcaFcLinkFail1dSynclossTr

Severity: variable

Explanation: This fault is caused by "sync losses trend" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366548: fltTcaFcLinkFail1wSynclossTr

Severity: variable

Explanation: This fault is caused by "sync losses trend" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366549: fltTcaFcLinkFail1moSynclossTr

Severity: variable

Explanation: This fault is caused by "sync losses trend" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366550: fltTcaFcLinkFail1qtrSynclossTr

Severity: variable

Explanation: This fault is caused by "sync losses trend" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366551: fltTcaFcLinkFail1yearSynclossTr

Severity: variable

Explanation: This fault is caused by "sync losses trend" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366552: fltTcaFcLinkFail5minSynclossRate

Severity: variable

Explanation: This fault is caused by "sync losses rate" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366553: fltTcaFcLinkFail15minSynclossRate

Severity: variable

Explanation: This fault is caused by "sync losses rate" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366554: fltTcaFcLinkFail1hSynclossRate

Severity: variable

Explanation: This fault is caused by "sync losses rate" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366555: fltTcaFcLinkFail1dSynclossRate

Severity: variable

Explanation: This fault is caused by "sync losses rate" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366556: fltTcaFcLinkFail1wSynclossRate

Severity: variable

Explanation: This fault is caused by "sync losses rate" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366557: fltTcaFcLinkFail1moSynclossRate

Severity: variable

Explanation: This fault is caused by "sync losses rate" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366558: fltTcaFcLinkFail1qtrSynclossRate

Severity: variable

Explanation: This fault is caused by "sync losses rate" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366559: fltTcaFcLinkFail1yearSynclossRate

Severity: variable

Explanation: This fault is caused by "sync losses rate" statistical property crossing threshold level.

Recommended Action: Check the values of "sync losses" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366632: fltTcaFcOutputBytes5minClass2Last

Severity: variable

Explanation: This fault is caused by "output class2 bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366633: fltTcaFcOutputBytes15minClass2Last

Severity: variable

Explanation: This fault is caused by "output class2 bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366634: fltTcaFcOutputBytes1hClass2Last

Severity: variable

Explanation: This fault is caused by "output class2 bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366635: fltTcaFcOutputBytes1dClass2Last

Severity: variable

Explanation: This fault is caused by "output class2 bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366636: fltTcaFcOutputBytes1wClass2Last

Severity: variable

Explanation: This fault is caused by "output class2 bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366637: fltTcaFcOutputBytes1moClass2Last

Severity: variable

Explanation: This fault is caused by "output class2 bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366638: fltTcaFcOutputBytes1qtrClass2Last

Severity: variable

Explanation: This fault is caused by "output class2 bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366639: fltTcaFcOutputBytes1yearClass2Last

Severity: variable

Explanation: This fault is caused by "output class2 bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366648: fltTcaFcOutputBytes5minClass2Cum

Severity: variable

Explanation: This fault is caused by "output class2 bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366649: fltTcaFcOutputBytes15minClass2Cum

Severity: variable

Explanation: This fault is caused by "output class2 bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366650: fltTcaFcOutputBytes1hClass2Cum

Severity: variable

Explanation: This fault is caused by "output class2 bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366651: fltTcaFcOutputBytes1dClass2Cum

Severity: variable

Explanation: This fault is caused by "output class2 bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366652: fltTcaFcOutputBytes1wClass2Cum

Severity: variable

Explanation: This fault is caused by "output class2 bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366653: fltTcaFcOutputBytes1moClass2Cum

Severity: variable

Explanation: This fault is caused by "output class2 bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366654: fltTcaFcOutputBytes1qtrClass2Cum

Severity: variable

Explanation: This fault is caused by "output class2 bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366655: fltTcaFcOutputBytes1yearClass2Cum

Severity: variable

Explanation: This fault is caused by "output class2 bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366656: fltTcaFcOutputBytes5minClass2Per

Severity: variable

Explanation: This fault is caused by "output class2 bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366657: fltTcaFcOutputBytes15minClass2Per

Severity: variable

Explanation: This fault is caused by "output class2 bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366658: fltTcaFcOutputBytes1hClass2Per

Severity: variable

Explanation: This fault is caused by "output class2 bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366659: fltTcaFcOutputBytes1dClass2Per

Severity: variable

Explanation: This fault is caused by "output class2 bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366660: fltTcaFcOutputBytes1wClass2Per

Severity: variable

Explanation: This fault is caused by "output class2 bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366661: fltTcaFcOutputBytes1moClass2Per

Severity: variable

Explanation: This fault is caused by "output class2 bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366662: fltTcaFcOutputBytes1qtrClass2Per

Severity: variable

Explanation: This fault is caused by "output class2 bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366663: fltTcaFcOutputBytes1yearClass2Per

Severity: variable

Explanation: This fault is caused by "output class2 bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366664: fltTcaFcOutputBytes5minClass2Min

Severity: variable

Explanation: This fault is caused by "output class2 bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366665: fltTcaFcOutputBytes15minClass2Min

Severity: variable

Explanation: This fault is caused by "output class2 bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366666: fltTcaFcOutputBytes1hClass2Min

Severity: variable

Explanation: This fault is caused by "output class2 bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366667: fltTcaFcOutputBytes1dClass2Min

Severity: variable

Explanation: This fault is caused by "output class2 bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366668: fltTcaFcOutputBytes1wClass2Min

Severity: variable

Explanation: This fault is caused by "output class2 bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366669: fltTcaFcOutputBytes1moClass2Min

Severity: variable

Explanation: This fault is caused by "output class2 bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366670: fltTcaFcOutputBytes1qtrClass2Min

Severity: variable

Explanation: This fault is caused by "output class2 bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366671: fltTcaFcOutputBytes1yearClass2Min

Severity: variable

Explanation: This fault is caused by "output class2 bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366672: fltTcaFcOutputBytes5minClass2Max

Severity: variable

Explanation: This fault is caused by "output class2 bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366673: fltTcaFcOutputBytes15minClass2Max

Severity: variable

Explanation: This fault is caused by "output class2 bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366674: fltTcaFcOutputBytes1hClass2Max

Severity: variable

Explanation: This fault is caused by "output class2 bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366675: fltTcaFcOutputBytes1dClass2Max

Severity: variable

Explanation: This fault is caused by "output class2 bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366676: fltTcaFcOutputBytes1wClass2Max

Severity: variable

Explanation: This fault is caused by "output class2 bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366677: fltTcaFcOutputBytes1moClass2Max

Severity: variable

Explanation: This fault is caused by "output class2 bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366678: fltTcaFcOutputBytes1qtrClass2Max

Severity: variable

Explanation: This fault is caused by "output class2 bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366679: fltTcaFcOutputBytes1yearClass2Max

Severity: variable

Explanation: This fault is caused by "output class2 bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366680: fltTcaFcOutputBytes5minClass2Avg

Severity: variable

Explanation: This fault is caused by "output class2 bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366681: fltTcaFcOutputBytes15minClass2Avg

Severity: variable

Explanation: This fault is caused by "output class2 bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366682: fltTcaFcOutputBytes1hClass2Avg

Severity: variable

Explanation: This fault is caused by "output class2 bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366683: fltTcaFcOutputBytes1dClass2Avg

Severity: variable

Explanation: This fault is caused by "output class2 bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366684: fltTcaFcOutputBytes1wClass2Avg

Severity: variable

Explanation: This fault is caused by "output class2 bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366685: fltTcaFcOutputBytes1moClass2Avg

Severity: variable

Explanation: This fault is caused by "output class2 bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366686: fltTcaFcOutputBytes1qtrClass2Avg

Severity: variable

Explanation: This fault is caused by "output class2 bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366687: fltTcaFcOutputBytes1yearClass2Avg

Severity: variable

Explanation: This fault is caused by "output class2 bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3667: fltHcloudEvRGDeployErrorCloudEventTaskRGError

Severity: major

Explanation: This fault is raised for any errors encountered while performing resource group events related programming on Azure

Recommended Action: None set.

F366712: fltTcaFcOutputBytes5minClass2Tr

Severity: variable

Explanation: This fault is caused by "output class2 bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366713: fltTcaFcOutputBytes15minClass2Tr

Severity: variable

Explanation: This fault is caused by "output class2 bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366714: fltTcaFcOutputBytes1hClass2Tr

Severity: variable

Explanation: This fault is caused by "output class2 bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366715: fltTcaFcOutputBytes1dClass2Tr

Severity: variable

Explanation: This fault is caused by "output class2 bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366716: fltTcaFcOutputBytes1wClass2Tr

Severity: variable

Explanation: This fault is caused by "output class2 bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366717: fltTcaFcOutputBytes1moClass2Tr

Severity: variable

Explanation: This fault is caused by "output class2 bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366718: fltTcaFcOutputBytes1qtrClass2Tr

Severity: variable

Explanation: This fault is caused by "output class2 bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366719: fltTcaFcOutputBytes1yearClass2Tr

Severity: variable

Explanation: This fault is caused by "output class2 bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366720: fltTcaFcOutputBytes5minClass2Rate

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366721: fltTcaFcOutputBytes15minClass2Rate

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366722: fltTcaFcOutputBytes1hClass2Rate

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366723: fltTcaFcOutputBytes1dClass2Rate

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366724: fltTcaFcOutputBytes1wClass2Rate

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366725: fltTcaFcOutputBytes1moClass2Rate

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366726: fltTcaFcOutputBytes1qtrClass2Rate

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366727: fltTcaFcOutputBytes1yearClass2Rate

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3668: fltHcloudEvNsDeployErrorCloudEventTaskNsError

Severity: major

Explanation: This fault is raised for any errors encountered while performing namespace events related programming on Azure

Recommended Action: None set.

F366800: fltTcaFcOutputBytes5minClass2RateLast

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366801: fltTcaFcOutputBytes15minClass2RateLast

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366802: fltTcaFcOutputBytes1hClass2RateLast

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366803: fltTcaFcOutputBytes1dClass2RateLast

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366804: fltTcaFcOutputBytes1wClass2RateLast

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366805: fltTcaFcOutputBytes1moClass2RateLast

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366806: fltTcaFcOutputBytes1qtrClass2RateLast

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366807: fltTcaFcOutputBytes1yearClass2RateLast

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366808: fltTcaFcOutputBytes5minClass2RateMin

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366809: fltTcaFcOutputBytes15minClass2RateMin

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366810: fltTcaFcOutputBytes1hClass2RateMin

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366811: fltTcaFcOutputBytes1dClass2RateMin

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366812: fltTcaFcOutputBytes1wClass2RateMin

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366813: fltTcaFcOutputBytes1moClass2RateMin

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366814: fltTcaFcOutputBytes1qtrClass2RateMin

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366815: fltTcaFcOutputBytes1yearClass2RateMin

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366816: fltTcaFcOutputBytes5minClass2RateMax

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366817: fltTcaFcOutputBytes15minClass2RateMax

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366818: fltTcaFcOutputBytes1hClass2RateMax

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366819: fltTcaFcOutputBytes1dClass2RateMax

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366820: fltTcaFcOutputBytes1wClass2RateMax

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366821: fltTcaFcOutputBytes1moClass2RateMax

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366822: fltTcaFcOutputBytes1qtrClass2RateMax

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366823: fltTcaFcOutputBytes1yearClass2RateMax

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366824: fltTcaFcOutputBytes5minClass2RateAvg

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366825: fltTcaFcOutputBytes15minClass2RateAvg

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366826: fltTcaFcOutputBytes1hClass2RateAvg

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366827: fltTcaFcOutputBytes1dClass2RateAvg

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366828: fltTcaFcOutputBytes1wClass2RateAvg

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366829: fltTcaFcOutputBytes1moClass2RateAvg

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366830: fltTcaFcOutputBytes1qtrClass2RateAvg

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366831: fltTcaFcOutputBytes1yearClass2RateAvg

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366864: fltTcaFcOutputBytes5minClass2RateTr

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366865: fltTcaFcOutputBytes15minClass2RateTr

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366866: fltTcaFcOutputBytes1hClass2RateTr

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366867: fltTcaFcOutputBytes1dClass2RateTr

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366868: fltTcaFcOutputBytes1wClass2RateTr

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366869: fltTcaFcOutputBytes1moClass2RateTr

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366870: fltTcaFcOutputBytes1qtrClass2RateTr

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366871: fltTcaFcOutputBytes1yearClass2RateTr

Severity: variable

Explanation: This fault is caused by "output class2 bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3669: fltHcloudEvAppDeployErrorCloudEventTaskAppError

Severity: major

Explanation: This fault is raised for any errors encountered while performing logic app events related programming on Azure

Recommended Action: None set.

F366920: fltTcaFcOutputBytes5minClass3Last

Severity: variable

Explanation: This fault is caused by "output class3 bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366921: fltTcaFcOutputBytes15minClass3Last

Severity: variable

Explanation: This fault is caused by "output class3 bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366922: fltTcaFcOutputBytes1hClass3Last

Severity: variable

Explanation: This fault is caused by "output class3 bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366923: fltTcaFcOutputBytes1dClass3Last

Severity: variable

Explanation: This fault is caused by "output class3 bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366924: fltTcaFcOutputBytes1wClass3Last

Severity: variable

Explanation: This fault is caused by "output class3 bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366925: fltTcaFcOutputBytes1moClass3Last

Severity: variable

Explanation: This fault is caused by "output class3 bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366926: fltTcaFcOutputBytes1qtrClass3Last

Severity: variable

Explanation: This fault is caused by "output class3 bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366927: fltTcaFcOutputBytes1yearClass3Last

Severity: variable

Explanation: This fault is caused by "output class3 bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366936: fltTcaFcOutputBytes5minClass3Cum

Severity: variable

Explanation: This fault is caused by "output class3 bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366937: fltTcaFcOutputBytes15minClass3Cum

Severity: variable

Explanation: This fault is caused by "output class3 bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366938: fltTcaFcOutputBytes1hClass3Cum

Severity: variable

Explanation: This fault is caused by "output class3 bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366939: fltTcaFcOutputBytes1dClass3Cum

Severity: variable

Explanation: This fault is caused by "output class3 bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366940: fltTcaFcOutputBytes1wClass3Cum

Severity: variable

Explanation: This fault is caused by "output class3 bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366941: fltTcaFcOutputBytes1moClass3Cum

Severity: variable

Explanation: This fault is caused by "output class3 bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366942: fltTcaFcOutputBytes1qtrClass3Cum

Severity: variable

Explanation: This fault is caused by "output class3 bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366943: fltTcaFcOutputBytes1yearClass3Cum

Severity: variable

Explanation: This fault is caused by "output class3 bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366944: fltTcaFcOutputBytes5minClass3Per

Severity: variable

Explanation: This fault is caused by "output class3 bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366945: fltTcaFcOutputBytes15minClass3Per

Severity: variable

Explanation: This fault is caused by "output class3 bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366946: fltTcaFcOutputBytes1hClass3Per

Severity: variable

Explanation: This fault is caused by "output class3 bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366947: fltTcaFcOutputBytes1dClass3Per

Severity: variable

Explanation: This fault is caused by "output class3 bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366948: fltTcaFcOutputBytes1wClass3Per

Severity: variable

Explanation: This fault is caused by "output class3 bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366949: fltTcaFcOutputBytes1moClass3Per

Severity: variable

Explanation: This fault is caused by "output class3 bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366950: fltTcaFcOutputBytes1qtrClass3Per

Severity: variable

Explanation: This fault is caused by "output class3 bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366951: fltTcaFcOutputBytes1yearClass3Per

Severity: variable

Explanation: This fault is caused by "output class3 bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366952: fltTcaFcOutputBytes5minClass3Min

Severity: variable

Explanation: This fault is caused by "output class3 bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366953: fltTcaFcOutputBytes15minClass3Min

Severity: variable

Explanation: This fault is caused by "output class3 bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366954: fltTcaFcOutputBytes1hClass3Min

Severity: variable

Explanation: This fault is caused by "output class3 bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366955: fltTcaFcOutputBytes1dClass3Min

Severity: variable

Explanation: This fault is caused by "output class3 bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366956: fltTcaFcOutputBytes1wClass3Min

Severity: variable

Explanation: This fault is caused by "output class3 bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366957: fltTcaFcOutputBytes1moClass3Min

Severity: variable

Explanation: This fault is caused by "output class3 bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366958: fltTcaFcOutputBytes1qtrClass3Min

Severity: variable

Explanation: This fault is caused by "output class3 bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366959: fltTcaFcOutputBytes1yearClass3Min

Severity: variable

Explanation: This fault is caused by "output class3 bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366960: fltTcaFcOutputBytes5minClass3Max

Severity: variable

Explanation: This fault is caused by "output class3 bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366961: fltTcaFcOutputBytes15minClass3Max

Severity: variable

Explanation: This fault is caused by "output class3 bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366962: fltTcaFcOutputBytes1hClass3Max

Severity: variable

Explanation: This fault is caused by "output class3 bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366963: fltTcaFcOutputBytes1dClass3Max

Severity: variable

Explanation: This fault is caused by "output class3 bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366964: fltTcaFcOutputBytes1wClass3Max

Severity: variable

Explanation: This fault is caused by "output class3 bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366965: fltTcaFcOutputBytes1moClass3Max

Severity: variable

Explanation: This fault is caused by "output class3 bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366966: fltTcaFcOutputBytes1qtrClass3Max

Severity: variable

Explanation: This fault is caused by "output class3 bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366967: fltTcaFcOutputBytes1yearClass3Max

Severity: variable

Explanation: This fault is caused by "output class3 bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366968: fltTcaFcOutputBytes5minClass3Avg

Severity: variable

Explanation: This fault is caused by "output class3 bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366969: fltTcaFcOutputBytes15minClass3Avg

Severity: variable

Explanation: This fault is caused by "output class3 bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366970: fltTcaFcOutputBytes1hClass3Avg

Severity: variable

Explanation: This fault is caused by "output class3 bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366971: fltTcaFcOutputBytes1dClass3Avg

Severity: variable

Explanation: This fault is caused by "output class3 bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366972: fltTcaFcOutputBytes1wClass3Avg

Severity: variable

Explanation: This fault is caused by "output class3 bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366973: fltTcaFcOutputBytes1moClass3Avg

Severity: variable

Explanation: This fault is caused by "output class3 bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366974: fltTcaFcOutputBytes1qtrClass3Avg

Severity: variable

Explanation: This fault is caused by "output class3 bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F366975: fltTcaFcOutputBytes1yearClass3Avg

Severity: variable

Explanation: This fault is caused by "output class3 bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3670: fltHcloudEvAlertDeployErrorCloudEventTaskAlertError

Severity: major

Explanation: This fault is raised for any errors encountered while performing alerts events related programming on Azure

Recommended Action: None set.

F367000: fltTcaFcOutputBytes5minClass3Tr

Severity: variable

Explanation: This fault is caused by "output class3 bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367001: fltTcaFcOutputBytes15minClass3Tr

Severity: variable

Explanation: This fault is caused by "output class3 bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367002: fltTcaFcOutputBytes1hClass3Tr

Severity: variable

Explanation: This fault is caused by "output class3 bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367003: fltTcaFcOutputBytes1dClass3Tr

Severity: variable

Explanation: This fault is caused by "output class3 bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367004: fltTcaFcOutputBytes1wClass3Tr

Severity: variable

Explanation: This fault is caused by "output class3 bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367005: fltTcaFcOutputBytes1moClass3Tr

Severity: variable

Explanation: This fault is caused by "output class3 bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367006: fltTcaFcOutputBytes1qtrClass3Tr

Severity: variable

Explanation: This fault is caused by "output class3 bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367007: fltTcaFcOutputBytes1yearClass3Tr

Severity: variable

Explanation: This fault is caused by "output class3 bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367008: fltTcaFcOutputBytes5minClass3Rate

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367009: fltTcaFcOutputBytes15minClass3Rate

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367010: fltTcaFcOutputBytes1hClass3Rate

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367011: fltTcaFcOutputBytes1dClass3Rate

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367012: fltTcaFcOutputBytes1wClass3Rate

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367013: fltTcaFcOutputBytes1moClass3Rate

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367014: fltTcaFcOutputBytes1qtrClass3Rate

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367015: fltTcaFcOutputBytes1yearClass3Rate

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367088: fltTcaFcOutputBytes5minClass3RateLast

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367089: fltTcaFcOutputBytes15minClass3RateLast

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367090: fltTcaFcOutputBytes1hClass3RateLast

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367091: fltTcaFcOutputBytes1dClass3RateLast

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367092: fltTcaFcOutputBytes1wClass3RateLast

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367093: fltTcaFcOutputBytes1moClass3RateLast

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367094: fltTcaFcOutputBytes1qtrClass3RateLast

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367095: fltTcaFcOutputBytes1yearClass3RateLast

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367096: fltTcaFcOutputBytes5minClass3RateMin

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367097: fltTcaFcOutputBytes15minClass3RateMin

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367098: fltTcaFcOutputBytes1hClass3RateMin

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367099: fltTcaFcOutputBytes1dClass3RateMin

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3671: fltHcloudRsEpToScaleSetNicGroupResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F367100: fltTcaFcOutputBytes1wClass3RateMin

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367101: fltTcaFcOutputBytes1moClass3RateMin

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367102: fltTcaFcOutputBytes1qtrClass3RateMin

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367103: fltTcaFcOutputBytes1yearClass3RateMin

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367104: fltTcaFcOutputBytes5minClass3RateMax

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367105: fltTcaFcOutputBytes15minClass3RateMax

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367106: fltTcaFcOutputBytes1hClass3RateMax

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367107: fltTcaFcOutputBytes1dClass3RateMax

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367108: fltTcaFcOutputBytes1wClass3RateMax

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367109: fltTcaFcOutputBytes1moClass3RateMax

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367110: fltTcaFcOutputBytes1qtrClass3RateMax

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367111: fltTcaFcOutputBytes1yearClass3RateMax

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367112: fltTcaFcOutputBytes5minClass3RateAvg

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367113: fltTcaFcOutputBytes15minClass3RateAvg

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367114: fltTcaFcOutputBytes1hClass3RateAvg

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367115: fltTcaFcOutputBytes1dClass3RateAvg

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367116: fltTcaFcOutputBytes1wClass3RateAvg

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367117: fltTcaFcOutputBytes1moClass3RateAvg

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367118: fltTcaFcOutputBytes1qtrClass3RateAvg

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367119: fltTcaFcOutputBytes1yearClass3RateAvg

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367152: fltTcaFcOutputBytes5minClass3RateTr

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367153: fltTcaFcOutputBytes15minClass3RateTr

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367154: fltTcaFcOutputBytes1hClass3RateTr

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367155: fltTcaFcOutputBytes1dClass3RateTr

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367156: fltTcaFcOutputBytes1wClass3RateTr

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367157: fltTcaFcOutputBytes1moClass3RateTr

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367158: fltTcaFcOutputBytes1qtrClass3RateTr

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367159: fltTcaFcOutputBytes1yearClass3RateTr

Severity: variable

Explanation: This fault is caused by "output class3 bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3672: fltHcloudRsInstToScaleSetResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F367208: fltTcaFcOutputBytes5minClassfLast

Severity: variable

Explanation: This fault is caused by "output classf bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367209: fltTcaFcOutputBytes15minClassfLast

Severity: variable

Explanation: This fault is caused by "output classf bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367210: fltTcaFcOutputBytes1hClassfLast

Severity: variable

Explanation: This fault is caused by "output classf bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367211: fltTcaFcOutputBytes1dClassfLast

Severity: variable

Explanation: This fault is caused by "output classf bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367212: fltTcaFcOutputBytes1wClassfLast

Severity: variable

Explanation: This fault is caused by "output classf bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367213: fltTcaFcOutputBytes1moClassfLast

Severity: variable

Explanation: This fault is caused by "output classf bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367214: fltTcaFcOutputBytes1qtrClassfLast

Severity: variable

Explanation: This fault is caused by "output classf bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367215: fltTcaFcOutputBytes1yearClassfLast

Severity: variable

Explanation: This fault is caused by "output classf bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367224: fltTcaFcOutputBytes5minClassfCum

Severity: variable

Explanation: This fault is caused by "output classf bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367225: fltTcaFcOutputBytes15minClassfCum

Severity: variable

Explanation: This fault is caused by "output classf bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367226: fltTcaFcOutputBytes1hClassfCum

Severity: variable

Explanation: This fault is caused by "output classf bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367227: fltTcaFcOutputBytes1dClassfCum

Severity: variable

Explanation: This fault is caused by "output classf bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367228: fltTcaFcOutputBytes1wClassfCum

Severity: variable

Explanation: This fault is caused by "output classf bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367229: fltTcaFcOutputBytes1moClassfCum

Severity: variable

Explanation: This fault is caused by "output classf bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367230: fltTcaFcOutputBytes1qtrClassfCum

Severity: variable

Explanation: This fault is caused by "output classf bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367231: fltTcaFcOutputBytes1yearClassfCum

Severity: variable

Explanation: This fault is caused by "output classf bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367232: fltTcaFcOutputBytes5minClassfPer

Severity: variable

Explanation: This fault is caused by "output classf bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367233: fltTcaFcOutputBytes15minClassfPer

Severity: variable

Explanation: This fault is caused by "output classf bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367234: fltTcaFcOutputBytes1hClassfPer

Severity: variable

Explanation: This fault is caused by "output classf bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367235: fltTcaFcOutputBytes1dClassfPer

Severity: variable

Explanation: This fault is caused by "output classf bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367236: fltTcaFcOutputBytes1wClassfPer

Severity: variable

Explanation: This fault is caused by "output classf bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367237: fltTcaFcOutputBytes1moClassfPer

Severity: variable

Explanation: This fault is caused by "output classf bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367238: fltTcaFcOutputBytes1qtrClassfPer

Severity: variable

Explanation: This fault is caused by "output classf bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367239: fltTcaFcOutputBytes1yearClassfPer

Severity: variable

Explanation: This fault is caused by "output classf bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367240: fltTcaFcOutputBytes5minClassfMin

Severity: variable

Explanation: This fault is caused by "output classf bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367241: fltTcaFcOutputBytes15minClassfMin

Severity: variable

Explanation: This fault is caused by "output classf bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367242: fltTcaFcOutputBytes1hClassfMin

Severity: variable

Explanation: This fault is caused by "output classf bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367243: fltTcaFcOutputBytes1dClassfMin

Severity: variable

Explanation: This fault is caused by "output classf bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367244: fltTcaFcOutputBytes1wClassfMin

Severity: variable

Explanation: This fault is caused by "output classf bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367245: fltTcaFcOutputBytes1moClassfMin

Severity: variable

Explanation: This fault is caused by "output classf bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367246: fltTcaFcOutputBytes1qtrClassfMin

Severity: variable

Explanation: This fault is caused by "output classf bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367247: fltTcaFcOutputBytes1yearClassfMin

Severity: variable

Explanation: This fault is caused by "output classf bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367248: fltTcaFcOutputBytes5minClassfMax

Severity: variable

Explanation: This fault is caused by "output classf bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367249: fltTcaFcOutputBytes15minClassfMax

Severity: variable

Explanation: This fault is caused by "output classf bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367250: fltTcaFcOutputBytes1hClassfMax

Severity: variable

Explanation: This fault is caused by "output classf bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367251: fltTcaFcOutputBytes1dClassfMax

Severity: variable

Explanation: This fault is caused by "output classf bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367252: fltTcaFcOutputBytes1wClassfMax

Severity: variable

Explanation: This fault is caused by "output classf bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367253: fltTcaFcOutputBytes1moClassfMax

Severity: variable

Explanation: This fault is caused by "output classf bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367254: fltTcaFcOutputBytes1qtrClassfMax

Severity: variable

Explanation: This fault is caused by "output classf bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367255: fltTcaFcOutputBytes1yearClassfMax

Severity: variable

Explanation: This fault is caused by "output classf bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367256: fltTcaFcOutputBytes5minClassfAvg

Severity: variable

Explanation: This fault is caused by "output classf bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367257: fltTcaFcOutputBytes15minClassfAvg

Severity: variable

Explanation: This fault is caused by "output classf bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367258: fltTcaFcOutputBytes1hClassfAvg

Severity: variable

Explanation: This fault is caused by "output classf bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367259: fltTcaFcOutputBytes1dClassfAvg

Severity: variable

Explanation: This fault is caused by "output classf bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367260: fltTcaFcOutputBytes1wClassfAvg

Severity: variable

Explanation: This fault is caused by "output classf bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367261: fltTcaFcOutputBytes1moClassfAvg

Severity: variable

Explanation: This fault is caused by "output classf bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367262: fltTcaFcOutputBytes1qtrClassfAvg

Severity: variable

Explanation: This fault is caused by "output classf bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367263: fltTcaFcOutputBytes1yearClassfAvg

Severity: variable

Explanation: This fault is caused by "output classf bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367288: fltTcaFcOutputBytes5minClassfTr

Severity: variable

Explanation: This fault is caused by "output classf bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367289: fltTcaFcOutputBytes15minClassfTr

Severity: variable

Explanation: This fault is caused by "output classf bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367290: fltTcaFcOutputBytes1hClassfTr

Severity: variable

Explanation: This fault is caused by "output classf bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367291: fltTcaFcOutputBytes1dClassfTr

Severity: variable

Explanation: This fault is caused by "output classf bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367292: fltTcaFcOutputBytes1wClassfTr

Severity: variable

Explanation: This fault is caused by "output classf bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367293: fltTcaFcOutputBytes1moClassfTr

Severity: variable

Explanation: This fault is caused by "output classf bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367294: fltTcaFcOutputBytes1qtrClassfTr

Severity: variable

Explanation: This fault is caused by "output classf bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367295: fltTcaFcOutputBytes1yearClassfTr

Severity: variable

Explanation: This fault is caused by "output classf bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367296: fltTcaFcOutputBytes5minClassfRate

Severity: variable

Explanation: This fault is caused by "output classf bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367297: fltTcaFcOutputBytes15minClassfRate

Severity: variable

Explanation: This fault is caused by "output classf bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367298: fltTcaFcOutputBytes1hClassfRate

Severity: variable

Explanation: This fault is caused by "output classf bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367299: fltTcaFcOutputBytes1dClassfRate

Severity: variable

Explanation: This fault is caused by "output classf bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3673: fltHcloudRsNicGroupToScaleSetResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F367300: fltTcaFcOutputBytes1wClassfRate

Severity: variable

Explanation: This fault is caused by "output classf bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367301: fltTcaFcOutputBytes1moClassfRate

Severity: variable

Explanation: This fault is caused by "output classf bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367302: fltTcaFcOutputBytes1qtrClassfRate

Severity: variable

Explanation: This fault is caused by "output classf bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367303: fltTcaFcOutputBytes1yearClassfRate

Severity: variable

Explanation: This fault is caused by "output classf bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367376: fltTcaFcOutputDisFrames5minDiscardsLast

Severity: variable

Explanation: This fault is caused by "output discards frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367377: fltTcaFcOutputDisFrames15minDiscardsLast

Severity: variable

Explanation: This fault is caused by "output discards frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367378: fltTcaFcOutputDisFrames1hDiscardsLast

Severity: variable

Explanation: This fault is caused by "output discards frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367379: fltTcaFcOutputDisFrames1dDiscardsLast

Severity: variable

Explanation: This fault is caused by "output discards frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367380: fltTcaFcOutputDisFrames1wDiscardsLast

Severity: variable

Explanation: This fault is caused by "output discards frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367381: fltTcaFcOutputDisFrames1moDiscardsLast

Severity: variable

Explanation: This fault is caused by "output discards frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367382: fltTcaFcOutputDisFrames1qtrDiscardsLast

Severity: variable

Explanation: This fault is caused by "output discards frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367383: fltTcaFcOutputDisFrames1yearDiscardsLast

Severity: variable

Explanation: This fault is caused by "output discards frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367392: fltTcaFcOutputDisFrames5minDiscardsCum

Severity: variable

Explanation: This fault is caused by "output discards frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367393: fltTcaFcOutputDisFrames15minDiscardsCum

Severity: variable

Explanation: This fault is caused by "output discards frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367394: fltTcaFcOutputDisFrames1hDiscardsCum

Severity: variable

Explanation: This fault is caused by "output discards frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367395: fltTcaFcOutputDisFrames1dDiscardsCum

Severity: variable

Explanation: This fault is caused by "output discards frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367396: fltTcaFcOutputDisFrames1wDiscardsCum

Severity: variable

Explanation: This fault is caused by "output discards frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367397: fltTcaFcOutputDisFrames1moDiscardsCum

Severity: variable

Explanation: This fault is caused by "output discards frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367398: fltTcaFcOutputDisFrames1qtrDiscardsCum

Severity: variable

Explanation: This fault is caused by "output discards frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367399: fltTcaFcOutputDisFrames1yearDiscardsCum

Severity: variable

Explanation: This fault is caused by "output discards frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367400: fltTcaFcOutputDisFrames5minDiscardsPer

Severity: variable

Explanation: This fault is caused by "output discards frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367401: fltTcaFcOutputDisFrames15minDiscardsPer

Severity: variable

Explanation: This fault is caused by "output discards frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367402: fltTcaFcOutputDisFrames1hDiscardsPer

Severity: variable

Explanation: This fault is caused by "output discards frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367403: fltTcaFcOutputDisFrames1dDiscardsPer

Severity: variable

Explanation: This fault is caused by "output discards frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367404: fltTcaFcOutputDisFrames1wDiscardsPer

Severity: variable

Explanation: This fault is caused by "output discards frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367405: fltTcaFcOutputDisFrames1moDiscardsPer

Severity: variable

Explanation: This fault is caused by "output discards frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367406: fltTcaFcOutputDisFrames1qtrDiscardsPer

Severity: variable

Explanation: This fault is caused by "output discards frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367407: fltTcaFcOutputDisFrames1yearDiscardsPer

Severity: variable

Explanation: This fault is caused by "output discards frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367408: fltTcaFcOutputDisFrames5minDiscardsMin

Severity: variable

Explanation: This fault is caused by "output discards frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367409: fltTcaFcOutputDisFrames15minDiscardsMin

Severity: variable

Explanation: This fault is caused by "output discards frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367410: fltTcaFcOutputDisFrames1hDiscardsMin

Severity: variable

Explanation: This fault is caused by "output discards frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367411: fltTcaFcOutputDisFrames1dDiscardsMin

Severity: variable

Explanation: This fault is caused by "output discards frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367412: fltTcaFcOutputDisFrames1wDiscardsMin

Severity: variable

Explanation: This fault is caused by "output discards frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367413: fltTcaFcOutputDisFrames1moDiscardsMin

Severity: variable

Explanation: This fault is caused by "output discards frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367414: fltTcaFcOutputDisFrames1qtrDiscardsMin

Severity: variable

Explanation: This fault is caused by "output discards frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367415: fltTcaFcOutputDisFrames1yearDiscardsMin

Severity: variable

Explanation: This fault is caused by "output discards frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367416: fltTcaFcOutputDisFrames5minDiscardsMax

Severity: variable

Explanation: This fault is caused by "output discards frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367417: fltTcaFcOutputDisFrames15minDiscardsMax

Severity: variable

Explanation: This fault is caused by "output discards frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367418: fltTcaFcOutputDisFrames1hDiscardsMax

Severity: variable

Explanation: This fault is caused by "output discards frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367419: fltTcaFcOutputDisFrames1dDiscardsMax

Severity: variable

Explanation: This fault is caused by "output discards frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367420: fltTcaFcOutputDisFrames1wDiscardsMax

Severity: variable

Explanation: This fault is caused by "output discards frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367421: fltTcaFcOutputDisFrames1moDiscardsMax

Severity: variable

Explanation: This fault is caused by "output discards frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367422: fltTcaFcOutputDisFrames1qtrDiscardsMax

Severity: variable

Explanation: This fault is caused by "output discards frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367423: fltTcaFcOutputDisFrames1yearDiscardsMax

Severity: variable

Explanation: This fault is caused by "output discards frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367424: fltTcaFcOutputDisFrames5minDiscardsAvg

Severity: variable

Explanation: This fault is caused by "output discards frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367425: fltTcaFcOutputDisFrames15minDiscardsAvg

Severity: variable

Explanation: This fault is caused by "output discards frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367426: fltTcaFcOutputDisFrames1hDiscardsAvg

Severity: variable

Explanation: This fault is caused by "output discards frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367427: fltTcaFcOutputDisFrames1dDiscardsAvg

Severity: variable

Explanation: This fault is caused by "output discards frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367428: fltTcaFcOutputDisFrames1wDiscardsAvg

Severity: variable

Explanation: This fault is caused by "output discards frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367429: fltTcaFcOutputDisFrames1moDiscardsAvg

Severity: variable

Explanation: This fault is caused by "output discards frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367430: fltTcaFcOutputDisFrames1qtrDiscardsAvg

Severity: variable

Explanation: This fault is caused by "output discards frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367431: fltTcaFcOutputDisFrames1yearDiscardsAvg

Severity: variable

Explanation: This fault is caused by "output discards frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367456: fltTcaFcOutputDisFrames5minDiscardsTr

Severity: variable

Explanation: This fault is caused by "output discards frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367457: fltTcaFcOutputDisFrames15minDiscardsTr

Severity: variable

Explanation: This fault is caused by "output discards frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367458: fltTcaFcOutputDisFrames1hDiscardsTr

Severity: variable

Explanation: This fault is caused by "output discards frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367459: fltTcaFcOutputDisFrames1dDiscardsTr

Severity: variable

Explanation: This fault is caused by "output discards frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367460: fltTcaFcOutputDisFrames1wDiscardsTr

Severity: variable

Explanation: This fault is caused by "output discards frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367461: fltTcaFcOutputDisFrames1moDiscardsTr

Severity: variable

Explanation: This fault is caused by "output discards frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367462: fltTcaFcOutputDisFrames1qtrDiscardsTr

Severity: variable

Explanation: This fault is caused by "output discards frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367463: fltTcaFcOutputDisFrames1yearDiscardsTr

Severity: variable

Explanation: This fault is caused by "output discards frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367464: fltTcaFcOutputDisFrames5minDiscardsRate

Severity: variable

Explanation: This fault is caused by "output discards frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367465: fltTcaFcOutputDisFrames15minDiscardsRate

Severity: variable

Explanation: This fault is caused by "output discards frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367466: fltTcaFcOutputDisFrames1hDiscardsRate

Severity: variable

Explanation: This fault is caused by "output discards frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367467: fltTcaFcOutputDisFrames1dDiscardsRate

Severity: variable

Explanation: This fault is caused by "output discards frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367468: fltTcaFcOutputDisFrames1wDiscardsRate

Severity: variable

Explanation: This fault is caused by "output discards frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367469: fltTcaFcOutputDisFrames1moDiscardsRate

Severity: variable

Explanation: This fault is caused by "output discards frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367470: fltTcaFcOutputDisFrames1qtrDiscardsRate

Severity: variable

Explanation: This fault is caused by "output discards frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367471: fltTcaFcOutputDisFrames1yearDiscardsRate

Severity: variable

Explanation: This fault is caused by "output discards frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output discards frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3675: fltHcloudRsToProvAcctResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F367544: fltTcaFcOutputDisFrames5minErrorsLast

Severity: variable

Explanation: This fault is caused by "output errors frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367545: fltTcaFcOutputDisFrames15minErrorsLast

Severity: variable

Explanation: This fault is caused by "output errors frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367546: fltTcaFcOutputDisFrames1hErrorsLast

Severity: variable

Explanation: This fault is caused by "output errors frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367547: fltTcaFcOutputDisFrames1dErrorsLast

Severity: variable

Explanation: This fault is caused by "output errors frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367548: fltTcaFcOutputDisFrames1wErrorsLast

Severity: variable

Explanation: This fault is caused by "output errors frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367549: fltTcaFcOutputDisFrames1moErrorsLast

Severity: variable

Explanation: This fault is caused by "output errors frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367550: fltTcaFcOutputDisFrames1qtrErrorsLast

Severity: variable

Explanation: This fault is caused by "output errors frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367551: fltTcaFcOutputDisFrames1yearErrorsLast

Severity: variable

Explanation: This fault is caused by "output errors frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367560: fltTcaFcOutputDisFrames5minErrorsCum

Severity: variable

Explanation: This fault is caused by "output errors frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367561: fltTcaFcOutputDisFrames15minErrorsCum

Severity: variable

Explanation: This fault is caused by "output errors frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367562: fltTcaFcOutputDisFrames1hErrorsCum

Severity: variable

Explanation: This fault is caused by "output errors frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367563: fltTcaFcOutputDisFrames1dErrorsCum

Severity: variable

Explanation: This fault is caused by "output errors frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367564: fltTcaFcOutputDisFrames1wErrorsCum

Severity: variable

Explanation: This fault is caused by "output errors frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367565: fltTcaFcOutputDisFrames1moErrorsCum

Severity: variable

Explanation: This fault is caused by "output errors frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367566: fltTcaFcOutputDisFrames1qtrErrorsCum

Severity: variable

Explanation: This fault is caused by "output errors frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367567: fltTcaFcOutputDisFrames1yearErrorsCum

Severity: variable

Explanation: This fault is caused by "output errors frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367568: fltTcaFcOutputDisFrames5minErrorsPer

Severity: variable

Explanation: This fault is caused by "output errors frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367569: fltTcaFcOutputDisFrames15minErrorsPer

Severity: variable

Explanation: This fault is caused by "output errors frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367570: fltTcaFcOutputDisFrames1hErrorsPer

Severity: variable

Explanation: This fault is caused by "output errors frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367571: fltTcaFcOutputDisFrames1dErrorsPer

Severity: variable

Explanation: This fault is caused by "output errors frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367572: fltTcaFcOutputDisFrames1wErrorsPer

Severity: variable

Explanation: This fault is caused by "output errors frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367573: fltTcaFcOutputDisFrames1moErrorsPer

Severity: variable

Explanation: This fault is caused by "output errors frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367574: fltTcaFcOutputDisFrames1qtrErrorsPer

Severity: variable

Explanation: This fault is caused by "output errors frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367575: fltTcaFcOutputDisFrames1yearErrorsPer

Severity: variable

Explanation: This fault is caused by "output errors frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367576: fltTcaFcOutputDisFrames5minErrorsMin

Severity: variable

Explanation: This fault is caused by "output errors frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367577: fltTcaFcOutputDisFrames15minErrorsMin

Severity: variable

Explanation: This fault is caused by "output errors frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367578: fltTcaFcOutputDisFrames1hErrorsMin

Severity: variable

Explanation: This fault is caused by "output errors frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367579: fltTcaFcOutputDisFrames1dErrorsMin

Severity: variable

Explanation: This fault is caused by "output errors frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367580: fltTcaFcOutputDisFrames1wErrorsMin

Severity: variable

Explanation: This fault is caused by "output errors frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367581: fltTcaFcOutputDisFrames1moErrorsMin

Severity: variable

Explanation: This fault is caused by "output errors frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367582: fltTcaFcOutputDisFrames1qtrErrorsMin

Severity: variable

Explanation: This fault is caused by "output errors frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367583: fltTcaFcOutputDisFrames1yearErrorsMin

Severity: variable

Explanation: This fault is caused by "output errors frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367584: fltTcaFcOutputDisFrames5minErrorsMax

Severity: variable

Explanation: This fault is caused by "output errors frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367585: fltTcaFcOutputDisFrames15minErrorsMax

Severity: variable

Explanation: This fault is caused by "output errors frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367586: fltTcaFcOutputDisFrames1hErrorsMax

Severity: variable

Explanation: This fault is caused by "output errors frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367587: fltTcaFcOutputDisFrames1dErrorsMax

Severity: variable

Explanation: This fault is caused by "output errors frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367588: fltTcaFcOutputDisFrames1wErrorsMax

Severity: variable

Explanation: This fault is caused by "output errors frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367589: fltTcaFcOutputDisFrames1moErrorsMax

Severity: variable

Explanation: This fault is caused by "output errors frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367590: fltTcaFcOutputDisFrames1qtrErrorsMax

Severity: variable

Explanation: This fault is caused by "output errors frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367591: fltTcaFcOutputDisFrames1yearErrorsMax

Severity: variable

Explanation: This fault is caused by "output errors frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367592: fltTcaFcOutputDisFrames5minErrorsAvg

Severity: variable

Explanation: This fault is caused by "output errors frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367593: fltTcaFcOutputDisFrames15minErrorsAvg

Severity: variable

Explanation: This fault is caused by "output errors frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367594: fltTcaFcOutputDisFrames1hErrorsAvg

Severity: variable

Explanation: This fault is caused by "output errors frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367595: fltTcaFcOutputDisFrames1dErrorsAvg

Severity: variable

Explanation: This fault is caused by "output errors frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367596: fltTcaFcOutputDisFrames1wErrorsAvg

Severity: variable

Explanation: This fault is caused by "output errors frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367597: fltTcaFcOutputDisFrames1moErrorsAvg

Severity: variable

Explanation: This fault is caused by "output errors frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367598: fltTcaFcOutputDisFrames1qtrErrorsAvg

Severity: variable

Explanation: This fault is caused by "output errors frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367599: fltTcaFcOutputDisFrames1yearErrorsAvg

Severity: variable

Explanation: This fault is caused by "output errors frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3676: fltSvcredirRsBackupDestAttOperStFailed

Severity: major

Explanation: This fault occurs when corresponding PBR service backup destination goes to failed state

Recommended Action: To recover from this fault, try the following actions

1. Check if hardware supports this feature

2. Look at any configuration issues

3. Verify the configuration is correct/complete

4. Check the routes and reachability of this dest

F367624: fltTcaFcOutputDisFrames5minErrorsTr

Severity: variable

Explanation: This fault is caused by "output errors frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367625: fltTcaFcOutputDisFrames15minErrorsTr

Severity: variable

Explanation: This fault is caused by "output errors frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367626: fltTcaFcOutputDisFrames1hErrorsTr

Severity: variable

Explanation: This fault is caused by "output errors frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367627: fltTcaFcOutputDisFrames1dErrorsTr

Severity: variable

Explanation: This fault is caused by "output errors frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367628: fltTcaFcOutputDisFrames1wErrorsTr

Severity: variable

Explanation: This fault is caused by "output errors frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367629: fltTcaFcOutputDisFrames1moErrorsTr

Severity: variable

Explanation: This fault is caused by "output errors frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367630: fltTcaFcOutputDisFrames1qtrErrorsTr

Severity: variable

Explanation: This fault is caused by "output errors frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367631: fltTcaFcOutputDisFrames1yearErrorsTr

Severity: variable

Explanation: This fault is caused by "output errors frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367632: fltTcaFcOutputDisFrames5minErrorsRate

Severity: variable

Explanation: This fault is caused by "output errors frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367633: fltTcaFcOutputDisFrames15minErrorsRate

Severity: variable

Explanation: This fault is caused by "output errors frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367634: fltTcaFcOutputDisFrames1hErrorsRate

Severity: variable

Explanation: This fault is caused by "output errors frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367635: fltTcaFcOutputDisFrames1dErrorsRate

Severity: variable

Explanation: This fault is caused by "output errors frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367636: fltTcaFcOutputDisFrames1wErrorsRate

Severity: variable

Explanation: This fault is caused by "output errors frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367637: fltTcaFcOutputDisFrames1moErrorsRate

Severity: variable

Explanation: This fault is caused by "output errors frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367638: fltTcaFcOutputDisFrames1qtrErrorsRate

Severity: variable

Explanation: This fault is caused by "output errors frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367639: fltTcaFcOutputDisFrames1yearErrorsRate

Severity: variable

Explanation: This fault is caused by "output errors frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output errors frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3677: fltHinventoryRsSubnetToSGResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F367712: fltTcaFcOutputFrames5minClass2Last

Severity: variable

Explanation: This fault is caused by "output class2 frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367713: fltTcaFcOutputFrames15minClass2Last

Severity: variable

Explanation: This fault is caused by "output class2 frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367714: fltTcaFcOutputFrames1hClass2Last

Severity: variable

Explanation: This fault is caused by "output class2 frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367715: fltTcaFcOutputFrames1dClass2Last

Severity: variable

Explanation: This fault is caused by "output class2 frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367716: fltTcaFcOutputFrames1wClass2Last

Severity: variable

Explanation: This fault is caused by "output class2 frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367717: fltTcaFcOutputFrames1moClass2Last

Severity: variable

Explanation: This fault is caused by "output class2 frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367718: fltTcaFcOutputFrames1qtrClass2Last

Severity: variable

Explanation: This fault is caused by "output class2 frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367719: fltTcaFcOutputFrames1yearClass2Last

Severity: variable

Explanation: This fault is caused by "output class2 frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367728: fltTcaFcOutputFrames5minClass2Cum

Severity: variable

Explanation: This fault is caused by "output class2 frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367729: fltTcaFcOutputFrames15minClass2Cum

Severity: variable

Explanation: This fault is caused by "output class2 frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367730: fltTcaFcOutputFrames1hClass2Cum

Severity: variable

Explanation: This fault is caused by "output class2 frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367731: fltTcaFcOutputFrames1dClass2Cum

Severity: variable

Explanation: This fault is caused by "output class2 frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367732: fltTcaFcOutputFrames1wClass2Cum

Severity: variable

Explanation: This fault is caused by "output class2 frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367733: fltTcaFcOutputFrames1moClass2Cum

Severity: variable

Explanation: This fault is caused by "output class2 frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367734: fltTcaFcOutputFrames1qtrClass2Cum

Severity: variable

Explanation: This fault is caused by "output class2 frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367735: fltTcaFcOutputFrames1yearClass2Cum

Severity: variable

Explanation: This fault is caused by "output class2 frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367736: fltTcaFcOutputFrames5minClass2Per

Severity: variable

Explanation: This fault is caused by "output class2 frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367737: fltTcaFcOutputFrames15minClass2Per

Severity: variable

Explanation: This fault is caused by "output class2 frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367738: fltTcaFcOutputFrames1hClass2Per

Severity: variable

Explanation: This fault is caused by "output class2 frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367739: fltTcaFcOutputFrames1dClass2Per

Severity: variable

Explanation: This fault is caused by "output class2 frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367740: fltTcaFcOutputFrames1wClass2Per

Severity: variable

Explanation: This fault is caused by "output class2 frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367741: fltTcaFcOutputFrames1moClass2Per

Severity: variable

Explanation: This fault is caused by "output class2 frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367742: fltTcaFcOutputFrames1qtrClass2Per

Severity: variable

Explanation: This fault is caused by "output class2 frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367743: fltTcaFcOutputFrames1yearClass2Per

Severity: variable

Explanation: This fault is caused by "output class2 frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367744: fltTcaFcOutputFrames5minClass2Min

Severity: variable

Explanation: This fault is caused by "output class2 frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367745: fltTcaFcOutputFrames15minClass2Min

Severity: variable

Explanation: This fault is caused by "output class2 frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367746: fltTcaFcOutputFrames1hClass2Min

Severity: variable

Explanation: This fault is caused by "output class2 frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367747: fltTcaFcOutputFrames1dClass2Min

Severity: variable

Explanation: This fault is caused by "output class2 frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367748: fltTcaFcOutputFrames1wClass2Min

Severity: variable

Explanation: This fault is caused by "output class2 frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367749: fltTcaFcOutputFrames1moClass2Min

Severity: variable

Explanation: This fault is caused by "output class2 frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367750: fltTcaFcOutputFrames1qtrClass2Min

Severity: variable

Explanation: This fault is caused by "output class2 frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367751: fltTcaFcOutputFrames1yearClass2Min

Severity: variable

Explanation: This fault is caused by "output class2 frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367752: fltTcaFcOutputFrames5minClass2Max

Severity: variable

Explanation: This fault is caused by "output class2 frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367753: fltTcaFcOutputFrames15minClass2Max

Severity: variable

Explanation: This fault is caused by "output class2 frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367754: fltTcaFcOutputFrames1hClass2Max

Severity: variable

Explanation: This fault is caused by "output class2 frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367755: fltTcaFcOutputFrames1dClass2Max

Severity: variable

Explanation: This fault is caused by "output class2 frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367756: fltTcaFcOutputFrames1wClass2Max

Severity: variable

Explanation: This fault is caused by "output class2 frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367757: fltTcaFcOutputFrames1moClass2Max

Severity: variable

Explanation: This fault is caused by "output class2 frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367758: fltTcaFcOutputFrames1qtrClass2Max

Severity: variable

Explanation: This fault is caused by "output class2 frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367759: fltTcaFcOutputFrames1yearClass2Max

Severity: variable

Explanation: This fault is caused by "output class2 frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367760: fltTcaFcOutputFrames5minClass2Avg

Severity: variable

Explanation: This fault is caused by "output class2 frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367761: fltTcaFcOutputFrames15minClass2Avg

Severity: variable

Explanation: This fault is caused by "output class2 frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367762: fltTcaFcOutputFrames1hClass2Avg

Severity: variable

Explanation: This fault is caused by "output class2 frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367763: fltTcaFcOutputFrames1dClass2Avg

Severity: variable

Explanation: This fault is caused by "output class2 frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367764: fltTcaFcOutputFrames1wClass2Avg

Severity: variable

Explanation: This fault is caused by "output class2 frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367765: fltTcaFcOutputFrames1moClass2Avg

Severity: variable

Explanation: This fault is caused by "output class2 frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367766: fltTcaFcOutputFrames1qtrClass2Avg

Severity: variable

Explanation: This fault is caused by "output class2 frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367767: fltTcaFcOutputFrames1yearClass2Avg

Severity: variable

Explanation: This fault is caused by "output class2 frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367792: fltTcaFcOutputFrames5minClass2Tr

Severity: variable

Explanation: This fault is caused by "output class2 frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367793: fltTcaFcOutputFrames15minClass2Tr

Severity: variable

Explanation: This fault is caused by "output class2 frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367794: fltTcaFcOutputFrames1hClass2Tr

Severity: variable

Explanation: This fault is caused by "output class2 frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367795: fltTcaFcOutputFrames1dClass2Tr

Severity: variable

Explanation: This fault is caused by "output class2 frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367796: fltTcaFcOutputFrames1wClass2Tr

Severity: variable

Explanation: This fault is caused by "output class2 frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367797: fltTcaFcOutputFrames1moClass2Tr

Severity: variable

Explanation: This fault is caused by "output class2 frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367798: fltTcaFcOutputFrames1qtrClass2Tr

Severity: variable

Explanation: This fault is caused by "output class2 frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367799: fltTcaFcOutputFrames1yearClass2Tr

Severity: variable

Explanation: This fault is caused by "output class2 frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3678: fltEdmMgrConfigErrMsg

Severity: major

Explanation: This fault is raised when the APIC is unable to configure the External Device.

Recommended Action: If you see this fault, take the following actions:

1. Verify your configuration is within the configuration limits of your target Integration Manager.

2. Verify Integration Manager policies do not conflict with APIC policies.

3. If the above actions did not resolve the issue, collect tech-support file and contact Cisco TAC.

F367800: fltTcaFcOutputFrames5minClass2Rate

Severity: variable

Explanation: This fault is caused by "output class2 frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367801: fltTcaFcOutputFrames15minClass2Rate

Severity: variable

Explanation: This fault is caused by "output class2 frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367802: fltTcaFcOutputFrames1hClass2Rate

Severity: variable

Explanation: This fault is caused by "output class2 frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367803: fltTcaFcOutputFrames1dClass2Rate

Severity: variable

Explanation: This fault is caused by "output class2 frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367804: fltTcaFcOutputFrames1wClass2Rate

Severity: variable

Explanation: This fault is caused by "output class2 frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367805: fltTcaFcOutputFrames1moClass2Rate

Severity: variable

Explanation: This fault is caused by "output class2 frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367806: fltTcaFcOutputFrames1qtrClass2Rate

Severity: variable

Explanation: This fault is caused by "output class2 frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367807: fltTcaFcOutputFrames1yearClass2Rate

Severity: variable

Explanation: This fault is caused by "output class2 frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output class2 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367880: fltTcaFcOutputFrames5minClass3Last

Severity: variable

Explanation: This fault is caused by "output class3 frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367881: fltTcaFcOutputFrames15minClass3Last

Severity: variable

Explanation: This fault is caused by "output class3 frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367882: fltTcaFcOutputFrames1hClass3Last

Severity: variable

Explanation: This fault is caused by "output class3 frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367883: fltTcaFcOutputFrames1dClass3Last

Severity: variable

Explanation: This fault is caused by "output class3 frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367884: fltTcaFcOutputFrames1wClass3Last

Severity: variable

Explanation: This fault is caused by "output class3 frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367885: fltTcaFcOutputFrames1moClass3Last

Severity: variable

Explanation: This fault is caused by "output class3 frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367886: fltTcaFcOutputFrames1qtrClass3Last

Severity: variable

Explanation: This fault is caused by "output class3 frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367887: fltTcaFcOutputFrames1yearClass3Last

Severity: variable

Explanation: This fault is caused by "output class3 frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367896: fltTcaFcOutputFrames5minClass3Cum

Severity: variable

Explanation: This fault is caused by "output class3 frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367897: fltTcaFcOutputFrames15minClass3Cum

Severity: variable

Explanation: This fault is caused by "output class3 frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367898: fltTcaFcOutputFrames1hClass3Cum

Severity: variable

Explanation: This fault is caused by "output class3 frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367899: fltTcaFcOutputFrames1dClass3Cum

Severity: variable

Explanation: This fault is caused by "output class3 frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367900: fltTcaFcOutputFrames1wClass3Cum

Severity: variable

Explanation: This fault is caused by "output class3 frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367901: fltTcaFcOutputFrames1moClass3Cum

Severity: variable

Explanation: This fault is caused by "output class3 frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367902: fltTcaFcOutputFrames1qtrClass3Cum

Severity: variable

Explanation: This fault is caused by "output class3 frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367903: fltTcaFcOutputFrames1yearClass3Cum

Severity: variable

Explanation: This fault is caused by "output class3 frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367904: fltTcaFcOutputFrames5minClass3Per

Severity: variable

Explanation: This fault is caused by "output class3 frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367905: fltTcaFcOutputFrames15minClass3Per

Severity: variable

Explanation: This fault is caused by "output class3 frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367906: fltTcaFcOutputFrames1hClass3Per

Severity: variable

Explanation: This fault is caused by "output class3 frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367907: fltTcaFcOutputFrames1dClass3Per

Severity: variable

Explanation: This fault is caused by "output class3 frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367908: fltTcaFcOutputFrames1wClass3Per

Severity: variable

Explanation: This fault is caused by "output class3 frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367909: fltTcaFcOutputFrames1moClass3Per

Severity: variable

Explanation: This fault is caused by "output class3 frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367910: fltTcaFcOutputFrames1qtrClass3Per

Severity: variable

Explanation: This fault is caused by "output class3 frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367911: fltTcaFcOutputFrames1yearClass3Per

Severity: variable

Explanation: This fault is caused by "output class3 frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367912: fltTcaFcOutputFrames5minClass3Min

Severity: variable

Explanation: This fault is caused by "output class3 frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367913: fltTcaFcOutputFrames15minClass3Min

Severity: variable

Explanation: This fault is caused by "output class3 frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367914: fltTcaFcOutputFrames1hClass3Min

Severity: variable

Explanation: This fault is caused by "output class3 frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367915: fltTcaFcOutputFrames1dClass3Min

Severity: variable

Explanation: This fault is caused by "output class3 frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367916: fltTcaFcOutputFrames1wClass3Min

Severity: variable

Explanation: This fault is caused by "output class3 frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367917: fltTcaFcOutputFrames1moClass3Min

Severity: variable

Explanation: This fault is caused by "output class3 frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367918: fltTcaFcOutputFrames1qtrClass3Min

Severity: variable

Explanation: This fault is caused by "output class3 frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367919: fltTcaFcOutputFrames1yearClass3Min

Severity: variable

Explanation: This fault is caused by "output class3 frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367920: fltTcaFcOutputFrames5minClass3Max

Severity: variable

Explanation: This fault is caused by "output class3 frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367921: fltTcaFcOutputFrames15minClass3Max

Severity: variable

Explanation: This fault is caused by "output class3 frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367922: fltTcaFcOutputFrames1hClass3Max

Severity: variable

Explanation: This fault is caused by "output class3 frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367923: fltTcaFcOutputFrames1dClass3Max

Severity: variable

Explanation: This fault is caused by "output class3 frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367924: fltTcaFcOutputFrames1wClass3Max

Severity: variable

Explanation: This fault is caused by "output class3 frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367925: fltTcaFcOutputFrames1moClass3Max

Severity: variable

Explanation: This fault is caused by "output class3 frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367926: fltTcaFcOutputFrames1qtrClass3Max

Severity: variable

Explanation: This fault is caused by "output class3 frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367927: fltTcaFcOutputFrames1yearClass3Max

Severity: variable

Explanation: This fault is caused by "output class3 frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367928: fltTcaFcOutputFrames5minClass3Avg

Severity: variable

Explanation: This fault is caused by "output class3 frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367929: fltTcaFcOutputFrames15minClass3Avg

Severity: variable

Explanation: This fault is caused by "output class3 frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367930: fltTcaFcOutputFrames1hClass3Avg

Severity: variable

Explanation: This fault is caused by "output class3 frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367931: fltTcaFcOutputFrames1dClass3Avg

Severity: variable

Explanation: This fault is caused by "output class3 frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367932: fltTcaFcOutputFrames1wClass3Avg

Severity: variable

Explanation: This fault is caused by "output class3 frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367933: fltTcaFcOutputFrames1moClass3Avg

Severity: variable

Explanation: This fault is caused by "output class3 frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367934: fltTcaFcOutputFrames1qtrClass3Avg

Severity: variable

Explanation: This fault is caused by "output class3 frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367935: fltTcaFcOutputFrames1yearClass3Avg

Severity: variable

Explanation: This fault is caused by "output class3 frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367960: fltTcaFcOutputFrames5minClass3Tr

Severity: variable

Explanation: This fault is caused by "output class3 frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367961: fltTcaFcOutputFrames15minClass3Tr

Severity: variable

Explanation: This fault is caused by "output class3 frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367962: fltTcaFcOutputFrames1hClass3Tr

Severity: variable

Explanation: This fault is caused by "output class3 frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367963: fltTcaFcOutputFrames1dClass3Tr

Severity: variable

Explanation: This fault is caused by "output class3 frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367964: fltTcaFcOutputFrames1wClass3Tr

Severity: variable

Explanation: This fault is caused by "output class3 frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367965: fltTcaFcOutputFrames1moClass3Tr

Severity: variable

Explanation: This fault is caused by "output class3 frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367966: fltTcaFcOutputFrames1qtrClass3Tr

Severity: variable

Explanation: This fault is caused by "output class3 frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367967: fltTcaFcOutputFrames1yearClass3Tr

Severity: variable

Explanation: This fault is caused by "output class3 frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367968: fltTcaFcOutputFrames5minClass3Rate

Severity: variable

Explanation: This fault is caused by "output class3 frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367969: fltTcaFcOutputFrames15minClass3Rate

Severity: variable

Explanation: This fault is caused by "output class3 frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367970: fltTcaFcOutputFrames1hClass3Rate

Severity: variable

Explanation: This fault is caused by "output class3 frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367971: fltTcaFcOutputFrames1dClass3Rate

Severity: variable

Explanation: This fault is caused by "output class3 frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367972: fltTcaFcOutputFrames1wClass3Rate

Severity: variable

Explanation: This fault is caused by "output class3 frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367973: fltTcaFcOutputFrames1moClass3Rate

Severity: variable

Explanation: This fault is caused by "output class3 frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367974: fltTcaFcOutputFrames1qtrClass3Rate

Severity: variable

Explanation: This fault is caused by "output class3 frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F367975: fltTcaFcOutputFrames1yearClass3Rate

Severity: variable

Explanation: This fault is caused by "output class3 frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output class3 frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368048: fltTcaFcOutputFrames5minClassfLast

Severity: variable

Explanation: This fault is caused by "output classf frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368049: fltTcaFcOutputFrames15minClassfLast

Severity: variable

Explanation: This fault is caused by "output classf frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368050: fltTcaFcOutputFrames1hClassfLast

Severity: variable

Explanation: This fault is caused by "output classf frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368051: fltTcaFcOutputFrames1dClassfLast

Severity: variable

Explanation: This fault is caused by "output classf frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368052: fltTcaFcOutputFrames1wClassfLast

Severity: variable

Explanation: This fault is caused by "output classf frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368053: fltTcaFcOutputFrames1moClassfLast

Severity: variable

Explanation: This fault is caused by "output classf frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368054: fltTcaFcOutputFrames1qtrClassfLast

Severity: variable

Explanation: This fault is caused by "output classf frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368055: fltTcaFcOutputFrames1yearClassfLast

Severity: variable

Explanation: This fault is caused by "output classf frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368064: fltTcaFcOutputFrames5minClassfCum

Severity: variable

Explanation: This fault is caused by "output classf frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368065: fltTcaFcOutputFrames15minClassfCum

Severity: variable

Explanation: This fault is caused by "output classf frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368066: fltTcaFcOutputFrames1hClassfCum

Severity: variable

Explanation: This fault is caused by "output classf frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368067: fltTcaFcOutputFrames1dClassfCum

Severity: variable

Explanation: This fault is caused by "output classf frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368068: fltTcaFcOutputFrames1wClassfCum

Severity: variable

Explanation: This fault is caused by "output classf frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368069: fltTcaFcOutputFrames1moClassfCum

Severity: variable

Explanation: This fault is caused by "output classf frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368070: fltTcaFcOutputFrames1qtrClassfCum

Severity: variable

Explanation: This fault is caused by "output classf frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368071: fltTcaFcOutputFrames1yearClassfCum

Severity: variable

Explanation: This fault is caused by "output classf frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368072: fltTcaFcOutputFrames5minClassfPer

Severity: variable

Explanation: This fault is caused by "output classf frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368073: fltTcaFcOutputFrames15minClassfPer

Severity: variable

Explanation: This fault is caused by "output classf frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368074: fltTcaFcOutputFrames1hClassfPer

Severity: variable

Explanation: This fault is caused by "output classf frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368075: fltTcaFcOutputFrames1dClassfPer

Severity: variable

Explanation: This fault is caused by "output classf frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368076: fltTcaFcOutputFrames1wClassfPer

Severity: variable

Explanation: This fault is caused by "output classf frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368077: fltTcaFcOutputFrames1moClassfPer

Severity: variable

Explanation: This fault is caused by "output classf frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368078: fltTcaFcOutputFrames1qtrClassfPer

Severity: variable

Explanation: This fault is caused by "output classf frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368079: fltTcaFcOutputFrames1yearClassfPer

Severity: variable

Explanation: This fault is caused by "output classf frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368080: fltTcaFcOutputFrames5minClassfMin

Severity: variable

Explanation: This fault is caused by "output classf frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368081: fltTcaFcOutputFrames15minClassfMin

Severity: variable

Explanation: This fault is caused by "output classf frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368082: fltTcaFcOutputFrames1hClassfMin

Severity: variable

Explanation: This fault is caused by "output classf frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368083: fltTcaFcOutputFrames1dClassfMin

Severity: variable

Explanation: This fault is caused by "output classf frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368084: fltTcaFcOutputFrames1wClassfMin

Severity: variable

Explanation: This fault is caused by "output classf frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368085: fltTcaFcOutputFrames1moClassfMin

Severity: variable

Explanation: This fault is caused by "output classf frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368086: fltTcaFcOutputFrames1qtrClassfMin

Severity: variable

Explanation: This fault is caused by "output classf frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368087: fltTcaFcOutputFrames1yearClassfMin

Severity: variable

Explanation: This fault is caused by "output classf frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368088: fltTcaFcOutputFrames5minClassfMax

Severity: variable

Explanation: This fault is caused by "output classf frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368089: fltTcaFcOutputFrames15minClassfMax

Severity: variable

Explanation: This fault is caused by "output classf frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368090: fltTcaFcOutputFrames1hClassfMax

Severity: variable

Explanation: This fault is caused by "output classf frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368091: fltTcaFcOutputFrames1dClassfMax

Severity: variable

Explanation: This fault is caused by "output classf frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368092: fltTcaFcOutputFrames1wClassfMax

Severity: variable

Explanation: This fault is caused by "output classf frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368093: fltTcaFcOutputFrames1moClassfMax

Severity: variable

Explanation: This fault is caused by "output classf frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368094: fltTcaFcOutputFrames1qtrClassfMax

Severity: variable

Explanation: This fault is caused by "output classf frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368095: fltTcaFcOutputFrames1yearClassfMax

Severity: variable

Explanation: This fault is caused by "output classf frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368096: fltTcaFcOutputFrames5minClassfAvg

Severity: variable

Explanation: This fault is caused by "output classf frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368097: fltTcaFcOutputFrames15minClassfAvg

Severity: variable

Explanation: This fault is caused by "output classf frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368098: fltTcaFcOutputFrames1hClassfAvg

Severity: variable

Explanation: This fault is caused by "output classf frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368099: fltTcaFcOutputFrames1dClassfAvg

Severity: variable

Explanation: This fault is caused by "output classf frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3681: fltHcloudVgwOperCloudVgwOperStateDown

Severity: major

Explanation: This fault occurs when the Virtual Gateway is down.

Recommended Action: If you see this fault, take the following actions:

1. If fault still has not cleared, please contact Cisco TAC.

F368100: fltTcaFcOutputFrames1wClassfAvg

Severity: variable

Explanation: This fault is caused by "output classf frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368101: fltTcaFcOutputFrames1moClassfAvg

Severity: variable

Explanation: This fault is caused by "output classf frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368102: fltTcaFcOutputFrames1qtrClassfAvg

Severity: variable

Explanation: This fault is caused by "output classf frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368103: fltTcaFcOutputFrames1yearClassfAvg

Severity: variable

Explanation: This fault is caused by "output classf frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368128: fltTcaFcOutputFrames5minClassfTr

Severity: variable

Explanation: This fault is caused by "output classf frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368129: fltTcaFcOutputFrames15minClassfTr

Severity: variable

Explanation: This fault is caused by "output classf frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368130: fltTcaFcOutputFrames1hClassfTr

Severity: variable

Explanation: This fault is caused by "output classf frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368131: fltTcaFcOutputFrames1dClassfTr

Severity: variable

Explanation: This fault is caused by "output classf frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368132: fltTcaFcOutputFrames1wClassfTr

Severity: variable

Explanation: This fault is caused by "output classf frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368133: fltTcaFcOutputFrames1moClassfTr

Severity: variable

Explanation: This fault is caused by "output classf frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368134: fltTcaFcOutputFrames1qtrClassfTr

Severity: variable

Explanation: This fault is caused by "output classf frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368135: fltTcaFcOutputFrames1yearClassfTr

Severity: variable

Explanation: This fault is caused by "output classf frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368136: fltTcaFcOutputFrames5minClassfRate

Severity: variable

Explanation: This fault is caused by "output classf frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368137: fltTcaFcOutputFrames15minClassfRate

Severity: variable

Explanation: This fault is caused by "output classf frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368138: fltTcaFcOutputFrames1hClassfRate

Severity: variable

Explanation: This fault is caused by "output classf frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368139: fltTcaFcOutputFrames1dClassfRate

Severity: variable

Explanation: This fault is caused by "output classf frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368140: fltTcaFcOutputFrames1wClassfRate

Severity: variable

Explanation: This fault is caused by "output classf frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368141: fltTcaFcOutputFrames1moClassfRate

Severity: variable

Explanation: This fault is caused by "output classf frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368142: fltTcaFcOutputFrames1qtrClassfRate

Severity: variable

Explanation: This fault is caused by "output classf frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368143: fltTcaFcOutputFrames1yearClassfRate

Severity: variable

Explanation: This fault is caused by "output classf frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output classf frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3682: fltL3extRsVSwitchEnhancedLagPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F368216: fltTcaFcOutputLink5minLoopinitsLast

Severity: variable

Explanation: This fault is caused by "output loop inits current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368217: fltTcaFcOutputLink15minLoopinitsLast

Severity: variable

Explanation: This fault is caused by "output loop inits current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368218: fltTcaFcOutputLink1hLoopinitsLast

Severity: variable

Explanation: This fault is caused by "output loop inits current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368219: fltTcaFcOutputLink1dLoopinitsLast

Severity: variable

Explanation: This fault is caused by "output loop inits current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368220: fltTcaFcOutputLink1wLoopinitsLast

Severity: variable

Explanation: This fault is caused by "output loop inits current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368221: fltTcaFcOutputLink1moLoopinitsLast

Severity: variable

Explanation: This fault is caused by "output loop inits current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368222: fltTcaFcOutputLink1qtrLoopinitsLast

Severity: variable

Explanation: This fault is caused by "output loop inits current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368223: fltTcaFcOutputLink1yearLoopinitsLast

Severity: variable

Explanation: This fault is caused by "output loop inits current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368232: fltTcaFcOutputLink5minLoopinitsCum

Severity: variable

Explanation: This fault is caused by "output loop inits cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368233: fltTcaFcOutputLink15minLoopinitsCum

Severity: variable

Explanation: This fault is caused by "output loop inits cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368234: fltTcaFcOutputLink1hLoopinitsCum

Severity: variable

Explanation: This fault is caused by "output loop inits cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368235: fltTcaFcOutputLink1dLoopinitsCum

Severity: variable

Explanation: This fault is caused by "output loop inits cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368236: fltTcaFcOutputLink1wLoopinitsCum

Severity: variable

Explanation: This fault is caused by "output loop inits cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368237: fltTcaFcOutputLink1moLoopinitsCum

Severity: variable

Explanation: This fault is caused by "output loop inits cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368238: fltTcaFcOutputLink1qtrLoopinitsCum

Severity: variable

Explanation: This fault is caused by "output loop inits cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368239: fltTcaFcOutputLink1yearLoopinitsCum

Severity: variable

Explanation: This fault is caused by "output loop inits cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368240: fltTcaFcOutputLink5minLoopinitsPer

Severity: variable

Explanation: This fault is caused by "output loop inits periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368241: fltTcaFcOutputLink15minLoopinitsPer

Severity: variable

Explanation: This fault is caused by "output loop inits periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368242: fltTcaFcOutputLink1hLoopinitsPer

Severity: variable

Explanation: This fault is caused by "output loop inits periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368243: fltTcaFcOutputLink1dLoopinitsPer

Severity: variable

Explanation: This fault is caused by "output loop inits periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368244: fltTcaFcOutputLink1wLoopinitsPer

Severity: variable

Explanation: This fault is caused by "output loop inits periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368245: fltTcaFcOutputLink1moLoopinitsPer

Severity: variable

Explanation: This fault is caused by "output loop inits periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368246: fltTcaFcOutputLink1qtrLoopinitsPer

Severity: variable

Explanation: This fault is caused by "output loop inits periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368247: fltTcaFcOutputLink1yearLoopinitsPer

Severity: variable

Explanation: This fault is caused by "output loop inits periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368248: fltTcaFcOutputLink5minLoopinitsMin

Severity: variable

Explanation: This fault is caused by "output loop inits minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368249: fltTcaFcOutputLink15minLoopinitsMin

Severity: variable

Explanation: This fault is caused by "output loop inits minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368250: fltTcaFcOutputLink1hLoopinitsMin

Severity: variable

Explanation: This fault is caused by "output loop inits minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368251: fltTcaFcOutputLink1dLoopinitsMin

Severity: variable

Explanation: This fault is caused by "output loop inits minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368252: fltTcaFcOutputLink1wLoopinitsMin

Severity: variable

Explanation: This fault is caused by "output loop inits minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368253: fltTcaFcOutputLink1moLoopinitsMin

Severity: variable

Explanation: This fault is caused by "output loop inits minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368254: fltTcaFcOutputLink1qtrLoopinitsMin

Severity: variable

Explanation: This fault is caused by "output loop inits minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368255: fltTcaFcOutputLink1yearLoopinitsMin

Severity: variable

Explanation: This fault is caused by "output loop inits minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368256: fltTcaFcOutputLink5minLoopinitsMax

Severity: variable

Explanation: This fault is caused by "output loop inits maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368257: fltTcaFcOutputLink15minLoopinitsMax

Severity: variable

Explanation: This fault is caused by "output loop inits maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368258: fltTcaFcOutputLink1hLoopinitsMax

Severity: variable

Explanation: This fault is caused by "output loop inits maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368259: fltTcaFcOutputLink1dLoopinitsMax

Severity: variable

Explanation: This fault is caused by "output loop inits maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368260: fltTcaFcOutputLink1wLoopinitsMax

Severity: variable

Explanation: This fault is caused by "output loop inits maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368261: fltTcaFcOutputLink1moLoopinitsMax

Severity: variable

Explanation: This fault is caused by "output loop inits maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368262: fltTcaFcOutputLink1qtrLoopinitsMax

Severity: variable

Explanation: This fault is caused by "output loop inits maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368263: fltTcaFcOutputLink1yearLoopinitsMax

Severity: variable

Explanation: This fault is caused by "output loop inits maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368264: fltTcaFcOutputLink5minLoopinitsAvg

Severity: variable

Explanation: This fault is caused by "output loop inits average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368265: fltTcaFcOutputLink15minLoopinitsAvg

Severity: variable

Explanation: This fault is caused by "output loop inits average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368266: fltTcaFcOutputLink1hLoopinitsAvg

Severity: variable

Explanation: This fault is caused by "output loop inits average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368267: fltTcaFcOutputLink1dLoopinitsAvg

Severity: variable

Explanation: This fault is caused by "output loop inits average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368268: fltTcaFcOutputLink1wLoopinitsAvg

Severity: variable

Explanation: This fault is caused by "output loop inits average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368269: fltTcaFcOutputLink1moLoopinitsAvg

Severity: variable

Explanation: This fault is caused by "output loop inits average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368270: fltTcaFcOutputLink1qtrLoopinitsAvg

Severity: variable

Explanation: This fault is caused by "output loop inits average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368271: fltTcaFcOutputLink1yearLoopinitsAvg

Severity: variable

Explanation: This fault is caused by "output loop inits average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368296: fltTcaFcOutputLink5minLoopinitsTr

Severity: variable

Explanation: This fault is caused by "output loop inits trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368297: fltTcaFcOutputLink15minLoopinitsTr

Severity: variable

Explanation: This fault is caused by "output loop inits trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368298: fltTcaFcOutputLink1hLoopinitsTr

Severity: variable

Explanation: This fault is caused by "output loop inits trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368299: fltTcaFcOutputLink1dLoopinitsTr

Severity: variable

Explanation: This fault is caused by "output loop inits trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368300: fltTcaFcOutputLink1wLoopinitsTr

Severity: variable

Explanation: This fault is caused by "output loop inits trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368301: fltTcaFcOutputLink1moLoopinitsTr

Severity: variable

Explanation: This fault is caused by "output loop inits trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368302: fltTcaFcOutputLink1qtrLoopinitsTr

Severity: variable

Explanation: This fault is caused by "output loop inits trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368303: fltTcaFcOutputLink1yearLoopinitsTr

Severity: variable

Explanation: This fault is caused by "output loop inits trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368304: fltTcaFcOutputLink5minLoopinitsRate

Severity: variable

Explanation: This fault is caused by "output loop inits rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368305: fltTcaFcOutputLink15minLoopinitsRate

Severity: variable

Explanation: This fault is caused by "output loop inits rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368306: fltTcaFcOutputLink1hLoopinitsRate

Severity: variable

Explanation: This fault is caused by "output loop inits rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368307: fltTcaFcOutputLink1dLoopinitsRate

Severity: variable

Explanation: This fault is caused by "output loop inits rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368308: fltTcaFcOutputLink1wLoopinitsRate

Severity: variable

Explanation: This fault is caused by "output loop inits rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368309: fltTcaFcOutputLink1moLoopinitsRate

Severity: variable

Explanation: This fault is caused by "output loop inits rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368310: fltTcaFcOutputLink1qtrLoopinitsRate

Severity: variable

Explanation: This fault is caused by "output loop inits rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368311: fltTcaFcOutputLink1yearLoopinitsRate

Severity: variable

Explanation: This fault is caused by "output loop inits rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output loop inits" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368384: fltTcaFcOutputLink5minLrrLast

Severity: variable

Explanation: This fault is caused by "output link Reset Response current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368385: fltTcaFcOutputLink15minLrrLast

Severity: variable

Explanation: This fault is caused by "output link Reset Response current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368386: fltTcaFcOutputLink1hLrrLast

Severity: variable

Explanation: This fault is caused by "output link Reset Response current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368387: fltTcaFcOutputLink1dLrrLast

Severity: variable

Explanation: This fault is caused by "output link Reset Response current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368388: fltTcaFcOutputLink1wLrrLast

Severity: variable

Explanation: This fault is caused by "output link Reset Response current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368389: fltTcaFcOutputLink1moLrrLast

Severity: variable

Explanation: This fault is caused by "output link Reset Response current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368390: fltTcaFcOutputLink1qtrLrrLast

Severity: variable

Explanation: This fault is caused by "output link Reset Response current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368391: fltTcaFcOutputLink1yearLrrLast

Severity: variable

Explanation: This fault is caused by "output link Reset Response current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3684: fltInfraRsWwnInstPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F368400: fltTcaFcOutputLink5minLrrCum

Severity: variable

Explanation: This fault is caused by "output link Reset Response cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368401: fltTcaFcOutputLink15minLrrCum

Severity: variable

Explanation: This fault is caused by "output link Reset Response cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368402: fltTcaFcOutputLink1hLrrCum

Severity: variable

Explanation: This fault is caused by "output link Reset Response cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368403: fltTcaFcOutputLink1dLrrCum

Severity: variable

Explanation: This fault is caused by "output link Reset Response cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368404: fltTcaFcOutputLink1wLrrCum

Severity: variable

Explanation: This fault is caused by "output link Reset Response cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368405: fltTcaFcOutputLink1moLrrCum

Severity: variable

Explanation: This fault is caused by "output link Reset Response cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368406: fltTcaFcOutputLink1qtrLrrCum

Severity: variable

Explanation: This fault is caused by "output link Reset Response cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368407: fltTcaFcOutputLink1yearLrrCum

Severity: variable

Explanation: This fault is caused by "output link Reset Response cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368408: fltTcaFcOutputLink5minLrrPer

Severity: variable

Explanation: This fault is caused by "output link Reset Response periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368409: fltTcaFcOutputLink15minLrrPer

Severity: variable

Explanation: This fault is caused by "output link Reset Response periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368410: fltTcaFcOutputLink1hLrrPer

Severity: variable

Explanation: This fault is caused by "output link Reset Response periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368411: fltTcaFcOutputLink1dLrrPer

Severity: variable

Explanation: This fault is caused by "output link Reset Response periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368412: fltTcaFcOutputLink1wLrrPer

Severity: variable

Explanation: This fault is caused by "output link Reset Response periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368413: fltTcaFcOutputLink1moLrrPer

Severity: variable

Explanation: This fault is caused by "output link Reset Response periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368414: fltTcaFcOutputLink1qtrLrrPer

Severity: variable

Explanation: This fault is caused by "output link Reset Response periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368415: fltTcaFcOutputLink1yearLrrPer

Severity: variable

Explanation: This fault is caused by "output link Reset Response periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368416: fltTcaFcOutputLink5minLrrMin

Severity: variable

Explanation: This fault is caused by "output link Reset Response minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368417: fltTcaFcOutputLink15minLrrMin

Severity: variable

Explanation: This fault is caused by "output link Reset Response minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368418: fltTcaFcOutputLink1hLrrMin

Severity: variable

Explanation: This fault is caused by "output link Reset Response minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368419: fltTcaFcOutputLink1dLrrMin

Severity: variable

Explanation: This fault is caused by "output link Reset Response minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368420: fltTcaFcOutputLink1wLrrMin

Severity: variable

Explanation: This fault is caused by "output link Reset Response minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368421: fltTcaFcOutputLink1moLrrMin

Severity: variable

Explanation: This fault is caused by "output link Reset Response minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368422: fltTcaFcOutputLink1qtrLrrMin

Severity: variable

Explanation: This fault is caused by "output link Reset Response minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368423: fltTcaFcOutputLink1yearLrrMin

Severity: variable

Explanation: This fault is caused by "output link Reset Response minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368424: fltTcaFcOutputLink5minLrrMax

Severity: variable

Explanation: This fault is caused by "output link Reset Response maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368425: fltTcaFcOutputLink15minLrrMax

Severity: variable

Explanation: This fault is caused by "output link Reset Response maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368426: fltTcaFcOutputLink1hLrrMax

Severity: variable

Explanation: This fault is caused by "output link Reset Response maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368427: fltTcaFcOutputLink1dLrrMax

Severity: variable

Explanation: This fault is caused by "output link Reset Response maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368428: fltTcaFcOutputLink1wLrrMax

Severity: variable

Explanation: This fault is caused by "output link Reset Response maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368429: fltTcaFcOutputLink1moLrrMax

Severity: variable

Explanation: This fault is caused by "output link Reset Response maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368430: fltTcaFcOutputLink1qtrLrrMax

Severity: variable

Explanation: This fault is caused by "output link Reset Response maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368431: fltTcaFcOutputLink1yearLrrMax

Severity: variable

Explanation: This fault is caused by "output link Reset Response maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368432: fltTcaFcOutputLink5minLrrAvg

Severity: variable

Explanation: This fault is caused by "output link Reset Response average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368433: fltTcaFcOutputLink15minLrrAvg

Severity: variable

Explanation: This fault is caused by "output link Reset Response average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368434: fltTcaFcOutputLink1hLrrAvg

Severity: variable

Explanation: This fault is caused by "output link Reset Response average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368435: fltTcaFcOutputLink1dLrrAvg

Severity: variable

Explanation: This fault is caused by "output link Reset Response average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368436: fltTcaFcOutputLink1wLrrAvg

Severity: variable

Explanation: This fault is caused by "output link Reset Response average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368437: fltTcaFcOutputLink1moLrrAvg

Severity: variable

Explanation: This fault is caused by "output link Reset Response average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368438: fltTcaFcOutputLink1qtrLrrAvg

Severity: variable

Explanation: This fault is caused by "output link Reset Response average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368439: fltTcaFcOutputLink1yearLrrAvg

Severity: variable

Explanation: This fault is caused by "output link Reset Response average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368464: fltTcaFcOutputLink5minLrrTr

Severity: variable

Explanation: This fault is caused by "output link Reset Response trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368465: fltTcaFcOutputLink15minLrrTr

Severity: variable

Explanation: This fault is caused by "output link Reset Response trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368466: fltTcaFcOutputLink1hLrrTr

Severity: variable

Explanation: This fault is caused by "output link Reset Response trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368467: fltTcaFcOutputLink1dLrrTr

Severity: variable

Explanation: This fault is caused by "output link Reset Response trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368468: fltTcaFcOutputLink1wLrrTr

Severity: variable

Explanation: This fault is caused by "output link Reset Response trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368469: fltTcaFcOutputLink1moLrrTr

Severity: variable

Explanation: This fault is caused by "output link Reset Response trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368470: fltTcaFcOutputLink1qtrLrrTr

Severity: variable

Explanation: This fault is caused by "output link Reset Response trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368471: fltTcaFcOutputLink1yearLrrTr

Severity: variable

Explanation: This fault is caused by "output link Reset Response trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368472: fltTcaFcOutputLink5minLrrRate

Severity: variable

Explanation: This fault is caused by "output link Reset Response rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368473: fltTcaFcOutputLink15minLrrRate

Severity: variable

Explanation: This fault is caused by "output link Reset Response rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368474: fltTcaFcOutputLink1hLrrRate

Severity: variable

Explanation: This fault is caused by "output link Reset Response rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368475: fltTcaFcOutputLink1dLrrRate

Severity: variable

Explanation: This fault is caused by "output link Reset Response rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368476: fltTcaFcOutputLink1wLrrRate

Severity: variable

Explanation: This fault is caused by "output link Reset Response rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368477: fltTcaFcOutputLink1moLrrRate

Severity: variable

Explanation: This fault is caused by "output link Reset Response rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368478: fltTcaFcOutputLink1qtrLrrRate

Severity: variable

Explanation: This fault is caused by "output link Reset Response rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368479: fltTcaFcOutputLink1yearLrrRate

Severity: variable

Explanation: This fault is caused by "output link Reset Response rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output link Reset Response" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3685: fltL2BDL3outCustomFault

Severity: warning

Explanation: This fault occurs when a L3 external virtual IF/floating L3out is deployed on an unsupported platform TOR

Recommended Action: To recover from this fault, take the following actions

1. Delete Virtual IF L3out deployment on the TOR

2. If the above action did not resolve the issue, generate the tech-support file and contact Cisco TAC.

F368552: fltTcaFcOutputLink5minNosLast

Severity: variable

Explanation: This fault is caused by "output not operational current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368553: fltTcaFcOutputLink15minNosLast

Severity: variable

Explanation: This fault is caused by "output not operational current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368554: fltTcaFcOutputLink1hNosLast

Severity: variable

Explanation: This fault is caused by "output not operational current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368555: fltTcaFcOutputLink1dNosLast

Severity: variable

Explanation: This fault is caused by "output not operational current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368556: fltTcaFcOutputLink1wNosLast

Severity: variable

Explanation: This fault is caused by "output not operational current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368557: fltTcaFcOutputLink1moNosLast

Severity: variable

Explanation: This fault is caused by "output not operational current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368558: fltTcaFcOutputLink1qtrNosLast

Severity: variable

Explanation: This fault is caused by "output not operational current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368559: fltTcaFcOutputLink1yearNosLast

Severity: variable

Explanation: This fault is caused by "output not operational current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368568: fltTcaFcOutputLink5minNosCum

Severity: variable

Explanation: This fault is caused by "output not operational cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368569: fltTcaFcOutputLink15minNosCum

Severity: variable

Explanation: This fault is caused by "output not operational cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368570: fltTcaFcOutputLink1hNosCum

Severity: variable

Explanation: This fault is caused by "output not operational cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368571: fltTcaFcOutputLink1dNosCum

Severity: variable

Explanation: This fault is caused by "output not operational cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368572: fltTcaFcOutputLink1wNosCum

Severity: variable

Explanation: This fault is caused by "output not operational cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368573: fltTcaFcOutputLink1moNosCum

Severity: variable

Explanation: This fault is caused by "output not operational cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368574: fltTcaFcOutputLink1qtrNosCum

Severity: variable

Explanation: This fault is caused by "output not operational cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368575: fltTcaFcOutputLink1yearNosCum

Severity: variable

Explanation: This fault is caused by "output not operational cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368576: fltTcaFcOutputLink5minNosPer

Severity: variable

Explanation: This fault is caused by "output not operational periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368577: fltTcaFcOutputLink15minNosPer

Severity: variable

Explanation: This fault is caused by "output not operational periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368578: fltTcaFcOutputLink1hNosPer

Severity: variable

Explanation: This fault is caused by "output not operational periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368579: fltTcaFcOutputLink1dNosPer

Severity: variable

Explanation: This fault is caused by "output not operational periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368580: fltTcaFcOutputLink1wNosPer

Severity: variable

Explanation: This fault is caused by "output not operational periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368581: fltTcaFcOutputLink1moNosPer

Severity: variable

Explanation: This fault is caused by "output not operational periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368582: fltTcaFcOutputLink1qtrNosPer

Severity: variable

Explanation: This fault is caused by "output not operational periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368583: fltTcaFcOutputLink1yearNosPer

Severity: variable

Explanation: This fault is caused by "output not operational periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368584: fltTcaFcOutputLink5minNosMin

Severity: variable

Explanation: This fault is caused by "output not operational minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368585: fltTcaFcOutputLink15minNosMin

Severity: variable

Explanation: This fault is caused by "output not operational minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368586: fltTcaFcOutputLink1hNosMin

Severity: variable

Explanation: This fault is caused by "output not operational minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368587: fltTcaFcOutputLink1dNosMin

Severity: variable

Explanation: This fault is caused by "output not operational minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368588: fltTcaFcOutputLink1wNosMin

Severity: variable

Explanation: This fault is caused by "output not operational minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368589: fltTcaFcOutputLink1moNosMin

Severity: variable

Explanation: This fault is caused by "output not operational minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368590: fltTcaFcOutputLink1qtrNosMin

Severity: variable

Explanation: This fault is caused by "output not operational minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368591: fltTcaFcOutputLink1yearNosMin

Severity: variable

Explanation: This fault is caused by "output not operational minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368592: fltTcaFcOutputLink5minNosMax

Severity: variable

Explanation: This fault is caused by "output not operational maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368593: fltTcaFcOutputLink15minNosMax

Severity: variable

Explanation: This fault is caused by "output not operational maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368594: fltTcaFcOutputLink1hNosMax

Severity: variable

Explanation: This fault is caused by "output not operational maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368595: fltTcaFcOutputLink1dNosMax

Severity: variable

Explanation: This fault is caused by "output not operational maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368596: fltTcaFcOutputLink1wNosMax

Severity: variable

Explanation: This fault is caused by "output not operational maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368597: fltTcaFcOutputLink1moNosMax

Severity: variable

Explanation: This fault is caused by "output not operational maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368598: fltTcaFcOutputLink1qtrNosMax

Severity: variable

Explanation: This fault is caused by "output not operational maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368599: fltTcaFcOutputLink1yearNosMax

Severity: variable

Explanation: This fault is caused by "output not operational maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3686: fltEthpmDOMRxPwrStatsRxPowerHigh

Severity: warning

Explanation: This fault occurs when rxPower value crosses above hi-alarm threshold.

Recommended Action: To recover from this fault, Please change the optics/cable to the functional one.

1. Please change the optics/cable to the functional one.

F368600: fltTcaFcOutputLink5minNosAvg

Severity: variable

Explanation: This fault is caused by "output not operational average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368601: fltTcaFcOutputLink15minNosAvg

Severity: variable

Explanation: This fault is caused by "output not operational average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368602: fltTcaFcOutputLink1hNosAvg

Severity: variable

Explanation: This fault is caused by "output not operational average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368603: fltTcaFcOutputLink1dNosAvg

Severity: variable

Explanation: This fault is caused by "output not operational average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368604: fltTcaFcOutputLink1wNosAvg

Severity: variable

Explanation: This fault is caused by "output not operational average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368605: fltTcaFcOutputLink1moNosAvg

Severity: variable

Explanation: This fault is caused by "output not operational average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368606: fltTcaFcOutputLink1qtrNosAvg

Severity: variable

Explanation: This fault is caused by "output not operational average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368607: fltTcaFcOutputLink1yearNosAvg

Severity: variable

Explanation: This fault is caused by "output not operational average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368632: fltTcaFcOutputLink5minNosTr

Severity: variable

Explanation: This fault is caused by "output not operational trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368633: fltTcaFcOutputLink15minNosTr

Severity: variable

Explanation: This fault is caused by "output not operational trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368634: fltTcaFcOutputLink1hNosTr

Severity: variable

Explanation: This fault is caused by "output not operational trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368635: fltTcaFcOutputLink1dNosTr

Severity: variable

Explanation: This fault is caused by "output not operational trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368636: fltTcaFcOutputLink1wNosTr

Severity: variable

Explanation: This fault is caused by "output not operational trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368637: fltTcaFcOutputLink1moNosTr

Severity: variable

Explanation: This fault is caused by "output not operational trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368638: fltTcaFcOutputLink1qtrNosTr

Severity: variable

Explanation: This fault is caused by "output not operational trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368639: fltTcaFcOutputLink1yearNosTr

Severity: variable

Explanation: This fault is caused by "output not operational trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368640: fltTcaFcOutputLink5minNosRate

Severity: variable

Explanation: This fault is caused by "output not operational rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368641: fltTcaFcOutputLink15minNosRate

Severity: variable

Explanation: This fault is caused by "output not operational rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368642: fltTcaFcOutputLink1hNosRate

Severity: variable

Explanation: This fault is caused by "output not operational rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368643: fltTcaFcOutputLink1dNosRate

Severity: variable

Explanation: This fault is caused by "output not operational rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368644: fltTcaFcOutputLink1wNosRate

Severity: variable

Explanation: This fault is caused by "output not operational rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368645: fltTcaFcOutputLink1moNosRate

Severity: variable

Explanation: This fault is caused by "output not operational rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368646: fltTcaFcOutputLink1qtrNosRate

Severity: variable

Explanation: This fault is caused by "output not operational rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368647: fltTcaFcOutputLink1yearNosRate

Severity: variable

Explanation: This fault is caused by "output not operational rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output not operational" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3687: fltEthpmDOMRxPwrStatsRxPowerLow

Severity: warning

Explanation: This fault occurs when rxPower value crosses below lo-alarm threshold.

Recommended Action: To recover from this fault, Please change the optics/cable to the functional one.

1. Please change the optics/cable to the functional one.

F368720: fltTcaFcOutputLink5minOlsLast

Severity: variable

Explanation: This fault is caused by "output offline current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368721: fltTcaFcOutputLink15minOlsLast

Severity: variable

Explanation: This fault is caused by "output offline current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368722: fltTcaFcOutputLink1hOlsLast

Severity: variable

Explanation: This fault is caused by "output offline current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368723: fltTcaFcOutputLink1dOlsLast

Severity: variable

Explanation: This fault is caused by "output offline current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368724: fltTcaFcOutputLink1wOlsLast

Severity: variable

Explanation: This fault is caused by "output offline current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368725: fltTcaFcOutputLink1moOlsLast

Severity: variable

Explanation: This fault is caused by "output offline current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368726: fltTcaFcOutputLink1qtrOlsLast

Severity: variable

Explanation: This fault is caused by "output offline current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368727: fltTcaFcOutputLink1yearOlsLast

Severity: variable

Explanation: This fault is caused by "output offline current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368736: fltTcaFcOutputLink5minOlsCum

Severity: variable

Explanation: This fault is caused by "output offline cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368737: fltTcaFcOutputLink15minOlsCum

Severity: variable

Explanation: This fault is caused by "output offline cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368738: fltTcaFcOutputLink1hOlsCum

Severity: variable

Explanation: This fault is caused by "output offline cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368739: fltTcaFcOutputLink1dOlsCum

Severity: variable

Explanation: This fault is caused by "output offline cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368740: fltTcaFcOutputLink1wOlsCum

Severity: variable

Explanation: This fault is caused by "output offline cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368741: fltTcaFcOutputLink1moOlsCum

Severity: variable

Explanation: This fault is caused by "output offline cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368742: fltTcaFcOutputLink1qtrOlsCum

Severity: variable

Explanation: This fault is caused by "output offline cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368743: fltTcaFcOutputLink1yearOlsCum

Severity: variable

Explanation: This fault is caused by "output offline cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368744: fltTcaFcOutputLink5minOlsPer

Severity: variable

Explanation: This fault is caused by "output offline periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368745: fltTcaFcOutputLink15minOlsPer

Severity: variable

Explanation: This fault is caused by "output offline periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368746: fltTcaFcOutputLink1hOlsPer

Severity: variable

Explanation: This fault is caused by "output offline periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368747: fltTcaFcOutputLink1dOlsPer

Severity: variable

Explanation: This fault is caused by "output offline periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368748: fltTcaFcOutputLink1wOlsPer

Severity: variable

Explanation: This fault is caused by "output offline periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368749: fltTcaFcOutputLink1moOlsPer

Severity: variable

Explanation: This fault is caused by "output offline periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368750: fltTcaFcOutputLink1qtrOlsPer

Severity: variable

Explanation: This fault is caused by "output offline periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368751: fltTcaFcOutputLink1yearOlsPer

Severity: variable

Explanation: This fault is caused by "output offline periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368752: fltTcaFcOutputLink5minOlsMin

Severity: variable

Explanation: This fault is caused by "output offline minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368753: fltTcaFcOutputLink15minOlsMin

Severity: variable

Explanation: This fault is caused by "output offline minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368754: fltTcaFcOutputLink1hOlsMin

Severity: variable

Explanation: This fault is caused by "output offline minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368755: fltTcaFcOutputLink1dOlsMin

Severity: variable

Explanation: This fault is caused by "output offline minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368756: fltTcaFcOutputLink1wOlsMin

Severity: variable

Explanation: This fault is caused by "output offline minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368757: fltTcaFcOutputLink1moOlsMin

Severity: variable

Explanation: This fault is caused by "output offline minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368758: fltTcaFcOutputLink1qtrOlsMin

Severity: variable

Explanation: This fault is caused by "output offline minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368759: fltTcaFcOutputLink1yearOlsMin

Severity: variable

Explanation: This fault is caused by "output offline minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368760: fltTcaFcOutputLink5minOlsMax

Severity: variable

Explanation: This fault is caused by "output offline maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368761: fltTcaFcOutputLink15minOlsMax

Severity: variable

Explanation: This fault is caused by "output offline maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368762: fltTcaFcOutputLink1hOlsMax

Severity: variable

Explanation: This fault is caused by "output offline maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368763: fltTcaFcOutputLink1dOlsMax

Severity: variable

Explanation: This fault is caused by "output offline maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368764: fltTcaFcOutputLink1wOlsMax

Severity: variable

Explanation: This fault is caused by "output offline maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368765: fltTcaFcOutputLink1moOlsMax

Severity: variable

Explanation: This fault is caused by "output offline maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368766: fltTcaFcOutputLink1qtrOlsMax

Severity: variable

Explanation: This fault is caused by "output offline maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368767: fltTcaFcOutputLink1yearOlsMax

Severity: variable

Explanation: This fault is caused by "output offline maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368768: fltTcaFcOutputLink5minOlsAvg

Severity: variable

Explanation: This fault is caused by "output offline average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368769: fltTcaFcOutputLink15minOlsAvg

Severity: variable

Explanation: This fault is caused by "output offline average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368770: fltTcaFcOutputLink1hOlsAvg

Severity: variable

Explanation: This fault is caused by "output offline average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368771: fltTcaFcOutputLink1dOlsAvg

Severity: variable

Explanation: This fault is caused by "output offline average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368772: fltTcaFcOutputLink1wOlsAvg

Severity: variable

Explanation: This fault is caused by "output offline average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368773: fltTcaFcOutputLink1moOlsAvg

Severity: variable

Explanation: This fault is caused by "output offline average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368774: fltTcaFcOutputLink1qtrOlsAvg

Severity: variable

Explanation: This fault is caused by "output offline average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368775: fltTcaFcOutputLink1yearOlsAvg

Severity: variable

Explanation: This fault is caused by "output offline average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3688: fltEthpmDOMTxPwrStatsTxPowerHigh

Severity: warning

Explanation: This fault occurs when txPower value crosses above hi-alarm threshold.

Recommended Action: To recover from this fault, Please change the optics/cable to the functional one.

1. Please change the optics/cable to the functional one.

F368800: fltTcaFcOutputLink5minOlsTr

Severity: variable

Explanation: This fault is caused by "output offline trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368801: fltTcaFcOutputLink15minOlsTr

Severity: variable

Explanation: This fault is caused by "output offline trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368802: fltTcaFcOutputLink1hOlsTr

Severity: variable

Explanation: This fault is caused by "output offline trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368803: fltTcaFcOutputLink1dOlsTr

Severity: variable

Explanation: This fault is caused by "output offline trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368804: fltTcaFcOutputLink1wOlsTr

Severity: variable

Explanation: This fault is caused by "output offline trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368805: fltTcaFcOutputLink1moOlsTr

Severity: variable

Explanation: This fault is caused by "output offline trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368806: fltTcaFcOutputLink1qtrOlsTr

Severity: variable

Explanation: This fault is caused by "output offline trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368807: fltTcaFcOutputLink1yearOlsTr

Severity: variable

Explanation: This fault is caused by "output offline trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368808: fltTcaFcOutputLink5minOlsRate

Severity: variable

Explanation: This fault is caused by "output offline rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368809: fltTcaFcOutputLink15minOlsRate

Severity: variable

Explanation: This fault is caused by "output offline rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368810: fltTcaFcOutputLink1hOlsRate

Severity: variable

Explanation: This fault is caused by "output offline rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368811: fltTcaFcOutputLink1dOlsRate

Severity: variable

Explanation: This fault is caused by "output offline rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368812: fltTcaFcOutputLink1wOlsRate

Severity: variable

Explanation: This fault is caused by "output offline rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368813: fltTcaFcOutputLink1moOlsRate

Severity: variable

Explanation: This fault is caused by "output offline rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368814: fltTcaFcOutputLink1qtrOlsRate

Severity: variable

Explanation: This fault is caused by "output offline rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368815: fltTcaFcOutputLink1yearOlsRate

Severity: variable

Explanation: This fault is caused by "output offline rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output offline" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368888: fltTcaFcOutputTotalByte5minBytesLast

Severity: variable

Explanation: This fault is caused by "total output bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368889: fltTcaFcOutputTotalByte15minBytesLast

Severity: variable

Explanation: This fault is caused by "total output bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368890: fltTcaFcOutputTotalByte1hBytesLast

Severity: variable

Explanation: This fault is caused by "total output bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368891: fltTcaFcOutputTotalByte1dBytesLast

Severity: variable

Explanation: This fault is caused by "total output bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368892: fltTcaFcOutputTotalByte1wBytesLast

Severity: variable

Explanation: This fault is caused by "total output bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368893: fltTcaFcOutputTotalByte1moBytesLast

Severity: variable

Explanation: This fault is caused by "total output bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368894: fltTcaFcOutputTotalByte1qtrBytesLast

Severity: variable

Explanation: This fault is caused by "total output bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368895: fltTcaFcOutputTotalByte1yearBytesLast

Severity: variable

Explanation: This fault is caused by "total output bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3689: fltEthpmDOMTxPwrStatsTxPowerLow

Severity: warning

Explanation: This fault occurs when txPower value crosses below lo-alarm threshold.

Recommended Action: To recover from this fault, Please change the optics/cable to the functional one.

1. Please change the optics/cable to the functional one.

F368904: fltTcaFcOutputTotalByte5minBytesCum

Severity: variable

Explanation: This fault is caused by "total output bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368905: fltTcaFcOutputTotalByte15minBytesCum

Severity: variable

Explanation: This fault is caused by "total output bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368906: fltTcaFcOutputTotalByte1hBytesCum

Severity: variable

Explanation: This fault is caused by "total output bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368907: fltTcaFcOutputTotalByte1dBytesCum

Severity: variable

Explanation: This fault is caused by "total output bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368908: fltTcaFcOutputTotalByte1wBytesCum

Severity: variable

Explanation: This fault is caused by "total output bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368909: fltTcaFcOutputTotalByte1moBytesCum

Severity: variable

Explanation: This fault is caused by "total output bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368910: fltTcaFcOutputTotalByte1qtrBytesCum

Severity: variable

Explanation: This fault is caused by "total output bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368911: fltTcaFcOutputTotalByte1yearBytesCum

Severity: variable

Explanation: This fault is caused by "total output bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368912: fltTcaFcOutputTotalByte5minBytesPer

Severity: variable

Explanation: This fault is caused by "total output bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368913: fltTcaFcOutputTotalByte15minBytesPer

Severity: variable

Explanation: This fault is caused by "total output bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368914: fltTcaFcOutputTotalByte1hBytesPer

Severity: variable

Explanation: This fault is caused by "total output bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368915: fltTcaFcOutputTotalByte1dBytesPer

Severity: variable

Explanation: This fault is caused by "total output bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368916: fltTcaFcOutputTotalByte1wBytesPer

Severity: variable

Explanation: This fault is caused by "total output bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368917: fltTcaFcOutputTotalByte1moBytesPer

Severity: variable

Explanation: This fault is caused by "total output bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368918: fltTcaFcOutputTotalByte1qtrBytesPer

Severity: variable

Explanation: This fault is caused by "total output bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368919: fltTcaFcOutputTotalByte1yearBytesPer

Severity: variable

Explanation: This fault is caused by "total output bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368920: fltTcaFcOutputTotalByte5minBytesMin

Severity: variable

Explanation: This fault is caused by "total output bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368921: fltTcaFcOutputTotalByte15minBytesMin

Severity: variable

Explanation: This fault is caused by "total output bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368922: fltTcaFcOutputTotalByte1hBytesMin

Severity: variable

Explanation: This fault is caused by "total output bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368923: fltTcaFcOutputTotalByte1dBytesMin

Severity: variable

Explanation: This fault is caused by "total output bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368924: fltTcaFcOutputTotalByte1wBytesMin

Severity: variable

Explanation: This fault is caused by "total output bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368925: fltTcaFcOutputTotalByte1moBytesMin

Severity: variable

Explanation: This fault is caused by "total output bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368926: fltTcaFcOutputTotalByte1qtrBytesMin

Severity: variable

Explanation: This fault is caused by "total output bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368927: fltTcaFcOutputTotalByte1yearBytesMin

Severity: variable

Explanation: This fault is caused by "total output bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368928: fltTcaFcOutputTotalByte5minBytesMax

Severity: variable

Explanation: This fault is caused by "total output bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368929: fltTcaFcOutputTotalByte15minBytesMax

Severity: variable

Explanation: This fault is caused by "total output bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368930: fltTcaFcOutputTotalByte1hBytesMax

Severity: variable

Explanation: This fault is caused by "total output bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368931: fltTcaFcOutputTotalByte1dBytesMax

Severity: variable

Explanation: This fault is caused by "total output bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368932: fltTcaFcOutputTotalByte1wBytesMax

Severity: variable

Explanation: This fault is caused by "total output bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368933: fltTcaFcOutputTotalByte1moBytesMax

Severity: variable

Explanation: This fault is caused by "total output bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368934: fltTcaFcOutputTotalByte1qtrBytesMax

Severity: variable

Explanation: This fault is caused by "total output bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368935: fltTcaFcOutputTotalByte1yearBytesMax

Severity: variable

Explanation: This fault is caused by "total output bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368936: fltTcaFcOutputTotalByte5minBytesAvg

Severity: variable

Explanation: This fault is caused by "total output bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368937: fltTcaFcOutputTotalByte15minBytesAvg

Severity: variable

Explanation: This fault is caused by "total output bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368938: fltTcaFcOutputTotalByte1hBytesAvg

Severity: variable

Explanation: This fault is caused by "total output bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368939: fltTcaFcOutputTotalByte1dBytesAvg

Severity: variable

Explanation: This fault is caused by "total output bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368940: fltTcaFcOutputTotalByte1wBytesAvg

Severity: variable

Explanation: This fault is caused by "total output bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368941: fltTcaFcOutputTotalByte1moBytesAvg

Severity: variable

Explanation: This fault is caused by "total output bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368942: fltTcaFcOutputTotalByte1qtrBytesAvg

Severity: variable

Explanation: This fault is caused by "total output bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368943: fltTcaFcOutputTotalByte1yearBytesAvg

Severity: variable

Explanation: This fault is caused by "total output bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368968: fltTcaFcOutputTotalByte5minBytesTr

Severity: variable

Explanation: This fault is caused by "total output bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368969: fltTcaFcOutputTotalByte15minBytesTr

Severity: variable

Explanation: This fault is caused by "total output bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368970: fltTcaFcOutputTotalByte1hBytesTr

Severity: variable

Explanation: This fault is caused by "total output bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368971: fltTcaFcOutputTotalByte1dBytesTr

Severity: variable

Explanation: This fault is caused by "total output bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368972: fltTcaFcOutputTotalByte1wBytesTr

Severity: variable

Explanation: This fault is caused by "total output bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368973: fltTcaFcOutputTotalByte1moBytesTr

Severity: variable

Explanation: This fault is caused by "total output bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368974: fltTcaFcOutputTotalByte1qtrBytesTr

Severity: variable

Explanation: This fault is caused by "total output bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368975: fltTcaFcOutputTotalByte1yearBytesTr

Severity: variable

Explanation: This fault is caused by "total output bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368976: fltTcaFcOutputTotalByte5minBytesRate

Severity: variable

Explanation: This fault is caused by "total output bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368977: fltTcaFcOutputTotalByte15minBytesRate

Severity: variable

Explanation: This fault is caused by "total output bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368978: fltTcaFcOutputTotalByte1hBytesRate

Severity: variable

Explanation: This fault is caused by "total output bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368979: fltTcaFcOutputTotalByte1dBytesRate

Severity: variable

Explanation: This fault is caused by "total output bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368980: fltTcaFcOutputTotalByte1wBytesRate

Severity: variable

Explanation: This fault is caused by "total output bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368981: fltTcaFcOutputTotalByte1moBytesRate

Severity: variable

Explanation: This fault is caused by "total output bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368982: fltTcaFcOutputTotalByte1qtrBytesRate

Severity: variable

Explanation: This fault is caused by "total output bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F368983: fltTcaFcOutputTotalByte1yearBytesRate

Severity: variable

Explanation: This fault is caused by "total output bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369056: fltTcaFcOutputTotalByte5minBytesRateLast

Severity: variable

Explanation: This fault is caused by "total output bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369057: fltTcaFcOutputTotalByte15minBytesRateLast

Severity: variable

Explanation: This fault is caused by "total output bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369058: fltTcaFcOutputTotalByte1hBytesRateLast

Severity: variable

Explanation: This fault is caused by "total output bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369059: fltTcaFcOutputTotalByte1dBytesRateLast

Severity: variable

Explanation: This fault is caused by "total output bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369060: fltTcaFcOutputTotalByte1wBytesRateLast

Severity: variable

Explanation: This fault is caused by "total output bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369061: fltTcaFcOutputTotalByte1moBytesRateLast

Severity: variable

Explanation: This fault is caused by "total output bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369062: fltTcaFcOutputTotalByte1qtrBytesRateLast

Severity: variable

Explanation: This fault is caused by "total output bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369063: fltTcaFcOutputTotalByte1yearBytesRateLast

Severity: variable

Explanation: This fault is caused by "total output bytes rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369064: fltTcaFcOutputTotalByte5minBytesRateMin

Severity: variable

Explanation: This fault is caused by "total output bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369065: fltTcaFcOutputTotalByte15minBytesRateMin

Severity: variable

Explanation: This fault is caused by "total output bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369066: fltTcaFcOutputTotalByte1hBytesRateMin

Severity: variable

Explanation: This fault is caused by "total output bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369067: fltTcaFcOutputTotalByte1dBytesRateMin

Severity: variable

Explanation: This fault is caused by "total output bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369068: fltTcaFcOutputTotalByte1wBytesRateMin

Severity: variable

Explanation: This fault is caused by "total output bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369069: fltTcaFcOutputTotalByte1moBytesRateMin

Severity: variable

Explanation: This fault is caused by "total output bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369070: fltTcaFcOutputTotalByte1qtrBytesRateMin

Severity: variable

Explanation: This fault is caused by "total output bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369071: fltTcaFcOutputTotalByte1yearBytesRateMin

Severity: variable

Explanation: This fault is caused by "total output bytes rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369072: fltTcaFcOutputTotalByte5minBytesRateMax

Severity: variable

Explanation: This fault is caused by "total output bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369073: fltTcaFcOutputTotalByte15minBytesRateMax

Severity: variable

Explanation: This fault is caused by "total output bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369074: fltTcaFcOutputTotalByte1hBytesRateMax

Severity: variable

Explanation: This fault is caused by "total output bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369075: fltTcaFcOutputTotalByte1dBytesRateMax

Severity: variable

Explanation: This fault is caused by "total output bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369076: fltTcaFcOutputTotalByte1wBytesRateMax

Severity: variable

Explanation: This fault is caused by "total output bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369077: fltTcaFcOutputTotalByte1moBytesRateMax

Severity: variable

Explanation: This fault is caused by "total output bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369078: fltTcaFcOutputTotalByte1qtrBytesRateMax

Severity: variable

Explanation: This fault is caused by "total output bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369079: fltTcaFcOutputTotalByte1yearBytesRateMax

Severity: variable

Explanation: This fault is caused by "total output bytes rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369080: fltTcaFcOutputTotalByte5minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "total output bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369081: fltTcaFcOutputTotalByte15minBytesRateAvg

Severity: variable

Explanation: This fault is caused by "total output bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369082: fltTcaFcOutputTotalByte1hBytesRateAvg

Severity: variable

Explanation: This fault is caused by "total output bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369083: fltTcaFcOutputTotalByte1dBytesRateAvg

Severity: variable

Explanation: This fault is caused by "total output bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369084: fltTcaFcOutputTotalByte1wBytesRateAvg

Severity: variable

Explanation: This fault is caused by "total output bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369085: fltTcaFcOutputTotalByte1moBytesRateAvg

Severity: variable

Explanation: This fault is caused by "total output bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369086: fltTcaFcOutputTotalByte1qtrBytesRateAvg

Severity: variable

Explanation: This fault is caused by "total output bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369087: fltTcaFcOutputTotalByte1yearBytesRateAvg

Severity: variable

Explanation: This fault is caused by "total output bytes rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3691: fltBfdRsMhIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F369120: fltTcaFcOutputTotalByte5minBytesRateTr

Severity: variable

Explanation: This fault is caused by "total output bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369121: fltTcaFcOutputTotalByte15minBytesRateTr

Severity: variable

Explanation: This fault is caused by "total output bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369122: fltTcaFcOutputTotalByte1hBytesRateTr

Severity: variable

Explanation: This fault is caused by "total output bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369123: fltTcaFcOutputTotalByte1dBytesRateTr

Severity: variable

Explanation: This fault is caused by "total output bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369124: fltTcaFcOutputTotalByte1wBytesRateTr

Severity: variable

Explanation: This fault is caused by "total output bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369125: fltTcaFcOutputTotalByte1moBytesRateTr

Severity: variable

Explanation: This fault is caused by "total output bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369126: fltTcaFcOutputTotalByte1qtrBytesRateTr

Severity: variable

Explanation: This fault is caused by "total output bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369127: fltTcaFcOutputTotalByte1yearBytesRateTr

Severity: variable

Explanation: This fault is caused by "total output bytes rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "total output bytes rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369176: fltTcaFcOutputTotalByte5minUtilLast

Severity: variable

Explanation: This fault is caused by "ingress link utilization current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369177: fltTcaFcOutputTotalByte15minUtilLast

Severity: variable

Explanation: This fault is caused by "ingress link utilization current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369178: fltTcaFcOutputTotalByte1hUtilLast

Severity: variable

Explanation: This fault is caused by "ingress link utilization current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369179: fltTcaFcOutputTotalByte1dUtilLast

Severity: variable

Explanation: This fault is caused by "ingress link utilization current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369180: fltTcaFcOutputTotalByte1wUtilLast

Severity: variable

Explanation: This fault is caused by "ingress link utilization current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369181: fltTcaFcOutputTotalByte1moUtilLast

Severity: variable

Explanation: This fault is caused by "ingress link utilization current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369182: fltTcaFcOutputTotalByte1qtrUtilLast

Severity: variable

Explanation: This fault is caused by "ingress link utilization current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369183: fltTcaFcOutputTotalByte1yearUtilLast

Severity: variable

Explanation: This fault is caused by "ingress link utilization current value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369184: fltTcaFcOutputTotalByte5minUtilMin

Severity: variable

Explanation: This fault is caused by "ingress link utilization minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369185: fltTcaFcOutputTotalByte15minUtilMin

Severity: variable

Explanation: This fault is caused by "ingress link utilization minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369186: fltTcaFcOutputTotalByte1hUtilMin

Severity: variable

Explanation: This fault is caused by "ingress link utilization minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369187: fltTcaFcOutputTotalByte1dUtilMin

Severity: variable

Explanation: This fault is caused by "ingress link utilization minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369188: fltTcaFcOutputTotalByte1wUtilMin

Severity: variable

Explanation: This fault is caused by "ingress link utilization minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369189: fltTcaFcOutputTotalByte1moUtilMin

Severity: variable

Explanation: This fault is caused by "ingress link utilization minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369190: fltTcaFcOutputTotalByte1qtrUtilMin

Severity: variable

Explanation: This fault is caused by "ingress link utilization minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369191: fltTcaFcOutputTotalByte1yearUtilMin

Severity: variable

Explanation: This fault is caused by "ingress link utilization minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369192: fltTcaFcOutputTotalByte5minUtilMax

Severity: variable

Explanation: This fault is caused by "ingress link utilization maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369193: fltTcaFcOutputTotalByte15minUtilMax

Severity: variable

Explanation: This fault is caused by "ingress link utilization maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369194: fltTcaFcOutputTotalByte1hUtilMax

Severity: variable

Explanation: This fault is caused by "ingress link utilization maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369195: fltTcaFcOutputTotalByte1dUtilMax

Severity: variable

Explanation: This fault is caused by "ingress link utilization maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369196: fltTcaFcOutputTotalByte1wUtilMax

Severity: variable

Explanation: This fault is caused by "ingress link utilization maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369197: fltTcaFcOutputTotalByte1moUtilMax

Severity: variable

Explanation: This fault is caused by "ingress link utilization maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369198: fltTcaFcOutputTotalByte1qtrUtilMax

Severity: variable

Explanation: This fault is caused by "ingress link utilization maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369199: fltTcaFcOutputTotalByte1yearUtilMax

Severity: variable

Explanation: This fault is caused by "ingress link utilization maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369200: fltTcaFcOutputTotalByte5minUtilAvg

Severity: variable

Explanation: This fault is caused by "ingress link utilization average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369201: fltTcaFcOutputTotalByte15minUtilAvg

Severity: variable

Explanation: This fault is caused by "ingress link utilization average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369202: fltTcaFcOutputTotalByte1hUtilAvg

Severity: variable

Explanation: This fault is caused by "ingress link utilization average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369203: fltTcaFcOutputTotalByte1dUtilAvg

Severity: variable

Explanation: This fault is caused by "ingress link utilization average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369204: fltTcaFcOutputTotalByte1wUtilAvg

Severity: variable

Explanation: This fault is caused by "ingress link utilization average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369205: fltTcaFcOutputTotalByte1moUtilAvg

Severity: variable

Explanation: This fault is caused by "ingress link utilization average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369206: fltTcaFcOutputTotalByte1qtrUtilAvg

Severity: variable

Explanation: This fault is caused by "ingress link utilization average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369207: fltTcaFcOutputTotalByte1yearUtilAvg

Severity: variable

Explanation: This fault is caused by "ingress link utilization average value" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369240: fltTcaFcOutputTotalByte5minUtilTr

Severity: variable

Explanation: This fault is caused by "ingress link utilization trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369241: fltTcaFcOutputTotalByte15minUtilTr

Severity: variable

Explanation: This fault is caused by "ingress link utilization trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369242: fltTcaFcOutputTotalByte1hUtilTr

Severity: variable

Explanation: This fault is caused by "ingress link utilization trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369243: fltTcaFcOutputTotalByte1dUtilTr

Severity: variable

Explanation: This fault is caused by "ingress link utilization trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369244: fltTcaFcOutputTotalByte1wUtilTr

Severity: variable

Explanation: This fault is caused by "ingress link utilization trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369245: fltTcaFcOutputTotalByte1moUtilTr

Severity: variable

Explanation: This fault is caused by "ingress link utilization trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369246: fltTcaFcOutputTotalByte1qtrUtilTr

Severity: variable

Explanation: This fault is caused by "ingress link utilization trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369247: fltTcaFcOutputTotalByte1yearUtilTr

Severity: variable

Explanation: This fault is caused by "ingress link utilization trend" statistical property crossing threshold level.

Recommended Action: Check the values of "ingress link utilization" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369296: fltTcaFcReceiveB2BCredit5minRemainingLast

Severity: variable

Explanation: This fault is caused by "remaining B2B credit current value" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369297: fltTcaFcReceiveB2BCredit15minRemainingLast

Severity: variable

Explanation: This fault is caused by "remaining B2B credit current value" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369298: fltTcaFcReceiveB2BCredit1hRemainingLast

Severity: variable

Explanation: This fault is caused by "remaining B2B credit current value" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369299: fltTcaFcReceiveB2BCredit1dRemainingLast

Severity: variable

Explanation: This fault is caused by "remaining B2B credit current value" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369300: fltTcaFcReceiveB2BCredit1wRemainingLast

Severity: variable

Explanation: This fault is caused by "remaining B2B credit current value" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369301: fltTcaFcReceiveB2BCredit1moRemainingLast

Severity: variable

Explanation: This fault is caused by "remaining B2B credit current value" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369302: fltTcaFcReceiveB2BCredit1qtrRemainingLast

Severity: variable

Explanation: This fault is caused by "remaining B2B credit current value" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369303: fltTcaFcReceiveB2BCredit1yearRemainingLast

Severity: variable

Explanation: This fault is caused by "remaining B2B credit current value" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369312: fltTcaFcReceiveB2BCredit5minRemainingCum

Severity: variable

Explanation: This fault is caused by "remaining B2B credit cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369313: fltTcaFcReceiveB2BCredit15minRemainingCum

Severity: variable

Explanation: This fault is caused by "remaining B2B credit cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369314: fltTcaFcReceiveB2BCredit1hRemainingCum

Severity: variable

Explanation: This fault is caused by "remaining B2B credit cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369315: fltTcaFcReceiveB2BCredit1dRemainingCum

Severity: variable

Explanation: This fault is caused by "remaining B2B credit cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369316: fltTcaFcReceiveB2BCredit1wRemainingCum

Severity: variable

Explanation: This fault is caused by "remaining B2B credit cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369317: fltTcaFcReceiveB2BCredit1moRemainingCum

Severity: variable

Explanation: This fault is caused by "remaining B2B credit cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369318: fltTcaFcReceiveB2BCredit1qtrRemainingCum

Severity: variable

Explanation: This fault is caused by "remaining B2B credit cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369319: fltTcaFcReceiveB2BCredit1yearRemainingCum

Severity: variable

Explanation: This fault is caused by "remaining B2B credit cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369320: fltTcaFcReceiveB2BCredit5minRemainingPer

Severity: variable

Explanation: This fault is caused by "remaining B2B credit periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369321: fltTcaFcReceiveB2BCredit15minRemainingPer

Severity: variable

Explanation: This fault is caused by "remaining B2B credit periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369322: fltTcaFcReceiveB2BCredit1hRemainingPer

Severity: variable

Explanation: This fault is caused by "remaining B2B credit periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369323: fltTcaFcReceiveB2BCredit1dRemainingPer

Severity: variable

Explanation: This fault is caused by "remaining B2B credit periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369324: fltTcaFcReceiveB2BCredit1wRemainingPer

Severity: variable

Explanation: This fault is caused by "remaining B2B credit periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369325: fltTcaFcReceiveB2BCredit1moRemainingPer

Severity: variable

Explanation: This fault is caused by "remaining B2B credit periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369326: fltTcaFcReceiveB2BCredit1qtrRemainingPer

Severity: variable

Explanation: This fault is caused by "remaining B2B credit periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369327: fltTcaFcReceiveB2BCredit1yearRemainingPer

Severity: variable

Explanation: This fault is caused by "remaining B2B credit periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369328: fltTcaFcReceiveB2BCredit5minRemainingMin

Severity: variable

Explanation: This fault is caused by "remaining B2B credit minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369329: fltTcaFcReceiveB2BCredit15minRemainingMin

Severity: variable

Explanation: This fault is caused by "remaining B2B credit minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369330: fltTcaFcReceiveB2BCredit1hRemainingMin

Severity: variable

Explanation: This fault is caused by "remaining B2B credit minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369331: fltTcaFcReceiveB2BCredit1dRemainingMin

Severity: variable

Explanation: This fault is caused by "remaining B2B credit minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369332: fltTcaFcReceiveB2BCredit1wRemainingMin

Severity: variable

Explanation: This fault is caused by "remaining B2B credit minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369333: fltTcaFcReceiveB2BCredit1moRemainingMin

Severity: variable

Explanation: This fault is caused by "remaining B2B credit minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369334: fltTcaFcReceiveB2BCredit1qtrRemainingMin

Severity: variable

Explanation: This fault is caused by "remaining B2B credit minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369335: fltTcaFcReceiveB2BCredit1yearRemainingMin

Severity: variable

Explanation: This fault is caused by "remaining B2B credit minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369336: fltTcaFcReceiveB2BCredit5minRemainingMax

Severity: variable

Explanation: This fault is caused by "remaining B2B credit maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369337: fltTcaFcReceiveB2BCredit15minRemainingMax

Severity: variable

Explanation: This fault is caused by "remaining B2B credit maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369338: fltTcaFcReceiveB2BCredit1hRemainingMax

Severity: variable

Explanation: This fault is caused by "remaining B2B credit maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369339: fltTcaFcReceiveB2BCredit1dRemainingMax

Severity: variable

Explanation: This fault is caused by "remaining B2B credit maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369340: fltTcaFcReceiveB2BCredit1wRemainingMax

Severity: variable

Explanation: This fault is caused by "remaining B2B credit maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369341: fltTcaFcReceiveB2BCredit1moRemainingMax

Severity: variable

Explanation: This fault is caused by "remaining B2B credit maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369342: fltTcaFcReceiveB2BCredit1qtrRemainingMax

Severity: variable

Explanation: This fault is caused by "remaining B2B credit maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369343: fltTcaFcReceiveB2BCredit1yearRemainingMax

Severity: variable

Explanation: This fault is caused by "remaining B2B credit maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369344: fltTcaFcReceiveB2BCredit5minRemainingAvg

Severity: variable

Explanation: This fault is caused by "remaining B2B credit average value" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369345: fltTcaFcReceiveB2BCredit15minRemainingAvg

Severity: variable

Explanation: This fault is caused by "remaining B2B credit average value" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369346: fltTcaFcReceiveB2BCredit1hRemainingAvg

Severity: variable

Explanation: This fault is caused by "remaining B2B credit average value" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369347: fltTcaFcReceiveB2BCredit1dRemainingAvg

Severity: variable

Explanation: This fault is caused by "remaining B2B credit average value" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369348: fltTcaFcReceiveB2BCredit1wRemainingAvg

Severity: variable

Explanation: This fault is caused by "remaining B2B credit average value" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369349: fltTcaFcReceiveB2BCredit1moRemainingAvg

Severity: variable

Explanation: This fault is caused by "remaining B2B credit average value" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369350: fltTcaFcReceiveB2BCredit1qtrRemainingAvg

Severity: variable

Explanation: This fault is caused by "remaining B2B credit average value" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369351: fltTcaFcReceiveB2BCredit1yearRemainingAvg

Severity: variable

Explanation: This fault is caused by "remaining B2B credit average value" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369376: fltTcaFcReceiveB2BCredit5minRemainingTr

Severity: variable

Explanation: This fault is caused by "remaining B2B credit trend" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369377: fltTcaFcReceiveB2BCredit15minRemainingTr

Severity: variable

Explanation: This fault is caused by "remaining B2B credit trend" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369378: fltTcaFcReceiveB2BCredit1hRemainingTr

Severity: variable

Explanation: This fault is caused by "remaining B2B credit trend" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369379: fltTcaFcReceiveB2BCredit1dRemainingTr

Severity: variable

Explanation: This fault is caused by "remaining B2B credit trend" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369380: fltTcaFcReceiveB2BCredit1wRemainingTr

Severity: variable

Explanation: This fault is caused by "remaining B2B credit trend" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369381: fltTcaFcReceiveB2BCredit1moRemainingTr

Severity: variable

Explanation: This fault is caused by "remaining B2B credit trend" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369382: fltTcaFcReceiveB2BCredit1qtrRemainingTr

Severity: variable

Explanation: This fault is caused by "remaining B2B credit trend" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369383: fltTcaFcReceiveB2BCredit1yearRemainingTr

Severity: variable

Explanation: This fault is caused by "remaining B2B credit trend" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369384: fltTcaFcReceiveB2BCredit5minRemainingRate

Severity: variable

Explanation: This fault is caused by "remaining B2B credit rate" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369385: fltTcaFcReceiveB2BCredit15minRemainingRate

Severity: variable

Explanation: This fault is caused by "remaining B2B credit rate" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369386: fltTcaFcReceiveB2BCredit1hRemainingRate

Severity: variable

Explanation: This fault is caused by "remaining B2B credit rate" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369387: fltTcaFcReceiveB2BCredit1dRemainingRate

Severity: variable

Explanation: This fault is caused by "remaining B2B credit rate" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369388: fltTcaFcReceiveB2BCredit1wRemainingRate

Severity: variable

Explanation: This fault is caused by "remaining B2B credit rate" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369389: fltTcaFcReceiveB2BCredit1moRemainingRate

Severity: variable

Explanation: This fault is caused by "remaining B2B credit rate" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369390: fltTcaFcReceiveB2BCredit1qtrRemainingRate

Severity: variable

Explanation: This fault is caused by "remaining B2B credit rate" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369391: fltTcaFcReceiveB2BCredit1yearRemainingRate

Severity: variable

Explanation: This fault is caused by "remaining B2B credit rate" statistical property crossing threshold level.

Recommended Action: Check the values of "remaining B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3694: fltBfdMhIfAfBfdCfgCtrl

Severity: warning

Explanation: This fault is caused by a hardware programming failure

Recommended Action: The system will periodically retry to program the hardware. If the failure is due to lack of hardware resources, free up resources by removing or simplifying existing configuration. One of the reasons for lack of hardware resources is exhaustion of VLANs in ToR. These hardware resources can be examined by looking at capacity dashboard under OPERATIONS tab. Please check entry against the number of VLANs in output of command show vlan summary issued at node where fault is generated to check whether it exceeds above advertised node capacity.

F369464: fltTcaFcReceiveB2BCredit5minTransitionsLast

Severity: variable

Explanation: This fault is caused by "receive B2B credit current value" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369465: fltTcaFcReceiveB2BCredit15minTransitionsLast

Severity: variable

Explanation: This fault is caused by "receive B2B credit current value" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369466: fltTcaFcReceiveB2BCredit1hTransitionsLast

Severity: variable

Explanation: This fault is caused by "receive B2B credit current value" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369467: fltTcaFcReceiveB2BCredit1dTransitionsLast

Severity: variable

Explanation: This fault is caused by "receive B2B credit current value" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369468: fltTcaFcReceiveB2BCredit1wTransitionsLast

Severity: variable

Explanation: This fault is caused by "receive B2B credit current value" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369469: fltTcaFcReceiveB2BCredit1moTransitionsLast

Severity: variable

Explanation: This fault is caused by "receive B2B credit current value" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369470: fltTcaFcReceiveB2BCredit1qtrTransitionsLast

Severity: variable

Explanation: This fault is caused by "receive B2B credit current value" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369471: fltTcaFcReceiveB2BCredit1yearTransitionsLast

Severity: variable

Explanation: This fault is caused by "receive B2B credit current value" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369480: fltTcaFcReceiveB2BCredit5minTransitionsCum

Severity: variable

Explanation: This fault is caused by "receive B2B credit cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369481: fltTcaFcReceiveB2BCredit15minTransitionsCum

Severity: variable

Explanation: This fault is caused by "receive B2B credit cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369482: fltTcaFcReceiveB2BCredit1hTransitionsCum

Severity: variable

Explanation: This fault is caused by "receive B2B credit cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369483: fltTcaFcReceiveB2BCredit1dTransitionsCum

Severity: variable

Explanation: This fault is caused by "receive B2B credit cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369484: fltTcaFcReceiveB2BCredit1wTransitionsCum

Severity: variable

Explanation: This fault is caused by "receive B2B credit cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369485: fltTcaFcReceiveB2BCredit1moTransitionsCum

Severity: variable

Explanation: This fault is caused by "receive B2B credit cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369486: fltTcaFcReceiveB2BCredit1qtrTransitionsCum

Severity: variable

Explanation: This fault is caused by "receive B2B credit cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369487: fltTcaFcReceiveB2BCredit1yearTransitionsCum

Severity: variable

Explanation: This fault is caused by "receive B2B credit cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369488: fltTcaFcReceiveB2BCredit5minTransitionsPer

Severity: variable

Explanation: This fault is caused by "receive B2B credit periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369489: fltTcaFcReceiveB2BCredit15minTransitionsPer

Severity: variable

Explanation: This fault is caused by "receive B2B credit periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369490: fltTcaFcReceiveB2BCredit1hTransitionsPer

Severity: variable

Explanation: This fault is caused by "receive B2B credit periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369491: fltTcaFcReceiveB2BCredit1dTransitionsPer

Severity: variable

Explanation: This fault is caused by "receive B2B credit periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369492: fltTcaFcReceiveB2BCredit1wTransitionsPer

Severity: variable

Explanation: This fault is caused by "receive B2B credit periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369493: fltTcaFcReceiveB2BCredit1moTransitionsPer

Severity: variable

Explanation: This fault is caused by "receive B2B credit periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369494: fltTcaFcReceiveB2BCredit1qtrTransitionsPer

Severity: variable

Explanation: This fault is caused by "receive B2B credit periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369495: fltTcaFcReceiveB2BCredit1yearTransitionsPer

Severity: variable

Explanation: This fault is caused by "receive B2B credit periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369496: fltTcaFcReceiveB2BCredit5minTransitionsMin

Severity: variable

Explanation: This fault is caused by "receive B2B credit minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369497: fltTcaFcReceiveB2BCredit15minTransitionsMin

Severity: variable

Explanation: This fault is caused by "receive B2B credit minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369498: fltTcaFcReceiveB2BCredit1hTransitionsMin

Severity: variable

Explanation: This fault is caused by "receive B2B credit minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369499: fltTcaFcReceiveB2BCredit1dTransitionsMin

Severity: variable

Explanation: This fault is caused by "receive B2B credit minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3695: fltBfdMhKaPBfdCfgCtrl

Severity: warning

Explanation: This fault is caused by a hardware programming failure

Recommended Action: The system will periodically retry to program the hardware. If the failure is due to lack of hardware resources, free up resources by removing or simplifying existing configuration. One of the reasons for lack of hardware resources is exhaustion of VLANs in ToR. These hardware resources can be examined by looking at capacity dashboard under OPERATIONS tab. Please check entry against the number of VLANs in output of command show vlan summary issued at node where fault is generated to check whether it exceeds above advertised node capacity.

F369500: fltTcaFcReceiveB2BCredit1wTransitionsMin

Severity: variable

Explanation: This fault is caused by "receive B2B credit minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369501: fltTcaFcReceiveB2BCredit1moTransitionsMin

Severity: variable

Explanation: This fault is caused by "receive B2B credit minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369502: fltTcaFcReceiveB2BCredit1qtrTransitionsMin

Severity: variable

Explanation: This fault is caused by "receive B2B credit minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369503: fltTcaFcReceiveB2BCredit1yearTransitionsMin

Severity: variable

Explanation: This fault is caused by "receive B2B credit minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369504: fltTcaFcReceiveB2BCredit5minTransitionsMax

Severity: variable

Explanation: This fault is caused by "receive B2B credit maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369505: fltTcaFcReceiveB2BCredit15minTransitionsMax

Severity: variable

Explanation: This fault is caused by "receive B2B credit maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369506: fltTcaFcReceiveB2BCredit1hTransitionsMax

Severity: variable

Explanation: This fault is caused by "receive B2B credit maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369507: fltTcaFcReceiveB2BCredit1dTransitionsMax

Severity: variable

Explanation: This fault is caused by "receive B2B credit maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369508: fltTcaFcReceiveB2BCredit1wTransitionsMax

Severity: variable

Explanation: This fault is caused by "receive B2B credit maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369509: fltTcaFcReceiveB2BCredit1moTransitionsMax

Severity: variable

Explanation: This fault is caused by "receive B2B credit maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369510: fltTcaFcReceiveB2BCredit1qtrTransitionsMax

Severity: variable

Explanation: This fault is caused by "receive B2B credit maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369511: fltTcaFcReceiveB2BCredit1yearTransitionsMax

Severity: variable

Explanation: This fault is caused by "receive B2B credit maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369512: fltTcaFcReceiveB2BCredit5minTransitionsAvg

Severity: variable

Explanation: This fault is caused by "receive B2B credit average value" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369513: fltTcaFcReceiveB2BCredit15minTransitionsAvg

Severity: variable

Explanation: This fault is caused by "receive B2B credit average value" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369514: fltTcaFcReceiveB2BCredit1hTransitionsAvg

Severity: variable

Explanation: This fault is caused by "receive B2B credit average value" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369515: fltTcaFcReceiveB2BCredit1dTransitionsAvg

Severity: variable

Explanation: This fault is caused by "receive B2B credit average value" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369516: fltTcaFcReceiveB2BCredit1wTransitionsAvg

Severity: variable

Explanation: This fault is caused by "receive B2B credit average value" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369517: fltTcaFcReceiveB2BCredit1moTransitionsAvg

Severity: variable

Explanation: This fault is caused by "receive B2B credit average value" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369518: fltTcaFcReceiveB2BCredit1qtrTransitionsAvg

Severity: variable

Explanation: This fault is caused by "receive B2B credit average value" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369519: fltTcaFcReceiveB2BCredit1yearTransitionsAvg

Severity: variable

Explanation: This fault is caused by "receive B2B credit average value" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369544: fltTcaFcReceiveB2BCredit5minTransitionsTr

Severity: variable

Explanation: This fault is caused by "receive B2B credit trend" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369545: fltTcaFcReceiveB2BCredit15minTransitionsTr

Severity: variable

Explanation: This fault is caused by "receive B2B credit trend" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369546: fltTcaFcReceiveB2BCredit1hTransitionsTr

Severity: variable

Explanation: This fault is caused by "receive B2B credit trend" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369547: fltTcaFcReceiveB2BCredit1dTransitionsTr

Severity: variable

Explanation: This fault is caused by "receive B2B credit trend" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369548: fltTcaFcReceiveB2BCredit1wTransitionsTr

Severity: variable

Explanation: This fault is caused by "receive B2B credit trend" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369549: fltTcaFcReceiveB2BCredit1moTransitionsTr

Severity: variable

Explanation: This fault is caused by "receive B2B credit trend" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369550: fltTcaFcReceiveB2BCredit1qtrTransitionsTr

Severity: variable

Explanation: This fault is caused by "receive B2B credit trend" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369551: fltTcaFcReceiveB2BCredit1yearTransitionsTr

Severity: variable

Explanation: This fault is caused by "receive B2B credit trend" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369552: fltTcaFcReceiveB2BCredit5minTransitionsRate

Severity: variable

Explanation: This fault is caused by "receive B2B credit rate" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369553: fltTcaFcReceiveB2BCredit15minTransitionsRate

Severity: variable

Explanation: This fault is caused by "receive B2B credit rate" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369554: fltTcaFcReceiveB2BCredit1hTransitionsRate

Severity: variable

Explanation: This fault is caused by "receive B2B credit rate" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369555: fltTcaFcReceiveB2BCredit1dTransitionsRate

Severity: variable

Explanation: This fault is caused by "receive B2B credit rate" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369556: fltTcaFcReceiveB2BCredit1wTransitionsRate

Severity: variable

Explanation: This fault is caused by "receive B2B credit rate" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369557: fltTcaFcReceiveB2BCredit1moTransitionsRate

Severity: variable

Explanation: This fault is caused by "receive B2B credit rate" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369558: fltTcaFcReceiveB2BCredit1qtrTransitionsRate

Severity: variable

Explanation: This fault is caused by "receive B2B credit rate" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369559: fltTcaFcReceiveB2BCredit1yearTransitionsRate

Severity: variable

Explanation: This fault is caused by "receive B2B credit rate" statistical property crossing threshold level.

Recommended Action: Check the values of "receive B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3696: fltCoopDomCoopEpDampFreeze

Severity: major

Explanation: This fault occurs when one or more EPs are in freeze state

Recommended Action: Try the following action

1. Use "show coop internal info repo ep dampening" command on the spine to see the list of dampened EPs

F369632: fltTcaFcTransmitB2BCredit5minLowpriorityLast

Severity: variable

Explanation: This fault is caused by "transmit B2B credit current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369633: fltTcaFcTransmitB2BCredit15minLowpriorityLast

Severity: variable

Explanation: This fault is caused by "transmit B2B credit current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369634: fltTcaFcTransmitB2BCredit1hLowpriorityLast

Severity: variable

Explanation: This fault is caused by "transmit B2B credit current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369635: fltTcaFcTransmitB2BCredit1dLowpriorityLast

Severity: variable

Explanation: This fault is caused by "transmit B2B credit current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369636: fltTcaFcTransmitB2BCredit1wLowpriorityLast

Severity: variable

Explanation: This fault is caused by "transmit B2B credit current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369637: fltTcaFcTransmitB2BCredit1moLowpriorityLast

Severity: variable

Explanation: This fault is caused by "transmit B2B credit current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369638: fltTcaFcTransmitB2BCredit1qtrLowpriorityLast

Severity: variable

Explanation: This fault is caused by "transmit B2B credit current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369639: fltTcaFcTransmitB2BCredit1yearLowpriorityLast

Severity: variable

Explanation: This fault is caused by "transmit B2B credit current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369648: fltTcaFcTransmitB2BCredit5minLowpriorityCum

Severity: variable

Explanation: This fault is caused by "transmit B2B credit cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369649: fltTcaFcTransmitB2BCredit15minLowpriorityCum

Severity: variable

Explanation: This fault is caused by "transmit B2B credit cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369650: fltTcaFcTransmitB2BCredit1hLowpriorityCum

Severity: variable

Explanation: This fault is caused by "transmit B2B credit cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369651: fltTcaFcTransmitB2BCredit1dLowpriorityCum

Severity: variable

Explanation: This fault is caused by "transmit B2B credit cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369652: fltTcaFcTransmitB2BCredit1wLowpriorityCum

Severity: variable

Explanation: This fault is caused by "transmit B2B credit cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369653: fltTcaFcTransmitB2BCredit1moLowpriorityCum

Severity: variable

Explanation: This fault is caused by "transmit B2B credit cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369654: fltTcaFcTransmitB2BCredit1qtrLowpriorityCum

Severity: variable

Explanation: This fault is caused by "transmit B2B credit cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369655: fltTcaFcTransmitB2BCredit1yearLowpriorityCum

Severity: variable

Explanation: This fault is caused by "transmit B2B credit cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369656: fltTcaFcTransmitB2BCredit5minLowpriorityPer

Severity: variable

Explanation: This fault is caused by "transmit B2B credit periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369657: fltTcaFcTransmitB2BCredit15minLowpriorityPer

Severity: variable

Explanation: This fault is caused by "transmit B2B credit periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369658: fltTcaFcTransmitB2BCredit1hLowpriorityPer

Severity: variable

Explanation: This fault is caused by "transmit B2B credit periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369659: fltTcaFcTransmitB2BCredit1dLowpriorityPer

Severity: variable

Explanation: This fault is caused by "transmit B2B credit periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369660: fltTcaFcTransmitB2BCredit1wLowpriorityPer

Severity: variable

Explanation: This fault is caused by "transmit B2B credit periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369661: fltTcaFcTransmitB2BCredit1moLowpriorityPer

Severity: variable

Explanation: This fault is caused by "transmit B2B credit periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369662: fltTcaFcTransmitB2BCredit1qtrLowpriorityPer

Severity: variable

Explanation: This fault is caused by "transmit B2B credit periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369663: fltTcaFcTransmitB2BCredit1yearLowpriorityPer

Severity: variable

Explanation: This fault is caused by "transmit B2B credit periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369664: fltTcaFcTransmitB2BCredit5minLowpriorityMin

Severity: variable

Explanation: This fault is caused by "transmit B2B credit minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369665: fltTcaFcTransmitB2BCredit15minLowpriorityMin

Severity: variable

Explanation: This fault is caused by "transmit B2B credit minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369666: fltTcaFcTransmitB2BCredit1hLowpriorityMin

Severity: variable

Explanation: This fault is caused by "transmit B2B credit minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369667: fltTcaFcTransmitB2BCredit1dLowpriorityMin

Severity: variable

Explanation: This fault is caused by "transmit B2B credit minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369668: fltTcaFcTransmitB2BCredit1wLowpriorityMin

Severity: variable

Explanation: This fault is caused by "transmit B2B credit minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369669: fltTcaFcTransmitB2BCredit1moLowpriorityMin

Severity: variable

Explanation: This fault is caused by "transmit B2B credit minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369670: fltTcaFcTransmitB2BCredit1qtrLowpriorityMin

Severity: variable

Explanation: This fault is caused by "transmit B2B credit minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369671: fltTcaFcTransmitB2BCredit1yearLowpriorityMin

Severity: variable

Explanation: This fault is caused by "transmit B2B credit minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369672: fltTcaFcTransmitB2BCredit5minLowpriorityMax

Severity: variable

Explanation: This fault is caused by "transmit B2B credit maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369673: fltTcaFcTransmitB2BCredit15minLowpriorityMax

Severity: variable

Explanation: This fault is caused by "transmit B2B credit maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369674: fltTcaFcTransmitB2BCredit1hLowpriorityMax

Severity: variable

Explanation: This fault is caused by "transmit B2B credit maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369675: fltTcaFcTransmitB2BCredit1dLowpriorityMax

Severity: variable

Explanation: This fault is caused by "transmit B2B credit maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369676: fltTcaFcTransmitB2BCredit1wLowpriorityMax

Severity: variable

Explanation: This fault is caused by "transmit B2B credit maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369677: fltTcaFcTransmitB2BCredit1moLowpriorityMax

Severity: variable

Explanation: This fault is caused by "transmit B2B credit maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369678: fltTcaFcTransmitB2BCredit1qtrLowpriorityMax

Severity: variable

Explanation: This fault is caused by "transmit B2B credit maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369679: fltTcaFcTransmitB2BCredit1yearLowpriorityMax

Severity: variable

Explanation: This fault is caused by "transmit B2B credit maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369680: fltTcaFcTransmitB2BCredit5minLowpriorityAvg

Severity: variable

Explanation: This fault is caused by "transmit B2B credit average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369681: fltTcaFcTransmitB2BCredit15minLowpriorityAvg

Severity: variable

Explanation: This fault is caused by "transmit B2B credit average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369682: fltTcaFcTransmitB2BCredit1hLowpriorityAvg

Severity: variable

Explanation: This fault is caused by "transmit B2B credit average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369683: fltTcaFcTransmitB2BCredit1dLowpriorityAvg

Severity: variable

Explanation: This fault is caused by "transmit B2B credit average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369684: fltTcaFcTransmitB2BCredit1wLowpriorityAvg

Severity: variable

Explanation: This fault is caused by "transmit B2B credit average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369685: fltTcaFcTransmitB2BCredit1moLowpriorityAvg

Severity: variable

Explanation: This fault is caused by "transmit B2B credit average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369686: fltTcaFcTransmitB2BCredit1qtrLowpriorityAvg

Severity: variable

Explanation: This fault is caused by "transmit B2B credit average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369687: fltTcaFcTransmitB2BCredit1yearLowpriorityAvg

Severity: variable

Explanation: This fault is caused by "transmit B2B credit average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3697: fltWwnOuiConfigDuplicate

Severity: minor

Explanation: This fault occurs when oui configuration failed

Recommended Action: If you see this fault, take the following actions

1. Delete the entry as it is a duplicate entry

F369712: fltTcaFcTransmitB2BCredit5minLowpriorityTr

Severity: variable

Explanation: This fault is caused by "transmit B2B credit trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369713: fltTcaFcTransmitB2BCredit15minLowpriorityTr

Severity: variable

Explanation: This fault is caused by "transmit B2B credit trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369714: fltTcaFcTransmitB2BCredit1hLowpriorityTr

Severity: variable

Explanation: This fault is caused by "transmit B2B credit trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369715: fltTcaFcTransmitB2BCredit1dLowpriorityTr

Severity: variable

Explanation: This fault is caused by "transmit B2B credit trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369716: fltTcaFcTransmitB2BCredit1wLowpriorityTr

Severity: variable

Explanation: This fault is caused by "transmit B2B credit trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369717: fltTcaFcTransmitB2BCredit1moLowpriorityTr

Severity: variable

Explanation: This fault is caused by "transmit B2B credit trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369718: fltTcaFcTransmitB2BCredit1qtrLowpriorityTr

Severity: variable

Explanation: This fault is caused by "transmit B2B credit trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369719: fltTcaFcTransmitB2BCredit1yearLowpriorityTr

Severity: variable

Explanation: This fault is caused by "transmit B2B credit trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369720: fltTcaFcTransmitB2BCredit5minLowpriorityRate

Severity: variable

Explanation: This fault is caused by "transmit B2B credit rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369721: fltTcaFcTransmitB2BCredit15minLowpriorityRate

Severity: variable

Explanation: This fault is caused by "transmit B2B credit rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369722: fltTcaFcTransmitB2BCredit1hLowpriorityRate

Severity: variable

Explanation: This fault is caused by "transmit B2B credit rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369723: fltTcaFcTransmitB2BCredit1dLowpriorityRate

Severity: variable

Explanation: This fault is caused by "transmit B2B credit rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369724: fltTcaFcTransmitB2BCredit1wLowpriorityRate

Severity: variable

Explanation: This fault is caused by "transmit B2B credit rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369725: fltTcaFcTransmitB2BCredit1moLowpriorityRate

Severity: variable

Explanation: This fault is caused by "transmit B2B credit rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369726: fltTcaFcTransmitB2BCredit1qtrLowpriorityRate

Severity: variable

Explanation: This fault is caused by "transmit B2B credit rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369727: fltTcaFcTransmitB2BCredit1yearLowpriorityRate

Severity: variable

Explanation: This fault is caused by "transmit B2B credit rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3698: fltWwnOuiConfigMaxCount

Severity: minor

Explanation: This fault occurs when oui configuration failed

Recommended Action: If you see this fault, take the following actions

1. Delete the entry as Max count reached

F369800: fltTcaFcTransmitB2BCredit5minRemainingLast

Severity: variable

Explanation: This fault is caused by "transmit B2B credit current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369801: fltTcaFcTransmitB2BCredit15minRemainingLast

Severity: variable

Explanation: This fault is caused by "transmit B2B credit current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369802: fltTcaFcTransmitB2BCredit1hRemainingLast

Severity: variable

Explanation: This fault is caused by "transmit B2B credit current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369803: fltTcaFcTransmitB2BCredit1dRemainingLast

Severity: variable

Explanation: This fault is caused by "transmit B2B credit current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369804: fltTcaFcTransmitB2BCredit1wRemainingLast

Severity: variable

Explanation: This fault is caused by "transmit B2B credit current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369805: fltTcaFcTransmitB2BCredit1moRemainingLast

Severity: variable

Explanation: This fault is caused by "transmit B2B credit current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369806: fltTcaFcTransmitB2BCredit1qtrRemainingLast

Severity: variable

Explanation: This fault is caused by "transmit B2B credit current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369807: fltTcaFcTransmitB2BCredit1yearRemainingLast

Severity: variable

Explanation: This fault is caused by "transmit B2B credit current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369816: fltTcaFcTransmitB2BCredit5minRemainingCum

Severity: variable

Explanation: This fault is caused by "transmit B2B credit cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369817: fltTcaFcTransmitB2BCredit15minRemainingCum

Severity: variable

Explanation: This fault is caused by "transmit B2B credit cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369818: fltTcaFcTransmitB2BCredit1hRemainingCum

Severity: variable

Explanation: This fault is caused by "transmit B2B credit cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369819: fltTcaFcTransmitB2BCredit1dRemainingCum

Severity: variable

Explanation: This fault is caused by "transmit B2B credit cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369820: fltTcaFcTransmitB2BCredit1wRemainingCum

Severity: variable

Explanation: This fault is caused by "transmit B2B credit cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369821: fltTcaFcTransmitB2BCredit1moRemainingCum

Severity: variable

Explanation: This fault is caused by "transmit B2B credit cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369822: fltTcaFcTransmitB2BCredit1qtrRemainingCum

Severity: variable

Explanation: This fault is caused by "transmit B2B credit cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369823: fltTcaFcTransmitB2BCredit1yearRemainingCum

Severity: variable

Explanation: This fault is caused by "transmit B2B credit cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369824: fltTcaFcTransmitB2BCredit5minRemainingPer

Severity: variable

Explanation: This fault is caused by "transmit B2B credit periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369825: fltTcaFcTransmitB2BCredit15minRemainingPer

Severity: variable

Explanation: This fault is caused by "transmit B2B credit periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369826: fltTcaFcTransmitB2BCredit1hRemainingPer

Severity: variable

Explanation: This fault is caused by "transmit B2B credit periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369827: fltTcaFcTransmitB2BCredit1dRemainingPer

Severity: variable

Explanation: This fault is caused by "transmit B2B credit periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369828: fltTcaFcTransmitB2BCredit1wRemainingPer

Severity: variable

Explanation: This fault is caused by "transmit B2B credit periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369829: fltTcaFcTransmitB2BCredit1moRemainingPer

Severity: variable

Explanation: This fault is caused by "transmit B2B credit periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369830: fltTcaFcTransmitB2BCredit1qtrRemainingPer

Severity: variable

Explanation: This fault is caused by "transmit B2B credit periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369831: fltTcaFcTransmitB2BCredit1yearRemainingPer

Severity: variable

Explanation: This fault is caused by "transmit B2B credit periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369832: fltTcaFcTransmitB2BCredit5minRemainingMin

Severity: variable

Explanation: This fault is caused by "transmit B2B credit minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369833: fltTcaFcTransmitB2BCredit15minRemainingMin

Severity: variable

Explanation: This fault is caused by "transmit B2B credit minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369834: fltTcaFcTransmitB2BCredit1hRemainingMin

Severity: variable

Explanation: This fault is caused by "transmit B2B credit minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369835: fltTcaFcTransmitB2BCredit1dRemainingMin

Severity: variable

Explanation: This fault is caused by "transmit B2B credit minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369836: fltTcaFcTransmitB2BCredit1wRemainingMin

Severity: variable

Explanation: This fault is caused by "transmit B2B credit minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369837: fltTcaFcTransmitB2BCredit1moRemainingMin

Severity: variable

Explanation: This fault is caused by "transmit B2B credit minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369838: fltTcaFcTransmitB2BCredit1qtrRemainingMin

Severity: variable

Explanation: This fault is caused by "transmit B2B credit minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369839: fltTcaFcTransmitB2BCredit1yearRemainingMin

Severity: variable

Explanation: This fault is caused by "transmit B2B credit minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369840: fltTcaFcTransmitB2BCredit5minRemainingMax

Severity: variable

Explanation: This fault is caused by "transmit B2B credit maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369841: fltTcaFcTransmitB2BCredit15minRemainingMax

Severity: variable

Explanation: This fault is caused by "transmit B2B credit maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369842: fltTcaFcTransmitB2BCredit1hRemainingMax

Severity: variable

Explanation: This fault is caused by "transmit B2B credit maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369843: fltTcaFcTransmitB2BCredit1dRemainingMax

Severity: variable

Explanation: This fault is caused by "transmit B2B credit maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369844: fltTcaFcTransmitB2BCredit1wRemainingMax

Severity: variable

Explanation: This fault is caused by "transmit B2B credit maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369845: fltTcaFcTransmitB2BCredit1moRemainingMax

Severity: variable

Explanation: This fault is caused by "transmit B2B credit maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369846: fltTcaFcTransmitB2BCredit1qtrRemainingMax

Severity: variable

Explanation: This fault is caused by "transmit B2B credit maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369847: fltTcaFcTransmitB2BCredit1yearRemainingMax

Severity: variable

Explanation: This fault is caused by "transmit B2B credit maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369848: fltTcaFcTransmitB2BCredit5minRemainingAvg

Severity: variable

Explanation: This fault is caused by "transmit B2B credit average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369849: fltTcaFcTransmitB2BCredit15minRemainingAvg

Severity: variable

Explanation: This fault is caused by "transmit B2B credit average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369850: fltTcaFcTransmitB2BCredit1hRemainingAvg

Severity: variable

Explanation: This fault is caused by "transmit B2B credit average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369851: fltTcaFcTransmitB2BCredit1dRemainingAvg

Severity: variable

Explanation: This fault is caused by "transmit B2B credit average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369852: fltTcaFcTransmitB2BCredit1wRemainingAvg

Severity: variable

Explanation: This fault is caused by "transmit B2B credit average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369853: fltTcaFcTransmitB2BCredit1moRemainingAvg

Severity: variable

Explanation: This fault is caused by "transmit B2B credit average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369854: fltTcaFcTransmitB2BCredit1qtrRemainingAvg

Severity: variable

Explanation: This fault is caused by "transmit B2B credit average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369855: fltTcaFcTransmitB2BCredit1yearRemainingAvg

Severity: variable

Explanation: This fault is caused by "transmit B2B credit average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369880: fltTcaFcTransmitB2BCredit5minRemainingTr

Severity: variable

Explanation: This fault is caused by "transmit B2B credit trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369881: fltTcaFcTransmitB2BCredit15minRemainingTr

Severity: variable

Explanation: This fault is caused by "transmit B2B credit trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369882: fltTcaFcTransmitB2BCredit1hRemainingTr

Severity: variable

Explanation: This fault is caused by "transmit B2B credit trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369883: fltTcaFcTransmitB2BCredit1dRemainingTr

Severity: variable

Explanation: This fault is caused by "transmit B2B credit trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369884: fltTcaFcTransmitB2BCredit1wRemainingTr

Severity: variable

Explanation: This fault is caused by "transmit B2B credit trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369885: fltTcaFcTransmitB2BCredit1moRemainingTr

Severity: variable

Explanation: This fault is caused by "transmit B2B credit trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369886: fltTcaFcTransmitB2BCredit1qtrRemainingTr

Severity: variable

Explanation: This fault is caused by "transmit B2B credit trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369887: fltTcaFcTransmitB2BCredit1yearRemainingTr

Severity: variable

Explanation: This fault is caused by "transmit B2B credit trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369888: fltTcaFcTransmitB2BCredit5minRemainingRate

Severity: variable

Explanation: This fault is caused by "transmit B2B credit rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369889: fltTcaFcTransmitB2BCredit15minRemainingRate

Severity: variable

Explanation: This fault is caused by "transmit B2B credit rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369890: fltTcaFcTransmitB2BCredit1hRemainingRate

Severity: variable

Explanation: This fault is caused by "transmit B2B credit rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369891: fltTcaFcTransmitB2BCredit1dRemainingRate

Severity: variable

Explanation: This fault is caused by "transmit B2B credit rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369892: fltTcaFcTransmitB2BCredit1wRemainingRate

Severity: variable

Explanation: This fault is caused by "transmit B2B credit rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369893: fltTcaFcTransmitB2BCredit1moRemainingRate

Severity: variable

Explanation: This fault is caused by "transmit B2B credit rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369894: fltTcaFcTransmitB2BCredit1qtrRemainingRate

Severity: variable

Explanation: This fault is caused by "transmit B2B credit rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369895: fltTcaFcTransmitB2BCredit1yearRemainingRate

Severity: variable

Explanation: This fault is caused by "transmit B2B credit rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3699: fltWwnOuiWwnCfgCtrl

Severity: warning

Explanation: This fault is caused by a hardware programming failure

Recommended Action: The system will periodically retry to program the hardware. If the failure is due to lack of hardware resources, free up resources by removing or simplifying existing configuration. One of the reasons for lack of hardware resources is exhaustion of VLANs in ToR. These hardware resources can be examined by looking at capacity dashboard under OPERATIONS tab. Please check entry against the number of VLANs in output of command show vlan summary issued at node where fault is generated to check whether it exceeds above advertised node capacity.

F369968: fltTcaFcTransmitB2BCredit5minTransitionsLast

Severity: variable

Explanation: This fault is caused by "transmit B2B credit current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369969: fltTcaFcTransmitB2BCredit15minTransitionsLast

Severity: variable

Explanation: This fault is caused by "transmit B2B credit current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369970: fltTcaFcTransmitB2BCredit1hTransitionsLast

Severity: variable

Explanation: This fault is caused by "transmit B2B credit current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369971: fltTcaFcTransmitB2BCredit1dTransitionsLast

Severity: variable

Explanation: This fault is caused by "transmit B2B credit current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369972: fltTcaFcTransmitB2BCredit1wTransitionsLast

Severity: variable

Explanation: This fault is caused by "transmit B2B credit current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369973: fltTcaFcTransmitB2BCredit1moTransitionsLast

Severity: variable

Explanation: This fault is caused by "transmit B2B credit current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369974: fltTcaFcTransmitB2BCredit1qtrTransitionsLast

Severity: variable

Explanation: This fault is caused by "transmit B2B credit current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369975: fltTcaFcTransmitB2BCredit1yearTransitionsLast

Severity: variable

Explanation: This fault is caused by "transmit B2B credit current value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369984: fltTcaFcTransmitB2BCredit5minTransitionsCum

Severity: variable

Explanation: This fault is caused by "transmit B2B credit cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369985: fltTcaFcTransmitB2BCredit15minTransitionsCum

Severity: variable

Explanation: This fault is caused by "transmit B2B credit cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369986: fltTcaFcTransmitB2BCredit1hTransitionsCum

Severity: variable

Explanation: This fault is caused by "transmit B2B credit cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369987: fltTcaFcTransmitB2BCredit1dTransitionsCum

Severity: variable

Explanation: This fault is caused by "transmit B2B credit cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369988: fltTcaFcTransmitB2BCredit1wTransitionsCum

Severity: variable

Explanation: This fault is caused by "transmit B2B credit cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369989: fltTcaFcTransmitB2BCredit1moTransitionsCum

Severity: variable

Explanation: This fault is caused by "transmit B2B credit cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369990: fltTcaFcTransmitB2BCredit1qtrTransitionsCum

Severity: variable

Explanation: This fault is caused by "transmit B2B credit cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369991: fltTcaFcTransmitB2BCredit1yearTransitionsCum

Severity: variable

Explanation: This fault is caused by "transmit B2B credit cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369992: fltTcaFcTransmitB2BCredit5minTransitionsPer

Severity: variable

Explanation: This fault is caused by "transmit B2B credit periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369993: fltTcaFcTransmitB2BCredit15minTransitionsPer

Severity: variable

Explanation: This fault is caused by "transmit B2B credit periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369994: fltTcaFcTransmitB2BCredit1hTransitionsPer

Severity: variable

Explanation: This fault is caused by "transmit B2B credit periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369995: fltTcaFcTransmitB2BCredit1dTransitionsPer

Severity: variable

Explanation: This fault is caused by "transmit B2B credit periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369996: fltTcaFcTransmitB2BCredit1wTransitionsPer

Severity: variable

Explanation: This fault is caused by "transmit B2B credit periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369997: fltTcaFcTransmitB2BCredit1moTransitionsPer

Severity: variable

Explanation: This fault is caused by "transmit B2B credit periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369998: fltTcaFcTransmitB2BCredit1qtrTransitionsPer

Severity: variable

Explanation: This fault is caused by "transmit B2B credit periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F369999: fltTcaFcTransmitB2BCredit1yearTransitionsPer

Severity: variable

Explanation: This fault is caused by "transmit B2B credit periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F370000: fltTcaFcTransmitB2BCredit5minTransitionsMin

Severity: variable

Explanation: This fault is caused by "transmit B2B credit minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F370001: fltTcaFcTransmitB2BCredit15minTransitionsMin

Severity: variable

Explanation: This fault is caused by "transmit B2B credit minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F370002: fltTcaFcTransmitB2BCredit1hTransitionsMin

Severity: variable

Explanation: This fault is caused by "transmit B2B credit minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F370003: fltTcaFcTransmitB2BCredit1dTransitionsMin

Severity: variable

Explanation: This fault is caused by "transmit B2B credit minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F370004: fltTcaFcTransmitB2BCredit1wTransitionsMin

Severity: variable

Explanation: This fault is caused by "transmit B2B credit minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F370005: fltTcaFcTransmitB2BCredit1moTransitionsMin

Severity: variable

Explanation: This fault is caused by "transmit B2B credit minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F370006: fltTcaFcTransmitB2BCredit1qtrTransitionsMin

Severity: variable

Explanation: This fault is caused by "transmit B2B credit minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F370007: fltTcaFcTransmitB2BCredit1yearTransitionsMin

Severity: variable

Explanation: This fault is caused by "transmit B2B credit minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F370008: fltTcaFcTransmitB2BCredit5minTransitionsMax

Severity: variable

Explanation: This fault is caused by "transmit B2B credit maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F370009: fltTcaFcTransmitB2BCredit15minTransitionsMax

Severity: variable

Explanation: This fault is caused by "transmit B2B credit maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F370010: fltTcaFcTransmitB2BCredit1hTransitionsMax

Severity: variable

Explanation: This fault is caused by "transmit B2B credit maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F370011: fltTcaFcTransmitB2BCredit1dTransitionsMax

Severity: variable

Explanation: This fault is caused by "transmit B2B credit maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F370012: fltTcaFcTransmitB2BCredit1wTransitionsMax

Severity: variable

Explanation: This fault is caused by "transmit B2B credit maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F370013: fltTcaFcTransmitB2BCredit1moTransitionsMax

Severity: variable

Explanation: This fault is caused by "transmit B2B credit maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F370014: fltTcaFcTransmitB2BCredit1qtrTransitionsMax

Severity: variable

Explanation: This fault is caused by "transmit B2B credit maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F370015: fltTcaFcTransmitB2BCredit1yearTransitionsMax

Severity: variable

Explanation: This fault is caused by "transmit B2B credit maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F370016: fltTcaFcTransmitB2BCredit5minTransitionsAvg

Severity: variable

Explanation: This fault is caused by "transmit B2B credit average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F370017: fltTcaFcTransmitB2BCredit15minTransitionsAvg

Severity: variable

Explanation: This fault is caused by "transmit B2B credit average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F370018: fltTcaFcTransmitB2BCredit1hTransitionsAvg

Severity: variable

Explanation: This fault is caused by "transmit B2B credit average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F370019: fltTcaFcTransmitB2BCredit1dTransitionsAvg

Severity: variable

Explanation: This fault is caused by "transmit B2B credit average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F370020: fltTcaFcTransmitB2BCredit1wTransitionsAvg

Severity: variable

Explanation: This fault is caused by "transmit B2B credit average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F370021: fltTcaFcTransmitB2BCredit1moTransitionsAvg

Severity: variable

Explanation: This fault is caused by "transmit B2B credit average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F370022: fltTcaFcTransmitB2BCredit1qtrTransitionsAvg

Severity: variable

Explanation: This fault is caused by "transmit B2B credit average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F370023: fltTcaFcTransmitB2BCredit1yearTransitionsAvg

Severity: variable

Explanation: This fault is caused by "transmit B2B credit average value" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F370048: fltTcaFcTransmitB2BCredit5minTransitionsTr

Severity: variable

Explanation: This fault is caused by "transmit B2B credit trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F370049: fltTcaFcTransmitB2BCredit15minTransitionsTr

Severity: variable

Explanation: This fault is caused by "transmit B2B credit trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F370050: fltTcaFcTransmitB2BCredit1hTransitionsTr

Severity: variable

Explanation: This fault is caused by "transmit B2B credit trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F370051: fltTcaFcTransmitB2BCredit1dTransitionsTr

Severity: variable

Explanation: This fault is caused by "transmit B2B credit trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F370052: fltTcaFcTransmitB2BCredit1wTransitionsTr

Severity: variable

Explanation: This fault is caused by "transmit B2B credit trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F370053: fltTcaFcTransmitB2BCredit1moTransitionsTr

Severity: variable

Explanation: This fault is caused by "transmit B2B credit trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F370054: fltTcaFcTransmitB2BCredit1qtrTransitionsTr

Severity: variable

Explanation: This fault is caused by "transmit B2B credit trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F370055: fltTcaFcTransmitB2BCredit1yearTransitionsTr

Severity: variable

Explanation: This fault is caused by "transmit B2B credit trend" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F370056: fltTcaFcTransmitB2BCredit5minTransitionsRate

Severity: variable

Explanation: This fault is caused by "transmit B2B credit rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F370057: fltTcaFcTransmitB2BCredit15minTransitionsRate

Severity: variable

Explanation: This fault is caused by "transmit B2B credit rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F370058: fltTcaFcTransmitB2BCredit1hTransitionsRate

Severity: variable

Explanation: This fault is caused by "transmit B2B credit rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F370059: fltTcaFcTransmitB2BCredit1dTransitionsRate

Severity: variable

Explanation: This fault is caused by "transmit B2B credit rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F370060: fltTcaFcTransmitB2BCredit1wTransitionsRate

Severity: variable

Explanation: This fault is caused by "transmit B2B credit rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F370061: fltTcaFcTransmitB2BCredit1moTransitionsRate

Severity: variable

Explanation: This fault is caused by "transmit B2B credit rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F370062: fltTcaFcTransmitB2BCredit1qtrTransitionsRate

Severity: variable

Explanation: This fault is caused by "transmit B2B credit rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F370063: fltTcaFcTransmitB2BCredit1yearTransitionsRate

Severity: variable

Explanation: This fault is caused by "transmit B2B credit rate" statistical property crossing threshold level.

Recommended Action: Check the values of "transmit B2B credit" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3702: fltFvRsScopeResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3705: fltHcloudAzureInventoryTaskErrorCloudAzureInventoryTaskError

Severity: major

Explanation: This fault occurs when Azure Inventory Task encounters an error while querying cloud provider.

Recommended Action: If you see this fault, take the following actions:

1. Please make sure that CAPIC is able to connect to internet and DNS was properly configured.

2. Please make sure that cloud specific credentials are correct in your configuration and they have the right permissions.

3. If fault still has not cleared, please contact Cisco TAC.

F3712: fltApPluginAppRemovalDeferred

Severity: minor

Explanation: Application removal deferred.

Recommended Action: APP removal keeps getting retried until it is successful. Please raise a TAC case only if this fault does not get cleared within one hour.

F3716: fltFabricRsApplTechSupPSchedResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3717: fltPtpRsProfileResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3718: fltVmmRsUsrCustomAggrLagPolAttResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3719: fltSviIfVmacHwMemFull

Severity: major

Explanation: This fault occurs when the svi vmac change failed due to hardware memory exhaustion

Recommended Action: There are two ways to recover from this fault - either clear the vmac on this svi; or free up some space for additional vmacs by deleting vmacs on other SVIs, and then

1. to retain current vmac address, first clear vmac, submit the change, then re-configure same vmac address and submit the change.

2. to configure new vmac address, configure new address, and submit the change.

F3720: fltSviIfInvalidMacAddr

Severity: major

Explanation: This fault occurs when the svi mac or vmac addr is invalid

Recommended Action: To recover from this fault, try configuring a mac or vmac address that is neither a broadcast nor a multicast address

F3725: fltSegrtSrgbSrgbAllocationFailed

Severity: warning

Explanation: This fault occurs when the mpls segment-routing Global Block allocation fails

Recommended Action: To recover from this fault, try the following actions

1. Verify if there is any other fault which has been raised

2. In case there is a fault for ulib-registration failed

3. unconfigure the segment-routing and reconfigure it

4. if no other fault has been raised or above action did not resolve the issue, generate the show tech-support segment-routing file and contact Cisco TAC.

F3726: fltSegrtSrgbSrgbCleanupFailed

Severity: warning

Explanation: This fault occurs when the mpls segment-routing cleanup of the global block fails

Recommended Action: To recover from this fault, try the following actions

1. Verify if there is any other fault which has been raised

2. In case there is a fault for ulib-registration failed

3. unconfigure the segment-routing and reconfigure it

4. if no other fault has been raised or above action did not resolve the issue, generate the show tech-support segment-routing file and contact Cisco TAC.

F3727: fltSegrtMplsSrUlibRegistrationState

Severity: warning

Explanation: This fault occurs when the mpls SR ulib registration has failed

Recommended Action: To recover from this fault, try the following actions

1. unconfigure the segment-routing and reconfigure it

2. Generate show tech-support segment-routing file and contact Cisco TAC.

F3732: fltL3extRsOutToMdpProvPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F373200: fltTcaEqptBvmacsecrxpkts5minDecryptedPacktesLast

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373201: fltTcaEqptBvmacsecrxpkts15minDecryptedPacktesLast

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373202: fltTcaEqptBvmacsecrxpkts1hDecryptedPacktesLast

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373203: fltTcaEqptBvmacsecrxpkts1dDecryptedPacktesLast

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373204: fltTcaEqptBvmacsecrxpkts1wDecryptedPacktesLast

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373205: fltTcaEqptBvmacsecrxpkts1moDecryptedPacktesLast

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373206: fltTcaEqptBvmacsecrxpkts1qtrDecryptedPacktesLast

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373207: fltTcaEqptBvmacsecrxpkts1yearDecryptedPacktesLast

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373216: fltTcaEqptBvmacsecrxpkts5minDecryptedPacktesCum

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373217: fltTcaEqptBvmacsecrxpkts15minDecryptedPacktesCum

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373218: fltTcaEqptBvmacsecrxpkts1hDecryptedPacktesCum

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373219: fltTcaEqptBvmacsecrxpkts1dDecryptedPacktesCum

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373220: fltTcaEqptBvmacsecrxpkts1wDecryptedPacktesCum

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373221: fltTcaEqptBvmacsecrxpkts1moDecryptedPacktesCum

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373222: fltTcaEqptBvmacsecrxpkts1qtrDecryptedPacktesCum

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373223: fltTcaEqptBvmacsecrxpkts1yearDecryptedPacktesCum

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373224: fltTcaEqptBvmacsecrxpkts5minDecryptedPacktesPer

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373225: fltTcaEqptBvmacsecrxpkts15minDecryptedPacktesPer

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373226: fltTcaEqptBvmacsecrxpkts1hDecryptedPacktesPer

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373227: fltTcaEqptBvmacsecrxpkts1dDecryptedPacktesPer

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373228: fltTcaEqptBvmacsecrxpkts1wDecryptedPacktesPer

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373229: fltTcaEqptBvmacsecrxpkts1moDecryptedPacktesPer

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373230: fltTcaEqptBvmacsecrxpkts1qtrDecryptedPacktesPer

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373231: fltTcaEqptBvmacsecrxpkts1yearDecryptedPacktesPer

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373232: fltTcaEqptBvmacsecrxpkts5minDecryptedPacktesMin

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373233: fltTcaEqptBvmacsecrxpkts15minDecryptedPacktesMin

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373234: fltTcaEqptBvmacsecrxpkts1hDecryptedPacktesMin

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373235: fltTcaEqptBvmacsecrxpkts1dDecryptedPacktesMin

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373236: fltTcaEqptBvmacsecrxpkts1wDecryptedPacktesMin

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373237: fltTcaEqptBvmacsecrxpkts1moDecryptedPacktesMin

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373238: fltTcaEqptBvmacsecrxpkts1qtrDecryptedPacktesMin

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373239: fltTcaEqptBvmacsecrxpkts1yearDecryptedPacktesMin

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373240: fltTcaEqptBvmacsecrxpkts5minDecryptedPacktesMax

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373241: fltTcaEqptBvmacsecrxpkts15minDecryptedPacktesMax

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373242: fltTcaEqptBvmacsecrxpkts1hDecryptedPacktesMax

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373243: fltTcaEqptBvmacsecrxpkts1dDecryptedPacktesMax

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373244: fltTcaEqptBvmacsecrxpkts1wDecryptedPacktesMax

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373245: fltTcaEqptBvmacsecrxpkts1moDecryptedPacktesMax

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373246: fltTcaEqptBvmacsecrxpkts1qtrDecryptedPacktesMax

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373247: fltTcaEqptBvmacsecrxpkts1yearDecryptedPacktesMax

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373248: fltTcaEqptBvmacsecrxpkts5minDecryptedPacktesAvg

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373249: fltTcaEqptBvmacsecrxpkts15minDecryptedPacktesAvg

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373250: fltTcaEqptBvmacsecrxpkts1hDecryptedPacktesAvg

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373251: fltTcaEqptBvmacsecrxpkts1dDecryptedPacktesAvg

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373252: fltTcaEqptBvmacsecrxpkts1wDecryptedPacktesAvg

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373253: fltTcaEqptBvmacsecrxpkts1moDecryptedPacktesAvg

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373254: fltTcaEqptBvmacsecrxpkts1qtrDecryptedPacktesAvg

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373255: fltTcaEqptBvmacsecrxpkts1yearDecryptedPacktesAvg

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373280: fltTcaEqptBvmacsecrxpkts5minDecryptedPacktesTr

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373281: fltTcaEqptBvmacsecrxpkts15minDecryptedPacktesTr

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373282: fltTcaEqptBvmacsecrxpkts1hDecryptedPacktesTr

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373283: fltTcaEqptBvmacsecrxpkts1dDecryptedPacktesTr

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373284: fltTcaEqptBvmacsecrxpkts1wDecryptedPacktesTr

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373285: fltTcaEqptBvmacsecrxpkts1moDecryptedPacktesTr

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373286: fltTcaEqptBvmacsecrxpkts1qtrDecryptedPacktesTr

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373287: fltTcaEqptBvmacsecrxpkts1yearDecryptedPacktesTr

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373288: fltTcaEqptBvmacsecrxpkts5minDecryptedPacktesRate

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373289: fltTcaEqptBvmacsecrxpkts15minDecryptedPacktesRate

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373290: fltTcaEqptBvmacsecrxpkts1hDecryptedPacktesRate

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373291: fltTcaEqptBvmacsecrxpkts1dDecryptedPacktesRate

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373292: fltTcaEqptBvmacsecrxpkts1wDecryptedPacktesRate

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373293: fltTcaEqptBvmacsecrxpkts1moDecryptedPacktesRate

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373294: fltTcaEqptBvmacsecrxpkts1qtrDecryptedPacktesRate

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373295: fltTcaEqptBvmacsecrxpkts1yearDecryptedPacktesRate

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3733: fltMdpRsRemoteCtxDefToMultiDomCtxDefResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F373368: fltTcaEqptBvmacsecrxpkts5minDecryptedPacktesRateLast

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373369: fltTcaEqptBvmacsecrxpkts15minDecryptedPacktesRateLast

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373370: fltTcaEqptBvmacsecrxpkts1hDecryptedPacktesRateLast

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373371: fltTcaEqptBvmacsecrxpkts1dDecryptedPacktesRateLast

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373372: fltTcaEqptBvmacsecrxpkts1wDecryptedPacktesRateLast

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373373: fltTcaEqptBvmacsecrxpkts1moDecryptedPacktesRateLast

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373374: fltTcaEqptBvmacsecrxpkts1qtrDecryptedPacktesRateLast

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373375: fltTcaEqptBvmacsecrxpkts1yearDecryptedPacktesRateLast

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373376: fltTcaEqptBvmacsecrxpkts5minDecryptedPacktesRateMin

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373377: fltTcaEqptBvmacsecrxpkts15minDecryptedPacktesRateMin

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373378: fltTcaEqptBvmacsecrxpkts1hDecryptedPacktesRateMin

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373379: fltTcaEqptBvmacsecrxpkts1dDecryptedPacktesRateMin

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373380: fltTcaEqptBvmacsecrxpkts1wDecryptedPacktesRateMin

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373381: fltTcaEqptBvmacsecrxpkts1moDecryptedPacktesRateMin

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373382: fltTcaEqptBvmacsecrxpkts1qtrDecryptedPacktesRateMin

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373383: fltTcaEqptBvmacsecrxpkts1yearDecryptedPacktesRateMin

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373384: fltTcaEqptBvmacsecrxpkts5minDecryptedPacktesRateMax

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373385: fltTcaEqptBvmacsecrxpkts15minDecryptedPacktesRateMax

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373386: fltTcaEqptBvmacsecrxpkts1hDecryptedPacktesRateMax

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373387: fltTcaEqptBvmacsecrxpkts1dDecryptedPacktesRateMax

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373388: fltTcaEqptBvmacsecrxpkts1wDecryptedPacktesRateMax

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373389: fltTcaEqptBvmacsecrxpkts1moDecryptedPacktesRateMax

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373390: fltTcaEqptBvmacsecrxpkts1qtrDecryptedPacktesRateMax

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373391: fltTcaEqptBvmacsecrxpkts1yearDecryptedPacktesRateMax

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373392: fltTcaEqptBvmacsecrxpkts5minDecryptedPacktesRateAvg

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373393: fltTcaEqptBvmacsecrxpkts15minDecryptedPacktesRateAvg

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373394: fltTcaEqptBvmacsecrxpkts1hDecryptedPacktesRateAvg

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373395: fltTcaEqptBvmacsecrxpkts1dDecryptedPacktesRateAvg

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373396: fltTcaEqptBvmacsecrxpkts1wDecryptedPacktesRateAvg

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373397: fltTcaEqptBvmacsecrxpkts1moDecryptedPacktesRateAvg

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373398: fltTcaEqptBvmacsecrxpkts1qtrDecryptedPacktesRateAvg

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373399: fltTcaEqptBvmacsecrxpkts1yearDecryptedPacktesRateAvg

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3734: fltMdpRsTenantInfoDefToMdpPolDefContResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F373432: fltTcaEqptBvmacsecrxpkts5minDecryptedPacktesRateTr

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373433: fltTcaEqptBvmacsecrxpkts15minDecryptedPacktesRateTr

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373434: fltTcaEqptBvmacsecrxpkts1hDecryptedPacktesRateTr

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373435: fltTcaEqptBvmacsecrxpkts1dDecryptedPacktesRateTr

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373436: fltTcaEqptBvmacsecrxpkts1wDecryptedPacktesRateTr

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373437: fltTcaEqptBvmacsecrxpkts1moDecryptedPacktesRateTr

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373438: fltTcaEqptBvmacsecrxpkts1qtrDecryptedPacktesRateTr

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373439: fltTcaEqptBvmacsecrxpkts1yearDecryptedPacktesRateTr

Severity: variable

Explanation: This fault is caused by "BV Macsec Decrypted packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Decrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373488: fltTcaEqptBvmacsectxpkts5minEncryptedPacktesLast

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373489: fltTcaEqptBvmacsectxpkts15minEncryptedPacktesLast

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373490: fltTcaEqptBvmacsectxpkts1hEncryptedPacktesLast

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373491: fltTcaEqptBvmacsectxpkts1dEncryptedPacktesLast

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373492: fltTcaEqptBvmacsectxpkts1wEncryptedPacktesLast

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373493: fltTcaEqptBvmacsectxpkts1moEncryptedPacktesLast

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373494: fltTcaEqptBvmacsectxpkts1qtrEncryptedPacktesLast

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373495: fltTcaEqptBvmacsectxpkts1yearEncryptedPacktesLast

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373504: fltTcaEqptBvmacsectxpkts5minEncryptedPacktesCum

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373505: fltTcaEqptBvmacsectxpkts15minEncryptedPacktesCum

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373506: fltTcaEqptBvmacsectxpkts1hEncryptedPacktesCum

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373507: fltTcaEqptBvmacsectxpkts1dEncryptedPacktesCum

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373508: fltTcaEqptBvmacsectxpkts1wEncryptedPacktesCum

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373509: fltTcaEqptBvmacsectxpkts1moEncryptedPacktesCum

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373510: fltTcaEqptBvmacsectxpkts1qtrEncryptedPacktesCum

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373511: fltTcaEqptBvmacsectxpkts1yearEncryptedPacktesCum

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373512: fltTcaEqptBvmacsectxpkts5minEncryptedPacktesPer

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373513: fltTcaEqptBvmacsectxpkts15minEncryptedPacktesPer

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373514: fltTcaEqptBvmacsectxpkts1hEncryptedPacktesPer

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373515: fltTcaEqptBvmacsectxpkts1dEncryptedPacktesPer

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373516: fltTcaEqptBvmacsectxpkts1wEncryptedPacktesPer

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373517: fltTcaEqptBvmacsectxpkts1moEncryptedPacktesPer

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373518: fltTcaEqptBvmacsectxpkts1qtrEncryptedPacktesPer

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373519: fltTcaEqptBvmacsectxpkts1yearEncryptedPacktesPer

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373520: fltTcaEqptBvmacsectxpkts5minEncryptedPacktesMin

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373521: fltTcaEqptBvmacsectxpkts15minEncryptedPacktesMin

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373522: fltTcaEqptBvmacsectxpkts1hEncryptedPacktesMin

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373523: fltTcaEqptBvmacsectxpkts1dEncryptedPacktesMin

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373524: fltTcaEqptBvmacsectxpkts1wEncryptedPacktesMin

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373525: fltTcaEqptBvmacsectxpkts1moEncryptedPacktesMin

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373526: fltTcaEqptBvmacsectxpkts1qtrEncryptedPacktesMin

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373527: fltTcaEqptBvmacsectxpkts1yearEncryptedPacktesMin

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373528: fltTcaEqptBvmacsectxpkts5minEncryptedPacktesMax

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373529: fltTcaEqptBvmacsectxpkts15minEncryptedPacktesMax

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373530: fltTcaEqptBvmacsectxpkts1hEncryptedPacktesMax

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373531: fltTcaEqptBvmacsectxpkts1dEncryptedPacktesMax

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373532: fltTcaEqptBvmacsectxpkts1wEncryptedPacktesMax

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373533: fltTcaEqptBvmacsectxpkts1moEncryptedPacktesMax

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373534: fltTcaEqptBvmacsectxpkts1qtrEncryptedPacktesMax

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373535: fltTcaEqptBvmacsectxpkts1yearEncryptedPacktesMax

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373536: fltTcaEqptBvmacsectxpkts5minEncryptedPacktesAvg

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373537: fltTcaEqptBvmacsectxpkts15minEncryptedPacktesAvg

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373538: fltTcaEqptBvmacsectxpkts1hEncryptedPacktesAvg

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373539: fltTcaEqptBvmacsectxpkts1dEncryptedPacktesAvg

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373540: fltTcaEqptBvmacsectxpkts1wEncryptedPacktesAvg

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373541: fltTcaEqptBvmacsectxpkts1moEncryptedPacktesAvg

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373542: fltTcaEqptBvmacsectxpkts1qtrEncryptedPacktesAvg

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373543: fltTcaEqptBvmacsectxpkts1yearEncryptedPacktesAvg

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373568: fltTcaEqptBvmacsectxpkts5minEncryptedPacktesTr

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373569: fltTcaEqptBvmacsectxpkts15minEncryptedPacktesTr

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373570: fltTcaEqptBvmacsectxpkts1hEncryptedPacktesTr

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373571: fltTcaEqptBvmacsectxpkts1dEncryptedPacktesTr

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373572: fltTcaEqptBvmacsectxpkts1wEncryptedPacktesTr

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373573: fltTcaEqptBvmacsectxpkts1moEncryptedPacktesTr

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373574: fltTcaEqptBvmacsectxpkts1qtrEncryptedPacktesTr

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373575: fltTcaEqptBvmacsectxpkts1yearEncryptedPacktesTr

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373576: fltTcaEqptBvmacsectxpkts5minEncryptedPacktesRate

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373577: fltTcaEqptBvmacsectxpkts15minEncryptedPacktesRate

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373578: fltTcaEqptBvmacsectxpkts1hEncryptedPacktesRate

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373579: fltTcaEqptBvmacsectxpkts1dEncryptedPacktesRate

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373580: fltTcaEqptBvmacsectxpkts1wEncryptedPacktesRate

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373581: fltTcaEqptBvmacsectxpkts1moEncryptedPacktesRate

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373582: fltTcaEqptBvmacsectxpkts1qtrEncryptedPacktesRate

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373583: fltTcaEqptBvmacsectxpkts1yearEncryptedPacktesRate

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3736: fltHinventoryRsLbToAzurePublicIPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F373656: fltTcaEqptBvmacsectxpkts5minEncryptedPacktesRateLast

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373657: fltTcaEqptBvmacsectxpkts15minEncryptedPacktesRateLast

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373658: fltTcaEqptBvmacsectxpkts1hEncryptedPacktesRateLast

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373659: fltTcaEqptBvmacsectxpkts1dEncryptedPacktesRateLast

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373660: fltTcaEqptBvmacsectxpkts1wEncryptedPacktesRateLast

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373661: fltTcaEqptBvmacsectxpkts1moEncryptedPacktesRateLast

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373662: fltTcaEqptBvmacsectxpkts1qtrEncryptedPacktesRateLast

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373663: fltTcaEqptBvmacsectxpkts1yearEncryptedPacktesRateLast

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373664: fltTcaEqptBvmacsectxpkts5minEncryptedPacktesRateMin

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373665: fltTcaEqptBvmacsectxpkts15minEncryptedPacktesRateMin

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373666: fltTcaEqptBvmacsectxpkts1hEncryptedPacktesRateMin

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373667: fltTcaEqptBvmacsectxpkts1dEncryptedPacktesRateMin

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373668: fltTcaEqptBvmacsectxpkts1wEncryptedPacktesRateMin

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373669: fltTcaEqptBvmacsectxpkts1moEncryptedPacktesRateMin

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373670: fltTcaEqptBvmacsectxpkts1qtrEncryptedPacktesRateMin

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373671: fltTcaEqptBvmacsectxpkts1yearEncryptedPacktesRateMin

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373672: fltTcaEqptBvmacsectxpkts5minEncryptedPacktesRateMax

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373673: fltTcaEqptBvmacsectxpkts15minEncryptedPacktesRateMax

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373674: fltTcaEqptBvmacsectxpkts1hEncryptedPacktesRateMax

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373675: fltTcaEqptBvmacsectxpkts1dEncryptedPacktesRateMax

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373676: fltTcaEqptBvmacsectxpkts1wEncryptedPacktesRateMax

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373677: fltTcaEqptBvmacsectxpkts1moEncryptedPacktesRateMax

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373678: fltTcaEqptBvmacsectxpkts1qtrEncryptedPacktesRateMax

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373679: fltTcaEqptBvmacsectxpkts1yearEncryptedPacktesRateMax

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373680: fltTcaEqptBvmacsectxpkts5minEncryptedPacktesRateAvg

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373681: fltTcaEqptBvmacsectxpkts15minEncryptedPacktesRateAvg

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373682: fltTcaEqptBvmacsectxpkts1hEncryptedPacktesRateAvg

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373683: fltTcaEqptBvmacsectxpkts1dEncryptedPacktesRateAvg

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373684: fltTcaEqptBvmacsectxpkts1wEncryptedPacktesRateAvg

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373685: fltTcaEqptBvmacsectxpkts1moEncryptedPacktesRateAvg

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373686: fltTcaEqptBvmacsectxpkts1qtrEncryptedPacktesRateAvg

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373687: fltTcaEqptBvmacsectxpkts1yearEncryptedPacktesRateAvg

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3737: fltHinventoryRsNicToAzurePublicIPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F373720: fltTcaEqptBvmacsectxpkts5minEncryptedPacktesRateTr

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373721: fltTcaEqptBvmacsectxpkts15minEncryptedPacktesRateTr

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373722: fltTcaEqptBvmacsectxpkts1hEncryptedPacktesRateTr

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373723: fltTcaEqptBvmacsectxpkts1dEncryptedPacktesRateTr

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373724: fltTcaEqptBvmacsectxpkts1wEncryptedPacktesRateTr

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373725: fltTcaEqptBvmacsectxpkts1moEncryptedPacktesRateTr

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373726: fltTcaEqptBvmacsectxpkts1qtrEncryptedPacktesRateTr

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F373727: fltTcaEqptBvmacsectxpkts1yearEncryptedPacktesRateTr

Severity: variable

Explanation: This fault is caused by "BV Macsec Encrypted packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "BV Macsec Encrypted packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3738: fltHinventoryRsVgwToAzurePublicIPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3741: fltMplsRsLabelPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3742: fltMplsRsIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3744: fltL3extVirtualLIfPDifferentSubnets

Severity: major

Explanation: This fault occurs when under a given l3extVirtualLIfP primary ip and floating ip are not in same subnet.

Recommended Action: If you see this fault, take the following actions:

1. Ensure that primary ip and floating ip are in same subnet

F3745: fltBfdMhAuthPBfdCfgCtrl

Severity: warning

Explanation: This fault is caused by a hardware programming failure

Recommended Action: The system will periodically retry to program the hardware. If the failure is due to lack of hardware resources, free up resources by removing or simplifying existing configuration. One of the reasons for lack of hardware resources is exhaustion of VLANs in ToR. These hardware resources can be examined by looking at capacity dashboard under OPERATIONS tab. Please check entry against the number of VLANs in output of command show vlan summary issued at node where fault is generated to check whether it exceeds above advertised node capacity.

F3753: fltHcloudSubnetNsgAttachOperCloudSubnetNsgAttachOperStateDown

Severity: minor

Explanation: This fault occurs when an erroneous configuration is pushed for Attaching a NSG to a Subnet.

Recommended Action: If you see this fault, take the following actions:

1. Please check the fault message and make necessary changes to the config for creating the Subnet.

2. If fault still has not cleared, please contact Cisco TAC.

F375424: fltTcaFcInputC2Frames5minFbsyLast

Severity: variable

Explanation: This fault is caused by "input fbsy frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375425: fltTcaFcInputC2Frames15minFbsyLast

Severity: variable

Explanation: This fault is caused by "input fbsy frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375426: fltTcaFcInputC2Frames1hFbsyLast

Severity: variable

Explanation: This fault is caused by "input fbsy frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375427: fltTcaFcInputC2Frames1dFbsyLast

Severity: variable

Explanation: This fault is caused by "input fbsy frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375428: fltTcaFcInputC2Frames1wFbsyLast

Severity: variable

Explanation: This fault is caused by "input fbsy frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375429: fltTcaFcInputC2Frames1moFbsyLast

Severity: variable

Explanation: This fault is caused by "input fbsy frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375430: fltTcaFcInputC2Frames1qtrFbsyLast

Severity: variable

Explanation: This fault is caused by "input fbsy frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375431: fltTcaFcInputC2Frames1yearFbsyLast

Severity: variable

Explanation: This fault is caused by "input fbsy frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375440: fltTcaFcInputC2Frames5minFbsyCum

Severity: variable

Explanation: This fault is caused by "input fbsy frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375441: fltTcaFcInputC2Frames15minFbsyCum

Severity: variable

Explanation: This fault is caused by "input fbsy frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375442: fltTcaFcInputC2Frames1hFbsyCum

Severity: variable

Explanation: This fault is caused by "input fbsy frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375443: fltTcaFcInputC2Frames1dFbsyCum

Severity: variable

Explanation: This fault is caused by "input fbsy frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375444: fltTcaFcInputC2Frames1wFbsyCum

Severity: variable

Explanation: This fault is caused by "input fbsy frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375445: fltTcaFcInputC2Frames1moFbsyCum

Severity: variable

Explanation: This fault is caused by "input fbsy frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375446: fltTcaFcInputC2Frames1qtrFbsyCum

Severity: variable

Explanation: This fault is caused by "input fbsy frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375447: fltTcaFcInputC2Frames1yearFbsyCum

Severity: variable

Explanation: This fault is caused by "input fbsy frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375448: fltTcaFcInputC2Frames5minFbsyPer

Severity: variable

Explanation: This fault is caused by "input fbsy frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375449: fltTcaFcInputC2Frames15minFbsyPer

Severity: variable

Explanation: This fault is caused by "input fbsy frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375450: fltTcaFcInputC2Frames1hFbsyPer

Severity: variable

Explanation: This fault is caused by "input fbsy frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375451: fltTcaFcInputC2Frames1dFbsyPer

Severity: variable

Explanation: This fault is caused by "input fbsy frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375452: fltTcaFcInputC2Frames1wFbsyPer

Severity: variable

Explanation: This fault is caused by "input fbsy frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375453: fltTcaFcInputC2Frames1moFbsyPer

Severity: variable

Explanation: This fault is caused by "input fbsy frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375454: fltTcaFcInputC2Frames1qtrFbsyPer

Severity: variable

Explanation: This fault is caused by "input fbsy frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375455: fltTcaFcInputC2Frames1yearFbsyPer

Severity: variable

Explanation: This fault is caused by "input fbsy frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375456: fltTcaFcInputC2Frames5minFbsyMin

Severity: variable

Explanation: This fault is caused by "input fbsy frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375457: fltTcaFcInputC2Frames15minFbsyMin

Severity: variable

Explanation: This fault is caused by "input fbsy frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375458: fltTcaFcInputC2Frames1hFbsyMin

Severity: variable

Explanation: This fault is caused by "input fbsy frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375459: fltTcaFcInputC2Frames1dFbsyMin

Severity: variable

Explanation: This fault is caused by "input fbsy frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375460: fltTcaFcInputC2Frames1wFbsyMin

Severity: variable

Explanation: This fault is caused by "input fbsy frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375461: fltTcaFcInputC2Frames1moFbsyMin

Severity: variable

Explanation: This fault is caused by "input fbsy frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375462: fltTcaFcInputC2Frames1qtrFbsyMin

Severity: variable

Explanation: This fault is caused by "input fbsy frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375463: fltTcaFcInputC2Frames1yearFbsyMin

Severity: variable

Explanation: This fault is caused by "input fbsy frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375464: fltTcaFcInputC2Frames5minFbsyMax

Severity: variable

Explanation: This fault is caused by "input fbsy frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375465: fltTcaFcInputC2Frames15minFbsyMax

Severity: variable

Explanation: This fault is caused by "input fbsy frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375466: fltTcaFcInputC2Frames1hFbsyMax

Severity: variable

Explanation: This fault is caused by "input fbsy frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375467: fltTcaFcInputC2Frames1dFbsyMax

Severity: variable

Explanation: This fault is caused by "input fbsy frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375468: fltTcaFcInputC2Frames1wFbsyMax

Severity: variable

Explanation: This fault is caused by "input fbsy frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375469: fltTcaFcInputC2Frames1moFbsyMax

Severity: variable

Explanation: This fault is caused by "input fbsy frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375470: fltTcaFcInputC2Frames1qtrFbsyMax

Severity: variable

Explanation: This fault is caused by "input fbsy frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375471: fltTcaFcInputC2Frames1yearFbsyMax

Severity: variable

Explanation: This fault is caused by "input fbsy frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375472: fltTcaFcInputC2Frames5minFbsyAvg

Severity: variable

Explanation: This fault is caused by "input fbsy frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375473: fltTcaFcInputC2Frames15minFbsyAvg

Severity: variable

Explanation: This fault is caused by "input fbsy frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375474: fltTcaFcInputC2Frames1hFbsyAvg

Severity: variable

Explanation: This fault is caused by "input fbsy frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375475: fltTcaFcInputC2Frames1dFbsyAvg

Severity: variable

Explanation: This fault is caused by "input fbsy frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375476: fltTcaFcInputC2Frames1wFbsyAvg

Severity: variable

Explanation: This fault is caused by "input fbsy frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375477: fltTcaFcInputC2Frames1moFbsyAvg

Severity: variable

Explanation: This fault is caused by "input fbsy frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375478: fltTcaFcInputC2Frames1qtrFbsyAvg

Severity: variable

Explanation: This fault is caused by "input fbsy frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375479: fltTcaFcInputC2Frames1yearFbsyAvg

Severity: variable

Explanation: This fault is caused by "input fbsy frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375504: fltTcaFcInputC2Frames5minFbsyTr

Severity: variable

Explanation: This fault is caused by "input fbsy frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375505: fltTcaFcInputC2Frames15minFbsyTr

Severity: variable

Explanation: This fault is caused by "input fbsy frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375506: fltTcaFcInputC2Frames1hFbsyTr

Severity: variable

Explanation: This fault is caused by "input fbsy frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375507: fltTcaFcInputC2Frames1dFbsyTr

Severity: variable

Explanation: This fault is caused by "input fbsy frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375508: fltTcaFcInputC2Frames1wFbsyTr

Severity: variable

Explanation: This fault is caused by "input fbsy frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375509: fltTcaFcInputC2Frames1moFbsyTr

Severity: variable

Explanation: This fault is caused by "input fbsy frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375510: fltTcaFcInputC2Frames1qtrFbsyTr

Severity: variable

Explanation: This fault is caused by "input fbsy frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375511: fltTcaFcInputC2Frames1yearFbsyTr

Severity: variable

Explanation: This fault is caused by "input fbsy frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375512: fltTcaFcInputC2Frames5minFbsyRate

Severity: variable

Explanation: This fault is caused by "input fbsy frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375513: fltTcaFcInputC2Frames15minFbsyRate

Severity: variable

Explanation: This fault is caused by "input fbsy frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375514: fltTcaFcInputC2Frames1hFbsyRate

Severity: variable

Explanation: This fault is caused by "input fbsy frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375515: fltTcaFcInputC2Frames1dFbsyRate

Severity: variable

Explanation: This fault is caused by "input fbsy frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375516: fltTcaFcInputC2Frames1wFbsyRate

Severity: variable

Explanation: This fault is caused by "input fbsy frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375517: fltTcaFcInputC2Frames1moFbsyRate

Severity: variable

Explanation: This fault is caused by "input fbsy frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375518: fltTcaFcInputC2Frames1qtrFbsyRate

Severity: variable

Explanation: This fault is caused by "input fbsy frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375519: fltTcaFcInputC2Frames1yearFbsyRate

Severity: variable

Explanation: This fault is caused by "input fbsy frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input fbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375592: fltTcaFcInputC2Frames5minFrjtLast

Severity: variable

Explanation: This fault is caused by "input frjt frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375593: fltTcaFcInputC2Frames15minFrjtLast

Severity: variable

Explanation: This fault is caused by "input frjt frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375594: fltTcaFcInputC2Frames1hFrjtLast

Severity: variable

Explanation: This fault is caused by "input frjt frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375595: fltTcaFcInputC2Frames1dFrjtLast

Severity: variable

Explanation: This fault is caused by "input frjt frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375596: fltTcaFcInputC2Frames1wFrjtLast

Severity: variable

Explanation: This fault is caused by "input frjt frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375597: fltTcaFcInputC2Frames1moFrjtLast

Severity: variable

Explanation: This fault is caused by "input frjt frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375598: fltTcaFcInputC2Frames1qtrFrjtLast

Severity: variable

Explanation: This fault is caused by "input frjt frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375599: fltTcaFcInputC2Frames1yearFrjtLast

Severity: variable

Explanation: This fault is caused by "input frjt frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375608: fltTcaFcInputC2Frames5minFrjtCum

Severity: variable

Explanation: This fault is caused by "input frjt frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375609: fltTcaFcInputC2Frames15minFrjtCum

Severity: variable

Explanation: This fault is caused by "input frjt frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375610: fltTcaFcInputC2Frames1hFrjtCum

Severity: variable

Explanation: This fault is caused by "input frjt frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375611: fltTcaFcInputC2Frames1dFrjtCum

Severity: variable

Explanation: This fault is caused by "input frjt frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375612: fltTcaFcInputC2Frames1wFrjtCum

Severity: variable

Explanation: This fault is caused by "input frjt frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375613: fltTcaFcInputC2Frames1moFrjtCum

Severity: variable

Explanation: This fault is caused by "input frjt frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375614: fltTcaFcInputC2Frames1qtrFrjtCum

Severity: variable

Explanation: This fault is caused by "input frjt frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375615: fltTcaFcInputC2Frames1yearFrjtCum

Severity: variable

Explanation: This fault is caused by "input frjt frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375616: fltTcaFcInputC2Frames5minFrjtPer

Severity: variable

Explanation: This fault is caused by "input frjt frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375617: fltTcaFcInputC2Frames15minFrjtPer

Severity: variable

Explanation: This fault is caused by "input frjt frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375618: fltTcaFcInputC2Frames1hFrjtPer

Severity: variable

Explanation: This fault is caused by "input frjt frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375619: fltTcaFcInputC2Frames1dFrjtPer

Severity: variable

Explanation: This fault is caused by "input frjt frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375620: fltTcaFcInputC2Frames1wFrjtPer

Severity: variable

Explanation: This fault is caused by "input frjt frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375621: fltTcaFcInputC2Frames1moFrjtPer

Severity: variable

Explanation: This fault is caused by "input frjt frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375622: fltTcaFcInputC2Frames1qtrFrjtPer

Severity: variable

Explanation: This fault is caused by "input frjt frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375623: fltTcaFcInputC2Frames1yearFrjtPer

Severity: variable

Explanation: This fault is caused by "input frjt frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375624: fltTcaFcInputC2Frames5minFrjtMin

Severity: variable

Explanation: This fault is caused by "input frjt frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375625: fltTcaFcInputC2Frames15minFrjtMin

Severity: variable

Explanation: This fault is caused by "input frjt frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375626: fltTcaFcInputC2Frames1hFrjtMin

Severity: variable

Explanation: This fault is caused by "input frjt frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375627: fltTcaFcInputC2Frames1dFrjtMin

Severity: variable

Explanation: This fault is caused by "input frjt frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375628: fltTcaFcInputC2Frames1wFrjtMin

Severity: variable

Explanation: This fault is caused by "input frjt frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375629: fltTcaFcInputC2Frames1moFrjtMin

Severity: variable

Explanation: This fault is caused by "input frjt frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375630: fltTcaFcInputC2Frames1qtrFrjtMin

Severity: variable

Explanation: This fault is caused by "input frjt frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375631: fltTcaFcInputC2Frames1yearFrjtMin

Severity: variable

Explanation: This fault is caused by "input frjt frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375632: fltTcaFcInputC2Frames5minFrjtMax

Severity: variable

Explanation: This fault is caused by "input frjt frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375633: fltTcaFcInputC2Frames15minFrjtMax

Severity: variable

Explanation: This fault is caused by "input frjt frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375634: fltTcaFcInputC2Frames1hFrjtMax

Severity: variable

Explanation: This fault is caused by "input frjt frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375635: fltTcaFcInputC2Frames1dFrjtMax

Severity: variable

Explanation: This fault is caused by "input frjt frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375636: fltTcaFcInputC2Frames1wFrjtMax

Severity: variable

Explanation: This fault is caused by "input frjt frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375637: fltTcaFcInputC2Frames1moFrjtMax

Severity: variable

Explanation: This fault is caused by "input frjt frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375638: fltTcaFcInputC2Frames1qtrFrjtMax

Severity: variable

Explanation: This fault is caused by "input frjt frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375639: fltTcaFcInputC2Frames1yearFrjtMax

Severity: variable

Explanation: This fault is caused by "input frjt frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375640: fltTcaFcInputC2Frames5minFrjtAvg

Severity: variable

Explanation: This fault is caused by "input frjt frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375641: fltTcaFcInputC2Frames15minFrjtAvg

Severity: variable

Explanation: This fault is caused by "input frjt frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375642: fltTcaFcInputC2Frames1hFrjtAvg

Severity: variable

Explanation: This fault is caused by "input frjt frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375643: fltTcaFcInputC2Frames1dFrjtAvg

Severity: variable

Explanation: This fault is caused by "input frjt frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375644: fltTcaFcInputC2Frames1wFrjtAvg

Severity: variable

Explanation: This fault is caused by "input frjt frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375645: fltTcaFcInputC2Frames1moFrjtAvg

Severity: variable

Explanation: This fault is caused by "input frjt frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375646: fltTcaFcInputC2Frames1qtrFrjtAvg

Severity: variable

Explanation: This fault is caused by "input frjt frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375647: fltTcaFcInputC2Frames1yearFrjtAvg

Severity: variable

Explanation: This fault is caused by "input frjt frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375672: fltTcaFcInputC2Frames5minFrjtTr

Severity: variable

Explanation: This fault is caused by "input frjt frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375673: fltTcaFcInputC2Frames15minFrjtTr

Severity: variable

Explanation: This fault is caused by "input frjt frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375674: fltTcaFcInputC2Frames1hFrjtTr

Severity: variable

Explanation: This fault is caused by "input frjt frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375675: fltTcaFcInputC2Frames1dFrjtTr

Severity: variable

Explanation: This fault is caused by "input frjt frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375676: fltTcaFcInputC2Frames1wFrjtTr

Severity: variable

Explanation: This fault is caused by "input frjt frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375677: fltTcaFcInputC2Frames1moFrjtTr

Severity: variable

Explanation: This fault is caused by "input frjt frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375678: fltTcaFcInputC2Frames1qtrFrjtTr

Severity: variable

Explanation: This fault is caused by "input frjt frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375679: fltTcaFcInputC2Frames1yearFrjtTr

Severity: variable

Explanation: This fault is caused by "input frjt frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375680: fltTcaFcInputC2Frames5minFrjtRate

Severity: variable

Explanation: This fault is caused by "input frjt frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375681: fltTcaFcInputC2Frames15minFrjtRate

Severity: variable

Explanation: This fault is caused by "input frjt frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375682: fltTcaFcInputC2Frames1hFrjtRate

Severity: variable

Explanation: This fault is caused by "input frjt frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375683: fltTcaFcInputC2Frames1dFrjtRate

Severity: variable

Explanation: This fault is caused by "input frjt frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375684: fltTcaFcInputC2Frames1wFrjtRate

Severity: variable

Explanation: This fault is caused by "input frjt frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375685: fltTcaFcInputC2Frames1moFrjtRate

Severity: variable

Explanation: This fault is caused by "input frjt frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375686: fltTcaFcInputC2Frames1qtrFrjtRate

Severity: variable

Explanation: This fault is caused by "input frjt frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375687: fltTcaFcInputC2Frames1yearFrjtRate

Severity: variable

Explanation: This fault is caused by "input frjt frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input frjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375760: fltTcaFcInputC2Frames5minPbsyLast

Severity: variable

Explanation: This fault is caused by "input pbsy frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375761: fltTcaFcInputC2Frames15minPbsyLast

Severity: variable

Explanation: This fault is caused by "input pbsy frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375762: fltTcaFcInputC2Frames1hPbsyLast

Severity: variable

Explanation: This fault is caused by "input pbsy frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375763: fltTcaFcInputC2Frames1dPbsyLast

Severity: variable

Explanation: This fault is caused by "input pbsy frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375764: fltTcaFcInputC2Frames1wPbsyLast

Severity: variable

Explanation: This fault is caused by "input pbsy frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375765: fltTcaFcInputC2Frames1moPbsyLast

Severity: variable

Explanation: This fault is caused by "input pbsy frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375766: fltTcaFcInputC2Frames1qtrPbsyLast

Severity: variable

Explanation: This fault is caused by "input pbsy frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375767: fltTcaFcInputC2Frames1yearPbsyLast

Severity: variable

Explanation: This fault is caused by "input pbsy frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375776: fltTcaFcInputC2Frames5minPbsyCum

Severity: variable

Explanation: This fault is caused by "input pbsy frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375777: fltTcaFcInputC2Frames15minPbsyCum

Severity: variable

Explanation: This fault is caused by "input pbsy frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375778: fltTcaFcInputC2Frames1hPbsyCum

Severity: variable

Explanation: This fault is caused by "input pbsy frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375779: fltTcaFcInputC2Frames1dPbsyCum

Severity: variable

Explanation: This fault is caused by "input pbsy frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375780: fltTcaFcInputC2Frames1wPbsyCum

Severity: variable

Explanation: This fault is caused by "input pbsy frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375781: fltTcaFcInputC2Frames1moPbsyCum

Severity: variable

Explanation: This fault is caused by "input pbsy frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375782: fltTcaFcInputC2Frames1qtrPbsyCum

Severity: variable

Explanation: This fault is caused by "input pbsy frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375783: fltTcaFcInputC2Frames1yearPbsyCum

Severity: variable

Explanation: This fault is caused by "input pbsy frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375784: fltTcaFcInputC2Frames5minPbsyPer

Severity: variable

Explanation: This fault is caused by "input pbsy frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375785: fltTcaFcInputC2Frames15minPbsyPer

Severity: variable

Explanation: This fault is caused by "input pbsy frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375786: fltTcaFcInputC2Frames1hPbsyPer

Severity: variable

Explanation: This fault is caused by "input pbsy frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375787: fltTcaFcInputC2Frames1dPbsyPer

Severity: variable

Explanation: This fault is caused by "input pbsy frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375788: fltTcaFcInputC2Frames1wPbsyPer

Severity: variable

Explanation: This fault is caused by "input pbsy frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375789: fltTcaFcInputC2Frames1moPbsyPer

Severity: variable

Explanation: This fault is caused by "input pbsy frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375790: fltTcaFcInputC2Frames1qtrPbsyPer

Severity: variable

Explanation: This fault is caused by "input pbsy frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375791: fltTcaFcInputC2Frames1yearPbsyPer

Severity: variable

Explanation: This fault is caused by "input pbsy frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375792: fltTcaFcInputC2Frames5minPbsyMin

Severity: variable

Explanation: This fault is caused by "input pbsy frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375793: fltTcaFcInputC2Frames15minPbsyMin

Severity: variable

Explanation: This fault is caused by "input pbsy frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375794: fltTcaFcInputC2Frames1hPbsyMin

Severity: variable

Explanation: This fault is caused by "input pbsy frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375795: fltTcaFcInputC2Frames1dPbsyMin

Severity: variable

Explanation: This fault is caused by "input pbsy frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375796: fltTcaFcInputC2Frames1wPbsyMin

Severity: variable

Explanation: This fault is caused by "input pbsy frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375797: fltTcaFcInputC2Frames1moPbsyMin

Severity: variable

Explanation: This fault is caused by "input pbsy frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375798: fltTcaFcInputC2Frames1qtrPbsyMin

Severity: variable

Explanation: This fault is caused by "input pbsy frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375799: fltTcaFcInputC2Frames1yearPbsyMin

Severity: variable

Explanation: This fault is caused by "input pbsy frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375800: fltTcaFcInputC2Frames5minPbsyMax

Severity: variable

Explanation: This fault is caused by "input pbsy frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375801: fltTcaFcInputC2Frames15minPbsyMax

Severity: variable

Explanation: This fault is caused by "input pbsy frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375802: fltTcaFcInputC2Frames1hPbsyMax

Severity: variable

Explanation: This fault is caused by "input pbsy frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375803: fltTcaFcInputC2Frames1dPbsyMax

Severity: variable

Explanation: This fault is caused by "input pbsy frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375804: fltTcaFcInputC2Frames1wPbsyMax

Severity: variable

Explanation: This fault is caused by "input pbsy frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375805: fltTcaFcInputC2Frames1moPbsyMax

Severity: variable

Explanation: This fault is caused by "input pbsy frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375806: fltTcaFcInputC2Frames1qtrPbsyMax

Severity: variable

Explanation: This fault is caused by "input pbsy frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375807: fltTcaFcInputC2Frames1yearPbsyMax

Severity: variable

Explanation: This fault is caused by "input pbsy frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375808: fltTcaFcInputC2Frames5minPbsyAvg

Severity: variable

Explanation: This fault is caused by "input pbsy frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375809: fltTcaFcInputC2Frames15minPbsyAvg

Severity: variable

Explanation: This fault is caused by "input pbsy frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375810: fltTcaFcInputC2Frames1hPbsyAvg

Severity: variable

Explanation: This fault is caused by "input pbsy frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375811: fltTcaFcInputC2Frames1dPbsyAvg

Severity: variable

Explanation: This fault is caused by "input pbsy frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375812: fltTcaFcInputC2Frames1wPbsyAvg

Severity: variable

Explanation: This fault is caused by "input pbsy frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375813: fltTcaFcInputC2Frames1moPbsyAvg

Severity: variable

Explanation: This fault is caused by "input pbsy frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375814: fltTcaFcInputC2Frames1qtrPbsyAvg

Severity: variable

Explanation: This fault is caused by "input pbsy frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375815: fltTcaFcInputC2Frames1yearPbsyAvg

Severity: variable

Explanation: This fault is caused by "input pbsy frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375840: fltTcaFcInputC2Frames5minPbsyTr

Severity: variable

Explanation: This fault is caused by "input pbsy frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375841: fltTcaFcInputC2Frames15minPbsyTr

Severity: variable

Explanation: This fault is caused by "input pbsy frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375842: fltTcaFcInputC2Frames1hPbsyTr

Severity: variable

Explanation: This fault is caused by "input pbsy frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375843: fltTcaFcInputC2Frames1dPbsyTr

Severity: variable

Explanation: This fault is caused by "input pbsy frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375844: fltTcaFcInputC2Frames1wPbsyTr

Severity: variable

Explanation: This fault is caused by "input pbsy frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375845: fltTcaFcInputC2Frames1moPbsyTr

Severity: variable

Explanation: This fault is caused by "input pbsy frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375846: fltTcaFcInputC2Frames1qtrPbsyTr

Severity: variable

Explanation: This fault is caused by "input pbsy frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375847: fltTcaFcInputC2Frames1yearPbsyTr

Severity: variable

Explanation: This fault is caused by "input pbsy frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375848: fltTcaFcInputC2Frames5minPbsyRate

Severity: variable

Explanation: This fault is caused by "input pbsy frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375849: fltTcaFcInputC2Frames15minPbsyRate

Severity: variable

Explanation: This fault is caused by "input pbsy frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375850: fltTcaFcInputC2Frames1hPbsyRate

Severity: variable

Explanation: This fault is caused by "input pbsy frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375851: fltTcaFcInputC2Frames1dPbsyRate

Severity: variable

Explanation: This fault is caused by "input pbsy frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375852: fltTcaFcInputC2Frames1wPbsyRate

Severity: variable

Explanation: This fault is caused by "input pbsy frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375853: fltTcaFcInputC2Frames1moPbsyRate

Severity: variable

Explanation: This fault is caused by "input pbsy frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375854: fltTcaFcInputC2Frames1qtrPbsyRate

Severity: variable

Explanation: This fault is caused by "input pbsy frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375855: fltTcaFcInputC2Frames1yearPbsyRate

Severity: variable

Explanation: This fault is caused by "input pbsy frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input pbsy frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375928: fltTcaFcInputC2Frames5minPrjtLast

Severity: variable

Explanation: This fault is caused by "input prjt frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375929: fltTcaFcInputC2Frames15minPrjtLast

Severity: variable

Explanation: This fault is caused by "input prjt frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375930: fltTcaFcInputC2Frames1hPrjtLast

Severity: variable

Explanation: This fault is caused by "input prjt frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375931: fltTcaFcInputC2Frames1dPrjtLast

Severity: variable

Explanation: This fault is caused by "input prjt frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375932: fltTcaFcInputC2Frames1wPrjtLast

Severity: variable

Explanation: This fault is caused by "input prjt frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375933: fltTcaFcInputC2Frames1moPrjtLast

Severity: variable

Explanation: This fault is caused by "input prjt frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375934: fltTcaFcInputC2Frames1qtrPrjtLast

Severity: variable

Explanation: This fault is caused by "input prjt frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375935: fltTcaFcInputC2Frames1yearPrjtLast

Severity: variable

Explanation: This fault is caused by "input prjt frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375944: fltTcaFcInputC2Frames5minPrjtCum

Severity: variable

Explanation: This fault is caused by "input prjt frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375945: fltTcaFcInputC2Frames15minPrjtCum

Severity: variable

Explanation: This fault is caused by "input prjt frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375946: fltTcaFcInputC2Frames1hPrjtCum

Severity: variable

Explanation: This fault is caused by "input prjt frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375947: fltTcaFcInputC2Frames1dPrjtCum

Severity: variable

Explanation: This fault is caused by "input prjt frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375948: fltTcaFcInputC2Frames1wPrjtCum

Severity: variable

Explanation: This fault is caused by "input prjt frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375949: fltTcaFcInputC2Frames1moPrjtCum

Severity: variable

Explanation: This fault is caused by "input prjt frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375950: fltTcaFcInputC2Frames1qtrPrjtCum

Severity: variable

Explanation: This fault is caused by "input prjt frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375951: fltTcaFcInputC2Frames1yearPrjtCum

Severity: variable

Explanation: This fault is caused by "input prjt frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375952: fltTcaFcInputC2Frames5minPrjtPer

Severity: variable

Explanation: This fault is caused by "input prjt frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375953: fltTcaFcInputC2Frames15minPrjtPer

Severity: variable

Explanation: This fault is caused by "input prjt frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375954: fltTcaFcInputC2Frames1hPrjtPer

Severity: variable

Explanation: This fault is caused by "input prjt frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375955: fltTcaFcInputC2Frames1dPrjtPer

Severity: variable

Explanation: This fault is caused by "input prjt frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375956: fltTcaFcInputC2Frames1wPrjtPer

Severity: variable

Explanation: This fault is caused by "input prjt frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375957: fltTcaFcInputC2Frames1moPrjtPer

Severity: variable

Explanation: This fault is caused by "input prjt frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375958: fltTcaFcInputC2Frames1qtrPrjtPer

Severity: variable

Explanation: This fault is caused by "input prjt frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375959: fltTcaFcInputC2Frames1yearPrjtPer

Severity: variable

Explanation: This fault is caused by "input prjt frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375960: fltTcaFcInputC2Frames5minPrjtMin

Severity: variable

Explanation: This fault is caused by "input prjt frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375961: fltTcaFcInputC2Frames15minPrjtMin

Severity: variable

Explanation: This fault is caused by "input prjt frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375962: fltTcaFcInputC2Frames1hPrjtMin

Severity: variable

Explanation: This fault is caused by "input prjt frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375963: fltTcaFcInputC2Frames1dPrjtMin

Severity: variable

Explanation: This fault is caused by "input prjt frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375964: fltTcaFcInputC2Frames1wPrjtMin

Severity: variable

Explanation: This fault is caused by "input prjt frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375965: fltTcaFcInputC2Frames1moPrjtMin

Severity: variable

Explanation: This fault is caused by "input prjt frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375966: fltTcaFcInputC2Frames1qtrPrjtMin

Severity: variable

Explanation: This fault is caused by "input prjt frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375967: fltTcaFcInputC2Frames1yearPrjtMin

Severity: variable

Explanation: This fault is caused by "input prjt frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375968: fltTcaFcInputC2Frames5minPrjtMax

Severity: variable

Explanation: This fault is caused by "input prjt frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375969: fltTcaFcInputC2Frames15minPrjtMax

Severity: variable

Explanation: This fault is caused by "input prjt frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375970: fltTcaFcInputC2Frames1hPrjtMax

Severity: variable

Explanation: This fault is caused by "input prjt frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375971: fltTcaFcInputC2Frames1dPrjtMax

Severity: variable

Explanation: This fault is caused by "input prjt frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375972: fltTcaFcInputC2Frames1wPrjtMax

Severity: variable

Explanation: This fault is caused by "input prjt frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375973: fltTcaFcInputC2Frames1moPrjtMax

Severity: variable

Explanation: This fault is caused by "input prjt frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375974: fltTcaFcInputC2Frames1qtrPrjtMax

Severity: variable

Explanation: This fault is caused by "input prjt frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375975: fltTcaFcInputC2Frames1yearPrjtMax

Severity: variable

Explanation: This fault is caused by "input prjt frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375976: fltTcaFcInputC2Frames5minPrjtAvg

Severity: variable

Explanation: This fault is caused by "input prjt frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375977: fltTcaFcInputC2Frames15minPrjtAvg

Severity: variable

Explanation: This fault is caused by "input prjt frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375978: fltTcaFcInputC2Frames1hPrjtAvg

Severity: variable

Explanation: This fault is caused by "input prjt frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375979: fltTcaFcInputC2Frames1dPrjtAvg

Severity: variable

Explanation: This fault is caused by "input prjt frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375980: fltTcaFcInputC2Frames1wPrjtAvg

Severity: variable

Explanation: This fault is caused by "input prjt frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375981: fltTcaFcInputC2Frames1moPrjtAvg

Severity: variable

Explanation: This fault is caused by "input prjt frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375982: fltTcaFcInputC2Frames1qtrPrjtAvg

Severity: variable

Explanation: This fault is caused by "input prjt frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F375983: fltTcaFcInputC2Frames1yearPrjtAvg

Severity: variable

Explanation: This fault is caused by "input prjt frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376008: fltTcaFcInputC2Frames5minPrjtTr

Severity: variable

Explanation: This fault is caused by "input prjt frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376009: fltTcaFcInputC2Frames15minPrjtTr

Severity: variable

Explanation: This fault is caused by "input prjt frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376010: fltTcaFcInputC2Frames1hPrjtTr

Severity: variable

Explanation: This fault is caused by "input prjt frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376011: fltTcaFcInputC2Frames1dPrjtTr

Severity: variable

Explanation: This fault is caused by "input prjt frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376012: fltTcaFcInputC2Frames1wPrjtTr

Severity: variable

Explanation: This fault is caused by "input prjt frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376013: fltTcaFcInputC2Frames1moPrjtTr

Severity: variable

Explanation: This fault is caused by "input prjt frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376014: fltTcaFcInputC2Frames1qtrPrjtTr

Severity: variable

Explanation: This fault is caused by "input prjt frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376015: fltTcaFcInputC2Frames1yearPrjtTr

Severity: variable

Explanation: This fault is caused by "input prjt frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376016: fltTcaFcInputC2Frames5minPrjtRate

Severity: variable

Explanation: This fault is caused by "input prjt frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376017: fltTcaFcInputC2Frames15minPrjtRate

Severity: variable

Explanation: This fault is caused by "input prjt frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376018: fltTcaFcInputC2Frames1hPrjtRate

Severity: variable

Explanation: This fault is caused by "input prjt frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376019: fltTcaFcInputC2Frames1dPrjtRate

Severity: variable

Explanation: This fault is caused by "input prjt frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376020: fltTcaFcInputC2Frames1wPrjtRate

Severity: variable

Explanation: This fault is caused by "input prjt frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376021: fltTcaFcInputC2Frames1moPrjtRate

Severity: variable

Explanation: This fault is caused by "input prjt frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376022: fltTcaFcInputC2Frames1qtrPrjtRate

Severity: variable

Explanation: This fault is caused by "input prjt frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376023: fltTcaFcInputC2Frames1yearPrjtRate

Severity: variable

Explanation: This fault is caused by "input prjt frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input prjt frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376096: fltTcaFcInputCastFrames5minBroadcastLast

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376097: fltTcaFcInputCastFrames15minBroadcastLast

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376098: fltTcaFcInputCastFrames1hBroadcastLast

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376099: fltTcaFcInputCastFrames1dBroadcastLast

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376100: fltTcaFcInputCastFrames1wBroadcastLast

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376101: fltTcaFcInputCastFrames1moBroadcastLast

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376102: fltTcaFcInputCastFrames1qtrBroadcastLast

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376103: fltTcaFcInputCastFrames1yearBroadcastLast

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376112: fltTcaFcInputCastFrames5minBroadcastCum

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376113: fltTcaFcInputCastFrames15minBroadcastCum

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376114: fltTcaFcInputCastFrames1hBroadcastCum

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376115: fltTcaFcInputCastFrames1dBroadcastCum

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376116: fltTcaFcInputCastFrames1wBroadcastCum

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376117: fltTcaFcInputCastFrames1moBroadcastCum

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376118: fltTcaFcInputCastFrames1qtrBroadcastCum

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376119: fltTcaFcInputCastFrames1yearBroadcastCum

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376120: fltTcaFcInputCastFrames5minBroadcastPer

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376121: fltTcaFcInputCastFrames15minBroadcastPer

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376122: fltTcaFcInputCastFrames1hBroadcastPer

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376123: fltTcaFcInputCastFrames1dBroadcastPer

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376124: fltTcaFcInputCastFrames1wBroadcastPer

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376125: fltTcaFcInputCastFrames1moBroadcastPer

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376126: fltTcaFcInputCastFrames1qtrBroadcastPer

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376127: fltTcaFcInputCastFrames1yearBroadcastPer

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376128: fltTcaFcInputCastFrames5minBroadcastMin

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376129: fltTcaFcInputCastFrames15minBroadcastMin

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376130: fltTcaFcInputCastFrames1hBroadcastMin

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376131: fltTcaFcInputCastFrames1dBroadcastMin

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376132: fltTcaFcInputCastFrames1wBroadcastMin

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376133: fltTcaFcInputCastFrames1moBroadcastMin

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376134: fltTcaFcInputCastFrames1qtrBroadcastMin

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376135: fltTcaFcInputCastFrames1yearBroadcastMin

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376136: fltTcaFcInputCastFrames5minBroadcastMax

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376137: fltTcaFcInputCastFrames15minBroadcastMax

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376138: fltTcaFcInputCastFrames1hBroadcastMax

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376139: fltTcaFcInputCastFrames1dBroadcastMax

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376140: fltTcaFcInputCastFrames1wBroadcastMax

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376141: fltTcaFcInputCastFrames1moBroadcastMax

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376142: fltTcaFcInputCastFrames1qtrBroadcastMax

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376143: fltTcaFcInputCastFrames1yearBroadcastMax

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376144: fltTcaFcInputCastFrames5minBroadcastAvg

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376145: fltTcaFcInputCastFrames15minBroadcastAvg

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376146: fltTcaFcInputCastFrames1hBroadcastAvg

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376147: fltTcaFcInputCastFrames1dBroadcastAvg

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376148: fltTcaFcInputCastFrames1wBroadcastAvg

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376149: fltTcaFcInputCastFrames1moBroadcastAvg

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376150: fltTcaFcInputCastFrames1qtrBroadcastAvg

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376151: fltTcaFcInputCastFrames1yearBroadcastAvg

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376176: fltTcaFcInputCastFrames5minBroadcastTr

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376177: fltTcaFcInputCastFrames15minBroadcastTr

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376178: fltTcaFcInputCastFrames1hBroadcastTr

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376179: fltTcaFcInputCastFrames1dBroadcastTr

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376180: fltTcaFcInputCastFrames1wBroadcastTr

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376181: fltTcaFcInputCastFrames1moBroadcastTr

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376182: fltTcaFcInputCastFrames1qtrBroadcastTr

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376183: fltTcaFcInputCastFrames1yearBroadcastTr

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376184: fltTcaFcInputCastFrames5minBroadcastRate

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376185: fltTcaFcInputCastFrames15minBroadcastRate

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376186: fltTcaFcInputCastFrames1hBroadcastRate

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376187: fltTcaFcInputCastFrames1dBroadcastRate

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376188: fltTcaFcInputCastFrames1wBroadcastRate

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376189: fltTcaFcInputCastFrames1moBroadcastRate

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376190: fltTcaFcInputCastFrames1qtrBroadcastRate

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376191: fltTcaFcInputCastFrames1yearBroadcastRate

Severity: variable

Explanation: This fault is caused by "Input Broadcast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376264: fltTcaFcInputCastFrames5minMulticastLast

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376265: fltTcaFcInputCastFrames15minMulticastLast

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376266: fltTcaFcInputCastFrames1hMulticastLast

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376267: fltTcaFcInputCastFrames1dMulticastLast

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376268: fltTcaFcInputCastFrames1wMulticastLast

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376269: fltTcaFcInputCastFrames1moMulticastLast

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376270: fltTcaFcInputCastFrames1qtrMulticastLast

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376271: fltTcaFcInputCastFrames1yearMulticastLast

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376280: fltTcaFcInputCastFrames5minMulticastCum

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376281: fltTcaFcInputCastFrames15minMulticastCum

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376282: fltTcaFcInputCastFrames1hMulticastCum

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376283: fltTcaFcInputCastFrames1dMulticastCum

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376284: fltTcaFcInputCastFrames1wMulticastCum

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376285: fltTcaFcInputCastFrames1moMulticastCum

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376286: fltTcaFcInputCastFrames1qtrMulticastCum

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376287: fltTcaFcInputCastFrames1yearMulticastCum

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376288: fltTcaFcInputCastFrames5minMulticastPer

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376289: fltTcaFcInputCastFrames15minMulticastPer

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376290: fltTcaFcInputCastFrames1hMulticastPer

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376291: fltTcaFcInputCastFrames1dMulticastPer

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376292: fltTcaFcInputCastFrames1wMulticastPer

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376293: fltTcaFcInputCastFrames1moMulticastPer

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376294: fltTcaFcInputCastFrames1qtrMulticastPer

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376295: fltTcaFcInputCastFrames1yearMulticastPer

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376296: fltTcaFcInputCastFrames5minMulticastMin

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376297: fltTcaFcInputCastFrames15minMulticastMin

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376298: fltTcaFcInputCastFrames1hMulticastMin

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376299: fltTcaFcInputCastFrames1dMulticastMin

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3763: fltHcloudBulkIngressRuleOperCloudBulkIngressRuleOperStateDown

Severity: major

Explanation: This fault occurs when an erroneous configuration is pushed for creating a contract.

Recommended Action: If you see this fault, take the following actions:

1. Please check the fault message and make necessary changes to the config for creating the vzFilter and vzEntry.

2. Please check if the other end of this contract (consumer or provider EPg) has deployed correctly or if it has a fault associated.

3. If fault still has not cleared, please contact Cisco TAC.

F376300: fltTcaFcInputCastFrames1wMulticastMin

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376301: fltTcaFcInputCastFrames1moMulticastMin

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376302: fltTcaFcInputCastFrames1qtrMulticastMin

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376303: fltTcaFcInputCastFrames1yearMulticastMin

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376304: fltTcaFcInputCastFrames5minMulticastMax

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376305: fltTcaFcInputCastFrames15minMulticastMax

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376306: fltTcaFcInputCastFrames1hMulticastMax

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376307: fltTcaFcInputCastFrames1dMulticastMax

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376308: fltTcaFcInputCastFrames1wMulticastMax

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376309: fltTcaFcInputCastFrames1moMulticastMax

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376310: fltTcaFcInputCastFrames1qtrMulticastMax

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376311: fltTcaFcInputCastFrames1yearMulticastMax

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376312: fltTcaFcInputCastFrames5minMulticastAvg

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376313: fltTcaFcInputCastFrames15minMulticastAvg

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376314: fltTcaFcInputCastFrames1hMulticastAvg

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376315: fltTcaFcInputCastFrames1dMulticastAvg

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376316: fltTcaFcInputCastFrames1wMulticastAvg

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376317: fltTcaFcInputCastFrames1moMulticastAvg

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376318: fltTcaFcInputCastFrames1qtrMulticastAvg

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376319: fltTcaFcInputCastFrames1yearMulticastAvg

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376344: fltTcaFcInputCastFrames5minMulticastTr

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376345: fltTcaFcInputCastFrames15minMulticastTr

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376346: fltTcaFcInputCastFrames1hMulticastTr

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376347: fltTcaFcInputCastFrames1dMulticastTr

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376348: fltTcaFcInputCastFrames1wMulticastTr

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376349: fltTcaFcInputCastFrames1moMulticastTr

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376350: fltTcaFcInputCastFrames1qtrMulticastTr

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376351: fltTcaFcInputCastFrames1yearMulticastTr

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376352: fltTcaFcInputCastFrames5minMulticastRate

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376353: fltTcaFcInputCastFrames15minMulticastRate

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376354: fltTcaFcInputCastFrames1hMulticastRate

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376355: fltTcaFcInputCastFrames1dMulticastRate

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376356: fltTcaFcInputCastFrames1wMulticastRate

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376357: fltTcaFcInputCastFrames1moMulticastRate

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376358: fltTcaFcInputCastFrames1qtrMulticastRate

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376359: fltTcaFcInputCastFrames1yearMulticastRate

Severity: variable

Explanation: This fault is caused by "Input Multicast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3764: fltHcloudBulkEgressRuleOperCloudBulkEgressRuleOperStateDown

Severity: major

Explanation: This fault occurs when an erroneous configuration is pushed for creating a contract.

Recommended Action: If you see this fault, take the following actions:

1. Please check the fault message and make necessary changes to the config for creating the vzFilter and vzEntry.

2. Please check if the other end of this contract (consumer or provider EPg) has deployed correctly or if it has a fault associated.

3. If fault still has not cleared, please contact Cisco TAC.

F376432: fltTcaFcInputCastFrames5minUnicastLast

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376433: fltTcaFcInputCastFrames15minUnicastLast

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376434: fltTcaFcInputCastFrames1hUnicastLast

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376435: fltTcaFcInputCastFrames1dUnicastLast

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376436: fltTcaFcInputCastFrames1wUnicastLast

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376437: fltTcaFcInputCastFrames1moUnicastLast

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376438: fltTcaFcInputCastFrames1qtrUnicastLast

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376439: fltTcaFcInputCastFrames1yearUnicastLast

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376448: fltTcaFcInputCastFrames5minUnicastCum

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376449: fltTcaFcInputCastFrames15minUnicastCum

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376450: fltTcaFcInputCastFrames1hUnicastCum

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376451: fltTcaFcInputCastFrames1dUnicastCum

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376452: fltTcaFcInputCastFrames1wUnicastCum

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376453: fltTcaFcInputCastFrames1moUnicastCum

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376454: fltTcaFcInputCastFrames1qtrUnicastCum

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376455: fltTcaFcInputCastFrames1yearUnicastCum

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376456: fltTcaFcInputCastFrames5minUnicastPer

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376457: fltTcaFcInputCastFrames15minUnicastPer

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376458: fltTcaFcInputCastFrames1hUnicastPer

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376459: fltTcaFcInputCastFrames1dUnicastPer

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376460: fltTcaFcInputCastFrames1wUnicastPer

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376461: fltTcaFcInputCastFrames1moUnicastPer

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376462: fltTcaFcInputCastFrames1qtrUnicastPer

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376463: fltTcaFcInputCastFrames1yearUnicastPer

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376464: fltTcaFcInputCastFrames5minUnicastMin

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376465: fltTcaFcInputCastFrames15minUnicastMin

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376466: fltTcaFcInputCastFrames1hUnicastMin

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376467: fltTcaFcInputCastFrames1dUnicastMin

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376468: fltTcaFcInputCastFrames1wUnicastMin

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376469: fltTcaFcInputCastFrames1moUnicastMin

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376470: fltTcaFcInputCastFrames1qtrUnicastMin

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376471: fltTcaFcInputCastFrames1yearUnicastMin

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376472: fltTcaFcInputCastFrames5minUnicastMax

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376473: fltTcaFcInputCastFrames15minUnicastMax

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376474: fltTcaFcInputCastFrames1hUnicastMax

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376475: fltTcaFcInputCastFrames1dUnicastMax

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376476: fltTcaFcInputCastFrames1wUnicastMax

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376477: fltTcaFcInputCastFrames1moUnicastMax

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376478: fltTcaFcInputCastFrames1qtrUnicastMax

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376479: fltTcaFcInputCastFrames1yearUnicastMax

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376480: fltTcaFcInputCastFrames5minUnicastAvg

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376481: fltTcaFcInputCastFrames15minUnicastAvg

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376482: fltTcaFcInputCastFrames1hUnicastAvg

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376483: fltTcaFcInputCastFrames1dUnicastAvg

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376484: fltTcaFcInputCastFrames1wUnicastAvg

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376485: fltTcaFcInputCastFrames1moUnicastAvg

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376486: fltTcaFcInputCastFrames1qtrUnicastAvg

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376487: fltTcaFcInputCastFrames1yearUnicastAvg

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3765: fltCloudRsCtxProfileToGatewayRouterPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F376512: fltTcaFcInputCastFrames5minUnicastTr

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376513: fltTcaFcInputCastFrames15minUnicastTr

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376514: fltTcaFcInputCastFrames1hUnicastTr

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376515: fltTcaFcInputCastFrames1dUnicastTr

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376516: fltTcaFcInputCastFrames1wUnicastTr

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376517: fltTcaFcInputCastFrames1moUnicastTr

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376518: fltTcaFcInputCastFrames1qtrUnicastTr

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376519: fltTcaFcInputCastFrames1yearUnicastTr

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376520: fltTcaFcInputCastFrames5minUnicastRate

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376521: fltTcaFcInputCastFrames15minUnicastRate

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376522: fltTcaFcInputCastFrames1hUnicastRate

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376523: fltTcaFcInputCastFrames1dUnicastRate

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376524: fltTcaFcInputCastFrames1wUnicastRate

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376525: fltTcaFcInputCastFrames1moUnicastRate

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376526: fltTcaFcInputCastFrames1qtrUnicastRate

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376527: fltTcaFcInputCastFrames1yearUnicastRate

Severity: variable

Explanation: This fault is caused by "Input Unicast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Input Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3766: fltCloudRsToTransitHubGwPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F376600: fltTcaFcInputClassDiscards5minC2DiscardsLast

Severity: variable

Explanation: This fault is caused by "input class2 discards current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376601: fltTcaFcInputClassDiscards15minC2DiscardsLast

Severity: variable

Explanation: This fault is caused by "input class2 discards current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376602: fltTcaFcInputClassDiscards1hC2DiscardsLast

Severity: variable

Explanation: This fault is caused by "input class2 discards current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376603: fltTcaFcInputClassDiscards1dC2DiscardsLast

Severity: variable

Explanation: This fault is caused by "input class2 discards current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376604: fltTcaFcInputClassDiscards1wC2DiscardsLast

Severity: variable

Explanation: This fault is caused by "input class2 discards current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376605: fltTcaFcInputClassDiscards1moC2DiscardsLast

Severity: variable

Explanation: This fault is caused by "input class2 discards current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376606: fltTcaFcInputClassDiscards1qtrC2DiscardsLast

Severity: variable

Explanation: This fault is caused by "input class2 discards current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376607: fltTcaFcInputClassDiscards1yearC2DiscardsLast

Severity: variable

Explanation: This fault is caused by "input class2 discards current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376616: fltTcaFcInputClassDiscards5minC2DiscardsCum

Severity: variable

Explanation: This fault is caused by "input class2 discards cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376617: fltTcaFcInputClassDiscards15minC2DiscardsCum

Severity: variable

Explanation: This fault is caused by "input class2 discards cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376618: fltTcaFcInputClassDiscards1hC2DiscardsCum

Severity: variable

Explanation: This fault is caused by "input class2 discards cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376619: fltTcaFcInputClassDiscards1dC2DiscardsCum

Severity: variable

Explanation: This fault is caused by "input class2 discards cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376620: fltTcaFcInputClassDiscards1wC2DiscardsCum

Severity: variable

Explanation: This fault is caused by "input class2 discards cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376621: fltTcaFcInputClassDiscards1moC2DiscardsCum

Severity: variable

Explanation: This fault is caused by "input class2 discards cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376622: fltTcaFcInputClassDiscards1qtrC2DiscardsCum

Severity: variable

Explanation: This fault is caused by "input class2 discards cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376623: fltTcaFcInputClassDiscards1yearC2DiscardsCum

Severity: variable

Explanation: This fault is caused by "input class2 discards cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376624: fltTcaFcInputClassDiscards5minC2DiscardsPer

Severity: variable

Explanation: This fault is caused by "input class2 discards periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376625: fltTcaFcInputClassDiscards15minC2DiscardsPer

Severity: variable

Explanation: This fault is caused by "input class2 discards periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376626: fltTcaFcInputClassDiscards1hC2DiscardsPer

Severity: variable

Explanation: This fault is caused by "input class2 discards periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376627: fltTcaFcInputClassDiscards1dC2DiscardsPer

Severity: variable

Explanation: This fault is caused by "input class2 discards periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376628: fltTcaFcInputClassDiscards1wC2DiscardsPer

Severity: variable

Explanation: This fault is caused by "input class2 discards periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376629: fltTcaFcInputClassDiscards1moC2DiscardsPer

Severity: variable

Explanation: This fault is caused by "input class2 discards periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376630: fltTcaFcInputClassDiscards1qtrC2DiscardsPer

Severity: variable

Explanation: This fault is caused by "input class2 discards periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376631: fltTcaFcInputClassDiscards1yearC2DiscardsPer

Severity: variable

Explanation: This fault is caused by "input class2 discards periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376632: fltTcaFcInputClassDiscards5minC2DiscardsMin

Severity: variable

Explanation: This fault is caused by "input class2 discards minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376633: fltTcaFcInputClassDiscards15minC2DiscardsMin

Severity: variable

Explanation: This fault is caused by "input class2 discards minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376634: fltTcaFcInputClassDiscards1hC2DiscardsMin

Severity: variable

Explanation: This fault is caused by "input class2 discards minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376635: fltTcaFcInputClassDiscards1dC2DiscardsMin

Severity: variable

Explanation: This fault is caused by "input class2 discards minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376636: fltTcaFcInputClassDiscards1wC2DiscardsMin

Severity: variable

Explanation: This fault is caused by "input class2 discards minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376637: fltTcaFcInputClassDiscards1moC2DiscardsMin

Severity: variable

Explanation: This fault is caused by "input class2 discards minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376638: fltTcaFcInputClassDiscards1qtrC2DiscardsMin

Severity: variable

Explanation: This fault is caused by "input class2 discards minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376639: fltTcaFcInputClassDiscards1yearC2DiscardsMin

Severity: variable

Explanation: This fault is caused by "input class2 discards minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376640: fltTcaFcInputClassDiscards5minC2DiscardsMax

Severity: variable

Explanation: This fault is caused by "input class2 discards maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376641: fltTcaFcInputClassDiscards15minC2DiscardsMax

Severity: variable

Explanation: This fault is caused by "input class2 discards maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376642: fltTcaFcInputClassDiscards1hC2DiscardsMax

Severity: variable

Explanation: This fault is caused by "input class2 discards maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376643: fltTcaFcInputClassDiscards1dC2DiscardsMax

Severity: variable

Explanation: This fault is caused by "input class2 discards maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376644: fltTcaFcInputClassDiscards1wC2DiscardsMax

Severity: variable

Explanation: This fault is caused by "input class2 discards maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376645: fltTcaFcInputClassDiscards1moC2DiscardsMax

Severity: variable

Explanation: This fault is caused by "input class2 discards maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376646: fltTcaFcInputClassDiscards1qtrC2DiscardsMax

Severity: variable

Explanation: This fault is caused by "input class2 discards maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376647: fltTcaFcInputClassDiscards1yearC2DiscardsMax

Severity: variable

Explanation: This fault is caused by "input class2 discards maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376648: fltTcaFcInputClassDiscards5minC2DiscardsAvg

Severity: variable

Explanation: This fault is caused by "input class2 discards average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376649: fltTcaFcInputClassDiscards15minC2DiscardsAvg

Severity: variable

Explanation: This fault is caused by "input class2 discards average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376650: fltTcaFcInputClassDiscards1hC2DiscardsAvg

Severity: variable

Explanation: This fault is caused by "input class2 discards average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376651: fltTcaFcInputClassDiscards1dC2DiscardsAvg

Severity: variable

Explanation: This fault is caused by "input class2 discards average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376652: fltTcaFcInputClassDiscards1wC2DiscardsAvg

Severity: variable

Explanation: This fault is caused by "input class2 discards average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376653: fltTcaFcInputClassDiscards1moC2DiscardsAvg

Severity: variable

Explanation: This fault is caused by "input class2 discards average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376654: fltTcaFcInputClassDiscards1qtrC2DiscardsAvg

Severity: variable

Explanation: This fault is caused by "input class2 discards average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376655: fltTcaFcInputClassDiscards1yearC2DiscardsAvg

Severity: variable

Explanation: This fault is caused by "input class2 discards average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376680: fltTcaFcInputClassDiscards5minC2DiscardsTr

Severity: variable

Explanation: This fault is caused by "input class2 discards trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376681: fltTcaFcInputClassDiscards15minC2DiscardsTr

Severity: variable

Explanation: This fault is caused by "input class2 discards trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376682: fltTcaFcInputClassDiscards1hC2DiscardsTr

Severity: variable

Explanation: This fault is caused by "input class2 discards trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376683: fltTcaFcInputClassDiscards1dC2DiscardsTr

Severity: variable

Explanation: This fault is caused by "input class2 discards trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376684: fltTcaFcInputClassDiscards1wC2DiscardsTr

Severity: variable

Explanation: This fault is caused by "input class2 discards trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376685: fltTcaFcInputClassDiscards1moC2DiscardsTr

Severity: variable

Explanation: This fault is caused by "input class2 discards trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376686: fltTcaFcInputClassDiscards1qtrC2DiscardsTr

Severity: variable

Explanation: This fault is caused by "input class2 discards trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376687: fltTcaFcInputClassDiscards1yearC2DiscardsTr

Severity: variable

Explanation: This fault is caused by "input class2 discards trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376688: fltTcaFcInputClassDiscards5minC2DiscardsRate

Severity: variable

Explanation: This fault is caused by "input class2 discards rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376689: fltTcaFcInputClassDiscards15minC2DiscardsRate

Severity: variable

Explanation: This fault is caused by "input class2 discards rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376690: fltTcaFcInputClassDiscards1hC2DiscardsRate

Severity: variable

Explanation: This fault is caused by "input class2 discards rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376691: fltTcaFcInputClassDiscards1dC2DiscardsRate

Severity: variable

Explanation: This fault is caused by "input class2 discards rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376692: fltTcaFcInputClassDiscards1wC2DiscardsRate

Severity: variable

Explanation: This fault is caused by "input class2 discards rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376693: fltTcaFcInputClassDiscards1moC2DiscardsRate

Severity: variable

Explanation: This fault is caused by "input class2 discards rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376694: fltTcaFcInputClassDiscards1qtrC2DiscardsRate

Severity: variable

Explanation: This fault is caused by "input class2 discards rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376695: fltTcaFcInputClassDiscards1yearC2DiscardsRate

Severity: variable

Explanation: This fault is caused by "input class2 discards rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class2 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3767: fltHcl3RsVrfToHcloudVrfResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F376768: fltTcaFcInputClassDiscards5minC3DiscardsLast

Severity: variable

Explanation: This fault is caused by "input class3 discards current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376769: fltTcaFcInputClassDiscards15minC3DiscardsLast

Severity: variable

Explanation: This fault is caused by "input class3 discards current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376770: fltTcaFcInputClassDiscards1hC3DiscardsLast

Severity: variable

Explanation: This fault is caused by "input class3 discards current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376771: fltTcaFcInputClassDiscards1dC3DiscardsLast

Severity: variable

Explanation: This fault is caused by "input class3 discards current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376772: fltTcaFcInputClassDiscards1wC3DiscardsLast

Severity: variable

Explanation: This fault is caused by "input class3 discards current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376773: fltTcaFcInputClassDiscards1moC3DiscardsLast

Severity: variable

Explanation: This fault is caused by "input class3 discards current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376774: fltTcaFcInputClassDiscards1qtrC3DiscardsLast

Severity: variable

Explanation: This fault is caused by "input class3 discards current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376775: fltTcaFcInputClassDiscards1yearC3DiscardsLast

Severity: variable

Explanation: This fault is caused by "input class3 discards current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376784: fltTcaFcInputClassDiscards5minC3DiscardsCum

Severity: variable

Explanation: This fault is caused by "input class3 discards cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376785: fltTcaFcInputClassDiscards15minC3DiscardsCum

Severity: variable

Explanation: This fault is caused by "input class3 discards cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376786: fltTcaFcInputClassDiscards1hC3DiscardsCum

Severity: variable

Explanation: This fault is caused by "input class3 discards cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376787: fltTcaFcInputClassDiscards1dC3DiscardsCum

Severity: variable

Explanation: This fault is caused by "input class3 discards cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376788: fltTcaFcInputClassDiscards1wC3DiscardsCum

Severity: variable

Explanation: This fault is caused by "input class3 discards cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376789: fltTcaFcInputClassDiscards1moC3DiscardsCum

Severity: variable

Explanation: This fault is caused by "input class3 discards cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376790: fltTcaFcInputClassDiscards1qtrC3DiscardsCum

Severity: variable

Explanation: This fault is caused by "input class3 discards cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376791: fltTcaFcInputClassDiscards1yearC3DiscardsCum

Severity: variable

Explanation: This fault is caused by "input class3 discards cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376792: fltTcaFcInputClassDiscards5minC3DiscardsPer

Severity: variable

Explanation: This fault is caused by "input class3 discards periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376793: fltTcaFcInputClassDiscards15minC3DiscardsPer

Severity: variable

Explanation: This fault is caused by "input class3 discards periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376794: fltTcaFcInputClassDiscards1hC3DiscardsPer

Severity: variable

Explanation: This fault is caused by "input class3 discards periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376795: fltTcaFcInputClassDiscards1dC3DiscardsPer

Severity: variable

Explanation: This fault is caused by "input class3 discards periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376796: fltTcaFcInputClassDiscards1wC3DiscardsPer

Severity: variable

Explanation: This fault is caused by "input class3 discards periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376797: fltTcaFcInputClassDiscards1moC3DiscardsPer

Severity: variable

Explanation: This fault is caused by "input class3 discards periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376798: fltTcaFcInputClassDiscards1qtrC3DiscardsPer

Severity: variable

Explanation: This fault is caused by "input class3 discards periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376799: fltTcaFcInputClassDiscards1yearC3DiscardsPer

Severity: variable

Explanation: This fault is caused by "input class3 discards periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3768: fltHcloudRsNextHopToHubCtxResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F376800: fltTcaFcInputClassDiscards5minC3DiscardsMin

Severity: variable

Explanation: This fault is caused by "input class3 discards minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376801: fltTcaFcInputClassDiscards15minC3DiscardsMin

Severity: variable

Explanation: This fault is caused by "input class3 discards minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376802: fltTcaFcInputClassDiscards1hC3DiscardsMin

Severity: variable

Explanation: This fault is caused by "input class3 discards minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376803: fltTcaFcInputClassDiscards1dC3DiscardsMin

Severity: variable

Explanation: This fault is caused by "input class3 discards minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376804: fltTcaFcInputClassDiscards1wC3DiscardsMin

Severity: variable

Explanation: This fault is caused by "input class3 discards minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376805: fltTcaFcInputClassDiscards1moC3DiscardsMin

Severity: variable

Explanation: This fault is caused by "input class3 discards minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376806: fltTcaFcInputClassDiscards1qtrC3DiscardsMin

Severity: variable

Explanation: This fault is caused by "input class3 discards minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376807: fltTcaFcInputClassDiscards1yearC3DiscardsMin

Severity: variable

Explanation: This fault is caused by "input class3 discards minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376808: fltTcaFcInputClassDiscards5minC3DiscardsMax

Severity: variable

Explanation: This fault is caused by "input class3 discards maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376809: fltTcaFcInputClassDiscards15minC3DiscardsMax

Severity: variable

Explanation: This fault is caused by "input class3 discards maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376810: fltTcaFcInputClassDiscards1hC3DiscardsMax

Severity: variable

Explanation: This fault is caused by "input class3 discards maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376811: fltTcaFcInputClassDiscards1dC3DiscardsMax

Severity: variable

Explanation: This fault is caused by "input class3 discards maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376812: fltTcaFcInputClassDiscards1wC3DiscardsMax

Severity: variable

Explanation: This fault is caused by "input class3 discards maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376813: fltTcaFcInputClassDiscards1moC3DiscardsMax

Severity: variable

Explanation: This fault is caused by "input class3 discards maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376814: fltTcaFcInputClassDiscards1qtrC3DiscardsMax

Severity: variable

Explanation: This fault is caused by "input class3 discards maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376815: fltTcaFcInputClassDiscards1yearC3DiscardsMax

Severity: variable

Explanation: This fault is caused by "input class3 discards maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376816: fltTcaFcInputClassDiscards5minC3DiscardsAvg

Severity: variable

Explanation: This fault is caused by "input class3 discards average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376817: fltTcaFcInputClassDiscards15minC3DiscardsAvg

Severity: variable

Explanation: This fault is caused by "input class3 discards average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376818: fltTcaFcInputClassDiscards1hC3DiscardsAvg

Severity: variable

Explanation: This fault is caused by "input class3 discards average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376819: fltTcaFcInputClassDiscards1dC3DiscardsAvg

Severity: variable

Explanation: This fault is caused by "input class3 discards average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376820: fltTcaFcInputClassDiscards1wC3DiscardsAvg

Severity: variable

Explanation: This fault is caused by "input class3 discards average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376821: fltTcaFcInputClassDiscards1moC3DiscardsAvg

Severity: variable

Explanation: This fault is caused by "input class3 discards average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376822: fltTcaFcInputClassDiscards1qtrC3DiscardsAvg

Severity: variable

Explanation: This fault is caused by "input class3 discards average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376823: fltTcaFcInputClassDiscards1yearC3DiscardsAvg

Severity: variable

Explanation: This fault is caused by "input class3 discards average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376848: fltTcaFcInputClassDiscards5minC3DiscardsTr

Severity: variable

Explanation: This fault is caused by "input class3 discards trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376849: fltTcaFcInputClassDiscards15minC3DiscardsTr

Severity: variable

Explanation: This fault is caused by "input class3 discards trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376850: fltTcaFcInputClassDiscards1hC3DiscardsTr

Severity: variable

Explanation: This fault is caused by "input class3 discards trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376851: fltTcaFcInputClassDiscards1dC3DiscardsTr

Severity: variable

Explanation: This fault is caused by "input class3 discards trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376852: fltTcaFcInputClassDiscards1wC3DiscardsTr

Severity: variable

Explanation: This fault is caused by "input class3 discards trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376853: fltTcaFcInputClassDiscards1moC3DiscardsTr

Severity: variable

Explanation: This fault is caused by "input class3 discards trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376854: fltTcaFcInputClassDiscards1qtrC3DiscardsTr

Severity: variable

Explanation: This fault is caused by "input class3 discards trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376855: fltTcaFcInputClassDiscards1yearC3DiscardsTr

Severity: variable

Explanation: This fault is caused by "input class3 discards trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376856: fltTcaFcInputClassDiscards5minC3DiscardsRate

Severity: variable

Explanation: This fault is caused by "input class3 discards rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376857: fltTcaFcInputClassDiscards15minC3DiscardsRate

Severity: variable

Explanation: This fault is caused by "input class3 discards rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376858: fltTcaFcInputClassDiscards1hC3DiscardsRate

Severity: variable

Explanation: This fault is caused by "input class3 discards rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376859: fltTcaFcInputClassDiscards1dC3DiscardsRate

Severity: variable

Explanation: This fault is caused by "input class3 discards rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376860: fltTcaFcInputClassDiscards1wC3DiscardsRate

Severity: variable

Explanation: This fault is caused by "input class3 discards rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376861: fltTcaFcInputClassDiscards1moC3DiscardsRate

Severity: variable

Explanation: This fault is caused by "input class3 discards rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376862: fltTcaFcInputClassDiscards1qtrC3DiscardsRate

Severity: variable

Explanation: This fault is caused by "input class3 discards rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376863: fltTcaFcInputClassDiscards1yearC3DiscardsRate

Severity: variable

Explanation: This fault is caused by "input class3 discards rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input class3 discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3769: fltHcloudRsCtxToHcloudVrfResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F376936: fltTcaFcInputClassDiscards5minCfDiscardsLast

Severity: variable

Explanation: This fault is caused by "input classf discards current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376937: fltTcaFcInputClassDiscards15minCfDiscardsLast

Severity: variable

Explanation: This fault is caused by "input classf discards current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376938: fltTcaFcInputClassDiscards1hCfDiscardsLast

Severity: variable

Explanation: This fault is caused by "input classf discards current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376939: fltTcaFcInputClassDiscards1dCfDiscardsLast

Severity: variable

Explanation: This fault is caused by "input classf discards current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376940: fltTcaFcInputClassDiscards1wCfDiscardsLast

Severity: variable

Explanation: This fault is caused by "input classf discards current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376941: fltTcaFcInputClassDiscards1moCfDiscardsLast

Severity: variable

Explanation: This fault is caused by "input classf discards current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376942: fltTcaFcInputClassDiscards1qtrCfDiscardsLast

Severity: variable

Explanation: This fault is caused by "input classf discards current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376943: fltTcaFcInputClassDiscards1yearCfDiscardsLast

Severity: variable

Explanation: This fault is caused by "input classf discards current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376952: fltTcaFcInputClassDiscards5minCfDiscardsCum

Severity: variable

Explanation: This fault is caused by "input classf discards cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376953: fltTcaFcInputClassDiscards15minCfDiscardsCum

Severity: variable

Explanation: This fault is caused by "input classf discards cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376954: fltTcaFcInputClassDiscards1hCfDiscardsCum

Severity: variable

Explanation: This fault is caused by "input classf discards cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376955: fltTcaFcInputClassDiscards1dCfDiscardsCum

Severity: variable

Explanation: This fault is caused by "input classf discards cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376956: fltTcaFcInputClassDiscards1wCfDiscardsCum

Severity: variable

Explanation: This fault is caused by "input classf discards cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376957: fltTcaFcInputClassDiscards1moCfDiscardsCum

Severity: variable

Explanation: This fault is caused by "input classf discards cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376958: fltTcaFcInputClassDiscards1qtrCfDiscardsCum

Severity: variable

Explanation: This fault is caused by "input classf discards cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376959: fltTcaFcInputClassDiscards1yearCfDiscardsCum

Severity: variable

Explanation: This fault is caused by "input classf discards cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376960: fltTcaFcInputClassDiscards5minCfDiscardsPer

Severity: variable

Explanation: This fault is caused by "input classf discards periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376961: fltTcaFcInputClassDiscards15minCfDiscardsPer

Severity: variable

Explanation: This fault is caused by "input classf discards periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376962: fltTcaFcInputClassDiscards1hCfDiscardsPer

Severity: variable

Explanation: This fault is caused by "input classf discards periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376963: fltTcaFcInputClassDiscards1dCfDiscardsPer

Severity: variable

Explanation: This fault is caused by "input classf discards periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376964: fltTcaFcInputClassDiscards1wCfDiscardsPer

Severity: variable

Explanation: This fault is caused by "input classf discards periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376965: fltTcaFcInputClassDiscards1moCfDiscardsPer

Severity: variable

Explanation: This fault is caused by "input classf discards periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376966: fltTcaFcInputClassDiscards1qtrCfDiscardsPer

Severity: variable

Explanation: This fault is caused by "input classf discards periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376967: fltTcaFcInputClassDiscards1yearCfDiscardsPer

Severity: variable

Explanation: This fault is caused by "input classf discards periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376968: fltTcaFcInputClassDiscards5minCfDiscardsMin

Severity: variable

Explanation: This fault is caused by "input classf discards minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376969: fltTcaFcInputClassDiscards15minCfDiscardsMin

Severity: variable

Explanation: This fault is caused by "input classf discards minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376970: fltTcaFcInputClassDiscards1hCfDiscardsMin

Severity: variable

Explanation: This fault is caused by "input classf discards minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376971: fltTcaFcInputClassDiscards1dCfDiscardsMin

Severity: variable

Explanation: This fault is caused by "input classf discards minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376972: fltTcaFcInputClassDiscards1wCfDiscardsMin

Severity: variable

Explanation: This fault is caused by "input classf discards minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376973: fltTcaFcInputClassDiscards1moCfDiscardsMin

Severity: variable

Explanation: This fault is caused by "input classf discards minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376974: fltTcaFcInputClassDiscards1qtrCfDiscardsMin

Severity: variable

Explanation: This fault is caused by "input classf discards minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376975: fltTcaFcInputClassDiscards1yearCfDiscardsMin

Severity: variable

Explanation: This fault is caused by "input classf discards minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376976: fltTcaFcInputClassDiscards5minCfDiscardsMax

Severity: variable

Explanation: This fault is caused by "input classf discards maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376977: fltTcaFcInputClassDiscards15minCfDiscardsMax

Severity: variable

Explanation: This fault is caused by "input classf discards maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376978: fltTcaFcInputClassDiscards1hCfDiscardsMax

Severity: variable

Explanation: This fault is caused by "input classf discards maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376979: fltTcaFcInputClassDiscards1dCfDiscardsMax

Severity: variable

Explanation: This fault is caused by "input classf discards maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376980: fltTcaFcInputClassDiscards1wCfDiscardsMax

Severity: variable

Explanation: This fault is caused by "input classf discards maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376981: fltTcaFcInputClassDiscards1moCfDiscardsMax

Severity: variable

Explanation: This fault is caused by "input classf discards maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376982: fltTcaFcInputClassDiscards1qtrCfDiscardsMax

Severity: variable

Explanation: This fault is caused by "input classf discards maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376983: fltTcaFcInputClassDiscards1yearCfDiscardsMax

Severity: variable

Explanation: This fault is caused by "input classf discards maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376984: fltTcaFcInputClassDiscards5minCfDiscardsAvg

Severity: variable

Explanation: This fault is caused by "input classf discards average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376985: fltTcaFcInputClassDiscards15minCfDiscardsAvg

Severity: variable

Explanation: This fault is caused by "input classf discards average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376986: fltTcaFcInputClassDiscards1hCfDiscardsAvg

Severity: variable

Explanation: This fault is caused by "input classf discards average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376987: fltTcaFcInputClassDiscards1dCfDiscardsAvg

Severity: variable

Explanation: This fault is caused by "input classf discards average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376988: fltTcaFcInputClassDiscards1wCfDiscardsAvg

Severity: variable

Explanation: This fault is caused by "input classf discards average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376989: fltTcaFcInputClassDiscards1moCfDiscardsAvg

Severity: variable

Explanation: This fault is caused by "input classf discards average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376990: fltTcaFcInputClassDiscards1qtrCfDiscardsAvg

Severity: variable

Explanation: This fault is caused by "input classf discards average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F376991: fltTcaFcInputClassDiscards1yearCfDiscardsAvg

Severity: variable

Explanation: This fault is caused by "input classf discards average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377016: fltTcaFcInputClassDiscards5minCfDiscardsTr

Severity: variable

Explanation: This fault is caused by "input classf discards trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377017: fltTcaFcInputClassDiscards15minCfDiscardsTr

Severity: variable

Explanation: This fault is caused by "input classf discards trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377018: fltTcaFcInputClassDiscards1hCfDiscardsTr

Severity: variable

Explanation: This fault is caused by "input classf discards trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377019: fltTcaFcInputClassDiscards1dCfDiscardsTr

Severity: variable

Explanation: This fault is caused by "input classf discards trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377020: fltTcaFcInputClassDiscards1wCfDiscardsTr

Severity: variable

Explanation: This fault is caused by "input classf discards trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377021: fltTcaFcInputClassDiscards1moCfDiscardsTr

Severity: variable

Explanation: This fault is caused by "input classf discards trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377022: fltTcaFcInputClassDiscards1qtrCfDiscardsTr

Severity: variable

Explanation: This fault is caused by "input classf discards trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377023: fltTcaFcInputClassDiscards1yearCfDiscardsTr

Severity: variable

Explanation: This fault is caused by "input classf discards trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377024: fltTcaFcInputClassDiscards5minCfDiscardsRate

Severity: variable

Explanation: This fault is caused by "input classf discards rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377025: fltTcaFcInputClassDiscards15minCfDiscardsRate

Severity: variable

Explanation: This fault is caused by "input classf discards rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377026: fltTcaFcInputClassDiscards1hCfDiscardsRate

Severity: variable

Explanation: This fault is caused by "input classf discards rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377027: fltTcaFcInputClassDiscards1dCfDiscardsRate

Severity: variable

Explanation: This fault is caused by "input classf discards rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377028: fltTcaFcInputClassDiscards1wCfDiscardsRate

Severity: variable

Explanation: This fault is caused by "input classf discards rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377029: fltTcaFcInputClassDiscards1moCfDiscardsRate

Severity: variable

Explanation: This fault is caused by "input classf discards rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377030: fltTcaFcInputClassDiscards1qtrCfDiscardsRate

Severity: variable

Explanation: This fault is caused by "input classf discards rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377031: fltTcaFcInputClassDiscards1yearCfDiscardsRate

Severity: variable

Explanation: This fault is caused by "input classf discards rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input classf discards" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377104: fltTcaFcInputErrors5minAddrIdErrorsLast

Severity: variable

Explanation: This fault is caused by "address identifier errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377105: fltTcaFcInputErrors15minAddrIdErrorsLast

Severity: variable

Explanation: This fault is caused by "address identifier errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377106: fltTcaFcInputErrors1hAddrIdErrorsLast

Severity: variable

Explanation: This fault is caused by "address identifier errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377107: fltTcaFcInputErrors1dAddrIdErrorsLast

Severity: variable

Explanation: This fault is caused by "address identifier errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377108: fltTcaFcInputErrors1wAddrIdErrorsLast

Severity: variable

Explanation: This fault is caused by "address identifier errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377109: fltTcaFcInputErrors1moAddrIdErrorsLast

Severity: variable

Explanation: This fault is caused by "address identifier errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377110: fltTcaFcInputErrors1qtrAddrIdErrorsLast

Severity: variable

Explanation: This fault is caused by "address identifier errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377111: fltTcaFcInputErrors1yearAddrIdErrorsLast

Severity: variable

Explanation: This fault is caused by "address identifier errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377120: fltTcaFcInputErrors5minAddrIdErrorsCum

Severity: variable

Explanation: This fault is caused by "address identifier errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377121: fltTcaFcInputErrors15minAddrIdErrorsCum

Severity: variable

Explanation: This fault is caused by "address identifier errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377122: fltTcaFcInputErrors1hAddrIdErrorsCum

Severity: variable

Explanation: This fault is caused by "address identifier errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377123: fltTcaFcInputErrors1dAddrIdErrorsCum

Severity: variable

Explanation: This fault is caused by "address identifier errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377124: fltTcaFcInputErrors1wAddrIdErrorsCum

Severity: variable

Explanation: This fault is caused by "address identifier errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377125: fltTcaFcInputErrors1moAddrIdErrorsCum

Severity: variable

Explanation: This fault is caused by "address identifier errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377126: fltTcaFcInputErrors1qtrAddrIdErrorsCum

Severity: variable

Explanation: This fault is caused by "address identifier errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377127: fltTcaFcInputErrors1yearAddrIdErrorsCum

Severity: variable

Explanation: This fault is caused by "address identifier errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377128: fltTcaFcInputErrors5minAddrIdErrorsPer

Severity: variable

Explanation: This fault is caused by "address identifier errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377129: fltTcaFcInputErrors15minAddrIdErrorsPer

Severity: variable

Explanation: This fault is caused by "address identifier errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377130: fltTcaFcInputErrors1hAddrIdErrorsPer

Severity: variable

Explanation: This fault is caused by "address identifier errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377131: fltTcaFcInputErrors1dAddrIdErrorsPer

Severity: variable

Explanation: This fault is caused by "address identifier errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377132: fltTcaFcInputErrors1wAddrIdErrorsPer

Severity: variable

Explanation: This fault is caused by "address identifier errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377133: fltTcaFcInputErrors1moAddrIdErrorsPer

Severity: variable

Explanation: This fault is caused by "address identifier errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377134: fltTcaFcInputErrors1qtrAddrIdErrorsPer

Severity: variable

Explanation: This fault is caused by "address identifier errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377135: fltTcaFcInputErrors1yearAddrIdErrorsPer

Severity: variable

Explanation: This fault is caused by "address identifier errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377136: fltTcaFcInputErrors5minAddrIdErrorsMin

Severity: variable

Explanation: This fault is caused by "address identifier errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377137: fltTcaFcInputErrors15minAddrIdErrorsMin

Severity: variable

Explanation: This fault is caused by "address identifier errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377138: fltTcaFcInputErrors1hAddrIdErrorsMin

Severity: variable

Explanation: This fault is caused by "address identifier errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377139: fltTcaFcInputErrors1dAddrIdErrorsMin

Severity: variable

Explanation: This fault is caused by "address identifier errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377140: fltTcaFcInputErrors1wAddrIdErrorsMin

Severity: variable

Explanation: This fault is caused by "address identifier errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377141: fltTcaFcInputErrors1moAddrIdErrorsMin

Severity: variable

Explanation: This fault is caused by "address identifier errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377142: fltTcaFcInputErrors1qtrAddrIdErrorsMin

Severity: variable

Explanation: This fault is caused by "address identifier errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377143: fltTcaFcInputErrors1yearAddrIdErrorsMin

Severity: variable

Explanation: This fault is caused by "address identifier errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377144: fltTcaFcInputErrors5minAddrIdErrorsMax

Severity: variable

Explanation: This fault is caused by "address identifier errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377145: fltTcaFcInputErrors15minAddrIdErrorsMax

Severity: variable

Explanation: This fault is caused by "address identifier errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377146: fltTcaFcInputErrors1hAddrIdErrorsMax

Severity: variable

Explanation: This fault is caused by "address identifier errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377147: fltTcaFcInputErrors1dAddrIdErrorsMax

Severity: variable

Explanation: This fault is caused by "address identifier errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377148: fltTcaFcInputErrors1wAddrIdErrorsMax

Severity: variable

Explanation: This fault is caused by "address identifier errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377149: fltTcaFcInputErrors1moAddrIdErrorsMax

Severity: variable

Explanation: This fault is caused by "address identifier errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377150: fltTcaFcInputErrors1qtrAddrIdErrorsMax

Severity: variable

Explanation: This fault is caused by "address identifier errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377151: fltTcaFcInputErrors1yearAddrIdErrorsMax

Severity: variable

Explanation: This fault is caused by "address identifier errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377152: fltTcaFcInputErrors5minAddrIdErrorsAvg

Severity: variable

Explanation: This fault is caused by "address identifier errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377153: fltTcaFcInputErrors15minAddrIdErrorsAvg

Severity: variable

Explanation: This fault is caused by "address identifier errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377154: fltTcaFcInputErrors1hAddrIdErrorsAvg

Severity: variable

Explanation: This fault is caused by "address identifier errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377155: fltTcaFcInputErrors1dAddrIdErrorsAvg

Severity: variable

Explanation: This fault is caused by "address identifier errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377156: fltTcaFcInputErrors1wAddrIdErrorsAvg

Severity: variable

Explanation: This fault is caused by "address identifier errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377157: fltTcaFcInputErrors1moAddrIdErrorsAvg

Severity: variable

Explanation: This fault is caused by "address identifier errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377158: fltTcaFcInputErrors1qtrAddrIdErrorsAvg

Severity: variable

Explanation: This fault is caused by "address identifier errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377159: fltTcaFcInputErrors1yearAddrIdErrorsAvg

Severity: variable

Explanation: This fault is caused by "address identifier errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377184: fltTcaFcInputErrors5minAddrIdErrorsTr

Severity: variable

Explanation: This fault is caused by "address identifier errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377185: fltTcaFcInputErrors15minAddrIdErrorsTr

Severity: variable

Explanation: This fault is caused by "address identifier errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377186: fltTcaFcInputErrors1hAddrIdErrorsTr

Severity: variable

Explanation: This fault is caused by "address identifier errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377187: fltTcaFcInputErrors1dAddrIdErrorsTr

Severity: variable

Explanation: This fault is caused by "address identifier errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377188: fltTcaFcInputErrors1wAddrIdErrorsTr

Severity: variable

Explanation: This fault is caused by "address identifier errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377189: fltTcaFcInputErrors1moAddrIdErrorsTr

Severity: variable

Explanation: This fault is caused by "address identifier errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377190: fltTcaFcInputErrors1qtrAddrIdErrorsTr

Severity: variable

Explanation: This fault is caused by "address identifier errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377191: fltTcaFcInputErrors1yearAddrIdErrorsTr

Severity: variable

Explanation: This fault is caused by "address identifier errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377192: fltTcaFcInputErrors5minAddrIdErrorsRate

Severity: variable

Explanation: This fault is caused by "address identifier errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377193: fltTcaFcInputErrors15minAddrIdErrorsRate

Severity: variable

Explanation: This fault is caused by "address identifier errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377194: fltTcaFcInputErrors1hAddrIdErrorsRate

Severity: variable

Explanation: This fault is caused by "address identifier errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377195: fltTcaFcInputErrors1dAddrIdErrorsRate

Severity: variable

Explanation: This fault is caused by "address identifier errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377196: fltTcaFcInputErrors1wAddrIdErrorsRate

Severity: variable

Explanation: This fault is caused by "address identifier errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377197: fltTcaFcInputErrors1moAddrIdErrorsRate

Severity: variable

Explanation: This fault is caused by "address identifier errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377198: fltTcaFcInputErrors1qtrAddrIdErrorsRate

Severity: variable

Explanation: This fault is caused by "address identifier errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377199: fltTcaFcInputErrors1yearAddrIdErrorsRate

Severity: variable

Explanation: This fault is caused by "address identifier errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "address identifier errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3772: fltHcloudRsHubCtxToVrfGroupResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F377272: fltTcaFcInputErrors5minDelimiterErrorsLast

Severity: variable

Explanation: This fault is caused by "delimiter errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377273: fltTcaFcInputErrors15minDelimiterErrorsLast

Severity: variable

Explanation: This fault is caused by "delimiter errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377274: fltTcaFcInputErrors1hDelimiterErrorsLast

Severity: variable

Explanation: This fault is caused by "delimiter errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377275: fltTcaFcInputErrors1dDelimiterErrorsLast

Severity: variable

Explanation: This fault is caused by "delimiter errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377276: fltTcaFcInputErrors1wDelimiterErrorsLast

Severity: variable

Explanation: This fault is caused by "delimiter errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377277: fltTcaFcInputErrors1moDelimiterErrorsLast

Severity: variable

Explanation: This fault is caused by "delimiter errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377278: fltTcaFcInputErrors1qtrDelimiterErrorsLast

Severity: variable

Explanation: This fault is caused by "delimiter errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377279: fltTcaFcInputErrors1yearDelimiterErrorsLast

Severity: variable

Explanation: This fault is caused by "delimiter errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377288: fltTcaFcInputErrors5minDelimiterErrorsCum

Severity: variable

Explanation: This fault is caused by "delimiter errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377289: fltTcaFcInputErrors15minDelimiterErrorsCum

Severity: variable

Explanation: This fault is caused by "delimiter errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377290: fltTcaFcInputErrors1hDelimiterErrorsCum

Severity: variable

Explanation: This fault is caused by "delimiter errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377291: fltTcaFcInputErrors1dDelimiterErrorsCum

Severity: variable

Explanation: This fault is caused by "delimiter errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377292: fltTcaFcInputErrors1wDelimiterErrorsCum

Severity: variable

Explanation: This fault is caused by "delimiter errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377293: fltTcaFcInputErrors1moDelimiterErrorsCum

Severity: variable

Explanation: This fault is caused by "delimiter errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377294: fltTcaFcInputErrors1qtrDelimiterErrorsCum

Severity: variable

Explanation: This fault is caused by "delimiter errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377295: fltTcaFcInputErrors1yearDelimiterErrorsCum

Severity: variable

Explanation: This fault is caused by "delimiter errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377296: fltTcaFcInputErrors5minDelimiterErrorsPer

Severity: variable

Explanation: This fault is caused by "delimiter errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377297: fltTcaFcInputErrors15minDelimiterErrorsPer

Severity: variable

Explanation: This fault is caused by "delimiter errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377298: fltTcaFcInputErrors1hDelimiterErrorsPer

Severity: variable

Explanation: This fault is caused by "delimiter errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377299: fltTcaFcInputErrors1dDelimiterErrorsPer

Severity: variable

Explanation: This fault is caused by "delimiter errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3773: fltHcloudRsInterHubCtxPeerToHubCtxResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F377300: fltTcaFcInputErrors1wDelimiterErrorsPer

Severity: variable

Explanation: This fault is caused by "delimiter errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377301: fltTcaFcInputErrors1moDelimiterErrorsPer

Severity: variable

Explanation: This fault is caused by "delimiter errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377302: fltTcaFcInputErrors1qtrDelimiterErrorsPer

Severity: variable

Explanation: This fault is caused by "delimiter errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377303: fltTcaFcInputErrors1yearDelimiterErrorsPer

Severity: variable

Explanation: This fault is caused by "delimiter errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377304: fltTcaFcInputErrors5minDelimiterErrorsMin

Severity: variable

Explanation: This fault is caused by "delimiter errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377305: fltTcaFcInputErrors15minDelimiterErrorsMin

Severity: variable

Explanation: This fault is caused by "delimiter errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377306: fltTcaFcInputErrors1hDelimiterErrorsMin

Severity: variable

Explanation: This fault is caused by "delimiter errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377307: fltTcaFcInputErrors1dDelimiterErrorsMin

Severity: variable

Explanation: This fault is caused by "delimiter errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377308: fltTcaFcInputErrors1wDelimiterErrorsMin

Severity: variable

Explanation: This fault is caused by "delimiter errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377309: fltTcaFcInputErrors1moDelimiterErrorsMin

Severity: variable

Explanation: This fault is caused by "delimiter errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377310: fltTcaFcInputErrors1qtrDelimiterErrorsMin

Severity: variable

Explanation: This fault is caused by "delimiter errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377311: fltTcaFcInputErrors1yearDelimiterErrorsMin

Severity: variable

Explanation: This fault is caused by "delimiter errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377312: fltTcaFcInputErrors5minDelimiterErrorsMax

Severity: variable

Explanation: This fault is caused by "delimiter errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377313: fltTcaFcInputErrors15minDelimiterErrorsMax

Severity: variable

Explanation: This fault is caused by "delimiter errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377314: fltTcaFcInputErrors1hDelimiterErrorsMax

Severity: variable

Explanation: This fault is caused by "delimiter errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377315: fltTcaFcInputErrors1dDelimiterErrorsMax

Severity: variable

Explanation: This fault is caused by "delimiter errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377316: fltTcaFcInputErrors1wDelimiterErrorsMax

Severity: variable

Explanation: This fault is caused by "delimiter errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377317: fltTcaFcInputErrors1moDelimiterErrorsMax

Severity: variable

Explanation: This fault is caused by "delimiter errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377318: fltTcaFcInputErrors1qtrDelimiterErrorsMax

Severity: variable

Explanation: This fault is caused by "delimiter errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377319: fltTcaFcInputErrors1yearDelimiterErrorsMax

Severity: variable

Explanation: This fault is caused by "delimiter errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377320: fltTcaFcInputErrors5minDelimiterErrorsAvg

Severity: variable

Explanation: This fault is caused by "delimiter errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377321: fltTcaFcInputErrors15minDelimiterErrorsAvg

Severity: variable

Explanation: This fault is caused by "delimiter errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377322: fltTcaFcInputErrors1hDelimiterErrorsAvg

Severity: variable

Explanation: This fault is caused by "delimiter errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377323: fltTcaFcInputErrors1dDelimiterErrorsAvg

Severity: variable

Explanation: This fault is caused by "delimiter errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377324: fltTcaFcInputErrors1wDelimiterErrorsAvg

Severity: variable

Explanation: This fault is caused by "delimiter errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377325: fltTcaFcInputErrors1moDelimiterErrorsAvg

Severity: variable

Explanation: This fault is caused by "delimiter errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377326: fltTcaFcInputErrors1qtrDelimiterErrorsAvg

Severity: variable

Explanation: This fault is caused by "delimiter errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377327: fltTcaFcInputErrors1yearDelimiterErrorsAvg

Severity: variable

Explanation: This fault is caused by "delimiter errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377352: fltTcaFcInputErrors5minDelimiterErrorsTr

Severity: variable

Explanation: This fault is caused by "delimiter errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377353: fltTcaFcInputErrors15minDelimiterErrorsTr

Severity: variable

Explanation: This fault is caused by "delimiter errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377354: fltTcaFcInputErrors1hDelimiterErrorsTr

Severity: variable

Explanation: This fault is caused by "delimiter errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377355: fltTcaFcInputErrors1dDelimiterErrorsTr

Severity: variable

Explanation: This fault is caused by "delimiter errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377356: fltTcaFcInputErrors1wDelimiterErrorsTr

Severity: variable

Explanation: This fault is caused by "delimiter errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377357: fltTcaFcInputErrors1moDelimiterErrorsTr

Severity: variable

Explanation: This fault is caused by "delimiter errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377358: fltTcaFcInputErrors1qtrDelimiterErrorsTr

Severity: variable

Explanation: This fault is caused by "delimiter errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377359: fltTcaFcInputErrors1yearDelimiterErrorsTr

Severity: variable

Explanation: This fault is caused by "delimiter errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377360: fltTcaFcInputErrors5minDelimiterErrorsRate

Severity: variable

Explanation: This fault is caused by "delimiter errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377361: fltTcaFcInputErrors15minDelimiterErrorsRate

Severity: variable

Explanation: This fault is caused by "delimiter errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377362: fltTcaFcInputErrors1hDelimiterErrorsRate

Severity: variable

Explanation: This fault is caused by "delimiter errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377363: fltTcaFcInputErrors1dDelimiterErrorsRate

Severity: variable

Explanation: This fault is caused by "delimiter errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377364: fltTcaFcInputErrors1wDelimiterErrorsRate

Severity: variable

Explanation: This fault is caused by "delimiter errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377365: fltTcaFcInputErrors1moDelimiterErrorsRate

Severity: variable

Explanation: This fault is caused by "delimiter errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377366: fltTcaFcInputErrors1qtrDelimiterErrorsRate

Severity: variable

Explanation: This fault is caused by "delimiter errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377367: fltTcaFcInputErrors1yearDelimiterErrorsRate

Severity: variable

Explanation: This fault is caused by "delimiter errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "delimiter errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3774: fltHcloudRsNetworkInterfaceToVrfGroupResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F377440: fltTcaFcInputErrors5minLrpLast

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377441: fltTcaFcInputErrors15minLrpLast

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377442: fltTcaFcInputErrors1hLrpLast

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377443: fltTcaFcInputErrors1dLrpLast

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377444: fltTcaFcInputErrors1wLrpLast

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377445: fltTcaFcInputErrors1moLrpLast

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377446: fltTcaFcInputErrors1qtrLrpLast

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377447: fltTcaFcInputErrors1yearLrpLast

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377456: fltTcaFcInputErrors5minLrpCum

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377457: fltTcaFcInputErrors15minLrpCum

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377458: fltTcaFcInputErrors1hLrpCum

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377459: fltTcaFcInputErrors1dLrpCum

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377460: fltTcaFcInputErrors1wLrpCum

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377461: fltTcaFcInputErrors1moLrpCum

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377462: fltTcaFcInputErrors1qtrLrpCum

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377463: fltTcaFcInputErrors1yearLrpCum

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377464: fltTcaFcInputErrors5minLrpPer

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377465: fltTcaFcInputErrors15minLrpPer

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377466: fltTcaFcInputErrors1hLrpPer

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377467: fltTcaFcInputErrors1dLrpPer

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377468: fltTcaFcInputErrors1wLrpPer

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377469: fltTcaFcInputErrors1moLrpPer

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377470: fltTcaFcInputErrors1qtrLrpPer

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377471: fltTcaFcInputErrors1yearLrpPer

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377472: fltTcaFcInputErrors5minLrpMin

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377473: fltTcaFcInputErrors15minLrpMin

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377474: fltTcaFcInputErrors1hLrpMin

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377475: fltTcaFcInputErrors1dLrpMin

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377476: fltTcaFcInputErrors1wLrpMin

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377477: fltTcaFcInputErrors1moLrpMin

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377478: fltTcaFcInputErrors1qtrLrpMin

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377479: fltTcaFcInputErrors1yearLrpMin

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377480: fltTcaFcInputErrors5minLrpMax

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377481: fltTcaFcInputErrors15minLrpMax

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377482: fltTcaFcInputErrors1hLrpMax

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377483: fltTcaFcInputErrors1dLrpMax

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377484: fltTcaFcInputErrors1wLrpMax

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377485: fltTcaFcInputErrors1moLrpMax

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377486: fltTcaFcInputErrors1qtrLrpMax

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377487: fltTcaFcInputErrors1yearLrpMax

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377488: fltTcaFcInputErrors5minLrpAvg

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377489: fltTcaFcInputErrors15minLrpAvg

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377490: fltTcaFcInputErrors1hLrpAvg

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377491: fltTcaFcInputErrors1dLrpAvg

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377492: fltTcaFcInputErrors1wLrpAvg

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377493: fltTcaFcInputErrors1moLrpAvg

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377494: fltTcaFcInputErrors1qtrLrpAvg

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377495: fltTcaFcInputErrors1yearLrpAvg

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3775: fltHcloudRsNextHopToCtxResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F377520: fltTcaFcInputErrors5minLrpTr

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377521: fltTcaFcInputErrors15minLrpTr

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377522: fltTcaFcInputErrors1hLrpTr

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377523: fltTcaFcInputErrors1dLrpTr

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377524: fltTcaFcInputErrors1wLrpTr

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377525: fltTcaFcInputErrors1moLrpTr

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377526: fltTcaFcInputErrors1qtrLrpTr

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377527: fltTcaFcInputErrors1yearLrpTr

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377528: fltTcaFcInputErrors5minLrpRate

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377529: fltTcaFcInputErrors15minLrpRate

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377530: fltTcaFcInputErrors1hLrpRate

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377531: fltTcaFcInputErrors1dLrpRate

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377532: fltTcaFcInputErrors1wLrpRate

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377533: fltTcaFcInputErrors1moLrpRate

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377534: fltTcaFcInputErrors1qtrLrpRate

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377535: fltTcaFcInputErrors1yearLrpRate

Severity: variable

Explanation: This fault is caused by "input link Reset Protocol rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input link Reset Protocol" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3776: fltHcloudRsSharedResourceToHubCtxResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F377608: fltTcaFcInputErrors5minPrimSeqProtoLast

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377609: fltTcaFcInputErrors15minPrimSeqProtoLast

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377610: fltTcaFcInputErrors1hPrimSeqProtoLast

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377611: fltTcaFcInputErrors1dPrimSeqProtoLast

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377612: fltTcaFcInputErrors1wPrimSeqProtoLast

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377613: fltTcaFcInputErrors1moPrimSeqProtoLast

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377614: fltTcaFcInputErrors1qtrPrimSeqProtoLast

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377615: fltTcaFcInputErrors1yearPrimSeqProtoLast

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377624: fltTcaFcInputErrors5minPrimSeqProtoCum

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377625: fltTcaFcInputErrors15minPrimSeqProtoCum

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377626: fltTcaFcInputErrors1hPrimSeqProtoCum

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377627: fltTcaFcInputErrors1dPrimSeqProtoCum

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377628: fltTcaFcInputErrors1wPrimSeqProtoCum

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377629: fltTcaFcInputErrors1moPrimSeqProtoCum

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377630: fltTcaFcInputErrors1qtrPrimSeqProtoCum

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377631: fltTcaFcInputErrors1yearPrimSeqProtoCum

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377632: fltTcaFcInputErrors5minPrimSeqProtoPer

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377633: fltTcaFcInputErrors15minPrimSeqProtoPer

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377634: fltTcaFcInputErrors1hPrimSeqProtoPer

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377635: fltTcaFcInputErrors1dPrimSeqProtoPer

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377636: fltTcaFcInputErrors1wPrimSeqProtoPer

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377637: fltTcaFcInputErrors1moPrimSeqProtoPer

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377638: fltTcaFcInputErrors1qtrPrimSeqProtoPer

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377639: fltTcaFcInputErrors1yearPrimSeqProtoPer

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377640: fltTcaFcInputErrors5minPrimSeqProtoMin

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377641: fltTcaFcInputErrors15minPrimSeqProtoMin

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377642: fltTcaFcInputErrors1hPrimSeqProtoMin

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377643: fltTcaFcInputErrors1dPrimSeqProtoMin

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377644: fltTcaFcInputErrors1wPrimSeqProtoMin

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377645: fltTcaFcInputErrors1moPrimSeqProtoMin

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377646: fltTcaFcInputErrors1qtrPrimSeqProtoMin

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377647: fltTcaFcInputErrors1yearPrimSeqProtoMin

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377648: fltTcaFcInputErrors5minPrimSeqProtoMax

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377649: fltTcaFcInputErrors15minPrimSeqProtoMax

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377650: fltTcaFcInputErrors1hPrimSeqProtoMax

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377651: fltTcaFcInputErrors1dPrimSeqProtoMax

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377652: fltTcaFcInputErrors1wPrimSeqProtoMax

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377653: fltTcaFcInputErrors1moPrimSeqProtoMax

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377654: fltTcaFcInputErrors1qtrPrimSeqProtoMax

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377655: fltTcaFcInputErrors1yearPrimSeqProtoMax

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377656: fltTcaFcInputErrors5minPrimSeqProtoAvg

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377657: fltTcaFcInputErrors15minPrimSeqProtoAvg

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377658: fltTcaFcInputErrors1hPrimSeqProtoAvg

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377659: fltTcaFcInputErrors1dPrimSeqProtoAvg

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377660: fltTcaFcInputErrors1wPrimSeqProtoAvg

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377661: fltTcaFcInputErrors1moPrimSeqProtoAvg

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377662: fltTcaFcInputErrors1qtrPrimSeqProtoAvg

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377663: fltTcaFcInputErrors1yearPrimSeqProtoAvg

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377688: fltTcaFcInputErrors5minPrimSeqProtoTr

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377689: fltTcaFcInputErrors15minPrimSeqProtoTr

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377690: fltTcaFcInputErrors1hPrimSeqProtoTr

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377691: fltTcaFcInputErrors1dPrimSeqProtoTr

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377692: fltTcaFcInputErrors1wPrimSeqProtoTr

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377693: fltTcaFcInputErrors1moPrimSeqProtoTr

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377694: fltTcaFcInputErrors1qtrPrimSeqProtoTr

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377695: fltTcaFcInputErrors1yearPrimSeqProtoTr

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377696: fltTcaFcInputErrors5minPrimSeqProtoRate

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377697: fltTcaFcInputErrors15minPrimSeqProtoRate

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377698: fltTcaFcInputErrors1hPrimSeqProtoRate

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377699: fltTcaFcInputErrors1dPrimSeqProtoRate

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3777: fltHcloudRsVrfToVrfGroupResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F377700: fltTcaFcInputErrors1wPrimSeqProtoRate

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377701: fltTcaFcInputErrors1moPrimSeqProtoRate

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377702: fltTcaFcInputErrors1qtrPrimSeqProtoRate

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377703: fltTcaFcInputErrors1yearPrimSeqProtoRate

Severity: variable

Explanation: This fault is caused by "primitive seq proto errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "primitive seq proto errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377776: fltTcaFcInputLIPErrors5minEofAbortsLast

Severity: variable

Explanation: This fault is caused by "input eof aborts current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377777: fltTcaFcInputLIPErrors15minEofAbortsLast

Severity: variable

Explanation: This fault is caused by "input eof aborts current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377778: fltTcaFcInputLIPErrors1hEofAbortsLast

Severity: variable

Explanation: This fault is caused by "input eof aborts current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377779: fltTcaFcInputLIPErrors1dEofAbortsLast

Severity: variable

Explanation: This fault is caused by "input eof aborts current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377780: fltTcaFcInputLIPErrors1wEofAbortsLast

Severity: variable

Explanation: This fault is caused by "input eof aborts current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377781: fltTcaFcInputLIPErrors1moEofAbortsLast

Severity: variable

Explanation: This fault is caused by "input eof aborts current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377782: fltTcaFcInputLIPErrors1qtrEofAbortsLast

Severity: variable

Explanation: This fault is caused by "input eof aborts current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377783: fltTcaFcInputLIPErrors1yearEofAbortsLast

Severity: variable

Explanation: This fault is caused by "input eof aborts current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377792: fltTcaFcInputLIPErrors5minEofAbortsCum

Severity: variable

Explanation: This fault is caused by "input eof aborts cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377793: fltTcaFcInputLIPErrors15minEofAbortsCum

Severity: variable

Explanation: This fault is caused by "input eof aborts cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377794: fltTcaFcInputLIPErrors1hEofAbortsCum

Severity: variable

Explanation: This fault is caused by "input eof aborts cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377795: fltTcaFcInputLIPErrors1dEofAbortsCum

Severity: variable

Explanation: This fault is caused by "input eof aborts cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377796: fltTcaFcInputLIPErrors1wEofAbortsCum

Severity: variable

Explanation: This fault is caused by "input eof aborts cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377797: fltTcaFcInputLIPErrors1moEofAbortsCum

Severity: variable

Explanation: This fault is caused by "input eof aborts cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377798: fltTcaFcInputLIPErrors1qtrEofAbortsCum

Severity: variable

Explanation: This fault is caused by "input eof aborts cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377799: fltTcaFcInputLIPErrors1yearEofAbortsCum

Severity: variable

Explanation: This fault is caused by "input eof aborts cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3778: fltHinventoryRsIgToCtxResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F377800: fltTcaFcInputLIPErrors5minEofAbortsPer

Severity: variable

Explanation: This fault is caused by "input eof aborts periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377801: fltTcaFcInputLIPErrors15minEofAbortsPer

Severity: variable

Explanation: This fault is caused by "input eof aborts periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377802: fltTcaFcInputLIPErrors1hEofAbortsPer

Severity: variable

Explanation: This fault is caused by "input eof aborts periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377803: fltTcaFcInputLIPErrors1dEofAbortsPer

Severity: variable

Explanation: This fault is caused by "input eof aborts periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377804: fltTcaFcInputLIPErrors1wEofAbortsPer

Severity: variable

Explanation: This fault is caused by "input eof aborts periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377805: fltTcaFcInputLIPErrors1moEofAbortsPer

Severity: variable

Explanation: This fault is caused by "input eof aborts periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377806: fltTcaFcInputLIPErrors1qtrEofAbortsPer

Severity: variable

Explanation: This fault is caused by "input eof aborts periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377807: fltTcaFcInputLIPErrors1yearEofAbortsPer

Severity: variable

Explanation: This fault is caused by "input eof aborts periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377808: fltTcaFcInputLIPErrors5minEofAbortsMin

Severity: variable

Explanation: This fault is caused by "input eof aborts minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377809: fltTcaFcInputLIPErrors15minEofAbortsMin

Severity: variable

Explanation: This fault is caused by "input eof aborts minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377810: fltTcaFcInputLIPErrors1hEofAbortsMin

Severity: variable

Explanation: This fault is caused by "input eof aborts minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377811: fltTcaFcInputLIPErrors1dEofAbortsMin

Severity: variable

Explanation: This fault is caused by "input eof aborts minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377812: fltTcaFcInputLIPErrors1wEofAbortsMin

Severity: variable

Explanation: This fault is caused by "input eof aborts minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377813: fltTcaFcInputLIPErrors1moEofAbortsMin

Severity: variable

Explanation: This fault is caused by "input eof aborts minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377814: fltTcaFcInputLIPErrors1qtrEofAbortsMin

Severity: variable

Explanation: This fault is caused by "input eof aborts minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377815: fltTcaFcInputLIPErrors1yearEofAbortsMin

Severity: variable

Explanation: This fault is caused by "input eof aborts minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377816: fltTcaFcInputLIPErrors5minEofAbortsMax

Severity: variable

Explanation: This fault is caused by "input eof aborts maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377817: fltTcaFcInputLIPErrors15minEofAbortsMax

Severity: variable

Explanation: This fault is caused by "input eof aborts maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377818: fltTcaFcInputLIPErrors1hEofAbortsMax

Severity: variable

Explanation: This fault is caused by "input eof aborts maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377819: fltTcaFcInputLIPErrors1dEofAbortsMax

Severity: variable

Explanation: This fault is caused by "input eof aborts maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377820: fltTcaFcInputLIPErrors1wEofAbortsMax

Severity: variable

Explanation: This fault is caused by "input eof aborts maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377821: fltTcaFcInputLIPErrors1moEofAbortsMax

Severity: variable

Explanation: This fault is caused by "input eof aborts maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377822: fltTcaFcInputLIPErrors1qtrEofAbortsMax

Severity: variable

Explanation: This fault is caused by "input eof aborts maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377823: fltTcaFcInputLIPErrors1yearEofAbortsMax

Severity: variable

Explanation: This fault is caused by "input eof aborts maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377824: fltTcaFcInputLIPErrors5minEofAbortsAvg

Severity: variable

Explanation: This fault is caused by "input eof aborts average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377825: fltTcaFcInputLIPErrors15minEofAbortsAvg

Severity: variable

Explanation: This fault is caused by "input eof aborts average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377826: fltTcaFcInputLIPErrors1hEofAbortsAvg

Severity: variable

Explanation: This fault is caused by "input eof aborts average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377827: fltTcaFcInputLIPErrors1dEofAbortsAvg

Severity: variable

Explanation: This fault is caused by "input eof aborts average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377828: fltTcaFcInputLIPErrors1wEofAbortsAvg

Severity: variable

Explanation: This fault is caused by "input eof aborts average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377829: fltTcaFcInputLIPErrors1moEofAbortsAvg

Severity: variable

Explanation: This fault is caused by "input eof aborts average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377830: fltTcaFcInputLIPErrors1qtrEofAbortsAvg

Severity: variable

Explanation: This fault is caused by "input eof aborts average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377831: fltTcaFcInputLIPErrors1yearEofAbortsAvg

Severity: variable

Explanation: This fault is caused by "input eof aborts average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377856: fltTcaFcInputLIPErrors5minEofAbortsTr

Severity: variable

Explanation: This fault is caused by "input eof aborts trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377857: fltTcaFcInputLIPErrors15minEofAbortsTr

Severity: variable

Explanation: This fault is caused by "input eof aborts trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377858: fltTcaFcInputLIPErrors1hEofAbortsTr

Severity: variable

Explanation: This fault is caused by "input eof aborts trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377859: fltTcaFcInputLIPErrors1dEofAbortsTr

Severity: variable

Explanation: This fault is caused by "input eof aborts trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377860: fltTcaFcInputLIPErrors1wEofAbortsTr

Severity: variable

Explanation: This fault is caused by "input eof aborts trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377861: fltTcaFcInputLIPErrors1moEofAbortsTr

Severity: variable

Explanation: This fault is caused by "input eof aborts trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377862: fltTcaFcInputLIPErrors1qtrEofAbortsTr

Severity: variable

Explanation: This fault is caused by "input eof aborts trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377863: fltTcaFcInputLIPErrors1yearEofAbortsTr

Severity: variable

Explanation: This fault is caused by "input eof aborts trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377864: fltTcaFcInputLIPErrors5minEofAbortsRate

Severity: variable

Explanation: This fault is caused by "input eof aborts rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377865: fltTcaFcInputLIPErrors15minEofAbortsRate

Severity: variable

Explanation: This fault is caused by "input eof aborts rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377866: fltTcaFcInputLIPErrors1hEofAbortsRate

Severity: variable

Explanation: This fault is caused by "input eof aborts rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377867: fltTcaFcInputLIPErrors1dEofAbortsRate

Severity: variable

Explanation: This fault is caused by "input eof aborts rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377868: fltTcaFcInputLIPErrors1wEofAbortsRate

Severity: variable

Explanation: This fault is caused by "input eof aborts rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377869: fltTcaFcInputLIPErrors1moEofAbortsRate

Severity: variable

Explanation: This fault is caused by "input eof aborts rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377870: fltTcaFcInputLIPErrors1qtrEofAbortsRate

Severity: variable

Explanation: This fault is caused by "input eof aborts rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377871: fltTcaFcInputLIPErrors1yearEofAbortsRate

Severity: variable

Explanation: This fault is caused by "input eof aborts rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input eof aborts" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3779: fltHinventoryRsSgToRegionResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F377944: fltTcaFcInputLIPErrors5minF8LipErrorLast

Severity: variable

Explanation: This fault is caused by "input f8 lip error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377945: fltTcaFcInputLIPErrors15minF8LipErrorLast

Severity: variable

Explanation: This fault is caused by "input f8 lip error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377946: fltTcaFcInputLIPErrors1hF8LipErrorLast

Severity: variable

Explanation: This fault is caused by "input f8 lip error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377947: fltTcaFcInputLIPErrors1dF8LipErrorLast

Severity: variable

Explanation: This fault is caused by "input f8 lip error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377948: fltTcaFcInputLIPErrors1wF8LipErrorLast

Severity: variable

Explanation: This fault is caused by "input f8 lip error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377949: fltTcaFcInputLIPErrors1moF8LipErrorLast

Severity: variable

Explanation: This fault is caused by "input f8 lip error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377950: fltTcaFcInputLIPErrors1qtrF8LipErrorLast

Severity: variable

Explanation: This fault is caused by "input f8 lip error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377951: fltTcaFcInputLIPErrors1yearF8LipErrorLast

Severity: variable

Explanation: This fault is caused by "input f8 lip error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377960: fltTcaFcInputLIPErrors5minF8LipErrorCum

Severity: variable

Explanation: This fault is caused by "input f8 lip error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377961: fltTcaFcInputLIPErrors15minF8LipErrorCum

Severity: variable

Explanation: This fault is caused by "input f8 lip error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377962: fltTcaFcInputLIPErrors1hF8LipErrorCum

Severity: variable

Explanation: This fault is caused by "input f8 lip error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377963: fltTcaFcInputLIPErrors1dF8LipErrorCum

Severity: variable

Explanation: This fault is caused by "input f8 lip error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377964: fltTcaFcInputLIPErrors1wF8LipErrorCum

Severity: variable

Explanation: This fault is caused by "input f8 lip error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377965: fltTcaFcInputLIPErrors1moF8LipErrorCum

Severity: variable

Explanation: This fault is caused by "input f8 lip error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377966: fltTcaFcInputLIPErrors1qtrF8LipErrorCum

Severity: variable

Explanation: This fault is caused by "input f8 lip error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377967: fltTcaFcInputLIPErrors1yearF8LipErrorCum

Severity: variable

Explanation: This fault is caused by "input f8 lip error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377968: fltTcaFcInputLIPErrors5minF8LipErrorPer

Severity: variable

Explanation: This fault is caused by "input f8 lip error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377969: fltTcaFcInputLIPErrors15minF8LipErrorPer

Severity: variable

Explanation: This fault is caused by "input f8 lip error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377970: fltTcaFcInputLIPErrors1hF8LipErrorPer

Severity: variable

Explanation: This fault is caused by "input f8 lip error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377971: fltTcaFcInputLIPErrors1dF8LipErrorPer

Severity: variable

Explanation: This fault is caused by "input f8 lip error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377972: fltTcaFcInputLIPErrors1wF8LipErrorPer

Severity: variable

Explanation: This fault is caused by "input f8 lip error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377973: fltTcaFcInputLIPErrors1moF8LipErrorPer

Severity: variable

Explanation: This fault is caused by "input f8 lip error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377974: fltTcaFcInputLIPErrors1qtrF8LipErrorPer

Severity: variable

Explanation: This fault is caused by "input f8 lip error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377975: fltTcaFcInputLIPErrors1yearF8LipErrorPer

Severity: variable

Explanation: This fault is caused by "input f8 lip error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377976: fltTcaFcInputLIPErrors5minF8LipErrorMin

Severity: variable

Explanation: This fault is caused by "input f8 lip error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377977: fltTcaFcInputLIPErrors15minF8LipErrorMin

Severity: variable

Explanation: This fault is caused by "input f8 lip error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377978: fltTcaFcInputLIPErrors1hF8LipErrorMin

Severity: variable

Explanation: This fault is caused by "input f8 lip error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377979: fltTcaFcInputLIPErrors1dF8LipErrorMin

Severity: variable

Explanation: This fault is caused by "input f8 lip error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377980: fltTcaFcInputLIPErrors1wF8LipErrorMin

Severity: variable

Explanation: This fault is caused by "input f8 lip error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377981: fltTcaFcInputLIPErrors1moF8LipErrorMin

Severity: variable

Explanation: This fault is caused by "input f8 lip error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377982: fltTcaFcInputLIPErrors1qtrF8LipErrorMin

Severity: variable

Explanation: This fault is caused by "input f8 lip error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377983: fltTcaFcInputLIPErrors1yearF8LipErrorMin

Severity: variable

Explanation: This fault is caused by "input f8 lip error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377984: fltTcaFcInputLIPErrors5minF8LipErrorMax

Severity: variable

Explanation: This fault is caused by "input f8 lip error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377985: fltTcaFcInputLIPErrors15minF8LipErrorMax

Severity: variable

Explanation: This fault is caused by "input f8 lip error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377986: fltTcaFcInputLIPErrors1hF8LipErrorMax

Severity: variable

Explanation: This fault is caused by "input f8 lip error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377987: fltTcaFcInputLIPErrors1dF8LipErrorMax

Severity: variable

Explanation: This fault is caused by "input f8 lip error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377988: fltTcaFcInputLIPErrors1wF8LipErrorMax

Severity: variable

Explanation: This fault is caused by "input f8 lip error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377989: fltTcaFcInputLIPErrors1moF8LipErrorMax

Severity: variable

Explanation: This fault is caused by "input f8 lip error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377990: fltTcaFcInputLIPErrors1qtrF8LipErrorMax

Severity: variable

Explanation: This fault is caused by "input f8 lip error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377991: fltTcaFcInputLIPErrors1yearF8LipErrorMax

Severity: variable

Explanation: This fault is caused by "input f8 lip error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377992: fltTcaFcInputLIPErrors5minF8LipErrorAvg

Severity: variable

Explanation: This fault is caused by "input f8 lip error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377993: fltTcaFcInputLIPErrors15minF8LipErrorAvg

Severity: variable

Explanation: This fault is caused by "input f8 lip error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377994: fltTcaFcInputLIPErrors1hF8LipErrorAvg

Severity: variable

Explanation: This fault is caused by "input f8 lip error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377995: fltTcaFcInputLIPErrors1dF8LipErrorAvg

Severity: variable

Explanation: This fault is caused by "input f8 lip error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377996: fltTcaFcInputLIPErrors1wF8LipErrorAvg

Severity: variable

Explanation: This fault is caused by "input f8 lip error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377997: fltTcaFcInputLIPErrors1moF8LipErrorAvg

Severity: variable

Explanation: This fault is caused by "input f8 lip error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377998: fltTcaFcInputLIPErrors1qtrF8LipErrorAvg

Severity: variable

Explanation: This fault is caused by "input f8 lip error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F377999: fltTcaFcInputLIPErrors1yearF8LipErrorAvg

Severity: variable

Explanation: This fault is caused by "input f8 lip error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3780: fltHinventoryRsSgToSubnetResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F378024: fltTcaFcInputLIPErrors5minF8LipErrorTr

Severity: variable

Explanation: This fault is caused by "input f8 lip error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378025: fltTcaFcInputLIPErrors15minF8LipErrorTr

Severity: variable

Explanation: This fault is caused by "input f8 lip error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378026: fltTcaFcInputLIPErrors1hF8LipErrorTr

Severity: variable

Explanation: This fault is caused by "input f8 lip error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378027: fltTcaFcInputLIPErrors1dF8LipErrorTr

Severity: variable

Explanation: This fault is caused by "input f8 lip error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378028: fltTcaFcInputLIPErrors1wF8LipErrorTr

Severity: variable

Explanation: This fault is caused by "input f8 lip error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378029: fltTcaFcInputLIPErrors1moF8LipErrorTr

Severity: variable

Explanation: This fault is caused by "input f8 lip error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378030: fltTcaFcInputLIPErrors1qtrF8LipErrorTr

Severity: variable

Explanation: This fault is caused by "input f8 lip error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378031: fltTcaFcInputLIPErrors1yearF8LipErrorTr

Severity: variable

Explanation: This fault is caused by "input f8 lip error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378032: fltTcaFcInputLIPErrors5minF8LipErrorRate

Severity: variable

Explanation: This fault is caused by "input f8 lip error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378033: fltTcaFcInputLIPErrors15minF8LipErrorRate

Severity: variable

Explanation: This fault is caused by "input f8 lip error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378034: fltTcaFcInputLIPErrors1hF8LipErrorRate

Severity: variable

Explanation: This fault is caused by "input f8 lip error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378035: fltTcaFcInputLIPErrors1dF8LipErrorRate

Severity: variable

Explanation: This fault is caused by "input f8 lip error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378036: fltTcaFcInputLIPErrors1wF8LipErrorRate

Severity: variable

Explanation: This fault is caused by "input f8 lip error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378037: fltTcaFcInputLIPErrors1moF8LipErrorRate

Severity: variable

Explanation: This fault is caused by "input f8 lip error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378038: fltTcaFcInputLIPErrors1qtrF8LipErrorRate

Severity: variable

Explanation: This fault is caused by "input f8 lip error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378039: fltTcaFcInputLIPErrors1yearF8LipErrorRate

Severity: variable

Explanation: This fault is caused by "input f8 lip error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378112: fltTcaFcInputLIPErrors5minFragmentedFramesLast

Severity: variable

Explanation: This fault is caused by "fragmented frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378113: fltTcaFcInputLIPErrors15minFragmentedFramesLast

Severity: variable

Explanation: This fault is caused by "fragmented frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378114: fltTcaFcInputLIPErrors1hFragmentedFramesLast

Severity: variable

Explanation: This fault is caused by "fragmented frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378115: fltTcaFcInputLIPErrors1dFragmentedFramesLast

Severity: variable

Explanation: This fault is caused by "fragmented frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378116: fltTcaFcInputLIPErrors1wFragmentedFramesLast

Severity: variable

Explanation: This fault is caused by "fragmented frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378117: fltTcaFcInputLIPErrors1moFragmentedFramesLast

Severity: variable

Explanation: This fault is caused by "fragmented frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378118: fltTcaFcInputLIPErrors1qtrFragmentedFramesLast

Severity: variable

Explanation: This fault is caused by "fragmented frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378119: fltTcaFcInputLIPErrors1yearFragmentedFramesLast

Severity: variable

Explanation: This fault is caused by "fragmented frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378128: fltTcaFcInputLIPErrors5minFragmentedFramesCum

Severity: variable

Explanation: This fault is caused by "fragmented frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378129: fltTcaFcInputLIPErrors15minFragmentedFramesCum

Severity: variable

Explanation: This fault is caused by "fragmented frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378130: fltTcaFcInputLIPErrors1hFragmentedFramesCum

Severity: variable

Explanation: This fault is caused by "fragmented frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378131: fltTcaFcInputLIPErrors1dFragmentedFramesCum

Severity: variable

Explanation: This fault is caused by "fragmented frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378132: fltTcaFcInputLIPErrors1wFragmentedFramesCum

Severity: variable

Explanation: This fault is caused by "fragmented frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378133: fltTcaFcInputLIPErrors1moFragmentedFramesCum

Severity: variable

Explanation: This fault is caused by "fragmented frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378134: fltTcaFcInputLIPErrors1qtrFragmentedFramesCum

Severity: variable

Explanation: This fault is caused by "fragmented frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378135: fltTcaFcInputLIPErrors1yearFragmentedFramesCum

Severity: variable

Explanation: This fault is caused by "fragmented frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378136: fltTcaFcInputLIPErrors5minFragmentedFramesPer

Severity: variable

Explanation: This fault is caused by "fragmented frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378137: fltTcaFcInputLIPErrors15minFragmentedFramesPer

Severity: variable

Explanation: This fault is caused by "fragmented frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378138: fltTcaFcInputLIPErrors1hFragmentedFramesPer

Severity: variable

Explanation: This fault is caused by "fragmented frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378139: fltTcaFcInputLIPErrors1dFragmentedFramesPer

Severity: variable

Explanation: This fault is caused by "fragmented frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378140: fltTcaFcInputLIPErrors1wFragmentedFramesPer

Severity: variable

Explanation: This fault is caused by "fragmented frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378141: fltTcaFcInputLIPErrors1moFragmentedFramesPer

Severity: variable

Explanation: This fault is caused by "fragmented frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378142: fltTcaFcInputLIPErrors1qtrFragmentedFramesPer

Severity: variable

Explanation: This fault is caused by "fragmented frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378143: fltTcaFcInputLIPErrors1yearFragmentedFramesPer

Severity: variable

Explanation: This fault is caused by "fragmented frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378144: fltTcaFcInputLIPErrors5minFragmentedFramesMin

Severity: variable

Explanation: This fault is caused by "fragmented frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378145: fltTcaFcInputLIPErrors15minFragmentedFramesMin

Severity: variable

Explanation: This fault is caused by "fragmented frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378146: fltTcaFcInputLIPErrors1hFragmentedFramesMin

Severity: variable

Explanation: This fault is caused by "fragmented frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378147: fltTcaFcInputLIPErrors1dFragmentedFramesMin

Severity: variable

Explanation: This fault is caused by "fragmented frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378148: fltTcaFcInputLIPErrors1wFragmentedFramesMin

Severity: variable

Explanation: This fault is caused by "fragmented frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378149: fltTcaFcInputLIPErrors1moFragmentedFramesMin

Severity: variable

Explanation: This fault is caused by "fragmented frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378150: fltTcaFcInputLIPErrors1qtrFragmentedFramesMin

Severity: variable

Explanation: This fault is caused by "fragmented frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378151: fltTcaFcInputLIPErrors1yearFragmentedFramesMin

Severity: variable

Explanation: This fault is caused by "fragmented frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378152: fltTcaFcInputLIPErrors5minFragmentedFramesMax

Severity: variable

Explanation: This fault is caused by "fragmented frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378153: fltTcaFcInputLIPErrors15minFragmentedFramesMax

Severity: variable

Explanation: This fault is caused by "fragmented frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378154: fltTcaFcInputLIPErrors1hFragmentedFramesMax

Severity: variable

Explanation: This fault is caused by "fragmented frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378155: fltTcaFcInputLIPErrors1dFragmentedFramesMax

Severity: variable

Explanation: This fault is caused by "fragmented frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378156: fltTcaFcInputLIPErrors1wFragmentedFramesMax

Severity: variable

Explanation: This fault is caused by "fragmented frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378157: fltTcaFcInputLIPErrors1moFragmentedFramesMax

Severity: variable

Explanation: This fault is caused by "fragmented frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378158: fltTcaFcInputLIPErrors1qtrFragmentedFramesMax

Severity: variable

Explanation: This fault is caused by "fragmented frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378159: fltTcaFcInputLIPErrors1yearFragmentedFramesMax

Severity: variable

Explanation: This fault is caused by "fragmented frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378160: fltTcaFcInputLIPErrors5minFragmentedFramesAvg

Severity: variable

Explanation: This fault is caused by "fragmented frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378161: fltTcaFcInputLIPErrors15minFragmentedFramesAvg

Severity: variable

Explanation: This fault is caused by "fragmented frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378162: fltTcaFcInputLIPErrors1hFragmentedFramesAvg

Severity: variable

Explanation: This fault is caused by "fragmented frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378163: fltTcaFcInputLIPErrors1dFragmentedFramesAvg

Severity: variable

Explanation: This fault is caused by "fragmented frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378164: fltTcaFcInputLIPErrors1wFragmentedFramesAvg

Severity: variable

Explanation: This fault is caused by "fragmented frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378165: fltTcaFcInputLIPErrors1moFragmentedFramesAvg

Severity: variable

Explanation: This fault is caused by "fragmented frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378166: fltTcaFcInputLIPErrors1qtrFragmentedFramesAvg

Severity: variable

Explanation: This fault is caused by "fragmented frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378167: fltTcaFcInputLIPErrors1yearFragmentedFramesAvg

Severity: variable

Explanation: This fault is caused by "fragmented frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378192: fltTcaFcInputLIPErrors5minFragmentedFramesTr

Severity: variable

Explanation: This fault is caused by "fragmented frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378193: fltTcaFcInputLIPErrors15minFragmentedFramesTr

Severity: variable

Explanation: This fault is caused by "fragmented frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378194: fltTcaFcInputLIPErrors1hFragmentedFramesTr

Severity: variable

Explanation: This fault is caused by "fragmented frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378195: fltTcaFcInputLIPErrors1dFragmentedFramesTr

Severity: variable

Explanation: This fault is caused by "fragmented frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378196: fltTcaFcInputLIPErrors1wFragmentedFramesTr

Severity: variable

Explanation: This fault is caused by "fragmented frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378197: fltTcaFcInputLIPErrors1moFragmentedFramesTr

Severity: variable

Explanation: This fault is caused by "fragmented frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378198: fltTcaFcInputLIPErrors1qtrFragmentedFramesTr

Severity: variable

Explanation: This fault is caused by "fragmented frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378199: fltTcaFcInputLIPErrors1yearFragmentedFramesTr

Severity: variable

Explanation: This fault is caused by "fragmented frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378200: fltTcaFcInputLIPErrors5minFragmentedFramesRate

Severity: variable

Explanation: This fault is caused by "fragmented frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378201: fltTcaFcInputLIPErrors15minFragmentedFramesRate

Severity: variable

Explanation: This fault is caused by "fragmented frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378202: fltTcaFcInputLIPErrors1hFragmentedFramesRate

Severity: variable

Explanation: This fault is caused by "fragmented frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378203: fltTcaFcInputLIPErrors1dFragmentedFramesRate

Severity: variable

Explanation: This fault is caused by "fragmented frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378204: fltTcaFcInputLIPErrors1wFragmentedFramesRate

Severity: variable

Explanation: This fault is caused by "fragmented frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378205: fltTcaFcInputLIPErrors1moFragmentedFramesRate

Severity: variable

Explanation: This fault is caused by "fragmented frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378206: fltTcaFcInputLIPErrors1qtrFragmentedFramesRate

Severity: variable

Explanation: This fault is caused by "fragmented frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378207: fltTcaFcInputLIPErrors1yearFragmentedFramesRate

Severity: variable

Explanation: This fault is caused by "fragmented frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "fragmented frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378280: fltTcaFcInputLIPErrors5minNonf8LipErrorLast

Severity: variable

Explanation: This fault is caused by "input non f8 lip error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378281: fltTcaFcInputLIPErrors15minNonf8LipErrorLast

Severity: variable

Explanation: This fault is caused by "input non f8 lip error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378282: fltTcaFcInputLIPErrors1hNonf8LipErrorLast

Severity: variable

Explanation: This fault is caused by "input non f8 lip error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378283: fltTcaFcInputLIPErrors1dNonf8LipErrorLast

Severity: variable

Explanation: This fault is caused by "input non f8 lip error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378284: fltTcaFcInputLIPErrors1wNonf8LipErrorLast

Severity: variable

Explanation: This fault is caused by "input non f8 lip error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378285: fltTcaFcInputLIPErrors1moNonf8LipErrorLast

Severity: variable

Explanation: This fault is caused by "input non f8 lip error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378286: fltTcaFcInputLIPErrors1qtrNonf8LipErrorLast

Severity: variable

Explanation: This fault is caused by "input non f8 lip error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378287: fltTcaFcInputLIPErrors1yearNonf8LipErrorLast

Severity: variable

Explanation: This fault is caused by "input non f8 lip error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378296: fltTcaFcInputLIPErrors5minNonf8LipErrorCum

Severity: variable

Explanation: This fault is caused by "input non f8 lip error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378297: fltTcaFcInputLIPErrors15minNonf8LipErrorCum

Severity: variable

Explanation: This fault is caused by "input non f8 lip error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378298: fltTcaFcInputLIPErrors1hNonf8LipErrorCum

Severity: variable

Explanation: This fault is caused by "input non f8 lip error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378299: fltTcaFcInputLIPErrors1dNonf8LipErrorCum

Severity: variable

Explanation: This fault is caused by "input non f8 lip error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3783: fltL3extRsLblToInstPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F378300: fltTcaFcInputLIPErrors1wNonf8LipErrorCum

Severity: variable

Explanation: This fault is caused by "input non f8 lip error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378301: fltTcaFcInputLIPErrors1moNonf8LipErrorCum

Severity: variable

Explanation: This fault is caused by "input non f8 lip error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378302: fltTcaFcInputLIPErrors1qtrNonf8LipErrorCum

Severity: variable

Explanation: This fault is caused by "input non f8 lip error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378303: fltTcaFcInputLIPErrors1yearNonf8LipErrorCum

Severity: variable

Explanation: This fault is caused by "input non f8 lip error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378304: fltTcaFcInputLIPErrors5minNonf8LipErrorPer

Severity: variable

Explanation: This fault is caused by "input non f8 lip error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378305: fltTcaFcInputLIPErrors15minNonf8LipErrorPer

Severity: variable

Explanation: This fault is caused by "input non f8 lip error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378306: fltTcaFcInputLIPErrors1hNonf8LipErrorPer

Severity: variable

Explanation: This fault is caused by "input non f8 lip error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378307: fltTcaFcInputLIPErrors1dNonf8LipErrorPer

Severity: variable

Explanation: This fault is caused by "input non f8 lip error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378308: fltTcaFcInputLIPErrors1wNonf8LipErrorPer

Severity: variable

Explanation: This fault is caused by "input non f8 lip error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378309: fltTcaFcInputLIPErrors1moNonf8LipErrorPer

Severity: variable

Explanation: This fault is caused by "input non f8 lip error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378310: fltTcaFcInputLIPErrors1qtrNonf8LipErrorPer

Severity: variable

Explanation: This fault is caused by "input non f8 lip error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378311: fltTcaFcInputLIPErrors1yearNonf8LipErrorPer

Severity: variable

Explanation: This fault is caused by "input non f8 lip error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378312: fltTcaFcInputLIPErrors5minNonf8LipErrorMin

Severity: variable

Explanation: This fault is caused by "input non f8 lip error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378313: fltTcaFcInputLIPErrors15minNonf8LipErrorMin

Severity: variable

Explanation: This fault is caused by "input non f8 lip error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378314: fltTcaFcInputLIPErrors1hNonf8LipErrorMin

Severity: variable

Explanation: This fault is caused by "input non f8 lip error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378315: fltTcaFcInputLIPErrors1dNonf8LipErrorMin

Severity: variable

Explanation: This fault is caused by "input non f8 lip error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378316: fltTcaFcInputLIPErrors1wNonf8LipErrorMin

Severity: variable

Explanation: This fault is caused by "input non f8 lip error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378317: fltTcaFcInputLIPErrors1moNonf8LipErrorMin

Severity: variable

Explanation: This fault is caused by "input non f8 lip error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378318: fltTcaFcInputLIPErrors1qtrNonf8LipErrorMin

Severity: variable

Explanation: This fault is caused by "input non f8 lip error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378319: fltTcaFcInputLIPErrors1yearNonf8LipErrorMin

Severity: variable

Explanation: This fault is caused by "input non f8 lip error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378320: fltTcaFcInputLIPErrors5minNonf8LipErrorMax

Severity: variable

Explanation: This fault is caused by "input non f8 lip error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378321: fltTcaFcInputLIPErrors15minNonf8LipErrorMax

Severity: variable

Explanation: This fault is caused by "input non f8 lip error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378322: fltTcaFcInputLIPErrors1hNonf8LipErrorMax

Severity: variable

Explanation: This fault is caused by "input non f8 lip error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378323: fltTcaFcInputLIPErrors1dNonf8LipErrorMax

Severity: variable

Explanation: This fault is caused by "input non f8 lip error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378324: fltTcaFcInputLIPErrors1wNonf8LipErrorMax

Severity: variable

Explanation: This fault is caused by "input non f8 lip error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378325: fltTcaFcInputLIPErrors1moNonf8LipErrorMax

Severity: variable

Explanation: This fault is caused by "input non f8 lip error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378326: fltTcaFcInputLIPErrors1qtrNonf8LipErrorMax

Severity: variable

Explanation: This fault is caused by "input non f8 lip error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378327: fltTcaFcInputLIPErrors1yearNonf8LipErrorMax

Severity: variable

Explanation: This fault is caused by "input non f8 lip error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378328: fltTcaFcInputLIPErrors5minNonf8LipErrorAvg

Severity: variable

Explanation: This fault is caused by "input non f8 lip error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378329: fltTcaFcInputLIPErrors15minNonf8LipErrorAvg

Severity: variable

Explanation: This fault is caused by "input non f8 lip error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378330: fltTcaFcInputLIPErrors1hNonf8LipErrorAvg

Severity: variable

Explanation: This fault is caused by "input non f8 lip error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378331: fltTcaFcInputLIPErrors1dNonf8LipErrorAvg

Severity: variable

Explanation: This fault is caused by "input non f8 lip error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378332: fltTcaFcInputLIPErrors1wNonf8LipErrorAvg

Severity: variable

Explanation: This fault is caused by "input non f8 lip error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378333: fltTcaFcInputLIPErrors1moNonf8LipErrorAvg

Severity: variable

Explanation: This fault is caused by "input non f8 lip error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378334: fltTcaFcInputLIPErrors1qtrNonf8LipErrorAvg

Severity: variable

Explanation: This fault is caused by "input non f8 lip error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378335: fltTcaFcInputLIPErrors1yearNonf8LipErrorAvg

Severity: variable

Explanation: This fault is caused by "input non f8 lip error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378360: fltTcaFcInputLIPErrors5minNonf8LipErrorTr

Severity: variable

Explanation: This fault is caused by "input non f8 lip error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378361: fltTcaFcInputLIPErrors15minNonf8LipErrorTr

Severity: variable

Explanation: This fault is caused by "input non f8 lip error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378362: fltTcaFcInputLIPErrors1hNonf8LipErrorTr

Severity: variable

Explanation: This fault is caused by "input non f8 lip error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378363: fltTcaFcInputLIPErrors1dNonf8LipErrorTr

Severity: variable

Explanation: This fault is caused by "input non f8 lip error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378364: fltTcaFcInputLIPErrors1wNonf8LipErrorTr

Severity: variable

Explanation: This fault is caused by "input non f8 lip error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378365: fltTcaFcInputLIPErrors1moNonf8LipErrorTr

Severity: variable

Explanation: This fault is caused by "input non f8 lip error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378366: fltTcaFcInputLIPErrors1qtrNonf8LipErrorTr

Severity: variable

Explanation: This fault is caused by "input non f8 lip error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378367: fltTcaFcInputLIPErrors1yearNonf8LipErrorTr

Severity: variable

Explanation: This fault is caused by "input non f8 lip error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378368: fltTcaFcInputLIPErrors5minNonf8LipErrorRate

Severity: variable

Explanation: This fault is caused by "input non f8 lip error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378369: fltTcaFcInputLIPErrors15minNonf8LipErrorRate

Severity: variable

Explanation: This fault is caused by "input non f8 lip error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378370: fltTcaFcInputLIPErrors1hNonf8LipErrorRate

Severity: variable

Explanation: This fault is caused by "input non f8 lip error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378371: fltTcaFcInputLIPErrors1dNonf8LipErrorRate

Severity: variable

Explanation: This fault is caused by "input non f8 lip error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378372: fltTcaFcInputLIPErrors1wNonf8LipErrorRate

Severity: variable

Explanation: This fault is caused by "input non f8 lip error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378373: fltTcaFcInputLIPErrors1moNonf8LipErrorRate

Severity: variable

Explanation: This fault is caused by "input non f8 lip error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378374: fltTcaFcInputLIPErrors1qtrNonf8LipErrorRate

Severity: variable

Explanation: This fault is caused by "input non f8 lip error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378375: fltTcaFcInputLIPErrors1yearNonf8LipErrorRate

Severity: variable

Explanation: This fault is caused by "input non f8 lip error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3784: fltL3extRsLblToProfileResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F378448: fltTcaFcInputOtherErrors5minDisparity8b10bLast

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378449: fltTcaFcInputOtherErrors15minDisparity8b10bLast

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378450: fltTcaFcInputOtherErrors1hDisparity8b10bLast

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378451: fltTcaFcInputOtherErrors1dDisparity8b10bLast

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378452: fltTcaFcInputOtherErrors1wDisparity8b10bLast

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378453: fltTcaFcInputOtherErrors1moDisparity8b10bLast

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378454: fltTcaFcInputOtherErrors1qtrDisparity8b10bLast

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378455: fltTcaFcInputOtherErrors1yearDisparity8b10bLast

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378464: fltTcaFcInputOtherErrors5minDisparity8b10bCum

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378465: fltTcaFcInputOtherErrors15minDisparity8b10bCum

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378466: fltTcaFcInputOtherErrors1hDisparity8b10bCum

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378467: fltTcaFcInputOtherErrors1dDisparity8b10bCum

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378468: fltTcaFcInputOtherErrors1wDisparity8b10bCum

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378469: fltTcaFcInputOtherErrors1moDisparity8b10bCum

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378470: fltTcaFcInputOtherErrors1qtrDisparity8b10bCum

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378471: fltTcaFcInputOtherErrors1yearDisparity8b10bCum

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378472: fltTcaFcInputOtherErrors5minDisparity8b10bPer

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378473: fltTcaFcInputOtherErrors15minDisparity8b10bPer

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378474: fltTcaFcInputOtherErrors1hDisparity8b10bPer

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378475: fltTcaFcInputOtherErrors1dDisparity8b10bPer

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378476: fltTcaFcInputOtherErrors1wDisparity8b10bPer

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378477: fltTcaFcInputOtherErrors1moDisparity8b10bPer

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378478: fltTcaFcInputOtherErrors1qtrDisparity8b10bPer

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378479: fltTcaFcInputOtherErrors1yearDisparity8b10bPer

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378480: fltTcaFcInputOtherErrors5minDisparity8b10bMin

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378481: fltTcaFcInputOtherErrors15minDisparity8b10bMin

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378482: fltTcaFcInputOtherErrors1hDisparity8b10bMin

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378483: fltTcaFcInputOtherErrors1dDisparity8b10bMin

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378484: fltTcaFcInputOtherErrors1wDisparity8b10bMin

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378485: fltTcaFcInputOtherErrors1moDisparity8b10bMin

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378486: fltTcaFcInputOtherErrors1qtrDisparity8b10bMin

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378487: fltTcaFcInputOtherErrors1yearDisparity8b10bMin

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378488: fltTcaFcInputOtherErrors5minDisparity8b10bMax

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378489: fltTcaFcInputOtherErrors15minDisparity8b10bMax

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378490: fltTcaFcInputOtherErrors1hDisparity8b10bMax

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378491: fltTcaFcInputOtherErrors1dDisparity8b10bMax

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378492: fltTcaFcInputOtherErrors1wDisparity8b10bMax

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378493: fltTcaFcInputOtherErrors1moDisparity8b10bMax

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378494: fltTcaFcInputOtherErrors1qtrDisparity8b10bMax

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378495: fltTcaFcInputOtherErrors1yearDisparity8b10bMax

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378496: fltTcaFcInputOtherErrors5minDisparity8b10bAvg

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378497: fltTcaFcInputOtherErrors15minDisparity8b10bAvg

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378498: fltTcaFcInputOtherErrors1hDisparity8b10bAvg

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378499: fltTcaFcInputOtherErrors1dDisparity8b10bAvg

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3785: fltHcloudCsrSummaryOperCsrSshConnectivityFault

Severity: major

Explanation: This fault is raised when the SSH connectivity to CSR cannot be established

Recommended Action: None set.

F378500: fltTcaFcInputOtherErrors1wDisparity8b10bAvg

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378501: fltTcaFcInputOtherErrors1moDisparity8b10bAvg

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378502: fltTcaFcInputOtherErrors1qtrDisparity8b10bAvg

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378503: fltTcaFcInputOtherErrors1yearDisparity8b10bAvg

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378528: fltTcaFcInputOtherErrors5minDisparity8b10bTr

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378529: fltTcaFcInputOtherErrors15minDisparity8b10bTr

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378530: fltTcaFcInputOtherErrors1hDisparity8b10bTr

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378531: fltTcaFcInputOtherErrors1dDisparity8b10bTr

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378532: fltTcaFcInputOtherErrors1wDisparity8b10bTr

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378533: fltTcaFcInputOtherErrors1moDisparity8b10bTr

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378534: fltTcaFcInputOtherErrors1qtrDisparity8b10bTr

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378535: fltTcaFcInputOtherErrors1yearDisparity8b10bTr

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378536: fltTcaFcInputOtherErrors5minDisparity8b10bRate

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378537: fltTcaFcInputOtherErrors15minDisparity8b10bRate

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378538: fltTcaFcInputOtherErrors1hDisparity8b10bRate

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378539: fltTcaFcInputOtherErrors1dDisparity8b10bRate

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378540: fltTcaFcInputOtherErrors1wDisparity8b10bRate

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378541: fltTcaFcInputOtherErrors1moDisparity8b10bRate

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378542: fltTcaFcInputOtherErrors1qtrDisparity8b10bRate

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378543: fltTcaFcInputOtherErrors1yearDisparity8b10bRate

Severity: variable

Explanation: This fault is caused by "input 8b10b disparity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input 8b10b disparity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378616: fltTcaFcInputOtherErrors5minEislLast

Severity: variable

Explanation: This fault is caused by "input eisl current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378617: fltTcaFcInputOtherErrors15minEislLast

Severity: variable

Explanation: This fault is caused by "input eisl current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378618: fltTcaFcInputOtherErrors1hEislLast

Severity: variable

Explanation: This fault is caused by "input eisl current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378619: fltTcaFcInputOtherErrors1dEislLast

Severity: variable

Explanation: This fault is caused by "input eisl current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378620: fltTcaFcInputOtherErrors1wEislLast

Severity: variable

Explanation: This fault is caused by "input eisl current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378621: fltTcaFcInputOtherErrors1moEislLast

Severity: variable

Explanation: This fault is caused by "input eisl current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378622: fltTcaFcInputOtherErrors1qtrEislLast

Severity: variable

Explanation: This fault is caused by "input eisl current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378623: fltTcaFcInputOtherErrors1yearEislLast

Severity: variable

Explanation: This fault is caused by "input eisl current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378632: fltTcaFcInputOtherErrors5minEislCum

Severity: variable

Explanation: This fault is caused by "input eisl cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378633: fltTcaFcInputOtherErrors15minEislCum

Severity: variable

Explanation: This fault is caused by "input eisl cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378634: fltTcaFcInputOtherErrors1hEislCum

Severity: variable

Explanation: This fault is caused by "input eisl cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378635: fltTcaFcInputOtherErrors1dEislCum

Severity: variable

Explanation: This fault is caused by "input eisl cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378636: fltTcaFcInputOtherErrors1wEislCum

Severity: variable

Explanation: This fault is caused by "input eisl cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378637: fltTcaFcInputOtherErrors1moEislCum

Severity: variable

Explanation: This fault is caused by "input eisl cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378638: fltTcaFcInputOtherErrors1qtrEislCum

Severity: variable

Explanation: This fault is caused by "input eisl cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378639: fltTcaFcInputOtherErrors1yearEislCum

Severity: variable

Explanation: This fault is caused by "input eisl cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378640: fltTcaFcInputOtherErrors5minEislPer

Severity: variable

Explanation: This fault is caused by "input eisl periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378641: fltTcaFcInputOtherErrors15minEislPer

Severity: variable

Explanation: This fault is caused by "input eisl periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378642: fltTcaFcInputOtherErrors1hEislPer

Severity: variable

Explanation: This fault is caused by "input eisl periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378643: fltTcaFcInputOtherErrors1dEislPer

Severity: variable

Explanation: This fault is caused by "input eisl periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378644: fltTcaFcInputOtherErrors1wEislPer

Severity: variable

Explanation: This fault is caused by "input eisl periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378645: fltTcaFcInputOtherErrors1moEislPer

Severity: variable

Explanation: This fault is caused by "input eisl periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378646: fltTcaFcInputOtherErrors1qtrEislPer

Severity: variable

Explanation: This fault is caused by "input eisl periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378647: fltTcaFcInputOtherErrors1yearEislPer

Severity: variable

Explanation: This fault is caused by "input eisl periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378648: fltTcaFcInputOtherErrors5minEislMin

Severity: variable

Explanation: This fault is caused by "input eisl minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378649: fltTcaFcInputOtherErrors15minEislMin

Severity: variable

Explanation: This fault is caused by "input eisl minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378650: fltTcaFcInputOtherErrors1hEislMin

Severity: variable

Explanation: This fault is caused by "input eisl minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378651: fltTcaFcInputOtherErrors1dEislMin

Severity: variable

Explanation: This fault is caused by "input eisl minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378652: fltTcaFcInputOtherErrors1wEislMin

Severity: variable

Explanation: This fault is caused by "input eisl minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378653: fltTcaFcInputOtherErrors1moEislMin

Severity: variable

Explanation: This fault is caused by "input eisl minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378654: fltTcaFcInputOtherErrors1qtrEislMin

Severity: variable

Explanation: This fault is caused by "input eisl minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378655: fltTcaFcInputOtherErrors1yearEislMin

Severity: variable

Explanation: This fault is caused by "input eisl minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378656: fltTcaFcInputOtherErrors5minEislMax

Severity: variable

Explanation: This fault is caused by "input eisl maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378657: fltTcaFcInputOtherErrors15minEislMax

Severity: variable

Explanation: This fault is caused by "input eisl maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378658: fltTcaFcInputOtherErrors1hEislMax

Severity: variable

Explanation: This fault is caused by "input eisl maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378659: fltTcaFcInputOtherErrors1dEislMax

Severity: variable

Explanation: This fault is caused by "input eisl maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378660: fltTcaFcInputOtherErrors1wEislMax

Severity: variable

Explanation: This fault is caused by "input eisl maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378661: fltTcaFcInputOtherErrors1moEislMax

Severity: variable

Explanation: This fault is caused by "input eisl maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378662: fltTcaFcInputOtherErrors1qtrEislMax

Severity: variable

Explanation: This fault is caused by "input eisl maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378663: fltTcaFcInputOtherErrors1yearEislMax

Severity: variable

Explanation: This fault is caused by "input eisl maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378664: fltTcaFcInputOtherErrors5minEislAvg

Severity: variable

Explanation: This fault is caused by "input eisl average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378665: fltTcaFcInputOtherErrors15minEislAvg

Severity: variable

Explanation: This fault is caused by "input eisl average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378666: fltTcaFcInputOtherErrors1hEislAvg

Severity: variable

Explanation: This fault is caused by "input eisl average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378667: fltTcaFcInputOtherErrors1dEislAvg

Severity: variable

Explanation: This fault is caused by "input eisl average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378668: fltTcaFcInputOtherErrors1wEislAvg

Severity: variable

Explanation: This fault is caused by "input eisl average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378669: fltTcaFcInputOtherErrors1moEislAvg

Severity: variable

Explanation: This fault is caused by "input eisl average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378670: fltTcaFcInputOtherErrors1qtrEislAvg

Severity: variable

Explanation: This fault is caused by "input eisl average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378671: fltTcaFcInputOtherErrors1yearEislAvg

Severity: variable

Explanation: This fault is caused by "input eisl average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378696: fltTcaFcInputOtherErrors5minEislTr

Severity: variable

Explanation: This fault is caused by "input eisl trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378697: fltTcaFcInputOtherErrors15minEislTr

Severity: variable

Explanation: This fault is caused by "input eisl trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378698: fltTcaFcInputOtherErrors1hEislTr

Severity: variable

Explanation: This fault is caused by "input eisl trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378699: fltTcaFcInputOtherErrors1dEislTr

Severity: variable

Explanation: This fault is caused by "input eisl trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378700: fltTcaFcInputOtherErrors1wEislTr

Severity: variable

Explanation: This fault is caused by "input eisl trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378701: fltTcaFcInputOtherErrors1moEislTr

Severity: variable

Explanation: This fault is caused by "input eisl trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378702: fltTcaFcInputOtherErrors1qtrEislTr

Severity: variable

Explanation: This fault is caused by "input eisl trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378703: fltTcaFcInputOtherErrors1yearEislTr

Severity: variable

Explanation: This fault is caused by "input eisl trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378704: fltTcaFcInputOtherErrors5minEislRate

Severity: variable

Explanation: This fault is caused by "input eisl rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378705: fltTcaFcInputOtherErrors15minEislRate

Severity: variable

Explanation: This fault is caused by "input eisl rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378706: fltTcaFcInputOtherErrors1hEislRate

Severity: variable

Explanation: This fault is caused by "input eisl rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378707: fltTcaFcInputOtherErrors1dEislRate

Severity: variable

Explanation: This fault is caused by "input eisl rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378708: fltTcaFcInputOtherErrors1wEislRate

Severity: variable

Explanation: This fault is caused by "input eisl rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378709: fltTcaFcInputOtherErrors1moEislRate

Severity: variable

Explanation: This fault is caused by "input eisl rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378710: fltTcaFcInputOtherErrors1qtrEislRate

Severity: variable

Explanation: This fault is caused by "input eisl rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378711: fltTcaFcInputOtherErrors1yearEislRate

Severity: variable

Explanation: This fault is caused by "input eisl rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input eisl" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378784: fltTcaFcInputOtherErrors5minElpLast

Severity: variable

Explanation: This fault is caused by "input elp current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378785: fltTcaFcInputOtherErrors15minElpLast

Severity: variable

Explanation: This fault is caused by "input elp current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378786: fltTcaFcInputOtherErrors1hElpLast

Severity: variable

Explanation: This fault is caused by "input elp current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378787: fltTcaFcInputOtherErrors1dElpLast

Severity: variable

Explanation: This fault is caused by "input elp current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378788: fltTcaFcInputOtherErrors1wElpLast

Severity: variable

Explanation: This fault is caused by "input elp current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378789: fltTcaFcInputOtherErrors1moElpLast

Severity: variable

Explanation: This fault is caused by "input elp current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378790: fltTcaFcInputOtherErrors1qtrElpLast

Severity: variable

Explanation: This fault is caused by "input elp current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378791: fltTcaFcInputOtherErrors1yearElpLast

Severity: variable

Explanation: This fault is caused by "input elp current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378800: fltTcaFcInputOtherErrors5minElpCum

Severity: variable

Explanation: This fault is caused by "input elp cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378801: fltTcaFcInputOtherErrors15minElpCum

Severity: variable

Explanation: This fault is caused by "input elp cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378802: fltTcaFcInputOtherErrors1hElpCum

Severity: variable

Explanation: This fault is caused by "input elp cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378803: fltTcaFcInputOtherErrors1dElpCum

Severity: variable

Explanation: This fault is caused by "input elp cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378804: fltTcaFcInputOtherErrors1wElpCum

Severity: variable

Explanation: This fault is caused by "input elp cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378805: fltTcaFcInputOtherErrors1moElpCum

Severity: variable

Explanation: This fault is caused by "input elp cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378806: fltTcaFcInputOtherErrors1qtrElpCum

Severity: variable

Explanation: This fault is caused by "input elp cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378807: fltTcaFcInputOtherErrors1yearElpCum

Severity: variable

Explanation: This fault is caused by "input elp cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378808: fltTcaFcInputOtherErrors5minElpPer

Severity: variable

Explanation: This fault is caused by "input elp periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378809: fltTcaFcInputOtherErrors15minElpPer

Severity: variable

Explanation: This fault is caused by "input elp periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378810: fltTcaFcInputOtherErrors1hElpPer

Severity: variable

Explanation: This fault is caused by "input elp periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378811: fltTcaFcInputOtherErrors1dElpPer

Severity: variable

Explanation: This fault is caused by "input elp periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378812: fltTcaFcInputOtherErrors1wElpPer

Severity: variable

Explanation: This fault is caused by "input elp periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378813: fltTcaFcInputOtherErrors1moElpPer

Severity: variable

Explanation: This fault is caused by "input elp periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378814: fltTcaFcInputOtherErrors1qtrElpPer

Severity: variable

Explanation: This fault is caused by "input elp periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378815: fltTcaFcInputOtherErrors1yearElpPer

Severity: variable

Explanation: This fault is caused by "input elp periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378816: fltTcaFcInputOtherErrors5minElpMin

Severity: variable

Explanation: This fault is caused by "input elp minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378817: fltTcaFcInputOtherErrors15minElpMin

Severity: variable

Explanation: This fault is caused by "input elp minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378818: fltTcaFcInputOtherErrors1hElpMin

Severity: variable

Explanation: This fault is caused by "input elp minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378819: fltTcaFcInputOtherErrors1dElpMin

Severity: variable

Explanation: This fault is caused by "input elp minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378820: fltTcaFcInputOtherErrors1wElpMin

Severity: variable

Explanation: This fault is caused by "input elp minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378821: fltTcaFcInputOtherErrors1moElpMin

Severity: variable

Explanation: This fault is caused by "input elp minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378822: fltTcaFcInputOtherErrors1qtrElpMin

Severity: variable

Explanation: This fault is caused by "input elp minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378823: fltTcaFcInputOtherErrors1yearElpMin

Severity: variable

Explanation: This fault is caused by "input elp minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378824: fltTcaFcInputOtherErrors5minElpMax

Severity: variable

Explanation: This fault is caused by "input elp maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378825: fltTcaFcInputOtherErrors15minElpMax

Severity: variable

Explanation: This fault is caused by "input elp maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378826: fltTcaFcInputOtherErrors1hElpMax

Severity: variable

Explanation: This fault is caused by "input elp maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378827: fltTcaFcInputOtherErrors1dElpMax

Severity: variable

Explanation: This fault is caused by "input elp maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378828: fltTcaFcInputOtherErrors1wElpMax

Severity: variable

Explanation: This fault is caused by "input elp maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378829: fltTcaFcInputOtherErrors1moElpMax

Severity: variable

Explanation: This fault is caused by "input elp maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378830: fltTcaFcInputOtherErrors1qtrElpMax

Severity: variable

Explanation: This fault is caused by "input elp maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378831: fltTcaFcInputOtherErrors1yearElpMax

Severity: variable

Explanation: This fault is caused by "input elp maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378832: fltTcaFcInputOtherErrors5minElpAvg

Severity: variable

Explanation: This fault is caused by "input elp average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378833: fltTcaFcInputOtherErrors15minElpAvg

Severity: variable

Explanation: This fault is caused by "input elp average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378834: fltTcaFcInputOtherErrors1hElpAvg

Severity: variable

Explanation: This fault is caused by "input elp average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378835: fltTcaFcInputOtherErrors1dElpAvg

Severity: variable

Explanation: This fault is caused by "input elp average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378836: fltTcaFcInputOtherErrors1wElpAvg

Severity: variable

Explanation: This fault is caused by "input elp average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378837: fltTcaFcInputOtherErrors1moElpAvg

Severity: variable

Explanation: This fault is caused by "input elp average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378838: fltTcaFcInputOtherErrors1qtrElpAvg

Severity: variable

Explanation: This fault is caused by "input elp average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378839: fltTcaFcInputOtherErrors1yearElpAvg

Severity: variable

Explanation: This fault is caused by "input elp average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378864: fltTcaFcInputOtherErrors5minElpTr

Severity: variable

Explanation: This fault is caused by "input elp trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378865: fltTcaFcInputOtherErrors15minElpTr

Severity: variable

Explanation: This fault is caused by "input elp trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378866: fltTcaFcInputOtherErrors1hElpTr

Severity: variable

Explanation: This fault is caused by "input elp trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378867: fltTcaFcInputOtherErrors1dElpTr

Severity: variable

Explanation: This fault is caused by "input elp trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378868: fltTcaFcInputOtherErrors1wElpTr

Severity: variable

Explanation: This fault is caused by "input elp trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378869: fltTcaFcInputOtherErrors1moElpTr

Severity: variable

Explanation: This fault is caused by "input elp trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378870: fltTcaFcInputOtherErrors1qtrElpTr

Severity: variable

Explanation: This fault is caused by "input elp trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378871: fltTcaFcInputOtherErrors1yearElpTr

Severity: variable

Explanation: This fault is caused by "input elp trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378872: fltTcaFcInputOtherErrors5minElpRate

Severity: variable

Explanation: This fault is caused by "input elp rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378873: fltTcaFcInputOtherErrors15minElpRate

Severity: variable

Explanation: This fault is caused by "input elp rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378874: fltTcaFcInputOtherErrors1hElpRate

Severity: variable

Explanation: This fault is caused by "input elp rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378875: fltTcaFcInputOtherErrors1dElpRate

Severity: variable

Explanation: This fault is caused by "input elp rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378876: fltTcaFcInputOtherErrors1wElpRate

Severity: variable

Explanation: This fault is caused by "input elp rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378877: fltTcaFcInputOtherErrors1moElpRate

Severity: variable

Explanation: This fault is caused by "input elp rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378878: fltTcaFcInputOtherErrors1qtrElpRate

Severity: variable

Explanation: This fault is caused by "input elp rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378879: fltTcaFcInputOtherErrors1yearElpRate

Severity: variable

Explanation: This fault is caused by "input elp rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input elp" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378952: fltTcaFcInputOtherErrors5minFramingLast

Severity: variable

Explanation: This fault is caused by "input framing errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378953: fltTcaFcInputOtherErrors15minFramingLast

Severity: variable

Explanation: This fault is caused by "input framing errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378954: fltTcaFcInputOtherErrors1hFramingLast

Severity: variable

Explanation: This fault is caused by "input framing errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378955: fltTcaFcInputOtherErrors1dFramingLast

Severity: variable

Explanation: This fault is caused by "input framing errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378956: fltTcaFcInputOtherErrors1wFramingLast

Severity: variable

Explanation: This fault is caused by "input framing errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378957: fltTcaFcInputOtherErrors1moFramingLast

Severity: variable

Explanation: This fault is caused by "input framing errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378958: fltTcaFcInputOtherErrors1qtrFramingLast

Severity: variable

Explanation: This fault is caused by "input framing errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378959: fltTcaFcInputOtherErrors1yearFramingLast

Severity: variable

Explanation: This fault is caused by "input framing errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378968: fltTcaFcInputOtherErrors5minFramingCum

Severity: variable

Explanation: This fault is caused by "input framing errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378969: fltTcaFcInputOtherErrors15minFramingCum

Severity: variable

Explanation: This fault is caused by "input framing errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378970: fltTcaFcInputOtherErrors1hFramingCum

Severity: variable

Explanation: This fault is caused by "input framing errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378971: fltTcaFcInputOtherErrors1dFramingCum

Severity: variable

Explanation: This fault is caused by "input framing errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378972: fltTcaFcInputOtherErrors1wFramingCum

Severity: variable

Explanation: This fault is caused by "input framing errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378973: fltTcaFcInputOtherErrors1moFramingCum

Severity: variable

Explanation: This fault is caused by "input framing errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378974: fltTcaFcInputOtherErrors1qtrFramingCum

Severity: variable

Explanation: This fault is caused by "input framing errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378975: fltTcaFcInputOtherErrors1yearFramingCum

Severity: variable

Explanation: This fault is caused by "input framing errors cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378976: fltTcaFcInputOtherErrors5minFramingPer

Severity: variable

Explanation: This fault is caused by "input framing errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378977: fltTcaFcInputOtherErrors15minFramingPer

Severity: variable

Explanation: This fault is caused by "input framing errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378978: fltTcaFcInputOtherErrors1hFramingPer

Severity: variable

Explanation: This fault is caused by "input framing errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378979: fltTcaFcInputOtherErrors1dFramingPer

Severity: variable

Explanation: This fault is caused by "input framing errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378980: fltTcaFcInputOtherErrors1wFramingPer

Severity: variable

Explanation: This fault is caused by "input framing errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378981: fltTcaFcInputOtherErrors1moFramingPer

Severity: variable

Explanation: This fault is caused by "input framing errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378982: fltTcaFcInputOtherErrors1qtrFramingPer

Severity: variable

Explanation: This fault is caused by "input framing errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378983: fltTcaFcInputOtherErrors1yearFramingPer

Severity: variable

Explanation: This fault is caused by "input framing errors periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378984: fltTcaFcInputOtherErrors5minFramingMin

Severity: variable

Explanation: This fault is caused by "input framing errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378985: fltTcaFcInputOtherErrors15minFramingMin

Severity: variable

Explanation: This fault is caused by "input framing errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378986: fltTcaFcInputOtherErrors1hFramingMin

Severity: variable

Explanation: This fault is caused by "input framing errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378987: fltTcaFcInputOtherErrors1dFramingMin

Severity: variable

Explanation: This fault is caused by "input framing errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378988: fltTcaFcInputOtherErrors1wFramingMin

Severity: variable

Explanation: This fault is caused by "input framing errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378989: fltTcaFcInputOtherErrors1moFramingMin

Severity: variable

Explanation: This fault is caused by "input framing errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378990: fltTcaFcInputOtherErrors1qtrFramingMin

Severity: variable

Explanation: This fault is caused by "input framing errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378991: fltTcaFcInputOtherErrors1yearFramingMin

Severity: variable

Explanation: This fault is caused by "input framing errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378992: fltTcaFcInputOtherErrors5minFramingMax

Severity: variable

Explanation: This fault is caused by "input framing errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378993: fltTcaFcInputOtherErrors15minFramingMax

Severity: variable

Explanation: This fault is caused by "input framing errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378994: fltTcaFcInputOtherErrors1hFramingMax

Severity: variable

Explanation: This fault is caused by "input framing errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378995: fltTcaFcInputOtherErrors1dFramingMax

Severity: variable

Explanation: This fault is caused by "input framing errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378996: fltTcaFcInputOtherErrors1wFramingMax

Severity: variable

Explanation: This fault is caused by "input framing errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378997: fltTcaFcInputOtherErrors1moFramingMax

Severity: variable

Explanation: This fault is caused by "input framing errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378998: fltTcaFcInputOtherErrors1qtrFramingMax

Severity: variable

Explanation: This fault is caused by "input framing errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F378999: fltTcaFcInputOtherErrors1yearFramingMax

Severity: variable

Explanation: This fault is caused by "input framing errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3790: fltSpanRsSpanSrcToL1IfAttSrcToL1DummyErr

Severity: major

Explanation: This fault is raised because of hardware resource exhaustion caused by overlapping Span src paths across different Span Src Groups

Recommended Action: To recover from this fault, try the following

1. Reduce the number of overlapping Span src paths across Span Src Groups to remedy the issue

F379000: fltTcaFcInputOtherErrors5minFramingAvg

Severity: variable

Explanation: This fault is caused by "input framing errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379001: fltTcaFcInputOtherErrors15minFramingAvg

Severity: variable

Explanation: This fault is caused by "input framing errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379002: fltTcaFcInputOtherErrors1hFramingAvg

Severity: variable

Explanation: This fault is caused by "input framing errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379003: fltTcaFcInputOtherErrors1dFramingAvg

Severity: variable

Explanation: This fault is caused by "input framing errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379004: fltTcaFcInputOtherErrors1wFramingAvg

Severity: variable

Explanation: This fault is caused by "input framing errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379005: fltTcaFcInputOtherErrors1moFramingAvg

Severity: variable

Explanation: This fault is caused by "input framing errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379006: fltTcaFcInputOtherErrors1qtrFramingAvg

Severity: variable

Explanation: This fault is caused by "input framing errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379007: fltTcaFcInputOtherErrors1yearFramingAvg

Severity: variable

Explanation: This fault is caused by "input framing errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379032: fltTcaFcInputOtherErrors5minFramingTr

Severity: variable

Explanation: This fault is caused by "input framing errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379033: fltTcaFcInputOtherErrors15minFramingTr

Severity: variable

Explanation: This fault is caused by "input framing errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379034: fltTcaFcInputOtherErrors1hFramingTr

Severity: variable

Explanation: This fault is caused by "input framing errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379035: fltTcaFcInputOtherErrors1dFramingTr

Severity: variable

Explanation: This fault is caused by "input framing errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379036: fltTcaFcInputOtherErrors1wFramingTr

Severity: variable

Explanation: This fault is caused by "input framing errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379037: fltTcaFcInputOtherErrors1moFramingTr

Severity: variable

Explanation: This fault is caused by "input framing errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379038: fltTcaFcInputOtherErrors1qtrFramingTr

Severity: variable

Explanation: This fault is caused by "input framing errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379039: fltTcaFcInputOtherErrors1yearFramingTr

Severity: variable

Explanation: This fault is caused by "input framing errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379040: fltTcaFcInputOtherErrors5minFramingRate

Severity: variable

Explanation: This fault is caused by "input framing errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379041: fltTcaFcInputOtherErrors15minFramingRate

Severity: variable

Explanation: This fault is caused by "input framing errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379042: fltTcaFcInputOtherErrors1hFramingRate

Severity: variable

Explanation: This fault is caused by "input framing errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379043: fltTcaFcInputOtherErrors1dFramingRate

Severity: variable

Explanation: This fault is caused by "input framing errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379044: fltTcaFcInputOtherErrors1wFramingRate

Severity: variable

Explanation: This fault is caused by "input framing errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379045: fltTcaFcInputOtherErrors1moFramingRate

Severity: variable

Explanation: This fault is caused by "input framing errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379046: fltTcaFcInputOtherErrors1qtrFramingRate

Severity: variable

Explanation: This fault is caused by "input framing errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379047: fltTcaFcInputOtherErrors1yearFramingRate

Severity: variable

Explanation: This fault is caused by "input framing errors rate" statistical property crossing threshold level.

Recommended Action: Check the values of "input framing errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3791: fltSpanRsSpanSrcToL2CktEpAttSrcToL2DummyErr

Severity: major

Explanation: This fault is raised because of hardware resource exhaustion caused by overlapping Span src paths across different Span Src Groups

Recommended Action: To recover from this fault, try the following

1. Reduce the number of overlapping Span src paths across Span Src Groups to remedy the issue

F379120: fltTcaFcOutputCastFrames5minBroadcastLast

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379121: fltTcaFcOutputCastFrames15minBroadcastLast

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379122: fltTcaFcOutputCastFrames1hBroadcastLast

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379123: fltTcaFcOutputCastFrames1dBroadcastLast

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379124: fltTcaFcOutputCastFrames1wBroadcastLast

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379125: fltTcaFcOutputCastFrames1moBroadcastLast

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379126: fltTcaFcOutputCastFrames1qtrBroadcastLast

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379127: fltTcaFcOutputCastFrames1yearBroadcastLast

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379136: fltTcaFcOutputCastFrames5minBroadcastCum

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379137: fltTcaFcOutputCastFrames15minBroadcastCum

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379138: fltTcaFcOutputCastFrames1hBroadcastCum

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379139: fltTcaFcOutputCastFrames1dBroadcastCum

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379140: fltTcaFcOutputCastFrames1wBroadcastCum

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379141: fltTcaFcOutputCastFrames1moBroadcastCum

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379142: fltTcaFcOutputCastFrames1qtrBroadcastCum

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379143: fltTcaFcOutputCastFrames1yearBroadcastCum

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379144: fltTcaFcOutputCastFrames5minBroadcastPer

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379145: fltTcaFcOutputCastFrames15minBroadcastPer

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379146: fltTcaFcOutputCastFrames1hBroadcastPer

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379147: fltTcaFcOutputCastFrames1dBroadcastPer

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379148: fltTcaFcOutputCastFrames1wBroadcastPer

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379149: fltTcaFcOutputCastFrames1moBroadcastPer

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379150: fltTcaFcOutputCastFrames1qtrBroadcastPer

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379151: fltTcaFcOutputCastFrames1yearBroadcastPer

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379152: fltTcaFcOutputCastFrames5minBroadcastMin

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379153: fltTcaFcOutputCastFrames15minBroadcastMin

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379154: fltTcaFcOutputCastFrames1hBroadcastMin

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379155: fltTcaFcOutputCastFrames1dBroadcastMin

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379156: fltTcaFcOutputCastFrames1wBroadcastMin

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379157: fltTcaFcOutputCastFrames1moBroadcastMin

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379158: fltTcaFcOutputCastFrames1qtrBroadcastMin

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379159: fltTcaFcOutputCastFrames1yearBroadcastMin

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379160: fltTcaFcOutputCastFrames5minBroadcastMax

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379161: fltTcaFcOutputCastFrames15minBroadcastMax

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379162: fltTcaFcOutputCastFrames1hBroadcastMax

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379163: fltTcaFcOutputCastFrames1dBroadcastMax

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379164: fltTcaFcOutputCastFrames1wBroadcastMax

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379165: fltTcaFcOutputCastFrames1moBroadcastMax

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379166: fltTcaFcOutputCastFrames1qtrBroadcastMax

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379167: fltTcaFcOutputCastFrames1yearBroadcastMax

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379168: fltTcaFcOutputCastFrames5minBroadcastAvg

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379169: fltTcaFcOutputCastFrames15minBroadcastAvg

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379170: fltTcaFcOutputCastFrames1hBroadcastAvg

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379171: fltTcaFcOutputCastFrames1dBroadcastAvg

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379172: fltTcaFcOutputCastFrames1wBroadcastAvg

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379173: fltTcaFcOutputCastFrames1moBroadcastAvg

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379174: fltTcaFcOutputCastFrames1qtrBroadcastAvg

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379175: fltTcaFcOutputCastFrames1yearBroadcastAvg

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3792: fltSpanRsSpanSrcToL3OutAttSrcToL3DummyErr

Severity: major

Explanation: This fault is raised because of hardware resource exhaustion caused by overlapping Span src paths across different Span Src Groups

Recommended Action: To recover from this fault, try the following

1. Reduce the number of overlapping Span src paths across Span Src Groups to remedy the issue

F379200: fltTcaFcOutputCastFrames5minBroadcastTr

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379201: fltTcaFcOutputCastFrames15minBroadcastTr

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379202: fltTcaFcOutputCastFrames1hBroadcastTr

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379203: fltTcaFcOutputCastFrames1dBroadcastTr

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379204: fltTcaFcOutputCastFrames1wBroadcastTr

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379205: fltTcaFcOutputCastFrames1moBroadcastTr

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379206: fltTcaFcOutputCastFrames1qtrBroadcastTr

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379207: fltTcaFcOutputCastFrames1yearBroadcastTr

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379208: fltTcaFcOutputCastFrames5minBroadcastRate

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379209: fltTcaFcOutputCastFrames15minBroadcastRate

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379210: fltTcaFcOutputCastFrames1hBroadcastRate

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379211: fltTcaFcOutputCastFrames1dBroadcastRate

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379212: fltTcaFcOutputCastFrames1wBroadcastRate

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379213: fltTcaFcOutputCastFrames1moBroadcastRate

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379214: fltTcaFcOutputCastFrames1qtrBroadcastRate

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379215: fltTcaFcOutputCastFrames1yearBroadcastRate

Severity: variable

Explanation: This fault is caused by "Output Broadcast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Broadcast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379288: fltTcaFcOutputCastFrames5minMulticastLast

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379289: fltTcaFcOutputCastFrames15minMulticastLast

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379290: fltTcaFcOutputCastFrames1hMulticastLast

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379291: fltTcaFcOutputCastFrames1dMulticastLast

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379292: fltTcaFcOutputCastFrames1wMulticastLast

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379293: fltTcaFcOutputCastFrames1moMulticastLast

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379294: fltTcaFcOutputCastFrames1qtrMulticastLast

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379295: fltTcaFcOutputCastFrames1yearMulticastLast

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379304: fltTcaFcOutputCastFrames5minMulticastCum

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379305: fltTcaFcOutputCastFrames15minMulticastCum

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379306: fltTcaFcOutputCastFrames1hMulticastCum

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379307: fltTcaFcOutputCastFrames1dMulticastCum

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379308: fltTcaFcOutputCastFrames1wMulticastCum

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379309: fltTcaFcOutputCastFrames1moMulticastCum

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379310: fltTcaFcOutputCastFrames1qtrMulticastCum

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379311: fltTcaFcOutputCastFrames1yearMulticastCum

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379312: fltTcaFcOutputCastFrames5minMulticastPer

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379313: fltTcaFcOutputCastFrames15minMulticastPer

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379314: fltTcaFcOutputCastFrames1hMulticastPer

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379315: fltTcaFcOutputCastFrames1dMulticastPer

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379316: fltTcaFcOutputCastFrames1wMulticastPer

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379317: fltTcaFcOutputCastFrames1moMulticastPer

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379318: fltTcaFcOutputCastFrames1qtrMulticastPer

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379319: fltTcaFcOutputCastFrames1yearMulticastPer

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379320: fltTcaFcOutputCastFrames5minMulticastMin

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379321: fltTcaFcOutputCastFrames15minMulticastMin

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379322: fltTcaFcOutputCastFrames1hMulticastMin

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379323: fltTcaFcOutputCastFrames1dMulticastMin

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379324: fltTcaFcOutputCastFrames1wMulticastMin

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379325: fltTcaFcOutputCastFrames1moMulticastMin

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379326: fltTcaFcOutputCastFrames1qtrMulticastMin

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379327: fltTcaFcOutputCastFrames1yearMulticastMin

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379328: fltTcaFcOutputCastFrames5minMulticastMax

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379329: fltTcaFcOutputCastFrames15minMulticastMax

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379330: fltTcaFcOutputCastFrames1hMulticastMax

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379331: fltTcaFcOutputCastFrames1dMulticastMax

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379332: fltTcaFcOutputCastFrames1wMulticastMax

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379333: fltTcaFcOutputCastFrames1moMulticastMax

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379334: fltTcaFcOutputCastFrames1qtrMulticastMax

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379335: fltTcaFcOutputCastFrames1yearMulticastMax

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379336: fltTcaFcOutputCastFrames5minMulticastAvg

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379337: fltTcaFcOutputCastFrames15minMulticastAvg

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379338: fltTcaFcOutputCastFrames1hMulticastAvg

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379339: fltTcaFcOutputCastFrames1dMulticastAvg

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379340: fltTcaFcOutputCastFrames1wMulticastAvg

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379341: fltTcaFcOutputCastFrames1moMulticastAvg

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379342: fltTcaFcOutputCastFrames1qtrMulticastAvg

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379343: fltTcaFcOutputCastFrames1yearMulticastAvg

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379368: fltTcaFcOutputCastFrames5minMulticastTr

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379369: fltTcaFcOutputCastFrames15minMulticastTr

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379370: fltTcaFcOutputCastFrames1hMulticastTr

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379371: fltTcaFcOutputCastFrames1dMulticastTr

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379372: fltTcaFcOutputCastFrames1wMulticastTr

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379373: fltTcaFcOutputCastFrames1moMulticastTr

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379374: fltTcaFcOutputCastFrames1qtrMulticastTr

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379375: fltTcaFcOutputCastFrames1yearMulticastTr

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379376: fltTcaFcOutputCastFrames5minMulticastRate

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379377: fltTcaFcOutputCastFrames15minMulticastRate

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379378: fltTcaFcOutputCastFrames1hMulticastRate

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379379: fltTcaFcOutputCastFrames1dMulticastRate

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379380: fltTcaFcOutputCastFrames1wMulticastRate

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379381: fltTcaFcOutputCastFrames1moMulticastRate

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379382: fltTcaFcOutputCastFrames1qtrMulticastRate

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379383: fltTcaFcOutputCastFrames1yearMulticastRate

Severity: variable

Explanation: This fault is caused by "Output Multicast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Multicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379456: fltTcaFcOutputCastFrames5minUnicastLast

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379457: fltTcaFcOutputCastFrames15minUnicastLast

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379458: fltTcaFcOutputCastFrames1hUnicastLast

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379459: fltTcaFcOutputCastFrames1dUnicastLast

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379460: fltTcaFcOutputCastFrames1wUnicastLast

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379461: fltTcaFcOutputCastFrames1moUnicastLast

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379462: fltTcaFcOutputCastFrames1qtrUnicastLast

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379463: fltTcaFcOutputCastFrames1yearUnicastLast

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379472: fltTcaFcOutputCastFrames5minUnicastCum

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379473: fltTcaFcOutputCastFrames15minUnicastCum

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379474: fltTcaFcOutputCastFrames1hUnicastCum

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379475: fltTcaFcOutputCastFrames1dUnicastCum

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379476: fltTcaFcOutputCastFrames1wUnicastCum

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379477: fltTcaFcOutputCastFrames1moUnicastCum

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379478: fltTcaFcOutputCastFrames1qtrUnicastCum

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379479: fltTcaFcOutputCastFrames1yearUnicastCum

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379480: fltTcaFcOutputCastFrames5minUnicastPer

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379481: fltTcaFcOutputCastFrames15minUnicastPer

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379482: fltTcaFcOutputCastFrames1hUnicastPer

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379483: fltTcaFcOutputCastFrames1dUnicastPer

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379484: fltTcaFcOutputCastFrames1wUnicastPer

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379485: fltTcaFcOutputCastFrames1moUnicastPer

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379486: fltTcaFcOutputCastFrames1qtrUnicastPer

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379487: fltTcaFcOutputCastFrames1yearUnicastPer

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379488: fltTcaFcOutputCastFrames5minUnicastMin

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379489: fltTcaFcOutputCastFrames15minUnicastMin

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379490: fltTcaFcOutputCastFrames1hUnicastMin

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379491: fltTcaFcOutputCastFrames1dUnicastMin

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379492: fltTcaFcOutputCastFrames1wUnicastMin

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379493: fltTcaFcOutputCastFrames1moUnicastMin

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379494: fltTcaFcOutputCastFrames1qtrUnicastMin

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379495: fltTcaFcOutputCastFrames1yearUnicastMin

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379496: fltTcaFcOutputCastFrames5minUnicastMax

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379497: fltTcaFcOutputCastFrames15minUnicastMax

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379498: fltTcaFcOutputCastFrames1hUnicastMax

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379499: fltTcaFcOutputCastFrames1dUnicastMax

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379500: fltTcaFcOutputCastFrames1wUnicastMax

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379501: fltTcaFcOutputCastFrames1moUnicastMax

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379502: fltTcaFcOutputCastFrames1qtrUnicastMax

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379503: fltTcaFcOutputCastFrames1yearUnicastMax

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379504: fltTcaFcOutputCastFrames5minUnicastAvg

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379505: fltTcaFcOutputCastFrames15minUnicastAvg

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379506: fltTcaFcOutputCastFrames1hUnicastAvg

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379507: fltTcaFcOutputCastFrames1dUnicastAvg

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379508: fltTcaFcOutputCastFrames1wUnicastAvg

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379509: fltTcaFcOutputCastFrames1moUnicastAvg

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379510: fltTcaFcOutputCastFrames1qtrUnicastAvg

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379511: fltTcaFcOutputCastFrames1yearUnicastAvg

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379536: fltTcaFcOutputCastFrames5minUnicastTr

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379537: fltTcaFcOutputCastFrames15minUnicastTr

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379538: fltTcaFcOutputCastFrames1hUnicastTr

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379539: fltTcaFcOutputCastFrames1dUnicastTr

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379540: fltTcaFcOutputCastFrames1wUnicastTr

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379541: fltTcaFcOutputCastFrames1moUnicastTr

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379542: fltTcaFcOutputCastFrames1qtrUnicastTr

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379543: fltTcaFcOutputCastFrames1yearUnicastTr

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379544: fltTcaFcOutputCastFrames5minUnicastRate

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379545: fltTcaFcOutputCastFrames15minUnicastRate

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379546: fltTcaFcOutputCastFrames1hUnicastRate

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379547: fltTcaFcOutputCastFrames1dUnicastRate

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379548: fltTcaFcOutputCastFrames1wUnicastRate

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379549: fltTcaFcOutputCastFrames1moUnicastRate

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379550: fltTcaFcOutputCastFrames1qtrUnicastRate

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379551: fltTcaFcOutputCastFrames1yearUnicastRate

Severity: variable

Explanation: This fault is caused by "Output Unicast Frames rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Output Unicast Frames" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379624: fltTcaFcOutputLIPErrors5minF8LipErrorLast

Severity: variable

Explanation: This fault is caused by "output f8 lip error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379625: fltTcaFcOutputLIPErrors15minF8LipErrorLast

Severity: variable

Explanation: This fault is caused by "output f8 lip error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379626: fltTcaFcOutputLIPErrors1hF8LipErrorLast

Severity: variable

Explanation: This fault is caused by "output f8 lip error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379627: fltTcaFcOutputLIPErrors1dF8LipErrorLast

Severity: variable

Explanation: This fault is caused by "output f8 lip error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379628: fltTcaFcOutputLIPErrors1wF8LipErrorLast

Severity: variable

Explanation: This fault is caused by "output f8 lip error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379629: fltTcaFcOutputLIPErrors1moF8LipErrorLast

Severity: variable

Explanation: This fault is caused by "output f8 lip error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379630: fltTcaFcOutputLIPErrors1qtrF8LipErrorLast

Severity: variable

Explanation: This fault is caused by "output f8 lip error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379631: fltTcaFcOutputLIPErrors1yearF8LipErrorLast

Severity: variable

Explanation: This fault is caused by "output f8 lip error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379640: fltTcaFcOutputLIPErrors5minF8LipErrorCum

Severity: variable

Explanation: This fault is caused by "output f8 lip error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379641: fltTcaFcOutputLIPErrors15minF8LipErrorCum

Severity: variable

Explanation: This fault is caused by "output f8 lip error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379642: fltTcaFcOutputLIPErrors1hF8LipErrorCum

Severity: variable

Explanation: This fault is caused by "output f8 lip error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379643: fltTcaFcOutputLIPErrors1dF8LipErrorCum

Severity: variable

Explanation: This fault is caused by "output f8 lip error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379644: fltTcaFcOutputLIPErrors1wF8LipErrorCum

Severity: variable

Explanation: This fault is caused by "output f8 lip error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379645: fltTcaFcOutputLIPErrors1moF8LipErrorCum

Severity: variable

Explanation: This fault is caused by "output f8 lip error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379646: fltTcaFcOutputLIPErrors1qtrF8LipErrorCum

Severity: variable

Explanation: This fault is caused by "output f8 lip error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379647: fltTcaFcOutputLIPErrors1yearF8LipErrorCum

Severity: variable

Explanation: This fault is caused by "output f8 lip error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379648: fltTcaFcOutputLIPErrors5minF8LipErrorPer

Severity: variable

Explanation: This fault is caused by "output f8 lip error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379649: fltTcaFcOutputLIPErrors15minF8LipErrorPer

Severity: variable

Explanation: This fault is caused by "output f8 lip error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379650: fltTcaFcOutputLIPErrors1hF8LipErrorPer

Severity: variable

Explanation: This fault is caused by "output f8 lip error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379651: fltTcaFcOutputLIPErrors1dF8LipErrorPer

Severity: variable

Explanation: This fault is caused by "output f8 lip error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379652: fltTcaFcOutputLIPErrors1wF8LipErrorPer

Severity: variable

Explanation: This fault is caused by "output f8 lip error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379653: fltTcaFcOutputLIPErrors1moF8LipErrorPer

Severity: variable

Explanation: This fault is caused by "output f8 lip error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379654: fltTcaFcOutputLIPErrors1qtrF8LipErrorPer

Severity: variable

Explanation: This fault is caused by "output f8 lip error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379655: fltTcaFcOutputLIPErrors1yearF8LipErrorPer

Severity: variable

Explanation: This fault is caused by "output f8 lip error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379656: fltTcaFcOutputLIPErrors5minF8LipErrorMin

Severity: variable

Explanation: This fault is caused by "output f8 lip error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379657: fltTcaFcOutputLIPErrors15minF8LipErrorMin

Severity: variable

Explanation: This fault is caused by "output f8 lip error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379658: fltTcaFcOutputLIPErrors1hF8LipErrorMin

Severity: variable

Explanation: This fault is caused by "output f8 lip error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379659: fltTcaFcOutputLIPErrors1dF8LipErrorMin

Severity: variable

Explanation: This fault is caused by "output f8 lip error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379660: fltTcaFcOutputLIPErrors1wF8LipErrorMin

Severity: variable

Explanation: This fault is caused by "output f8 lip error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379661: fltTcaFcOutputLIPErrors1moF8LipErrorMin

Severity: variable

Explanation: This fault is caused by "output f8 lip error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379662: fltTcaFcOutputLIPErrors1qtrF8LipErrorMin

Severity: variable

Explanation: This fault is caused by "output f8 lip error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379663: fltTcaFcOutputLIPErrors1yearF8LipErrorMin

Severity: variable

Explanation: This fault is caused by "output f8 lip error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379664: fltTcaFcOutputLIPErrors5minF8LipErrorMax

Severity: variable

Explanation: This fault is caused by "output f8 lip error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379665: fltTcaFcOutputLIPErrors15minF8LipErrorMax

Severity: variable

Explanation: This fault is caused by "output f8 lip error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379666: fltTcaFcOutputLIPErrors1hF8LipErrorMax

Severity: variable

Explanation: This fault is caused by "output f8 lip error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379667: fltTcaFcOutputLIPErrors1dF8LipErrorMax

Severity: variable

Explanation: This fault is caused by "output f8 lip error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379668: fltTcaFcOutputLIPErrors1wF8LipErrorMax

Severity: variable

Explanation: This fault is caused by "output f8 lip error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379669: fltTcaFcOutputLIPErrors1moF8LipErrorMax

Severity: variable

Explanation: This fault is caused by "output f8 lip error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379670: fltTcaFcOutputLIPErrors1qtrF8LipErrorMax

Severity: variable

Explanation: This fault is caused by "output f8 lip error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379671: fltTcaFcOutputLIPErrors1yearF8LipErrorMax

Severity: variable

Explanation: This fault is caused by "output f8 lip error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379672: fltTcaFcOutputLIPErrors5minF8LipErrorAvg

Severity: variable

Explanation: This fault is caused by "output f8 lip error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379673: fltTcaFcOutputLIPErrors15minF8LipErrorAvg

Severity: variable

Explanation: This fault is caused by "output f8 lip error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379674: fltTcaFcOutputLIPErrors1hF8LipErrorAvg

Severity: variable

Explanation: This fault is caused by "output f8 lip error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379675: fltTcaFcOutputLIPErrors1dF8LipErrorAvg

Severity: variable

Explanation: This fault is caused by "output f8 lip error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379676: fltTcaFcOutputLIPErrors1wF8LipErrorAvg

Severity: variable

Explanation: This fault is caused by "output f8 lip error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379677: fltTcaFcOutputLIPErrors1moF8LipErrorAvg

Severity: variable

Explanation: This fault is caused by "output f8 lip error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379678: fltTcaFcOutputLIPErrors1qtrF8LipErrorAvg

Severity: variable

Explanation: This fault is caused by "output f8 lip error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379679: fltTcaFcOutputLIPErrors1yearF8LipErrorAvg

Severity: variable

Explanation: This fault is caused by "output f8 lip error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379704: fltTcaFcOutputLIPErrors5minF8LipErrorTr

Severity: variable

Explanation: This fault is caused by "output f8 lip error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379705: fltTcaFcOutputLIPErrors15minF8LipErrorTr

Severity: variable

Explanation: This fault is caused by "output f8 lip error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379706: fltTcaFcOutputLIPErrors1hF8LipErrorTr

Severity: variable

Explanation: This fault is caused by "output f8 lip error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379707: fltTcaFcOutputLIPErrors1dF8LipErrorTr

Severity: variable

Explanation: This fault is caused by "output f8 lip error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379708: fltTcaFcOutputLIPErrors1wF8LipErrorTr

Severity: variable

Explanation: This fault is caused by "output f8 lip error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379709: fltTcaFcOutputLIPErrors1moF8LipErrorTr

Severity: variable

Explanation: This fault is caused by "output f8 lip error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379710: fltTcaFcOutputLIPErrors1qtrF8LipErrorTr

Severity: variable

Explanation: This fault is caused by "output f8 lip error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379711: fltTcaFcOutputLIPErrors1yearF8LipErrorTr

Severity: variable

Explanation: This fault is caused by "output f8 lip error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379712: fltTcaFcOutputLIPErrors5minF8LipErrorRate

Severity: variable

Explanation: This fault is caused by "output f8 lip error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379713: fltTcaFcOutputLIPErrors15minF8LipErrorRate

Severity: variable

Explanation: This fault is caused by "output f8 lip error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379714: fltTcaFcOutputLIPErrors1hF8LipErrorRate

Severity: variable

Explanation: This fault is caused by "output f8 lip error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379715: fltTcaFcOutputLIPErrors1dF8LipErrorRate

Severity: variable

Explanation: This fault is caused by "output f8 lip error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379716: fltTcaFcOutputLIPErrors1wF8LipErrorRate

Severity: variable

Explanation: This fault is caused by "output f8 lip error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379717: fltTcaFcOutputLIPErrors1moF8LipErrorRate

Severity: variable

Explanation: This fault is caused by "output f8 lip error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379718: fltTcaFcOutputLIPErrors1qtrF8LipErrorRate

Severity: variable

Explanation: This fault is caused by "output f8 lip error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379719: fltTcaFcOutputLIPErrors1yearF8LipErrorRate

Severity: variable

Explanation: This fault is caused by "output f8 lip error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379792: fltTcaFcOutputLIPErrors5minNonf8LipErrorLast

Severity: variable

Explanation: This fault is caused by "output non f8 lip error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379793: fltTcaFcOutputLIPErrors15minNonf8LipErrorLast

Severity: variable

Explanation: This fault is caused by "output non f8 lip error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379794: fltTcaFcOutputLIPErrors1hNonf8LipErrorLast

Severity: variable

Explanation: This fault is caused by "output non f8 lip error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379795: fltTcaFcOutputLIPErrors1dNonf8LipErrorLast

Severity: variable

Explanation: This fault is caused by "output non f8 lip error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379796: fltTcaFcOutputLIPErrors1wNonf8LipErrorLast

Severity: variable

Explanation: This fault is caused by "output non f8 lip error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379797: fltTcaFcOutputLIPErrors1moNonf8LipErrorLast

Severity: variable

Explanation: This fault is caused by "output non f8 lip error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379798: fltTcaFcOutputLIPErrors1qtrNonf8LipErrorLast

Severity: variable

Explanation: This fault is caused by "output non f8 lip error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379799: fltTcaFcOutputLIPErrors1yearNonf8LipErrorLast

Severity: variable

Explanation: This fault is caused by "output non f8 lip error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3798: fltBfdRsMhNodePolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F379808: fltTcaFcOutputLIPErrors5minNonf8LipErrorCum

Severity: variable

Explanation: This fault is caused by "output non f8 lip error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379809: fltTcaFcOutputLIPErrors15minNonf8LipErrorCum

Severity: variable

Explanation: This fault is caused by "output non f8 lip error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379810: fltTcaFcOutputLIPErrors1hNonf8LipErrorCum

Severity: variable

Explanation: This fault is caused by "output non f8 lip error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379811: fltTcaFcOutputLIPErrors1dNonf8LipErrorCum

Severity: variable

Explanation: This fault is caused by "output non f8 lip error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379812: fltTcaFcOutputLIPErrors1wNonf8LipErrorCum

Severity: variable

Explanation: This fault is caused by "output non f8 lip error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379813: fltTcaFcOutputLIPErrors1moNonf8LipErrorCum

Severity: variable

Explanation: This fault is caused by "output non f8 lip error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379814: fltTcaFcOutputLIPErrors1qtrNonf8LipErrorCum

Severity: variable

Explanation: This fault is caused by "output non f8 lip error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379815: fltTcaFcOutputLIPErrors1yearNonf8LipErrorCum

Severity: variable

Explanation: This fault is caused by "output non f8 lip error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379816: fltTcaFcOutputLIPErrors5minNonf8LipErrorPer

Severity: variable

Explanation: This fault is caused by "output non f8 lip error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379817: fltTcaFcOutputLIPErrors15minNonf8LipErrorPer

Severity: variable

Explanation: This fault is caused by "output non f8 lip error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379818: fltTcaFcOutputLIPErrors1hNonf8LipErrorPer

Severity: variable

Explanation: This fault is caused by "output non f8 lip error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379819: fltTcaFcOutputLIPErrors1dNonf8LipErrorPer

Severity: variable

Explanation: This fault is caused by "output non f8 lip error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379820: fltTcaFcOutputLIPErrors1wNonf8LipErrorPer

Severity: variable

Explanation: This fault is caused by "output non f8 lip error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379821: fltTcaFcOutputLIPErrors1moNonf8LipErrorPer

Severity: variable

Explanation: This fault is caused by "output non f8 lip error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379822: fltTcaFcOutputLIPErrors1qtrNonf8LipErrorPer

Severity: variable

Explanation: This fault is caused by "output non f8 lip error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379823: fltTcaFcOutputLIPErrors1yearNonf8LipErrorPer

Severity: variable

Explanation: This fault is caused by "output non f8 lip error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379824: fltTcaFcOutputLIPErrors5minNonf8LipErrorMin

Severity: variable

Explanation: This fault is caused by "output non f8 lip error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379825: fltTcaFcOutputLIPErrors15minNonf8LipErrorMin

Severity: variable

Explanation: This fault is caused by "output non f8 lip error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379826: fltTcaFcOutputLIPErrors1hNonf8LipErrorMin

Severity: variable

Explanation: This fault is caused by "output non f8 lip error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379827: fltTcaFcOutputLIPErrors1dNonf8LipErrorMin

Severity: variable

Explanation: This fault is caused by "output non f8 lip error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379828: fltTcaFcOutputLIPErrors1wNonf8LipErrorMin

Severity: variable

Explanation: This fault is caused by "output non f8 lip error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379829: fltTcaFcOutputLIPErrors1moNonf8LipErrorMin

Severity: variable

Explanation: This fault is caused by "output non f8 lip error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379830: fltTcaFcOutputLIPErrors1qtrNonf8LipErrorMin

Severity: variable

Explanation: This fault is caused by "output non f8 lip error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379831: fltTcaFcOutputLIPErrors1yearNonf8LipErrorMin

Severity: variable

Explanation: This fault is caused by "output non f8 lip error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379832: fltTcaFcOutputLIPErrors5minNonf8LipErrorMax

Severity: variable

Explanation: This fault is caused by "output non f8 lip error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379833: fltTcaFcOutputLIPErrors15minNonf8LipErrorMax

Severity: variable

Explanation: This fault is caused by "output non f8 lip error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379834: fltTcaFcOutputLIPErrors1hNonf8LipErrorMax

Severity: variable

Explanation: This fault is caused by "output non f8 lip error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379835: fltTcaFcOutputLIPErrors1dNonf8LipErrorMax

Severity: variable

Explanation: This fault is caused by "output non f8 lip error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379836: fltTcaFcOutputLIPErrors1wNonf8LipErrorMax

Severity: variable

Explanation: This fault is caused by "output non f8 lip error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379837: fltTcaFcOutputLIPErrors1moNonf8LipErrorMax

Severity: variable

Explanation: This fault is caused by "output non f8 lip error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379838: fltTcaFcOutputLIPErrors1qtrNonf8LipErrorMax

Severity: variable

Explanation: This fault is caused by "output non f8 lip error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379839: fltTcaFcOutputLIPErrors1yearNonf8LipErrorMax

Severity: variable

Explanation: This fault is caused by "output non f8 lip error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379840: fltTcaFcOutputLIPErrors5minNonf8LipErrorAvg

Severity: variable

Explanation: This fault is caused by "output non f8 lip error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379841: fltTcaFcOutputLIPErrors15minNonf8LipErrorAvg

Severity: variable

Explanation: This fault is caused by "output non f8 lip error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379842: fltTcaFcOutputLIPErrors1hNonf8LipErrorAvg

Severity: variable

Explanation: This fault is caused by "output non f8 lip error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379843: fltTcaFcOutputLIPErrors1dNonf8LipErrorAvg

Severity: variable

Explanation: This fault is caused by "output non f8 lip error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379844: fltTcaFcOutputLIPErrors1wNonf8LipErrorAvg

Severity: variable

Explanation: This fault is caused by "output non f8 lip error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379845: fltTcaFcOutputLIPErrors1moNonf8LipErrorAvg

Severity: variable

Explanation: This fault is caused by "output non f8 lip error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379846: fltTcaFcOutputLIPErrors1qtrNonf8LipErrorAvg

Severity: variable

Explanation: This fault is caused by "output non f8 lip error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379847: fltTcaFcOutputLIPErrors1yearNonf8LipErrorAvg

Severity: variable

Explanation: This fault is caused by "output non f8 lip error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379872: fltTcaFcOutputLIPErrors5minNonf8LipErrorTr

Severity: variable

Explanation: This fault is caused by "output non f8 lip error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379873: fltTcaFcOutputLIPErrors15minNonf8LipErrorTr

Severity: variable

Explanation: This fault is caused by "output non f8 lip error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379874: fltTcaFcOutputLIPErrors1hNonf8LipErrorTr

Severity: variable

Explanation: This fault is caused by "output non f8 lip error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379875: fltTcaFcOutputLIPErrors1dNonf8LipErrorTr

Severity: variable

Explanation: This fault is caused by "output non f8 lip error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379876: fltTcaFcOutputLIPErrors1wNonf8LipErrorTr

Severity: variable

Explanation: This fault is caused by "output non f8 lip error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379877: fltTcaFcOutputLIPErrors1moNonf8LipErrorTr

Severity: variable

Explanation: This fault is caused by "output non f8 lip error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379878: fltTcaFcOutputLIPErrors1qtrNonf8LipErrorTr

Severity: variable

Explanation: This fault is caused by "output non f8 lip error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379879: fltTcaFcOutputLIPErrors1yearNonf8LipErrorTr

Severity: variable

Explanation: This fault is caused by "output non f8 lip error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379880: fltTcaFcOutputLIPErrors5minNonf8LipErrorRate

Severity: variable

Explanation: This fault is caused by "output non f8 lip error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379881: fltTcaFcOutputLIPErrors15minNonf8LipErrorRate

Severity: variable

Explanation: This fault is caused by "output non f8 lip error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379882: fltTcaFcOutputLIPErrors1hNonf8LipErrorRate

Severity: variable

Explanation: This fault is caused by "output non f8 lip error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379883: fltTcaFcOutputLIPErrors1dNonf8LipErrorRate

Severity: variable

Explanation: This fault is caused by "output non f8 lip error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379884: fltTcaFcOutputLIPErrors1wNonf8LipErrorRate

Severity: variable

Explanation: This fault is caused by "output non f8 lip error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379885: fltTcaFcOutputLIPErrors1moNonf8LipErrorRate

Severity: variable

Explanation: This fault is caused by "output non f8 lip error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379886: fltTcaFcOutputLIPErrors1qtrNonf8LipErrorRate

Severity: variable

Explanation: This fault is caused by "output non f8 lip error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F379887: fltTcaFcOutputLIPErrors1yearNonf8LipErrorRate

Severity: variable

Explanation: This fault is caused by "output non f8 lip error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "output non f8 lip error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3799: fltInfraRsBfdMhIpv4InstPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3800: fltInfraRsBfdMhIpv6InstPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3804: fltInfraRsLinkFlapPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F381328: fltTcaEqptIngrErrPkts5minCrcLast

Severity: variable

Explanation: This fault is caused by "CRC Align Errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F381329: fltTcaEqptIngrErrPkts15minCrcLast

Severity: variable

Explanation: This fault is caused by "CRC Align Errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F381330: fltTcaEqptIngrErrPkts1hCrcLast

Severity: variable

Explanation: This fault is caused by "CRC Align Errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F381331: fltTcaEqptIngrErrPkts1dCrcLast

Severity: variable

Explanation: This fault is caused by "CRC Align Errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F381332: fltTcaEqptIngrErrPkts1wCrcLast

Severity: variable

Explanation: This fault is caused by "CRC Align Errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F381333: fltTcaEqptIngrErrPkts1moCrcLast

Severity: variable

Explanation: This fault is caused by "CRC Align Errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F381334: fltTcaEqptIngrErrPkts1qtrCrcLast

Severity: variable

Explanation: This fault is caused by "CRC Align Errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F381335: fltTcaEqptIngrErrPkts1yearCrcLast

Severity: variable

Explanation: This fault is caused by "CRC Align Errors current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F381360: fltTcaEqptIngrErrPkts5minCrcMin

Severity: variable

Explanation: This fault is caused by "CRC Align Errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F381361: fltTcaEqptIngrErrPkts15minCrcMin

Severity: variable

Explanation: This fault is caused by "CRC Align Errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F381362: fltTcaEqptIngrErrPkts1hCrcMin

Severity: variable

Explanation: This fault is caused by "CRC Align Errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F381363: fltTcaEqptIngrErrPkts1dCrcMin

Severity: variable

Explanation: This fault is caused by "CRC Align Errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F381364: fltTcaEqptIngrErrPkts1wCrcMin

Severity: variable

Explanation: This fault is caused by "CRC Align Errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F381365: fltTcaEqptIngrErrPkts1moCrcMin

Severity: variable

Explanation: This fault is caused by "CRC Align Errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F381366: fltTcaEqptIngrErrPkts1qtrCrcMin

Severity: variable

Explanation: This fault is caused by "CRC Align Errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F381367: fltTcaEqptIngrErrPkts1yearCrcMin

Severity: variable

Explanation: This fault is caused by "CRC Align Errors minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F381368: fltTcaEqptIngrErrPkts5minCrcMax

Severity: variable

Explanation: This fault is caused by "CRC Align Errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F381369: fltTcaEqptIngrErrPkts15minCrcMax

Severity: variable

Explanation: This fault is caused by "CRC Align Errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F381370: fltTcaEqptIngrErrPkts1hCrcMax

Severity: variable

Explanation: This fault is caused by "CRC Align Errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F381371: fltTcaEqptIngrErrPkts1dCrcMax

Severity: variable

Explanation: This fault is caused by "CRC Align Errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F381372: fltTcaEqptIngrErrPkts1wCrcMax

Severity: variable

Explanation: This fault is caused by "CRC Align Errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F381373: fltTcaEqptIngrErrPkts1moCrcMax

Severity: variable

Explanation: This fault is caused by "CRC Align Errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F381374: fltTcaEqptIngrErrPkts1qtrCrcMax

Severity: variable

Explanation: This fault is caused by "CRC Align Errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F381375: fltTcaEqptIngrErrPkts1yearCrcMax

Severity: variable

Explanation: This fault is caused by "CRC Align Errors maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F381376: fltTcaEqptIngrErrPkts5minCrcAvg

Severity: variable

Explanation: This fault is caused by "CRC Align Errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F381377: fltTcaEqptIngrErrPkts15minCrcAvg

Severity: variable

Explanation: This fault is caused by "CRC Align Errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F381378: fltTcaEqptIngrErrPkts1hCrcAvg

Severity: variable

Explanation: This fault is caused by "CRC Align Errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F381379: fltTcaEqptIngrErrPkts1dCrcAvg

Severity: variable

Explanation: This fault is caused by "CRC Align Errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F381380: fltTcaEqptIngrErrPkts1wCrcAvg

Severity: variable

Explanation: This fault is caused by "CRC Align Errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F381381: fltTcaEqptIngrErrPkts1moCrcAvg

Severity: variable

Explanation: This fault is caused by "CRC Align Errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F381382: fltTcaEqptIngrErrPkts1qtrCrcAvg

Severity: variable

Explanation: This fault is caused by "CRC Align Errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F381383: fltTcaEqptIngrErrPkts1yearCrcAvg

Severity: variable

Explanation: This fault is caused by "CRC Align Errors average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F381408: fltTcaEqptIngrErrPkts5minCrcTr

Severity: variable

Explanation: This fault is caused by "CRC Align Errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F381409: fltTcaEqptIngrErrPkts15minCrcTr

Severity: variable

Explanation: This fault is caused by "CRC Align Errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F381410: fltTcaEqptIngrErrPkts1hCrcTr

Severity: variable

Explanation: This fault is caused by "CRC Align Errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F381411: fltTcaEqptIngrErrPkts1dCrcTr

Severity: variable

Explanation: This fault is caused by "CRC Align Errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F381412: fltTcaEqptIngrErrPkts1wCrcTr

Severity: variable

Explanation: This fault is caused by "CRC Align Errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F381413: fltTcaEqptIngrErrPkts1moCrcTr

Severity: variable

Explanation: This fault is caused by "CRC Align Errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F381414: fltTcaEqptIngrErrPkts1qtrCrcTr

Severity: variable

Explanation: This fault is caused by "CRC Align Errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F381415: fltTcaEqptIngrErrPkts1yearCrcTr

Severity: variable

Explanation: This fault is caused by "CRC Align Errors trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errors" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3821: fltHcloudStorageAccountOperCloudStorageAccountOperStateDown

Severity: major

Explanation: This fault occurs when the Storage Account is down.

Recommended Action: If you see this fault, take the following actions:

1. If fault still has not cleared, please contact Cisco TAC.

F3832: fltCloudRsSvcEPgCtxResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3833: fltCloudRsLDevToCtxResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3834: fltInfraRsFuncToVirtualLIfPAttEntPContResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3835: fltCloudRsLDevToComputePolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3836: fltCloudRsLDevToMgmtPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3839: fltHinventoryRsLbToNicResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3840: fltHinventoryRsNicToPrivateIPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3841: fltCloudRsToUnderlayCtxProfileResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3842: fltHcloudRsCtxUnderlayToCtxResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3843: fltHinventoryRsNexthopTgwAttachmentResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3845: fltHinventoryRsAttachmentToCtxResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F384512: fltTcaEqptcapacityL3v4Usage325minV4EpLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384513: fltTcaEqptcapacityL3v4Usage3215minV4EpLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384514: fltTcaEqptcapacityL3v4Usage321hV4EpLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384515: fltTcaEqptcapacityL3v4Usage321dV4EpLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384516: fltTcaEqptcapacityL3v4Usage321wV4EpLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384517: fltTcaEqptcapacityL3v4Usage321moV4EpLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384518: fltTcaEqptcapacityL3v4Usage321qtrV4EpLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384519: fltTcaEqptcapacityL3v4Usage321yearV4EpLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384528: fltTcaEqptcapacityL3v4Usage325minV4EpCum

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384529: fltTcaEqptcapacityL3v4Usage3215minV4EpCum

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384530: fltTcaEqptcapacityL3v4Usage321hV4EpCum

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384531: fltTcaEqptcapacityL3v4Usage321dV4EpCum

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384532: fltTcaEqptcapacityL3v4Usage321wV4EpCum

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384533: fltTcaEqptcapacityL3v4Usage321moV4EpCum

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384534: fltTcaEqptcapacityL3v4Usage321qtrV4EpCum

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384535: fltTcaEqptcapacityL3v4Usage321yearV4EpCum

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384536: fltTcaEqptcapacityL3v4Usage325minV4EpPer

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384537: fltTcaEqptcapacityL3v4Usage3215minV4EpPer

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384538: fltTcaEqptcapacityL3v4Usage321hV4EpPer

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384539: fltTcaEqptcapacityL3v4Usage321dV4EpPer

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384540: fltTcaEqptcapacityL3v4Usage321wV4EpPer

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384541: fltTcaEqptcapacityL3v4Usage321moV4EpPer

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384542: fltTcaEqptcapacityL3v4Usage321qtrV4EpPer

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384543: fltTcaEqptcapacityL3v4Usage321yearV4EpPer

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384544: fltTcaEqptcapacityL3v4Usage325minV4EpMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384545: fltTcaEqptcapacityL3v4Usage3215minV4EpMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384546: fltTcaEqptcapacityL3v4Usage321hV4EpMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384547: fltTcaEqptcapacityL3v4Usage321dV4EpMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384548: fltTcaEqptcapacityL3v4Usage321wV4EpMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384549: fltTcaEqptcapacityL3v4Usage321moV4EpMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384550: fltTcaEqptcapacityL3v4Usage321qtrV4EpMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384551: fltTcaEqptcapacityL3v4Usage321yearV4EpMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384552: fltTcaEqptcapacityL3v4Usage325minV4EpMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384553: fltTcaEqptcapacityL3v4Usage3215minV4EpMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384554: fltTcaEqptcapacityL3v4Usage321hV4EpMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384555: fltTcaEqptcapacityL3v4Usage321dV4EpMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384556: fltTcaEqptcapacityL3v4Usage321wV4EpMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384557: fltTcaEqptcapacityL3v4Usage321moV4EpMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384558: fltTcaEqptcapacityL3v4Usage321qtrV4EpMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384559: fltTcaEqptcapacityL3v4Usage321yearV4EpMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384560: fltTcaEqptcapacityL3v4Usage325minV4EpAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384561: fltTcaEqptcapacityL3v4Usage3215minV4EpAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384562: fltTcaEqptcapacityL3v4Usage321hV4EpAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384563: fltTcaEqptcapacityL3v4Usage321dV4EpAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384564: fltTcaEqptcapacityL3v4Usage321wV4EpAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384565: fltTcaEqptcapacityL3v4Usage321moV4EpAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384566: fltTcaEqptcapacityL3v4Usage321qtrV4EpAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384567: fltTcaEqptcapacityL3v4Usage321yearV4EpAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384592: fltTcaEqptcapacityL3v4Usage325minV4EpTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384593: fltTcaEqptcapacityL3v4Usage3215minV4EpTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384594: fltTcaEqptcapacityL3v4Usage321hV4EpTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384595: fltTcaEqptcapacityL3v4Usage321dV4EpTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384596: fltTcaEqptcapacityL3v4Usage321wV4EpTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384597: fltTcaEqptcapacityL3v4Usage321moV4EpTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384598: fltTcaEqptcapacityL3v4Usage321qtrV4EpTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384599: fltTcaEqptcapacityL3v4Usage321yearV4EpTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384600: fltTcaEqptcapacityL3v4Usage325minV4EpRate

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384601: fltTcaEqptcapacityL3v4Usage3215minV4EpRate

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384602: fltTcaEqptcapacityL3v4Usage321hV4EpRate

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384603: fltTcaEqptcapacityL3v4Usage321dV4EpRate

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384604: fltTcaEqptcapacityL3v4Usage321wV4EpRate

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384605: fltTcaEqptcapacityL3v4Usage321moV4EpRate

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384606: fltTcaEqptcapacityL3v4Usage321qtrV4EpRate

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384607: fltTcaEqptcapacityL3v4Usage321yearV4EpRate

Severity: variable

Explanation: This fault is caused by "Total v4 32 Endpoints rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384680: fltTcaEqptcapacityL3v4Usage325minV4McLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384681: fltTcaEqptcapacityL3v4Usage3215minV4McLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384682: fltTcaEqptcapacityL3v4Usage321hV4McLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384683: fltTcaEqptcapacityL3v4Usage321dV4McLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384684: fltTcaEqptcapacityL3v4Usage321wV4McLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384685: fltTcaEqptcapacityL3v4Usage321moV4McLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384686: fltTcaEqptcapacityL3v4Usage321qtrV4McLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384687: fltTcaEqptcapacityL3v4Usage321yearV4McLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384696: fltTcaEqptcapacityL3v4Usage325minV4McCum

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384697: fltTcaEqptcapacityL3v4Usage3215minV4McCum

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384698: fltTcaEqptcapacityL3v4Usage321hV4McCum

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384699: fltTcaEqptcapacityL3v4Usage321dV4McCum

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3847: fltL3extRsLNodePMplsCustQosPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F384700: fltTcaEqptcapacityL3v4Usage321wV4McCum

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384701: fltTcaEqptcapacityL3v4Usage321moV4McCum

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384702: fltTcaEqptcapacityL3v4Usage321qtrV4McCum

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384703: fltTcaEqptcapacityL3v4Usage321yearV4McCum

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384704: fltTcaEqptcapacityL3v4Usage325minV4McPer

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384705: fltTcaEqptcapacityL3v4Usage3215minV4McPer

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384706: fltTcaEqptcapacityL3v4Usage321hV4McPer

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384707: fltTcaEqptcapacityL3v4Usage321dV4McPer

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384708: fltTcaEqptcapacityL3v4Usage321wV4McPer

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384709: fltTcaEqptcapacityL3v4Usage321moV4McPer

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384710: fltTcaEqptcapacityL3v4Usage321qtrV4McPer

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384711: fltTcaEqptcapacityL3v4Usage321yearV4McPer

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384712: fltTcaEqptcapacityL3v4Usage325minV4McMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384713: fltTcaEqptcapacityL3v4Usage3215minV4McMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384714: fltTcaEqptcapacityL3v4Usage321hV4McMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384715: fltTcaEqptcapacityL3v4Usage321dV4McMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384716: fltTcaEqptcapacityL3v4Usage321wV4McMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384717: fltTcaEqptcapacityL3v4Usage321moV4McMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384718: fltTcaEqptcapacityL3v4Usage321qtrV4McMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384719: fltTcaEqptcapacityL3v4Usage321yearV4McMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384720: fltTcaEqptcapacityL3v4Usage325minV4McMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384721: fltTcaEqptcapacityL3v4Usage3215minV4McMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384722: fltTcaEqptcapacityL3v4Usage321hV4McMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384723: fltTcaEqptcapacityL3v4Usage321dV4McMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384724: fltTcaEqptcapacityL3v4Usage321wV4McMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384725: fltTcaEqptcapacityL3v4Usage321moV4McMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384726: fltTcaEqptcapacityL3v4Usage321qtrV4McMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384727: fltTcaEqptcapacityL3v4Usage321yearV4McMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384728: fltTcaEqptcapacityL3v4Usage325minV4McAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384729: fltTcaEqptcapacityL3v4Usage3215minV4McAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384730: fltTcaEqptcapacityL3v4Usage321hV4McAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384731: fltTcaEqptcapacityL3v4Usage321dV4McAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384732: fltTcaEqptcapacityL3v4Usage321wV4McAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384733: fltTcaEqptcapacityL3v4Usage321moV4McAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384734: fltTcaEqptcapacityL3v4Usage321qtrV4McAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384735: fltTcaEqptcapacityL3v4Usage321yearV4McAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384760: fltTcaEqptcapacityL3v4Usage325minV4McTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384761: fltTcaEqptcapacityL3v4Usage3215minV4McTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384762: fltTcaEqptcapacityL3v4Usage321hV4McTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384763: fltTcaEqptcapacityL3v4Usage321dV4McTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384764: fltTcaEqptcapacityL3v4Usage321wV4McTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384765: fltTcaEqptcapacityL3v4Usage321moV4McTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384766: fltTcaEqptcapacityL3v4Usage321qtrV4McTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384767: fltTcaEqptcapacityL3v4Usage321yearV4McTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384768: fltTcaEqptcapacityL3v4Usage325minV4McRate

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384769: fltTcaEqptcapacityL3v4Usage3215minV4McRate

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384770: fltTcaEqptcapacityL3v4Usage321hV4McRate

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384771: fltTcaEqptcapacityL3v4Usage321dV4McRate

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384772: fltTcaEqptcapacityL3v4Usage321wV4McRate

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384773: fltTcaEqptcapacityL3v4Usage321moV4McRate

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384774: fltTcaEqptcapacityL3v4Usage321qtrV4McRate

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384775: fltTcaEqptcapacityL3v4Usage321yearV4McRate

Severity: variable

Explanation: This fault is caused by "Total v4 32 MC Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3848: fltEqptPsuPsuShut

Severity: minor

Explanation: This fault occurs when the Power Supply Unit is present and in powered down state

Recommended Action: If you see this fault, take the following action:

1. power on the unit. make sure PSU is receiving power-supply

2. If the above action did not resolve the issue, create a show tech-support file and contact Cisco TAC.

F384848: fltTcaEqptcapacityL3v4Usage325minV4TotalLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384849: fltTcaEqptcapacityL3v4Usage3215minV4TotalLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384850: fltTcaEqptcapacityL3v4Usage321hV4TotalLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384851: fltTcaEqptcapacityL3v4Usage321dV4TotalLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384852: fltTcaEqptcapacityL3v4Usage321wV4TotalLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384853: fltTcaEqptcapacityL3v4Usage321moV4TotalLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384854: fltTcaEqptcapacityL3v4Usage321qtrV4TotalLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384855: fltTcaEqptcapacityL3v4Usage321yearV4TotalLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384864: fltTcaEqptcapacityL3v4Usage325minV4TotalCum

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384865: fltTcaEqptcapacityL3v4Usage3215minV4TotalCum

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384866: fltTcaEqptcapacityL3v4Usage321hV4TotalCum

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384867: fltTcaEqptcapacityL3v4Usage321dV4TotalCum

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384868: fltTcaEqptcapacityL3v4Usage321wV4TotalCum

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384869: fltTcaEqptcapacityL3v4Usage321moV4TotalCum

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384870: fltTcaEqptcapacityL3v4Usage321qtrV4TotalCum

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384871: fltTcaEqptcapacityL3v4Usage321yearV4TotalCum

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384872: fltTcaEqptcapacityL3v4Usage325minV4TotalPer

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384873: fltTcaEqptcapacityL3v4Usage3215minV4TotalPer

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384874: fltTcaEqptcapacityL3v4Usage321hV4TotalPer

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384875: fltTcaEqptcapacityL3v4Usage321dV4TotalPer

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384876: fltTcaEqptcapacityL3v4Usage321wV4TotalPer

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384877: fltTcaEqptcapacityL3v4Usage321moV4TotalPer

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384878: fltTcaEqptcapacityL3v4Usage321qtrV4TotalPer

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384879: fltTcaEqptcapacityL3v4Usage321yearV4TotalPer

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384880: fltTcaEqptcapacityL3v4Usage325minV4TotalMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384881: fltTcaEqptcapacityL3v4Usage3215minV4TotalMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384882: fltTcaEqptcapacityL3v4Usage321hV4TotalMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384883: fltTcaEqptcapacityL3v4Usage321dV4TotalMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384884: fltTcaEqptcapacityL3v4Usage321wV4TotalMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384885: fltTcaEqptcapacityL3v4Usage321moV4TotalMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384886: fltTcaEqptcapacityL3v4Usage321qtrV4TotalMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384887: fltTcaEqptcapacityL3v4Usage321yearV4TotalMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384888: fltTcaEqptcapacityL3v4Usage325minV4TotalMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384889: fltTcaEqptcapacityL3v4Usage3215minV4TotalMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384890: fltTcaEqptcapacityL3v4Usage321hV4TotalMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384891: fltTcaEqptcapacityL3v4Usage321dV4TotalMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384892: fltTcaEqptcapacityL3v4Usage321wV4TotalMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384893: fltTcaEqptcapacityL3v4Usage321moV4TotalMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384894: fltTcaEqptcapacityL3v4Usage321qtrV4TotalMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384895: fltTcaEqptcapacityL3v4Usage321yearV4TotalMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384896: fltTcaEqptcapacityL3v4Usage325minV4TotalAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384897: fltTcaEqptcapacityL3v4Usage3215minV4TotalAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384898: fltTcaEqptcapacityL3v4Usage321hV4TotalAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384899: fltTcaEqptcapacityL3v4Usage321dV4TotalAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3849: fltSpanRsSpanSrcToL1IfAttNoHwResSpanSrcL1

Severity: major

Explanation: This fault occurs when scale limit is reached on a span hw resource

Recommended Action: To recover from this fault, try the following actions

1. Reduce the number of ports being used as Span srcs

2. Reduce the number of BDs/VRFs being used as Span src filters

3. Reduce the number of Filter entries in Span Filter Groups

4. Reduce the number of Span srcs shared between Span Src Groups

F384900: fltTcaEqptcapacityL3v4Usage321wV4TotalAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384901: fltTcaEqptcapacityL3v4Usage321moV4TotalAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384902: fltTcaEqptcapacityL3v4Usage321qtrV4TotalAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384903: fltTcaEqptcapacityL3v4Usage321yearV4TotalAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384928: fltTcaEqptcapacityL3v4Usage325minV4TotalTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384929: fltTcaEqptcapacityL3v4Usage3215minV4TotalTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384930: fltTcaEqptcapacityL3v4Usage321hV4TotalTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384931: fltTcaEqptcapacityL3v4Usage321dV4TotalTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384932: fltTcaEqptcapacityL3v4Usage321wV4TotalTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384933: fltTcaEqptcapacityL3v4Usage321moV4TotalTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384934: fltTcaEqptcapacityL3v4Usage321qtrV4TotalTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384935: fltTcaEqptcapacityL3v4Usage321yearV4TotalTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384936: fltTcaEqptcapacityL3v4Usage325minV4TotalRate

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384937: fltTcaEqptcapacityL3v4Usage3215minV4TotalRate

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384938: fltTcaEqptcapacityL3v4Usage321hV4TotalRate

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384939: fltTcaEqptcapacityL3v4Usage321dV4TotalRate

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384940: fltTcaEqptcapacityL3v4Usage321wV4TotalRate

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384941: fltTcaEqptcapacityL3v4Usage321moV4TotalRate

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384942: fltTcaEqptcapacityL3v4Usage321qtrV4TotalRate

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F384943: fltTcaEqptcapacityL3v4Usage321yearV4TotalRate

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3850: fltSpanRsSpanSrcToL2CktEpAttNoHwResSpanSrcL2

Severity: major

Explanation: This fault occurs when span source on a circuit goes to failed state

Recommended Action: To recover from this fault, try the following actions

1. Look at any configuration issues

2. Verify the configuration is correct/complete

3. Check network connectivity and ensure the circuit is up

F385016: fltTcaEqptcapacityL3v4Usage325minV4UcLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385017: fltTcaEqptcapacityL3v4Usage3215minV4UcLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385018: fltTcaEqptcapacityL3v4Usage321hV4UcLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385019: fltTcaEqptcapacityL3v4Usage321dV4UcLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385020: fltTcaEqptcapacityL3v4Usage321wV4UcLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385021: fltTcaEqptcapacityL3v4Usage321moV4UcLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385022: fltTcaEqptcapacityL3v4Usage321qtrV4UcLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385023: fltTcaEqptcapacityL3v4Usage321yearV4UcLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385032: fltTcaEqptcapacityL3v4Usage325minV4UcCum

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385033: fltTcaEqptcapacityL3v4Usage3215minV4UcCum

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385034: fltTcaEqptcapacityL3v4Usage321hV4UcCum

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385035: fltTcaEqptcapacityL3v4Usage321dV4UcCum

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385036: fltTcaEqptcapacityL3v4Usage321wV4UcCum

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385037: fltTcaEqptcapacityL3v4Usage321moV4UcCum

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385038: fltTcaEqptcapacityL3v4Usage321qtrV4UcCum

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385039: fltTcaEqptcapacityL3v4Usage321yearV4UcCum

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385040: fltTcaEqptcapacityL3v4Usage325minV4UcPer

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385041: fltTcaEqptcapacityL3v4Usage3215minV4UcPer

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385042: fltTcaEqptcapacityL3v4Usage321hV4UcPer

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385043: fltTcaEqptcapacityL3v4Usage321dV4UcPer

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385044: fltTcaEqptcapacityL3v4Usage321wV4UcPer

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385045: fltTcaEqptcapacityL3v4Usage321moV4UcPer

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385046: fltTcaEqptcapacityL3v4Usage321qtrV4UcPer

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385047: fltTcaEqptcapacityL3v4Usage321yearV4UcPer

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385048: fltTcaEqptcapacityL3v4Usage325minV4UcMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385049: fltTcaEqptcapacityL3v4Usage3215minV4UcMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385050: fltTcaEqptcapacityL3v4Usage321hV4UcMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385051: fltTcaEqptcapacityL3v4Usage321dV4UcMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385052: fltTcaEqptcapacityL3v4Usage321wV4UcMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385053: fltTcaEqptcapacityL3v4Usage321moV4UcMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385054: fltTcaEqptcapacityL3v4Usage321qtrV4UcMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385055: fltTcaEqptcapacityL3v4Usage321yearV4UcMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385056: fltTcaEqptcapacityL3v4Usage325minV4UcMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385057: fltTcaEqptcapacityL3v4Usage3215minV4UcMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385058: fltTcaEqptcapacityL3v4Usage321hV4UcMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385059: fltTcaEqptcapacityL3v4Usage321dV4UcMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385060: fltTcaEqptcapacityL3v4Usage321wV4UcMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385061: fltTcaEqptcapacityL3v4Usage321moV4UcMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385062: fltTcaEqptcapacityL3v4Usage321qtrV4UcMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385063: fltTcaEqptcapacityL3v4Usage321yearV4UcMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385064: fltTcaEqptcapacityL3v4Usage325minV4UcAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385065: fltTcaEqptcapacityL3v4Usage3215minV4UcAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385066: fltTcaEqptcapacityL3v4Usage321hV4UcAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385067: fltTcaEqptcapacityL3v4Usage321dV4UcAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385068: fltTcaEqptcapacityL3v4Usage321wV4UcAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385069: fltTcaEqptcapacityL3v4Usage321moV4UcAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385070: fltTcaEqptcapacityL3v4Usage321qtrV4UcAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385071: fltTcaEqptcapacityL3v4Usage321yearV4UcAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385096: fltTcaEqptcapacityL3v4Usage325minV4UcTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385097: fltTcaEqptcapacityL3v4Usage3215minV4UcTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385098: fltTcaEqptcapacityL3v4Usage321hV4UcTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385099: fltTcaEqptcapacityL3v4Usage321dV4UcTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3851: fltSpanRsSpanSrcToL3OutAttNoHwResSpanSrcL3Out

Severity: major

Explanation: This fault occurs when scale limit is reached on a span hw resource

Recommended Action: To recover from this fault, try the following actions

1. Reduce the number of ports being used as Span srcs

2. Reduce the number of BDs/VRFs being used as Span src filters

3. Reduce the number of Filter entries in Span Filter Groups

4. Reduce the number of Span srcs shared between Span Src Groups

F385100: fltTcaEqptcapacityL3v4Usage321wV4UcTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385101: fltTcaEqptcapacityL3v4Usage321moV4UcTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385102: fltTcaEqptcapacityL3v4Usage321qtrV4UcTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385103: fltTcaEqptcapacityL3v4Usage321yearV4UcTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385104: fltTcaEqptcapacityL3v4Usage325minV4UcRate

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385105: fltTcaEqptcapacityL3v4Usage3215minV4UcRate

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385106: fltTcaEqptcapacityL3v4Usage321hV4UcRate

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385107: fltTcaEqptcapacityL3v4Usage321dV4UcRate

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385108: fltTcaEqptcapacityL3v4Usage321wV4UcRate

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385109: fltTcaEqptcapacityL3v4Usage321moV4UcRate

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385110: fltTcaEqptcapacityL3v4Usage321qtrV4UcRate

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385111: fltTcaEqptcapacityL3v4Usage321yearV4UcRate

Severity: variable

Explanation: This fault is caused by "Total v4 32 UC Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385184: fltTcaEqptcapacityL3v4Usage32Cap5minV4TotalCapLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385185: fltTcaEqptcapacityL3v4Usage32Cap15minV4TotalCapLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385186: fltTcaEqptcapacityL3v4Usage32Cap1hV4TotalCapLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385187: fltTcaEqptcapacityL3v4Usage32Cap1dV4TotalCapLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385188: fltTcaEqptcapacityL3v4Usage32Cap1wV4TotalCapLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385189: fltTcaEqptcapacityL3v4Usage32Cap1moV4TotalCapLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385190: fltTcaEqptcapacityL3v4Usage32Cap1qtrV4TotalCapLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385191: fltTcaEqptcapacityL3v4Usage32Cap1yearV4TotalCapLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3852: fltSpanDestinationNoHwResSpanDst

Severity: major

Explanation: This fault occurs when scale limit is reached on a span hw resource

Recommended Action: To recover from this fault, try the following actions

1. Reduce the number of Span Source Groups

F385200: fltTcaEqptcapacityL3v4Usage32Cap5minV4TotalCapCum

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385201: fltTcaEqptcapacityL3v4Usage32Cap15minV4TotalCapCum

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385202: fltTcaEqptcapacityL3v4Usage32Cap1hV4TotalCapCum

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385203: fltTcaEqptcapacityL3v4Usage32Cap1dV4TotalCapCum

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385204: fltTcaEqptcapacityL3v4Usage32Cap1wV4TotalCapCum

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385205: fltTcaEqptcapacityL3v4Usage32Cap1moV4TotalCapCum

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385206: fltTcaEqptcapacityL3v4Usage32Cap1qtrV4TotalCapCum

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385207: fltTcaEqptcapacityL3v4Usage32Cap1yearV4TotalCapCum

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385208: fltTcaEqptcapacityL3v4Usage32Cap5minV4TotalCapPer

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385209: fltTcaEqptcapacityL3v4Usage32Cap15minV4TotalCapPer

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385210: fltTcaEqptcapacityL3v4Usage32Cap1hV4TotalCapPer

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385211: fltTcaEqptcapacityL3v4Usage32Cap1dV4TotalCapPer

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385212: fltTcaEqptcapacityL3v4Usage32Cap1wV4TotalCapPer

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385213: fltTcaEqptcapacityL3v4Usage32Cap1moV4TotalCapPer

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385214: fltTcaEqptcapacityL3v4Usage32Cap1qtrV4TotalCapPer

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385215: fltTcaEqptcapacityL3v4Usage32Cap1yearV4TotalCapPer

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385216: fltTcaEqptcapacityL3v4Usage32Cap5minV4TotalCapMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385217: fltTcaEqptcapacityL3v4Usage32Cap15minV4TotalCapMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385218: fltTcaEqptcapacityL3v4Usage32Cap1hV4TotalCapMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385219: fltTcaEqptcapacityL3v4Usage32Cap1dV4TotalCapMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385220: fltTcaEqptcapacityL3v4Usage32Cap1wV4TotalCapMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385221: fltTcaEqptcapacityL3v4Usage32Cap1moV4TotalCapMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385222: fltTcaEqptcapacityL3v4Usage32Cap1qtrV4TotalCapMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385223: fltTcaEqptcapacityL3v4Usage32Cap1yearV4TotalCapMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385224: fltTcaEqptcapacityL3v4Usage32Cap5minV4TotalCapMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385225: fltTcaEqptcapacityL3v4Usage32Cap15minV4TotalCapMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385226: fltTcaEqptcapacityL3v4Usage32Cap1hV4TotalCapMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385227: fltTcaEqptcapacityL3v4Usage32Cap1dV4TotalCapMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385228: fltTcaEqptcapacityL3v4Usage32Cap1wV4TotalCapMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385229: fltTcaEqptcapacityL3v4Usage32Cap1moV4TotalCapMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385230: fltTcaEqptcapacityL3v4Usage32Cap1qtrV4TotalCapMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385231: fltTcaEqptcapacityL3v4Usage32Cap1yearV4TotalCapMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385232: fltTcaEqptcapacityL3v4Usage32Cap5minV4TotalCapAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385233: fltTcaEqptcapacityL3v4Usage32Cap15minV4TotalCapAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385234: fltTcaEqptcapacityL3v4Usage32Cap1hV4TotalCapAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385235: fltTcaEqptcapacityL3v4Usage32Cap1dV4TotalCapAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385236: fltTcaEqptcapacityL3v4Usage32Cap1wV4TotalCapAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385237: fltTcaEqptcapacityL3v4Usage32Cap1moV4TotalCapAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385238: fltTcaEqptcapacityL3v4Usage32Cap1qtrV4TotalCapAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385239: fltTcaEqptcapacityL3v4Usage32Cap1yearV4TotalCapAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385264: fltTcaEqptcapacityL3v4Usage32Cap5minV4TotalCapTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385265: fltTcaEqptcapacityL3v4Usage32Cap15minV4TotalCapTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385266: fltTcaEqptcapacityL3v4Usage32Cap1hV4TotalCapTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385267: fltTcaEqptcapacityL3v4Usage32Cap1dV4TotalCapTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385268: fltTcaEqptcapacityL3v4Usage32Cap1wV4TotalCapTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385269: fltTcaEqptcapacityL3v4Usage32Cap1moV4TotalCapTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385270: fltTcaEqptcapacityL3v4Usage32Cap1qtrV4TotalCapTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385271: fltTcaEqptcapacityL3v4Usage32Cap1yearV4TotalCapTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385272: fltTcaEqptcapacityL3v4Usage32Cap5minV4TotalCapRate

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385273: fltTcaEqptcapacityL3v4Usage32Cap15minV4TotalCapRate

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385274: fltTcaEqptcapacityL3v4Usage32Cap1hV4TotalCapRate

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385275: fltTcaEqptcapacityL3v4Usage32Cap1dV4TotalCapRate

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385276: fltTcaEqptcapacityL3v4Usage32Cap1wV4TotalCapRate

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385277: fltTcaEqptcapacityL3v4Usage32Cap1moV4TotalCapRate

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385278: fltTcaEqptcapacityL3v4Usage32Cap1qtrV4TotalCapRate

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385279: fltTcaEqptcapacityL3v4Usage32Cap1yearV4TotalCapRate

Severity: variable

Explanation: This fault is caused by "Total v4 32 Routes capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3853: fltVmmRsVswitchOverrideMtuPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F385352: fltTcaEqptcapacityL3v4Usage32Per5minNormalizedv4TotalLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385353: fltTcaEqptcapacityL3v4Usage32Per15minNormalizedv4TotalLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385354: fltTcaEqptcapacityL3v4Usage32Per1hNormalizedv4TotalLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385355: fltTcaEqptcapacityL3v4Usage32Per1dNormalizedv4TotalLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385356: fltTcaEqptcapacityL3v4Usage32Per1wNormalizedv4TotalLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385357: fltTcaEqptcapacityL3v4Usage32Per1moNormalizedv4TotalLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385358: fltTcaEqptcapacityL3v4Usage32Per1qtrNormalizedv4TotalLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385359: fltTcaEqptcapacityL3v4Usage32Per1yearNormalizedv4TotalLast

Severity: variable

Explanation: This fault is caused by "Total v4 32 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385360: fltTcaEqptcapacityL3v4Usage32Per5minNormalizedv4TotalMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385361: fltTcaEqptcapacityL3v4Usage32Per15minNormalizedv4TotalMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385362: fltTcaEqptcapacityL3v4Usage32Per1hNormalizedv4TotalMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385363: fltTcaEqptcapacityL3v4Usage32Per1dNormalizedv4TotalMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385364: fltTcaEqptcapacityL3v4Usage32Per1wNormalizedv4TotalMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385365: fltTcaEqptcapacityL3v4Usage32Per1moNormalizedv4TotalMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385366: fltTcaEqptcapacityL3v4Usage32Per1qtrNormalizedv4TotalMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385367: fltTcaEqptcapacityL3v4Usage32Per1yearNormalizedv4TotalMin

Severity: variable

Explanation: This fault is caused by "Total v4 32 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385368: fltTcaEqptcapacityL3v4Usage32Per5minNormalizedv4TotalMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385369: fltTcaEqptcapacityL3v4Usage32Per15minNormalizedv4TotalMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385370: fltTcaEqptcapacityL3v4Usage32Per1hNormalizedv4TotalMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385371: fltTcaEqptcapacityL3v4Usage32Per1dNormalizedv4TotalMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385372: fltTcaEqptcapacityL3v4Usage32Per1wNormalizedv4TotalMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385373: fltTcaEqptcapacityL3v4Usage32Per1moNormalizedv4TotalMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385374: fltTcaEqptcapacityL3v4Usage32Per1qtrNormalizedv4TotalMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385375: fltTcaEqptcapacityL3v4Usage32Per1yearNormalizedv4TotalMax

Severity: variable

Explanation: This fault is caused by "Total v4 32 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385376: fltTcaEqptcapacityL3v4Usage32Per5minNormalizedv4TotalAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385377: fltTcaEqptcapacityL3v4Usage32Per15minNormalizedv4TotalAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385378: fltTcaEqptcapacityL3v4Usage32Per1hNormalizedv4TotalAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385379: fltTcaEqptcapacityL3v4Usage32Per1dNormalizedv4TotalAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385380: fltTcaEqptcapacityL3v4Usage32Per1wNormalizedv4TotalAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385381: fltTcaEqptcapacityL3v4Usage32Per1moNormalizedv4TotalAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385382: fltTcaEqptcapacityL3v4Usage32Per1qtrNormalizedv4TotalAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385383: fltTcaEqptcapacityL3v4Usage32Per1yearNormalizedv4TotalAvg

Severity: variable

Explanation: This fault is caused by "Total v4 32 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3854: fltMdpRsToMdpServiceDefResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F385416: fltTcaEqptcapacityL3v4Usage32Per5minNormalizedv4TotalTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385417: fltTcaEqptcapacityL3v4Usage32Per15minNormalizedv4TotalTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385418: fltTcaEqptcapacityL3v4Usage32Per1hNormalizedv4TotalTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385419: fltTcaEqptcapacityL3v4Usage32Per1dNormalizedv4TotalTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385420: fltTcaEqptcapacityL3v4Usage32Per1wNormalizedv4TotalTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385421: fltTcaEqptcapacityL3v4Usage32Per1moNormalizedv4TotalTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385422: fltTcaEqptcapacityL3v4Usage32Per1qtrNormalizedv4TotalTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385423: fltTcaEqptcapacityL3v4Usage32Per1yearNormalizedv4TotalTr

Severity: variable

Explanation: This fault is caused by "Total v4 32 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v4 32 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385472: fltTcaEqptcapacityL3v6Usage1285minV6EpLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385473: fltTcaEqptcapacityL3v6Usage12815minV6EpLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385474: fltTcaEqptcapacityL3v6Usage1281hV6EpLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385475: fltTcaEqptcapacityL3v6Usage1281dV6EpLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385476: fltTcaEqptcapacityL3v6Usage1281wV6EpLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385477: fltTcaEqptcapacityL3v6Usage1281moV6EpLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385478: fltTcaEqptcapacityL3v6Usage1281qtrV6EpLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385479: fltTcaEqptcapacityL3v6Usage1281yearV6EpLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385488: fltTcaEqptcapacityL3v6Usage1285minV6EpCum

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385489: fltTcaEqptcapacityL3v6Usage12815minV6EpCum

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385490: fltTcaEqptcapacityL3v6Usage1281hV6EpCum

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385491: fltTcaEqptcapacityL3v6Usage1281dV6EpCum

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385492: fltTcaEqptcapacityL3v6Usage1281wV6EpCum

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385493: fltTcaEqptcapacityL3v6Usage1281moV6EpCum

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385494: fltTcaEqptcapacityL3v6Usage1281qtrV6EpCum

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385495: fltTcaEqptcapacityL3v6Usage1281yearV6EpCum

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385496: fltTcaEqptcapacityL3v6Usage1285minV6EpPer

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385497: fltTcaEqptcapacityL3v6Usage12815minV6EpPer

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385498: fltTcaEqptcapacityL3v6Usage1281hV6EpPer

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385499: fltTcaEqptcapacityL3v6Usage1281dV6EpPer

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385500: fltTcaEqptcapacityL3v6Usage1281wV6EpPer

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385501: fltTcaEqptcapacityL3v6Usage1281moV6EpPer

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385502: fltTcaEqptcapacityL3v6Usage1281qtrV6EpPer

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385503: fltTcaEqptcapacityL3v6Usage1281yearV6EpPer

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385504: fltTcaEqptcapacityL3v6Usage1285minV6EpMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385505: fltTcaEqptcapacityL3v6Usage12815minV6EpMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385506: fltTcaEqptcapacityL3v6Usage1281hV6EpMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385507: fltTcaEqptcapacityL3v6Usage1281dV6EpMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385508: fltTcaEqptcapacityL3v6Usage1281wV6EpMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385509: fltTcaEqptcapacityL3v6Usage1281moV6EpMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385510: fltTcaEqptcapacityL3v6Usage1281qtrV6EpMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385511: fltTcaEqptcapacityL3v6Usage1281yearV6EpMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385512: fltTcaEqptcapacityL3v6Usage1285minV6EpMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385513: fltTcaEqptcapacityL3v6Usage12815minV6EpMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385514: fltTcaEqptcapacityL3v6Usage1281hV6EpMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385515: fltTcaEqptcapacityL3v6Usage1281dV6EpMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385516: fltTcaEqptcapacityL3v6Usage1281wV6EpMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385517: fltTcaEqptcapacityL3v6Usage1281moV6EpMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385518: fltTcaEqptcapacityL3v6Usage1281qtrV6EpMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385519: fltTcaEqptcapacityL3v6Usage1281yearV6EpMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385520: fltTcaEqptcapacityL3v6Usage1285minV6EpAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385521: fltTcaEqptcapacityL3v6Usage12815minV6EpAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385522: fltTcaEqptcapacityL3v6Usage1281hV6EpAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385523: fltTcaEqptcapacityL3v6Usage1281dV6EpAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385524: fltTcaEqptcapacityL3v6Usage1281wV6EpAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385525: fltTcaEqptcapacityL3v6Usage1281moV6EpAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385526: fltTcaEqptcapacityL3v6Usage1281qtrV6EpAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385527: fltTcaEqptcapacityL3v6Usage1281yearV6EpAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385552: fltTcaEqptcapacityL3v6Usage1285minV6EpTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385553: fltTcaEqptcapacityL3v6Usage12815minV6EpTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385554: fltTcaEqptcapacityL3v6Usage1281hV6EpTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385555: fltTcaEqptcapacityL3v6Usage1281dV6EpTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385556: fltTcaEqptcapacityL3v6Usage1281wV6EpTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385557: fltTcaEqptcapacityL3v6Usage1281moV6EpTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385558: fltTcaEqptcapacityL3v6Usage1281qtrV6EpTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385559: fltTcaEqptcapacityL3v6Usage1281yearV6EpTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385560: fltTcaEqptcapacityL3v6Usage1285minV6EpRate

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385561: fltTcaEqptcapacityL3v6Usage12815minV6EpRate

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385562: fltTcaEqptcapacityL3v6Usage1281hV6EpRate

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385563: fltTcaEqptcapacityL3v6Usage1281dV6EpRate

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385564: fltTcaEqptcapacityL3v6Usage1281wV6EpRate

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385565: fltTcaEqptcapacityL3v6Usage1281moV6EpRate

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385566: fltTcaEqptcapacityL3v6Usage1281qtrV6EpRate

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385567: fltTcaEqptcapacityL3v6Usage1281yearV6EpRate

Severity: variable

Explanation: This fault is caused by "Total v6 128 Endpoints rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Endpoints" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385640: fltTcaEqptcapacityL3v6Usage1285minV6McLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385641: fltTcaEqptcapacityL3v6Usage12815minV6McLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385642: fltTcaEqptcapacityL3v6Usage1281hV6McLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385643: fltTcaEqptcapacityL3v6Usage1281dV6McLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385644: fltTcaEqptcapacityL3v6Usage1281wV6McLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385645: fltTcaEqptcapacityL3v6Usage1281moV6McLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385646: fltTcaEqptcapacityL3v6Usage1281qtrV6McLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385647: fltTcaEqptcapacityL3v6Usage1281yearV6McLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385656: fltTcaEqptcapacityL3v6Usage1285minV6McCum

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385657: fltTcaEqptcapacityL3v6Usage12815minV6McCum

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385658: fltTcaEqptcapacityL3v6Usage1281hV6McCum

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385659: fltTcaEqptcapacityL3v6Usage1281dV6McCum

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385660: fltTcaEqptcapacityL3v6Usage1281wV6McCum

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385661: fltTcaEqptcapacityL3v6Usage1281moV6McCum

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385662: fltTcaEqptcapacityL3v6Usage1281qtrV6McCum

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385663: fltTcaEqptcapacityL3v6Usage1281yearV6McCum

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385664: fltTcaEqptcapacityL3v6Usage1285minV6McPer

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385665: fltTcaEqptcapacityL3v6Usage12815minV6McPer

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385666: fltTcaEqptcapacityL3v6Usage1281hV6McPer

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385667: fltTcaEqptcapacityL3v6Usage1281dV6McPer

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385668: fltTcaEqptcapacityL3v6Usage1281wV6McPer

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385669: fltTcaEqptcapacityL3v6Usage1281moV6McPer

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385670: fltTcaEqptcapacityL3v6Usage1281qtrV6McPer

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385671: fltTcaEqptcapacityL3v6Usage1281yearV6McPer

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385672: fltTcaEqptcapacityL3v6Usage1285minV6McMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385673: fltTcaEqptcapacityL3v6Usage12815minV6McMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385674: fltTcaEqptcapacityL3v6Usage1281hV6McMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385675: fltTcaEqptcapacityL3v6Usage1281dV6McMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385676: fltTcaEqptcapacityL3v6Usage1281wV6McMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385677: fltTcaEqptcapacityL3v6Usage1281moV6McMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385678: fltTcaEqptcapacityL3v6Usage1281qtrV6McMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385679: fltTcaEqptcapacityL3v6Usage1281yearV6McMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385680: fltTcaEqptcapacityL3v6Usage1285minV6McMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385681: fltTcaEqptcapacityL3v6Usage12815minV6McMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385682: fltTcaEqptcapacityL3v6Usage1281hV6McMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385683: fltTcaEqptcapacityL3v6Usage1281dV6McMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385684: fltTcaEqptcapacityL3v6Usage1281wV6McMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385685: fltTcaEqptcapacityL3v6Usage1281moV6McMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385686: fltTcaEqptcapacityL3v6Usage1281qtrV6McMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385687: fltTcaEqptcapacityL3v6Usage1281yearV6McMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385688: fltTcaEqptcapacityL3v6Usage1285minV6McAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385689: fltTcaEqptcapacityL3v6Usage12815minV6McAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385690: fltTcaEqptcapacityL3v6Usage1281hV6McAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385691: fltTcaEqptcapacityL3v6Usage1281dV6McAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385692: fltTcaEqptcapacityL3v6Usage1281wV6McAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385693: fltTcaEqptcapacityL3v6Usage1281moV6McAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385694: fltTcaEqptcapacityL3v6Usage1281qtrV6McAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385695: fltTcaEqptcapacityL3v6Usage1281yearV6McAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385720: fltTcaEqptcapacityL3v6Usage1285minV6McTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385721: fltTcaEqptcapacityL3v6Usage12815minV6McTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385722: fltTcaEqptcapacityL3v6Usage1281hV6McTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385723: fltTcaEqptcapacityL3v6Usage1281dV6McTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385724: fltTcaEqptcapacityL3v6Usage1281wV6McTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385725: fltTcaEqptcapacityL3v6Usage1281moV6McTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385726: fltTcaEqptcapacityL3v6Usage1281qtrV6McTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385727: fltTcaEqptcapacityL3v6Usage1281yearV6McTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385728: fltTcaEqptcapacityL3v6Usage1285minV6McRate

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385729: fltTcaEqptcapacityL3v6Usage12815minV6McRate

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385730: fltTcaEqptcapacityL3v6Usage1281hV6McRate

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385731: fltTcaEqptcapacityL3v6Usage1281dV6McRate

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385732: fltTcaEqptcapacityL3v6Usage1281wV6McRate

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385733: fltTcaEqptcapacityL3v6Usage1281moV6McRate

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385734: fltTcaEqptcapacityL3v6Usage1281qtrV6McRate

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385735: fltTcaEqptcapacityL3v6Usage1281yearV6McRate

Severity: variable

Explanation: This fault is caused by "Total v6 128 MC Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 MC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385808: fltTcaEqptcapacityL3v6Usage1285minV6TotalLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385809: fltTcaEqptcapacityL3v6Usage12815minV6TotalLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385810: fltTcaEqptcapacityL3v6Usage1281hV6TotalLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385811: fltTcaEqptcapacityL3v6Usage1281dV6TotalLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385812: fltTcaEqptcapacityL3v6Usage1281wV6TotalLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385813: fltTcaEqptcapacityL3v6Usage1281moV6TotalLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385814: fltTcaEqptcapacityL3v6Usage1281qtrV6TotalLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385815: fltTcaEqptcapacityL3v6Usage1281yearV6TotalLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385824: fltTcaEqptcapacityL3v6Usage1285minV6TotalCum

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385825: fltTcaEqptcapacityL3v6Usage12815minV6TotalCum

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385826: fltTcaEqptcapacityL3v6Usage1281hV6TotalCum

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385827: fltTcaEqptcapacityL3v6Usage1281dV6TotalCum

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385828: fltTcaEqptcapacityL3v6Usage1281wV6TotalCum

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385829: fltTcaEqptcapacityL3v6Usage1281moV6TotalCum

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385830: fltTcaEqptcapacityL3v6Usage1281qtrV6TotalCum

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385831: fltTcaEqptcapacityL3v6Usage1281yearV6TotalCum

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385832: fltTcaEqptcapacityL3v6Usage1285minV6TotalPer

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385833: fltTcaEqptcapacityL3v6Usage12815minV6TotalPer

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385834: fltTcaEqptcapacityL3v6Usage1281hV6TotalPer

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385835: fltTcaEqptcapacityL3v6Usage1281dV6TotalPer

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385836: fltTcaEqptcapacityL3v6Usage1281wV6TotalPer

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385837: fltTcaEqptcapacityL3v6Usage1281moV6TotalPer

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385838: fltTcaEqptcapacityL3v6Usage1281qtrV6TotalPer

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385839: fltTcaEqptcapacityL3v6Usage1281yearV6TotalPer

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385840: fltTcaEqptcapacityL3v6Usage1285minV6TotalMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385841: fltTcaEqptcapacityL3v6Usage12815minV6TotalMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385842: fltTcaEqptcapacityL3v6Usage1281hV6TotalMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385843: fltTcaEqptcapacityL3v6Usage1281dV6TotalMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385844: fltTcaEqptcapacityL3v6Usage1281wV6TotalMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385845: fltTcaEqptcapacityL3v6Usage1281moV6TotalMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385846: fltTcaEqptcapacityL3v6Usage1281qtrV6TotalMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385847: fltTcaEqptcapacityL3v6Usage1281yearV6TotalMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385848: fltTcaEqptcapacityL3v6Usage1285minV6TotalMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385849: fltTcaEqptcapacityL3v6Usage12815minV6TotalMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385850: fltTcaEqptcapacityL3v6Usage1281hV6TotalMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385851: fltTcaEqptcapacityL3v6Usage1281dV6TotalMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385852: fltTcaEqptcapacityL3v6Usage1281wV6TotalMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385853: fltTcaEqptcapacityL3v6Usage1281moV6TotalMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385854: fltTcaEqptcapacityL3v6Usage1281qtrV6TotalMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385855: fltTcaEqptcapacityL3v6Usage1281yearV6TotalMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385856: fltTcaEqptcapacityL3v6Usage1285minV6TotalAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385857: fltTcaEqptcapacityL3v6Usage12815minV6TotalAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385858: fltTcaEqptcapacityL3v6Usage1281hV6TotalAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385859: fltTcaEqptcapacityL3v6Usage1281dV6TotalAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385860: fltTcaEqptcapacityL3v6Usage1281wV6TotalAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385861: fltTcaEqptcapacityL3v6Usage1281moV6TotalAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385862: fltTcaEqptcapacityL3v6Usage1281qtrV6TotalAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385863: fltTcaEqptcapacityL3v6Usage1281yearV6TotalAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385888: fltTcaEqptcapacityL3v6Usage1285minV6TotalTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385889: fltTcaEqptcapacityL3v6Usage12815minV6TotalTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385890: fltTcaEqptcapacityL3v6Usage1281hV6TotalTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385891: fltTcaEqptcapacityL3v6Usage1281dV6TotalTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385892: fltTcaEqptcapacityL3v6Usage1281wV6TotalTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385893: fltTcaEqptcapacityL3v6Usage1281moV6TotalTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385894: fltTcaEqptcapacityL3v6Usage1281qtrV6TotalTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385895: fltTcaEqptcapacityL3v6Usage1281yearV6TotalTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385896: fltTcaEqptcapacityL3v6Usage1285minV6TotalRate

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385897: fltTcaEqptcapacityL3v6Usage12815minV6TotalRate

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385898: fltTcaEqptcapacityL3v6Usage1281hV6TotalRate

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385899: fltTcaEqptcapacityL3v6Usage1281dV6TotalRate

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385900: fltTcaEqptcapacityL3v6Usage1281wV6TotalRate

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385901: fltTcaEqptcapacityL3v6Usage1281moV6TotalRate

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385902: fltTcaEqptcapacityL3v6Usage1281qtrV6TotalRate

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385903: fltTcaEqptcapacityL3v6Usage1281yearV6TotalRate

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385976: fltTcaEqptcapacityL3v6Usage1285minV6UcLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385977: fltTcaEqptcapacityL3v6Usage12815minV6UcLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385978: fltTcaEqptcapacityL3v6Usage1281hV6UcLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385979: fltTcaEqptcapacityL3v6Usage1281dV6UcLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385980: fltTcaEqptcapacityL3v6Usage1281wV6UcLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385981: fltTcaEqptcapacityL3v6Usage1281moV6UcLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385982: fltTcaEqptcapacityL3v6Usage1281qtrV6UcLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385983: fltTcaEqptcapacityL3v6Usage1281yearV6UcLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385992: fltTcaEqptcapacityL3v6Usage1285minV6UcCum

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385993: fltTcaEqptcapacityL3v6Usage12815minV6UcCum

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385994: fltTcaEqptcapacityL3v6Usage1281hV6UcCum

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385995: fltTcaEqptcapacityL3v6Usage1281dV6UcCum

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385996: fltTcaEqptcapacityL3v6Usage1281wV6UcCum

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385997: fltTcaEqptcapacityL3v6Usage1281moV6UcCum

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385998: fltTcaEqptcapacityL3v6Usage1281qtrV6UcCum

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F385999: fltTcaEqptcapacityL3v6Usage1281yearV6UcCum

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386000: fltTcaEqptcapacityL3v6Usage1285minV6UcPer

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386001: fltTcaEqptcapacityL3v6Usage12815minV6UcPer

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386002: fltTcaEqptcapacityL3v6Usage1281hV6UcPer

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386003: fltTcaEqptcapacityL3v6Usage1281dV6UcPer

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386004: fltTcaEqptcapacityL3v6Usage1281wV6UcPer

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386005: fltTcaEqptcapacityL3v6Usage1281moV6UcPer

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386006: fltTcaEqptcapacityL3v6Usage1281qtrV6UcPer

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386007: fltTcaEqptcapacityL3v6Usage1281yearV6UcPer

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386008: fltTcaEqptcapacityL3v6Usage1285minV6UcMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386009: fltTcaEqptcapacityL3v6Usage12815minV6UcMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386010: fltTcaEqptcapacityL3v6Usage1281hV6UcMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386011: fltTcaEqptcapacityL3v6Usage1281dV6UcMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386012: fltTcaEqptcapacityL3v6Usage1281wV6UcMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386013: fltTcaEqptcapacityL3v6Usage1281moV6UcMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386014: fltTcaEqptcapacityL3v6Usage1281qtrV6UcMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386015: fltTcaEqptcapacityL3v6Usage1281yearV6UcMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386016: fltTcaEqptcapacityL3v6Usage1285minV6UcMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386017: fltTcaEqptcapacityL3v6Usage12815minV6UcMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386018: fltTcaEqptcapacityL3v6Usage1281hV6UcMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386019: fltTcaEqptcapacityL3v6Usage1281dV6UcMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386020: fltTcaEqptcapacityL3v6Usage1281wV6UcMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386021: fltTcaEqptcapacityL3v6Usage1281moV6UcMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386022: fltTcaEqptcapacityL3v6Usage1281qtrV6UcMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386023: fltTcaEqptcapacityL3v6Usage1281yearV6UcMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386024: fltTcaEqptcapacityL3v6Usage1285minV6UcAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386025: fltTcaEqptcapacityL3v6Usage12815minV6UcAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386026: fltTcaEqptcapacityL3v6Usage1281hV6UcAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386027: fltTcaEqptcapacityL3v6Usage1281dV6UcAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386028: fltTcaEqptcapacityL3v6Usage1281wV6UcAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386029: fltTcaEqptcapacityL3v6Usage1281moV6UcAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386030: fltTcaEqptcapacityL3v6Usage1281qtrV6UcAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386031: fltTcaEqptcapacityL3v6Usage1281yearV6UcAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386056: fltTcaEqptcapacityL3v6Usage1285minV6UcTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386057: fltTcaEqptcapacityL3v6Usage12815minV6UcTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386058: fltTcaEqptcapacityL3v6Usage1281hV6UcTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386059: fltTcaEqptcapacityL3v6Usage1281dV6UcTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386060: fltTcaEqptcapacityL3v6Usage1281wV6UcTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386061: fltTcaEqptcapacityL3v6Usage1281moV6UcTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386062: fltTcaEqptcapacityL3v6Usage1281qtrV6UcTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386063: fltTcaEqptcapacityL3v6Usage1281yearV6UcTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386064: fltTcaEqptcapacityL3v6Usage1285minV6UcRate

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386065: fltTcaEqptcapacityL3v6Usage12815minV6UcRate

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386066: fltTcaEqptcapacityL3v6Usage1281hV6UcRate

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386067: fltTcaEqptcapacityL3v6Usage1281dV6UcRate

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386068: fltTcaEqptcapacityL3v6Usage1281wV6UcRate

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386069: fltTcaEqptcapacityL3v6Usage1281moV6UcRate

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386070: fltTcaEqptcapacityL3v6Usage1281qtrV6UcRate

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386071: fltTcaEqptcapacityL3v6Usage1281yearV6UcRate

Severity: variable

Explanation: This fault is caused by "Total v6 128 UC Routes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 UC Routes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386144: fltTcaEqptcapacityL3v6Usage128Cap5minV6TotalCapLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386145: fltTcaEqptcapacityL3v6Usage128Cap15minV6TotalCapLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386146: fltTcaEqptcapacityL3v6Usage128Cap1hV6TotalCapLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386147: fltTcaEqptcapacityL3v6Usage128Cap1dV6TotalCapLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386148: fltTcaEqptcapacityL3v6Usage128Cap1wV6TotalCapLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386149: fltTcaEqptcapacityL3v6Usage128Cap1moV6TotalCapLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386150: fltTcaEqptcapacityL3v6Usage128Cap1qtrV6TotalCapLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386151: fltTcaEqptcapacityL3v6Usage128Cap1yearV6TotalCapLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386160: fltTcaEqptcapacityL3v6Usage128Cap5minV6TotalCapCum

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386161: fltTcaEqptcapacityL3v6Usage128Cap15minV6TotalCapCum

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386162: fltTcaEqptcapacityL3v6Usage128Cap1hV6TotalCapCum

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386163: fltTcaEqptcapacityL3v6Usage128Cap1dV6TotalCapCum

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386164: fltTcaEqptcapacityL3v6Usage128Cap1wV6TotalCapCum

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386165: fltTcaEqptcapacityL3v6Usage128Cap1moV6TotalCapCum

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386166: fltTcaEqptcapacityL3v6Usage128Cap1qtrV6TotalCapCum

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386167: fltTcaEqptcapacityL3v6Usage128Cap1yearV6TotalCapCum

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386168: fltTcaEqptcapacityL3v6Usage128Cap5minV6TotalCapPer

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386169: fltTcaEqptcapacityL3v6Usage128Cap15minV6TotalCapPer

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386170: fltTcaEqptcapacityL3v6Usage128Cap1hV6TotalCapPer

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386171: fltTcaEqptcapacityL3v6Usage128Cap1dV6TotalCapPer

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386172: fltTcaEqptcapacityL3v6Usage128Cap1wV6TotalCapPer

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386173: fltTcaEqptcapacityL3v6Usage128Cap1moV6TotalCapPer

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386174: fltTcaEqptcapacityL3v6Usage128Cap1qtrV6TotalCapPer

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386175: fltTcaEqptcapacityL3v6Usage128Cap1yearV6TotalCapPer

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386176: fltTcaEqptcapacityL3v6Usage128Cap5minV6TotalCapMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386177: fltTcaEqptcapacityL3v6Usage128Cap15minV6TotalCapMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386178: fltTcaEqptcapacityL3v6Usage128Cap1hV6TotalCapMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386179: fltTcaEqptcapacityL3v6Usage128Cap1dV6TotalCapMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386180: fltTcaEqptcapacityL3v6Usage128Cap1wV6TotalCapMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386181: fltTcaEqptcapacityL3v6Usage128Cap1moV6TotalCapMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386182: fltTcaEqptcapacityL3v6Usage128Cap1qtrV6TotalCapMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386183: fltTcaEqptcapacityL3v6Usage128Cap1yearV6TotalCapMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386184: fltTcaEqptcapacityL3v6Usage128Cap5minV6TotalCapMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386185: fltTcaEqptcapacityL3v6Usage128Cap15minV6TotalCapMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386186: fltTcaEqptcapacityL3v6Usage128Cap1hV6TotalCapMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386187: fltTcaEqptcapacityL3v6Usage128Cap1dV6TotalCapMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386188: fltTcaEqptcapacityL3v6Usage128Cap1wV6TotalCapMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386189: fltTcaEqptcapacityL3v6Usage128Cap1moV6TotalCapMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386190: fltTcaEqptcapacityL3v6Usage128Cap1qtrV6TotalCapMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386191: fltTcaEqptcapacityL3v6Usage128Cap1yearV6TotalCapMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386192: fltTcaEqptcapacityL3v6Usage128Cap5minV6TotalCapAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386193: fltTcaEqptcapacityL3v6Usage128Cap15minV6TotalCapAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386194: fltTcaEqptcapacityL3v6Usage128Cap1hV6TotalCapAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386195: fltTcaEqptcapacityL3v6Usage128Cap1dV6TotalCapAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386196: fltTcaEqptcapacityL3v6Usage128Cap1wV6TotalCapAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386197: fltTcaEqptcapacityL3v6Usage128Cap1moV6TotalCapAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386198: fltTcaEqptcapacityL3v6Usage128Cap1qtrV6TotalCapAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386199: fltTcaEqptcapacityL3v6Usage128Cap1yearV6TotalCapAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386224: fltTcaEqptcapacityL3v6Usage128Cap5minV6TotalCapTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386225: fltTcaEqptcapacityL3v6Usage128Cap15minV6TotalCapTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386226: fltTcaEqptcapacityL3v6Usage128Cap1hV6TotalCapTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386227: fltTcaEqptcapacityL3v6Usage128Cap1dV6TotalCapTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386228: fltTcaEqptcapacityL3v6Usage128Cap1wV6TotalCapTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386229: fltTcaEqptcapacityL3v6Usage128Cap1moV6TotalCapTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386230: fltTcaEqptcapacityL3v6Usage128Cap1qtrV6TotalCapTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386231: fltTcaEqptcapacityL3v6Usage128Cap1yearV6TotalCapTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386232: fltTcaEqptcapacityL3v6Usage128Cap5minV6TotalCapRate

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386233: fltTcaEqptcapacityL3v6Usage128Cap15minV6TotalCapRate

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386234: fltTcaEqptcapacityL3v6Usage128Cap1hV6TotalCapRate

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386235: fltTcaEqptcapacityL3v6Usage128Cap1dV6TotalCapRate

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386236: fltTcaEqptcapacityL3v6Usage128Cap1wV6TotalCapRate

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386237: fltTcaEqptcapacityL3v6Usage128Cap1moV6TotalCapRate

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386238: fltTcaEqptcapacityL3v6Usage128Cap1qtrV6TotalCapRate

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386239: fltTcaEqptcapacityL3v6Usage128Cap1yearV6TotalCapRate

Severity: variable

Explanation: This fault is caused by "Total v6 128 Routes capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 Routes capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386312: fltTcaEqptcapacityL3v6Usage128Per5minNormalizedv6TotalLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386313: fltTcaEqptcapacityL3v6Usage128Per15minNormalizedv6TotalLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386314: fltTcaEqptcapacityL3v6Usage128Per1hNormalizedv6TotalLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386315: fltTcaEqptcapacityL3v6Usage128Per1dNormalizedv6TotalLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386316: fltTcaEqptcapacityL3v6Usage128Per1wNormalizedv6TotalLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386317: fltTcaEqptcapacityL3v6Usage128Per1moNormalizedv6TotalLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386318: fltTcaEqptcapacityL3v6Usage128Per1qtrNormalizedv6TotalLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386319: fltTcaEqptcapacityL3v6Usage128Per1yearNormalizedv6TotalLast

Severity: variable

Explanation: This fault is caused by "Total v6 128 L3 entries usage percentage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386320: fltTcaEqptcapacityL3v6Usage128Per5minNormalizedv6TotalMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386321: fltTcaEqptcapacityL3v6Usage128Per15minNormalizedv6TotalMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386322: fltTcaEqptcapacityL3v6Usage128Per1hNormalizedv6TotalMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386323: fltTcaEqptcapacityL3v6Usage128Per1dNormalizedv6TotalMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386324: fltTcaEqptcapacityL3v6Usage128Per1wNormalizedv6TotalMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386325: fltTcaEqptcapacityL3v6Usage128Per1moNormalizedv6TotalMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386326: fltTcaEqptcapacityL3v6Usage128Per1qtrNormalizedv6TotalMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386327: fltTcaEqptcapacityL3v6Usage128Per1yearNormalizedv6TotalMin

Severity: variable

Explanation: This fault is caused by "Total v6 128 L3 entries usage percentage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386328: fltTcaEqptcapacityL3v6Usage128Per5minNormalizedv6TotalMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386329: fltTcaEqptcapacityL3v6Usage128Per15minNormalizedv6TotalMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386330: fltTcaEqptcapacityL3v6Usage128Per1hNormalizedv6TotalMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386331: fltTcaEqptcapacityL3v6Usage128Per1dNormalizedv6TotalMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386332: fltTcaEqptcapacityL3v6Usage128Per1wNormalizedv6TotalMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386333: fltTcaEqptcapacityL3v6Usage128Per1moNormalizedv6TotalMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386334: fltTcaEqptcapacityL3v6Usage128Per1qtrNormalizedv6TotalMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386335: fltTcaEqptcapacityL3v6Usage128Per1yearNormalizedv6TotalMax

Severity: variable

Explanation: This fault is caused by "Total v6 128 L3 entries usage percentage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386336: fltTcaEqptcapacityL3v6Usage128Per5minNormalizedv6TotalAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386337: fltTcaEqptcapacityL3v6Usage128Per15minNormalizedv6TotalAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386338: fltTcaEqptcapacityL3v6Usage128Per1hNormalizedv6TotalAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386339: fltTcaEqptcapacityL3v6Usage128Per1dNormalizedv6TotalAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386340: fltTcaEqptcapacityL3v6Usage128Per1wNormalizedv6TotalAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386341: fltTcaEqptcapacityL3v6Usage128Per1moNormalizedv6TotalAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386342: fltTcaEqptcapacityL3v6Usage128Per1qtrNormalizedv6TotalAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386343: fltTcaEqptcapacityL3v6Usage128Per1yearNormalizedv6TotalAvg

Severity: variable

Explanation: This fault is caused by "Total v6 128 L3 entries usage percentage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386376: fltTcaEqptcapacityL3v6Usage128Per5minNormalizedv6TotalTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386377: fltTcaEqptcapacityL3v6Usage128Per15minNormalizedv6TotalTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386378: fltTcaEqptcapacityL3v6Usage128Per1hNormalizedv6TotalTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386379: fltTcaEqptcapacityL3v6Usage128Per1dNormalizedv6TotalTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386380: fltTcaEqptcapacityL3v6Usage128Per1wNormalizedv6TotalTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386381: fltTcaEqptcapacityL3v6Usage128Per1moNormalizedv6TotalTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386382: fltTcaEqptcapacityL3v6Usage128Per1qtrNormalizedv6TotalTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386383: fltTcaEqptcapacityL3v6Usage128Per1yearNormalizedv6TotalTr

Severity: variable

Explanation: This fault is caused by "Total v6 128 L3 entries usage percentage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total v6 128 L3 entries usage percentage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3864: fltMultidomainMultiDomainIpsMultiDomainIpsCfgNotSupported

Severity: warning

Explanation: This fault occurs when user tries to configure Multidomain policy on unsupported hardware(Old-Gen Spine/Tor)

Recommended Action: To recover from this fault, delete the policy on unsupported hardware(Old-Gen Spine/Tor)

1. Delete the multidomain policy on unsupported hardware(Old-Gen Spine/Tor)

F3865: fltHcloudHubCtxOperCloudHubCtxOperStateDown

Severity: major

Explanation: This fault occurs when a transit gateway has not been properly configured by AWS.

Recommended Action: None set.

F3866: fltHcloudSharedResourceToHubCtxCreateOperCloudSharedResourceToHubCtxCreateOperStateDown

Severity: major

Explanation: This fault occurs when a transit gateway shared resource has not been properly configured by AWS.

Recommended Action: None set.

F3867: fltHcloudSharedResourceToHubCtxAcceptOperCloudSharedResourceToHubCtxAcceptOperStateDown

Severity: major

Explanation: This fault occurs when a transit gateway shared resource invitation has not been accepted by AWS.

Recommended Action: None set.

F386728: fltTcaEqptcapacityPrefixEntriesUsage5minTcamLpmLast

Severity: variable

Explanation: This fault is caused by "tcam LPM current value" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386729: fltTcaEqptcapacityPrefixEntriesUsage15minTcamLpmLast

Severity: variable

Explanation: This fault is caused by "tcam LPM current value" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386730: fltTcaEqptcapacityPrefixEntriesUsage1hTcamLpmLast

Severity: variable

Explanation: This fault is caused by "tcam LPM current value" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386731: fltTcaEqptcapacityPrefixEntriesUsage1dTcamLpmLast

Severity: variable

Explanation: This fault is caused by "tcam LPM current value" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386732: fltTcaEqptcapacityPrefixEntriesUsage1wTcamLpmLast

Severity: variable

Explanation: This fault is caused by "tcam LPM current value" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386733: fltTcaEqptcapacityPrefixEntriesUsage1moTcamLpmLast

Severity: variable

Explanation: This fault is caused by "tcam LPM current value" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386734: fltTcaEqptcapacityPrefixEntriesUsage1qtrTcamLpmLast

Severity: variable

Explanation: This fault is caused by "tcam LPM current value" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386735: fltTcaEqptcapacityPrefixEntriesUsage1yearTcamLpmLast

Severity: variable

Explanation: This fault is caused by "tcam LPM current value" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386744: fltTcaEqptcapacityPrefixEntriesUsage5minTcamLpmCum

Severity: variable

Explanation: This fault is caused by "tcam LPM cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386745: fltTcaEqptcapacityPrefixEntriesUsage15minTcamLpmCum

Severity: variable

Explanation: This fault is caused by "tcam LPM cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386746: fltTcaEqptcapacityPrefixEntriesUsage1hTcamLpmCum

Severity: variable

Explanation: This fault is caused by "tcam LPM cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386747: fltTcaEqptcapacityPrefixEntriesUsage1dTcamLpmCum

Severity: variable

Explanation: This fault is caused by "tcam LPM cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386748: fltTcaEqptcapacityPrefixEntriesUsage1wTcamLpmCum

Severity: variable

Explanation: This fault is caused by "tcam LPM cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386749: fltTcaEqptcapacityPrefixEntriesUsage1moTcamLpmCum

Severity: variable

Explanation: This fault is caused by "tcam LPM cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386750: fltTcaEqptcapacityPrefixEntriesUsage1qtrTcamLpmCum

Severity: variable

Explanation: This fault is caused by "tcam LPM cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386751: fltTcaEqptcapacityPrefixEntriesUsage1yearTcamLpmCum

Severity: variable

Explanation: This fault is caused by "tcam LPM cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386752: fltTcaEqptcapacityPrefixEntriesUsage5minTcamLpmPer

Severity: variable

Explanation: This fault is caused by "tcam LPM periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386753: fltTcaEqptcapacityPrefixEntriesUsage15minTcamLpmPer

Severity: variable

Explanation: This fault is caused by "tcam LPM periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386754: fltTcaEqptcapacityPrefixEntriesUsage1hTcamLpmPer

Severity: variable

Explanation: This fault is caused by "tcam LPM periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386755: fltTcaEqptcapacityPrefixEntriesUsage1dTcamLpmPer

Severity: variable

Explanation: This fault is caused by "tcam LPM periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386756: fltTcaEqptcapacityPrefixEntriesUsage1wTcamLpmPer

Severity: variable

Explanation: This fault is caused by "tcam LPM periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386757: fltTcaEqptcapacityPrefixEntriesUsage1moTcamLpmPer

Severity: variable

Explanation: This fault is caused by "tcam LPM periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386758: fltTcaEqptcapacityPrefixEntriesUsage1qtrTcamLpmPer

Severity: variable

Explanation: This fault is caused by "tcam LPM periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386759: fltTcaEqptcapacityPrefixEntriesUsage1yearTcamLpmPer

Severity: variable

Explanation: This fault is caused by "tcam LPM periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386760: fltTcaEqptcapacityPrefixEntriesUsage5minTcamLpmMin

Severity: variable

Explanation: This fault is caused by "tcam LPM minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386761: fltTcaEqptcapacityPrefixEntriesUsage15minTcamLpmMin

Severity: variable

Explanation: This fault is caused by "tcam LPM minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386762: fltTcaEqptcapacityPrefixEntriesUsage1hTcamLpmMin

Severity: variable

Explanation: This fault is caused by "tcam LPM minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386763: fltTcaEqptcapacityPrefixEntriesUsage1dTcamLpmMin

Severity: variable

Explanation: This fault is caused by "tcam LPM minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386764: fltTcaEqptcapacityPrefixEntriesUsage1wTcamLpmMin

Severity: variable

Explanation: This fault is caused by "tcam LPM minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386765: fltTcaEqptcapacityPrefixEntriesUsage1moTcamLpmMin

Severity: variable

Explanation: This fault is caused by "tcam LPM minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386766: fltTcaEqptcapacityPrefixEntriesUsage1qtrTcamLpmMin

Severity: variable

Explanation: This fault is caused by "tcam LPM minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386767: fltTcaEqptcapacityPrefixEntriesUsage1yearTcamLpmMin

Severity: variable

Explanation: This fault is caused by "tcam LPM minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386768: fltTcaEqptcapacityPrefixEntriesUsage5minTcamLpmMax

Severity: variable

Explanation: This fault is caused by "tcam LPM maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386769: fltTcaEqptcapacityPrefixEntriesUsage15minTcamLpmMax

Severity: variable

Explanation: This fault is caused by "tcam LPM maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386770: fltTcaEqptcapacityPrefixEntriesUsage1hTcamLpmMax

Severity: variable

Explanation: This fault is caused by "tcam LPM maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386771: fltTcaEqptcapacityPrefixEntriesUsage1dTcamLpmMax

Severity: variable

Explanation: This fault is caused by "tcam LPM maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386772: fltTcaEqptcapacityPrefixEntriesUsage1wTcamLpmMax

Severity: variable

Explanation: This fault is caused by "tcam LPM maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386773: fltTcaEqptcapacityPrefixEntriesUsage1moTcamLpmMax

Severity: variable

Explanation: This fault is caused by "tcam LPM maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386774: fltTcaEqptcapacityPrefixEntriesUsage1qtrTcamLpmMax

Severity: variable

Explanation: This fault is caused by "tcam LPM maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386775: fltTcaEqptcapacityPrefixEntriesUsage1yearTcamLpmMax

Severity: variable

Explanation: This fault is caused by "tcam LPM maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386776: fltTcaEqptcapacityPrefixEntriesUsage5minTcamLpmAvg

Severity: variable

Explanation: This fault is caused by "tcam LPM average value" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386777: fltTcaEqptcapacityPrefixEntriesUsage15minTcamLpmAvg

Severity: variable

Explanation: This fault is caused by "tcam LPM average value" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386778: fltTcaEqptcapacityPrefixEntriesUsage1hTcamLpmAvg

Severity: variable

Explanation: This fault is caused by "tcam LPM average value" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386779: fltTcaEqptcapacityPrefixEntriesUsage1dTcamLpmAvg

Severity: variable

Explanation: This fault is caused by "tcam LPM average value" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386780: fltTcaEqptcapacityPrefixEntriesUsage1wTcamLpmAvg

Severity: variable

Explanation: This fault is caused by "tcam LPM average value" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386781: fltTcaEqptcapacityPrefixEntriesUsage1moTcamLpmAvg

Severity: variable

Explanation: This fault is caused by "tcam LPM average value" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386782: fltTcaEqptcapacityPrefixEntriesUsage1qtrTcamLpmAvg

Severity: variable

Explanation: This fault is caused by "tcam LPM average value" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386783: fltTcaEqptcapacityPrefixEntriesUsage1yearTcamLpmAvg

Severity: variable

Explanation: This fault is caused by "tcam LPM average value" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3868: fltHcloudCtxPeerToRouteTableOperCloudCtxPeerToRouteTableOperStateDown

Severity: major

Explanation: This fault occurs when a route table association with a transit gateway has not been accepted by AWS.

Recommended Action: None set.

F386808: fltTcaEqptcapacityPrefixEntriesUsage5minTcamLpmTr

Severity: variable

Explanation: This fault is caused by "tcam LPM trend" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386809: fltTcaEqptcapacityPrefixEntriesUsage15minTcamLpmTr

Severity: variable

Explanation: This fault is caused by "tcam LPM trend" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386810: fltTcaEqptcapacityPrefixEntriesUsage1hTcamLpmTr

Severity: variable

Explanation: This fault is caused by "tcam LPM trend" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386811: fltTcaEqptcapacityPrefixEntriesUsage1dTcamLpmTr

Severity: variable

Explanation: This fault is caused by "tcam LPM trend" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386812: fltTcaEqptcapacityPrefixEntriesUsage1wTcamLpmTr

Severity: variable

Explanation: This fault is caused by "tcam LPM trend" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386813: fltTcaEqptcapacityPrefixEntriesUsage1moTcamLpmTr

Severity: variable

Explanation: This fault is caused by "tcam LPM trend" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386814: fltTcaEqptcapacityPrefixEntriesUsage1qtrTcamLpmTr

Severity: variable

Explanation: This fault is caused by "tcam LPM trend" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386815: fltTcaEqptcapacityPrefixEntriesUsage1yearTcamLpmTr

Severity: variable

Explanation: This fault is caused by "tcam LPM trend" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386816: fltTcaEqptcapacityPrefixEntriesUsage5minTcamLpmRate

Severity: variable

Explanation: This fault is caused by "tcam LPM rate" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386817: fltTcaEqptcapacityPrefixEntriesUsage15minTcamLpmRate

Severity: variable

Explanation: This fault is caused by "tcam LPM rate" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386818: fltTcaEqptcapacityPrefixEntriesUsage1hTcamLpmRate

Severity: variable

Explanation: This fault is caused by "tcam LPM rate" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386819: fltTcaEqptcapacityPrefixEntriesUsage1dTcamLpmRate

Severity: variable

Explanation: This fault is caused by "tcam LPM rate" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386820: fltTcaEqptcapacityPrefixEntriesUsage1wTcamLpmRate

Severity: variable

Explanation: This fault is caused by "tcam LPM rate" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386821: fltTcaEqptcapacityPrefixEntriesUsage1moTcamLpmRate

Severity: variable

Explanation: This fault is caused by "tcam LPM rate" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386822: fltTcaEqptcapacityPrefixEntriesUsage1qtrTcamLpmRate

Severity: variable

Explanation: This fault is caused by "tcam LPM rate" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386823: fltTcaEqptcapacityPrefixEntriesUsage1yearTcamLpmRate

Severity: variable

Explanation: This fault is caused by "tcam LPM rate" statistical property crossing threshold level.

Recommended Action: Check the values of "tcam LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386896: fltTcaEqptcapacityPrefixEntriesUsage5minTotalLpmLast

Severity: variable

Explanation: This fault is caused by "Total L3 LPM current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386897: fltTcaEqptcapacityPrefixEntriesUsage15minTotalLpmLast

Severity: variable

Explanation: This fault is caused by "Total L3 LPM current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386898: fltTcaEqptcapacityPrefixEntriesUsage1hTotalLpmLast

Severity: variable

Explanation: This fault is caused by "Total L3 LPM current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386899: fltTcaEqptcapacityPrefixEntriesUsage1dTotalLpmLast

Severity: variable

Explanation: This fault is caused by "Total L3 LPM current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3869: fltHinventoryRsNexthopTgwResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F386900: fltTcaEqptcapacityPrefixEntriesUsage1wTotalLpmLast

Severity: variable

Explanation: This fault is caused by "Total L3 LPM current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386901: fltTcaEqptcapacityPrefixEntriesUsage1moTotalLpmLast

Severity: variable

Explanation: This fault is caused by "Total L3 LPM current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386902: fltTcaEqptcapacityPrefixEntriesUsage1qtrTotalLpmLast

Severity: variable

Explanation: This fault is caused by "Total L3 LPM current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386903: fltTcaEqptcapacityPrefixEntriesUsage1yearTotalLpmLast

Severity: variable

Explanation: This fault is caused by "Total L3 LPM current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386912: fltTcaEqptcapacityPrefixEntriesUsage5minTotalLpmCum

Severity: variable

Explanation: This fault is caused by "Total L3 LPM cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386913: fltTcaEqptcapacityPrefixEntriesUsage15minTotalLpmCum

Severity: variable

Explanation: This fault is caused by "Total L3 LPM cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386914: fltTcaEqptcapacityPrefixEntriesUsage1hTotalLpmCum

Severity: variable

Explanation: This fault is caused by "Total L3 LPM cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386915: fltTcaEqptcapacityPrefixEntriesUsage1dTotalLpmCum

Severity: variable

Explanation: This fault is caused by "Total L3 LPM cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386916: fltTcaEqptcapacityPrefixEntriesUsage1wTotalLpmCum

Severity: variable

Explanation: This fault is caused by "Total L3 LPM cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386917: fltTcaEqptcapacityPrefixEntriesUsage1moTotalLpmCum

Severity: variable

Explanation: This fault is caused by "Total L3 LPM cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386918: fltTcaEqptcapacityPrefixEntriesUsage1qtrTotalLpmCum

Severity: variable

Explanation: This fault is caused by "Total L3 LPM cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386919: fltTcaEqptcapacityPrefixEntriesUsage1yearTotalLpmCum

Severity: variable

Explanation: This fault is caused by "Total L3 LPM cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386920: fltTcaEqptcapacityPrefixEntriesUsage5minTotalLpmPer

Severity: variable

Explanation: This fault is caused by "Total L3 LPM periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386921: fltTcaEqptcapacityPrefixEntriesUsage15minTotalLpmPer

Severity: variable

Explanation: This fault is caused by "Total L3 LPM periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386922: fltTcaEqptcapacityPrefixEntriesUsage1hTotalLpmPer

Severity: variable

Explanation: This fault is caused by "Total L3 LPM periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386923: fltTcaEqptcapacityPrefixEntriesUsage1dTotalLpmPer

Severity: variable

Explanation: This fault is caused by "Total L3 LPM periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386924: fltTcaEqptcapacityPrefixEntriesUsage1wTotalLpmPer

Severity: variable

Explanation: This fault is caused by "Total L3 LPM periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386925: fltTcaEqptcapacityPrefixEntriesUsage1moTotalLpmPer

Severity: variable

Explanation: This fault is caused by "Total L3 LPM periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386926: fltTcaEqptcapacityPrefixEntriesUsage1qtrTotalLpmPer

Severity: variable

Explanation: This fault is caused by "Total L3 LPM periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386927: fltTcaEqptcapacityPrefixEntriesUsage1yearTotalLpmPer

Severity: variable

Explanation: This fault is caused by "Total L3 LPM periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386928: fltTcaEqptcapacityPrefixEntriesUsage5minTotalLpmMin

Severity: variable

Explanation: This fault is caused by "Total L3 LPM minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386929: fltTcaEqptcapacityPrefixEntriesUsage15minTotalLpmMin

Severity: variable

Explanation: This fault is caused by "Total L3 LPM minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386930: fltTcaEqptcapacityPrefixEntriesUsage1hTotalLpmMin

Severity: variable

Explanation: This fault is caused by "Total L3 LPM minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386931: fltTcaEqptcapacityPrefixEntriesUsage1dTotalLpmMin

Severity: variable

Explanation: This fault is caused by "Total L3 LPM minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386932: fltTcaEqptcapacityPrefixEntriesUsage1wTotalLpmMin

Severity: variable

Explanation: This fault is caused by "Total L3 LPM minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386933: fltTcaEqptcapacityPrefixEntriesUsage1moTotalLpmMin

Severity: variable

Explanation: This fault is caused by "Total L3 LPM minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386934: fltTcaEqptcapacityPrefixEntriesUsage1qtrTotalLpmMin

Severity: variable

Explanation: This fault is caused by "Total L3 LPM minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386935: fltTcaEqptcapacityPrefixEntriesUsage1yearTotalLpmMin

Severity: variable

Explanation: This fault is caused by "Total L3 LPM minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386936: fltTcaEqptcapacityPrefixEntriesUsage5minTotalLpmMax

Severity: variable

Explanation: This fault is caused by "Total L3 LPM maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386937: fltTcaEqptcapacityPrefixEntriesUsage15minTotalLpmMax

Severity: variable

Explanation: This fault is caused by "Total L3 LPM maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386938: fltTcaEqptcapacityPrefixEntriesUsage1hTotalLpmMax

Severity: variable

Explanation: This fault is caused by "Total L3 LPM maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386939: fltTcaEqptcapacityPrefixEntriesUsage1dTotalLpmMax

Severity: variable

Explanation: This fault is caused by "Total L3 LPM maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386940: fltTcaEqptcapacityPrefixEntriesUsage1wTotalLpmMax

Severity: variable

Explanation: This fault is caused by "Total L3 LPM maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386941: fltTcaEqptcapacityPrefixEntriesUsage1moTotalLpmMax

Severity: variable

Explanation: This fault is caused by "Total L3 LPM maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386942: fltTcaEqptcapacityPrefixEntriesUsage1qtrTotalLpmMax

Severity: variable

Explanation: This fault is caused by "Total L3 LPM maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386943: fltTcaEqptcapacityPrefixEntriesUsage1yearTotalLpmMax

Severity: variable

Explanation: This fault is caused by "Total L3 LPM maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386944: fltTcaEqptcapacityPrefixEntriesUsage5minTotalLpmAvg

Severity: variable

Explanation: This fault is caused by "Total L3 LPM average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386945: fltTcaEqptcapacityPrefixEntriesUsage15minTotalLpmAvg

Severity: variable

Explanation: This fault is caused by "Total L3 LPM average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386946: fltTcaEqptcapacityPrefixEntriesUsage1hTotalLpmAvg

Severity: variable

Explanation: This fault is caused by "Total L3 LPM average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386947: fltTcaEqptcapacityPrefixEntriesUsage1dTotalLpmAvg

Severity: variable

Explanation: This fault is caused by "Total L3 LPM average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386948: fltTcaEqptcapacityPrefixEntriesUsage1wTotalLpmAvg

Severity: variable

Explanation: This fault is caused by "Total L3 LPM average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386949: fltTcaEqptcapacityPrefixEntriesUsage1moTotalLpmAvg

Severity: variable

Explanation: This fault is caused by "Total L3 LPM average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386950: fltTcaEqptcapacityPrefixEntriesUsage1qtrTotalLpmAvg

Severity: variable

Explanation: This fault is caused by "Total L3 LPM average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386951: fltTcaEqptcapacityPrefixEntriesUsage1yearTotalLpmAvg

Severity: variable

Explanation: This fault is caused by "Total L3 LPM average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386976: fltTcaEqptcapacityPrefixEntriesUsage5minTotalLpmTr

Severity: variable

Explanation: This fault is caused by "Total L3 LPM trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386977: fltTcaEqptcapacityPrefixEntriesUsage15minTotalLpmTr

Severity: variable

Explanation: This fault is caused by "Total L3 LPM trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386978: fltTcaEqptcapacityPrefixEntriesUsage1hTotalLpmTr

Severity: variable

Explanation: This fault is caused by "Total L3 LPM trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386979: fltTcaEqptcapacityPrefixEntriesUsage1dTotalLpmTr

Severity: variable

Explanation: This fault is caused by "Total L3 LPM trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386980: fltTcaEqptcapacityPrefixEntriesUsage1wTotalLpmTr

Severity: variable

Explanation: This fault is caused by "Total L3 LPM trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386981: fltTcaEqptcapacityPrefixEntriesUsage1moTotalLpmTr

Severity: variable

Explanation: This fault is caused by "Total L3 LPM trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386982: fltTcaEqptcapacityPrefixEntriesUsage1qtrTotalLpmTr

Severity: variable

Explanation: This fault is caused by "Total L3 LPM trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386983: fltTcaEqptcapacityPrefixEntriesUsage1yearTotalLpmTr

Severity: variable

Explanation: This fault is caused by "Total L3 LPM trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386984: fltTcaEqptcapacityPrefixEntriesUsage5minTotalLpmRate

Severity: variable

Explanation: This fault is caused by "Total L3 LPM rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386985: fltTcaEqptcapacityPrefixEntriesUsage15minTotalLpmRate

Severity: variable

Explanation: This fault is caused by "Total L3 LPM rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386986: fltTcaEqptcapacityPrefixEntriesUsage1hTotalLpmRate

Severity: variable

Explanation: This fault is caused by "Total L3 LPM rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386987: fltTcaEqptcapacityPrefixEntriesUsage1dTotalLpmRate

Severity: variable

Explanation: This fault is caused by "Total L3 LPM rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386988: fltTcaEqptcapacityPrefixEntriesUsage1wTotalLpmRate

Severity: variable

Explanation: This fault is caused by "Total L3 LPM rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386989: fltTcaEqptcapacityPrefixEntriesUsage1moTotalLpmRate

Severity: variable

Explanation: This fault is caused by "Total L3 LPM rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386990: fltTcaEqptcapacityPrefixEntriesUsage1qtrTotalLpmRate

Severity: variable

Explanation: This fault is caused by "Total L3 LPM rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F386991: fltTcaEqptcapacityPrefixEntriesUsage1yearTotalLpmRate

Severity: variable

Explanation: This fault is caused by "Total L3 LPM rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3870: fltHinventoryRsAttachmentToRouteTableResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F387064: fltTcaEqptcapacityPrefixEntriesUsage5minV4LpmLast

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM current value" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387065: fltTcaEqptcapacityPrefixEntriesUsage15minV4LpmLast

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM current value" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387066: fltTcaEqptcapacityPrefixEntriesUsage1hV4LpmLast

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM current value" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387067: fltTcaEqptcapacityPrefixEntriesUsage1dV4LpmLast

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM current value" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387068: fltTcaEqptcapacityPrefixEntriesUsage1wV4LpmLast

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM current value" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387069: fltTcaEqptcapacityPrefixEntriesUsage1moV4LpmLast

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM current value" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387070: fltTcaEqptcapacityPrefixEntriesUsage1qtrV4LpmLast

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM current value" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387071: fltTcaEqptcapacityPrefixEntriesUsage1yearV4LpmLast

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM current value" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387080: fltTcaEqptcapacityPrefixEntriesUsage5minV4LpmCum

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387081: fltTcaEqptcapacityPrefixEntriesUsage15minV4LpmCum

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387082: fltTcaEqptcapacityPrefixEntriesUsage1hV4LpmCum

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387083: fltTcaEqptcapacityPrefixEntriesUsage1dV4LpmCum

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387084: fltTcaEqptcapacityPrefixEntriesUsage1wV4LpmCum

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387085: fltTcaEqptcapacityPrefixEntriesUsage1moV4LpmCum

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387086: fltTcaEqptcapacityPrefixEntriesUsage1qtrV4LpmCum

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387087: fltTcaEqptcapacityPrefixEntriesUsage1yearV4LpmCum

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387088: fltTcaEqptcapacityPrefixEntriesUsage5minV4LpmPer

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387089: fltTcaEqptcapacityPrefixEntriesUsage15minV4LpmPer

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387090: fltTcaEqptcapacityPrefixEntriesUsage1hV4LpmPer

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387091: fltTcaEqptcapacityPrefixEntriesUsage1dV4LpmPer

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387092: fltTcaEqptcapacityPrefixEntriesUsage1wV4LpmPer

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387093: fltTcaEqptcapacityPrefixEntriesUsage1moV4LpmPer

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387094: fltTcaEqptcapacityPrefixEntriesUsage1qtrV4LpmPer

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387095: fltTcaEqptcapacityPrefixEntriesUsage1yearV4LpmPer

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387096: fltTcaEqptcapacityPrefixEntriesUsage5minV4LpmMin

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387097: fltTcaEqptcapacityPrefixEntriesUsage15minV4LpmMin

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387098: fltTcaEqptcapacityPrefixEntriesUsage1hV4LpmMin

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387099: fltTcaEqptcapacityPrefixEntriesUsage1dV4LpmMin

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3871: fltHinventoryRsAttachmentToSubnetResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F387100: fltTcaEqptcapacityPrefixEntriesUsage1wV4LpmMin

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387101: fltTcaEqptcapacityPrefixEntriesUsage1moV4LpmMin

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387102: fltTcaEqptcapacityPrefixEntriesUsage1qtrV4LpmMin

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387103: fltTcaEqptcapacityPrefixEntriesUsage1yearV4LpmMin

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387104: fltTcaEqptcapacityPrefixEntriesUsage5minV4LpmMax

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387105: fltTcaEqptcapacityPrefixEntriesUsage15minV4LpmMax

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387106: fltTcaEqptcapacityPrefixEntriesUsage1hV4LpmMax

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387107: fltTcaEqptcapacityPrefixEntriesUsage1dV4LpmMax

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387108: fltTcaEqptcapacityPrefixEntriesUsage1wV4LpmMax

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387109: fltTcaEqptcapacityPrefixEntriesUsage1moV4LpmMax

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387110: fltTcaEqptcapacityPrefixEntriesUsage1qtrV4LpmMax

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387111: fltTcaEqptcapacityPrefixEntriesUsage1yearV4LpmMax

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387112: fltTcaEqptcapacityPrefixEntriesUsage5minV4LpmAvg

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM average value" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387113: fltTcaEqptcapacityPrefixEntriesUsage15minV4LpmAvg

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM average value" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387114: fltTcaEqptcapacityPrefixEntriesUsage1hV4LpmAvg

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM average value" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387115: fltTcaEqptcapacityPrefixEntriesUsage1dV4LpmAvg

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM average value" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387116: fltTcaEqptcapacityPrefixEntriesUsage1wV4LpmAvg

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM average value" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387117: fltTcaEqptcapacityPrefixEntriesUsage1moV4LpmAvg

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM average value" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387118: fltTcaEqptcapacityPrefixEntriesUsage1qtrV4LpmAvg

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM average value" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387119: fltTcaEqptcapacityPrefixEntriesUsage1yearV4LpmAvg

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM average value" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387144: fltTcaEqptcapacityPrefixEntriesUsage5minV4LpmTr

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM trend" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387145: fltTcaEqptcapacityPrefixEntriesUsage15minV4LpmTr

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM trend" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387146: fltTcaEqptcapacityPrefixEntriesUsage1hV4LpmTr

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM trend" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387147: fltTcaEqptcapacityPrefixEntriesUsage1dV4LpmTr

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM trend" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387148: fltTcaEqptcapacityPrefixEntriesUsage1wV4LpmTr

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM trend" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387149: fltTcaEqptcapacityPrefixEntriesUsage1moV4LpmTr

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM trend" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387150: fltTcaEqptcapacityPrefixEntriesUsage1qtrV4LpmTr

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM trend" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387151: fltTcaEqptcapacityPrefixEntriesUsage1yearV4LpmTr

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM trend" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387152: fltTcaEqptcapacityPrefixEntriesUsage5minV4LpmRate

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM rate" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387153: fltTcaEqptcapacityPrefixEntriesUsage15minV4LpmRate

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM rate" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387154: fltTcaEqptcapacityPrefixEntriesUsage1hV4LpmRate

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM rate" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387155: fltTcaEqptcapacityPrefixEntriesUsage1dV4LpmRate

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM rate" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387156: fltTcaEqptcapacityPrefixEntriesUsage1wV4LpmRate

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM rate" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387157: fltTcaEqptcapacityPrefixEntriesUsage1moV4LpmRate

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM rate" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387158: fltTcaEqptcapacityPrefixEntriesUsage1qtrV4LpmRate

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM rate" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387159: fltTcaEqptcapacityPrefixEntriesUsage1yearV4LpmRate

Severity: variable

Explanation: This fault is caused by "v4 L3 LPM rate" statistical property crossing threshold level.

Recommended Action: Check the values of "v4 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3872: fltInfrazoneZoneConfigZoneDisabled

Severity: warning

Explanation: This fault is raised when infrazone.Zone is disabled or locked.

Recommended Action: If you see this fault, take the following actions:

1. Make sure infrazone.Zone.deplMod is not disabled.

F387232: fltTcaEqptcapacityPrefixEntriesUsage5minV6LpmLast

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM current value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387233: fltTcaEqptcapacityPrefixEntriesUsage15minV6LpmLast

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM current value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387234: fltTcaEqptcapacityPrefixEntriesUsage1hV6LpmLast

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM current value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387235: fltTcaEqptcapacityPrefixEntriesUsage1dV6LpmLast

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM current value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387236: fltTcaEqptcapacityPrefixEntriesUsage1wV6LpmLast

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM current value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387237: fltTcaEqptcapacityPrefixEntriesUsage1moV6LpmLast

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM current value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387238: fltTcaEqptcapacityPrefixEntriesUsage1qtrV6LpmLast

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM current value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387239: fltTcaEqptcapacityPrefixEntriesUsage1yearV6LpmLast

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM current value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387248: fltTcaEqptcapacityPrefixEntriesUsage5minV6LpmCum

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387249: fltTcaEqptcapacityPrefixEntriesUsage15minV6LpmCum

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387250: fltTcaEqptcapacityPrefixEntriesUsage1hV6LpmCum

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387251: fltTcaEqptcapacityPrefixEntriesUsage1dV6LpmCum

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387252: fltTcaEqptcapacityPrefixEntriesUsage1wV6LpmCum

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387253: fltTcaEqptcapacityPrefixEntriesUsage1moV6LpmCum

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387254: fltTcaEqptcapacityPrefixEntriesUsage1qtrV6LpmCum

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387255: fltTcaEqptcapacityPrefixEntriesUsage1yearV6LpmCum

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387256: fltTcaEqptcapacityPrefixEntriesUsage5minV6LpmPer

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387257: fltTcaEqptcapacityPrefixEntriesUsage15minV6LpmPer

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387258: fltTcaEqptcapacityPrefixEntriesUsage1hV6LpmPer

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387259: fltTcaEqptcapacityPrefixEntriesUsage1dV6LpmPer

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387260: fltTcaEqptcapacityPrefixEntriesUsage1wV6LpmPer

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387261: fltTcaEqptcapacityPrefixEntriesUsage1moV6LpmPer

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387262: fltTcaEqptcapacityPrefixEntriesUsage1qtrV6LpmPer

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387263: fltTcaEqptcapacityPrefixEntriesUsage1yearV6LpmPer

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387264: fltTcaEqptcapacityPrefixEntriesUsage5minV6LpmMin

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387265: fltTcaEqptcapacityPrefixEntriesUsage15minV6LpmMin

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387266: fltTcaEqptcapacityPrefixEntriesUsage1hV6LpmMin

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387267: fltTcaEqptcapacityPrefixEntriesUsage1dV6LpmMin

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387268: fltTcaEqptcapacityPrefixEntriesUsage1wV6LpmMin

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387269: fltTcaEqptcapacityPrefixEntriesUsage1moV6LpmMin

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387270: fltTcaEqptcapacityPrefixEntriesUsage1qtrV6LpmMin

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387271: fltTcaEqptcapacityPrefixEntriesUsage1yearV6LpmMin

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387272: fltTcaEqptcapacityPrefixEntriesUsage5minV6LpmMax

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387273: fltTcaEqptcapacityPrefixEntriesUsage15minV6LpmMax

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387274: fltTcaEqptcapacityPrefixEntriesUsage1hV6LpmMax

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387275: fltTcaEqptcapacityPrefixEntriesUsage1dV6LpmMax

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387276: fltTcaEqptcapacityPrefixEntriesUsage1wV6LpmMax

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387277: fltTcaEqptcapacityPrefixEntriesUsage1moV6LpmMax

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387278: fltTcaEqptcapacityPrefixEntriesUsage1qtrV6LpmMax

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387279: fltTcaEqptcapacityPrefixEntriesUsage1yearV6LpmMax

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387280: fltTcaEqptcapacityPrefixEntriesUsage5minV6LpmAvg

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM average value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387281: fltTcaEqptcapacityPrefixEntriesUsage15minV6LpmAvg

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM average value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387282: fltTcaEqptcapacityPrefixEntriesUsage1hV6LpmAvg

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM average value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387283: fltTcaEqptcapacityPrefixEntriesUsage1dV6LpmAvg

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM average value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387284: fltTcaEqptcapacityPrefixEntriesUsage1wV6LpmAvg

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM average value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387285: fltTcaEqptcapacityPrefixEntriesUsage1moV6LpmAvg

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM average value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387286: fltTcaEqptcapacityPrefixEntriesUsage1qtrV6LpmAvg

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM average value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387287: fltTcaEqptcapacityPrefixEntriesUsage1yearV6LpmAvg

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM average value" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387312: fltTcaEqptcapacityPrefixEntriesUsage5minV6LpmTr

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM trend" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387313: fltTcaEqptcapacityPrefixEntriesUsage15minV6LpmTr

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM trend" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387314: fltTcaEqptcapacityPrefixEntriesUsage1hV6LpmTr

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM trend" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387315: fltTcaEqptcapacityPrefixEntriesUsage1dV6LpmTr

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM trend" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387316: fltTcaEqptcapacityPrefixEntriesUsage1wV6LpmTr

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM trend" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387317: fltTcaEqptcapacityPrefixEntriesUsage1moV6LpmTr

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM trend" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387318: fltTcaEqptcapacityPrefixEntriesUsage1qtrV6LpmTr

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM trend" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387319: fltTcaEqptcapacityPrefixEntriesUsage1yearV6LpmTr

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM trend" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387320: fltTcaEqptcapacityPrefixEntriesUsage5minV6LpmRate

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM rate" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387321: fltTcaEqptcapacityPrefixEntriesUsage15minV6LpmRate

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM rate" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387322: fltTcaEqptcapacityPrefixEntriesUsage1hV6LpmRate

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM rate" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387323: fltTcaEqptcapacityPrefixEntriesUsage1dV6LpmRate

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM rate" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387324: fltTcaEqptcapacityPrefixEntriesUsage1wV6LpmRate

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM rate" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387325: fltTcaEqptcapacityPrefixEntriesUsage1moV6LpmRate

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM rate" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387326: fltTcaEqptcapacityPrefixEntriesUsage1qtrV6LpmRate

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM rate" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387327: fltTcaEqptcapacityPrefixEntriesUsage1yearV6LpmRate

Severity: variable

Explanation: This fault is caused by "v6 L3 LPM rate" statistical property crossing threshold level.

Recommended Action: Check the values of "v6 L3 LPM" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3874: fltFteRsCollectorAttResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F387400: fltTcaEqptcapacityPrefixEntriesUsageCap5minTotalLpmCapLast

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387401: fltTcaEqptcapacityPrefixEntriesUsageCap15minTotalLpmCapLast

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387402: fltTcaEqptcapacityPrefixEntriesUsageCap1hTotalLpmCapLast

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387403: fltTcaEqptcapacityPrefixEntriesUsageCap1dTotalLpmCapLast

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387404: fltTcaEqptcapacityPrefixEntriesUsageCap1wTotalLpmCapLast

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387405: fltTcaEqptcapacityPrefixEntriesUsageCap1moTotalLpmCapLast

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387406: fltTcaEqptcapacityPrefixEntriesUsageCap1qtrTotalLpmCapLast

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387407: fltTcaEqptcapacityPrefixEntriesUsageCap1yearTotalLpmCapLast

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387416: fltTcaEqptcapacityPrefixEntriesUsageCap5minTotalLpmCapCum

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387417: fltTcaEqptcapacityPrefixEntriesUsageCap15minTotalLpmCapCum

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387418: fltTcaEqptcapacityPrefixEntriesUsageCap1hTotalLpmCapCum

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387419: fltTcaEqptcapacityPrefixEntriesUsageCap1dTotalLpmCapCum

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387420: fltTcaEqptcapacityPrefixEntriesUsageCap1wTotalLpmCapCum

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387421: fltTcaEqptcapacityPrefixEntriesUsageCap1moTotalLpmCapCum

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387422: fltTcaEqptcapacityPrefixEntriesUsageCap1qtrTotalLpmCapCum

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387423: fltTcaEqptcapacityPrefixEntriesUsageCap1yearTotalLpmCapCum

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387424: fltTcaEqptcapacityPrefixEntriesUsageCap5minTotalLpmCapPer

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387425: fltTcaEqptcapacityPrefixEntriesUsageCap15minTotalLpmCapPer

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387426: fltTcaEqptcapacityPrefixEntriesUsageCap1hTotalLpmCapPer

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387427: fltTcaEqptcapacityPrefixEntriesUsageCap1dTotalLpmCapPer

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387428: fltTcaEqptcapacityPrefixEntriesUsageCap1wTotalLpmCapPer

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387429: fltTcaEqptcapacityPrefixEntriesUsageCap1moTotalLpmCapPer

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387430: fltTcaEqptcapacityPrefixEntriesUsageCap1qtrTotalLpmCapPer

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387431: fltTcaEqptcapacityPrefixEntriesUsageCap1yearTotalLpmCapPer

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387432: fltTcaEqptcapacityPrefixEntriesUsageCap5minTotalLpmCapMin

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387433: fltTcaEqptcapacityPrefixEntriesUsageCap15minTotalLpmCapMin

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387434: fltTcaEqptcapacityPrefixEntriesUsageCap1hTotalLpmCapMin

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387435: fltTcaEqptcapacityPrefixEntriesUsageCap1dTotalLpmCapMin

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387436: fltTcaEqptcapacityPrefixEntriesUsageCap1wTotalLpmCapMin

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387437: fltTcaEqptcapacityPrefixEntriesUsageCap1moTotalLpmCapMin

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387438: fltTcaEqptcapacityPrefixEntriesUsageCap1qtrTotalLpmCapMin

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387439: fltTcaEqptcapacityPrefixEntriesUsageCap1yearTotalLpmCapMin

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387440: fltTcaEqptcapacityPrefixEntriesUsageCap5minTotalLpmCapMax

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387441: fltTcaEqptcapacityPrefixEntriesUsageCap15minTotalLpmCapMax

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387442: fltTcaEqptcapacityPrefixEntriesUsageCap1hTotalLpmCapMax

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387443: fltTcaEqptcapacityPrefixEntriesUsageCap1dTotalLpmCapMax

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387444: fltTcaEqptcapacityPrefixEntriesUsageCap1wTotalLpmCapMax

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387445: fltTcaEqptcapacityPrefixEntriesUsageCap1moTotalLpmCapMax

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387446: fltTcaEqptcapacityPrefixEntriesUsageCap1qtrTotalLpmCapMax

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387447: fltTcaEqptcapacityPrefixEntriesUsageCap1yearTotalLpmCapMax

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387448: fltTcaEqptcapacityPrefixEntriesUsageCap5minTotalLpmCapAvg

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387449: fltTcaEqptcapacityPrefixEntriesUsageCap15minTotalLpmCapAvg

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387450: fltTcaEqptcapacityPrefixEntriesUsageCap1hTotalLpmCapAvg

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387451: fltTcaEqptcapacityPrefixEntriesUsageCap1dTotalLpmCapAvg

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387452: fltTcaEqptcapacityPrefixEntriesUsageCap1wTotalLpmCapAvg

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387453: fltTcaEqptcapacityPrefixEntriesUsageCap1moTotalLpmCapAvg

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387454: fltTcaEqptcapacityPrefixEntriesUsageCap1qtrTotalLpmCapAvg

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387455: fltTcaEqptcapacityPrefixEntriesUsageCap1yearTotalLpmCapAvg

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387480: fltTcaEqptcapacityPrefixEntriesUsageCap5minTotalLpmCapTr

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387481: fltTcaEqptcapacityPrefixEntriesUsageCap15minTotalLpmCapTr

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387482: fltTcaEqptcapacityPrefixEntriesUsageCap1hTotalLpmCapTr

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387483: fltTcaEqptcapacityPrefixEntriesUsageCap1dTotalLpmCapTr

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387484: fltTcaEqptcapacityPrefixEntriesUsageCap1wTotalLpmCapTr

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387485: fltTcaEqptcapacityPrefixEntriesUsageCap1moTotalLpmCapTr

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387486: fltTcaEqptcapacityPrefixEntriesUsageCap1qtrTotalLpmCapTr

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387487: fltTcaEqptcapacityPrefixEntriesUsageCap1yearTotalLpmCapTr

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387488: fltTcaEqptcapacityPrefixEntriesUsageCap5minTotalLpmCapRate

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387489: fltTcaEqptcapacityPrefixEntriesUsageCap15minTotalLpmCapRate

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387490: fltTcaEqptcapacityPrefixEntriesUsageCap1hTotalLpmCapRate

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387491: fltTcaEqptcapacityPrefixEntriesUsageCap1dTotalLpmCapRate

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387492: fltTcaEqptcapacityPrefixEntriesUsageCap1wTotalLpmCapRate

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387493: fltTcaEqptcapacityPrefixEntriesUsageCap1moTotalLpmCapRate

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387494: fltTcaEqptcapacityPrefixEntriesUsageCap1qtrTotalLpmCapRate

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387495: fltTcaEqptcapacityPrefixEntriesUsageCap1yearTotalLpmCapRate

Severity: variable

Explanation: This fault is caused by "L3 lpm capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "L3 lpm capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3875: fltFteRsEventsAttResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3876: fltFteRsRecordAttResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3879: fltHcloudRsNextHopToVrfGroupNwIfResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F387952: fltTcaEqptcapacityPGLabelEntry5minNormalizedLast

Severity: variable

Explanation: This fault is caused by "PG label entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387953: fltTcaEqptcapacityPGLabelEntry15minNormalizedLast

Severity: variable

Explanation: This fault is caused by "PG label entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387954: fltTcaEqptcapacityPGLabelEntry1hNormalizedLast

Severity: variable

Explanation: This fault is caused by "PG label entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387955: fltTcaEqptcapacityPGLabelEntry1dNormalizedLast

Severity: variable

Explanation: This fault is caused by "PG label entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387956: fltTcaEqptcapacityPGLabelEntry1wNormalizedLast

Severity: variable

Explanation: This fault is caused by "PG label entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387957: fltTcaEqptcapacityPGLabelEntry1moNormalizedLast

Severity: variable

Explanation: This fault is caused by "PG label entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387958: fltTcaEqptcapacityPGLabelEntry1qtrNormalizedLast

Severity: variable

Explanation: This fault is caused by "PG label entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387959: fltTcaEqptcapacityPGLabelEntry1yearNormalizedLast

Severity: variable

Explanation: This fault is caused by "PG label entries usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387960: fltTcaEqptcapacityPGLabelEntry5minNormalizedMin

Severity: variable

Explanation: This fault is caused by "PG label entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387961: fltTcaEqptcapacityPGLabelEntry15minNormalizedMin

Severity: variable

Explanation: This fault is caused by "PG label entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387962: fltTcaEqptcapacityPGLabelEntry1hNormalizedMin

Severity: variable

Explanation: This fault is caused by "PG label entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387963: fltTcaEqptcapacityPGLabelEntry1dNormalizedMin

Severity: variable

Explanation: This fault is caused by "PG label entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387964: fltTcaEqptcapacityPGLabelEntry1wNormalizedMin

Severity: variable

Explanation: This fault is caused by "PG label entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387965: fltTcaEqptcapacityPGLabelEntry1moNormalizedMin

Severity: variable

Explanation: This fault is caused by "PG label entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387966: fltTcaEqptcapacityPGLabelEntry1qtrNormalizedMin

Severity: variable

Explanation: This fault is caused by "PG label entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387967: fltTcaEqptcapacityPGLabelEntry1yearNormalizedMin

Severity: variable

Explanation: This fault is caused by "PG label entries usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387968: fltTcaEqptcapacityPGLabelEntry5minNormalizedMax

Severity: variable

Explanation: This fault is caused by "PG label entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387969: fltTcaEqptcapacityPGLabelEntry15minNormalizedMax

Severity: variable

Explanation: This fault is caused by "PG label entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387970: fltTcaEqptcapacityPGLabelEntry1hNormalizedMax

Severity: variable

Explanation: This fault is caused by "PG label entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387971: fltTcaEqptcapacityPGLabelEntry1dNormalizedMax

Severity: variable

Explanation: This fault is caused by "PG label entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387972: fltTcaEqptcapacityPGLabelEntry1wNormalizedMax

Severity: variable

Explanation: This fault is caused by "PG label entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387973: fltTcaEqptcapacityPGLabelEntry1moNormalizedMax

Severity: variable

Explanation: This fault is caused by "PG label entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387974: fltTcaEqptcapacityPGLabelEntry1qtrNormalizedMax

Severity: variable

Explanation: This fault is caused by "PG label entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387975: fltTcaEqptcapacityPGLabelEntry1yearNormalizedMax

Severity: variable

Explanation: This fault is caused by "PG label entries usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387976: fltTcaEqptcapacityPGLabelEntry5minNormalizedAvg

Severity: variable

Explanation: This fault is caused by "PG label entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387977: fltTcaEqptcapacityPGLabelEntry15minNormalizedAvg

Severity: variable

Explanation: This fault is caused by "PG label entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387978: fltTcaEqptcapacityPGLabelEntry1hNormalizedAvg

Severity: variable

Explanation: This fault is caused by "PG label entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387979: fltTcaEqptcapacityPGLabelEntry1dNormalizedAvg

Severity: variable

Explanation: This fault is caused by "PG label entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387980: fltTcaEqptcapacityPGLabelEntry1wNormalizedAvg

Severity: variable

Explanation: This fault is caused by "PG label entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387981: fltTcaEqptcapacityPGLabelEntry1moNormalizedAvg

Severity: variable

Explanation: This fault is caused by "PG label entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387982: fltTcaEqptcapacityPGLabelEntry1qtrNormalizedAvg

Severity: variable

Explanation: This fault is caused by "PG label entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F387983: fltTcaEqptcapacityPGLabelEntry1yearNormalizedAvg

Severity: variable

Explanation: This fault is caused by "PG label entries usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3880: fltFabricRsFIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F388016: fltTcaEqptcapacityPGLabelEntry5minNormalizedTr

Severity: variable

Explanation: This fault is caused by "PG label entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388017: fltTcaEqptcapacityPGLabelEntry15minNormalizedTr

Severity: variable

Explanation: This fault is caused by "PG label entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388018: fltTcaEqptcapacityPGLabelEntry1hNormalizedTr

Severity: variable

Explanation: This fault is caused by "PG label entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388019: fltTcaEqptcapacityPGLabelEntry1dNormalizedTr

Severity: variable

Explanation: This fault is caused by "PG label entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388020: fltTcaEqptcapacityPGLabelEntry1wNormalizedTr

Severity: variable

Explanation: This fault is caused by "PG label entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388021: fltTcaEqptcapacityPGLabelEntry1moNormalizedTr

Severity: variable

Explanation: This fault is caused by "PG label entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388022: fltTcaEqptcapacityPGLabelEntry1qtrNormalizedTr

Severity: variable

Explanation: This fault is caused by "PG label entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388023: fltTcaEqptcapacityPGLabelEntry1yearNormalizedTr

Severity: variable

Explanation: This fault is caused by "PG label entries usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label entries usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388072: fltTcaEqptcapacityPGLabelUsage5minPgLblCapLast

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388073: fltTcaEqptcapacityPGLabelUsage15minPgLblCapLast

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388074: fltTcaEqptcapacityPGLabelUsage1hPgLblCapLast

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388075: fltTcaEqptcapacityPGLabelUsage1dPgLblCapLast

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388076: fltTcaEqptcapacityPGLabelUsage1wPgLblCapLast

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388077: fltTcaEqptcapacityPGLabelUsage1moPgLblCapLast

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388078: fltTcaEqptcapacityPGLabelUsage1qtrPgLblCapLast

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388079: fltTcaEqptcapacityPGLabelUsage1yearPgLblCapLast

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388088: fltTcaEqptcapacityPGLabelUsage5minPgLblCapCum

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388089: fltTcaEqptcapacityPGLabelUsage15minPgLblCapCum

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388090: fltTcaEqptcapacityPGLabelUsage1hPgLblCapCum

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388091: fltTcaEqptcapacityPGLabelUsage1dPgLblCapCum

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388092: fltTcaEqptcapacityPGLabelUsage1wPgLblCapCum

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388093: fltTcaEqptcapacityPGLabelUsage1moPgLblCapCum

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388094: fltTcaEqptcapacityPGLabelUsage1qtrPgLblCapCum

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388095: fltTcaEqptcapacityPGLabelUsage1yearPgLblCapCum

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388096: fltTcaEqptcapacityPGLabelUsage5minPgLblCapPer

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388097: fltTcaEqptcapacityPGLabelUsage15minPgLblCapPer

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388098: fltTcaEqptcapacityPGLabelUsage1hPgLblCapPer

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388099: fltTcaEqptcapacityPGLabelUsage1dPgLblCapPer

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3881: fltHcloudCtxPeerOperCloudCtxPeerOperStateDown

Severity: major

Explanation: This fault occurs when a TGW attachment has not been properly configured by AWS.

Recommended Action: None set.

F388100: fltTcaEqptcapacityPGLabelUsage1wPgLblCapPer

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388101: fltTcaEqptcapacityPGLabelUsage1moPgLblCapPer

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388102: fltTcaEqptcapacityPGLabelUsage1qtrPgLblCapPer

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388103: fltTcaEqptcapacityPGLabelUsage1yearPgLblCapPer

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388104: fltTcaEqptcapacityPGLabelUsage5minPgLblCapMin

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388105: fltTcaEqptcapacityPGLabelUsage15minPgLblCapMin

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388106: fltTcaEqptcapacityPGLabelUsage1hPgLblCapMin

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388107: fltTcaEqptcapacityPGLabelUsage1dPgLblCapMin

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388108: fltTcaEqptcapacityPGLabelUsage1wPgLblCapMin

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388109: fltTcaEqptcapacityPGLabelUsage1moPgLblCapMin

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388110: fltTcaEqptcapacityPGLabelUsage1qtrPgLblCapMin

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388111: fltTcaEqptcapacityPGLabelUsage1yearPgLblCapMin

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388112: fltTcaEqptcapacityPGLabelUsage5minPgLblCapMax

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388113: fltTcaEqptcapacityPGLabelUsage15minPgLblCapMax

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388114: fltTcaEqptcapacityPGLabelUsage1hPgLblCapMax

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388115: fltTcaEqptcapacityPGLabelUsage1dPgLblCapMax

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388116: fltTcaEqptcapacityPGLabelUsage1wPgLblCapMax

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388117: fltTcaEqptcapacityPGLabelUsage1moPgLblCapMax

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388118: fltTcaEqptcapacityPGLabelUsage1qtrPgLblCapMax

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388119: fltTcaEqptcapacityPGLabelUsage1yearPgLblCapMax

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388120: fltTcaEqptcapacityPGLabelUsage5minPgLblCapAvg

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388121: fltTcaEqptcapacityPGLabelUsage15minPgLblCapAvg

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388122: fltTcaEqptcapacityPGLabelUsage1hPgLblCapAvg

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388123: fltTcaEqptcapacityPGLabelUsage1dPgLblCapAvg

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388124: fltTcaEqptcapacityPGLabelUsage1wPgLblCapAvg

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388125: fltTcaEqptcapacityPGLabelUsage1moPgLblCapAvg

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388126: fltTcaEqptcapacityPGLabelUsage1qtrPgLblCapAvg

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388127: fltTcaEqptcapacityPGLabelUsage1yearPgLblCapAvg

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388152: fltTcaEqptcapacityPGLabelUsage5minPgLblCapTr

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388153: fltTcaEqptcapacityPGLabelUsage15minPgLblCapTr

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388154: fltTcaEqptcapacityPGLabelUsage1hPgLblCapTr

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388155: fltTcaEqptcapacityPGLabelUsage1dPgLblCapTr

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388156: fltTcaEqptcapacityPGLabelUsage1wPgLblCapTr

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388157: fltTcaEqptcapacityPGLabelUsage1moPgLblCapTr

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388158: fltTcaEqptcapacityPGLabelUsage1qtrPgLblCapTr

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388159: fltTcaEqptcapacityPGLabelUsage1yearPgLblCapTr

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388160: fltTcaEqptcapacityPGLabelUsage5minPgLblCapRate

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388161: fltTcaEqptcapacityPGLabelUsage15minPgLblCapRate

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388162: fltTcaEqptcapacityPGLabelUsage1hPgLblCapRate

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388163: fltTcaEqptcapacityPGLabelUsage1dPgLblCapRate

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388164: fltTcaEqptcapacityPGLabelUsage1wPgLblCapRate

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388165: fltTcaEqptcapacityPGLabelUsage1moPgLblCapRate

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388166: fltTcaEqptcapacityPGLabelUsage1qtrPgLblCapRate

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388167: fltTcaEqptcapacityPGLabelUsage1yearPgLblCapRate

Severity: variable

Explanation: This fault is caused by "PG label Usage capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3882: fltQosmGlobalIngressMplsRuleOperStFailed

Severity: major

Explanation: This fault occurs when qos manager fails to activate a Global Ingress Mpls rule due to hardware programming failure

Recommended Action: To recover from this fault, try the following actions

1. Look at any configuration issues

2. Verify the configuration is correct/complete

3. Reduce the number of rules and retry

F388240: fltTcaEqptcapacityPGLabelUsage5minPgLblUsageLast

Severity: variable

Explanation: This fault is caused by "PG label Usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388241: fltTcaEqptcapacityPGLabelUsage15minPgLblUsageLast

Severity: variable

Explanation: This fault is caused by "PG label Usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388242: fltTcaEqptcapacityPGLabelUsage1hPgLblUsageLast

Severity: variable

Explanation: This fault is caused by "PG label Usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388243: fltTcaEqptcapacityPGLabelUsage1dPgLblUsageLast

Severity: variable

Explanation: This fault is caused by "PG label Usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388244: fltTcaEqptcapacityPGLabelUsage1wPgLblUsageLast

Severity: variable

Explanation: This fault is caused by "PG label Usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388245: fltTcaEqptcapacityPGLabelUsage1moPgLblUsageLast

Severity: variable

Explanation: This fault is caused by "PG label Usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388246: fltTcaEqptcapacityPGLabelUsage1qtrPgLblUsageLast

Severity: variable

Explanation: This fault is caused by "PG label Usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388247: fltTcaEqptcapacityPGLabelUsage1yearPgLblUsageLast

Severity: variable

Explanation: This fault is caused by "PG label Usage current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388256: fltTcaEqptcapacityPGLabelUsage5minPgLblUsageCum

Severity: variable

Explanation: This fault is caused by "PG label Usage cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388257: fltTcaEqptcapacityPGLabelUsage15minPgLblUsageCum

Severity: variable

Explanation: This fault is caused by "PG label Usage cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388258: fltTcaEqptcapacityPGLabelUsage1hPgLblUsageCum

Severity: variable

Explanation: This fault is caused by "PG label Usage cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388259: fltTcaEqptcapacityPGLabelUsage1dPgLblUsageCum

Severity: variable

Explanation: This fault is caused by "PG label Usage cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388260: fltTcaEqptcapacityPGLabelUsage1wPgLblUsageCum

Severity: variable

Explanation: This fault is caused by "PG label Usage cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388261: fltTcaEqptcapacityPGLabelUsage1moPgLblUsageCum

Severity: variable

Explanation: This fault is caused by "PG label Usage cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388262: fltTcaEqptcapacityPGLabelUsage1qtrPgLblUsageCum

Severity: variable

Explanation: This fault is caused by "PG label Usage cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388263: fltTcaEqptcapacityPGLabelUsage1yearPgLblUsageCum

Severity: variable

Explanation: This fault is caused by "PG label Usage cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388264: fltTcaEqptcapacityPGLabelUsage5minPgLblUsagePer

Severity: variable

Explanation: This fault is caused by "PG label Usage periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388265: fltTcaEqptcapacityPGLabelUsage15minPgLblUsagePer

Severity: variable

Explanation: This fault is caused by "PG label Usage periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388266: fltTcaEqptcapacityPGLabelUsage1hPgLblUsagePer

Severity: variable

Explanation: This fault is caused by "PG label Usage periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388267: fltTcaEqptcapacityPGLabelUsage1dPgLblUsagePer

Severity: variable

Explanation: This fault is caused by "PG label Usage periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388268: fltTcaEqptcapacityPGLabelUsage1wPgLblUsagePer

Severity: variable

Explanation: This fault is caused by "PG label Usage periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388269: fltTcaEqptcapacityPGLabelUsage1moPgLblUsagePer

Severity: variable

Explanation: This fault is caused by "PG label Usage periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388270: fltTcaEqptcapacityPGLabelUsage1qtrPgLblUsagePer

Severity: variable

Explanation: This fault is caused by "PG label Usage periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388271: fltTcaEqptcapacityPGLabelUsage1yearPgLblUsagePer

Severity: variable

Explanation: This fault is caused by "PG label Usage periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388272: fltTcaEqptcapacityPGLabelUsage5minPgLblUsageMin

Severity: variable

Explanation: This fault is caused by "PG label Usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388273: fltTcaEqptcapacityPGLabelUsage15minPgLblUsageMin

Severity: variable

Explanation: This fault is caused by "PG label Usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388274: fltTcaEqptcapacityPGLabelUsage1hPgLblUsageMin

Severity: variable

Explanation: This fault is caused by "PG label Usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388275: fltTcaEqptcapacityPGLabelUsage1dPgLblUsageMin

Severity: variable

Explanation: This fault is caused by "PG label Usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388276: fltTcaEqptcapacityPGLabelUsage1wPgLblUsageMin

Severity: variable

Explanation: This fault is caused by "PG label Usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388277: fltTcaEqptcapacityPGLabelUsage1moPgLblUsageMin

Severity: variable

Explanation: This fault is caused by "PG label Usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388278: fltTcaEqptcapacityPGLabelUsage1qtrPgLblUsageMin

Severity: variable

Explanation: This fault is caused by "PG label Usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388279: fltTcaEqptcapacityPGLabelUsage1yearPgLblUsageMin

Severity: variable

Explanation: This fault is caused by "PG label Usage minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388280: fltTcaEqptcapacityPGLabelUsage5minPgLblUsageMax

Severity: variable

Explanation: This fault is caused by "PG label Usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388281: fltTcaEqptcapacityPGLabelUsage15minPgLblUsageMax

Severity: variable

Explanation: This fault is caused by "PG label Usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388282: fltTcaEqptcapacityPGLabelUsage1hPgLblUsageMax

Severity: variable

Explanation: This fault is caused by "PG label Usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388283: fltTcaEqptcapacityPGLabelUsage1dPgLblUsageMax

Severity: variable

Explanation: This fault is caused by "PG label Usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388284: fltTcaEqptcapacityPGLabelUsage1wPgLblUsageMax

Severity: variable

Explanation: This fault is caused by "PG label Usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388285: fltTcaEqptcapacityPGLabelUsage1moPgLblUsageMax

Severity: variable

Explanation: This fault is caused by "PG label Usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388286: fltTcaEqptcapacityPGLabelUsage1qtrPgLblUsageMax

Severity: variable

Explanation: This fault is caused by "PG label Usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388287: fltTcaEqptcapacityPGLabelUsage1yearPgLblUsageMax

Severity: variable

Explanation: This fault is caused by "PG label Usage maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388288: fltTcaEqptcapacityPGLabelUsage5minPgLblUsageAvg

Severity: variable

Explanation: This fault is caused by "PG label Usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388289: fltTcaEqptcapacityPGLabelUsage15minPgLblUsageAvg

Severity: variable

Explanation: This fault is caused by "PG label Usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388290: fltTcaEqptcapacityPGLabelUsage1hPgLblUsageAvg

Severity: variable

Explanation: This fault is caused by "PG label Usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388291: fltTcaEqptcapacityPGLabelUsage1dPgLblUsageAvg

Severity: variable

Explanation: This fault is caused by "PG label Usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388292: fltTcaEqptcapacityPGLabelUsage1wPgLblUsageAvg

Severity: variable

Explanation: This fault is caused by "PG label Usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388293: fltTcaEqptcapacityPGLabelUsage1moPgLblUsageAvg

Severity: variable

Explanation: This fault is caused by "PG label Usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388294: fltTcaEqptcapacityPGLabelUsage1qtrPgLblUsageAvg

Severity: variable

Explanation: This fault is caused by "PG label Usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388295: fltTcaEqptcapacityPGLabelUsage1yearPgLblUsageAvg

Severity: variable

Explanation: This fault is caused by "PG label Usage average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3883: fltQosmGlobalEgressMplsRuleOperStFailed

Severity: major

Explanation: This fault occurs when qos manager fails to activate a Global Egress Mpls rule due to hardware programming failure

Recommended Action: To recover from this fault, try the following actions

1. Look at any configuration issues

2. Verify the configuration is correct/complete

3. Reduce the number of rules and retry

F388320: fltTcaEqptcapacityPGLabelUsage5minPgLblUsageTr

Severity: variable

Explanation: This fault is caused by "PG label Usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388321: fltTcaEqptcapacityPGLabelUsage15minPgLblUsageTr

Severity: variable

Explanation: This fault is caused by "PG label Usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388322: fltTcaEqptcapacityPGLabelUsage1hPgLblUsageTr

Severity: variable

Explanation: This fault is caused by "PG label Usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388323: fltTcaEqptcapacityPGLabelUsage1dPgLblUsageTr

Severity: variable

Explanation: This fault is caused by "PG label Usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388324: fltTcaEqptcapacityPGLabelUsage1wPgLblUsageTr

Severity: variable

Explanation: This fault is caused by "PG label Usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388325: fltTcaEqptcapacityPGLabelUsage1moPgLblUsageTr

Severity: variable

Explanation: This fault is caused by "PG label Usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388326: fltTcaEqptcapacityPGLabelUsage1qtrPgLblUsageTr

Severity: variable

Explanation: This fault is caused by "PG label Usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388327: fltTcaEqptcapacityPGLabelUsage1yearPgLblUsageTr

Severity: variable

Explanation: This fault is caused by "PG label Usage trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388328: fltTcaEqptcapacityPGLabelUsage5minPgLblUsageRate

Severity: variable

Explanation: This fault is caused by "PG label Usage rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388329: fltTcaEqptcapacityPGLabelUsage15minPgLblUsageRate

Severity: variable

Explanation: This fault is caused by "PG label Usage rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388330: fltTcaEqptcapacityPGLabelUsage1hPgLblUsageRate

Severity: variable

Explanation: This fault is caused by "PG label Usage rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388331: fltTcaEqptcapacityPGLabelUsage1dPgLblUsageRate

Severity: variable

Explanation: This fault is caused by "PG label Usage rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388332: fltTcaEqptcapacityPGLabelUsage1wPgLblUsageRate

Severity: variable

Explanation: This fault is caused by "PG label Usage rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388333: fltTcaEqptcapacityPGLabelUsage1moPgLblUsageRate

Severity: variable

Explanation: This fault is caused by "PG label Usage rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388334: fltTcaEqptcapacityPGLabelUsage1qtrPgLblUsageRate

Severity: variable

Explanation: This fault is caused by "PG label Usage rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F388335: fltTcaEqptcapacityPGLabelUsage1yearPgLblUsageRate

Severity: variable

Explanation: This fault is caused by "PG label Usage rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PG label Usage" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3884: fltQosmGlobalIngressMplsRuleUnsupportedHw

Severity: minor

Explanation: This fault occurs when Ingress Mpls rules are pushed to unsupported hardware

Recommended Action: To recover from this fault, try the following actions

1. Look at any configuration issues

2. Verify the configuration is correct/complete

3. Reduce the number of rules and retry

F3885: fltQosmGlobalEgressMplsRuleUnsupportedHw

Severity: minor

Explanation: This fault occurs when Egress Mpls rules are pushed to unsupported hardware

Recommended Action: To recover from this fault, try the following actions

1. Look at any configuration issues

2. Verify the configuration is correct/complete

3. Reduce the number of rules and retry

F3887: fltDbgexpRsTSOnDSchedulerResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3888: fltHcloudSelectedEPOperCloudSelectedEndpointError

Severity: major

Explanation: This fault occurs when tagging operation to assign the endpoint to the target cloudEPg fails.

Recommended Action: If you see this fault, take the following actions:

1. Please check that the endpoint still exists in the cloud provider.

2. Please check that the endpoint has reached the maximum number of allowed tags.

3. Please check through Visore that the inventory object used to specify the endpoint is actually present in CAPIC.

4. If fault still has not cleared, please contact Cisco TAC.

F3891: fltLeakInternalSubnetConfigurationFailed

Severity: minor

Explanation: This fault occurs when an Inter-VRF Leaked BD Subnet or in CAPIC, cloudSubnet or cloudCidr is not correctly configred

Recommended Action: If you see this fault, take the following actions:

1. Look at the configuration for issues

2. Verify the leakInternalSubnet configuration is correct and complete

3. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F3895: fltHcloudInterHubCtxPeerOperCloudInterHubCtxPeerOperStateDown

Severity: minor

Explanation: This fault occurs when a transit gateway peering is not up.

Recommended Action: None set.

F3897: fltOpflexpAgentODevFaultInfoMajorOperationalIssues

Severity: major

Explanation: This fault is raised when there is an operational issue with respect to the Opflex device

Recommended Action: If you see this fault, take the following actions:

1. From the fault description resolve the issue on the opflex device

2. If the above actions did not resolve the issue, collect avs-tech-support file and contact Cisco TAC.

F3898: fltOpflexpAgentODevFaultInfoMinorOperationalIssues

Severity: minor

Explanation: This fault is raised when there is an operational issue with respect to the Opflex device

Recommended Action: If you see this fault, take the following actions:

1. From the fault description resolve the issue on the opflex device

2. If the above actions did not resolve the issue, collect avs-tech-support file and contact Cisco TAC.

F3899: fltOpflexpAgentODevFaultInfoCriticalOperationalIssues

Severity: critical

Explanation: This fault is raised when there is an operational issue with respect to the Opflex device

Recommended Action: If you see this fault, take the following actions:

1. From the fault description resolve the issue on the opflex device

2. If the above actions did not resolve the issue, collect avs-tech-support file and contact Cisco TAC.

F3900: fltOpflexpAgentIDEpFaultInfoMajorOperationalIssues

Severity: major

Explanation: This fault is raised when there is an operational issue with respect to the Opflex device

Recommended Action: If you see this fault, take the following actions:

1. From the fault description resolve the issue on the opflex device

2. If the above actions did not resolve the issue, collect avs-tech-support file and contact Cisco TAC.

F3901: fltOpflexpAgentIDEpFaultInfoMinorOperationalIssues

Severity: minor

Explanation: This fault is raised when there is an operational issue with respect to the Opflex device

Recommended Action: If you see this fault, take the following actions:

1. From the fault description resolve the issue on the opflex device

2. If the above actions did not resolve the issue, collect avs-tech-support file and contact Cisco TAC.

F3902: fltOpflexpAgentIDEpFaultInfoCriticalOperationalIssues

Severity: critical

Explanation: This fault is raised when there is an operational issue with respect to the Opflex device

Recommended Action: If you see this fault, take the following actions:

1. From the fault description resolve the issue on the opflex device

2. If the above actions did not resolve the issue, collect avs-tech-support file and contact Cisco TAC.

F3905: fltVpcDomSelfIniFabLinksMaxFlapsExceeded

Severity: critical

Explanation: This fault occurs when fabric links on the node have been flapped more than a certain limited number of times by VPC manager.

Recommended Action: Please make sure that L3 connectivity to this node is stable.

F3906: fltInfraWiNodePeerNodeUnavailable

Severity: critical

Explanation: This fault occurs when a controller reports another controller is not available.

Recommended Action: If you see this fault, take the following actions:

1. Check cluster connectivity. All controllers need to be listed and reported as available.

2. Ensure that the cluster configuration is stable. Make note of any frequent and brief interruptions of cluster availability or prolonged unavailability.

3. If any controllers are missing from the cluster, check if those controllers are accessible via other means like ssh.

4. Check for other faults related to cluster health and availability by looking at System->Faults Count By Domain->infra

5. Check that all services are up and running on all controllers. You can look for faults with code F1419.

6. Check for any process crashes and cores.

7. If the above actions did not resolve the issue, create a tech-support file and contact Cisco TAC.

F3907: fltHcloudRsTgToEndPointOperRsTgToEndPointOperStateDown

Severity: minor

Explanation: This fault occurs when an endpoint is not added to load balancer's targetgroup

Recommended Action: If you see this fault, take the following actions:

1. Please check the fault message and make necessary changes to the endpoint.

2. If fault still has not cleared, please contact Cisco TAC.

F3908: fltSvcredirRsDestAttConfigStFailed

Severity: major

Explanation: This fault occurs when a PBR service destination is used in multiple BD

Recommended Action: To recover from this fault, try the following actions

1. Use the destination in a single BD only

2. To recover, delete the particular destination from all PBR policies where its used, then add the destination to the correct PBR policy

F3909: fltSvcredirRsBackupDestAttConfigStFailed

Severity: major

Explanation: This fault occurs when a PBR backup service destination is used in multiple BD

Recommended Action: To recover from this fault, try the following actions

1. Use the destination in a single BD only

2. To recover, delete the particular destination from all PBR policies where its used, then add the destination to the correct PBR policy

F3914: fltHcloudRsCtxPeerToRouteTableResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3915: fltFvRsCtxToRtctrlProfileResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3916: fltBgpInfraPeerPInvalidConfigInfraBgpPeerP

Severity: critical

Explanation: This fault occurs when router id is not used as loopback and explict loopback interface is not configured for a node and bgp peer configured under logical node profile of infra L3Outs.

Recommended Action: If you see this fault, take the following actions:

1. Add loopback interface under node.

2. If the above actions did not resolve the issue, collect a tech-support file and contact Cisco TAC.

F3918: fltHcloudRouteTableEntryOperCloudRouteTableEntryOperStateDown

Severity: major

Explanation: This fault occurs when a Route Table Entry has not been properly configured by AWS.

Recommended Action: None set.

F3919: fltHinventoryRsSubnetToCtxCidrResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3920: fltDatetimeClkPolNtp-server-notstart-fault

Severity: minor

Explanation: This fault occurs when a ntp configuration on a controller has problems

Recommended Action: If you see this fault, take the following actions:

1. Verify that the ntp peers are correctly configured and are reachable.

2. Verify that the ntp peers have the correct keys.

3. Configure multiple NTP servers for to guarantee availability of a valid NTP Server for synchronization.

4. If NTP Servers are configured with a DNS Name and not an IP Address, Verify if it's a valid domain name and verify if the policy with DNS providers are configured.

5. If there is a firewall in-between the ACI Fabric and NTP Servers, make sure that the firewall allows NTP traffic.

6. Verify whether NTP daemon is running in all or some of the NTP servers.

7. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F3921: fltVnsRsLIfDomPResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3925: fltHcloudRsHubCtxToVNetResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F392544: fltTcaLacpPduStats5minFlapsLast

Severity: variable

Explanation: This fault is caused by "Number of flaps current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392545: fltTcaLacpPduStats15minFlapsLast

Severity: variable

Explanation: This fault is caused by "Number of flaps current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392546: fltTcaLacpPduStats1hFlapsLast

Severity: variable

Explanation: This fault is caused by "Number of flaps current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392547: fltTcaLacpPduStats1dFlapsLast

Severity: variable

Explanation: This fault is caused by "Number of flaps current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392548: fltTcaLacpPduStats1wFlapsLast

Severity: variable

Explanation: This fault is caused by "Number of flaps current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392549: fltTcaLacpPduStats1moFlapsLast

Severity: variable

Explanation: This fault is caused by "Number of flaps current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392550: fltTcaLacpPduStats1qtrFlapsLast

Severity: variable

Explanation: This fault is caused by "Number of flaps current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392551: fltTcaLacpPduStats1yearFlapsLast

Severity: variable

Explanation: This fault is caused by "Number of flaps current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392560: fltTcaLacpPduStats5minFlapsCum

Severity: variable

Explanation: This fault is caused by "Number of flaps cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392561: fltTcaLacpPduStats15minFlapsCum

Severity: variable

Explanation: This fault is caused by "Number of flaps cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392562: fltTcaLacpPduStats1hFlapsCum

Severity: variable

Explanation: This fault is caused by "Number of flaps cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392563: fltTcaLacpPduStats1dFlapsCum

Severity: variable

Explanation: This fault is caused by "Number of flaps cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392564: fltTcaLacpPduStats1wFlapsCum

Severity: variable

Explanation: This fault is caused by "Number of flaps cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392565: fltTcaLacpPduStats1moFlapsCum

Severity: variable

Explanation: This fault is caused by "Number of flaps cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392566: fltTcaLacpPduStats1qtrFlapsCum

Severity: variable

Explanation: This fault is caused by "Number of flaps cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392567: fltTcaLacpPduStats1yearFlapsCum

Severity: variable

Explanation: This fault is caused by "Number of flaps cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392568: fltTcaLacpPduStats5minFlapsPer

Severity: variable

Explanation: This fault is caused by "Number of flaps periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392569: fltTcaLacpPduStats15minFlapsPer

Severity: variable

Explanation: This fault is caused by "Number of flaps periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392570: fltTcaLacpPduStats1hFlapsPer

Severity: variable

Explanation: This fault is caused by "Number of flaps periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392571: fltTcaLacpPduStats1dFlapsPer

Severity: variable

Explanation: This fault is caused by "Number of flaps periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392572: fltTcaLacpPduStats1wFlapsPer

Severity: variable

Explanation: This fault is caused by "Number of flaps periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392573: fltTcaLacpPduStats1moFlapsPer

Severity: variable

Explanation: This fault is caused by "Number of flaps periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392574: fltTcaLacpPduStats1qtrFlapsPer

Severity: variable

Explanation: This fault is caused by "Number of flaps periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392575: fltTcaLacpPduStats1yearFlapsPer

Severity: variable

Explanation: This fault is caused by "Number of flaps periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392576: fltTcaLacpPduStats5minFlapsMin

Severity: variable

Explanation: This fault is caused by "Number of flaps minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392577: fltTcaLacpPduStats15minFlapsMin

Severity: variable

Explanation: This fault is caused by "Number of flaps minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392578: fltTcaLacpPduStats1hFlapsMin

Severity: variable

Explanation: This fault is caused by "Number of flaps minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392579: fltTcaLacpPduStats1dFlapsMin

Severity: variable

Explanation: This fault is caused by "Number of flaps minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392580: fltTcaLacpPduStats1wFlapsMin

Severity: variable

Explanation: This fault is caused by "Number of flaps minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392581: fltTcaLacpPduStats1moFlapsMin

Severity: variable

Explanation: This fault is caused by "Number of flaps minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392582: fltTcaLacpPduStats1qtrFlapsMin

Severity: variable

Explanation: This fault is caused by "Number of flaps minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392583: fltTcaLacpPduStats1yearFlapsMin

Severity: variable

Explanation: This fault is caused by "Number of flaps minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392584: fltTcaLacpPduStats5minFlapsMax

Severity: variable

Explanation: This fault is caused by "Number of flaps maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392585: fltTcaLacpPduStats15minFlapsMax

Severity: variable

Explanation: This fault is caused by "Number of flaps maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392586: fltTcaLacpPduStats1hFlapsMax

Severity: variable

Explanation: This fault is caused by "Number of flaps maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392587: fltTcaLacpPduStats1dFlapsMax

Severity: variable

Explanation: This fault is caused by "Number of flaps maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392588: fltTcaLacpPduStats1wFlapsMax

Severity: variable

Explanation: This fault is caused by "Number of flaps maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392589: fltTcaLacpPduStats1moFlapsMax

Severity: variable

Explanation: This fault is caused by "Number of flaps maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392590: fltTcaLacpPduStats1qtrFlapsMax

Severity: variable

Explanation: This fault is caused by "Number of flaps maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392591: fltTcaLacpPduStats1yearFlapsMax

Severity: variable

Explanation: This fault is caused by "Number of flaps maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392592: fltTcaLacpPduStats5minFlapsAvg

Severity: variable

Explanation: This fault is caused by "Number of flaps average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392593: fltTcaLacpPduStats15minFlapsAvg

Severity: variable

Explanation: This fault is caused by "Number of flaps average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392594: fltTcaLacpPduStats1hFlapsAvg

Severity: variable

Explanation: This fault is caused by "Number of flaps average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392595: fltTcaLacpPduStats1dFlapsAvg

Severity: variable

Explanation: This fault is caused by "Number of flaps average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392596: fltTcaLacpPduStats1wFlapsAvg

Severity: variable

Explanation: This fault is caused by "Number of flaps average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392597: fltTcaLacpPduStats1moFlapsAvg

Severity: variable

Explanation: This fault is caused by "Number of flaps average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392598: fltTcaLacpPduStats1qtrFlapsAvg

Severity: variable

Explanation: This fault is caused by "Number of flaps average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392599: fltTcaLacpPduStats1yearFlapsAvg

Severity: variable

Explanation: This fault is caused by "Number of flaps average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392624: fltTcaLacpPduStats5minFlapsTr

Severity: variable

Explanation: This fault is caused by "Number of flaps trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392625: fltTcaLacpPduStats15minFlapsTr

Severity: variable

Explanation: This fault is caused by "Number of flaps trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392626: fltTcaLacpPduStats1hFlapsTr

Severity: variable

Explanation: This fault is caused by "Number of flaps trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392627: fltTcaLacpPduStats1dFlapsTr

Severity: variable

Explanation: This fault is caused by "Number of flaps trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392628: fltTcaLacpPduStats1wFlapsTr

Severity: variable

Explanation: This fault is caused by "Number of flaps trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392629: fltTcaLacpPduStats1moFlapsTr

Severity: variable

Explanation: This fault is caused by "Number of flaps trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392630: fltTcaLacpPduStats1qtrFlapsTr

Severity: variable

Explanation: This fault is caused by "Number of flaps trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392631: fltTcaLacpPduStats1yearFlapsTr

Severity: variable

Explanation: This fault is caused by "Number of flaps trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392632: fltTcaLacpPduStats5minFlapsRate

Severity: variable

Explanation: This fault is caused by "Number of flaps rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392633: fltTcaLacpPduStats15minFlapsRate

Severity: variable

Explanation: This fault is caused by "Number of flaps rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392634: fltTcaLacpPduStats1hFlapsRate

Severity: variable

Explanation: This fault is caused by "Number of flaps rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392635: fltTcaLacpPduStats1dFlapsRate

Severity: variable

Explanation: This fault is caused by "Number of flaps rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392636: fltTcaLacpPduStats1wFlapsRate

Severity: variable

Explanation: This fault is caused by "Number of flaps rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392637: fltTcaLacpPduStats1moFlapsRate

Severity: variable

Explanation: This fault is caused by "Number of flaps rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392638: fltTcaLacpPduStats1qtrFlapsRate

Severity: variable

Explanation: This fault is caused by "Number of flaps rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392639: fltTcaLacpPduStats1yearFlapsRate

Severity: variable

Explanation: This fault is caused by "Number of flaps rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3927: fltDatetimeNtpProviderStatusNtp-Duplicate-Ip-Fault

Severity: warning

Explanation: This fault occurs when there is duplicate NTP IP server

Recommended Action: If you see this fault, take the following actions:

1. Verify that the ntp peers are correctly configured and are reachable.

2. Verify that the ntp peers have the correct keys.

3. Configure multiple NTP servers for to guarantee availability of a valid NTP Server for synchronization.

4. If NTP Servers are configured with a DNS Name and not an IP Address, Verify if it's a valid domain name and verify if the policy with DNS providers are configured.

5. If there is a firewall in-between the ACI Fabric and NTP Servers, make sure that the firewall allows NTP traffic.

6. Delete the Duplicate IP from the system.

7. Verify whether NTP daemon is running in all or some of the NTP servers.

8. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F392712: fltTcaLacpPduStats5minPduRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392713: fltTcaLacpPduStats15minPduRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392714: fltTcaLacpPduStats1hPduRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392715: fltTcaLacpPduStats1dPduRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392716: fltTcaLacpPduStats1wPduRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392717: fltTcaLacpPduStats1moPduRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392718: fltTcaLacpPduStats1qtrPduRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392719: fltTcaLacpPduStats1yearPduRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392728: fltTcaLacpPduStats5minPduRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392729: fltTcaLacpPduStats15minPduRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392730: fltTcaLacpPduStats1hPduRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392731: fltTcaLacpPduStats1dPduRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392732: fltTcaLacpPduStats1wPduRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392733: fltTcaLacpPduStats1moPduRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392734: fltTcaLacpPduStats1qtrPduRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392735: fltTcaLacpPduStats1yearPduRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392736: fltTcaLacpPduStats5minPduRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392737: fltTcaLacpPduStats15minPduRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392738: fltTcaLacpPduStats1hPduRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392739: fltTcaLacpPduStats1dPduRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392740: fltTcaLacpPduStats1wPduRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392741: fltTcaLacpPduStats1moPduRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392742: fltTcaLacpPduStats1qtrPduRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392743: fltTcaLacpPduStats1yearPduRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392744: fltTcaLacpPduStats5minPduRcvdMin

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392745: fltTcaLacpPduStats15minPduRcvdMin

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392746: fltTcaLacpPduStats1hPduRcvdMin

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392747: fltTcaLacpPduStats1dPduRcvdMin

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392748: fltTcaLacpPduStats1wPduRcvdMin

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392749: fltTcaLacpPduStats1moPduRcvdMin

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392750: fltTcaLacpPduStats1qtrPduRcvdMin

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392751: fltTcaLacpPduStats1yearPduRcvdMin

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392752: fltTcaLacpPduStats5minPduRcvdMax

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392753: fltTcaLacpPduStats15minPduRcvdMax

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392754: fltTcaLacpPduStats1hPduRcvdMax

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392755: fltTcaLacpPduStats1dPduRcvdMax

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392756: fltTcaLacpPduStats1wPduRcvdMax

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392757: fltTcaLacpPduStats1moPduRcvdMax

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392758: fltTcaLacpPduStats1qtrPduRcvdMax

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392759: fltTcaLacpPduStats1yearPduRcvdMax

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392760: fltTcaLacpPduStats5minPduRcvdAvg

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392761: fltTcaLacpPduStats15minPduRcvdAvg

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392762: fltTcaLacpPduStats1hPduRcvdAvg

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392763: fltTcaLacpPduStats1dPduRcvdAvg

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392764: fltTcaLacpPduStats1wPduRcvdAvg

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392765: fltTcaLacpPduStats1moPduRcvdAvg

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392766: fltTcaLacpPduStats1qtrPduRcvdAvg

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392767: fltTcaLacpPduStats1yearPduRcvdAvg

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392792: fltTcaLacpPduStats5minPduRcvdTr

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392793: fltTcaLacpPduStats15minPduRcvdTr

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392794: fltTcaLacpPduStats1hPduRcvdTr

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392795: fltTcaLacpPduStats1dPduRcvdTr

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392796: fltTcaLacpPduStats1wPduRcvdTr

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392797: fltTcaLacpPduStats1moPduRcvdTr

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392798: fltTcaLacpPduStats1qtrPduRcvdTr

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392799: fltTcaLacpPduStats1yearPduRcvdTr

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3928: fltDatetimeNtpProviderStatusNtp-DNS-Resolution-fault

Severity: warning

Explanation: This fault occurs when DNS resolution fails

Recommended Action: If you see this fault, take the following actions:

1. Verify that the ntp peers are correctly configured and are reachable.

2. Verify that the ntp peers have the correct keys.

3. Verify that the DNS IP is configured to correct IP.

4. If NTP Servers are configured with a DNS Name and not an IP Address, Verify if it's a valid domain name and verify if the policy with DNS providers are configured.

5. If there is a firewall in-between the ACI Fabric and NTP Servers, make sure that the firewall allows NTP traffic.

6. Verify whether NTP daemon is running in all or some of the NTP servers.

7. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F392800: fltTcaLacpPduStats5minPduRcvdRate

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392801: fltTcaLacpPduStats15minPduRcvdRate

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392802: fltTcaLacpPduStats1hPduRcvdRate

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392803: fltTcaLacpPduStats1dPduRcvdRate

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392804: fltTcaLacpPduStats1wPduRcvdRate

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392805: fltTcaLacpPduStats1moPduRcvdRate

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392806: fltTcaLacpPduStats1qtrPduRcvdRate

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392807: fltTcaLacpPduStats1yearPduRcvdRate

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392880: fltTcaLacpPduStats5minPduRcvdRateLast

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392881: fltTcaLacpPduStats15minPduRcvdRateLast

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392882: fltTcaLacpPduStats1hPduRcvdRateLast

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392883: fltTcaLacpPduStats1dPduRcvdRateLast

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392884: fltTcaLacpPduStats1wPduRcvdRateLast

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392885: fltTcaLacpPduStats1moPduRcvdRateLast

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392886: fltTcaLacpPduStats1qtrPduRcvdRateLast

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392887: fltTcaLacpPduStats1yearPduRcvdRateLast

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392888: fltTcaLacpPduStats5minPduRcvdRateMin

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392889: fltTcaLacpPduStats15minPduRcvdRateMin

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392890: fltTcaLacpPduStats1hPduRcvdRateMin

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392891: fltTcaLacpPduStats1dPduRcvdRateMin

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392892: fltTcaLacpPduStats1wPduRcvdRateMin

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392893: fltTcaLacpPduStats1moPduRcvdRateMin

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392894: fltTcaLacpPduStats1qtrPduRcvdRateMin

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392895: fltTcaLacpPduStats1yearPduRcvdRateMin

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392896: fltTcaLacpPduStats5minPduRcvdRateMax

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392897: fltTcaLacpPduStats15minPduRcvdRateMax

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392898: fltTcaLacpPduStats1hPduRcvdRateMax

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392899: fltTcaLacpPduStats1dPduRcvdRateMax

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3929: fltHcloudRsHubCtxToNwIntfResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F392900: fltTcaLacpPduStats1wPduRcvdRateMax

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392901: fltTcaLacpPduStats1moPduRcvdRateMax

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392902: fltTcaLacpPduStats1qtrPduRcvdRateMax

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392903: fltTcaLacpPduStats1yearPduRcvdRateMax

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392904: fltTcaLacpPduStats5minPduRcvdRateAvg

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392905: fltTcaLacpPduStats15minPduRcvdRateAvg

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392906: fltTcaLacpPduStats1hPduRcvdRateAvg

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392907: fltTcaLacpPduStats1dPduRcvdRateAvg

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392908: fltTcaLacpPduStats1wPduRcvdRateAvg

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392909: fltTcaLacpPduStats1moPduRcvdRateAvg

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392910: fltTcaLacpPduStats1qtrPduRcvdRateAvg

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392911: fltTcaLacpPduStats1yearPduRcvdRateAvg

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392944: fltTcaLacpPduStats5minPduRcvdRateTr

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392945: fltTcaLacpPduStats15minPduRcvdRateTr

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392946: fltTcaLacpPduStats1hPduRcvdRateTr

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392947: fltTcaLacpPduStats1dPduRcvdRateTr

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392948: fltTcaLacpPduStats1wPduRcvdRateTr

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392949: fltTcaLacpPduStats1moPduRcvdRateTr

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392950: fltTcaLacpPduStats1qtrPduRcvdRateTr

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F392951: fltTcaLacpPduStats1yearPduRcvdRateTr

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3930: fltHcloudFlowLogOperFlowLogDeliverFailure

Severity: minor

Explanation: This fault occurs when a log flow is having issues delivering logs to its destination.

Recommended Action: If you see this fault, take the following actions:

1. Verify log destination present.

2. Check the access policy attached to the IAM role has proper permissions.

3. If the above action did not resolve the issue, contact Cisco TAC.

F393000: fltTcaLacpPduStats5minPduSentLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393001: fltTcaLacpPduStats15minPduSentLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393002: fltTcaLacpPduStats1hPduSentLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393003: fltTcaLacpPduStats1dPduSentLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393004: fltTcaLacpPduStats1wPduSentLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393005: fltTcaLacpPduStats1moPduSentLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393006: fltTcaLacpPduStats1qtrPduSentLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393007: fltTcaLacpPduStats1yearPduSentLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393016: fltTcaLacpPduStats5minPduSentCum

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393017: fltTcaLacpPduStats15minPduSentCum

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393018: fltTcaLacpPduStats1hPduSentCum

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393019: fltTcaLacpPduStats1dPduSentCum

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393020: fltTcaLacpPduStats1wPduSentCum

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393021: fltTcaLacpPduStats1moPduSentCum

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393022: fltTcaLacpPduStats1qtrPduSentCum

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393023: fltTcaLacpPduStats1yearPduSentCum

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393024: fltTcaLacpPduStats5minPduSentPer

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393025: fltTcaLacpPduStats15minPduSentPer

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393026: fltTcaLacpPduStats1hPduSentPer

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393027: fltTcaLacpPduStats1dPduSentPer

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393028: fltTcaLacpPduStats1wPduSentPer

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393029: fltTcaLacpPduStats1moPduSentPer

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393030: fltTcaLacpPduStats1qtrPduSentPer

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393031: fltTcaLacpPduStats1yearPduSentPer

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393032: fltTcaLacpPduStats5minPduSentMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393033: fltTcaLacpPduStats15minPduSentMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393034: fltTcaLacpPduStats1hPduSentMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393035: fltTcaLacpPduStats1dPduSentMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393036: fltTcaLacpPduStats1wPduSentMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393037: fltTcaLacpPduStats1moPduSentMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393038: fltTcaLacpPduStats1qtrPduSentMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393039: fltTcaLacpPduStats1yearPduSentMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393040: fltTcaLacpPduStats5minPduSentMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393041: fltTcaLacpPduStats15minPduSentMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393042: fltTcaLacpPduStats1hPduSentMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393043: fltTcaLacpPduStats1dPduSentMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393044: fltTcaLacpPduStats1wPduSentMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393045: fltTcaLacpPduStats1moPduSentMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393046: fltTcaLacpPduStats1qtrPduSentMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393047: fltTcaLacpPduStats1yearPduSentMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393048: fltTcaLacpPduStats5minPduSentAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393049: fltTcaLacpPduStats15minPduSentAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393050: fltTcaLacpPduStats1hPduSentAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393051: fltTcaLacpPduStats1dPduSentAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393052: fltTcaLacpPduStats1wPduSentAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393053: fltTcaLacpPduStats1moPduSentAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393054: fltTcaLacpPduStats1qtrPduSentAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393055: fltTcaLacpPduStats1yearPduSentAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393080: fltTcaLacpPduStats5minPduSentTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393081: fltTcaLacpPduStats15minPduSentTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393082: fltTcaLacpPduStats1hPduSentTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393083: fltTcaLacpPduStats1dPduSentTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393084: fltTcaLacpPduStats1wPduSentTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393085: fltTcaLacpPduStats1moPduSentTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393086: fltTcaLacpPduStats1qtrPduSentTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393087: fltTcaLacpPduStats1yearPduSentTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393088: fltTcaLacpPduStats5minPduSentRate

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393089: fltTcaLacpPduStats15minPduSentRate

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393090: fltTcaLacpPduStats1hPduSentRate

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393091: fltTcaLacpPduStats1dPduSentRate

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393092: fltTcaLacpPduStats1wPduSentRate

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393093: fltTcaLacpPduStats1moPduSentRate

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393094: fltTcaLacpPduStats1qtrPduSentRate

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393095: fltTcaLacpPduStats1yearPduSentRate

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3931: fltEthpmIfUnsupportedMplsPlatform

Severity: major

Explanation: This fault occurs when a port is operationally down because mpls is enabled on the port on an unsupported platform

Recommended Action: To recover from this fault, delete mpls config on the port.

F393168: fltTcaLacpPduStats5minPduSentRateLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393169: fltTcaLacpPduStats15minPduSentRateLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393170: fltTcaLacpPduStats1hPduSentRateLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393171: fltTcaLacpPduStats1dPduSentRateLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393172: fltTcaLacpPduStats1wPduSentRateLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393173: fltTcaLacpPduStats1moPduSentRateLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393174: fltTcaLacpPduStats1qtrPduSentRateLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393175: fltTcaLacpPduStats1yearPduSentRateLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393176: fltTcaLacpPduStats5minPduSentRateMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393177: fltTcaLacpPduStats15minPduSentRateMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393178: fltTcaLacpPduStats1hPduSentRateMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393179: fltTcaLacpPduStats1dPduSentRateMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393180: fltTcaLacpPduStats1wPduSentRateMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393181: fltTcaLacpPduStats1moPduSentRateMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393182: fltTcaLacpPduStats1qtrPduSentRateMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393183: fltTcaLacpPduStats1yearPduSentRateMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393184: fltTcaLacpPduStats5minPduSentRateMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393185: fltTcaLacpPduStats15minPduSentRateMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393186: fltTcaLacpPduStats1hPduSentRateMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393187: fltTcaLacpPduStats1dPduSentRateMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393188: fltTcaLacpPduStats1wPduSentRateMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393189: fltTcaLacpPduStats1moPduSentRateMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393190: fltTcaLacpPduStats1qtrPduSentRateMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393191: fltTcaLacpPduStats1yearPduSentRateMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393192: fltTcaLacpPduStats5minPduSentRateAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393193: fltTcaLacpPduStats15minPduSentRateAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393194: fltTcaLacpPduStats1hPduSentRateAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393195: fltTcaLacpPduStats1dPduSentRateAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393196: fltTcaLacpPduStats1wPduSentRateAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393197: fltTcaLacpPduStats1moPduSentRateAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393198: fltTcaLacpPduStats1qtrPduSentRateAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393199: fltTcaLacpPduStats1yearPduSentRateAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393232: fltTcaLacpPduStats5minPduSentRateTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393233: fltTcaLacpPduStats15minPduSentRateTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393234: fltTcaLacpPduStats1hPduSentRateTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393235: fltTcaLacpPduStats1dPduSentRateTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393236: fltTcaLacpPduStats1wPduSentRateTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393237: fltTcaLacpPduStats1moPduSentRateTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393238: fltTcaLacpPduStats1qtrPduSentRateTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393239: fltTcaLacpPduStats1yearPduSentRateTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393288: fltTcaLldpPduStats5minFlapsLast

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393289: fltTcaLldpPduStats15minFlapsLast

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393290: fltTcaLldpPduStats1hFlapsLast

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393291: fltTcaLldpPduStats1dFlapsLast

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393292: fltTcaLldpPduStats1wFlapsLast

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393293: fltTcaLldpPduStats1moFlapsLast

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393294: fltTcaLldpPduStats1qtrFlapsLast

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393295: fltTcaLldpPduStats1yearFlapsLast

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393304: fltTcaLldpPduStats5minFlapsCum

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393305: fltTcaLldpPduStats15minFlapsCum

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393306: fltTcaLldpPduStats1hFlapsCum

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393307: fltTcaLldpPduStats1dFlapsCum

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393308: fltTcaLldpPduStats1wFlapsCum

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393309: fltTcaLldpPduStats1moFlapsCum

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393310: fltTcaLldpPduStats1qtrFlapsCum

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393311: fltTcaLldpPduStats1yearFlapsCum

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393312: fltTcaLldpPduStats5minFlapsPer

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393313: fltTcaLldpPduStats15minFlapsPer

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393314: fltTcaLldpPduStats1hFlapsPer

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393315: fltTcaLldpPduStats1dFlapsPer

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393316: fltTcaLldpPduStats1wFlapsPer

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393317: fltTcaLldpPduStats1moFlapsPer

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393318: fltTcaLldpPduStats1qtrFlapsPer

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393319: fltTcaLldpPduStats1yearFlapsPer

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393320: fltTcaLldpPduStats5minFlapsMin

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393321: fltTcaLldpPduStats15minFlapsMin

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393322: fltTcaLldpPduStats1hFlapsMin

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393323: fltTcaLldpPduStats1dFlapsMin

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393324: fltTcaLldpPduStats1wFlapsMin

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393325: fltTcaLldpPduStats1moFlapsMin

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393326: fltTcaLldpPduStats1qtrFlapsMin

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393327: fltTcaLldpPduStats1yearFlapsMin

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393328: fltTcaLldpPduStats5minFlapsMax

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393329: fltTcaLldpPduStats15minFlapsMax

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393330: fltTcaLldpPduStats1hFlapsMax

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393331: fltTcaLldpPduStats1dFlapsMax

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393332: fltTcaLldpPduStats1wFlapsMax

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393333: fltTcaLldpPduStats1moFlapsMax

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393334: fltTcaLldpPduStats1qtrFlapsMax

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393335: fltTcaLldpPduStats1yearFlapsMax

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393336: fltTcaLldpPduStats5minFlapsAvg

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393337: fltTcaLldpPduStats15minFlapsAvg

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393338: fltTcaLldpPduStats1hFlapsAvg

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393339: fltTcaLldpPduStats1dFlapsAvg

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393340: fltTcaLldpPduStats1wFlapsAvg

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393341: fltTcaLldpPduStats1moFlapsAvg

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393342: fltTcaLldpPduStats1qtrFlapsAvg

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393343: fltTcaLldpPduStats1yearFlapsAvg

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393368: fltTcaLldpPduStats5minFlapsTr

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393369: fltTcaLldpPduStats15minFlapsTr

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393370: fltTcaLldpPduStats1hFlapsTr

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393371: fltTcaLldpPduStats1dFlapsTr

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393372: fltTcaLldpPduStats1wFlapsTr

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393373: fltTcaLldpPduStats1moFlapsTr

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393374: fltTcaLldpPduStats1qtrFlapsTr

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393375: fltTcaLldpPduStats1yearFlapsTr

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393376: fltTcaLldpPduStats5minFlapsRate

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393377: fltTcaLldpPduStats15minFlapsRate

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393378: fltTcaLldpPduStats1hFlapsRate

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393379: fltTcaLldpPduStats1dFlapsRate

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393380: fltTcaLldpPduStats1wFlapsRate

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393381: fltTcaLldpPduStats1moFlapsRate

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393382: fltTcaLldpPduStats1qtrFlapsRate

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393383: fltTcaLldpPduStats1yearFlapsRate

Severity: variable

Explanation: This fault is caused by "Number of Partner PDU timeout events rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Partner PDU timeout events" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3934: fltHcloudCtxPeerOperCloudCtxPeerOperPeeringStateDown

Severity: major

Explanation: This fault occurs when peering link transitions to Disconnected state or is removed in Azure.

Recommended Action: If you see this fault, take the following actions:

1. In case the peering link transitions to Disconnected state, please wait as the system attempts to recover from this state.

2. In case the peering link has been removed, please verify bi-directional peering configuration in Azure.

3. If fault still has not cleared, please contact Cisco TAC.

F393456: fltTcaLldpPduStats5minPduRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393457: fltTcaLldpPduStats15minPduRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393458: fltTcaLldpPduStats1hPduRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393459: fltTcaLldpPduStats1dPduRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393460: fltTcaLldpPduStats1wPduRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393461: fltTcaLldpPduStats1moPduRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393462: fltTcaLldpPduStats1qtrPduRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393463: fltTcaLldpPduStats1yearPduRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393472: fltTcaLldpPduStats5minPduRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393473: fltTcaLldpPduStats15minPduRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393474: fltTcaLldpPduStats1hPduRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393475: fltTcaLldpPduStats1dPduRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393476: fltTcaLldpPduStats1wPduRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393477: fltTcaLldpPduStats1moPduRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393478: fltTcaLldpPduStats1qtrPduRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393479: fltTcaLldpPduStats1yearPduRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393480: fltTcaLldpPduStats5minPduRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393481: fltTcaLldpPduStats15minPduRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393482: fltTcaLldpPduStats1hPduRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393483: fltTcaLldpPduStats1dPduRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393484: fltTcaLldpPduStats1wPduRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393485: fltTcaLldpPduStats1moPduRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393486: fltTcaLldpPduStats1qtrPduRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393487: fltTcaLldpPduStats1yearPduRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393488: fltTcaLldpPduStats5minPduRcvdMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393489: fltTcaLldpPduStats15minPduRcvdMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393490: fltTcaLldpPduStats1hPduRcvdMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393491: fltTcaLldpPduStats1dPduRcvdMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393492: fltTcaLldpPduStats1wPduRcvdMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393493: fltTcaLldpPduStats1moPduRcvdMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393494: fltTcaLldpPduStats1qtrPduRcvdMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393495: fltTcaLldpPduStats1yearPduRcvdMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393496: fltTcaLldpPduStats5minPduRcvdMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393497: fltTcaLldpPduStats15minPduRcvdMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393498: fltTcaLldpPduStats1hPduRcvdMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393499: fltTcaLldpPduStats1dPduRcvdMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3935: fltL3extVirtualLIfPAnchorNodeMismatch

Severity: major

Explanation: This fault occurs when for a given virtual lif the anchor node set if different for v4 and v6

Recommended Action: If you see this fault, take the following actions:

1. Ensure the same anchor node set is configured for v4 and v6

F393500: fltTcaLldpPduStats1wPduRcvdMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393501: fltTcaLldpPduStats1moPduRcvdMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393502: fltTcaLldpPduStats1qtrPduRcvdMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393503: fltTcaLldpPduStats1yearPduRcvdMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393504: fltTcaLldpPduStats5minPduRcvdAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393505: fltTcaLldpPduStats15minPduRcvdAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393506: fltTcaLldpPduStats1hPduRcvdAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393507: fltTcaLldpPduStats1dPduRcvdAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393508: fltTcaLldpPduStats1wPduRcvdAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393509: fltTcaLldpPduStats1moPduRcvdAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393510: fltTcaLldpPduStats1qtrPduRcvdAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393511: fltTcaLldpPduStats1yearPduRcvdAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393536: fltTcaLldpPduStats5minPduRcvdTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393537: fltTcaLldpPduStats15minPduRcvdTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393538: fltTcaLldpPduStats1hPduRcvdTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393539: fltTcaLldpPduStats1dPduRcvdTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393540: fltTcaLldpPduStats1wPduRcvdTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393541: fltTcaLldpPduStats1moPduRcvdTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393542: fltTcaLldpPduStats1qtrPduRcvdTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393543: fltTcaLldpPduStats1yearPduRcvdTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393544: fltTcaLldpPduStats5minPduRcvdRate

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393545: fltTcaLldpPduStats15minPduRcvdRate

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393546: fltTcaLldpPduStats1hPduRcvdRate

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393547: fltTcaLldpPduStats1dPduRcvdRate

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393548: fltTcaLldpPduStats1wPduRcvdRate

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393549: fltTcaLldpPduStats1moPduRcvdRate

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393550: fltTcaLldpPduStats1qtrPduRcvdRate

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393551: fltTcaLldpPduStats1yearPduRcvdRate

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393624: fltTcaLldpPduStats5minPduRcvdRateLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393625: fltTcaLldpPduStats15minPduRcvdRateLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393626: fltTcaLldpPduStats1hPduRcvdRateLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393627: fltTcaLldpPduStats1dPduRcvdRateLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393628: fltTcaLldpPduStats1wPduRcvdRateLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393629: fltTcaLldpPduStats1moPduRcvdRateLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393630: fltTcaLldpPduStats1qtrPduRcvdRateLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393631: fltTcaLldpPduStats1yearPduRcvdRateLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393632: fltTcaLldpPduStats5minPduRcvdRateMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393633: fltTcaLldpPduStats15minPduRcvdRateMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393634: fltTcaLldpPduStats1hPduRcvdRateMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393635: fltTcaLldpPduStats1dPduRcvdRateMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393636: fltTcaLldpPduStats1wPduRcvdRateMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393637: fltTcaLldpPduStats1moPduRcvdRateMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393638: fltTcaLldpPduStats1qtrPduRcvdRateMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393639: fltTcaLldpPduStats1yearPduRcvdRateMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393640: fltTcaLldpPduStats5minPduRcvdRateMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393641: fltTcaLldpPduStats15minPduRcvdRateMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393642: fltTcaLldpPduStats1hPduRcvdRateMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393643: fltTcaLldpPduStats1dPduRcvdRateMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393644: fltTcaLldpPduStats1wPduRcvdRateMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393645: fltTcaLldpPduStats1moPduRcvdRateMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393646: fltTcaLldpPduStats1qtrPduRcvdRateMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393647: fltTcaLldpPduStats1yearPduRcvdRateMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393648: fltTcaLldpPduStats5minPduRcvdRateAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393649: fltTcaLldpPduStats15minPduRcvdRateAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393650: fltTcaLldpPduStats1hPduRcvdRateAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393651: fltTcaLldpPduStats1dPduRcvdRateAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393652: fltTcaLldpPduStats1wPduRcvdRateAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393653: fltTcaLldpPduStats1moPduRcvdRateAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393654: fltTcaLldpPduStats1qtrPduRcvdRateAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393655: fltTcaLldpPduStats1yearPduRcvdRateAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393688: fltTcaLldpPduStats5minPduRcvdRateTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393689: fltTcaLldpPduStats15minPduRcvdRateTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393690: fltTcaLldpPduStats1hPduRcvdRateTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393691: fltTcaLldpPduStats1dPduRcvdRateTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393692: fltTcaLldpPduStats1wPduRcvdRateTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393693: fltTcaLldpPduStats1moPduRcvdRateTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393694: fltTcaLldpPduStats1qtrPduRcvdRateTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393695: fltTcaLldpPduStats1yearPduRcvdRateTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets received rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets received rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393744: fltTcaLldpPduStats5minPduSentLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393745: fltTcaLldpPduStats15minPduSentLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393746: fltTcaLldpPduStats1hPduSentLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393747: fltTcaLldpPduStats1dPduSentLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393748: fltTcaLldpPduStats1wPduSentLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393749: fltTcaLldpPduStats1moPduSentLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393750: fltTcaLldpPduStats1qtrPduSentLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393751: fltTcaLldpPduStats1yearPduSentLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393760: fltTcaLldpPduStats5minPduSentCum

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393761: fltTcaLldpPduStats15minPduSentCum

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393762: fltTcaLldpPduStats1hPduSentCum

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393763: fltTcaLldpPduStats1dPduSentCum

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393764: fltTcaLldpPduStats1wPduSentCum

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393765: fltTcaLldpPduStats1moPduSentCum

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393766: fltTcaLldpPduStats1qtrPduSentCum

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393767: fltTcaLldpPduStats1yearPduSentCum

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393768: fltTcaLldpPduStats5minPduSentPer

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393769: fltTcaLldpPduStats15minPduSentPer

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393770: fltTcaLldpPduStats1hPduSentPer

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393771: fltTcaLldpPduStats1dPduSentPer

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393772: fltTcaLldpPduStats1wPduSentPer

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393773: fltTcaLldpPduStats1moPduSentPer

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393774: fltTcaLldpPduStats1qtrPduSentPer

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393775: fltTcaLldpPduStats1yearPduSentPer

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393776: fltTcaLldpPduStats5minPduSentMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393777: fltTcaLldpPduStats15minPduSentMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393778: fltTcaLldpPduStats1hPduSentMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393779: fltTcaLldpPduStats1dPduSentMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393780: fltTcaLldpPduStats1wPduSentMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393781: fltTcaLldpPduStats1moPduSentMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393782: fltTcaLldpPduStats1qtrPduSentMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393783: fltTcaLldpPduStats1yearPduSentMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393784: fltTcaLldpPduStats5minPduSentMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393785: fltTcaLldpPduStats15minPduSentMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393786: fltTcaLldpPduStats1hPduSentMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393787: fltTcaLldpPduStats1dPduSentMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393788: fltTcaLldpPduStats1wPduSentMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393789: fltTcaLldpPduStats1moPduSentMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393790: fltTcaLldpPduStats1qtrPduSentMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393791: fltTcaLldpPduStats1yearPduSentMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393792: fltTcaLldpPduStats5minPduSentAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393793: fltTcaLldpPduStats15minPduSentAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393794: fltTcaLldpPduStats1hPduSentAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393795: fltTcaLldpPduStats1dPduSentAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393796: fltTcaLldpPduStats1wPduSentAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393797: fltTcaLldpPduStats1moPduSentAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393798: fltTcaLldpPduStats1qtrPduSentAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393799: fltTcaLldpPduStats1yearPduSentAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3938: fltCloudRsLIfToCloudSubnetResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F393824: fltTcaLldpPduStats5minPduSentTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393825: fltTcaLldpPduStats15minPduSentTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393826: fltTcaLldpPduStats1hPduSentTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393827: fltTcaLldpPduStats1dPduSentTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393828: fltTcaLldpPduStats1wPduSentTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393829: fltTcaLldpPduStats1moPduSentTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393830: fltTcaLldpPduStats1qtrPduSentTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393831: fltTcaLldpPduStats1yearPduSentTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393832: fltTcaLldpPduStats5minPduSentRate

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393833: fltTcaLldpPduStats15minPduSentRate

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393834: fltTcaLldpPduStats1hPduSentRate

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393835: fltTcaLldpPduStats1dPduSentRate

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393836: fltTcaLldpPduStats1wPduSentRate

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393837: fltTcaLldpPduStats1moPduSentRate

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393838: fltTcaLldpPduStats1qtrPduSentRate

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393839: fltTcaLldpPduStats1yearPduSentRate

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3939: fltHcloudRsVendorInstToSubnetResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F393912: fltTcaLldpPduStats5minPduSentRateLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393913: fltTcaLldpPduStats15minPduSentRateLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393914: fltTcaLldpPduStats1hPduSentRateLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393915: fltTcaLldpPduStats1dPduSentRateLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393916: fltTcaLldpPduStats1wPduSentRateLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393917: fltTcaLldpPduStats1moPduSentRateLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393918: fltTcaLldpPduStats1qtrPduSentRateLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393919: fltTcaLldpPduStats1yearPduSentRateLast

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393920: fltTcaLldpPduStats5minPduSentRateMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393921: fltTcaLldpPduStats15minPduSentRateMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393922: fltTcaLldpPduStats1hPduSentRateMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393923: fltTcaLldpPduStats1dPduSentRateMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393924: fltTcaLldpPduStats1wPduSentRateMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393925: fltTcaLldpPduStats1moPduSentRateMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393926: fltTcaLldpPduStats1qtrPduSentRateMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393927: fltTcaLldpPduStats1yearPduSentRateMin

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393928: fltTcaLldpPduStats5minPduSentRateMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393929: fltTcaLldpPduStats15minPduSentRateMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393930: fltTcaLldpPduStats1hPduSentRateMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393931: fltTcaLldpPduStats1dPduSentRateMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393932: fltTcaLldpPduStats1wPduSentRateMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393933: fltTcaLldpPduStats1moPduSentRateMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393934: fltTcaLldpPduStats1qtrPduSentRateMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393935: fltTcaLldpPduStats1yearPduSentRateMax

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393936: fltTcaLldpPduStats5minPduSentRateAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393937: fltTcaLldpPduStats15minPduSentRateAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393938: fltTcaLldpPduStats1hPduSentRateAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393939: fltTcaLldpPduStats1dPduSentRateAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393940: fltTcaLldpPduStats1wPduSentRateAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393941: fltTcaLldpPduStats1moPduSentRateAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393942: fltTcaLldpPduStats1qtrPduSentRateAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393943: fltTcaLldpPduStats1yearPduSentRateAvg

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393976: fltTcaLldpPduStats5minPduSentRateTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393977: fltTcaLldpPduStats15minPduSentRateTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393978: fltTcaLldpPduStats1hPduSentRateTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393979: fltTcaLldpPduStats1dPduSentRateTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393980: fltTcaLldpPduStats1wPduSentRateTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393981: fltTcaLldpPduStats1moPduSentRateTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393982: fltTcaLldpPduStats1qtrPduSentRateTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F393983: fltTcaLldpPduStats1yearPduSentRateTr

Severity: variable

Explanation: This fault is caused by "Number of lldp PDU packets sent rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of lldp PDU packets sent rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3940: fltL3extConsLblMissingExportRouteProfile

Severity: major

Explanation: This fault occurs when there's no export route policy relation for an MPLS consumer label

Recommended Action: If you see this fault, take the following actions:

1. Ensure that export route policy relation is configured for the consumer label

F394096: fltTcaFcReceiveFecCounters5minCorrectedLast

Severity: variable

Explanation: This fault is caused by "Corrected counters current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394097: fltTcaFcReceiveFecCounters15minCorrectedLast

Severity: variable

Explanation: This fault is caused by "Corrected counters current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394098: fltTcaFcReceiveFecCounters1hCorrectedLast

Severity: variable

Explanation: This fault is caused by "Corrected counters current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394099: fltTcaFcReceiveFecCounters1dCorrectedLast

Severity: variable

Explanation: This fault is caused by "Corrected counters current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3941: fltL3extInstPNoConsLblAssociation

Severity: minor

Explanation: This fault occurs when there's no consumer label association for an external EPG in an MPLS L3Out

Recommended Action: If you see this fault, take the following actions:

1. Ensure that the external EPG is associated with at least one MPLS consumer label

F394100: fltTcaFcReceiveFecCounters1wCorrectedLast

Severity: variable

Explanation: This fault is caused by "Corrected counters current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394101: fltTcaFcReceiveFecCounters1moCorrectedLast

Severity: variable

Explanation: This fault is caused by "Corrected counters current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394102: fltTcaFcReceiveFecCounters1qtrCorrectedLast

Severity: variable

Explanation: This fault is caused by "Corrected counters current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394103: fltTcaFcReceiveFecCounters1yearCorrectedLast

Severity: variable

Explanation: This fault is caused by "Corrected counters current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394112: fltTcaFcReceiveFecCounters5minCorrectedCum

Severity: variable

Explanation: This fault is caused by "Corrected counters cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394113: fltTcaFcReceiveFecCounters15minCorrectedCum

Severity: variable

Explanation: This fault is caused by "Corrected counters cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394114: fltTcaFcReceiveFecCounters1hCorrectedCum

Severity: variable

Explanation: This fault is caused by "Corrected counters cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394115: fltTcaFcReceiveFecCounters1dCorrectedCum

Severity: variable

Explanation: This fault is caused by "Corrected counters cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394116: fltTcaFcReceiveFecCounters1wCorrectedCum

Severity: variable

Explanation: This fault is caused by "Corrected counters cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394117: fltTcaFcReceiveFecCounters1moCorrectedCum

Severity: variable

Explanation: This fault is caused by "Corrected counters cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394118: fltTcaFcReceiveFecCounters1qtrCorrectedCum

Severity: variable

Explanation: This fault is caused by "Corrected counters cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394119: fltTcaFcReceiveFecCounters1yearCorrectedCum

Severity: variable

Explanation: This fault is caused by "Corrected counters cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394120: fltTcaFcReceiveFecCounters5minCorrectedPer

Severity: variable

Explanation: This fault is caused by "Corrected counters periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394121: fltTcaFcReceiveFecCounters15minCorrectedPer

Severity: variable

Explanation: This fault is caused by "Corrected counters periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394122: fltTcaFcReceiveFecCounters1hCorrectedPer

Severity: variable

Explanation: This fault is caused by "Corrected counters periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394123: fltTcaFcReceiveFecCounters1dCorrectedPer

Severity: variable

Explanation: This fault is caused by "Corrected counters periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394124: fltTcaFcReceiveFecCounters1wCorrectedPer

Severity: variable

Explanation: This fault is caused by "Corrected counters periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394125: fltTcaFcReceiveFecCounters1moCorrectedPer

Severity: variable

Explanation: This fault is caused by "Corrected counters periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394126: fltTcaFcReceiveFecCounters1qtrCorrectedPer

Severity: variable

Explanation: This fault is caused by "Corrected counters periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394127: fltTcaFcReceiveFecCounters1yearCorrectedPer

Severity: variable

Explanation: This fault is caused by "Corrected counters periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394128: fltTcaFcReceiveFecCounters5minCorrectedMin

Severity: variable

Explanation: This fault is caused by "Corrected counters minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394129: fltTcaFcReceiveFecCounters15minCorrectedMin

Severity: variable

Explanation: This fault is caused by "Corrected counters minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394130: fltTcaFcReceiveFecCounters1hCorrectedMin

Severity: variable

Explanation: This fault is caused by "Corrected counters minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394131: fltTcaFcReceiveFecCounters1dCorrectedMin

Severity: variable

Explanation: This fault is caused by "Corrected counters minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394132: fltTcaFcReceiveFecCounters1wCorrectedMin

Severity: variable

Explanation: This fault is caused by "Corrected counters minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394133: fltTcaFcReceiveFecCounters1moCorrectedMin

Severity: variable

Explanation: This fault is caused by "Corrected counters minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394134: fltTcaFcReceiveFecCounters1qtrCorrectedMin

Severity: variable

Explanation: This fault is caused by "Corrected counters minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394135: fltTcaFcReceiveFecCounters1yearCorrectedMin

Severity: variable

Explanation: This fault is caused by "Corrected counters minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394136: fltTcaFcReceiveFecCounters5minCorrectedMax

Severity: variable

Explanation: This fault is caused by "Corrected counters maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394137: fltTcaFcReceiveFecCounters15minCorrectedMax

Severity: variable

Explanation: This fault is caused by "Corrected counters maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394138: fltTcaFcReceiveFecCounters1hCorrectedMax

Severity: variable

Explanation: This fault is caused by "Corrected counters maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394139: fltTcaFcReceiveFecCounters1dCorrectedMax

Severity: variable

Explanation: This fault is caused by "Corrected counters maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394140: fltTcaFcReceiveFecCounters1wCorrectedMax

Severity: variable

Explanation: This fault is caused by "Corrected counters maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394141: fltTcaFcReceiveFecCounters1moCorrectedMax

Severity: variable

Explanation: This fault is caused by "Corrected counters maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394142: fltTcaFcReceiveFecCounters1qtrCorrectedMax

Severity: variable

Explanation: This fault is caused by "Corrected counters maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394143: fltTcaFcReceiveFecCounters1yearCorrectedMax

Severity: variable

Explanation: This fault is caused by "Corrected counters maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394144: fltTcaFcReceiveFecCounters5minCorrectedAvg

Severity: variable

Explanation: This fault is caused by "Corrected counters average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394145: fltTcaFcReceiveFecCounters15minCorrectedAvg

Severity: variable

Explanation: This fault is caused by "Corrected counters average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394146: fltTcaFcReceiveFecCounters1hCorrectedAvg

Severity: variable

Explanation: This fault is caused by "Corrected counters average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394147: fltTcaFcReceiveFecCounters1dCorrectedAvg

Severity: variable

Explanation: This fault is caused by "Corrected counters average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394148: fltTcaFcReceiveFecCounters1wCorrectedAvg

Severity: variable

Explanation: This fault is caused by "Corrected counters average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394149: fltTcaFcReceiveFecCounters1moCorrectedAvg

Severity: variable

Explanation: This fault is caused by "Corrected counters average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394150: fltTcaFcReceiveFecCounters1qtrCorrectedAvg

Severity: variable

Explanation: This fault is caused by "Corrected counters average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394151: fltTcaFcReceiveFecCounters1yearCorrectedAvg

Severity: variable

Explanation: This fault is caused by "Corrected counters average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394176: fltTcaFcReceiveFecCounters5minCorrectedTr

Severity: variable

Explanation: This fault is caused by "Corrected counters trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394177: fltTcaFcReceiveFecCounters15minCorrectedTr

Severity: variable

Explanation: This fault is caused by "Corrected counters trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394178: fltTcaFcReceiveFecCounters1hCorrectedTr

Severity: variable

Explanation: This fault is caused by "Corrected counters trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394179: fltTcaFcReceiveFecCounters1dCorrectedTr

Severity: variable

Explanation: This fault is caused by "Corrected counters trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394180: fltTcaFcReceiveFecCounters1wCorrectedTr

Severity: variable

Explanation: This fault is caused by "Corrected counters trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394181: fltTcaFcReceiveFecCounters1moCorrectedTr

Severity: variable

Explanation: This fault is caused by "Corrected counters trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394182: fltTcaFcReceiveFecCounters1qtrCorrectedTr

Severity: variable

Explanation: This fault is caused by "Corrected counters trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394183: fltTcaFcReceiveFecCounters1yearCorrectedTr

Severity: variable

Explanation: This fault is caused by "Corrected counters trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394184: fltTcaFcReceiveFecCounters5minCorrectedRate

Severity: variable

Explanation: This fault is caused by "Corrected counters rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394185: fltTcaFcReceiveFecCounters15minCorrectedRate

Severity: variable

Explanation: This fault is caused by "Corrected counters rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394186: fltTcaFcReceiveFecCounters1hCorrectedRate

Severity: variable

Explanation: This fault is caused by "Corrected counters rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394187: fltTcaFcReceiveFecCounters1dCorrectedRate

Severity: variable

Explanation: This fault is caused by "Corrected counters rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394188: fltTcaFcReceiveFecCounters1wCorrectedRate

Severity: variable

Explanation: This fault is caused by "Corrected counters rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394189: fltTcaFcReceiveFecCounters1moCorrectedRate

Severity: variable

Explanation: This fault is caused by "Corrected counters rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394190: fltTcaFcReceiveFecCounters1qtrCorrectedRate

Severity: variable

Explanation: This fault is caused by "Corrected counters rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394191: fltTcaFcReceiveFecCounters1yearCorrectedRate

Severity: variable

Explanation: This fault is caused by "Corrected counters rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Corrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3942: fltDhcpLeaseDbThresholdReached

Severity: major

Explanation: This fault is raised when there are DHCPDISCOVER message flood and number of reserved dhcpLease reaches the threshold 512

Recommended Action: If you see this fault, take the following actions:

1. Stop the DHCPDISCOVER message flood in the network.

2. The reserved dhcpLease will be cleaned up in one hour, and after that, IP will be allocated.

3. If the above actions did not resolve the issue, collect a tech-support file and contact Cisco TAC.

F394264: fltTcaFcReceiveFecCounters5minUncorrectedLast

Severity: variable

Explanation: This fault is caused by "Uncorrected counters current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394265: fltTcaFcReceiveFecCounters15minUncorrectedLast

Severity: variable

Explanation: This fault is caused by "Uncorrected counters current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394266: fltTcaFcReceiveFecCounters1hUncorrectedLast

Severity: variable

Explanation: This fault is caused by "Uncorrected counters current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394267: fltTcaFcReceiveFecCounters1dUncorrectedLast

Severity: variable

Explanation: This fault is caused by "Uncorrected counters current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394268: fltTcaFcReceiveFecCounters1wUncorrectedLast

Severity: variable

Explanation: This fault is caused by "Uncorrected counters current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394269: fltTcaFcReceiveFecCounters1moUncorrectedLast

Severity: variable

Explanation: This fault is caused by "Uncorrected counters current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394270: fltTcaFcReceiveFecCounters1qtrUncorrectedLast

Severity: variable

Explanation: This fault is caused by "Uncorrected counters current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394271: fltTcaFcReceiveFecCounters1yearUncorrectedLast

Severity: variable

Explanation: This fault is caused by "Uncorrected counters current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394280: fltTcaFcReceiveFecCounters5minUncorrectedCum

Severity: variable

Explanation: This fault is caused by "Uncorrected counters cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394281: fltTcaFcReceiveFecCounters15minUncorrectedCum

Severity: variable

Explanation: This fault is caused by "Uncorrected counters cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394282: fltTcaFcReceiveFecCounters1hUncorrectedCum

Severity: variable

Explanation: This fault is caused by "Uncorrected counters cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394283: fltTcaFcReceiveFecCounters1dUncorrectedCum

Severity: variable

Explanation: This fault is caused by "Uncorrected counters cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394284: fltTcaFcReceiveFecCounters1wUncorrectedCum

Severity: variable

Explanation: This fault is caused by "Uncorrected counters cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394285: fltTcaFcReceiveFecCounters1moUncorrectedCum

Severity: variable

Explanation: This fault is caused by "Uncorrected counters cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394286: fltTcaFcReceiveFecCounters1qtrUncorrectedCum

Severity: variable

Explanation: This fault is caused by "Uncorrected counters cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394287: fltTcaFcReceiveFecCounters1yearUncorrectedCum

Severity: variable

Explanation: This fault is caused by "Uncorrected counters cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394288: fltTcaFcReceiveFecCounters5minUncorrectedPer

Severity: variable

Explanation: This fault is caused by "Uncorrected counters periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394289: fltTcaFcReceiveFecCounters15minUncorrectedPer

Severity: variable

Explanation: This fault is caused by "Uncorrected counters periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394290: fltTcaFcReceiveFecCounters1hUncorrectedPer

Severity: variable

Explanation: This fault is caused by "Uncorrected counters periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394291: fltTcaFcReceiveFecCounters1dUncorrectedPer

Severity: variable

Explanation: This fault is caused by "Uncorrected counters periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394292: fltTcaFcReceiveFecCounters1wUncorrectedPer

Severity: variable

Explanation: This fault is caused by "Uncorrected counters periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394293: fltTcaFcReceiveFecCounters1moUncorrectedPer

Severity: variable

Explanation: This fault is caused by "Uncorrected counters periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394294: fltTcaFcReceiveFecCounters1qtrUncorrectedPer

Severity: variable

Explanation: This fault is caused by "Uncorrected counters periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394295: fltTcaFcReceiveFecCounters1yearUncorrectedPer

Severity: variable

Explanation: This fault is caused by "Uncorrected counters periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394296: fltTcaFcReceiveFecCounters5minUncorrectedMin

Severity: variable

Explanation: This fault is caused by "Uncorrected counters minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394297: fltTcaFcReceiveFecCounters15minUncorrectedMin

Severity: variable

Explanation: This fault is caused by "Uncorrected counters minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394298: fltTcaFcReceiveFecCounters1hUncorrectedMin

Severity: variable

Explanation: This fault is caused by "Uncorrected counters minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394299: fltTcaFcReceiveFecCounters1dUncorrectedMin

Severity: variable

Explanation: This fault is caused by "Uncorrected counters minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394300: fltTcaFcReceiveFecCounters1wUncorrectedMin

Severity: variable

Explanation: This fault is caused by "Uncorrected counters minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394301: fltTcaFcReceiveFecCounters1moUncorrectedMin

Severity: variable

Explanation: This fault is caused by "Uncorrected counters minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394302: fltTcaFcReceiveFecCounters1qtrUncorrectedMin

Severity: variable

Explanation: This fault is caused by "Uncorrected counters minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394303: fltTcaFcReceiveFecCounters1yearUncorrectedMin

Severity: variable

Explanation: This fault is caused by "Uncorrected counters minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394304: fltTcaFcReceiveFecCounters5minUncorrectedMax

Severity: variable

Explanation: This fault is caused by "Uncorrected counters maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394305: fltTcaFcReceiveFecCounters15minUncorrectedMax

Severity: variable

Explanation: This fault is caused by "Uncorrected counters maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394306: fltTcaFcReceiveFecCounters1hUncorrectedMax

Severity: variable

Explanation: This fault is caused by "Uncorrected counters maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394307: fltTcaFcReceiveFecCounters1dUncorrectedMax

Severity: variable

Explanation: This fault is caused by "Uncorrected counters maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394308: fltTcaFcReceiveFecCounters1wUncorrectedMax

Severity: variable

Explanation: This fault is caused by "Uncorrected counters maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394309: fltTcaFcReceiveFecCounters1moUncorrectedMax

Severity: variable

Explanation: This fault is caused by "Uncorrected counters maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394310: fltTcaFcReceiveFecCounters1qtrUncorrectedMax

Severity: variable

Explanation: This fault is caused by "Uncorrected counters maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394311: fltTcaFcReceiveFecCounters1yearUncorrectedMax

Severity: variable

Explanation: This fault is caused by "Uncorrected counters maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394312: fltTcaFcReceiveFecCounters5minUncorrectedAvg

Severity: variable

Explanation: This fault is caused by "Uncorrected counters average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394313: fltTcaFcReceiveFecCounters15minUncorrectedAvg

Severity: variable

Explanation: This fault is caused by "Uncorrected counters average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394314: fltTcaFcReceiveFecCounters1hUncorrectedAvg

Severity: variable

Explanation: This fault is caused by "Uncorrected counters average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394315: fltTcaFcReceiveFecCounters1dUncorrectedAvg

Severity: variable

Explanation: This fault is caused by "Uncorrected counters average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394316: fltTcaFcReceiveFecCounters1wUncorrectedAvg

Severity: variable

Explanation: This fault is caused by "Uncorrected counters average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394317: fltTcaFcReceiveFecCounters1moUncorrectedAvg

Severity: variable

Explanation: This fault is caused by "Uncorrected counters average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394318: fltTcaFcReceiveFecCounters1qtrUncorrectedAvg

Severity: variable

Explanation: This fault is caused by "Uncorrected counters average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394319: fltTcaFcReceiveFecCounters1yearUncorrectedAvg

Severity: variable

Explanation: This fault is caused by "Uncorrected counters average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394344: fltTcaFcReceiveFecCounters5minUncorrectedTr

Severity: variable

Explanation: This fault is caused by "Uncorrected counters trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394345: fltTcaFcReceiveFecCounters15minUncorrectedTr

Severity: variable

Explanation: This fault is caused by "Uncorrected counters trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394346: fltTcaFcReceiveFecCounters1hUncorrectedTr

Severity: variable

Explanation: This fault is caused by "Uncorrected counters trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394347: fltTcaFcReceiveFecCounters1dUncorrectedTr

Severity: variable

Explanation: This fault is caused by "Uncorrected counters trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394348: fltTcaFcReceiveFecCounters1wUncorrectedTr

Severity: variable

Explanation: This fault is caused by "Uncorrected counters trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394349: fltTcaFcReceiveFecCounters1moUncorrectedTr

Severity: variable

Explanation: This fault is caused by "Uncorrected counters trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394350: fltTcaFcReceiveFecCounters1qtrUncorrectedTr

Severity: variable

Explanation: This fault is caused by "Uncorrected counters trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394351: fltTcaFcReceiveFecCounters1yearUncorrectedTr

Severity: variable

Explanation: This fault is caused by "Uncorrected counters trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394352: fltTcaFcReceiveFecCounters5minUncorrectedRate

Severity: variable

Explanation: This fault is caused by "Uncorrected counters rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394353: fltTcaFcReceiveFecCounters15minUncorrectedRate

Severity: variable

Explanation: This fault is caused by "Uncorrected counters rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394354: fltTcaFcReceiveFecCounters1hUncorrectedRate

Severity: variable

Explanation: This fault is caused by "Uncorrected counters rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394355: fltTcaFcReceiveFecCounters1dUncorrectedRate

Severity: variable

Explanation: This fault is caused by "Uncorrected counters rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394356: fltTcaFcReceiveFecCounters1wUncorrectedRate

Severity: variable

Explanation: This fault is caused by "Uncorrected counters rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394357: fltTcaFcReceiveFecCounters1moUncorrectedRate

Severity: variable

Explanation: This fault is caused by "Uncorrected counters rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394358: fltTcaFcReceiveFecCounters1qtrUncorrectedRate

Severity: variable

Explanation: This fault is caused by "Uncorrected counters rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394359: fltTcaFcReceiveFecCounters1yearUncorrectedRate

Severity: variable

Explanation: This fault is caused by "Uncorrected counters rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Uncorrected counters" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3944: fltDhcpClientUnregisteredSwitch

Severity: warning

Explanation: This fault is raised when a node discovered but not registered yet

Recommended Action: If you see this fault, take the following actions:

1. Configure the nodeIdentity policy to register the node

F394480: fltTcaEqptIngrErrPkts5minCrcCountLast

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394481: fltTcaEqptIngrErrPkts15minCrcCountLast

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394482: fltTcaEqptIngrErrPkts1hCrcCountLast

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394483: fltTcaEqptIngrErrPkts1dCrcCountLast

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394484: fltTcaEqptIngrErrPkts1wCrcCountLast

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394485: fltTcaEqptIngrErrPkts1moCrcCountLast

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394486: fltTcaEqptIngrErrPkts1qtrCrcCountLast

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394487: fltTcaEqptIngrErrPkts1yearCrcCountLast

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394496: fltTcaEqptIngrErrPkts5minCrcCountCum

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394497: fltTcaEqptIngrErrPkts15minCrcCountCum

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394498: fltTcaEqptIngrErrPkts1hCrcCountCum

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394499: fltTcaEqptIngrErrPkts1dCrcCountCum

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394500: fltTcaEqptIngrErrPkts1wCrcCountCum

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394501: fltTcaEqptIngrErrPkts1moCrcCountCum

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394502: fltTcaEqptIngrErrPkts1qtrCrcCountCum

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394503: fltTcaEqptIngrErrPkts1yearCrcCountCum

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394504: fltTcaEqptIngrErrPkts5minCrcCountPer

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394505: fltTcaEqptIngrErrPkts15minCrcCountPer

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394506: fltTcaEqptIngrErrPkts1hCrcCountPer

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394507: fltTcaEqptIngrErrPkts1dCrcCountPer

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394508: fltTcaEqptIngrErrPkts1wCrcCountPer

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394509: fltTcaEqptIngrErrPkts1moCrcCountPer

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394510: fltTcaEqptIngrErrPkts1qtrCrcCountPer

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394511: fltTcaEqptIngrErrPkts1yearCrcCountPer

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394512: fltTcaEqptIngrErrPkts5minCrcCountMin

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394513: fltTcaEqptIngrErrPkts15minCrcCountMin

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394514: fltTcaEqptIngrErrPkts1hCrcCountMin

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394515: fltTcaEqptIngrErrPkts1dCrcCountMin

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394516: fltTcaEqptIngrErrPkts1wCrcCountMin

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394517: fltTcaEqptIngrErrPkts1moCrcCountMin

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394518: fltTcaEqptIngrErrPkts1qtrCrcCountMin

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394519: fltTcaEqptIngrErrPkts1yearCrcCountMin

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394520: fltTcaEqptIngrErrPkts5minCrcCountMax

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394521: fltTcaEqptIngrErrPkts15minCrcCountMax

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394522: fltTcaEqptIngrErrPkts1hCrcCountMax

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394523: fltTcaEqptIngrErrPkts1dCrcCountMax

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394524: fltTcaEqptIngrErrPkts1wCrcCountMax

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394525: fltTcaEqptIngrErrPkts1moCrcCountMax

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394526: fltTcaEqptIngrErrPkts1qtrCrcCountMax

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394527: fltTcaEqptIngrErrPkts1yearCrcCountMax

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394528: fltTcaEqptIngrErrPkts5minCrcCountAvg

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394529: fltTcaEqptIngrErrPkts15minCrcCountAvg

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394530: fltTcaEqptIngrErrPkts1hCrcCountAvg

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394531: fltTcaEqptIngrErrPkts1dCrcCountAvg

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394532: fltTcaEqptIngrErrPkts1wCrcCountAvg

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394533: fltTcaEqptIngrErrPkts1moCrcCountAvg

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394534: fltTcaEqptIngrErrPkts1qtrCrcCountAvg

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394535: fltTcaEqptIngrErrPkts1yearCrcCountAvg

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394560: fltTcaEqptIngrErrPkts5minCrcCountTr

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394561: fltTcaEqptIngrErrPkts15minCrcCountTr

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394562: fltTcaEqptIngrErrPkts1hCrcCountTr

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394563: fltTcaEqptIngrErrPkts1dCrcCountTr

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394564: fltTcaEqptIngrErrPkts1wCrcCountTr

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394565: fltTcaEqptIngrErrPkts1moCrcCountTr

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394566: fltTcaEqptIngrErrPkts1qtrCrcCountTr

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394567: fltTcaEqptIngrErrPkts1yearCrcCountTr

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394568: fltTcaEqptIngrErrPkts5minCrcCountRate

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394569: fltTcaEqptIngrErrPkts15minCrcCountRate

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394570: fltTcaEqptIngrErrPkts1hCrcCountRate

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394571: fltTcaEqptIngrErrPkts1dCrcCountRate

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394572: fltTcaEqptIngrErrPkts1wCrcCountRate

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394573: fltTcaEqptIngrErrPkts1moCrcCountRate

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394574: fltTcaEqptIngrErrPkts1qtrCrcCountRate

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394575: fltTcaEqptIngrErrPkts1yearCrcCountRate

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394648: fltTcaEqptIngrErrPkts5minCrcCountRateLast

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394649: fltTcaEqptIngrErrPkts15minCrcCountRateLast

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394650: fltTcaEqptIngrErrPkts1hCrcCountRateLast

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394651: fltTcaEqptIngrErrPkts1dCrcCountRateLast

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394652: fltTcaEqptIngrErrPkts1wCrcCountRateLast

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394653: fltTcaEqptIngrErrPkts1moCrcCountRateLast

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394654: fltTcaEqptIngrErrPkts1qtrCrcCountRateLast

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394655: fltTcaEqptIngrErrPkts1yearCrcCountRateLast

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394656: fltTcaEqptIngrErrPkts5minCrcCountRateMin

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394657: fltTcaEqptIngrErrPkts15minCrcCountRateMin

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394658: fltTcaEqptIngrErrPkts1hCrcCountRateMin

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394659: fltTcaEqptIngrErrPkts1dCrcCountRateMin

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394660: fltTcaEqptIngrErrPkts1wCrcCountRateMin

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394661: fltTcaEqptIngrErrPkts1moCrcCountRateMin

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394662: fltTcaEqptIngrErrPkts1qtrCrcCountRateMin

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394663: fltTcaEqptIngrErrPkts1yearCrcCountRateMin

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394664: fltTcaEqptIngrErrPkts5minCrcCountRateMax

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394665: fltTcaEqptIngrErrPkts15minCrcCountRateMax

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394666: fltTcaEqptIngrErrPkts1hCrcCountRateMax

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394667: fltTcaEqptIngrErrPkts1dCrcCountRateMax

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394668: fltTcaEqptIngrErrPkts1wCrcCountRateMax

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394669: fltTcaEqptIngrErrPkts1moCrcCountRateMax

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394670: fltTcaEqptIngrErrPkts1qtrCrcCountRateMax

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394671: fltTcaEqptIngrErrPkts1yearCrcCountRateMax

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394672: fltTcaEqptIngrErrPkts5minCrcCountRateAvg

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394673: fltTcaEqptIngrErrPkts15minCrcCountRateAvg

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394674: fltTcaEqptIngrErrPkts1hCrcCountRateAvg

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394675: fltTcaEqptIngrErrPkts1dCrcCountRateAvg

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394676: fltTcaEqptIngrErrPkts1wCrcCountRateAvg

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394677: fltTcaEqptIngrErrPkts1moCrcCountRateAvg

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394678: fltTcaEqptIngrErrPkts1qtrCrcCountRateAvg

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394679: fltTcaEqptIngrErrPkts1yearCrcCountRateAvg

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394712: fltTcaEqptIngrErrPkts5minCrcCountRateTr

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394713: fltTcaEqptIngrErrPkts15minCrcCountRateTr

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394714: fltTcaEqptIngrErrPkts1hCrcCountRateTr

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394715: fltTcaEqptIngrErrPkts1dCrcCountRateTr

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394716: fltTcaEqptIngrErrPkts1wCrcCountRateTr

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394717: fltTcaEqptIngrErrPkts1moCrcCountRateTr

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394718: fltTcaEqptIngrErrPkts1qtrCrcCountRateTr

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F394719: fltTcaEqptIngrErrPkts1yearCrcCountRateTr

Severity: variable

Explanation: This fault is caused by "CRC Align Errored Packets rate trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CRC Align Errored Packets rate" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F3950: fltL3extRsBdProfileResolveFail

Severity: minor

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3951: fltL3extConsLblMissingInfraL3out

Severity: major

Explanation: This fault occurs when there's no MPLS infra l3out config for an MPLS consumer label

Recommended Action: If you see this fault, take the following actions:

1. Ensure that mpls infra l3out is configured for the consumer label

F3952: fltHinventoryRsNicToTgResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3956: fltLeakRouteIntPfxNot-working-in-hardware

Severity: minor

Explanation: This fault occurs when the shared provider subnet $[ancestor:leak:RouteIntPfx:ip]$ is also cover by an fvSubnet under an fvAEPg for EPG shared services. In this case the leakInternalSubnet is not functional, only the fvSubnet under the fvAEPg is actually working.

Recommended Action: This fault is present till there is the same subnet covered under also by the fvSubnet under fvAEPg, the possible solutions are:

1. split the prefix in smaller pieces to be configured as leakInternalSubnet

2. migrate the shared service provider to use ESG only and then remove the fvSubnet under the fvAEPg

F3984: fltHcloudRsToRouteTableEntryResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3985: fltHcloudRsIgwToRouteTableResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3986: fltHcloudRsNextHopToSvcEpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3993: fltHcloudRsLBToEndPointResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F3994: fltFvExtTepPoolDefUcastNotConfiured

Severity: major

Explanation: This fault occurs when there ucast is deleted if RL is present.

Recommended Action: If you see this fault, take the following actions:

1. fvExtRoutableUcastConnP needs to be configured for all Pods when a Remote Leaf is present in the fabric. You can configure the Ucast by going through Tenant->infra->policies->Protocol->Fabric Ext Connection Policies

2. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC

F3995: fltFabricFailedDecommissionNodeSwitchDecommissionFailed

Severity: warning

Explanation: This fault is raised when the Policy Manager is not able to send reload notification to switch during decommission procedure because switch is not reachable

Recommended Action: If you see this fault, take the following actions:

1. Please manually reload the switch

2. This fault will be removed after 1 hr

3. If the above actions did not resolve the issue, collect tech-support and contact Cisco TAC.

Chapter 8. ACI F4x Messages

- ACI F4* Commands

ACI F4* Commands

F4003: fltHcloudRouteTableEntryOperCloudRouteTableEntrySvcEpStateDown

Severity: major

Explanation: This fault occurs Service device is not present/discovered in the local region.

Recommended Action: None set.

F4004: fltHcloudRsToRouteTableEntryIntraCtxProfileRedirRoute

Severity: major

Explanation: This fault occurs service graph with redirect node is used with consumer and provider from same context profile(VNET/VPC).

Recommended Action: If you see this fault, remove the epgs from the contract.

F4005: fltHcloudSvcFaultInfoCloudPeeringRouteOverride

Severity: warning

Explanation: This fault occurs when peering installed route is over-written by Services UDR.

Recommended Action: None set.

F4006: fltFvExtRoutableUcastConnPInvalidConfiguration

Severity: major

Explanation: This fault occurs when there are specific configuration errors on a ucast tep IP.

Recommended Action: If you see this fault, take the one of following actions based on error shown:

1. Please delete and reconfigure ucast tep IP or routable subnet (fabricExtRoutablePodSubnet) so that ucast tep doesnt overlapping with the unreserved portion of any routable subnet configured.

2. Please delete and reconfigure one of the duplicate ucast tep IPs configured.

3. Please delete and reconfigure corresponding ucast tep IP or rl pool (fabricExtSetupP) so that they dont overlap.

4. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC

F4007: fltCloudNamingNamingPolicyNotReviewed

Severity: warning

Explanation: This fault occurs when cloudNaming Policy has not been reviewed and accepted. Cloud Resources will not deployed till this configuration is done.

Recommended Action: If you see this fault, take the following actions:

1. Navigate to the First time Setup Wizard.

2. Navigate to the cloudNaming Rules, review the naming policy, deploy the Policy and save the config

3. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F4008: fltHcloudSGRuleGroupOperCloudNSGOperStateDown

Severity: minor

Explanation: This fault occurs when an erroneous configuration is pushed for creating a CloudEPg.

Recommended Action: If you see this fault, take the following actions:

1. Please check the fault message and make necessary changes to the config for creating the CloudEPg.

2. In case of error in delete operation, please check if any pending dependent resources have to be cleaned up first on cloud provider.

3. If fault still has not cleared, please contact Cisco TAC.

F4011: fltFabricRsFLinkFlapPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F4012: fltPtpACfgFabricPtpDisabled

Severity: warning

Explanation: This fault occurs when the fabric PTP is disabled.

Recommended Action: Enable Fabric PTP for the PTP FP policy

1. If you are still seeing this, create tech-support ticket and contact Cisco TAC

F401296: fltTcaIsisIsisCsnpErrStats5minCsnpPktsAuthErrLast

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401297: fltTcaIsisIsisCsnpErrStats15minCsnpPktsAuthErrLast

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401298: fltTcaIsisIsisCsnpErrStats1hCsnpPktsAuthErrLast

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401299: fltTcaIsisIsisCsnpErrStats1dCsnpPktsAuthErrLast

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4013: fltPtpRsLatencyPtpModeResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F401300: fltTcaIsisIsisCsnpErrStats1wCsnpPktsAuthErrLast

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401301: fltTcaIsisIsisCsnpErrStats1moCsnpPktsAuthErrLast

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401302: fltTcaIsisIsisCsnpErrStats1qtrCsnpPktsAuthErrLast

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401303: fltTcaIsisIsisCsnpErrStats1yearCsnpPktsAuthErrLast

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401312: fltTcaIsisIsisCsnpErrStats5minCsnpPktsAuthErrCum

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401313: fltTcaIsisIsisCsnpErrStats15minCsnpPktsAuthErrCum

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401314: fltTcaIsisIsisCsnpErrStats1hCsnpPktsAuthErrCum

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401315: fltTcaIsisIsisCsnpErrStats1dCsnpPktsAuthErrCum

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401316: fltTcaIsisIsisCsnpErrStats1wCsnpPktsAuthErrCum

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401317: fltTcaIsisIsisCsnpErrStats1moCsnpPktsAuthErrCum

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401318: fltTcaIsisIsisCsnpErrStats1qtrCsnpPktsAuthErrCum

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401319: fltTcaIsisIsisCsnpErrStats1yearCsnpPktsAuthErrCum

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401320: fltTcaIsisIsisCsnpErrStats5minCsnpPktsAuthErrPer

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401321: fltTcaIsisIsisCsnpErrStats15minCsnpPktsAuthErrPer

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401322: fltTcaIsisIsisCsnpErrStats1hCsnpPktsAuthErrPer

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401323: fltTcaIsisIsisCsnpErrStats1dCsnpPktsAuthErrPer

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401324: fltTcaIsisIsisCsnpErrStats1wCsnpPktsAuthErrPer

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401325: fltTcaIsisIsisCsnpErrStats1moCsnpPktsAuthErrPer

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401326: fltTcaIsisIsisCsnpErrStats1qtrCsnpPktsAuthErrPer

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401327: fltTcaIsisIsisCsnpErrStats1yearCsnpPktsAuthErrPer

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401328: fltTcaIsisIsisCsnpErrStats5minCsnpPktsAuthErrMin

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401329: fltTcaIsisIsisCsnpErrStats15minCsnpPktsAuthErrMin

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401330: fltTcaIsisIsisCsnpErrStats1hCsnpPktsAuthErrMin

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401331: fltTcaIsisIsisCsnpErrStats1dCsnpPktsAuthErrMin

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401332: fltTcaIsisIsisCsnpErrStats1wCsnpPktsAuthErrMin

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401333: fltTcaIsisIsisCsnpErrStats1moCsnpPktsAuthErrMin

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401334: fltTcaIsisIsisCsnpErrStats1qtrCsnpPktsAuthErrMin

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401335: fltTcaIsisIsisCsnpErrStats1yearCsnpPktsAuthErrMin

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401336: fltTcaIsisIsisCsnpErrStats5minCsnpPktsAuthErrMax

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401337: fltTcaIsisIsisCsnpErrStats15minCsnpPktsAuthErrMax

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401338: fltTcaIsisIsisCsnpErrStats1hCsnpPktsAuthErrMax

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401339: fltTcaIsisIsisCsnpErrStats1dCsnpPktsAuthErrMax

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401340: fltTcaIsisIsisCsnpErrStats1wCsnpPktsAuthErrMax

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401341: fltTcaIsisIsisCsnpErrStats1moCsnpPktsAuthErrMax

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401342: fltTcaIsisIsisCsnpErrStats1qtrCsnpPktsAuthErrMax

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401343: fltTcaIsisIsisCsnpErrStats1yearCsnpPktsAuthErrMax

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401344: fltTcaIsisIsisCsnpErrStats5minCsnpPktsAuthErrAvg

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401345: fltTcaIsisIsisCsnpErrStats15minCsnpPktsAuthErrAvg

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401346: fltTcaIsisIsisCsnpErrStats1hCsnpPktsAuthErrAvg

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401347: fltTcaIsisIsisCsnpErrStats1dCsnpPktsAuthErrAvg

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401348: fltTcaIsisIsisCsnpErrStats1wCsnpPktsAuthErrAvg

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401349: fltTcaIsisIsisCsnpErrStats1moCsnpPktsAuthErrAvg

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401350: fltTcaIsisIsisCsnpErrStats1qtrCsnpPktsAuthErrAvg

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401351: fltTcaIsisIsisCsnpErrStats1yearCsnpPktsAuthErrAvg

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401376: fltTcaIsisIsisCsnpErrStats5minCsnpPktsAuthErrTr

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401377: fltTcaIsisIsisCsnpErrStats15minCsnpPktsAuthErrTr

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401378: fltTcaIsisIsisCsnpErrStats1hCsnpPktsAuthErrTr

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401379: fltTcaIsisIsisCsnpErrStats1dCsnpPktsAuthErrTr

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401380: fltTcaIsisIsisCsnpErrStats1wCsnpPktsAuthErrTr

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401381: fltTcaIsisIsisCsnpErrStats1moCsnpPktsAuthErrTr

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401382: fltTcaIsisIsisCsnpErrStats1qtrCsnpPktsAuthErrTr

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401383: fltTcaIsisIsisCsnpErrStats1yearCsnpPktsAuthErrTr

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401384: fltTcaIsisIsisCsnpErrStats5minCsnpPktsAuthErrRate

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401385: fltTcaIsisIsisCsnpErrStats15minCsnpPktsAuthErrRate

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401386: fltTcaIsisIsisCsnpErrStats1hCsnpPktsAuthErrRate

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401387: fltTcaIsisIsisCsnpErrStats1dCsnpPktsAuthErrRate

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401388: fltTcaIsisIsisCsnpErrStats1wCsnpPktsAuthErrRate

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401389: fltTcaIsisIsisCsnpErrStats1moCsnpPktsAuthErrRate

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401390: fltTcaIsisIsisCsnpErrStats1qtrCsnpPktsAuthErrRate

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401391: fltTcaIsisIsisCsnpErrStats1yearCsnpPktsAuthErrRate

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Authentication Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4014: fltQosRsEgressDppPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F401464: fltTcaIsisIsisCsnpErrStats5minCsnpPktsMiscErrLast

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401465: fltTcaIsisIsisCsnpErrStats15minCsnpPktsMiscErrLast

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401466: fltTcaIsisIsisCsnpErrStats1hCsnpPktsMiscErrLast

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401467: fltTcaIsisIsisCsnpErrStats1dCsnpPktsMiscErrLast

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401468: fltTcaIsisIsisCsnpErrStats1wCsnpPktsMiscErrLast

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401469: fltTcaIsisIsisCsnpErrStats1moCsnpPktsMiscErrLast

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401470: fltTcaIsisIsisCsnpErrStats1qtrCsnpPktsMiscErrLast

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401471: fltTcaIsisIsisCsnpErrStats1yearCsnpPktsMiscErrLast

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401480: fltTcaIsisIsisCsnpErrStats5minCsnpPktsMiscErrCum

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401481: fltTcaIsisIsisCsnpErrStats15minCsnpPktsMiscErrCum

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401482: fltTcaIsisIsisCsnpErrStats1hCsnpPktsMiscErrCum

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401483: fltTcaIsisIsisCsnpErrStats1dCsnpPktsMiscErrCum

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401484: fltTcaIsisIsisCsnpErrStats1wCsnpPktsMiscErrCum

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401485: fltTcaIsisIsisCsnpErrStats1moCsnpPktsMiscErrCum

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401486: fltTcaIsisIsisCsnpErrStats1qtrCsnpPktsMiscErrCum

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401487: fltTcaIsisIsisCsnpErrStats1yearCsnpPktsMiscErrCum

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401488: fltTcaIsisIsisCsnpErrStats5minCsnpPktsMiscErrPer

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401489: fltTcaIsisIsisCsnpErrStats15minCsnpPktsMiscErrPer

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401490: fltTcaIsisIsisCsnpErrStats1hCsnpPktsMiscErrPer

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401491: fltTcaIsisIsisCsnpErrStats1dCsnpPktsMiscErrPer

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401492: fltTcaIsisIsisCsnpErrStats1wCsnpPktsMiscErrPer

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401493: fltTcaIsisIsisCsnpErrStats1moCsnpPktsMiscErrPer

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401494: fltTcaIsisIsisCsnpErrStats1qtrCsnpPktsMiscErrPer

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401495: fltTcaIsisIsisCsnpErrStats1yearCsnpPktsMiscErrPer

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401496: fltTcaIsisIsisCsnpErrStats5minCsnpPktsMiscErrMin

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401497: fltTcaIsisIsisCsnpErrStats15minCsnpPktsMiscErrMin

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401498: fltTcaIsisIsisCsnpErrStats1hCsnpPktsMiscErrMin

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401499: fltTcaIsisIsisCsnpErrStats1dCsnpPktsMiscErrMin

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4015: fltQosRsIngressDppPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F401500: fltTcaIsisIsisCsnpErrStats1wCsnpPktsMiscErrMin

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401501: fltTcaIsisIsisCsnpErrStats1moCsnpPktsMiscErrMin

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401502: fltTcaIsisIsisCsnpErrStats1qtrCsnpPktsMiscErrMin

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401503: fltTcaIsisIsisCsnpErrStats1yearCsnpPktsMiscErrMin

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401504: fltTcaIsisIsisCsnpErrStats5minCsnpPktsMiscErrMax

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401505: fltTcaIsisIsisCsnpErrStats15minCsnpPktsMiscErrMax

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401506: fltTcaIsisIsisCsnpErrStats1hCsnpPktsMiscErrMax

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401507: fltTcaIsisIsisCsnpErrStats1dCsnpPktsMiscErrMax

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401508: fltTcaIsisIsisCsnpErrStats1wCsnpPktsMiscErrMax

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401509: fltTcaIsisIsisCsnpErrStats1moCsnpPktsMiscErrMax

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401510: fltTcaIsisIsisCsnpErrStats1qtrCsnpPktsMiscErrMax

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401511: fltTcaIsisIsisCsnpErrStats1yearCsnpPktsMiscErrMax

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401512: fltTcaIsisIsisCsnpErrStats5minCsnpPktsMiscErrAvg

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401513: fltTcaIsisIsisCsnpErrStats15minCsnpPktsMiscErrAvg

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401514: fltTcaIsisIsisCsnpErrStats1hCsnpPktsMiscErrAvg

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401515: fltTcaIsisIsisCsnpErrStats1dCsnpPktsMiscErrAvg

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401516: fltTcaIsisIsisCsnpErrStats1wCsnpPktsMiscErrAvg

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401517: fltTcaIsisIsisCsnpErrStats1moCsnpPktsMiscErrAvg

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401518: fltTcaIsisIsisCsnpErrStats1qtrCsnpPktsMiscErrAvg

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401519: fltTcaIsisIsisCsnpErrStats1yearCsnpPktsMiscErrAvg

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401544: fltTcaIsisIsisCsnpErrStats5minCsnpPktsMiscErrTr

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401545: fltTcaIsisIsisCsnpErrStats15minCsnpPktsMiscErrTr

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401546: fltTcaIsisIsisCsnpErrStats1hCsnpPktsMiscErrTr

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401547: fltTcaIsisIsisCsnpErrStats1dCsnpPktsMiscErrTr

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401548: fltTcaIsisIsisCsnpErrStats1wCsnpPktsMiscErrTr

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401549: fltTcaIsisIsisCsnpErrStats1moCsnpPktsMiscErrTr

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401550: fltTcaIsisIsisCsnpErrStats1qtrCsnpPktsMiscErrTr

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401551: fltTcaIsisIsisCsnpErrStats1yearCsnpPktsMiscErrTr

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401552: fltTcaIsisIsisCsnpErrStats5minCsnpPktsMiscErrRate

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401553: fltTcaIsisIsisCsnpErrStats15minCsnpPktsMiscErrRate

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401554: fltTcaIsisIsisCsnpErrStats1hCsnpPktsMiscErrRate

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401555: fltTcaIsisIsisCsnpErrStats1dCsnpPktsMiscErrRate

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401556: fltTcaIsisIsisCsnpErrStats1wCsnpPktsMiscErrRate

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401557: fltTcaIsisIsisCsnpErrStats1moCsnpPktsMiscErrRate

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401558: fltTcaIsisIsisCsnpErrStats1qtrCsnpPktsMiscErrRate

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401559: fltTcaIsisIsisCsnpErrStats1yearCsnpPktsMiscErrRate

Severity: variable

Explanation: This fault is caused by "CSNP Packets with Miscelcsnpeous Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4016: fltQospClassMicroburstUnsupportedHw

Severity: minor

Explanation: This fault occurs when Microburst config is pushed to unsupported hardware

Recommended Action: To recover from this fault, try the following actions

1. Look at any configuration issues

2. Microburst not supported on this hardware,could upgrade to newer hardware

F401632: fltTcaIsisIsisCsnpStats5minCsnpPktsRxLast

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401633: fltTcaIsisIsisCsnpStats15minCsnpPktsRxLast

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401634: fltTcaIsisIsisCsnpStats1hCsnpPktsRxLast

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401635: fltTcaIsisIsisCsnpStats1dCsnpPktsRxLast

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401636: fltTcaIsisIsisCsnpStats1wCsnpPktsRxLast

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401637: fltTcaIsisIsisCsnpStats1moCsnpPktsRxLast

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401638: fltTcaIsisIsisCsnpStats1qtrCsnpPktsRxLast

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401639: fltTcaIsisIsisCsnpStats1yearCsnpPktsRxLast

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401648: fltTcaIsisIsisCsnpStats5minCsnpPktsRxCum

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401649: fltTcaIsisIsisCsnpStats15minCsnpPktsRxCum

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401650: fltTcaIsisIsisCsnpStats1hCsnpPktsRxCum

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401651: fltTcaIsisIsisCsnpStats1dCsnpPktsRxCum

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401652: fltTcaIsisIsisCsnpStats1wCsnpPktsRxCum

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401653: fltTcaIsisIsisCsnpStats1moCsnpPktsRxCum

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401654: fltTcaIsisIsisCsnpStats1qtrCsnpPktsRxCum

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401655: fltTcaIsisIsisCsnpStats1yearCsnpPktsRxCum

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401656: fltTcaIsisIsisCsnpStats5minCsnpPktsRxPer

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401657: fltTcaIsisIsisCsnpStats15minCsnpPktsRxPer

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401658: fltTcaIsisIsisCsnpStats1hCsnpPktsRxPer

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401659: fltTcaIsisIsisCsnpStats1dCsnpPktsRxPer

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401660: fltTcaIsisIsisCsnpStats1wCsnpPktsRxPer

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401661: fltTcaIsisIsisCsnpStats1moCsnpPktsRxPer

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401662: fltTcaIsisIsisCsnpStats1qtrCsnpPktsRxPer

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401663: fltTcaIsisIsisCsnpStats1yearCsnpPktsRxPer

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401664: fltTcaIsisIsisCsnpStats5minCsnpPktsRxMin

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401665: fltTcaIsisIsisCsnpStats15minCsnpPktsRxMin

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401666: fltTcaIsisIsisCsnpStats1hCsnpPktsRxMin

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401667: fltTcaIsisIsisCsnpStats1dCsnpPktsRxMin

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401668: fltTcaIsisIsisCsnpStats1wCsnpPktsRxMin

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401669: fltTcaIsisIsisCsnpStats1moCsnpPktsRxMin

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401670: fltTcaIsisIsisCsnpStats1qtrCsnpPktsRxMin

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401671: fltTcaIsisIsisCsnpStats1yearCsnpPktsRxMin

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401672: fltTcaIsisIsisCsnpStats5minCsnpPktsRxMax

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401673: fltTcaIsisIsisCsnpStats15minCsnpPktsRxMax

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401674: fltTcaIsisIsisCsnpStats1hCsnpPktsRxMax

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401675: fltTcaIsisIsisCsnpStats1dCsnpPktsRxMax

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401676: fltTcaIsisIsisCsnpStats1wCsnpPktsRxMax

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401677: fltTcaIsisIsisCsnpStats1moCsnpPktsRxMax

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401678: fltTcaIsisIsisCsnpStats1qtrCsnpPktsRxMax

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401679: fltTcaIsisIsisCsnpStats1yearCsnpPktsRxMax

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401680: fltTcaIsisIsisCsnpStats5minCsnpPktsRxAvg

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401681: fltTcaIsisIsisCsnpStats15minCsnpPktsRxAvg

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401682: fltTcaIsisIsisCsnpStats1hCsnpPktsRxAvg

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401683: fltTcaIsisIsisCsnpStats1dCsnpPktsRxAvg

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401684: fltTcaIsisIsisCsnpStats1wCsnpPktsRxAvg

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401685: fltTcaIsisIsisCsnpStats1moCsnpPktsRxAvg

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401686: fltTcaIsisIsisCsnpStats1qtrCsnpPktsRxAvg

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401687: fltTcaIsisIsisCsnpStats1yearCsnpPktsRxAvg

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401712: fltTcaIsisIsisCsnpStats5minCsnpPktsRxTr

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401713: fltTcaIsisIsisCsnpStats15minCsnpPktsRxTr

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401714: fltTcaIsisIsisCsnpStats1hCsnpPktsRxTr

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401715: fltTcaIsisIsisCsnpStats1dCsnpPktsRxTr

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401716: fltTcaIsisIsisCsnpStats1wCsnpPktsRxTr

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401717: fltTcaIsisIsisCsnpStats1moCsnpPktsRxTr

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401718: fltTcaIsisIsisCsnpStats1qtrCsnpPktsRxTr

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401719: fltTcaIsisIsisCsnpStats1yearCsnpPktsRxTr

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401720: fltTcaIsisIsisCsnpStats5minCsnpPktsRxRate

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401721: fltTcaIsisIsisCsnpStats15minCsnpPktsRxRate

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401722: fltTcaIsisIsisCsnpStats1hCsnpPktsRxRate

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401723: fltTcaIsisIsisCsnpStats1dCsnpPktsRxRate

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401724: fltTcaIsisIsisCsnpStats1wCsnpPktsRxRate

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401725: fltTcaIsisIsisCsnpStats1moCsnpPktsRxRate

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401726: fltTcaIsisIsisCsnpStats1qtrCsnpPktsRxRate

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401727: fltTcaIsisIsisCsnpStats1yearCsnpPktsRxRate

Severity: variable

Explanation: This fault is caused by "CSNP Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4018: fltFvRsQosRequirementResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F401800: fltTcaIsisIsisCsnpStats5minCsnpPktsTxLast

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401801: fltTcaIsisIsisCsnpStats15minCsnpPktsTxLast

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401802: fltTcaIsisIsisCsnpStats1hCsnpPktsTxLast

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401803: fltTcaIsisIsisCsnpStats1dCsnpPktsTxLast

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401804: fltTcaIsisIsisCsnpStats1wCsnpPktsTxLast

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401805: fltTcaIsisIsisCsnpStats1moCsnpPktsTxLast

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401806: fltTcaIsisIsisCsnpStats1qtrCsnpPktsTxLast

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401807: fltTcaIsisIsisCsnpStats1yearCsnpPktsTxLast

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401816: fltTcaIsisIsisCsnpStats5minCsnpPktsTxCum

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401817: fltTcaIsisIsisCsnpStats15minCsnpPktsTxCum

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401818: fltTcaIsisIsisCsnpStats1hCsnpPktsTxCum

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401819: fltTcaIsisIsisCsnpStats1dCsnpPktsTxCum

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401820: fltTcaIsisIsisCsnpStats1wCsnpPktsTxCum

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401821: fltTcaIsisIsisCsnpStats1moCsnpPktsTxCum

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401822: fltTcaIsisIsisCsnpStats1qtrCsnpPktsTxCum

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401823: fltTcaIsisIsisCsnpStats1yearCsnpPktsTxCum

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401824: fltTcaIsisIsisCsnpStats5minCsnpPktsTxPer

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401825: fltTcaIsisIsisCsnpStats15minCsnpPktsTxPer

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401826: fltTcaIsisIsisCsnpStats1hCsnpPktsTxPer

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401827: fltTcaIsisIsisCsnpStats1dCsnpPktsTxPer

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401828: fltTcaIsisIsisCsnpStats1wCsnpPktsTxPer

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401829: fltTcaIsisIsisCsnpStats1moCsnpPktsTxPer

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401830: fltTcaIsisIsisCsnpStats1qtrCsnpPktsTxPer

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401831: fltTcaIsisIsisCsnpStats1yearCsnpPktsTxPer

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401832: fltTcaIsisIsisCsnpStats5minCsnpPktsTxMin

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401833: fltTcaIsisIsisCsnpStats15minCsnpPktsTxMin

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401834: fltTcaIsisIsisCsnpStats1hCsnpPktsTxMin

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401835: fltTcaIsisIsisCsnpStats1dCsnpPktsTxMin

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401836: fltTcaIsisIsisCsnpStats1wCsnpPktsTxMin

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401837: fltTcaIsisIsisCsnpStats1moCsnpPktsTxMin

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401838: fltTcaIsisIsisCsnpStats1qtrCsnpPktsTxMin

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401839: fltTcaIsisIsisCsnpStats1yearCsnpPktsTxMin

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401840: fltTcaIsisIsisCsnpStats5minCsnpPktsTxMax

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401841: fltTcaIsisIsisCsnpStats15minCsnpPktsTxMax

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401842: fltTcaIsisIsisCsnpStats1hCsnpPktsTxMax

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401843: fltTcaIsisIsisCsnpStats1dCsnpPktsTxMax

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401844: fltTcaIsisIsisCsnpStats1wCsnpPktsTxMax

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401845: fltTcaIsisIsisCsnpStats1moCsnpPktsTxMax

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401846: fltTcaIsisIsisCsnpStats1qtrCsnpPktsTxMax

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401847: fltTcaIsisIsisCsnpStats1yearCsnpPktsTxMax

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401848: fltTcaIsisIsisCsnpStats5minCsnpPktsTxAvg

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401849: fltTcaIsisIsisCsnpStats15minCsnpPktsTxAvg

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401850: fltTcaIsisIsisCsnpStats1hCsnpPktsTxAvg

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401851: fltTcaIsisIsisCsnpStats1dCsnpPktsTxAvg

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401852: fltTcaIsisIsisCsnpStats1wCsnpPktsTxAvg

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401853: fltTcaIsisIsisCsnpStats1moCsnpPktsTxAvg

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401854: fltTcaIsisIsisCsnpStats1qtrCsnpPktsTxAvg

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401855: fltTcaIsisIsisCsnpStats1yearCsnpPktsTxAvg

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401880: fltTcaIsisIsisCsnpStats5minCsnpPktsTxTr

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401881: fltTcaIsisIsisCsnpStats15minCsnpPktsTxTr

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401882: fltTcaIsisIsisCsnpStats1hCsnpPktsTxTr

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401883: fltTcaIsisIsisCsnpStats1dCsnpPktsTxTr

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401884: fltTcaIsisIsisCsnpStats1wCsnpPktsTxTr

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401885: fltTcaIsisIsisCsnpStats1moCsnpPktsTxTr

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401886: fltTcaIsisIsisCsnpStats1qtrCsnpPktsTxTr

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401887: fltTcaIsisIsisCsnpStats1yearCsnpPktsTxTr

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401888: fltTcaIsisIsisCsnpStats5minCsnpPktsTxRate

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401889: fltTcaIsisIsisCsnpStats15minCsnpPktsTxRate

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401890: fltTcaIsisIsisCsnpStats1hCsnpPktsTxRate

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401891: fltTcaIsisIsisCsnpStats1dCsnpPktsTxRate

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401892: fltTcaIsisIsisCsnpStats1wCsnpPktsTxRate

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401893: fltTcaIsisIsisCsnpStats1moCsnpPktsTxRate

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401894: fltTcaIsisIsisCsnpStats1qtrCsnpPktsTxRate

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401895: fltTcaIsisIsisCsnpStats1yearCsnpPktsTxRate

Severity: variable

Explanation: This fault is caused by "CSNP Packets Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "CSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401968: fltTcaIsisIsisCsnpStats5minFastCsnpPktsRxLast

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401969: fltTcaIsisIsisCsnpStats15minFastCsnpPktsRxLast

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401970: fltTcaIsisIsisCsnpStats1hFastCsnpPktsRxLast

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401971: fltTcaIsisIsisCsnpStats1dFastCsnpPktsRxLast

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401972: fltTcaIsisIsisCsnpStats1wFastCsnpPktsRxLast

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401973: fltTcaIsisIsisCsnpStats1moFastCsnpPktsRxLast

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401974: fltTcaIsisIsisCsnpStats1qtrFastCsnpPktsRxLast

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401975: fltTcaIsisIsisCsnpStats1yearFastCsnpPktsRxLast

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401984: fltTcaIsisIsisCsnpStats5minFastCsnpPktsRxCum

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401985: fltTcaIsisIsisCsnpStats15minFastCsnpPktsRxCum

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401986: fltTcaIsisIsisCsnpStats1hFastCsnpPktsRxCum

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401987: fltTcaIsisIsisCsnpStats1dFastCsnpPktsRxCum

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401988: fltTcaIsisIsisCsnpStats1wFastCsnpPktsRxCum

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401989: fltTcaIsisIsisCsnpStats1moFastCsnpPktsRxCum

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401990: fltTcaIsisIsisCsnpStats1qtrFastCsnpPktsRxCum

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401991: fltTcaIsisIsisCsnpStats1yearFastCsnpPktsRxCum

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401992: fltTcaIsisIsisCsnpStats5minFastCsnpPktsRxPer

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401993: fltTcaIsisIsisCsnpStats15minFastCsnpPktsRxPer

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401994: fltTcaIsisIsisCsnpStats1hFastCsnpPktsRxPer

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401995: fltTcaIsisIsisCsnpStats1dFastCsnpPktsRxPer

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401996: fltTcaIsisIsisCsnpStats1wFastCsnpPktsRxPer

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401997: fltTcaIsisIsisCsnpStats1moFastCsnpPktsRxPer

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401998: fltTcaIsisIsisCsnpStats1qtrFastCsnpPktsRxPer

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F401999: fltTcaIsisIsisCsnpStats1yearFastCsnpPktsRxPer

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402000: fltTcaIsisIsisCsnpStats5minFastCsnpPktsRxMin

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402001: fltTcaIsisIsisCsnpStats15minFastCsnpPktsRxMin

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402002: fltTcaIsisIsisCsnpStats1hFastCsnpPktsRxMin

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402003: fltTcaIsisIsisCsnpStats1dFastCsnpPktsRxMin

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402004: fltTcaIsisIsisCsnpStats1wFastCsnpPktsRxMin

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402005: fltTcaIsisIsisCsnpStats1moFastCsnpPktsRxMin

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402006: fltTcaIsisIsisCsnpStats1qtrFastCsnpPktsRxMin

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402007: fltTcaIsisIsisCsnpStats1yearFastCsnpPktsRxMin

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402008: fltTcaIsisIsisCsnpStats5minFastCsnpPktsRxMax

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402009: fltTcaIsisIsisCsnpStats15minFastCsnpPktsRxMax

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402010: fltTcaIsisIsisCsnpStats1hFastCsnpPktsRxMax

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402011: fltTcaIsisIsisCsnpStats1dFastCsnpPktsRxMax

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402012: fltTcaIsisIsisCsnpStats1wFastCsnpPktsRxMax

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402013: fltTcaIsisIsisCsnpStats1moFastCsnpPktsRxMax

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402014: fltTcaIsisIsisCsnpStats1qtrFastCsnpPktsRxMax

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402015: fltTcaIsisIsisCsnpStats1yearFastCsnpPktsRxMax

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402016: fltTcaIsisIsisCsnpStats5minFastCsnpPktsRxAvg

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402017: fltTcaIsisIsisCsnpStats15minFastCsnpPktsRxAvg

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402018: fltTcaIsisIsisCsnpStats1hFastCsnpPktsRxAvg

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402019: fltTcaIsisIsisCsnpStats1dFastCsnpPktsRxAvg

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402020: fltTcaIsisIsisCsnpStats1wFastCsnpPktsRxAvg

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402021: fltTcaIsisIsisCsnpStats1moFastCsnpPktsRxAvg

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402022: fltTcaIsisIsisCsnpStats1qtrFastCsnpPktsRxAvg

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402023: fltTcaIsisIsisCsnpStats1yearFastCsnpPktsRxAvg

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402048: fltTcaIsisIsisCsnpStats5minFastCsnpPktsRxTr

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402049: fltTcaIsisIsisCsnpStats15minFastCsnpPktsRxTr

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402050: fltTcaIsisIsisCsnpStats1hFastCsnpPktsRxTr

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402051: fltTcaIsisIsisCsnpStats1dFastCsnpPktsRxTr

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402052: fltTcaIsisIsisCsnpStats1wFastCsnpPktsRxTr

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402053: fltTcaIsisIsisCsnpStats1moFastCsnpPktsRxTr

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402054: fltTcaIsisIsisCsnpStats1qtrFastCsnpPktsRxTr

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402055: fltTcaIsisIsisCsnpStats1yearFastCsnpPktsRxTr

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402056: fltTcaIsisIsisCsnpStats5minFastCsnpPktsRxRate

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402057: fltTcaIsisIsisCsnpStats15minFastCsnpPktsRxRate

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402058: fltTcaIsisIsisCsnpStats1hFastCsnpPktsRxRate

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402059: fltTcaIsisIsisCsnpStats1dFastCsnpPktsRxRate

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402060: fltTcaIsisIsisCsnpStats1wFastCsnpPktsRxRate

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402061: fltTcaIsisIsisCsnpStats1moFastCsnpPktsRxRate

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402062: fltTcaIsisIsisCsnpStats1qtrFastCsnpPktsRxRate

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402063: fltTcaIsisIsisCsnpStats1yearFastCsnpPktsRxRate

Severity: variable

Explanation: This fault is caused by "Fast CSNP Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast CSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402136: fltTcaIsisIsisLanStats5minLanIIHPktsAuthErrLast

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402137: fltTcaIsisIsisLanStats15minLanIIHPktsAuthErrLast

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402138: fltTcaIsisIsisLanStats1hLanIIHPktsAuthErrLast

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402139: fltTcaIsisIsisLanStats1dLanIIHPktsAuthErrLast

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402140: fltTcaIsisIsisLanStats1wLanIIHPktsAuthErrLast

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402141: fltTcaIsisIsisLanStats1moLanIIHPktsAuthErrLast

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402142: fltTcaIsisIsisLanStats1qtrLanIIHPktsAuthErrLast

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402143: fltTcaIsisIsisLanStats1yearLanIIHPktsAuthErrLast

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402152: fltTcaIsisIsisLanStats5minLanIIHPktsAuthErrCum

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402153: fltTcaIsisIsisLanStats15minLanIIHPktsAuthErrCum

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402154: fltTcaIsisIsisLanStats1hLanIIHPktsAuthErrCum

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402155: fltTcaIsisIsisLanStats1dLanIIHPktsAuthErrCum

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402156: fltTcaIsisIsisLanStats1wLanIIHPktsAuthErrCum

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402157: fltTcaIsisIsisLanStats1moLanIIHPktsAuthErrCum

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402158: fltTcaIsisIsisLanStats1qtrLanIIHPktsAuthErrCum

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402159: fltTcaIsisIsisLanStats1yearLanIIHPktsAuthErrCum

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402160: fltTcaIsisIsisLanStats5minLanIIHPktsAuthErrPer

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402161: fltTcaIsisIsisLanStats15minLanIIHPktsAuthErrPer

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402162: fltTcaIsisIsisLanStats1hLanIIHPktsAuthErrPer

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402163: fltTcaIsisIsisLanStats1dLanIIHPktsAuthErrPer

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402164: fltTcaIsisIsisLanStats1wLanIIHPktsAuthErrPer

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402165: fltTcaIsisIsisLanStats1moLanIIHPktsAuthErrPer

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402166: fltTcaIsisIsisLanStats1qtrLanIIHPktsAuthErrPer

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402167: fltTcaIsisIsisLanStats1yearLanIIHPktsAuthErrPer

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402168: fltTcaIsisIsisLanStats5minLanIIHPktsAuthErrMin

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402169: fltTcaIsisIsisLanStats15minLanIIHPktsAuthErrMin

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402170: fltTcaIsisIsisLanStats1hLanIIHPktsAuthErrMin

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402171: fltTcaIsisIsisLanStats1dLanIIHPktsAuthErrMin

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402172: fltTcaIsisIsisLanStats1wLanIIHPktsAuthErrMin

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402173: fltTcaIsisIsisLanStats1moLanIIHPktsAuthErrMin

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402174: fltTcaIsisIsisLanStats1qtrLanIIHPktsAuthErrMin

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402175: fltTcaIsisIsisLanStats1yearLanIIHPktsAuthErrMin

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402176: fltTcaIsisIsisLanStats5minLanIIHPktsAuthErrMax

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402177: fltTcaIsisIsisLanStats15minLanIIHPktsAuthErrMax

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402178: fltTcaIsisIsisLanStats1hLanIIHPktsAuthErrMax

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402179: fltTcaIsisIsisLanStats1dLanIIHPktsAuthErrMax

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402180: fltTcaIsisIsisLanStats1wLanIIHPktsAuthErrMax

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402181: fltTcaIsisIsisLanStats1moLanIIHPktsAuthErrMax

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402182: fltTcaIsisIsisLanStats1qtrLanIIHPktsAuthErrMax

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402183: fltTcaIsisIsisLanStats1yearLanIIHPktsAuthErrMax

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402184: fltTcaIsisIsisLanStats5minLanIIHPktsAuthErrAvg

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402185: fltTcaIsisIsisLanStats15minLanIIHPktsAuthErrAvg

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402186: fltTcaIsisIsisLanStats1hLanIIHPktsAuthErrAvg

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402187: fltTcaIsisIsisLanStats1dLanIIHPktsAuthErrAvg

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402188: fltTcaIsisIsisLanStats1wLanIIHPktsAuthErrAvg

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402189: fltTcaIsisIsisLanStats1moLanIIHPktsAuthErrAvg

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402190: fltTcaIsisIsisLanStats1qtrLanIIHPktsAuthErrAvg

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402191: fltTcaIsisIsisLanStats1yearLanIIHPktsAuthErrAvg

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4022: fltCloudRsSubnetToCtxResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F402216: fltTcaIsisIsisLanStats5minLanIIHPktsAuthErrTr

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402217: fltTcaIsisIsisLanStats15minLanIIHPktsAuthErrTr

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402218: fltTcaIsisIsisLanStats1hLanIIHPktsAuthErrTr

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402219: fltTcaIsisIsisLanStats1dLanIIHPktsAuthErrTr

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402220: fltTcaIsisIsisLanStats1wLanIIHPktsAuthErrTr

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402221: fltTcaIsisIsisLanStats1moLanIIHPktsAuthErrTr

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402222: fltTcaIsisIsisLanStats1qtrLanIIHPktsAuthErrTr

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402223: fltTcaIsisIsisLanStats1yearLanIIHPktsAuthErrTr

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402224: fltTcaIsisIsisLanStats5minLanIIHPktsAuthErrRate

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402225: fltTcaIsisIsisLanStats15minLanIIHPktsAuthErrRate

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402226: fltTcaIsisIsisLanStats1hLanIIHPktsAuthErrRate

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402227: fltTcaIsisIsisLanStats1dLanIIHPktsAuthErrRate

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402228: fltTcaIsisIsisLanStats1wLanIIHPktsAuthErrRate

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402229: fltTcaIsisIsisLanStats1moLanIIHPktsAuthErrRate

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402230: fltTcaIsisIsisLanStats1qtrLanIIHPktsAuthErrRate

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402231: fltTcaIsisIsisLanStats1yearLanIIHPktsAuthErrRate

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Authentication Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402304: fltTcaIsisIsisLanStats5minLanIIHPktsMiscErrLast

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402305: fltTcaIsisIsisLanStats15minLanIIHPktsMiscErrLast

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402306: fltTcaIsisIsisLanStats1hLanIIHPktsMiscErrLast

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402307: fltTcaIsisIsisLanStats1dLanIIHPktsMiscErrLast

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402308: fltTcaIsisIsisLanStats1wLanIIHPktsMiscErrLast

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402309: fltTcaIsisIsisLanStats1moLanIIHPktsMiscErrLast

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402310: fltTcaIsisIsisLanStats1qtrLanIIHPktsMiscErrLast

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402311: fltTcaIsisIsisLanStats1yearLanIIHPktsMiscErrLast

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402320: fltTcaIsisIsisLanStats5minLanIIHPktsMiscErrCum

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402321: fltTcaIsisIsisLanStats15minLanIIHPktsMiscErrCum

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402322: fltTcaIsisIsisLanStats1hLanIIHPktsMiscErrCum

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402323: fltTcaIsisIsisLanStats1dLanIIHPktsMiscErrCum

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402324: fltTcaIsisIsisLanStats1wLanIIHPktsMiscErrCum

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402325: fltTcaIsisIsisLanStats1moLanIIHPktsMiscErrCum

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402326: fltTcaIsisIsisLanStats1qtrLanIIHPktsMiscErrCum

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402327: fltTcaIsisIsisLanStats1yearLanIIHPktsMiscErrCum

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402328: fltTcaIsisIsisLanStats5minLanIIHPktsMiscErrPer

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402329: fltTcaIsisIsisLanStats15minLanIIHPktsMiscErrPer

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402330: fltTcaIsisIsisLanStats1hLanIIHPktsMiscErrPer

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402331: fltTcaIsisIsisLanStats1dLanIIHPktsMiscErrPer

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402332: fltTcaIsisIsisLanStats1wLanIIHPktsMiscErrPer

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402333: fltTcaIsisIsisLanStats1moLanIIHPktsMiscErrPer

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402334: fltTcaIsisIsisLanStats1qtrLanIIHPktsMiscErrPer

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402335: fltTcaIsisIsisLanStats1yearLanIIHPktsMiscErrPer

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402336: fltTcaIsisIsisLanStats5minLanIIHPktsMiscErrMin

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402337: fltTcaIsisIsisLanStats15minLanIIHPktsMiscErrMin

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402338: fltTcaIsisIsisLanStats1hLanIIHPktsMiscErrMin

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402339: fltTcaIsisIsisLanStats1dLanIIHPktsMiscErrMin

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402340: fltTcaIsisIsisLanStats1wLanIIHPktsMiscErrMin

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402341: fltTcaIsisIsisLanStats1moLanIIHPktsMiscErrMin

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402342: fltTcaIsisIsisLanStats1qtrLanIIHPktsMiscErrMin

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402343: fltTcaIsisIsisLanStats1yearLanIIHPktsMiscErrMin

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402344: fltTcaIsisIsisLanStats5minLanIIHPktsMiscErrMax

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402345: fltTcaIsisIsisLanStats15minLanIIHPktsMiscErrMax

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402346: fltTcaIsisIsisLanStats1hLanIIHPktsMiscErrMax

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402347: fltTcaIsisIsisLanStats1dLanIIHPktsMiscErrMax

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402348: fltTcaIsisIsisLanStats1wLanIIHPktsMiscErrMax

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402349: fltTcaIsisIsisLanStats1moLanIIHPktsMiscErrMax

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402350: fltTcaIsisIsisLanStats1qtrLanIIHPktsMiscErrMax

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402351: fltTcaIsisIsisLanStats1yearLanIIHPktsMiscErrMax

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402352: fltTcaIsisIsisLanStats5minLanIIHPktsMiscErrAvg

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402353: fltTcaIsisIsisLanStats15minLanIIHPktsMiscErrAvg

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402354: fltTcaIsisIsisLanStats1hLanIIHPktsMiscErrAvg

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402355: fltTcaIsisIsisLanStats1dLanIIHPktsMiscErrAvg

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402356: fltTcaIsisIsisLanStats1wLanIIHPktsMiscErrAvg

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402357: fltTcaIsisIsisLanStats1moLanIIHPktsMiscErrAvg

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402358: fltTcaIsisIsisLanStats1qtrLanIIHPktsMiscErrAvg

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402359: fltTcaIsisIsisLanStats1yearLanIIHPktsMiscErrAvg

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402384: fltTcaIsisIsisLanStats5minLanIIHPktsMiscErrTr

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402385: fltTcaIsisIsisLanStats15minLanIIHPktsMiscErrTr

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402386: fltTcaIsisIsisLanStats1hLanIIHPktsMiscErrTr

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402387: fltTcaIsisIsisLanStats1dLanIIHPktsMiscErrTr

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402388: fltTcaIsisIsisLanStats1wLanIIHPktsMiscErrTr

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402389: fltTcaIsisIsisLanStats1moLanIIHPktsMiscErrTr

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402390: fltTcaIsisIsisLanStats1qtrLanIIHPktsMiscErrTr

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402391: fltTcaIsisIsisLanStats1yearLanIIHPktsMiscErrTr

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402392: fltTcaIsisIsisLanStats5minLanIIHPktsMiscErrRate

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402393: fltTcaIsisIsisLanStats15minLanIIHPktsMiscErrRate

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402394: fltTcaIsisIsisLanStats1hLanIIHPktsMiscErrRate

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402395: fltTcaIsisIsisLanStats1dLanIIHPktsMiscErrRate

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402396: fltTcaIsisIsisLanStats1wLanIIHPktsMiscErrRate

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402397: fltTcaIsisIsisLanStats1moLanIIHPktsMiscErrRate

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402398: fltTcaIsisIsisLanStats1qtrLanIIHPktsMiscErrRate

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402399: fltTcaIsisIsisLanStats1yearLanIIHPktsMiscErrRate

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets with Miscellaneous Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4024: fltHcloudDiscVendorCInstOperDiscVendorCInstOperStateDown

Severity: major

Explanation: This fault occurs when 3rd party FW and LB VM has issue.

Recommended Action: None set.

F402472: fltTcaIsisIsisLanStats5minLanIIHPktsRxLast

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402473: fltTcaIsisIsisLanStats15minLanIIHPktsRxLast

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402474: fltTcaIsisIsisLanStats1hLanIIHPktsRxLast

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402475: fltTcaIsisIsisLanStats1dLanIIHPktsRxLast

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402476: fltTcaIsisIsisLanStats1wLanIIHPktsRxLast

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402477: fltTcaIsisIsisLanStats1moLanIIHPktsRxLast

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402478: fltTcaIsisIsisLanStats1qtrLanIIHPktsRxLast

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402479: fltTcaIsisIsisLanStats1yearLanIIHPktsRxLast

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402488: fltTcaIsisIsisLanStats5minLanIIHPktsRxCum

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402489: fltTcaIsisIsisLanStats15minLanIIHPktsRxCum

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402490: fltTcaIsisIsisLanStats1hLanIIHPktsRxCum

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402491: fltTcaIsisIsisLanStats1dLanIIHPktsRxCum

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402492: fltTcaIsisIsisLanStats1wLanIIHPktsRxCum

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402493: fltTcaIsisIsisLanStats1moLanIIHPktsRxCum

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402494: fltTcaIsisIsisLanStats1qtrLanIIHPktsRxCum

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402495: fltTcaIsisIsisLanStats1yearLanIIHPktsRxCum

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402496: fltTcaIsisIsisLanStats5minLanIIHPktsRxPer

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402497: fltTcaIsisIsisLanStats15minLanIIHPktsRxPer

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402498: fltTcaIsisIsisLanStats1hLanIIHPktsRxPer

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402499: fltTcaIsisIsisLanStats1dLanIIHPktsRxPer

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4025: fltHcloudDiscEpOperDiscEpOperStateDown

Severity: major

Explanation: This fault occurs when 3rd party FW and LB NIC has issue.

Recommended Action: None set.

F402500: fltTcaIsisIsisLanStats1wLanIIHPktsRxPer

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402501: fltTcaIsisIsisLanStats1moLanIIHPktsRxPer

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402502: fltTcaIsisIsisLanStats1qtrLanIIHPktsRxPer

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402503: fltTcaIsisIsisLanStats1yearLanIIHPktsRxPer

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402504: fltTcaIsisIsisLanStats5minLanIIHPktsRxMin

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402505: fltTcaIsisIsisLanStats15minLanIIHPktsRxMin

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402506: fltTcaIsisIsisLanStats1hLanIIHPktsRxMin

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402507: fltTcaIsisIsisLanStats1dLanIIHPktsRxMin

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402508: fltTcaIsisIsisLanStats1wLanIIHPktsRxMin

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402509: fltTcaIsisIsisLanStats1moLanIIHPktsRxMin

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402510: fltTcaIsisIsisLanStats1qtrLanIIHPktsRxMin

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402511: fltTcaIsisIsisLanStats1yearLanIIHPktsRxMin

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402512: fltTcaIsisIsisLanStats5minLanIIHPktsRxMax

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402513: fltTcaIsisIsisLanStats15minLanIIHPktsRxMax

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402514: fltTcaIsisIsisLanStats1hLanIIHPktsRxMax

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402515: fltTcaIsisIsisLanStats1dLanIIHPktsRxMax

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402516: fltTcaIsisIsisLanStats1wLanIIHPktsRxMax

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402517: fltTcaIsisIsisLanStats1moLanIIHPktsRxMax

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402518: fltTcaIsisIsisLanStats1qtrLanIIHPktsRxMax

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402519: fltTcaIsisIsisLanStats1yearLanIIHPktsRxMax

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402520: fltTcaIsisIsisLanStats5minLanIIHPktsRxAvg

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402521: fltTcaIsisIsisLanStats15minLanIIHPktsRxAvg

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402522: fltTcaIsisIsisLanStats1hLanIIHPktsRxAvg

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402523: fltTcaIsisIsisLanStats1dLanIIHPktsRxAvg

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402524: fltTcaIsisIsisLanStats1wLanIIHPktsRxAvg

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402525: fltTcaIsisIsisLanStats1moLanIIHPktsRxAvg

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402526: fltTcaIsisIsisLanStats1qtrLanIIHPktsRxAvg

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402527: fltTcaIsisIsisLanStats1yearLanIIHPktsRxAvg

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402552: fltTcaIsisIsisLanStats5minLanIIHPktsRxTr

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402553: fltTcaIsisIsisLanStats15minLanIIHPktsRxTr

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402554: fltTcaIsisIsisLanStats1hLanIIHPktsRxTr

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402555: fltTcaIsisIsisLanStats1dLanIIHPktsRxTr

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402556: fltTcaIsisIsisLanStats1wLanIIHPktsRxTr

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402557: fltTcaIsisIsisLanStats1moLanIIHPktsRxTr

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402558: fltTcaIsisIsisLanStats1qtrLanIIHPktsRxTr

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402559: fltTcaIsisIsisLanStats1yearLanIIHPktsRxTr

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402560: fltTcaIsisIsisLanStats5minLanIIHPktsRxRate

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402561: fltTcaIsisIsisLanStats15minLanIIHPktsRxRate

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402562: fltTcaIsisIsisLanStats1hLanIIHPktsRxRate

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402563: fltTcaIsisIsisLanStats1dLanIIHPktsRxRate

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402564: fltTcaIsisIsisLanStats1wLanIIHPktsRxRate

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402565: fltTcaIsisIsisLanStats1moLanIIHPktsRxRate

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402566: fltTcaIsisIsisLanStats1qtrLanIIHPktsRxRate

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402567: fltTcaIsisIsisLanStats1yearLanIIHPktsRxRate

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4026: fltCloudRsExtCtxProfileToCtxResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F402640: fltTcaIsisIsisLanStats5minLanIIHPktsTxLast

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402641: fltTcaIsisIsisLanStats15minLanIIHPktsTxLast

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402642: fltTcaIsisIsisLanStats1hLanIIHPktsTxLast

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402643: fltTcaIsisIsisLanStats1dLanIIHPktsTxLast

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402644: fltTcaIsisIsisLanStats1wLanIIHPktsTxLast

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402645: fltTcaIsisIsisLanStats1moLanIIHPktsTxLast

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402646: fltTcaIsisIsisLanStats1qtrLanIIHPktsTxLast

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402647: fltTcaIsisIsisLanStats1yearLanIIHPktsTxLast

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402656: fltTcaIsisIsisLanStats5minLanIIHPktsTxCum

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402657: fltTcaIsisIsisLanStats15minLanIIHPktsTxCum

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402658: fltTcaIsisIsisLanStats1hLanIIHPktsTxCum

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402659: fltTcaIsisIsisLanStats1dLanIIHPktsTxCum

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402660: fltTcaIsisIsisLanStats1wLanIIHPktsTxCum

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402661: fltTcaIsisIsisLanStats1moLanIIHPktsTxCum

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402662: fltTcaIsisIsisLanStats1qtrLanIIHPktsTxCum

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402663: fltTcaIsisIsisLanStats1yearLanIIHPktsTxCum

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402664: fltTcaIsisIsisLanStats5minLanIIHPktsTxPer

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402665: fltTcaIsisIsisLanStats15minLanIIHPktsTxPer

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402666: fltTcaIsisIsisLanStats1hLanIIHPktsTxPer

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402667: fltTcaIsisIsisLanStats1dLanIIHPktsTxPer

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402668: fltTcaIsisIsisLanStats1wLanIIHPktsTxPer

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402669: fltTcaIsisIsisLanStats1moLanIIHPktsTxPer

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402670: fltTcaIsisIsisLanStats1qtrLanIIHPktsTxPer

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402671: fltTcaIsisIsisLanStats1yearLanIIHPktsTxPer

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402672: fltTcaIsisIsisLanStats5minLanIIHPktsTxMin

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402673: fltTcaIsisIsisLanStats15minLanIIHPktsTxMin

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402674: fltTcaIsisIsisLanStats1hLanIIHPktsTxMin

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402675: fltTcaIsisIsisLanStats1dLanIIHPktsTxMin

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402676: fltTcaIsisIsisLanStats1wLanIIHPktsTxMin

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402677: fltTcaIsisIsisLanStats1moLanIIHPktsTxMin

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402678: fltTcaIsisIsisLanStats1qtrLanIIHPktsTxMin

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402679: fltTcaIsisIsisLanStats1yearLanIIHPktsTxMin

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402680: fltTcaIsisIsisLanStats5minLanIIHPktsTxMax

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402681: fltTcaIsisIsisLanStats15minLanIIHPktsTxMax

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402682: fltTcaIsisIsisLanStats1hLanIIHPktsTxMax

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402683: fltTcaIsisIsisLanStats1dLanIIHPktsTxMax

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402684: fltTcaIsisIsisLanStats1wLanIIHPktsTxMax

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402685: fltTcaIsisIsisLanStats1moLanIIHPktsTxMax

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402686: fltTcaIsisIsisLanStats1qtrLanIIHPktsTxMax

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402687: fltTcaIsisIsisLanStats1yearLanIIHPktsTxMax

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402688: fltTcaIsisIsisLanStats5minLanIIHPktsTxAvg

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402689: fltTcaIsisIsisLanStats15minLanIIHPktsTxAvg

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402690: fltTcaIsisIsisLanStats1hLanIIHPktsTxAvg

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402691: fltTcaIsisIsisLanStats1dLanIIHPktsTxAvg

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402692: fltTcaIsisIsisLanStats1wLanIIHPktsTxAvg

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402693: fltTcaIsisIsisLanStats1moLanIIHPktsTxAvg

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402694: fltTcaIsisIsisLanStats1qtrLanIIHPktsTxAvg

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402695: fltTcaIsisIsisLanStats1yearLanIIHPktsTxAvg

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4027: fltCloudRsExtCtxProfileToRegionResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F402720: fltTcaIsisIsisLanStats5minLanIIHPktsTxTr

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402721: fltTcaIsisIsisLanStats15minLanIIHPktsTxTr

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402722: fltTcaIsisIsisLanStats1hLanIIHPktsTxTr

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402723: fltTcaIsisIsisLanStats1dLanIIHPktsTxTr

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402724: fltTcaIsisIsisLanStats1wLanIIHPktsTxTr

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402725: fltTcaIsisIsisLanStats1moLanIIHPktsTxTr

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402726: fltTcaIsisIsisLanStats1qtrLanIIHPktsTxTr

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402727: fltTcaIsisIsisLanStats1yearLanIIHPktsTxTr

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402728: fltTcaIsisIsisLanStats5minLanIIHPktsTxRate

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402729: fltTcaIsisIsisLanStats15minLanIIHPktsTxRate

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402730: fltTcaIsisIsisLanStats1hLanIIHPktsTxRate

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402731: fltTcaIsisIsisLanStats1dLanIIHPktsTxRate

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402732: fltTcaIsisIsisLanStats1wLanIIHPktsTxRate

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402733: fltTcaIsisIsisLanStats1moLanIIHPktsTxRate

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402734: fltTcaIsisIsisLanStats1qtrLanIIHPktsTxRate

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402735: fltTcaIsisIsisLanStats1yearLanIIHPktsTxRate

Severity: variable

Explanation: This fault is caused by "LAN IIH Packets Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LAN IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402808: fltTcaIsisIsisLspErrStats5minLspPktsAuthErrLast

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402809: fltTcaIsisIsisLspErrStats15minLspPktsAuthErrLast

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402810: fltTcaIsisIsisLspErrStats1hLspPktsAuthErrLast

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402811: fltTcaIsisIsisLspErrStats1dLspPktsAuthErrLast

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402812: fltTcaIsisIsisLspErrStats1wLspPktsAuthErrLast

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402813: fltTcaIsisIsisLspErrStats1moLspPktsAuthErrLast

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402814: fltTcaIsisIsisLspErrStats1qtrLspPktsAuthErrLast

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402815: fltTcaIsisIsisLspErrStats1yearLspPktsAuthErrLast

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402824: fltTcaIsisIsisLspErrStats5minLspPktsAuthErrCum

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402825: fltTcaIsisIsisLspErrStats15minLspPktsAuthErrCum

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402826: fltTcaIsisIsisLspErrStats1hLspPktsAuthErrCum

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402827: fltTcaIsisIsisLspErrStats1dLspPktsAuthErrCum

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402828: fltTcaIsisIsisLspErrStats1wLspPktsAuthErrCum

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402829: fltTcaIsisIsisLspErrStats1moLspPktsAuthErrCum

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402830: fltTcaIsisIsisLspErrStats1qtrLspPktsAuthErrCum

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402831: fltTcaIsisIsisLspErrStats1yearLspPktsAuthErrCum

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402832: fltTcaIsisIsisLspErrStats5minLspPktsAuthErrPer

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402833: fltTcaIsisIsisLspErrStats15minLspPktsAuthErrPer

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402834: fltTcaIsisIsisLspErrStats1hLspPktsAuthErrPer

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402835: fltTcaIsisIsisLspErrStats1dLspPktsAuthErrPer

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402836: fltTcaIsisIsisLspErrStats1wLspPktsAuthErrPer

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402837: fltTcaIsisIsisLspErrStats1moLspPktsAuthErrPer

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402838: fltTcaIsisIsisLspErrStats1qtrLspPktsAuthErrPer

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402839: fltTcaIsisIsisLspErrStats1yearLspPktsAuthErrPer

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402840: fltTcaIsisIsisLspErrStats5minLspPktsAuthErrMin

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402841: fltTcaIsisIsisLspErrStats15minLspPktsAuthErrMin

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402842: fltTcaIsisIsisLspErrStats1hLspPktsAuthErrMin

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402843: fltTcaIsisIsisLspErrStats1dLspPktsAuthErrMin

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402844: fltTcaIsisIsisLspErrStats1wLspPktsAuthErrMin

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402845: fltTcaIsisIsisLspErrStats1moLspPktsAuthErrMin

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402846: fltTcaIsisIsisLspErrStats1qtrLspPktsAuthErrMin

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402847: fltTcaIsisIsisLspErrStats1yearLspPktsAuthErrMin

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402848: fltTcaIsisIsisLspErrStats5minLspPktsAuthErrMax

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402849: fltTcaIsisIsisLspErrStats15minLspPktsAuthErrMax

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402850: fltTcaIsisIsisLspErrStats1hLspPktsAuthErrMax

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402851: fltTcaIsisIsisLspErrStats1dLspPktsAuthErrMax

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402852: fltTcaIsisIsisLspErrStats1wLspPktsAuthErrMax

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402853: fltTcaIsisIsisLspErrStats1moLspPktsAuthErrMax

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402854: fltTcaIsisIsisLspErrStats1qtrLspPktsAuthErrMax

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402855: fltTcaIsisIsisLspErrStats1yearLspPktsAuthErrMax

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402856: fltTcaIsisIsisLspErrStats5minLspPktsAuthErrAvg

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402857: fltTcaIsisIsisLspErrStats15minLspPktsAuthErrAvg

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402858: fltTcaIsisIsisLspErrStats1hLspPktsAuthErrAvg

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402859: fltTcaIsisIsisLspErrStats1dLspPktsAuthErrAvg

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402860: fltTcaIsisIsisLspErrStats1wLspPktsAuthErrAvg

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402861: fltTcaIsisIsisLspErrStats1moLspPktsAuthErrAvg

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402862: fltTcaIsisIsisLspErrStats1qtrLspPktsAuthErrAvg

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402863: fltTcaIsisIsisLspErrStats1yearLspPktsAuthErrAvg

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402888: fltTcaIsisIsisLspErrStats5minLspPktsAuthErrTr

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402889: fltTcaIsisIsisLspErrStats15minLspPktsAuthErrTr

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402890: fltTcaIsisIsisLspErrStats1hLspPktsAuthErrTr

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402891: fltTcaIsisIsisLspErrStats1dLspPktsAuthErrTr

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402892: fltTcaIsisIsisLspErrStats1wLspPktsAuthErrTr

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402893: fltTcaIsisIsisLspErrStats1moLspPktsAuthErrTr

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402894: fltTcaIsisIsisLspErrStats1qtrLspPktsAuthErrTr

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402895: fltTcaIsisIsisLspErrStats1yearLspPktsAuthErrTr

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402896: fltTcaIsisIsisLspErrStats5minLspPktsAuthErrRate

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402897: fltTcaIsisIsisLspErrStats15minLspPktsAuthErrRate

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402898: fltTcaIsisIsisLspErrStats1hLspPktsAuthErrRate

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402899: fltTcaIsisIsisLspErrStats1dLspPktsAuthErrRate

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402900: fltTcaIsisIsisLspErrStats1wLspPktsAuthErrRate

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402901: fltTcaIsisIsisLspErrStats1moLspPktsAuthErrRate

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402902: fltTcaIsisIsisLspErrStats1qtrLspPktsAuthErrRate

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402903: fltTcaIsisIsisLspErrStats1yearLspPktsAuthErrRate

Severity: variable

Explanation: This fault is caused by "LSP Packets with Authentication Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402976: fltTcaIsisIsisLspErrStats5minLspPktsMiscErrLast

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402977: fltTcaIsisIsisLspErrStats15minLspPktsMiscErrLast

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402978: fltTcaIsisIsisLspErrStats1hLspPktsMiscErrLast

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402979: fltTcaIsisIsisLspErrStats1dLspPktsMiscErrLast

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402980: fltTcaIsisIsisLspErrStats1wLspPktsMiscErrLast

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402981: fltTcaIsisIsisLspErrStats1moLspPktsMiscErrLast

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402982: fltTcaIsisIsisLspErrStats1qtrLspPktsMiscErrLast

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402983: fltTcaIsisIsisLspErrStats1yearLspPktsMiscErrLast

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402992: fltTcaIsisIsisLspErrStats5minLspPktsMiscErrCum

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402993: fltTcaIsisIsisLspErrStats15minLspPktsMiscErrCum

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402994: fltTcaIsisIsisLspErrStats1hLspPktsMiscErrCum

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402995: fltTcaIsisIsisLspErrStats1dLspPktsMiscErrCum

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402996: fltTcaIsisIsisLspErrStats1wLspPktsMiscErrCum

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402997: fltTcaIsisIsisLspErrStats1moLspPktsMiscErrCum

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402998: fltTcaIsisIsisLspErrStats1qtrLspPktsMiscErrCum

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F402999: fltTcaIsisIsisLspErrStats1yearLspPktsMiscErrCum

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403000: fltTcaIsisIsisLspErrStats5minLspPktsMiscErrPer

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403001: fltTcaIsisIsisLspErrStats15minLspPktsMiscErrPer

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403002: fltTcaIsisIsisLspErrStats1hLspPktsMiscErrPer

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403003: fltTcaIsisIsisLspErrStats1dLspPktsMiscErrPer

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403004: fltTcaIsisIsisLspErrStats1wLspPktsMiscErrPer

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403005: fltTcaIsisIsisLspErrStats1moLspPktsMiscErrPer

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403006: fltTcaIsisIsisLspErrStats1qtrLspPktsMiscErrPer

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403007: fltTcaIsisIsisLspErrStats1yearLspPktsMiscErrPer

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403008: fltTcaIsisIsisLspErrStats5minLspPktsMiscErrMin

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403009: fltTcaIsisIsisLspErrStats15minLspPktsMiscErrMin

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403010: fltTcaIsisIsisLspErrStats1hLspPktsMiscErrMin

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403011: fltTcaIsisIsisLspErrStats1dLspPktsMiscErrMin

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403012: fltTcaIsisIsisLspErrStats1wLspPktsMiscErrMin

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403013: fltTcaIsisIsisLspErrStats1moLspPktsMiscErrMin

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403014: fltTcaIsisIsisLspErrStats1qtrLspPktsMiscErrMin

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403015: fltTcaIsisIsisLspErrStats1yearLspPktsMiscErrMin

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403016: fltTcaIsisIsisLspErrStats5minLspPktsMiscErrMax

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403017: fltTcaIsisIsisLspErrStats15minLspPktsMiscErrMax

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403018: fltTcaIsisIsisLspErrStats1hLspPktsMiscErrMax

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403019: fltTcaIsisIsisLspErrStats1dLspPktsMiscErrMax

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403020: fltTcaIsisIsisLspErrStats1wLspPktsMiscErrMax

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403021: fltTcaIsisIsisLspErrStats1moLspPktsMiscErrMax

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403022: fltTcaIsisIsisLspErrStats1qtrLspPktsMiscErrMax

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403023: fltTcaIsisIsisLspErrStats1yearLspPktsMiscErrMax

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403024: fltTcaIsisIsisLspErrStats5minLspPktsMiscErrAvg

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403025: fltTcaIsisIsisLspErrStats15minLspPktsMiscErrAvg

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403026: fltTcaIsisIsisLspErrStats1hLspPktsMiscErrAvg

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403027: fltTcaIsisIsisLspErrStats1dLspPktsMiscErrAvg

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403028: fltTcaIsisIsisLspErrStats1wLspPktsMiscErrAvg

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403029: fltTcaIsisIsisLspErrStats1moLspPktsMiscErrAvg

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403030: fltTcaIsisIsisLspErrStats1qtrLspPktsMiscErrAvg

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403031: fltTcaIsisIsisLspErrStats1yearLspPktsMiscErrAvg

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403056: fltTcaIsisIsisLspErrStats5minLspPktsMiscErrTr

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403057: fltTcaIsisIsisLspErrStats15minLspPktsMiscErrTr

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403058: fltTcaIsisIsisLspErrStats1hLspPktsMiscErrTr

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403059: fltTcaIsisIsisLspErrStats1dLspPktsMiscErrTr

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403060: fltTcaIsisIsisLspErrStats1wLspPktsMiscErrTr

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403061: fltTcaIsisIsisLspErrStats1moLspPktsMiscErrTr

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403062: fltTcaIsisIsisLspErrStats1qtrLspPktsMiscErrTr

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403063: fltTcaIsisIsisLspErrStats1yearLspPktsMiscErrTr

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403064: fltTcaIsisIsisLspErrStats5minLspPktsMiscErrRate

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403065: fltTcaIsisIsisLspErrStats15minLspPktsMiscErrRate

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403066: fltTcaIsisIsisLspErrStats1hLspPktsMiscErrRate

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403067: fltTcaIsisIsisLspErrStats1dLspPktsMiscErrRate

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403068: fltTcaIsisIsisLspErrStats1wLspPktsMiscErrRate

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403069: fltTcaIsisIsisLspErrStats1moLspPktsMiscErrRate

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403070: fltTcaIsisIsisLspErrStats1qtrLspPktsMiscErrRate

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403071: fltTcaIsisIsisLspErrStats1yearLspPktsMiscErrRate

Severity: variable

Explanation: This fault is caused by "LSP Packets with Miscelcsnpeous Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403144: fltTcaIsisIsisLspStats5minFastLspPktsRxLast

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403145: fltTcaIsisIsisLspStats15minFastLspPktsRxLast

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403146: fltTcaIsisIsisLspStats1hFastLspPktsRxLast

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403147: fltTcaIsisIsisLspStats1dFastLspPktsRxLast

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403148: fltTcaIsisIsisLspStats1wFastLspPktsRxLast

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403149: fltTcaIsisIsisLspStats1moFastLspPktsRxLast

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403150: fltTcaIsisIsisLspStats1qtrFastLspPktsRxLast

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403151: fltTcaIsisIsisLspStats1yearFastLspPktsRxLast

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403160: fltTcaIsisIsisLspStats5minFastLspPktsRxCum

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403161: fltTcaIsisIsisLspStats15minFastLspPktsRxCum

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403162: fltTcaIsisIsisLspStats1hFastLspPktsRxCum

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403163: fltTcaIsisIsisLspStats1dFastLspPktsRxCum

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403164: fltTcaIsisIsisLspStats1wFastLspPktsRxCum

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403165: fltTcaIsisIsisLspStats1moFastLspPktsRxCum

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403166: fltTcaIsisIsisLspStats1qtrFastLspPktsRxCum

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403167: fltTcaIsisIsisLspStats1yearFastLspPktsRxCum

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403168: fltTcaIsisIsisLspStats5minFastLspPktsRxPer

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403169: fltTcaIsisIsisLspStats15minFastLspPktsRxPer

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403170: fltTcaIsisIsisLspStats1hFastLspPktsRxPer

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403171: fltTcaIsisIsisLspStats1dFastLspPktsRxPer

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403172: fltTcaIsisIsisLspStats1wFastLspPktsRxPer

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403173: fltTcaIsisIsisLspStats1moFastLspPktsRxPer

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403174: fltTcaIsisIsisLspStats1qtrFastLspPktsRxPer

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403175: fltTcaIsisIsisLspStats1yearFastLspPktsRxPer

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403176: fltTcaIsisIsisLspStats5minFastLspPktsRxMin

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403177: fltTcaIsisIsisLspStats15minFastLspPktsRxMin

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403178: fltTcaIsisIsisLspStats1hFastLspPktsRxMin

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403179: fltTcaIsisIsisLspStats1dFastLspPktsRxMin

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403180: fltTcaIsisIsisLspStats1wFastLspPktsRxMin

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403181: fltTcaIsisIsisLspStats1moFastLspPktsRxMin

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403182: fltTcaIsisIsisLspStats1qtrFastLspPktsRxMin

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403183: fltTcaIsisIsisLspStats1yearFastLspPktsRxMin

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403184: fltTcaIsisIsisLspStats5minFastLspPktsRxMax

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403185: fltTcaIsisIsisLspStats15minFastLspPktsRxMax

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403186: fltTcaIsisIsisLspStats1hFastLspPktsRxMax

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403187: fltTcaIsisIsisLspStats1dFastLspPktsRxMax

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403188: fltTcaIsisIsisLspStats1wFastLspPktsRxMax

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403189: fltTcaIsisIsisLspStats1moFastLspPktsRxMax

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403190: fltTcaIsisIsisLspStats1qtrFastLspPktsRxMax

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403191: fltTcaIsisIsisLspStats1yearFastLspPktsRxMax

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403192: fltTcaIsisIsisLspStats5minFastLspPktsRxAvg

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403193: fltTcaIsisIsisLspStats15minFastLspPktsRxAvg

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403194: fltTcaIsisIsisLspStats1hFastLspPktsRxAvg

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403195: fltTcaIsisIsisLspStats1dFastLspPktsRxAvg

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403196: fltTcaIsisIsisLspStats1wFastLspPktsRxAvg

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403197: fltTcaIsisIsisLspStats1moFastLspPktsRxAvg

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403198: fltTcaIsisIsisLspStats1qtrFastLspPktsRxAvg

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403199: fltTcaIsisIsisLspStats1yearFastLspPktsRxAvg

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403224: fltTcaIsisIsisLspStats5minFastLspPktsRxTr

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403225: fltTcaIsisIsisLspStats15minFastLspPktsRxTr

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403226: fltTcaIsisIsisLspStats1hFastLspPktsRxTr

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403227: fltTcaIsisIsisLspStats1dFastLspPktsRxTr

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403228: fltTcaIsisIsisLspStats1wFastLspPktsRxTr

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403229: fltTcaIsisIsisLspStats1moFastLspPktsRxTr

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403230: fltTcaIsisIsisLspStats1qtrFastLspPktsRxTr

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403231: fltTcaIsisIsisLspStats1yearFastLspPktsRxTr

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403232: fltTcaIsisIsisLspStats5minFastLspPktsRxRate

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403233: fltTcaIsisIsisLspStats15minFastLspPktsRxRate

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403234: fltTcaIsisIsisLspStats1hFastLspPktsRxRate

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403235: fltTcaIsisIsisLspStats1dFastLspPktsRxRate

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403236: fltTcaIsisIsisLspStats1wFastLspPktsRxRate

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403237: fltTcaIsisIsisLspStats1moFastLspPktsRxRate

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403238: fltTcaIsisIsisLspStats1qtrFastLspPktsRxRate

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403239: fltTcaIsisIsisLspStats1yearFastLspPktsRxRate

Severity: variable

Explanation: This fault is caused by "Fast LSP Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Fast LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403312: fltTcaIsisIsisLspStats5minLspPktsRetxLast

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403313: fltTcaIsisIsisLspStats15minLspPktsRetxLast

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403314: fltTcaIsisIsisLspStats1hLspPktsRetxLast

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403315: fltTcaIsisIsisLspStats1dLspPktsRetxLast

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403316: fltTcaIsisIsisLspStats1wLspPktsRetxLast

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403317: fltTcaIsisIsisLspStats1moLspPktsRetxLast

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403318: fltTcaIsisIsisLspStats1qtrLspPktsRetxLast

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403319: fltTcaIsisIsisLspStats1yearLspPktsRetxLast

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403328: fltTcaIsisIsisLspStats5minLspPktsRetxCum

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403329: fltTcaIsisIsisLspStats15minLspPktsRetxCum

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403330: fltTcaIsisIsisLspStats1hLspPktsRetxCum

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403331: fltTcaIsisIsisLspStats1dLspPktsRetxCum

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403332: fltTcaIsisIsisLspStats1wLspPktsRetxCum

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403333: fltTcaIsisIsisLspStats1moLspPktsRetxCum

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403334: fltTcaIsisIsisLspStats1qtrLspPktsRetxCum

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403335: fltTcaIsisIsisLspStats1yearLspPktsRetxCum

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403336: fltTcaIsisIsisLspStats5minLspPktsRetxPer

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403337: fltTcaIsisIsisLspStats15minLspPktsRetxPer

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403338: fltTcaIsisIsisLspStats1hLspPktsRetxPer

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403339: fltTcaIsisIsisLspStats1dLspPktsRetxPer

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403340: fltTcaIsisIsisLspStats1wLspPktsRetxPer

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403341: fltTcaIsisIsisLspStats1moLspPktsRetxPer

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403342: fltTcaIsisIsisLspStats1qtrLspPktsRetxPer

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403343: fltTcaIsisIsisLspStats1yearLspPktsRetxPer

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403344: fltTcaIsisIsisLspStats5minLspPktsRetxMin

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403345: fltTcaIsisIsisLspStats15minLspPktsRetxMin

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403346: fltTcaIsisIsisLspStats1hLspPktsRetxMin

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403347: fltTcaIsisIsisLspStats1dLspPktsRetxMin

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403348: fltTcaIsisIsisLspStats1wLspPktsRetxMin

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403349: fltTcaIsisIsisLspStats1moLspPktsRetxMin

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403350: fltTcaIsisIsisLspStats1qtrLspPktsRetxMin

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403351: fltTcaIsisIsisLspStats1yearLspPktsRetxMin

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403352: fltTcaIsisIsisLspStats5minLspPktsRetxMax

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403353: fltTcaIsisIsisLspStats15minLspPktsRetxMax

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403354: fltTcaIsisIsisLspStats1hLspPktsRetxMax

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403355: fltTcaIsisIsisLspStats1dLspPktsRetxMax

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403356: fltTcaIsisIsisLspStats1wLspPktsRetxMax

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403357: fltTcaIsisIsisLspStats1moLspPktsRetxMax

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403358: fltTcaIsisIsisLspStats1qtrLspPktsRetxMax

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403359: fltTcaIsisIsisLspStats1yearLspPktsRetxMax

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403360: fltTcaIsisIsisLspStats5minLspPktsRetxAvg

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403361: fltTcaIsisIsisLspStats15minLspPktsRetxAvg

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403362: fltTcaIsisIsisLspStats1hLspPktsRetxAvg

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403363: fltTcaIsisIsisLspStats1dLspPktsRetxAvg

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403364: fltTcaIsisIsisLspStats1wLspPktsRetxAvg

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403365: fltTcaIsisIsisLspStats1moLspPktsRetxAvg

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403366: fltTcaIsisIsisLspStats1qtrLspPktsRetxAvg

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403367: fltTcaIsisIsisLspStats1yearLspPktsRetxAvg

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403392: fltTcaIsisIsisLspStats5minLspPktsRetxTr

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403393: fltTcaIsisIsisLspStats15minLspPktsRetxTr

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403394: fltTcaIsisIsisLspStats1hLspPktsRetxTr

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403395: fltTcaIsisIsisLspStats1dLspPktsRetxTr

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403396: fltTcaIsisIsisLspStats1wLspPktsRetxTr

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403397: fltTcaIsisIsisLspStats1moLspPktsRetxTr

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403398: fltTcaIsisIsisLspStats1qtrLspPktsRetxTr

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403399: fltTcaIsisIsisLspStats1yearLspPktsRetxTr

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4034: fltHcloudRsSvcResToSvcEPgResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F403400: fltTcaIsisIsisLspStats5minLspPktsRetxRate

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403401: fltTcaIsisIsisLspStats15minLspPktsRetxRate

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403402: fltTcaIsisIsisLspStats1hLspPktsRetxRate

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403403: fltTcaIsisIsisLspStats1dLspPktsRetxRate

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403404: fltTcaIsisIsisLspStats1wLspPktsRetxRate

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403405: fltTcaIsisIsisLspStats1moLspPktsRetxRate

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403406: fltTcaIsisIsisLspStats1qtrLspPktsRetxRate

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403407: fltTcaIsisIsisLspStats1yearLspPktsRetxRate

Severity: variable

Explanation: This fault is caused by "LSP Packets Retransmitted rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Retransmitted" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403480: fltTcaIsisIsisLspStats5minLspPktsRxLast

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403481: fltTcaIsisIsisLspStats15minLspPktsRxLast

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403482: fltTcaIsisIsisLspStats1hLspPktsRxLast

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403483: fltTcaIsisIsisLspStats1dLspPktsRxLast

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403484: fltTcaIsisIsisLspStats1wLspPktsRxLast

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403485: fltTcaIsisIsisLspStats1moLspPktsRxLast

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403486: fltTcaIsisIsisLspStats1qtrLspPktsRxLast

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403487: fltTcaIsisIsisLspStats1yearLspPktsRxLast

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403496: fltTcaIsisIsisLspStats5minLspPktsRxCum

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403497: fltTcaIsisIsisLspStats15minLspPktsRxCum

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403498: fltTcaIsisIsisLspStats1hLspPktsRxCum

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403499: fltTcaIsisIsisLspStats1dLspPktsRxCum

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4035: fltHcloudRsEpToPrivateEpResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F403500: fltTcaIsisIsisLspStats1wLspPktsRxCum

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403501: fltTcaIsisIsisLspStats1moLspPktsRxCum

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403502: fltTcaIsisIsisLspStats1qtrLspPktsRxCum

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403503: fltTcaIsisIsisLspStats1yearLspPktsRxCum

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403504: fltTcaIsisIsisLspStats5minLspPktsRxPer

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403505: fltTcaIsisIsisLspStats15minLspPktsRxPer

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403506: fltTcaIsisIsisLspStats1hLspPktsRxPer

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403507: fltTcaIsisIsisLspStats1dLspPktsRxPer

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403508: fltTcaIsisIsisLspStats1wLspPktsRxPer

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403509: fltTcaIsisIsisLspStats1moLspPktsRxPer

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403510: fltTcaIsisIsisLspStats1qtrLspPktsRxPer

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403511: fltTcaIsisIsisLspStats1yearLspPktsRxPer

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403512: fltTcaIsisIsisLspStats5minLspPktsRxMin

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403513: fltTcaIsisIsisLspStats15minLspPktsRxMin

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403514: fltTcaIsisIsisLspStats1hLspPktsRxMin

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403515: fltTcaIsisIsisLspStats1dLspPktsRxMin

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403516: fltTcaIsisIsisLspStats1wLspPktsRxMin

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403517: fltTcaIsisIsisLspStats1moLspPktsRxMin

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403518: fltTcaIsisIsisLspStats1qtrLspPktsRxMin

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403519: fltTcaIsisIsisLspStats1yearLspPktsRxMin

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403520: fltTcaIsisIsisLspStats5minLspPktsRxMax

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403521: fltTcaIsisIsisLspStats15minLspPktsRxMax

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403522: fltTcaIsisIsisLspStats1hLspPktsRxMax

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403523: fltTcaIsisIsisLspStats1dLspPktsRxMax

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403524: fltTcaIsisIsisLspStats1wLspPktsRxMax

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403525: fltTcaIsisIsisLspStats1moLspPktsRxMax

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403526: fltTcaIsisIsisLspStats1qtrLspPktsRxMax

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403527: fltTcaIsisIsisLspStats1yearLspPktsRxMax

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403528: fltTcaIsisIsisLspStats5minLspPktsRxAvg

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403529: fltTcaIsisIsisLspStats15minLspPktsRxAvg

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403530: fltTcaIsisIsisLspStats1hLspPktsRxAvg

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403531: fltTcaIsisIsisLspStats1dLspPktsRxAvg

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403532: fltTcaIsisIsisLspStats1wLspPktsRxAvg

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403533: fltTcaIsisIsisLspStats1moLspPktsRxAvg

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403534: fltTcaIsisIsisLspStats1qtrLspPktsRxAvg

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403535: fltTcaIsisIsisLspStats1yearLspPktsRxAvg

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403560: fltTcaIsisIsisLspStats5minLspPktsRxTr

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403561: fltTcaIsisIsisLspStats15minLspPktsRxTr

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403562: fltTcaIsisIsisLspStats1hLspPktsRxTr

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403563: fltTcaIsisIsisLspStats1dLspPktsRxTr

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403564: fltTcaIsisIsisLspStats1wLspPktsRxTr

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403565: fltTcaIsisIsisLspStats1moLspPktsRxTr

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403566: fltTcaIsisIsisLspStats1qtrLspPktsRxTr

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403567: fltTcaIsisIsisLspStats1yearLspPktsRxTr

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403568: fltTcaIsisIsisLspStats5minLspPktsRxRate

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403569: fltTcaIsisIsisLspStats15minLspPktsRxRate

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403570: fltTcaIsisIsisLspStats1hLspPktsRxRate

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403571: fltTcaIsisIsisLspStats1dLspPktsRxRate

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403572: fltTcaIsisIsisLspStats1wLspPktsRxRate

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403573: fltTcaIsisIsisLspStats1moLspPktsRxRate

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403574: fltTcaIsisIsisLspStats1qtrLspPktsRxRate

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403575: fltTcaIsisIsisLspStats1yearLspPktsRxRate

Severity: variable

Explanation: This fault is caused by "LSP Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403648: fltTcaIsisIsisLspStats5minLspPktsTxLast

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403649: fltTcaIsisIsisLspStats15minLspPktsTxLast

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403650: fltTcaIsisIsisLspStats1hLspPktsTxLast

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403651: fltTcaIsisIsisLspStats1dLspPktsTxLast

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403652: fltTcaIsisIsisLspStats1wLspPktsTxLast

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403653: fltTcaIsisIsisLspStats1moLspPktsTxLast

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403654: fltTcaIsisIsisLspStats1qtrLspPktsTxLast

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403655: fltTcaIsisIsisLspStats1yearLspPktsTxLast

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403664: fltTcaIsisIsisLspStats5minLspPktsTxCum

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403665: fltTcaIsisIsisLspStats15minLspPktsTxCum

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403666: fltTcaIsisIsisLspStats1hLspPktsTxCum

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403667: fltTcaIsisIsisLspStats1dLspPktsTxCum

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403668: fltTcaIsisIsisLspStats1wLspPktsTxCum

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403669: fltTcaIsisIsisLspStats1moLspPktsTxCum

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403670: fltTcaIsisIsisLspStats1qtrLspPktsTxCum

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403671: fltTcaIsisIsisLspStats1yearLspPktsTxCum

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403672: fltTcaIsisIsisLspStats5minLspPktsTxPer

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403673: fltTcaIsisIsisLspStats15minLspPktsTxPer

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403674: fltTcaIsisIsisLspStats1hLspPktsTxPer

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403675: fltTcaIsisIsisLspStats1dLspPktsTxPer

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403676: fltTcaIsisIsisLspStats1wLspPktsTxPer

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403677: fltTcaIsisIsisLspStats1moLspPktsTxPer

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403678: fltTcaIsisIsisLspStats1qtrLspPktsTxPer

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403679: fltTcaIsisIsisLspStats1yearLspPktsTxPer

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403680: fltTcaIsisIsisLspStats5minLspPktsTxMin

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403681: fltTcaIsisIsisLspStats15minLspPktsTxMin

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403682: fltTcaIsisIsisLspStats1hLspPktsTxMin

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403683: fltTcaIsisIsisLspStats1dLspPktsTxMin

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403684: fltTcaIsisIsisLspStats1wLspPktsTxMin

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403685: fltTcaIsisIsisLspStats1moLspPktsTxMin

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403686: fltTcaIsisIsisLspStats1qtrLspPktsTxMin

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403687: fltTcaIsisIsisLspStats1yearLspPktsTxMin

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403688: fltTcaIsisIsisLspStats5minLspPktsTxMax

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403689: fltTcaIsisIsisLspStats15minLspPktsTxMax

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403690: fltTcaIsisIsisLspStats1hLspPktsTxMax

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403691: fltTcaIsisIsisLspStats1dLspPktsTxMax

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403692: fltTcaIsisIsisLspStats1wLspPktsTxMax

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403693: fltTcaIsisIsisLspStats1moLspPktsTxMax

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403694: fltTcaIsisIsisLspStats1qtrLspPktsTxMax

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403695: fltTcaIsisIsisLspStats1yearLspPktsTxMax

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403696: fltTcaIsisIsisLspStats5minLspPktsTxAvg

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403697: fltTcaIsisIsisLspStats15minLspPktsTxAvg

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403698: fltTcaIsisIsisLspStats1hLspPktsTxAvg

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403699: fltTcaIsisIsisLspStats1dLspPktsTxAvg

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4037: fltHcloudRsNetworkSecurityGroupToSubnetResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F403700: fltTcaIsisIsisLspStats1wLspPktsTxAvg

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403701: fltTcaIsisIsisLspStats1moLspPktsTxAvg

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403702: fltTcaIsisIsisLspStats1qtrLspPktsTxAvg

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403703: fltTcaIsisIsisLspStats1yearLspPktsTxAvg

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403728: fltTcaIsisIsisLspStats5minLspPktsTxTr

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403729: fltTcaIsisIsisLspStats15minLspPktsTxTr

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403730: fltTcaIsisIsisLspStats1hLspPktsTxTr

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403731: fltTcaIsisIsisLspStats1dLspPktsTxTr

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403732: fltTcaIsisIsisLspStats1wLspPktsTxTr

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403733: fltTcaIsisIsisLspStats1moLspPktsTxTr

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403734: fltTcaIsisIsisLspStats1qtrLspPktsTxTr

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403735: fltTcaIsisIsisLspStats1yearLspPktsTxTr

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403736: fltTcaIsisIsisLspStats5minLspPktsTxRate

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403737: fltTcaIsisIsisLspStats15minLspPktsTxRate

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403738: fltTcaIsisIsisLspStats1hLspPktsTxRate

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403739: fltTcaIsisIsisLspStats1dLspPktsTxRate

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403740: fltTcaIsisIsisLspStats1wLspPktsTxRate

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403741: fltTcaIsisIsisLspStats1moLspPktsTxRate

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403742: fltTcaIsisIsisLspStats1qtrLspPktsTxRate

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403743: fltTcaIsisIsisLspStats1yearLspPktsTxRate

Severity: variable

Explanation: This fault is caused by "LSP Packets Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "LSP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4038: fltHcloudRsServiceepToSvcEPgResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F403816: fltTcaIsisIsisP2pStats5minP2pIIHPktsAuthErrLast

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403817: fltTcaIsisIsisP2pStats15minP2pIIHPktsAuthErrLast

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403818: fltTcaIsisIsisP2pStats1hP2pIIHPktsAuthErrLast

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403819: fltTcaIsisIsisP2pStats1dP2pIIHPktsAuthErrLast

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403820: fltTcaIsisIsisP2pStats1wP2pIIHPktsAuthErrLast

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403821: fltTcaIsisIsisP2pStats1moP2pIIHPktsAuthErrLast

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403822: fltTcaIsisIsisP2pStats1qtrP2pIIHPktsAuthErrLast

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403823: fltTcaIsisIsisP2pStats1yearP2pIIHPktsAuthErrLast

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403832: fltTcaIsisIsisP2pStats5minP2pIIHPktsAuthErrCum

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403833: fltTcaIsisIsisP2pStats15minP2pIIHPktsAuthErrCum

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403834: fltTcaIsisIsisP2pStats1hP2pIIHPktsAuthErrCum

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403835: fltTcaIsisIsisP2pStats1dP2pIIHPktsAuthErrCum

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403836: fltTcaIsisIsisP2pStats1wP2pIIHPktsAuthErrCum

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403837: fltTcaIsisIsisP2pStats1moP2pIIHPktsAuthErrCum

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403838: fltTcaIsisIsisP2pStats1qtrP2pIIHPktsAuthErrCum

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403839: fltTcaIsisIsisP2pStats1yearP2pIIHPktsAuthErrCum

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403840: fltTcaIsisIsisP2pStats5minP2pIIHPktsAuthErrPer

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403841: fltTcaIsisIsisP2pStats15minP2pIIHPktsAuthErrPer

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403842: fltTcaIsisIsisP2pStats1hP2pIIHPktsAuthErrPer

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403843: fltTcaIsisIsisP2pStats1dP2pIIHPktsAuthErrPer

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403844: fltTcaIsisIsisP2pStats1wP2pIIHPktsAuthErrPer

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403845: fltTcaIsisIsisP2pStats1moP2pIIHPktsAuthErrPer

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403846: fltTcaIsisIsisP2pStats1qtrP2pIIHPktsAuthErrPer

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403847: fltTcaIsisIsisP2pStats1yearP2pIIHPktsAuthErrPer

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403848: fltTcaIsisIsisP2pStats5minP2pIIHPktsAuthErrMin

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403849: fltTcaIsisIsisP2pStats15minP2pIIHPktsAuthErrMin

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403850: fltTcaIsisIsisP2pStats1hP2pIIHPktsAuthErrMin

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403851: fltTcaIsisIsisP2pStats1dP2pIIHPktsAuthErrMin

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403852: fltTcaIsisIsisP2pStats1wP2pIIHPktsAuthErrMin

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403853: fltTcaIsisIsisP2pStats1moP2pIIHPktsAuthErrMin

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403854: fltTcaIsisIsisP2pStats1qtrP2pIIHPktsAuthErrMin

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403855: fltTcaIsisIsisP2pStats1yearP2pIIHPktsAuthErrMin

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403856: fltTcaIsisIsisP2pStats5minP2pIIHPktsAuthErrMax

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403857: fltTcaIsisIsisP2pStats15minP2pIIHPktsAuthErrMax

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403858: fltTcaIsisIsisP2pStats1hP2pIIHPktsAuthErrMax

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403859: fltTcaIsisIsisP2pStats1dP2pIIHPktsAuthErrMax

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403860: fltTcaIsisIsisP2pStats1wP2pIIHPktsAuthErrMax

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403861: fltTcaIsisIsisP2pStats1moP2pIIHPktsAuthErrMax

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403862: fltTcaIsisIsisP2pStats1qtrP2pIIHPktsAuthErrMax

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403863: fltTcaIsisIsisP2pStats1yearP2pIIHPktsAuthErrMax

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403864: fltTcaIsisIsisP2pStats5minP2pIIHPktsAuthErrAvg

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403865: fltTcaIsisIsisP2pStats15minP2pIIHPktsAuthErrAvg

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403866: fltTcaIsisIsisP2pStats1hP2pIIHPktsAuthErrAvg

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403867: fltTcaIsisIsisP2pStats1dP2pIIHPktsAuthErrAvg

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403868: fltTcaIsisIsisP2pStats1wP2pIIHPktsAuthErrAvg

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403869: fltTcaIsisIsisP2pStats1moP2pIIHPktsAuthErrAvg

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403870: fltTcaIsisIsisP2pStats1qtrP2pIIHPktsAuthErrAvg

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403871: fltTcaIsisIsisP2pStats1yearP2pIIHPktsAuthErrAvg

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403896: fltTcaIsisIsisP2pStats5minP2pIIHPktsAuthErrTr

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403897: fltTcaIsisIsisP2pStats15minP2pIIHPktsAuthErrTr

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403898: fltTcaIsisIsisP2pStats1hP2pIIHPktsAuthErrTr

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403899: fltTcaIsisIsisP2pStats1dP2pIIHPktsAuthErrTr

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4039: fltHcloudRsSubnetToAppSecurityGroupResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F403900: fltTcaIsisIsisP2pStats1wP2pIIHPktsAuthErrTr

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403901: fltTcaIsisIsisP2pStats1moP2pIIHPktsAuthErrTr

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403902: fltTcaIsisIsisP2pStats1qtrP2pIIHPktsAuthErrTr

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403903: fltTcaIsisIsisP2pStats1yearP2pIIHPktsAuthErrTr

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403904: fltTcaIsisIsisP2pStats5minP2pIIHPktsAuthErrRate

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403905: fltTcaIsisIsisP2pStats15minP2pIIHPktsAuthErrRate

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403906: fltTcaIsisIsisP2pStats1hP2pIIHPktsAuthErrRate

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403907: fltTcaIsisIsisP2pStats1dP2pIIHPktsAuthErrRate

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403908: fltTcaIsisIsisP2pStats1wP2pIIHPktsAuthErrRate

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403909: fltTcaIsisIsisP2pStats1moP2pIIHPktsAuthErrRate

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403910: fltTcaIsisIsisP2pStats1qtrP2pIIHPktsAuthErrRate

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403911: fltTcaIsisIsisP2pStats1yearP2pIIHPktsAuthErrRate

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Authentication Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403984: fltTcaIsisIsisP2pStats5minP2pIIHPktsMiscErrLast

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403985: fltTcaIsisIsisP2pStats15minP2pIIHPktsMiscErrLast

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403986: fltTcaIsisIsisP2pStats1hP2pIIHPktsMiscErrLast

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403987: fltTcaIsisIsisP2pStats1dP2pIIHPktsMiscErrLast

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403988: fltTcaIsisIsisP2pStats1wP2pIIHPktsMiscErrLast

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403989: fltTcaIsisIsisP2pStats1moP2pIIHPktsMiscErrLast

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403990: fltTcaIsisIsisP2pStats1qtrP2pIIHPktsMiscErrLast

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F403991: fltTcaIsisIsisP2pStats1yearP2pIIHPktsMiscErrLast

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4040: fltHcloudRsSvcEPgToSgResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F404000: fltTcaIsisIsisP2pStats5minP2pIIHPktsMiscErrCum

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404001: fltTcaIsisIsisP2pStats15minP2pIIHPktsMiscErrCum

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404002: fltTcaIsisIsisP2pStats1hP2pIIHPktsMiscErrCum

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404003: fltTcaIsisIsisP2pStats1dP2pIIHPktsMiscErrCum

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404004: fltTcaIsisIsisP2pStats1wP2pIIHPktsMiscErrCum

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404005: fltTcaIsisIsisP2pStats1moP2pIIHPktsMiscErrCum

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404006: fltTcaIsisIsisP2pStats1qtrP2pIIHPktsMiscErrCum

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404007: fltTcaIsisIsisP2pStats1yearP2pIIHPktsMiscErrCum

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404008: fltTcaIsisIsisP2pStats5minP2pIIHPktsMiscErrPer

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404009: fltTcaIsisIsisP2pStats15minP2pIIHPktsMiscErrPer

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404010: fltTcaIsisIsisP2pStats1hP2pIIHPktsMiscErrPer

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404011: fltTcaIsisIsisP2pStats1dP2pIIHPktsMiscErrPer

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404012: fltTcaIsisIsisP2pStats1wP2pIIHPktsMiscErrPer

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404013: fltTcaIsisIsisP2pStats1moP2pIIHPktsMiscErrPer

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404014: fltTcaIsisIsisP2pStats1qtrP2pIIHPktsMiscErrPer

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404015: fltTcaIsisIsisP2pStats1yearP2pIIHPktsMiscErrPer

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404016: fltTcaIsisIsisP2pStats5minP2pIIHPktsMiscErrMin

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404017: fltTcaIsisIsisP2pStats15minP2pIIHPktsMiscErrMin

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404018: fltTcaIsisIsisP2pStats1hP2pIIHPktsMiscErrMin

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404019: fltTcaIsisIsisP2pStats1dP2pIIHPktsMiscErrMin

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404020: fltTcaIsisIsisP2pStats1wP2pIIHPktsMiscErrMin

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404021: fltTcaIsisIsisP2pStats1moP2pIIHPktsMiscErrMin

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404022: fltTcaIsisIsisP2pStats1qtrP2pIIHPktsMiscErrMin

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404023: fltTcaIsisIsisP2pStats1yearP2pIIHPktsMiscErrMin

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404024: fltTcaIsisIsisP2pStats5minP2pIIHPktsMiscErrMax

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404025: fltTcaIsisIsisP2pStats15minP2pIIHPktsMiscErrMax

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404026: fltTcaIsisIsisP2pStats1hP2pIIHPktsMiscErrMax

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404027: fltTcaIsisIsisP2pStats1dP2pIIHPktsMiscErrMax

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404028: fltTcaIsisIsisP2pStats1wP2pIIHPktsMiscErrMax

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404029: fltTcaIsisIsisP2pStats1moP2pIIHPktsMiscErrMax

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404030: fltTcaIsisIsisP2pStats1qtrP2pIIHPktsMiscErrMax

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404031: fltTcaIsisIsisP2pStats1yearP2pIIHPktsMiscErrMax

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404032: fltTcaIsisIsisP2pStats5minP2pIIHPktsMiscErrAvg

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404033: fltTcaIsisIsisP2pStats15minP2pIIHPktsMiscErrAvg

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404034: fltTcaIsisIsisP2pStats1hP2pIIHPktsMiscErrAvg

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404035: fltTcaIsisIsisP2pStats1dP2pIIHPktsMiscErrAvg

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404036: fltTcaIsisIsisP2pStats1wP2pIIHPktsMiscErrAvg

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404037: fltTcaIsisIsisP2pStats1moP2pIIHPktsMiscErrAvg

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404038: fltTcaIsisIsisP2pStats1qtrP2pIIHPktsMiscErrAvg

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404039: fltTcaIsisIsisP2pStats1yearP2pIIHPktsMiscErrAvg

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404064: fltTcaIsisIsisP2pStats5minP2pIIHPktsMiscErrTr

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404065: fltTcaIsisIsisP2pStats15minP2pIIHPktsMiscErrTr

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404066: fltTcaIsisIsisP2pStats1hP2pIIHPktsMiscErrTr

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404067: fltTcaIsisIsisP2pStats1dP2pIIHPktsMiscErrTr

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404068: fltTcaIsisIsisP2pStats1wP2pIIHPktsMiscErrTr

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404069: fltTcaIsisIsisP2pStats1moP2pIIHPktsMiscErrTr

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404070: fltTcaIsisIsisP2pStats1qtrP2pIIHPktsMiscErrTr

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404071: fltTcaIsisIsisP2pStats1yearP2pIIHPktsMiscErrTr

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404072: fltTcaIsisIsisP2pStats5minP2pIIHPktsMiscErrRate

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404073: fltTcaIsisIsisP2pStats15minP2pIIHPktsMiscErrRate

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404074: fltTcaIsisIsisP2pStats1hP2pIIHPktsMiscErrRate

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404075: fltTcaIsisIsisP2pStats1dP2pIIHPktsMiscErrRate

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404076: fltTcaIsisIsisP2pStats1wP2pIIHPktsMiscErrRate

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404077: fltTcaIsisIsisP2pStats1moP2pIIHPktsMiscErrRate

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404078: fltTcaIsisIsisP2pStats1qtrP2pIIHPktsMiscErrRate

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404079: fltTcaIsisIsisP2pStats1yearP2pIIHPktsMiscErrRate

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets with Miscellaneous Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets with Miscellaneous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4041: fltHcloudRsSvcEPgToSubnetResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F404152: fltTcaIsisIsisP2pStats5minP2pIIHPktsRxLast

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404153: fltTcaIsisIsisP2pStats15minP2pIIHPktsRxLast

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404154: fltTcaIsisIsisP2pStats1hP2pIIHPktsRxLast

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404155: fltTcaIsisIsisP2pStats1dP2pIIHPktsRxLast

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404156: fltTcaIsisIsisP2pStats1wP2pIIHPktsRxLast

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404157: fltTcaIsisIsisP2pStats1moP2pIIHPktsRxLast

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404158: fltTcaIsisIsisP2pStats1qtrP2pIIHPktsRxLast

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404159: fltTcaIsisIsisP2pStats1yearP2pIIHPktsRxLast

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404168: fltTcaIsisIsisP2pStats5minP2pIIHPktsRxCum

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404169: fltTcaIsisIsisP2pStats15minP2pIIHPktsRxCum

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404170: fltTcaIsisIsisP2pStats1hP2pIIHPktsRxCum

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404171: fltTcaIsisIsisP2pStats1dP2pIIHPktsRxCum

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404172: fltTcaIsisIsisP2pStats1wP2pIIHPktsRxCum

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404173: fltTcaIsisIsisP2pStats1moP2pIIHPktsRxCum

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404174: fltTcaIsisIsisP2pStats1qtrP2pIIHPktsRxCum

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404175: fltTcaIsisIsisP2pStats1yearP2pIIHPktsRxCum

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404176: fltTcaIsisIsisP2pStats5minP2pIIHPktsRxPer

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404177: fltTcaIsisIsisP2pStats15minP2pIIHPktsRxPer

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404178: fltTcaIsisIsisP2pStats1hP2pIIHPktsRxPer

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404179: fltTcaIsisIsisP2pStats1dP2pIIHPktsRxPer

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404180: fltTcaIsisIsisP2pStats1wP2pIIHPktsRxPer

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404181: fltTcaIsisIsisP2pStats1moP2pIIHPktsRxPer

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404182: fltTcaIsisIsisP2pStats1qtrP2pIIHPktsRxPer

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404183: fltTcaIsisIsisP2pStats1yearP2pIIHPktsRxPer

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404184: fltTcaIsisIsisP2pStats5minP2pIIHPktsRxMin

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404185: fltTcaIsisIsisP2pStats15minP2pIIHPktsRxMin

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404186: fltTcaIsisIsisP2pStats1hP2pIIHPktsRxMin

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404187: fltTcaIsisIsisP2pStats1dP2pIIHPktsRxMin

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404188: fltTcaIsisIsisP2pStats1wP2pIIHPktsRxMin

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404189: fltTcaIsisIsisP2pStats1moP2pIIHPktsRxMin

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404190: fltTcaIsisIsisP2pStats1qtrP2pIIHPktsRxMin

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404191: fltTcaIsisIsisP2pStats1yearP2pIIHPktsRxMin

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404192: fltTcaIsisIsisP2pStats5minP2pIIHPktsRxMax

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404193: fltTcaIsisIsisP2pStats15minP2pIIHPktsRxMax

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404194: fltTcaIsisIsisP2pStats1hP2pIIHPktsRxMax

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404195: fltTcaIsisIsisP2pStats1dP2pIIHPktsRxMax

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404196: fltTcaIsisIsisP2pStats1wP2pIIHPktsRxMax

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404197: fltTcaIsisIsisP2pStats1moP2pIIHPktsRxMax

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404198: fltTcaIsisIsisP2pStats1qtrP2pIIHPktsRxMax

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404199: fltTcaIsisIsisP2pStats1yearP2pIIHPktsRxMax

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4042: fltHinventoryRsApigwToSubnetResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F404200: fltTcaIsisIsisP2pStats5minP2pIIHPktsRxAvg

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404201: fltTcaIsisIsisP2pStats15minP2pIIHPktsRxAvg

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404202: fltTcaIsisIsisP2pStats1hP2pIIHPktsRxAvg

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404203: fltTcaIsisIsisP2pStats1dP2pIIHPktsRxAvg

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404204: fltTcaIsisIsisP2pStats1wP2pIIHPktsRxAvg

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404205: fltTcaIsisIsisP2pStats1moP2pIIHPktsRxAvg

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404206: fltTcaIsisIsisP2pStats1qtrP2pIIHPktsRxAvg

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404207: fltTcaIsisIsisP2pStats1yearP2pIIHPktsRxAvg

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404232: fltTcaIsisIsisP2pStats5minP2pIIHPktsRxTr

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404233: fltTcaIsisIsisP2pStats15minP2pIIHPktsRxTr

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404234: fltTcaIsisIsisP2pStats1hP2pIIHPktsRxTr

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404235: fltTcaIsisIsisP2pStats1dP2pIIHPktsRxTr

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404236: fltTcaIsisIsisP2pStats1wP2pIIHPktsRxTr

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404237: fltTcaIsisIsisP2pStats1moP2pIIHPktsRxTr

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404238: fltTcaIsisIsisP2pStats1qtrP2pIIHPktsRxTr

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404239: fltTcaIsisIsisP2pStats1yearP2pIIHPktsRxTr

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404240: fltTcaIsisIsisP2pStats5minP2pIIHPktsRxRate

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404241: fltTcaIsisIsisP2pStats15minP2pIIHPktsRxRate

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404242: fltTcaIsisIsisP2pStats1hP2pIIHPktsRxRate

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404243: fltTcaIsisIsisP2pStats1dP2pIIHPktsRxRate

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404244: fltTcaIsisIsisP2pStats1wP2pIIHPktsRxRate

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404245: fltTcaIsisIsisP2pStats1moP2pIIHPktsRxRate

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404246: fltTcaIsisIsisP2pStats1qtrP2pIIHPktsRxRate

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404247: fltTcaIsisIsisP2pStats1yearP2pIIHPktsRxRate

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4043: fltHinventoryRsApimToRegionResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F404320: fltTcaIsisIsisP2pStats5minP2pIIHPktsTxLast

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404321: fltTcaIsisIsisP2pStats15minP2pIIHPktsTxLast

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404322: fltTcaIsisIsisP2pStats1hP2pIIHPktsTxLast

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404323: fltTcaIsisIsisP2pStats1dP2pIIHPktsTxLast

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404324: fltTcaIsisIsisP2pStats1wP2pIIHPktsTxLast

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404325: fltTcaIsisIsisP2pStats1moP2pIIHPktsTxLast

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404326: fltTcaIsisIsisP2pStats1qtrP2pIIHPktsTxLast

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404327: fltTcaIsisIsisP2pStats1yearP2pIIHPktsTxLast

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404336: fltTcaIsisIsisP2pStats5minP2pIIHPktsTxCum

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404337: fltTcaIsisIsisP2pStats15minP2pIIHPktsTxCum

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404338: fltTcaIsisIsisP2pStats1hP2pIIHPktsTxCum

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404339: fltTcaIsisIsisP2pStats1dP2pIIHPktsTxCum

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404340: fltTcaIsisIsisP2pStats1wP2pIIHPktsTxCum

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404341: fltTcaIsisIsisP2pStats1moP2pIIHPktsTxCum

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404342: fltTcaIsisIsisP2pStats1qtrP2pIIHPktsTxCum

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404343: fltTcaIsisIsisP2pStats1yearP2pIIHPktsTxCum

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404344: fltTcaIsisIsisP2pStats5minP2pIIHPktsTxPer

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404345: fltTcaIsisIsisP2pStats15minP2pIIHPktsTxPer

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404346: fltTcaIsisIsisP2pStats1hP2pIIHPktsTxPer

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404347: fltTcaIsisIsisP2pStats1dP2pIIHPktsTxPer

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404348: fltTcaIsisIsisP2pStats1wP2pIIHPktsTxPer

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404349: fltTcaIsisIsisP2pStats1moP2pIIHPktsTxPer

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404350: fltTcaIsisIsisP2pStats1qtrP2pIIHPktsTxPer

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404351: fltTcaIsisIsisP2pStats1yearP2pIIHPktsTxPer

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404352: fltTcaIsisIsisP2pStats5minP2pIIHPktsTxMin

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404353: fltTcaIsisIsisP2pStats15minP2pIIHPktsTxMin

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404354: fltTcaIsisIsisP2pStats1hP2pIIHPktsTxMin

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404355: fltTcaIsisIsisP2pStats1dP2pIIHPktsTxMin

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404356: fltTcaIsisIsisP2pStats1wP2pIIHPktsTxMin

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404357: fltTcaIsisIsisP2pStats1moP2pIIHPktsTxMin

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404358: fltTcaIsisIsisP2pStats1qtrP2pIIHPktsTxMin

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404359: fltTcaIsisIsisP2pStats1yearP2pIIHPktsTxMin

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404360: fltTcaIsisIsisP2pStats5minP2pIIHPktsTxMax

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404361: fltTcaIsisIsisP2pStats15minP2pIIHPktsTxMax

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404362: fltTcaIsisIsisP2pStats1hP2pIIHPktsTxMax

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404363: fltTcaIsisIsisP2pStats1dP2pIIHPktsTxMax

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404364: fltTcaIsisIsisP2pStats1wP2pIIHPktsTxMax

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404365: fltTcaIsisIsisP2pStats1moP2pIIHPktsTxMax

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404366: fltTcaIsisIsisP2pStats1qtrP2pIIHPktsTxMax

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404367: fltTcaIsisIsisP2pStats1yearP2pIIHPktsTxMax

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404368: fltTcaIsisIsisP2pStats5minP2pIIHPktsTxAvg

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404369: fltTcaIsisIsisP2pStats15minP2pIIHPktsTxAvg

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404370: fltTcaIsisIsisP2pStats1hP2pIIHPktsTxAvg

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404371: fltTcaIsisIsisP2pStats1dP2pIIHPktsTxAvg

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404372: fltTcaIsisIsisP2pStats1wP2pIIHPktsTxAvg

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404373: fltTcaIsisIsisP2pStats1moP2pIIHPktsTxAvg

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404374: fltTcaIsisIsisP2pStats1qtrP2pIIHPktsTxAvg

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404375: fltTcaIsisIsisP2pStats1yearP2pIIHPktsTxAvg

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4044: fltHinventoryRsCosmosToPvtEndpointResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F404400: fltTcaIsisIsisP2pStats5minP2pIIHPktsTxTr

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404401: fltTcaIsisIsisP2pStats15minP2pIIHPktsTxTr

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404402: fltTcaIsisIsisP2pStats1hP2pIIHPktsTxTr

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404403: fltTcaIsisIsisP2pStats1dP2pIIHPktsTxTr

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404404: fltTcaIsisIsisP2pStats1wP2pIIHPktsTxTr

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404405: fltTcaIsisIsisP2pStats1moP2pIIHPktsTxTr

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404406: fltTcaIsisIsisP2pStats1qtrP2pIIHPktsTxTr

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404407: fltTcaIsisIsisP2pStats1yearP2pIIHPktsTxTr

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404408: fltTcaIsisIsisP2pStats5minP2pIIHPktsTxRate

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404409: fltTcaIsisIsisP2pStats15minP2pIIHPktsTxRate

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404410: fltTcaIsisIsisP2pStats1hP2pIIHPktsTxRate

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404411: fltTcaIsisIsisP2pStats1dP2pIIHPktsTxRate

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404412: fltTcaIsisIsisP2pStats1wP2pIIHPktsTxRate

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404413: fltTcaIsisIsisP2pStats1moP2pIIHPktsTxRate

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404414: fltTcaIsisIsisP2pStats1qtrP2pIIHPktsTxRate

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404415: fltTcaIsisIsisP2pStats1yearP2pIIHPktsTxRate

Severity: variable

Explanation: This fault is caused by "P2P IIH Packets Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "P2P IIH Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404488: fltTcaIsisIsisPsnpStats5minPsnpPktsAuthErrLast

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404489: fltTcaIsisIsisPsnpStats15minPsnpPktsAuthErrLast

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404490: fltTcaIsisIsisPsnpStats1hPsnpPktsAuthErrLast

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404491: fltTcaIsisIsisPsnpStats1dPsnpPktsAuthErrLast

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404492: fltTcaIsisIsisPsnpStats1wPsnpPktsAuthErrLast

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404493: fltTcaIsisIsisPsnpStats1moPsnpPktsAuthErrLast

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404494: fltTcaIsisIsisPsnpStats1qtrPsnpPktsAuthErrLast

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404495: fltTcaIsisIsisPsnpStats1yearPsnpPktsAuthErrLast

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4045: fltHinventoryRsCosmosToRegionResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F404504: fltTcaIsisIsisPsnpStats5minPsnpPktsAuthErrCum

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404505: fltTcaIsisIsisPsnpStats15minPsnpPktsAuthErrCum

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404506: fltTcaIsisIsisPsnpStats1hPsnpPktsAuthErrCum

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404507: fltTcaIsisIsisPsnpStats1dPsnpPktsAuthErrCum

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404508: fltTcaIsisIsisPsnpStats1wPsnpPktsAuthErrCum

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404509: fltTcaIsisIsisPsnpStats1moPsnpPktsAuthErrCum

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404510: fltTcaIsisIsisPsnpStats1qtrPsnpPktsAuthErrCum

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404511: fltTcaIsisIsisPsnpStats1yearPsnpPktsAuthErrCum

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404512: fltTcaIsisIsisPsnpStats5minPsnpPktsAuthErrPer

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404513: fltTcaIsisIsisPsnpStats15minPsnpPktsAuthErrPer

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404514: fltTcaIsisIsisPsnpStats1hPsnpPktsAuthErrPer

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404515: fltTcaIsisIsisPsnpStats1dPsnpPktsAuthErrPer

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404516: fltTcaIsisIsisPsnpStats1wPsnpPktsAuthErrPer

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404517: fltTcaIsisIsisPsnpStats1moPsnpPktsAuthErrPer

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404518: fltTcaIsisIsisPsnpStats1qtrPsnpPktsAuthErrPer

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404519: fltTcaIsisIsisPsnpStats1yearPsnpPktsAuthErrPer

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404520: fltTcaIsisIsisPsnpStats5minPsnpPktsAuthErrMin

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404521: fltTcaIsisIsisPsnpStats15minPsnpPktsAuthErrMin

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404522: fltTcaIsisIsisPsnpStats1hPsnpPktsAuthErrMin

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404523: fltTcaIsisIsisPsnpStats1dPsnpPktsAuthErrMin

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404524: fltTcaIsisIsisPsnpStats1wPsnpPktsAuthErrMin

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404525: fltTcaIsisIsisPsnpStats1moPsnpPktsAuthErrMin

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404526: fltTcaIsisIsisPsnpStats1qtrPsnpPktsAuthErrMin

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404527: fltTcaIsisIsisPsnpStats1yearPsnpPktsAuthErrMin

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404528: fltTcaIsisIsisPsnpStats5minPsnpPktsAuthErrMax

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404529: fltTcaIsisIsisPsnpStats15minPsnpPktsAuthErrMax

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404530: fltTcaIsisIsisPsnpStats1hPsnpPktsAuthErrMax

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404531: fltTcaIsisIsisPsnpStats1dPsnpPktsAuthErrMax

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404532: fltTcaIsisIsisPsnpStats1wPsnpPktsAuthErrMax

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404533: fltTcaIsisIsisPsnpStats1moPsnpPktsAuthErrMax

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404534: fltTcaIsisIsisPsnpStats1qtrPsnpPktsAuthErrMax

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404535: fltTcaIsisIsisPsnpStats1yearPsnpPktsAuthErrMax

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404536: fltTcaIsisIsisPsnpStats5minPsnpPktsAuthErrAvg

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404537: fltTcaIsisIsisPsnpStats15minPsnpPktsAuthErrAvg

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404538: fltTcaIsisIsisPsnpStats1hPsnpPktsAuthErrAvg

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404539: fltTcaIsisIsisPsnpStats1dPsnpPktsAuthErrAvg

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404540: fltTcaIsisIsisPsnpStats1wPsnpPktsAuthErrAvg

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404541: fltTcaIsisIsisPsnpStats1moPsnpPktsAuthErrAvg

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404542: fltTcaIsisIsisPsnpStats1qtrPsnpPktsAuthErrAvg

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404543: fltTcaIsisIsisPsnpStats1yearPsnpPktsAuthErrAvg

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404568: fltTcaIsisIsisPsnpStats5minPsnpPktsAuthErrTr

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404569: fltTcaIsisIsisPsnpStats15minPsnpPktsAuthErrTr

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404570: fltTcaIsisIsisPsnpStats1hPsnpPktsAuthErrTr

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404571: fltTcaIsisIsisPsnpStats1dPsnpPktsAuthErrTr

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404572: fltTcaIsisIsisPsnpStats1wPsnpPktsAuthErrTr

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404573: fltTcaIsisIsisPsnpStats1moPsnpPktsAuthErrTr

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404574: fltTcaIsisIsisPsnpStats1qtrPsnpPktsAuthErrTr

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404575: fltTcaIsisIsisPsnpStats1yearPsnpPktsAuthErrTr

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404576: fltTcaIsisIsisPsnpStats5minPsnpPktsAuthErrRate

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404577: fltTcaIsisIsisPsnpStats15minPsnpPktsAuthErrRate

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404578: fltTcaIsisIsisPsnpStats1hPsnpPktsAuthErrRate

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404579: fltTcaIsisIsisPsnpStats1dPsnpPktsAuthErrRate

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404580: fltTcaIsisIsisPsnpStats1wPsnpPktsAuthErrRate

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404581: fltTcaIsisIsisPsnpStats1moPsnpPktsAuthErrRate

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404582: fltTcaIsisIsisPsnpStats1qtrPsnpPktsAuthErrRate

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404583: fltTcaIsisIsisPsnpStats1yearPsnpPktsAuthErrRate

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Authentication Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Authentication Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4046: fltHinventoryRsCosmosToSubnetResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F404656: fltTcaIsisIsisPsnpStats5minPsnpPktsMiscErrLast

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404657: fltTcaIsisIsisPsnpStats15minPsnpPktsMiscErrLast

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404658: fltTcaIsisIsisPsnpStats1hPsnpPktsMiscErrLast

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404659: fltTcaIsisIsisPsnpStats1dPsnpPktsMiscErrLast

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404660: fltTcaIsisIsisPsnpStats1wPsnpPktsMiscErrLast

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404661: fltTcaIsisIsisPsnpStats1moPsnpPktsMiscErrLast

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404662: fltTcaIsisIsisPsnpStats1qtrPsnpPktsMiscErrLast

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404663: fltTcaIsisIsisPsnpStats1yearPsnpPktsMiscErrLast

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404672: fltTcaIsisIsisPsnpStats5minPsnpPktsMiscErrCum

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404673: fltTcaIsisIsisPsnpStats15minPsnpPktsMiscErrCum

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404674: fltTcaIsisIsisPsnpStats1hPsnpPktsMiscErrCum

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404675: fltTcaIsisIsisPsnpStats1dPsnpPktsMiscErrCum

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404676: fltTcaIsisIsisPsnpStats1wPsnpPktsMiscErrCum

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404677: fltTcaIsisIsisPsnpStats1moPsnpPktsMiscErrCum

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404678: fltTcaIsisIsisPsnpStats1qtrPsnpPktsMiscErrCum

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404679: fltTcaIsisIsisPsnpStats1yearPsnpPktsMiscErrCum

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404680: fltTcaIsisIsisPsnpStats5minPsnpPktsMiscErrPer

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404681: fltTcaIsisIsisPsnpStats15minPsnpPktsMiscErrPer

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404682: fltTcaIsisIsisPsnpStats1hPsnpPktsMiscErrPer

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404683: fltTcaIsisIsisPsnpStats1dPsnpPktsMiscErrPer

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404684: fltTcaIsisIsisPsnpStats1wPsnpPktsMiscErrPer

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404685: fltTcaIsisIsisPsnpStats1moPsnpPktsMiscErrPer

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404686: fltTcaIsisIsisPsnpStats1qtrPsnpPktsMiscErrPer

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404687: fltTcaIsisIsisPsnpStats1yearPsnpPktsMiscErrPer

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404688: fltTcaIsisIsisPsnpStats5minPsnpPktsMiscErrMin

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404689: fltTcaIsisIsisPsnpStats15minPsnpPktsMiscErrMin

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404690: fltTcaIsisIsisPsnpStats1hPsnpPktsMiscErrMin

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404691: fltTcaIsisIsisPsnpStats1dPsnpPktsMiscErrMin

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404692: fltTcaIsisIsisPsnpStats1wPsnpPktsMiscErrMin

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404693: fltTcaIsisIsisPsnpStats1moPsnpPktsMiscErrMin

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404694: fltTcaIsisIsisPsnpStats1qtrPsnpPktsMiscErrMin

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404695: fltTcaIsisIsisPsnpStats1yearPsnpPktsMiscErrMin

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404696: fltTcaIsisIsisPsnpStats5minPsnpPktsMiscErrMax

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404697: fltTcaIsisIsisPsnpStats15minPsnpPktsMiscErrMax

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404698: fltTcaIsisIsisPsnpStats1hPsnpPktsMiscErrMax

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404699: fltTcaIsisIsisPsnpStats1dPsnpPktsMiscErrMax

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4047: fltHinventoryRsClusterAgentPoolToSubnetResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F404700: fltTcaIsisIsisPsnpStats1wPsnpPktsMiscErrMax

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404701: fltTcaIsisIsisPsnpStats1moPsnpPktsMiscErrMax

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404702: fltTcaIsisIsisPsnpStats1qtrPsnpPktsMiscErrMax

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404703: fltTcaIsisIsisPsnpStats1yearPsnpPktsMiscErrMax

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404704: fltTcaIsisIsisPsnpStats5minPsnpPktsMiscErrAvg

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404705: fltTcaIsisIsisPsnpStats15minPsnpPktsMiscErrAvg

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404706: fltTcaIsisIsisPsnpStats1hPsnpPktsMiscErrAvg

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404707: fltTcaIsisIsisPsnpStats1dPsnpPktsMiscErrAvg

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404708: fltTcaIsisIsisPsnpStats1wPsnpPktsMiscErrAvg

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404709: fltTcaIsisIsisPsnpStats1moPsnpPktsMiscErrAvg

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404710: fltTcaIsisIsisPsnpStats1qtrPsnpPktsMiscErrAvg

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404711: fltTcaIsisIsisPsnpStats1yearPsnpPktsMiscErrAvg

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404736: fltTcaIsisIsisPsnpStats5minPsnpPktsMiscErrTr

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404737: fltTcaIsisIsisPsnpStats15minPsnpPktsMiscErrTr

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404738: fltTcaIsisIsisPsnpStats1hPsnpPktsMiscErrTr

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404739: fltTcaIsisIsisPsnpStats1dPsnpPktsMiscErrTr

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404740: fltTcaIsisIsisPsnpStats1wPsnpPktsMiscErrTr

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404741: fltTcaIsisIsisPsnpStats1moPsnpPktsMiscErrTr

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404742: fltTcaIsisIsisPsnpStats1qtrPsnpPktsMiscErrTr

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404743: fltTcaIsisIsisPsnpStats1yearPsnpPktsMiscErrTr

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404744: fltTcaIsisIsisPsnpStats5minPsnpPktsMiscErrRate

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404745: fltTcaIsisIsisPsnpStats15minPsnpPktsMiscErrRate

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404746: fltTcaIsisIsisPsnpStats1hPsnpPktsMiscErrRate

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404747: fltTcaIsisIsisPsnpStats1dPsnpPktsMiscErrRate

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404748: fltTcaIsisIsisPsnpStats1wPsnpPktsMiscErrRate

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404749: fltTcaIsisIsisPsnpStats1moPsnpPktsMiscErrRate

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404750: fltTcaIsisIsisPsnpStats1qtrPsnpPktsMiscErrRate

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404751: fltTcaIsisIsisPsnpStats1yearPsnpPktsMiscErrRate

Severity: variable

Explanation: This fault is caused by "PSNP Packets with Miscelcsnpeous Error rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets with Miscelcsnpeous Error" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4048: fltHinventoryRsClusterToPvtEndpointResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F404824: fltTcaIsisIsisPsnpStats5minPsnpPktsRxLast

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404825: fltTcaIsisIsisPsnpStats15minPsnpPktsRxLast

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404826: fltTcaIsisIsisPsnpStats1hPsnpPktsRxLast

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404827: fltTcaIsisIsisPsnpStats1dPsnpPktsRxLast

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404828: fltTcaIsisIsisPsnpStats1wPsnpPktsRxLast

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404829: fltTcaIsisIsisPsnpStats1moPsnpPktsRxLast

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404830: fltTcaIsisIsisPsnpStats1qtrPsnpPktsRxLast

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404831: fltTcaIsisIsisPsnpStats1yearPsnpPktsRxLast

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404840: fltTcaIsisIsisPsnpStats5minPsnpPktsRxCum

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404841: fltTcaIsisIsisPsnpStats15minPsnpPktsRxCum

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404842: fltTcaIsisIsisPsnpStats1hPsnpPktsRxCum

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404843: fltTcaIsisIsisPsnpStats1dPsnpPktsRxCum

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404844: fltTcaIsisIsisPsnpStats1wPsnpPktsRxCum

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404845: fltTcaIsisIsisPsnpStats1moPsnpPktsRxCum

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404846: fltTcaIsisIsisPsnpStats1qtrPsnpPktsRxCum

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404847: fltTcaIsisIsisPsnpStats1yearPsnpPktsRxCum

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404848: fltTcaIsisIsisPsnpStats5minPsnpPktsRxPer

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404849: fltTcaIsisIsisPsnpStats15minPsnpPktsRxPer

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404850: fltTcaIsisIsisPsnpStats1hPsnpPktsRxPer

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404851: fltTcaIsisIsisPsnpStats1dPsnpPktsRxPer

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404852: fltTcaIsisIsisPsnpStats1wPsnpPktsRxPer

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404853: fltTcaIsisIsisPsnpStats1moPsnpPktsRxPer

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404854: fltTcaIsisIsisPsnpStats1qtrPsnpPktsRxPer

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404855: fltTcaIsisIsisPsnpStats1yearPsnpPktsRxPer

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404856: fltTcaIsisIsisPsnpStats5minPsnpPktsRxMin

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404857: fltTcaIsisIsisPsnpStats15minPsnpPktsRxMin

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404858: fltTcaIsisIsisPsnpStats1hPsnpPktsRxMin

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404859: fltTcaIsisIsisPsnpStats1dPsnpPktsRxMin

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404860: fltTcaIsisIsisPsnpStats1wPsnpPktsRxMin

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404861: fltTcaIsisIsisPsnpStats1moPsnpPktsRxMin

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404862: fltTcaIsisIsisPsnpStats1qtrPsnpPktsRxMin

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404863: fltTcaIsisIsisPsnpStats1yearPsnpPktsRxMin

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404864: fltTcaIsisIsisPsnpStats5minPsnpPktsRxMax

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404865: fltTcaIsisIsisPsnpStats15minPsnpPktsRxMax

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404866: fltTcaIsisIsisPsnpStats1hPsnpPktsRxMax

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404867: fltTcaIsisIsisPsnpStats1dPsnpPktsRxMax

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404868: fltTcaIsisIsisPsnpStats1wPsnpPktsRxMax

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404869: fltTcaIsisIsisPsnpStats1moPsnpPktsRxMax

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404870: fltTcaIsisIsisPsnpStats1qtrPsnpPktsRxMax

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404871: fltTcaIsisIsisPsnpStats1yearPsnpPktsRxMax

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404872: fltTcaIsisIsisPsnpStats5minPsnpPktsRxAvg

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404873: fltTcaIsisIsisPsnpStats15minPsnpPktsRxAvg

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404874: fltTcaIsisIsisPsnpStats1hPsnpPktsRxAvg

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404875: fltTcaIsisIsisPsnpStats1dPsnpPktsRxAvg

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404876: fltTcaIsisIsisPsnpStats1wPsnpPktsRxAvg

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404877: fltTcaIsisIsisPsnpStats1moPsnpPktsRxAvg

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404878: fltTcaIsisIsisPsnpStats1qtrPsnpPktsRxAvg

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404879: fltTcaIsisIsisPsnpStats1yearPsnpPktsRxAvg

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4049: fltHinventoryRsClusterToRegionResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F404904: fltTcaIsisIsisPsnpStats5minPsnpPktsRxTr

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404905: fltTcaIsisIsisPsnpStats15minPsnpPktsRxTr

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404906: fltTcaIsisIsisPsnpStats1hPsnpPktsRxTr

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404907: fltTcaIsisIsisPsnpStats1dPsnpPktsRxTr

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404908: fltTcaIsisIsisPsnpStats1wPsnpPktsRxTr

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404909: fltTcaIsisIsisPsnpStats1moPsnpPktsRxTr

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404910: fltTcaIsisIsisPsnpStats1qtrPsnpPktsRxTr

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404911: fltTcaIsisIsisPsnpStats1yearPsnpPktsRxTr

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404912: fltTcaIsisIsisPsnpStats5minPsnpPktsRxRate

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404913: fltTcaIsisIsisPsnpStats15minPsnpPktsRxRate

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404914: fltTcaIsisIsisPsnpStats1hPsnpPktsRxRate

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404915: fltTcaIsisIsisPsnpStats1dPsnpPktsRxRate

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404916: fltTcaIsisIsisPsnpStats1wPsnpPktsRxRate

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404917: fltTcaIsisIsisPsnpStats1moPsnpPktsRxRate

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404918: fltTcaIsisIsisPsnpStats1qtrPsnpPktsRxRate

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404919: fltTcaIsisIsisPsnpStats1yearPsnpPktsRxRate

Severity: variable

Explanation: This fault is caused by "PSNP Packets Recevied rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Recevied" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404992: fltTcaIsisIsisPsnpStats5minPsnpPktsTxLast

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404993: fltTcaIsisIsisPsnpStats15minPsnpPktsTxLast

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404994: fltTcaIsisIsisPsnpStats1hPsnpPktsTxLast

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404995: fltTcaIsisIsisPsnpStats1dPsnpPktsTxLast

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404996: fltTcaIsisIsisPsnpStats1wPsnpPktsTxLast

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404997: fltTcaIsisIsisPsnpStats1moPsnpPktsTxLast

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404998: fltTcaIsisIsisPsnpStats1qtrPsnpPktsTxLast

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F404999: fltTcaIsisIsisPsnpStats1yearPsnpPktsTxLast

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4050: fltHinventoryRsEpToNicResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F405008: fltTcaIsisIsisPsnpStats5minPsnpPktsTxCum

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405009: fltTcaIsisIsisPsnpStats15minPsnpPktsTxCum

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405010: fltTcaIsisIsisPsnpStats1hPsnpPktsTxCum

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405011: fltTcaIsisIsisPsnpStats1dPsnpPktsTxCum

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405012: fltTcaIsisIsisPsnpStats1wPsnpPktsTxCum

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405013: fltTcaIsisIsisPsnpStats1moPsnpPktsTxCum

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405014: fltTcaIsisIsisPsnpStats1qtrPsnpPktsTxCum

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405015: fltTcaIsisIsisPsnpStats1yearPsnpPktsTxCum

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405016: fltTcaIsisIsisPsnpStats5minPsnpPktsTxPer

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405017: fltTcaIsisIsisPsnpStats15minPsnpPktsTxPer

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405018: fltTcaIsisIsisPsnpStats1hPsnpPktsTxPer

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405019: fltTcaIsisIsisPsnpStats1dPsnpPktsTxPer

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405020: fltTcaIsisIsisPsnpStats1wPsnpPktsTxPer

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405021: fltTcaIsisIsisPsnpStats1moPsnpPktsTxPer

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405022: fltTcaIsisIsisPsnpStats1qtrPsnpPktsTxPer

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405023: fltTcaIsisIsisPsnpStats1yearPsnpPktsTxPer

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405024: fltTcaIsisIsisPsnpStats5minPsnpPktsTxMin

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405025: fltTcaIsisIsisPsnpStats15minPsnpPktsTxMin

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405026: fltTcaIsisIsisPsnpStats1hPsnpPktsTxMin

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405027: fltTcaIsisIsisPsnpStats1dPsnpPktsTxMin

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405028: fltTcaIsisIsisPsnpStats1wPsnpPktsTxMin

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405029: fltTcaIsisIsisPsnpStats1moPsnpPktsTxMin

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405030: fltTcaIsisIsisPsnpStats1qtrPsnpPktsTxMin

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405031: fltTcaIsisIsisPsnpStats1yearPsnpPktsTxMin

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405032: fltTcaIsisIsisPsnpStats5minPsnpPktsTxMax

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405033: fltTcaIsisIsisPsnpStats15minPsnpPktsTxMax

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405034: fltTcaIsisIsisPsnpStats1hPsnpPktsTxMax

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405035: fltTcaIsisIsisPsnpStats1dPsnpPktsTxMax

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405036: fltTcaIsisIsisPsnpStats1wPsnpPktsTxMax

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405037: fltTcaIsisIsisPsnpStats1moPsnpPktsTxMax

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405038: fltTcaIsisIsisPsnpStats1qtrPsnpPktsTxMax

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405039: fltTcaIsisIsisPsnpStats1yearPsnpPktsTxMax

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405040: fltTcaIsisIsisPsnpStats5minPsnpPktsTxAvg

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405041: fltTcaIsisIsisPsnpStats15minPsnpPktsTxAvg

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405042: fltTcaIsisIsisPsnpStats1hPsnpPktsTxAvg

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405043: fltTcaIsisIsisPsnpStats1dPsnpPktsTxAvg

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405044: fltTcaIsisIsisPsnpStats1wPsnpPktsTxAvg

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405045: fltTcaIsisIsisPsnpStats1moPsnpPktsTxAvg

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405046: fltTcaIsisIsisPsnpStats1qtrPsnpPktsTxAvg

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405047: fltTcaIsisIsisPsnpStats1yearPsnpPktsTxAvg

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405072: fltTcaIsisIsisPsnpStats5minPsnpPktsTxTr

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405073: fltTcaIsisIsisPsnpStats15minPsnpPktsTxTr

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405074: fltTcaIsisIsisPsnpStats1hPsnpPktsTxTr

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405075: fltTcaIsisIsisPsnpStats1dPsnpPktsTxTr

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405076: fltTcaIsisIsisPsnpStats1wPsnpPktsTxTr

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405077: fltTcaIsisIsisPsnpStats1moPsnpPktsTxTr

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405078: fltTcaIsisIsisPsnpStats1qtrPsnpPktsTxTr

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405079: fltTcaIsisIsisPsnpStats1yearPsnpPktsTxTr

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405080: fltTcaIsisIsisPsnpStats5minPsnpPktsTxRate

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405081: fltTcaIsisIsisPsnpStats15minPsnpPktsTxRate

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405082: fltTcaIsisIsisPsnpStats1hPsnpPktsTxRate

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405083: fltTcaIsisIsisPsnpStats1dPsnpPktsTxRate

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405084: fltTcaIsisIsisPsnpStats1wPsnpPktsTxRate

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405085: fltTcaIsisIsisPsnpStats1moPsnpPktsTxRate

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405086: fltTcaIsisIsisPsnpStats1qtrPsnpPktsTxRate

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F405087: fltTcaIsisIsisPsnpStats1yearPsnpPktsTxRate

Severity: variable

Explanation: This fault is caused by "PSNP Packets Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "PSNP Packets Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4051: fltHinventoryRsEpToSubnetResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F4052: fltHinventoryRsSqlServerToPvtEndpointResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F4053: fltHinventoryRsStorageToPvtEndpointResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F4055: fltHcloudNativeLBOperNativeLBOperHealthDown

Severity: major

Explanation: This fault occurs when an erroneous configuration is pushed for creating Health status of Native load balancer.

Recommended Action: If you see this fault, take the following actions:

1. Please check the fault message and make necessary changes to the config for creating health status of Native Load balancer.

2. If fault still has not cleared, please contact Cisco TAC.

F4060: fltHcloudRsSelectorToTagParentResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F4061: fltAnalyticsRecordPRecordParamMismatch

Severity: major

Explanation: This fault occurs when the record is incompatible with monitor

Recommended Action: To recover from this fault, try the following actions

1. Check the record match parameters for eg: Source IP, IPv6

F4062: fltHcloudPrivateEndpointOperPrivateEndpointOperError

Severity: minor

Explanation: This fault occurs where there are errors encountered while creating/updating/deleting private endpoints

Recommended Action: If you see this fault, take the following actions:

1. If the error indicates Access Denied or permissions related issues, check the access permissions.

2. If the error indicates resource id errors for a custom service, check the name of the resource.

3. For other errors, please take action based on the error message.

4. If fault still has not cleared, please contact Cisco TAC.

F4063: fltHcloudRsPrivateEpToSvcResResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F4065: fltInfraRsQosLlfcIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F4066: fltHcloudRsToRedirDestResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F4067: fltHinventoryRsRegistryToPvtEndpointResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F4068: fltHinventoryRsRegistryToRegionResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F4069: fltHinventoryRsRegistryToSubnetResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F4070: fltFvIfConfigIssuesNode-config-failure

Severity: minor

Explanation: This fault occurs when different netflow policy for a particular netflow type is configured under the same interface

Recommended Action: If you see this fault, take the following actions:

1. Remove the conflicting netflow policy.

2. If the above action did not resolve the issue, delete and create the interface.

3. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F4071: fltFvIfConfigIssuesInterface-config-failure

Severity: minor

Explanation: This fault occurs when different netflow policy for a particular netflow type is configured under the same interface

Recommended Action: If you see this fault, take the following actions:

1. Remove the conflicting netflow policy.

2. If the above action did not resolve the issue, delete and create the interface.

3. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F4072: fltHinventoryRsVaultToPvtEndpointResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F4073: fltHinventoryRsVaultToRegionResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F4074: fltHinventoryRsVaultToSubnetResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F4080: fltHcloudRsBricksToPubSubnetResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F4081: fltHcloudRsBricksToPvtSubnetResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F4082: fltHinventoryRsBricksToPubSubnetResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F4083: fltHinventoryRsBricksToPvtSubnetResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F4084: fltHinventoryRsBricksToRegionResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F4085: fltHcloudRsSvcResToSubnetResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F4089: fltHinventoryRsRedisToRegionResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F4090: fltHinventoryRsRedisToSubnetResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F4091: fltL1PrioFlowCtrlPConfigMismatch

Severity: warning

Explanation: This fault occurs when PriorityFlowControl/LinkLevelFLowControl is configured on same interface.

Recommended Action: To recover from this fault, try the following actions

1. Remove either PriorityFlowControl or LinkLevelFLowControl configuration

F4092: fltL1LinkLevelFlowCtrlPConfigMismatchLlfc

Severity: warning

Explanation: This fault occurs when PriorityFlowControl/LinkLevelFLowControl is configured on same interface.

Recommended Action: To recover from this fault, try the following actions

1. Remove either PriorityFlowControl or LinkLevelFLowControl configuration

F4093: fltL1LinkLevelFlowCtrlPPolicyConfigMissing

Severity: warning

Explanation: This fault occurs when LLFC is configured without slow-drain policy.

Recommended Action: To recover from this fault, try the following actions

1. slow-drain configuration is required for LLFC to work

F4096: fltHcloudRsEpToSecurityGroupErrorRsEpToSecurityGroupError

Severity: minor

Explanation: This fault occurs where the Endpoint Group could not be attached to the target Endpoint even if it was matching the Selector's expression.

Recommended Action: If you see this fault, take the following actions:

1. Depending on the cloud provider and your configuration, an Endpoint can be attached to at most one EPG. Make sure that the EPG's Selector is matching the intended Endpoint.

2. If fault still has not cleared, please contact Cisco TAC.

F4097: fltHinventoryRsAddsToRegionResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F4098: fltHinventoryRsAddsToSubnetResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F409864: fltTcaTunnelEgrTepCntrs5minDropBytesLast

Severity: variable

Explanation: This fault is caused by "Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409865: fltTcaTunnelEgrTepCntrs15minDropBytesLast

Severity: variable

Explanation: This fault is caused by "Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409866: fltTcaTunnelEgrTepCntrs1hDropBytesLast

Severity: variable

Explanation: This fault is caused by "Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409867: fltTcaTunnelEgrTepCntrs1dDropBytesLast

Severity: variable

Explanation: This fault is caused by "Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409868: fltTcaTunnelEgrTepCntrs1wDropBytesLast

Severity: variable

Explanation: This fault is caused by "Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409869: fltTcaTunnelEgrTepCntrs1moDropBytesLast

Severity: variable

Explanation: This fault is caused by "Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409870: fltTcaTunnelEgrTepCntrs1qtrDropBytesLast

Severity: variable

Explanation: This fault is caused by "Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409871: fltTcaTunnelEgrTepCntrs1yearDropBytesLast

Severity: variable

Explanation: This fault is caused by "Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409880: fltTcaTunnelEgrTepCntrs5minDropBytesCum

Severity: variable

Explanation: This fault is caused by "Drop Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409881: fltTcaTunnelEgrTepCntrs15minDropBytesCum

Severity: variable

Explanation: This fault is caused by "Drop Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409882: fltTcaTunnelEgrTepCntrs1hDropBytesCum

Severity: variable

Explanation: This fault is caused by "Drop Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409883: fltTcaTunnelEgrTepCntrs1dDropBytesCum

Severity: variable

Explanation: This fault is caused by "Drop Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409884: fltTcaTunnelEgrTepCntrs1wDropBytesCum

Severity: variable

Explanation: This fault is caused by "Drop Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409885: fltTcaTunnelEgrTepCntrs1moDropBytesCum

Severity: variable

Explanation: This fault is caused by "Drop Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409886: fltTcaTunnelEgrTepCntrs1qtrDropBytesCum

Severity: variable

Explanation: This fault is caused by "Drop Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409887: fltTcaTunnelEgrTepCntrs1yearDropBytesCum

Severity: variable

Explanation: This fault is caused by "Drop Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409888: fltTcaTunnelEgrTepCntrs5minDropBytesPer

Severity: variable

Explanation: This fault is caused by "Drop Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409889: fltTcaTunnelEgrTepCntrs15minDropBytesPer

Severity: variable

Explanation: This fault is caused by "Drop Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409890: fltTcaTunnelEgrTepCntrs1hDropBytesPer

Severity: variable

Explanation: This fault is caused by "Drop Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409891: fltTcaTunnelEgrTepCntrs1dDropBytesPer

Severity: variable

Explanation: This fault is caused by "Drop Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409892: fltTcaTunnelEgrTepCntrs1wDropBytesPer

Severity: variable

Explanation: This fault is caused by "Drop Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409893: fltTcaTunnelEgrTepCntrs1moDropBytesPer

Severity: variable

Explanation: This fault is caused by "Drop Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409894: fltTcaTunnelEgrTepCntrs1qtrDropBytesPer

Severity: variable

Explanation: This fault is caused by "Drop Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409895: fltTcaTunnelEgrTepCntrs1yearDropBytesPer

Severity: variable

Explanation: This fault is caused by "Drop Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409896: fltTcaTunnelEgrTepCntrs5minDropBytesMin

Severity: variable

Explanation: This fault is caused by "Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409897: fltTcaTunnelEgrTepCntrs15minDropBytesMin

Severity: variable

Explanation: This fault is caused by "Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409898: fltTcaTunnelEgrTepCntrs1hDropBytesMin

Severity: variable

Explanation: This fault is caused by "Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409899: fltTcaTunnelEgrTepCntrs1dDropBytesMin

Severity: variable

Explanation: This fault is caused by "Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4099: fltCoopDomCoopCoopAssertHit

Severity: major

Explanation: This fault occurs when the coop assert is hit

Recommended Action: Try the following action

1. Generate the show tech-support file and contact Cisco TAC.

F409900: fltTcaTunnelEgrTepCntrs1wDropBytesMin

Severity: variable

Explanation: This fault is caused by "Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409901: fltTcaTunnelEgrTepCntrs1moDropBytesMin

Severity: variable

Explanation: This fault is caused by "Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409902: fltTcaTunnelEgrTepCntrs1qtrDropBytesMin

Severity: variable

Explanation: This fault is caused by "Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409903: fltTcaTunnelEgrTepCntrs1yearDropBytesMin

Severity: variable

Explanation: This fault is caused by "Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409904: fltTcaTunnelEgrTepCntrs5minDropBytesMax

Severity: variable

Explanation: This fault is caused by "Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409905: fltTcaTunnelEgrTepCntrs15minDropBytesMax

Severity: variable

Explanation: This fault is caused by "Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409906: fltTcaTunnelEgrTepCntrs1hDropBytesMax

Severity: variable

Explanation: This fault is caused by "Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409907: fltTcaTunnelEgrTepCntrs1dDropBytesMax

Severity: variable

Explanation: This fault is caused by "Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409908: fltTcaTunnelEgrTepCntrs1wDropBytesMax

Severity: variable

Explanation: This fault is caused by "Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409909: fltTcaTunnelEgrTepCntrs1moDropBytesMax

Severity: variable

Explanation: This fault is caused by "Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409910: fltTcaTunnelEgrTepCntrs1qtrDropBytesMax

Severity: variable

Explanation: This fault is caused by "Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409911: fltTcaTunnelEgrTepCntrs1yearDropBytesMax

Severity: variable

Explanation: This fault is caused by "Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409912: fltTcaTunnelEgrTepCntrs5minDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409913: fltTcaTunnelEgrTepCntrs15minDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409914: fltTcaTunnelEgrTepCntrs1hDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409915: fltTcaTunnelEgrTepCntrs1dDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409916: fltTcaTunnelEgrTepCntrs1wDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409917: fltTcaTunnelEgrTepCntrs1moDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409918: fltTcaTunnelEgrTepCntrs1qtrDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409919: fltTcaTunnelEgrTepCntrs1yearDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409944: fltTcaTunnelEgrTepCntrs5minDropBytesTr

Severity: variable

Explanation: This fault is caused by "Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409945: fltTcaTunnelEgrTepCntrs15minDropBytesTr

Severity: variable

Explanation: This fault is caused by "Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409946: fltTcaTunnelEgrTepCntrs1hDropBytesTr

Severity: variable

Explanation: This fault is caused by "Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409947: fltTcaTunnelEgrTepCntrs1dDropBytesTr

Severity: variable

Explanation: This fault is caused by "Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409948: fltTcaTunnelEgrTepCntrs1wDropBytesTr

Severity: variable

Explanation: This fault is caused by "Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409949: fltTcaTunnelEgrTepCntrs1moDropBytesTr

Severity: variable

Explanation: This fault is caused by "Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409950: fltTcaTunnelEgrTepCntrs1qtrDropBytesTr

Severity: variable

Explanation: This fault is caused by "Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409951: fltTcaTunnelEgrTepCntrs1yearDropBytesTr

Severity: variable

Explanation: This fault is caused by "Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409952: fltTcaTunnelEgrTepCntrs5minDropBytesRate

Severity: variable

Explanation: This fault is caused by "Drop Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409953: fltTcaTunnelEgrTepCntrs15minDropBytesRate

Severity: variable

Explanation: This fault is caused by "Drop Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409954: fltTcaTunnelEgrTepCntrs1hDropBytesRate

Severity: variable

Explanation: This fault is caused by "Drop Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409955: fltTcaTunnelEgrTepCntrs1dDropBytesRate

Severity: variable

Explanation: This fault is caused by "Drop Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409956: fltTcaTunnelEgrTepCntrs1wDropBytesRate

Severity: variable

Explanation: This fault is caused by "Drop Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409957: fltTcaTunnelEgrTepCntrs1moDropBytesRate

Severity: variable

Explanation: This fault is caused by "Drop Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409958: fltTcaTunnelEgrTepCntrs1qtrDropBytesRate

Severity: variable

Explanation: This fault is caused by "Drop Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F409959: fltTcaTunnelEgrTepCntrs1yearDropBytesRate

Severity: variable

Explanation: This fault is caused by "Drop Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4100: fltTopSystemRouteTableModifyFail

Severity: minor

Explanation: This fault occurs when a configured static route cannot be created.

Recommended Action: If you see this fault, take the following actions:

1. Verify the route table for a similar route.

2. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F410032: fltTcaTunnelEgrTepCntrs5minDropPktsLast

Severity: variable

Explanation: This fault is caused by "Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410033: fltTcaTunnelEgrTepCntrs15minDropPktsLast

Severity: variable

Explanation: This fault is caused by "Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410034: fltTcaTunnelEgrTepCntrs1hDropPktsLast

Severity: variable

Explanation: This fault is caused by "Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410035: fltTcaTunnelEgrTepCntrs1dDropPktsLast

Severity: variable

Explanation: This fault is caused by "Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410036: fltTcaTunnelEgrTepCntrs1wDropPktsLast

Severity: variable

Explanation: This fault is caused by "Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410037: fltTcaTunnelEgrTepCntrs1moDropPktsLast

Severity: variable

Explanation: This fault is caused by "Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410038: fltTcaTunnelEgrTepCntrs1qtrDropPktsLast

Severity: variable

Explanation: This fault is caused by "Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410039: fltTcaTunnelEgrTepCntrs1yearDropPktsLast

Severity: variable

Explanation: This fault is caused by "Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410048: fltTcaTunnelEgrTepCntrs5minDropPktsCum

Severity: variable

Explanation: This fault is caused by "Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410049: fltTcaTunnelEgrTepCntrs15minDropPktsCum

Severity: variable

Explanation: This fault is caused by "Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410050: fltTcaTunnelEgrTepCntrs1hDropPktsCum

Severity: variable

Explanation: This fault is caused by "Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410051: fltTcaTunnelEgrTepCntrs1dDropPktsCum

Severity: variable

Explanation: This fault is caused by "Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410052: fltTcaTunnelEgrTepCntrs1wDropPktsCum

Severity: variable

Explanation: This fault is caused by "Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410053: fltTcaTunnelEgrTepCntrs1moDropPktsCum

Severity: variable

Explanation: This fault is caused by "Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410054: fltTcaTunnelEgrTepCntrs1qtrDropPktsCum

Severity: variable

Explanation: This fault is caused by "Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410055: fltTcaTunnelEgrTepCntrs1yearDropPktsCum

Severity: variable

Explanation: This fault is caused by "Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410056: fltTcaTunnelEgrTepCntrs5minDropPktsPer

Severity: variable

Explanation: This fault is caused by "Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410057: fltTcaTunnelEgrTepCntrs15minDropPktsPer

Severity: variable

Explanation: This fault is caused by "Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410058: fltTcaTunnelEgrTepCntrs1hDropPktsPer

Severity: variable

Explanation: This fault is caused by "Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410059: fltTcaTunnelEgrTepCntrs1dDropPktsPer

Severity: variable

Explanation: This fault is caused by "Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410060: fltTcaTunnelEgrTepCntrs1wDropPktsPer

Severity: variable

Explanation: This fault is caused by "Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410061: fltTcaTunnelEgrTepCntrs1moDropPktsPer

Severity: variable

Explanation: This fault is caused by "Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410062: fltTcaTunnelEgrTepCntrs1qtrDropPktsPer

Severity: variable

Explanation: This fault is caused by "Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410063: fltTcaTunnelEgrTepCntrs1yearDropPktsPer

Severity: variable

Explanation: This fault is caused by "Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410064: fltTcaTunnelEgrTepCntrs5minDropPktsMin

Severity: variable

Explanation: This fault is caused by "Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410065: fltTcaTunnelEgrTepCntrs15minDropPktsMin

Severity: variable

Explanation: This fault is caused by "Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410066: fltTcaTunnelEgrTepCntrs1hDropPktsMin

Severity: variable

Explanation: This fault is caused by "Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410067: fltTcaTunnelEgrTepCntrs1dDropPktsMin

Severity: variable

Explanation: This fault is caused by "Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410068: fltTcaTunnelEgrTepCntrs1wDropPktsMin

Severity: variable

Explanation: This fault is caused by "Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410069: fltTcaTunnelEgrTepCntrs1moDropPktsMin

Severity: variable

Explanation: This fault is caused by "Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410070: fltTcaTunnelEgrTepCntrs1qtrDropPktsMin

Severity: variable

Explanation: This fault is caused by "Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410071: fltTcaTunnelEgrTepCntrs1yearDropPktsMin

Severity: variable

Explanation: This fault is caused by "Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410072: fltTcaTunnelEgrTepCntrs5minDropPktsMax

Severity: variable

Explanation: This fault is caused by "Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410073: fltTcaTunnelEgrTepCntrs15minDropPktsMax

Severity: variable

Explanation: This fault is caused by "Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410074: fltTcaTunnelEgrTepCntrs1hDropPktsMax

Severity: variable

Explanation: This fault is caused by "Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410075: fltTcaTunnelEgrTepCntrs1dDropPktsMax

Severity: variable

Explanation: This fault is caused by "Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410076: fltTcaTunnelEgrTepCntrs1wDropPktsMax

Severity: variable

Explanation: This fault is caused by "Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410077: fltTcaTunnelEgrTepCntrs1moDropPktsMax

Severity: variable

Explanation: This fault is caused by "Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410078: fltTcaTunnelEgrTepCntrs1qtrDropPktsMax

Severity: variable

Explanation: This fault is caused by "Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410079: fltTcaTunnelEgrTepCntrs1yearDropPktsMax

Severity: variable

Explanation: This fault is caused by "Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410080: fltTcaTunnelEgrTepCntrs5minDropPktsAvg

Severity: variable

Explanation: This fault is caused by "Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410081: fltTcaTunnelEgrTepCntrs15minDropPktsAvg

Severity: variable

Explanation: This fault is caused by "Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410082: fltTcaTunnelEgrTepCntrs1hDropPktsAvg

Severity: variable

Explanation: This fault is caused by "Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410083: fltTcaTunnelEgrTepCntrs1dDropPktsAvg

Severity: variable

Explanation: This fault is caused by "Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410084: fltTcaTunnelEgrTepCntrs1wDropPktsAvg

Severity: variable

Explanation: This fault is caused by "Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410085: fltTcaTunnelEgrTepCntrs1moDropPktsAvg

Severity: variable

Explanation: This fault is caused by "Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410086: fltTcaTunnelEgrTepCntrs1qtrDropPktsAvg

Severity: variable

Explanation: This fault is caused by "Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410087: fltTcaTunnelEgrTepCntrs1yearDropPktsAvg

Severity: variable

Explanation: This fault is caused by "Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4101: fltTopSystemCimcAddrSetFailure

Severity: minor

Explanation: This fault occurs when the controller's CIMC IP/Mask/Gateway cannot be update.

Recommended Action: If you see this fault, take the following actions:

1. Verify that IP/Mask/Gateway are valid.

2. Verify that CIMC IP/Mask/Gateway have not been updated by checking the CIMC UI or running ipmitool command on the controller.

3. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F410112: fltTcaTunnelEgrTepCntrs5minDropPktsTr

Severity: variable

Explanation: This fault is caused by "Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410113: fltTcaTunnelEgrTepCntrs15minDropPktsTr

Severity: variable

Explanation: This fault is caused by "Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410114: fltTcaTunnelEgrTepCntrs1hDropPktsTr

Severity: variable

Explanation: This fault is caused by "Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410115: fltTcaTunnelEgrTepCntrs1dDropPktsTr

Severity: variable

Explanation: This fault is caused by "Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410116: fltTcaTunnelEgrTepCntrs1wDropPktsTr

Severity: variable

Explanation: This fault is caused by "Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410117: fltTcaTunnelEgrTepCntrs1moDropPktsTr

Severity: variable

Explanation: This fault is caused by "Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410118: fltTcaTunnelEgrTepCntrs1qtrDropPktsTr

Severity: variable

Explanation: This fault is caused by "Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410119: fltTcaTunnelEgrTepCntrs1yearDropPktsTr

Severity: variable

Explanation: This fault is caused by "Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410120: fltTcaTunnelEgrTepCntrs5minDropPktsRate

Severity: variable

Explanation: This fault is caused by "Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410121: fltTcaTunnelEgrTepCntrs15minDropPktsRate

Severity: variable

Explanation: This fault is caused by "Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410122: fltTcaTunnelEgrTepCntrs1hDropPktsRate

Severity: variable

Explanation: This fault is caused by "Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410123: fltTcaTunnelEgrTepCntrs1dDropPktsRate

Severity: variable

Explanation: This fault is caused by "Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410124: fltTcaTunnelEgrTepCntrs1wDropPktsRate

Severity: variable

Explanation: This fault is caused by "Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410125: fltTcaTunnelEgrTepCntrs1moDropPktsRate

Severity: variable

Explanation: This fault is caused by "Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410126: fltTcaTunnelEgrTepCntrs1qtrDropPktsRate

Severity: variable

Explanation: This fault is caused by "Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410127: fltTcaTunnelEgrTepCntrs1yearDropPktsRate

Severity: variable

Explanation: This fault is caused by "Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410200: fltTcaTunnelEgrTepCntrs5minFwdBytesLast

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410201: fltTcaTunnelEgrTepCntrs15minFwdBytesLast

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410202: fltTcaTunnelEgrTepCntrs1hFwdBytesLast

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410203: fltTcaTunnelEgrTepCntrs1dFwdBytesLast

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410204: fltTcaTunnelEgrTepCntrs1wFwdBytesLast

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410205: fltTcaTunnelEgrTepCntrs1moFwdBytesLast

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410206: fltTcaTunnelEgrTepCntrs1qtrFwdBytesLast

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410207: fltTcaTunnelEgrTepCntrs1yearFwdBytesLast

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410216: fltTcaTunnelEgrTepCntrs5minFwdBytesCum

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410217: fltTcaTunnelEgrTepCntrs15minFwdBytesCum

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410218: fltTcaTunnelEgrTepCntrs1hFwdBytesCum

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410219: fltTcaTunnelEgrTepCntrs1dFwdBytesCum

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410220: fltTcaTunnelEgrTepCntrs1wFwdBytesCum

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410221: fltTcaTunnelEgrTepCntrs1moFwdBytesCum

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410222: fltTcaTunnelEgrTepCntrs1qtrFwdBytesCum

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410223: fltTcaTunnelEgrTepCntrs1yearFwdBytesCum

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410224: fltTcaTunnelEgrTepCntrs5minFwdBytesPer

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410225: fltTcaTunnelEgrTepCntrs15minFwdBytesPer

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410226: fltTcaTunnelEgrTepCntrs1hFwdBytesPer

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410227: fltTcaTunnelEgrTepCntrs1dFwdBytesPer

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410228: fltTcaTunnelEgrTepCntrs1wFwdBytesPer

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410229: fltTcaTunnelEgrTepCntrs1moFwdBytesPer

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410230: fltTcaTunnelEgrTepCntrs1qtrFwdBytesPer

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410231: fltTcaTunnelEgrTepCntrs1yearFwdBytesPer

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410232: fltTcaTunnelEgrTepCntrs5minFwdBytesMin

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410233: fltTcaTunnelEgrTepCntrs15minFwdBytesMin

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410234: fltTcaTunnelEgrTepCntrs1hFwdBytesMin

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410235: fltTcaTunnelEgrTepCntrs1dFwdBytesMin

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410236: fltTcaTunnelEgrTepCntrs1wFwdBytesMin

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410237: fltTcaTunnelEgrTepCntrs1moFwdBytesMin

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410238: fltTcaTunnelEgrTepCntrs1qtrFwdBytesMin

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410239: fltTcaTunnelEgrTepCntrs1yearFwdBytesMin

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410240: fltTcaTunnelEgrTepCntrs5minFwdBytesMax

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410241: fltTcaTunnelEgrTepCntrs15minFwdBytesMax

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410242: fltTcaTunnelEgrTepCntrs1hFwdBytesMax

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410243: fltTcaTunnelEgrTepCntrs1dFwdBytesMax

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410244: fltTcaTunnelEgrTepCntrs1wFwdBytesMax

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410245: fltTcaTunnelEgrTepCntrs1moFwdBytesMax

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410246: fltTcaTunnelEgrTepCntrs1qtrFwdBytesMax

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410247: fltTcaTunnelEgrTepCntrs1yearFwdBytesMax

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410248: fltTcaTunnelEgrTepCntrs5minFwdBytesAvg

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410249: fltTcaTunnelEgrTepCntrs15minFwdBytesAvg

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410250: fltTcaTunnelEgrTepCntrs1hFwdBytesAvg

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410251: fltTcaTunnelEgrTepCntrs1dFwdBytesAvg

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410252: fltTcaTunnelEgrTepCntrs1wFwdBytesAvg

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410253: fltTcaTunnelEgrTepCntrs1moFwdBytesAvg

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410254: fltTcaTunnelEgrTepCntrs1qtrFwdBytesAvg

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410255: fltTcaTunnelEgrTepCntrs1yearFwdBytesAvg

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410280: fltTcaTunnelEgrTepCntrs5minFwdBytesTr

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410281: fltTcaTunnelEgrTepCntrs15minFwdBytesTr

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410282: fltTcaTunnelEgrTepCntrs1hFwdBytesTr

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410283: fltTcaTunnelEgrTepCntrs1dFwdBytesTr

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410284: fltTcaTunnelEgrTepCntrs1wFwdBytesTr

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410285: fltTcaTunnelEgrTepCntrs1moFwdBytesTr

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410286: fltTcaTunnelEgrTepCntrs1qtrFwdBytesTr

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410287: fltTcaTunnelEgrTepCntrs1yearFwdBytesTr

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410288: fltTcaTunnelEgrTepCntrs5minFwdBytesRate

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410289: fltTcaTunnelEgrTepCntrs15minFwdBytesRate

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410290: fltTcaTunnelEgrTepCntrs1hFwdBytesRate

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410291: fltTcaTunnelEgrTepCntrs1dFwdBytesRate

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410292: fltTcaTunnelEgrTepCntrs1wFwdBytesRate

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410293: fltTcaTunnelEgrTepCntrs1moFwdBytesRate

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410294: fltTcaTunnelEgrTepCntrs1qtrFwdBytesRate

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410295: fltTcaTunnelEgrTepCntrs1yearFwdBytesRate

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4103: fltDatetimeRsNtpProvToNtpAuthKey2ResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F410368: fltTcaTunnelEgrTepCntrs5minFwdPktsLast

Severity: variable

Explanation: This fault is caused by "Forwarded Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410369: fltTcaTunnelEgrTepCntrs15minFwdPktsLast

Severity: variable

Explanation: This fault is caused by "Forwarded Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410370: fltTcaTunnelEgrTepCntrs1hFwdPktsLast

Severity: variable

Explanation: This fault is caused by "Forwarded Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410371: fltTcaTunnelEgrTepCntrs1dFwdPktsLast

Severity: variable

Explanation: This fault is caused by "Forwarded Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410372: fltTcaTunnelEgrTepCntrs1wFwdPktsLast

Severity: variable

Explanation: This fault is caused by "Forwarded Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410373: fltTcaTunnelEgrTepCntrs1moFwdPktsLast

Severity: variable

Explanation: This fault is caused by "Forwarded Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410374: fltTcaTunnelEgrTepCntrs1qtrFwdPktsLast

Severity: variable

Explanation: This fault is caused by "Forwarded Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410375: fltTcaTunnelEgrTepCntrs1yearFwdPktsLast

Severity: variable

Explanation: This fault is caused by "Forwarded Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410384: fltTcaTunnelEgrTepCntrs5minFwdPktsCum

Severity: variable

Explanation: This fault is caused by "Forwarded Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410385: fltTcaTunnelEgrTepCntrs15minFwdPktsCum

Severity: variable

Explanation: This fault is caused by "Forwarded Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410386: fltTcaTunnelEgrTepCntrs1hFwdPktsCum

Severity: variable

Explanation: This fault is caused by "Forwarded Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410387: fltTcaTunnelEgrTepCntrs1dFwdPktsCum

Severity: variable

Explanation: This fault is caused by "Forwarded Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410388: fltTcaTunnelEgrTepCntrs1wFwdPktsCum

Severity: variable

Explanation: This fault is caused by "Forwarded Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410389: fltTcaTunnelEgrTepCntrs1moFwdPktsCum

Severity: variable

Explanation: This fault is caused by "Forwarded Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410390: fltTcaTunnelEgrTepCntrs1qtrFwdPktsCum

Severity: variable

Explanation: This fault is caused by "Forwarded Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410391: fltTcaTunnelEgrTepCntrs1yearFwdPktsCum

Severity: variable

Explanation: This fault is caused by "Forwarded Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410392: fltTcaTunnelEgrTepCntrs5minFwdPktsPer

Severity: variable

Explanation: This fault is caused by "Forwarded Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410393: fltTcaTunnelEgrTepCntrs15minFwdPktsPer

Severity: variable

Explanation: This fault is caused by "Forwarded Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410394: fltTcaTunnelEgrTepCntrs1hFwdPktsPer

Severity: variable

Explanation: This fault is caused by "Forwarded Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410395: fltTcaTunnelEgrTepCntrs1dFwdPktsPer

Severity: variable

Explanation: This fault is caused by "Forwarded Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410396: fltTcaTunnelEgrTepCntrs1wFwdPktsPer

Severity: variable

Explanation: This fault is caused by "Forwarded Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410397: fltTcaTunnelEgrTepCntrs1moFwdPktsPer

Severity: variable

Explanation: This fault is caused by "Forwarded Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410398: fltTcaTunnelEgrTepCntrs1qtrFwdPktsPer

Severity: variable

Explanation: This fault is caused by "Forwarded Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410399: fltTcaTunnelEgrTepCntrs1yearFwdPktsPer

Severity: variable

Explanation: This fault is caused by "Forwarded Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4104: fltL3extRsPathL3OutAttMtuMacMismatch

Severity: warning

Explanation: This fault occurs when identical l3extRsPathL3OutAtt are configured with different MTU/MAC values. l3extRsPathL3OutAtt are identical when their IP, VLAN and node/interface values are same. Only one of the configured MTU/MAC values will be used on the interface.

Recommended Action: If you see this fault, take the following actions:

1. Confgure the same MTU/MAC on all l3extRsPathL3OutAtt with identical IP, VLAN and interface.

F410400: fltTcaTunnelEgrTepCntrs5minFwdPktsMin

Severity: variable

Explanation: This fault is caused by "Forwarded Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410401: fltTcaTunnelEgrTepCntrs15minFwdPktsMin

Severity: variable

Explanation: This fault is caused by "Forwarded Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410402: fltTcaTunnelEgrTepCntrs1hFwdPktsMin

Severity: variable

Explanation: This fault is caused by "Forwarded Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410403: fltTcaTunnelEgrTepCntrs1dFwdPktsMin

Severity: variable

Explanation: This fault is caused by "Forwarded Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410404: fltTcaTunnelEgrTepCntrs1wFwdPktsMin

Severity: variable

Explanation: This fault is caused by "Forwarded Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410405: fltTcaTunnelEgrTepCntrs1moFwdPktsMin

Severity: variable

Explanation: This fault is caused by "Forwarded Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410406: fltTcaTunnelEgrTepCntrs1qtrFwdPktsMin

Severity: variable

Explanation: This fault is caused by "Forwarded Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410407: fltTcaTunnelEgrTepCntrs1yearFwdPktsMin

Severity: variable

Explanation: This fault is caused by "Forwarded Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410408: fltTcaTunnelEgrTepCntrs5minFwdPktsMax

Severity: variable

Explanation: This fault is caused by "Forwarded Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410409: fltTcaTunnelEgrTepCntrs15minFwdPktsMax

Severity: variable

Explanation: This fault is caused by "Forwarded Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410410: fltTcaTunnelEgrTepCntrs1hFwdPktsMax

Severity: variable

Explanation: This fault is caused by "Forwarded Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410411: fltTcaTunnelEgrTepCntrs1dFwdPktsMax

Severity: variable

Explanation: This fault is caused by "Forwarded Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410412: fltTcaTunnelEgrTepCntrs1wFwdPktsMax

Severity: variable

Explanation: This fault is caused by "Forwarded Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410413: fltTcaTunnelEgrTepCntrs1moFwdPktsMax

Severity: variable

Explanation: This fault is caused by "Forwarded Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410414: fltTcaTunnelEgrTepCntrs1qtrFwdPktsMax

Severity: variable

Explanation: This fault is caused by "Forwarded Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410415: fltTcaTunnelEgrTepCntrs1yearFwdPktsMax

Severity: variable

Explanation: This fault is caused by "Forwarded Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410416: fltTcaTunnelEgrTepCntrs5minFwdPktsAvg

Severity: variable

Explanation: This fault is caused by "Forwarded Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410417: fltTcaTunnelEgrTepCntrs15minFwdPktsAvg

Severity: variable

Explanation: This fault is caused by "Forwarded Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410418: fltTcaTunnelEgrTepCntrs1hFwdPktsAvg

Severity: variable

Explanation: This fault is caused by "Forwarded Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410419: fltTcaTunnelEgrTepCntrs1dFwdPktsAvg

Severity: variable

Explanation: This fault is caused by "Forwarded Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410420: fltTcaTunnelEgrTepCntrs1wFwdPktsAvg

Severity: variable

Explanation: This fault is caused by "Forwarded Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410421: fltTcaTunnelEgrTepCntrs1moFwdPktsAvg

Severity: variable

Explanation: This fault is caused by "Forwarded Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410422: fltTcaTunnelEgrTepCntrs1qtrFwdPktsAvg

Severity: variable

Explanation: This fault is caused by "Forwarded Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410423: fltTcaTunnelEgrTepCntrs1yearFwdPktsAvg

Severity: variable

Explanation: This fault is caused by "Forwarded Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410448: fltTcaTunnelEgrTepCntrs5minFwdPktsTr

Severity: variable

Explanation: This fault is caused by "Forwarded Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410449: fltTcaTunnelEgrTepCntrs15minFwdPktsTr

Severity: variable

Explanation: This fault is caused by "Forwarded Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410450: fltTcaTunnelEgrTepCntrs1hFwdPktsTr

Severity: variable

Explanation: This fault is caused by "Forwarded Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410451: fltTcaTunnelEgrTepCntrs1dFwdPktsTr

Severity: variable

Explanation: This fault is caused by "Forwarded Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410452: fltTcaTunnelEgrTepCntrs1wFwdPktsTr

Severity: variable

Explanation: This fault is caused by "Forwarded Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410453: fltTcaTunnelEgrTepCntrs1moFwdPktsTr

Severity: variable

Explanation: This fault is caused by "Forwarded Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410454: fltTcaTunnelEgrTepCntrs1qtrFwdPktsTr

Severity: variable

Explanation: This fault is caused by "Forwarded Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410455: fltTcaTunnelEgrTepCntrs1yearFwdPktsTr

Severity: variable

Explanation: This fault is caused by "Forwarded Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410456: fltTcaTunnelEgrTepCntrs5minFwdPktsRate

Severity: variable

Explanation: This fault is caused by "Forwarded Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410457: fltTcaTunnelEgrTepCntrs15minFwdPktsRate

Severity: variable

Explanation: This fault is caused by "Forwarded Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410458: fltTcaTunnelEgrTepCntrs1hFwdPktsRate

Severity: variable

Explanation: This fault is caused by "Forwarded Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410459: fltTcaTunnelEgrTepCntrs1dFwdPktsRate

Severity: variable

Explanation: This fault is caused by "Forwarded Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410460: fltTcaTunnelEgrTepCntrs1wFwdPktsRate

Severity: variable

Explanation: This fault is caused by "Forwarded Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410461: fltTcaTunnelEgrTepCntrs1moFwdPktsRate

Severity: variable

Explanation: This fault is caused by "Forwarded Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410462: fltTcaTunnelEgrTepCntrs1qtrFwdPktsRate

Severity: variable

Explanation: This fault is caused by "Forwarded Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410463: fltTcaTunnelEgrTepCntrs1yearFwdPktsRate

Severity: variable

Explanation: This fault is caused by "Forwarded Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410536: fltTcaTunnelIngrTepCntrs5minDropBytesLast

Severity: variable

Explanation: This fault is caused by "Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410537: fltTcaTunnelIngrTepCntrs15minDropBytesLast

Severity: variable

Explanation: This fault is caused by "Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410538: fltTcaTunnelIngrTepCntrs1hDropBytesLast

Severity: variable

Explanation: This fault is caused by "Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410539: fltTcaTunnelIngrTepCntrs1dDropBytesLast

Severity: variable

Explanation: This fault is caused by "Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410540: fltTcaTunnelIngrTepCntrs1wDropBytesLast

Severity: variable

Explanation: This fault is caused by "Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410541: fltTcaTunnelIngrTepCntrs1moDropBytesLast

Severity: variable

Explanation: This fault is caused by "Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410542: fltTcaTunnelIngrTepCntrs1qtrDropBytesLast

Severity: variable

Explanation: This fault is caused by "Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410543: fltTcaTunnelIngrTepCntrs1yearDropBytesLast

Severity: variable

Explanation: This fault is caused by "Drop Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410552: fltTcaTunnelIngrTepCntrs5minDropBytesCum

Severity: variable

Explanation: This fault is caused by "Drop Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410553: fltTcaTunnelIngrTepCntrs15minDropBytesCum

Severity: variable

Explanation: This fault is caused by "Drop Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410554: fltTcaTunnelIngrTepCntrs1hDropBytesCum

Severity: variable

Explanation: This fault is caused by "Drop Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410555: fltTcaTunnelIngrTepCntrs1dDropBytesCum

Severity: variable

Explanation: This fault is caused by "Drop Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410556: fltTcaTunnelIngrTepCntrs1wDropBytesCum

Severity: variable

Explanation: This fault is caused by "Drop Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410557: fltTcaTunnelIngrTepCntrs1moDropBytesCum

Severity: variable

Explanation: This fault is caused by "Drop Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410558: fltTcaTunnelIngrTepCntrs1qtrDropBytesCum

Severity: variable

Explanation: This fault is caused by "Drop Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410559: fltTcaTunnelIngrTepCntrs1yearDropBytesCum

Severity: variable

Explanation: This fault is caused by "Drop Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410560: fltTcaTunnelIngrTepCntrs5minDropBytesPer

Severity: variable

Explanation: This fault is caused by "Drop Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410561: fltTcaTunnelIngrTepCntrs15minDropBytesPer

Severity: variable

Explanation: This fault is caused by "Drop Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410562: fltTcaTunnelIngrTepCntrs1hDropBytesPer

Severity: variable

Explanation: This fault is caused by "Drop Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410563: fltTcaTunnelIngrTepCntrs1dDropBytesPer

Severity: variable

Explanation: This fault is caused by "Drop Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410564: fltTcaTunnelIngrTepCntrs1wDropBytesPer

Severity: variable

Explanation: This fault is caused by "Drop Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410565: fltTcaTunnelIngrTepCntrs1moDropBytesPer

Severity: variable

Explanation: This fault is caused by "Drop Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410566: fltTcaTunnelIngrTepCntrs1qtrDropBytesPer

Severity: variable

Explanation: This fault is caused by "Drop Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410567: fltTcaTunnelIngrTepCntrs1yearDropBytesPer

Severity: variable

Explanation: This fault is caused by "Drop Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410568: fltTcaTunnelIngrTepCntrs5minDropBytesMin

Severity: variable

Explanation: This fault is caused by "Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410569: fltTcaTunnelIngrTepCntrs15minDropBytesMin

Severity: variable

Explanation: This fault is caused by "Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410570: fltTcaTunnelIngrTepCntrs1hDropBytesMin

Severity: variable

Explanation: This fault is caused by "Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410571: fltTcaTunnelIngrTepCntrs1dDropBytesMin

Severity: variable

Explanation: This fault is caused by "Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410572: fltTcaTunnelIngrTepCntrs1wDropBytesMin

Severity: variable

Explanation: This fault is caused by "Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410573: fltTcaTunnelIngrTepCntrs1moDropBytesMin

Severity: variable

Explanation: This fault is caused by "Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410574: fltTcaTunnelIngrTepCntrs1qtrDropBytesMin

Severity: variable

Explanation: This fault is caused by "Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410575: fltTcaTunnelIngrTepCntrs1yearDropBytesMin

Severity: variable

Explanation: This fault is caused by "Drop Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410576: fltTcaTunnelIngrTepCntrs5minDropBytesMax

Severity: variable

Explanation: This fault is caused by "Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410577: fltTcaTunnelIngrTepCntrs15minDropBytesMax

Severity: variable

Explanation: This fault is caused by "Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410578: fltTcaTunnelIngrTepCntrs1hDropBytesMax

Severity: variable

Explanation: This fault is caused by "Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410579: fltTcaTunnelIngrTepCntrs1dDropBytesMax

Severity: variable

Explanation: This fault is caused by "Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410580: fltTcaTunnelIngrTepCntrs1wDropBytesMax

Severity: variable

Explanation: This fault is caused by "Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410581: fltTcaTunnelIngrTepCntrs1moDropBytesMax

Severity: variable

Explanation: This fault is caused by "Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410582: fltTcaTunnelIngrTepCntrs1qtrDropBytesMax

Severity: variable

Explanation: This fault is caused by "Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410583: fltTcaTunnelIngrTepCntrs1yearDropBytesMax

Severity: variable

Explanation: This fault is caused by "Drop Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410584: fltTcaTunnelIngrTepCntrs5minDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410585: fltTcaTunnelIngrTepCntrs15minDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410586: fltTcaTunnelIngrTepCntrs1hDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410587: fltTcaTunnelIngrTepCntrs1dDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410588: fltTcaTunnelIngrTepCntrs1wDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410589: fltTcaTunnelIngrTepCntrs1moDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410590: fltTcaTunnelIngrTepCntrs1qtrDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410591: fltTcaTunnelIngrTepCntrs1yearDropBytesAvg

Severity: variable

Explanation: This fault is caused by "Drop Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410616: fltTcaTunnelIngrTepCntrs5minDropBytesTr

Severity: variable

Explanation: This fault is caused by "Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410617: fltTcaTunnelIngrTepCntrs15minDropBytesTr

Severity: variable

Explanation: This fault is caused by "Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410618: fltTcaTunnelIngrTepCntrs1hDropBytesTr

Severity: variable

Explanation: This fault is caused by "Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410619: fltTcaTunnelIngrTepCntrs1dDropBytesTr

Severity: variable

Explanation: This fault is caused by "Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410620: fltTcaTunnelIngrTepCntrs1wDropBytesTr

Severity: variable

Explanation: This fault is caused by "Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410621: fltTcaTunnelIngrTepCntrs1moDropBytesTr

Severity: variable

Explanation: This fault is caused by "Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410622: fltTcaTunnelIngrTepCntrs1qtrDropBytesTr

Severity: variable

Explanation: This fault is caused by "Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410623: fltTcaTunnelIngrTepCntrs1yearDropBytesTr

Severity: variable

Explanation: This fault is caused by "Drop Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410624: fltTcaTunnelIngrTepCntrs5minDropBytesRate

Severity: variable

Explanation: This fault is caused by "Drop Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410625: fltTcaTunnelIngrTepCntrs15minDropBytesRate

Severity: variable

Explanation: This fault is caused by "Drop Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410626: fltTcaTunnelIngrTepCntrs1hDropBytesRate

Severity: variable

Explanation: This fault is caused by "Drop Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410627: fltTcaTunnelIngrTepCntrs1dDropBytesRate

Severity: variable

Explanation: This fault is caused by "Drop Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410628: fltTcaTunnelIngrTepCntrs1wDropBytesRate

Severity: variable

Explanation: This fault is caused by "Drop Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410629: fltTcaTunnelIngrTepCntrs1moDropBytesRate

Severity: variable

Explanation: This fault is caused by "Drop Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410630: fltTcaTunnelIngrTepCntrs1qtrDropBytesRate

Severity: variable

Explanation: This fault is caused by "Drop Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410631: fltTcaTunnelIngrTepCntrs1yearDropBytesRate

Severity: variable

Explanation: This fault is caused by "Drop Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4107: fltApPluginHighPrivilegeAppNotSigned

Severity: minor

Explanation: This fault occurs when there is a signature verification failure for a high privilege app.

Recommended Action: If you see this fault, please make sure that app was not modified after downloading from Cisco. Re-download the app from cisco app center and try again.

F410704: fltTcaTunnelIngrTepCntrs5minDropPktsLast

Severity: variable

Explanation: This fault is caused by "Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410705: fltTcaTunnelIngrTepCntrs15minDropPktsLast

Severity: variable

Explanation: This fault is caused by "Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410706: fltTcaTunnelIngrTepCntrs1hDropPktsLast

Severity: variable

Explanation: This fault is caused by "Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410707: fltTcaTunnelIngrTepCntrs1dDropPktsLast

Severity: variable

Explanation: This fault is caused by "Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410708: fltTcaTunnelIngrTepCntrs1wDropPktsLast

Severity: variable

Explanation: This fault is caused by "Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410709: fltTcaTunnelIngrTepCntrs1moDropPktsLast

Severity: variable

Explanation: This fault is caused by "Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410710: fltTcaTunnelIngrTepCntrs1qtrDropPktsLast

Severity: variable

Explanation: This fault is caused by "Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410711: fltTcaTunnelIngrTepCntrs1yearDropPktsLast

Severity: variable

Explanation: This fault is caused by "Drop Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410720: fltTcaTunnelIngrTepCntrs5minDropPktsCum

Severity: variable

Explanation: This fault is caused by "Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410721: fltTcaTunnelIngrTepCntrs15minDropPktsCum

Severity: variable

Explanation: This fault is caused by "Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410722: fltTcaTunnelIngrTepCntrs1hDropPktsCum

Severity: variable

Explanation: This fault is caused by "Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410723: fltTcaTunnelIngrTepCntrs1dDropPktsCum

Severity: variable

Explanation: This fault is caused by "Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410724: fltTcaTunnelIngrTepCntrs1wDropPktsCum

Severity: variable

Explanation: This fault is caused by "Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410725: fltTcaTunnelIngrTepCntrs1moDropPktsCum

Severity: variable

Explanation: This fault is caused by "Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410726: fltTcaTunnelIngrTepCntrs1qtrDropPktsCum

Severity: variable

Explanation: This fault is caused by "Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410727: fltTcaTunnelIngrTepCntrs1yearDropPktsCum

Severity: variable

Explanation: This fault is caused by "Drop Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410728: fltTcaTunnelIngrTepCntrs5minDropPktsPer

Severity: variable

Explanation: This fault is caused by "Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410729: fltTcaTunnelIngrTepCntrs15minDropPktsPer

Severity: variable

Explanation: This fault is caused by "Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410730: fltTcaTunnelIngrTepCntrs1hDropPktsPer

Severity: variable

Explanation: This fault is caused by "Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410731: fltTcaTunnelIngrTepCntrs1dDropPktsPer

Severity: variable

Explanation: This fault is caused by "Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410732: fltTcaTunnelIngrTepCntrs1wDropPktsPer

Severity: variable

Explanation: This fault is caused by "Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410733: fltTcaTunnelIngrTepCntrs1moDropPktsPer

Severity: variable

Explanation: This fault is caused by "Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410734: fltTcaTunnelIngrTepCntrs1qtrDropPktsPer

Severity: variable

Explanation: This fault is caused by "Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410735: fltTcaTunnelIngrTepCntrs1yearDropPktsPer

Severity: variable

Explanation: This fault is caused by "Drop Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410736: fltTcaTunnelIngrTepCntrs5minDropPktsMin

Severity: variable

Explanation: This fault is caused by "Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410737: fltTcaTunnelIngrTepCntrs15minDropPktsMin

Severity: variable

Explanation: This fault is caused by "Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410738: fltTcaTunnelIngrTepCntrs1hDropPktsMin

Severity: variable

Explanation: This fault is caused by "Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410739: fltTcaTunnelIngrTepCntrs1dDropPktsMin

Severity: variable

Explanation: This fault is caused by "Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410740: fltTcaTunnelIngrTepCntrs1wDropPktsMin

Severity: variable

Explanation: This fault is caused by "Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410741: fltTcaTunnelIngrTepCntrs1moDropPktsMin

Severity: variable

Explanation: This fault is caused by "Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410742: fltTcaTunnelIngrTepCntrs1qtrDropPktsMin

Severity: variable

Explanation: This fault is caused by "Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410743: fltTcaTunnelIngrTepCntrs1yearDropPktsMin

Severity: variable

Explanation: This fault is caused by "Drop Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410744: fltTcaTunnelIngrTepCntrs5minDropPktsMax

Severity: variable

Explanation: This fault is caused by "Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410745: fltTcaTunnelIngrTepCntrs15minDropPktsMax

Severity: variable

Explanation: This fault is caused by "Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410746: fltTcaTunnelIngrTepCntrs1hDropPktsMax

Severity: variable

Explanation: This fault is caused by "Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410747: fltTcaTunnelIngrTepCntrs1dDropPktsMax

Severity: variable

Explanation: This fault is caused by "Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410748: fltTcaTunnelIngrTepCntrs1wDropPktsMax

Severity: variable

Explanation: This fault is caused by "Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410749: fltTcaTunnelIngrTepCntrs1moDropPktsMax

Severity: variable

Explanation: This fault is caused by "Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410750: fltTcaTunnelIngrTepCntrs1qtrDropPktsMax

Severity: variable

Explanation: This fault is caused by "Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410751: fltTcaTunnelIngrTepCntrs1yearDropPktsMax

Severity: variable

Explanation: This fault is caused by "Drop Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410752: fltTcaTunnelIngrTepCntrs5minDropPktsAvg

Severity: variable

Explanation: This fault is caused by "Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410753: fltTcaTunnelIngrTepCntrs15minDropPktsAvg

Severity: variable

Explanation: This fault is caused by "Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410754: fltTcaTunnelIngrTepCntrs1hDropPktsAvg

Severity: variable

Explanation: This fault is caused by "Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410755: fltTcaTunnelIngrTepCntrs1dDropPktsAvg

Severity: variable

Explanation: This fault is caused by "Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410756: fltTcaTunnelIngrTepCntrs1wDropPktsAvg

Severity: variable

Explanation: This fault is caused by "Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410757: fltTcaTunnelIngrTepCntrs1moDropPktsAvg

Severity: variable

Explanation: This fault is caused by "Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410758: fltTcaTunnelIngrTepCntrs1qtrDropPktsAvg

Severity: variable

Explanation: This fault is caused by "Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410759: fltTcaTunnelIngrTepCntrs1yearDropPktsAvg

Severity: variable

Explanation: This fault is caused by "Drop Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410784: fltTcaTunnelIngrTepCntrs5minDropPktsTr

Severity: variable

Explanation: This fault is caused by "Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410785: fltTcaTunnelIngrTepCntrs15minDropPktsTr

Severity: variable

Explanation: This fault is caused by "Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410786: fltTcaTunnelIngrTepCntrs1hDropPktsTr

Severity: variable

Explanation: This fault is caused by "Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410787: fltTcaTunnelIngrTepCntrs1dDropPktsTr

Severity: variable

Explanation: This fault is caused by "Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410788: fltTcaTunnelIngrTepCntrs1wDropPktsTr

Severity: variable

Explanation: This fault is caused by "Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410789: fltTcaTunnelIngrTepCntrs1moDropPktsTr

Severity: variable

Explanation: This fault is caused by "Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410790: fltTcaTunnelIngrTepCntrs1qtrDropPktsTr

Severity: variable

Explanation: This fault is caused by "Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410791: fltTcaTunnelIngrTepCntrs1yearDropPktsTr

Severity: variable

Explanation: This fault is caused by "Drop Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410792: fltTcaTunnelIngrTepCntrs5minDropPktsRate

Severity: variable

Explanation: This fault is caused by "Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410793: fltTcaTunnelIngrTepCntrs15minDropPktsRate

Severity: variable

Explanation: This fault is caused by "Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410794: fltTcaTunnelIngrTepCntrs1hDropPktsRate

Severity: variable

Explanation: This fault is caused by "Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410795: fltTcaTunnelIngrTepCntrs1dDropPktsRate

Severity: variable

Explanation: This fault is caused by "Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410796: fltTcaTunnelIngrTepCntrs1wDropPktsRate

Severity: variable

Explanation: This fault is caused by "Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410797: fltTcaTunnelIngrTepCntrs1moDropPktsRate

Severity: variable

Explanation: This fault is caused by "Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410798: fltTcaTunnelIngrTepCntrs1qtrDropPktsRate

Severity: variable

Explanation: This fault is caused by "Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410799: fltTcaTunnelIngrTepCntrs1yearDropPktsRate

Severity: variable

Explanation: This fault is caused by "Drop Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Drop Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4108: fltDbgacRsToEsgForEpgToEpgResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F410872: fltTcaTunnelIngrTepCntrs5minFwdBytesLast

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410873: fltTcaTunnelIngrTepCntrs15minFwdBytesLast

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410874: fltTcaTunnelIngrTepCntrs1hFwdBytesLast

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410875: fltTcaTunnelIngrTepCntrs1dFwdBytesLast

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410876: fltTcaTunnelIngrTepCntrs1wFwdBytesLast

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410877: fltTcaTunnelIngrTepCntrs1moFwdBytesLast

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410878: fltTcaTunnelIngrTepCntrs1qtrFwdBytesLast

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410879: fltTcaTunnelIngrTepCntrs1yearFwdBytesLast

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410888: fltTcaTunnelIngrTepCntrs5minFwdBytesCum

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410889: fltTcaTunnelIngrTepCntrs15minFwdBytesCum

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410890: fltTcaTunnelIngrTepCntrs1hFwdBytesCum

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410891: fltTcaTunnelIngrTepCntrs1dFwdBytesCum

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410892: fltTcaTunnelIngrTepCntrs1wFwdBytesCum

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410893: fltTcaTunnelIngrTepCntrs1moFwdBytesCum

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410894: fltTcaTunnelIngrTepCntrs1qtrFwdBytesCum

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410895: fltTcaTunnelIngrTepCntrs1yearFwdBytesCum

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410896: fltTcaTunnelIngrTepCntrs5minFwdBytesPer

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410897: fltTcaTunnelIngrTepCntrs15minFwdBytesPer

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410898: fltTcaTunnelIngrTepCntrs1hFwdBytesPer

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410899: fltTcaTunnelIngrTepCntrs1dFwdBytesPer

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4109: fltDbgacRsFromEsgResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F410900: fltTcaTunnelIngrTepCntrs1wFwdBytesPer

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410901: fltTcaTunnelIngrTepCntrs1moFwdBytesPer

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410902: fltTcaTunnelIngrTepCntrs1qtrFwdBytesPer

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410903: fltTcaTunnelIngrTepCntrs1yearFwdBytesPer

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410904: fltTcaTunnelIngrTepCntrs5minFwdBytesMin

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410905: fltTcaTunnelIngrTepCntrs15minFwdBytesMin

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410906: fltTcaTunnelIngrTepCntrs1hFwdBytesMin

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410907: fltTcaTunnelIngrTepCntrs1dFwdBytesMin

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410908: fltTcaTunnelIngrTepCntrs1wFwdBytesMin

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410909: fltTcaTunnelIngrTepCntrs1moFwdBytesMin

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410910: fltTcaTunnelIngrTepCntrs1qtrFwdBytesMin

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410911: fltTcaTunnelIngrTepCntrs1yearFwdBytesMin

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410912: fltTcaTunnelIngrTepCntrs5minFwdBytesMax

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410913: fltTcaTunnelIngrTepCntrs15minFwdBytesMax

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410914: fltTcaTunnelIngrTepCntrs1hFwdBytesMax

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410915: fltTcaTunnelIngrTepCntrs1dFwdBytesMax

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410916: fltTcaTunnelIngrTepCntrs1wFwdBytesMax

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410917: fltTcaTunnelIngrTepCntrs1moFwdBytesMax

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410918: fltTcaTunnelIngrTepCntrs1qtrFwdBytesMax

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410919: fltTcaTunnelIngrTepCntrs1yearFwdBytesMax

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410920: fltTcaTunnelIngrTepCntrs5minFwdBytesAvg

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410921: fltTcaTunnelIngrTepCntrs15minFwdBytesAvg

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410922: fltTcaTunnelIngrTepCntrs1hFwdBytesAvg

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410923: fltTcaTunnelIngrTepCntrs1dFwdBytesAvg

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410924: fltTcaTunnelIngrTepCntrs1wFwdBytesAvg

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410925: fltTcaTunnelIngrTepCntrs1moFwdBytesAvg

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410926: fltTcaTunnelIngrTepCntrs1qtrFwdBytesAvg

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410927: fltTcaTunnelIngrTepCntrs1yearFwdBytesAvg

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410952: fltTcaTunnelIngrTepCntrs5minFwdBytesTr

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410953: fltTcaTunnelIngrTepCntrs15minFwdBytesTr

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410954: fltTcaTunnelIngrTepCntrs1hFwdBytesTr

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410955: fltTcaTunnelIngrTepCntrs1dFwdBytesTr

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410956: fltTcaTunnelIngrTepCntrs1wFwdBytesTr

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410957: fltTcaTunnelIngrTepCntrs1moFwdBytesTr

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410958: fltTcaTunnelIngrTepCntrs1qtrFwdBytesTr

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410959: fltTcaTunnelIngrTepCntrs1yearFwdBytesTr

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410960: fltTcaTunnelIngrTepCntrs5minFwdBytesRate

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410961: fltTcaTunnelIngrTepCntrs15minFwdBytesRate

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410962: fltTcaTunnelIngrTepCntrs1hFwdBytesRate

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410963: fltTcaTunnelIngrTepCntrs1dFwdBytesRate

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410964: fltTcaTunnelIngrTepCntrs1wFwdBytesRate

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410965: fltTcaTunnelIngrTepCntrs1moFwdBytesRate

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410966: fltTcaTunnelIngrTepCntrs1qtrFwdBytesRate

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F410967: fltTcaTunnelIngrTepCntrs1yearFwdBytesRate

Severity: variable

Explanation: This fault is caused by "Forwarded Bytes rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Bytes" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4110: fltFvEpMacTagConfigurationFailed

Severity: minor

Explanation: This fault occurs when an Endpoint (fvEpMacTag) is not correctly configured.

Recommended Action: If you see this fault, take the following actions:

1. The specific Bridge Domain (bd-does-not-exist) or VRF (vrf-does-not-exist) does not exist. As a result, the configuration is not applied. Verify that the specific Bridge Domain or VRF exists.

2. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F411040: fltTcaTunnelIngrTepCntrs5minFwdPktsLast

Severity: variable

Explanation: This fault is caused by "Forwarded Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411041: fltTcaTunnelIngrTepCntrs15minFwdPktsLast

Severity: variable

Explanation: This fault is caused by "Forwarded Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411042: fltTcaTunnelIngrTepCntrs1hFwdPktsLast

Severity: variable

Explanation: This fault is caused by "Forwarded Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411043: fltTcaTunnelIngrTepCntrs1dFwdPktsLast

Severity: variable

Explanation: This fault is caused by "Forwarded Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411044: fltTcaTunnelIngrTepCntrs1wFwdPktsLast

Severity: variable

Explanation: This fault is caused by "Forwarded Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411045: fltTcaTunnelIngrTepCntrs1moFwdPktsLast

Severity: variable

Explanation: This fault is caused by "Forwarded Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411046: fltTcaTunnelIngrTepCntrs1qtrFwdPktsLast

Severity: variable

Explanation: This fault is caused by "Forwarded Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411047: fltTcaTunnelIngrTepCntrs1yearFwdPktsLast

Severity: variable

Explanation: This fault is caused by "Forwarded Packets current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411056: fltTcaTunnelIngrTepCntrs5minFwdPktsCum

Severity: variable

Explanation: This fault is caused by "Forwarded Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411057: fltTcaTunnelIngrTepCntrs15minFwdPktsCum

Severity: variable

Explanation: This fault is caused by "Forwarded Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411058: fltTcaTunnelIngrTepCntrs1hFwdPktsCum

Severity: variable

Explanation: This fault is caused by "Forwarded Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411059: fltTcaTunnelIngrTepCntrs1dFwdPktsCum

Severity: variable

Explanation: This fault is caused by "Forwarded Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411060: fltTcaTunnelIngrTepCntrs1wFwdPktsCum

Severity: variable

Explanation: This fault is caused by "Forwarded Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411061: fltTcaTunnelIngrTepCntrs1moFwdPktsCum

Severity: variable

Explanation: This fault is caused by "Forwarded Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411062: fltTcaTunnelIngrTepCntrs1qtrFwdPktsCum

Severity: variable

Explanation: This fault is caused by "Forwarded Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411063: fltTcaTunnelIngrTepCntrs1yearFwdPktsCum

Severity: variable

Explanation: This fault is caused by "Forwarded Packets cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411064: fltTcaTunnelIngrTepCntrs5minFwdPktsPer

Severity: variable

Explanation: This fault is caused by "Forwarded Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411065: fltTcaTunnelIngrTepCntrs15minFwdPktsPer

Severity: variable

Explanation: This fault is caused by "Forwarded Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411066: fltTcaTunnelIngrTepCntrs1hFwdPktsPer

Severity: variable

Explanation: This fault is caused by "Forwarded Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411067: fltTcaTunnelIngrTepCntrs1dFwdPktsPer

Severity: variable

Explanation: This fault is caused by "Forwarded Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411068: fltTcaTunnelIngrTepCntrs1wFwdPktsPer

Severity: variable

Explanation: This fault is caused by "Forwarded Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411069: fltTcaTunnelIngrTepCntrs1moFwdPktsPer

Severity: variable

Explanation: This fault is caused by "Forwarded Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411070: fltTcaTunnelIngrTepCntrs1qtrFwdPktsPer

Severity: variable

Explanation: This fault is caused by "Forwarded Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411071: fltTcaTunnelIngrTepCntrs1yearFwdPktsPer

Severity: variable

Explanation: This fault is caused by "Forwarded Packets periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411072: fltTcaTunnelIngrTepCntrs5minFwdPktsMin

Severity: variable

Explanation: This fault is caused by "Forwarded Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411073: fltTcaTunnelIngrTepCntrs15minFwdPktsMin

Severity: variable

Explanation: This fault is caused by "Forwarded Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411074: fltTcaTunnelIngrTepCntrs1hFwdPktsMin

Severity: variable

Explanation: This fault is caused by "Forwarded Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411075: fltTcaTunnelIngrTepCntrs1dFwdPktsMin

Severity: variable

Explanation: This fault is caused by "Forwarded Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411076: fltTcaTunnelIngrTepCntrs1wFwdPktsMin

Severity: variable

Explanation: This fault is caused by "Forwarded Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411077: fltTcaTunnelIngrTepCntrs1moFwdPktsMin

Severity: variable

Explanation: This fault is caused by "Forwarded Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411078: fltTcaTunnelIngrTepCntrs1qtrFwdPktsMin

Severity: variable

Explanation: This fault is caused by "Forwarded Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411079: fltTcaTunnelIngrTepCntrs1yearFwdPktsMin

Severity: variable

Explanation: This fault is caused by "Forwarded Packets minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411080: fltTcaTunnelIngrTepCntrs5minFwdPktsMax

Severity: variable

Explanation: This fault is caused by "Forwarded Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411081: fltTcaTunnelIngrTepCntrs15minFwdPktsMax

Severity: variable

Explanation: This fault is caused by "Forwarded Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411082: fltTcaTunnelIngrTepCntrs1hFwdPktsMax

Severity: variable

Explanation: This fault is caused by "Forwarded Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411083: fltTcaTunnelIngrTepCntrs1dFwdPktsMax

Severity: variable

Explanation: This fault is caused by "Forwarded Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411084: fltTcaTunnelIngrTepCntrs1wFwdPktsMax

Severity: variable

Explanation: This fault is caused by "Forwarded Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411085: fltTcaTunnelIngrTepCntrs1moFwdPktsMax

Severity: variable

Explanation: This fault is caused by "Forwarded Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411086: fltTcaTunnelIngrTepCntrs1qtrFwdPktsMax

Severity: variable

Explanation: This fault is caused by "Forwarded Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411087: fltTcaTunnelIngrTepCntrs1yearFwdPktsMax

Severity: variable

Explanation: This fault is caused by "Forwarded Packets maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411088: fltTcaTunnelIngrTepCntrs5minFwdPktsAvg

Severity: variable

Explanation: This fault is caused by "Forwarded Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411089: fltTcaTunnelIngrTepCntrs15minFwdPktsAvg

Severity: variable

Explanation: This fault is caused by "Forwarded Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411090: fltTcaTunnelIngrTepCntrs1hFwdPktsAvg

Severity: variable

Explanation: This fault is caused by "Forwarded Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411091: fltTcaTunnelIngrTepCntrs1dFwdPktsAvg

Severity: variable

Explanation: This fault is caused by "Forwarded Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411092: fltTcaTunnelIngrTepCntrs1wFwdPktsAvg

Severity: variable

Explanation: This fault is caused by "Forwarded Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411093: fltTcaTunnelIngrTepCntrs1moFwdPktsAvg

Severity: variable

Explanation: This fault is caused by "Forwarded Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411094: fltTcaTunnelIngrTepCntrs1qtrFwdPktsAvg

Severity: variable

Explanation: This fault is caused by "Forwarded Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411095: fltTcaTunnelIngrTepCntrs1yearFwdPktsAvg

Severity: variable

Explanation: This fault is caused by "Forwarded Packets average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411120: fltTcaTunnelIngrTepCntrs5minFwdPktsTr

Severity: variable

Explanation: This fault is caused by "Forwarded Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411121: fltTcaTunnelIngrTepCntrs15minFwdPktsTr

Severity: variable

Explanation: This fault is caused by "Forwarded Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411122: fltTcaTunnelIngrTepCntrs1hFwdPktsTr

Severity: variable

Explanation: This fault is caused by "Forwarded Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411123: fltTcaTunnelIngrTepCntrs1dFwdPktsTr

Severity: variable

Explanation: This fault is caused by "Forwarded Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411124: fltTcaTunnelIngrTepCntrs1wFwdPktsTr

Severity: variable

Explanation: This fault is caused by "Forwarded Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411125: fltTcaTunnelIngrTepCntrs1moFwdPktsTr

Severity: variable

Explanation: This fault is caused by "Forwarded Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411126: fltTcaTunnelIngrTepCntrs1qtrFwdPktsTr

Severity: variable

Explanation: This fault is caused by "Forwarded Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411127: fltTcaTunnelIngrTepCntrs1yearFwdPktsTr

Severity: variable

Explanation: This fault is caused by "Forwarded Packets trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411128: fltTcaTunnelIngrTepCntrs5minFwdPktsRate

Severity: variable

Explanation: This fault is caused by "Forwarded Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411129: fltTcaTunnelIngrTepCntrs15minFwdPktsRate

Severity: variable

Explanation: This fault is caused by "Forwarded Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411130: fltTcaTunnelIngrTepCntrs1hFwdPktsRate

Severity: variable

Explanation: This fault is caused by "Forwarded Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411131: fltTcaTunnelIngrTepCntrs1dFwdPktsRate

Severity: variable

Explanation: This fault is caused by "Forwarded Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411132: fltTcaTunnelIngrTepCntrs1wFwdPktsRate

Severity: variable

Explanation: This fault is caused by "Forwarded Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411133: fltTcaTunnelIngrTepCntrs1moFwdPktsRate

Severity: variable

Explanation: This fault is caused by "Forwarded Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411134: fltTcaTunnelIngrTepCntrs1qtrFwdPktsRate

Severity: variable

Explanation: This fault is caused by "Forwarded Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411135: fltTcaTunnelIngrTepCntrs1yearFwdPktsRate

Severity: variable

Explanation: This fault is caused by "Forwarded Packets rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Forwarded Packets" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411208: fltTcaTunnelTunnelFlapCntrs5minFlapsLast

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411209: fltTcaTunnelTunnelFlapCntrs15minFlapsLast

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411210: fltTcaTunnelTunnelFlapCntrs1hFlapsLast

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411211: fltTcaTunnelTunnelFlapCntrs1dFlapsLast

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411212: fltTcaTunnelTunnelFlapCntrs1wFlapsLast

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411213: fltTcaTunnelTunnelFlapCntrs1moFlapsLast

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411214: fltTcaTunnelTunnelFlapCntrs1qtrFlapsLast

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411215: fltTcaTunnelTunnelFlapCntrs1yearFlapsLast

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411224: fltTcaTunnelTunnelFlapCntrs5minFlapsCum

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411225: fltTcaTunnelTunnelFlapCntrs15minFlapsCum

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411226: fltTcaTunnelTunnelFlapCntrs1hFlapsCum

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411227: fltTcaTunnelTunnelFlapCntrs1dFlapsCum

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411228: fltTcaTunnelTunnelFlapCntrs1wFlapsCum

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411229: fltTcaTunnelTunnelFlapCntrs1moFlapsCum

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411230: fltTcaTunnelTunnelFlapCntrs1qtrFlapsCum

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411231: fltTcaTunnelTunnelFlapCntrs1yearFlapsCum

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411232: fltTcaTunnelTunnelFlapCntrs5minFlapsPer

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411233: fltTcaTunnelTunnelFlapCntrs15minFlapsPer

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411234: fltTcaTunnelTunnelFlapCntrs1hFlapsPer

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411235: fltTcaTunnelTunnelFlapCntrs1dFlapsPer

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411236: fltTcaTunnelTunnelFlapCntrs1wFlapsPer

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411237: fltTcaTunnelTunnelFlapCntrs1moFlapsPer

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411238: fltTcaTunnelTunnelFlapCntrs1qtrFlapsPer

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411239: fltTcaTunnelTunnelFlapCntrs1yearFlapsPer

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411240: fltTcaTunnelTunnelFlapCntrs5minFlapsMin

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411241: fltTcaTunnelTunnelFlapCntrs15minFlapsMin

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411242: fltTcaTunnelTunnelFlapCntrs1hFlapsMin

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411243: fltTcaTunnelTunnelFlapCntrs1dFlapsMin

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411244: fltTcaTunnelTunnelFlapCntrs1wFlapsMin

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411245: fltTcaTunnelTunnelFlapCntrs1moFlapsMin

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411246: fltTcaTunnelTunnelFlapCntrs1qtrFlapsMin

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411247: fltTcaTunnelTunnelFlapCntrs1yearFlapsMin

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411248: fltTcaTunnelTunnelFlapCntrs5minFlapsMax

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411249: fltTcaTunnelTunnelFlapCntrs15minFlapsMax

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411250: fltTcaTunnelTunnelFlapCntrs1hFlapsMax

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411251: fltTcaTunnelTunnelFlapCntrs1dFlapsMax

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411252: fltTcaTunnelTunnelFlapCntrs1wFlapsMax

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411253: fltTcaTunnelTunnelFlapCntrs1moFlapsMax

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411254: fltTcaTunnelTunnelFlapCntrs1qtrFlapsMax

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411255: fltTcaTunnelTunnelFlapCntrs1yearFlapsMax

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411256: fltTcaTunnelTunnelFlapCntrs5minFlapsAvg

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411257: fltTcaTunnelTunnelFlapCntrs15minFlapsAvg

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411258: fltTcaTunnelTunnelFlapCntrs1hFlapsAvg

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411259: fltTcaTunnelTunnelFlapCntrs1dFlapsAvg

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411260: fltTcaTunnelTunnelFlapCntrs1wFlapsAvg

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411261: fltTcaTunnelTunnelFlapCntrs1moFlapsAvg

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411262: fltTcaTunnelTunnelFlapCntrs1qtrFlapsAvg

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411263: fltTcaTunnelTunnelFlapCntrs1yearFlapsAvg

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411288: fltTcaTunnelTunnelFlapCntrs5minFlapsTr

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411289: fltTcaTunnelTunnelFlapCntrs15minFlapsTr

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411290: fltTcaTunnelTunnelFlapCntrs1hFlapsTr

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411291: fltTcaTunnelTunnelFlapCntrs1dFlapsTr

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411292: fltTcaTunnelTunnelFlapCntrs1wFlapsTr

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411293: fltTcaTunnelTunnelFlapCntrs1moFlapsTr

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411294: fltTcaTunnelTunnelFlapCntrs1qtrFlapsTr

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411295: fltTcaTunnelTunnelFlapCntrs1yearFlapsTr

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411296: fltTcaTunnelTunnelFlapCntrs5minFlapsRate

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411297: fltTcaTunnelTunnelFlapCntrs15minFlapsRate

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411298: fltTcaTunnelTunnelFlapCntrs1hFlapsRate

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411299: fltTcaTunnelTunnelFlapCntrs1dFlapsRate

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411300: fltTcaTunnelTunnelFlapCntrs1wFlapsRate

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411301: fltTcaTunnelTunnelFlapCntrs1moFlapsRate

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411302: fltTcaTunnelTunnelFlapCntrs1qtrFlapsRate

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F411303: fltTcaTunnelTunnelFlapCntrs1yearFlapsRate

Severity: variable

Explanation: This fault is caused by "Number of Tunnel Flaps rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Tunnel Flaps" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4114: fltHcloudTargetGroupOperTargetGroupOperHealthDown

Severity: minor

Explanation: This fault occurs when an erroneous configuration is pushed for creating a Native service Target Group.

Recommended Action: If you see this fault, take the following actions:

1. Please check the fault message and make necessary changes to the config for creating the Native service provider Epg representing target server pool.

2. If fault still has not cleared, please contact Cisco TAC.

F4119: fltVmmClusterFaultInfoMajorOperationalIssues

Severity: major

Explanation: This fault is raised when there is an operational issue with respect to VmmMgr Cluster

Recommended Action: If you see this fault, take the following actions:

1. From the fault description resolve the issue on the cluster

2. If the above actions did not resolve the issue, collect avs-tech-support file and contact Cisco TAC.

F4120: fltVmmClusterFaultInfoMinorOperationalIssues

Severity: minor

Explanation: This fault is raised when there is an operational issue with respect to VmmMgr Cluster

Recommended Action: If you see this fault, take the following actions:

1. From the fault description resolve the issue on the cluster

2. If the above actions did not resolve the issue, collect avs-tech-support file and contact Cisco TAC.

F4121: fltVmmClusterFaultInfoCriticalOperationalIssues

Severity: critical

Explanation: This fault is raised when there is an operational issue with respect to VmmMgr Cluster

Recommended Action: If you see this fault, take the following actions:

1. From the fault description resolve the issue on the cluster

2. If the above actions did not resolve the issue, collect avs-tech-support file and contact Cisco TAC.

F4122: fltInfraRsSynceInstPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F4123: fltInfraRsSynceEthIfPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F4124: fltFvEpIpTagConfigurationFailed

Severity: minor

Explanation: This fault occurs when an Endpoint (fvEpIpTag) is not correctly configured.

Recommended Action: If you see this fault, take the following actions:

1. vrf-does-not-exist: The specific VRF does not exist. As a result, the configuration is not applied. Verify that the specific VRF exists.

2. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F4125: fltFvSubnetConfigurationFailed

Severity: major

Explanation: This fault occurs when an Subnet (fvSubnet) Tag is not correctly configured.

Recommended Action: If you see this fault, take the following actions:

1. multiple-tag-selector-match: The configured Policy Tag(s) match more than one ESG TagSelctor when there is no pre-existing match. As a result, the subnet is not classified into any ESGs because each subnet can be associated to only one ESG TagSelector. Remove or update Policy Tag(s) (tagTag) or ESG TagSelctor (fvTagSelector) so that there is only one Policy Tag matching an ESG TagSelector for this subnet.

2. multiple-tag-selector-match-after-single-match: The configured Policy Tag(s) match more than one ESG TagSelctor after the subnet was already classified to an ESG via a previously configured tag. As a result, the subnet remains classified to the original ESG and the new Tag(s) matching other ESG TagSelectors will be ignored at the moment. Remove or update Policy Tag(s) (tagTag) or ESG TagSelctor (fvTagSelector) so that there is only one Policy Tag matching an ESG TagSelector for this endpoint.

3. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F412632: fltTcaEqptcapacityBdUsage5minTotalCapLast

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412633: fltTcaEqptcapacityBdUsage15minTotalCapLast

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412634: fltTcaEqptcapacityBdUsage1hTotalCapLast

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412635: fltTcaEqptcapacityBdUsage1dTotalCapLast

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412636: fltTcaEqptcapacityBdUsage1wTotalCapLast

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412637: fltTcaEqptcapacityBdUsage1moTotalCapLast

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412638: fltTcaEqptcapacityBdUsage1qtrTotalCapLast

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412639: fltTcaEqptcapacityBdUsage1yearTotalCapLast

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412648: fltTcaEqptcapacityBdUsage5minTotalCapCum

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412649: fltTcaEqptcapacityBdUsage15minTotalCapCum

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412650: fltTcaEqptcapacityBdUsage1hTotalCapCum

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412651: fltTcaEqptcapacityBdUsage1dTotalCapCum

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412652: fltTcaEqptcapacityBdUsage1wTotalCapCum

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412653: fltTcaEqptcapacityBdUsage1moTotalCapCum

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412654: fltTcaEqptcapacityBdUsage1qtrTotalCapCum

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412655: fltTcaEqptcapacityBdUsage1yearTotalCapCum

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412656: fltTcaEqptcapacityBdUsage5minTotalCapPer

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412657: fltTcaEqptcapacityBdUsage15minTotalCapPer

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412658: fltTcaEqptcapacityBdUsage1hTotalCapPer

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412659: fltTcaEqptcapacityBdUsage1dTotalCapPer

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412660: fltTcaEqptcapacityBdUsage1wTotalCapPer

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412661: fltTcaEqptcapacityBdUsage1moTotalCapPer

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412662: fltTcaEqptcapacityBdUsage1qtrTotalCapPer

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412663: fltTcaEqptcapacityBdUsage1yearTotalCapPer

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412664: fltTcaEqptcapacityBdUsage5minTotalCapMin

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412665: fltTcaEqptcapacityBdUsage15minTotalCapMin

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412666: fltTcaEqptcapacityBdUsage1hTotalCapMin

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412667: fltTcaEqptcapacityBdUsage1dTotalCapMin

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412668: fltTcaEqptcapacityBdUsage1wTotalCapMin

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412669: fltTcaEqptcapacityBdUsage1moTotalCapMin

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412670: fltTcaEqptcapacityBdUsage1qtrTotalCapMin

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412671: fltTcaEqptcapacityBdUsage1yearTotalCapMin

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412672: fltTcaEqptcapacityBdUsage5minTotalCapMax

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412673: fltTcaEqptcapacityBdUsage15minTotalCapMax

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412674: fltTcaEqptcapacityBdUsage1hTotalCapMax

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412675: fltTcaEqptcapacityBdUsage1dTotalCapMax

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412676: fltTcaEqptcapacityBdUsage1wTotalCapMax

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412677: fltTcaEqptcapacityBdUsage1moTotalCapMax

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412678: fltTcaEqptcapacityBdUsage1qtrTotalCapMax

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412679: fltTcaEqptcapacityBdUsage1yearTotalCapMax

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412680: fltTcaEqptcapacityBdUsage5minTotalCapAvg

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412681: fltTcaEqptcapacityBdUsage15minTotalCapAvg

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412682: fltTcaEqptcapacityBdUsage1hTotalCapAvg

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412683: fltTcaEqptcapacityBdUsage1dTotalCapAvg

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412684: fltTcaEqptcapacityBdUsage1wTotalCapAvg

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412685: fltTcaEqptcapacityBdUsage1moTotalCapAvg

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412686: fltTcaEqptcapacityBdUsage1qtrTotalCapAvg

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412687: fltTcaEqptcapacityBdUsage1yearTotalCapAvg

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4127: fltTrigSchedPConfigurationFailed

Severity: major

Explanation: This fault occurs when schelduer is attached to 2 or more techsupport policy with same nodes

Recommended Action: None set.

F412712: fltTcaEqptcapacityBdUsage5minTotalCapTr

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412713: fltTcaEqptcapacityBdUsage15minTotalCapTr

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412714: fltTcaEqptcapacityBdUsage1hTotalCapTr

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412715: fltTcaEqptcapacityBdUsage1dTotalCapTr

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412716: fltTcaEqptcapacityBdUsage1wTotalCapTr

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412717: fltTcaEqptcapacityBdUsage1moTotalCapTr

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412718: fltTcaEqptcapacityBdUsage1qtrTotalCapTr

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412719: fltTcaEqptcapacityBdUsage1yearTotalCapTr

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412720: fltTcaEqptcapacityBdUsage5minTotalCapRate

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412721: fltTcaEqptcapacityBdUsage15minTotalCapRate

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412722: fltTcaEqptcapacityBdUsage1hTotalCapRate

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412723: fltTcaEqptcapacityBdUsage1dTotalCapRate

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412724: fltTcaEqptcapacityBdUsage1wTotalCapRate

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412725: fltTcaEqptcapacityBdUsage1moTotalCapRate

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412726: fltTcaEqptcapacityBdUsage1qtrTotalCapRate

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412727: fltTcaEqptcapacityBdUsage1yearTotalCapRate

Severity: variable

Explanation: This fault is caused by "Bridge domain entries capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bridge domain entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4128: fltSlaOperationOverThreshold

Severity: minor

Explanation: This fault occurs when an IP SLA response time goes over threshold.

Recommended Action: To recover from this fault, try the following actions

1. Check if there are any network delay issues.

2. Confirm if the configured threshold value is correct.

F412800: fltTcaEqptcapacityBdUsage5minTotalLast

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412801: fltTcaEqptcapacityBdUsage15minTotalLast

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412802: fltTcaEqptcapacityBdUsage1hTotalLast

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412803: fltTcaEqptcapacityBdUsage1dTotalLast

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412804: fltTcaEqptcapacityBdUsage1wTotalLast

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412805: fltTcaEqptcapacityBdUsage1moTotalLast

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412806: fltTcaEqptcapacityBdUsage1qtrTotalLast

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412807: fltTcaEqptcapacityBdUsage1yearTotalLast

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412816: fltTcaEqptcapacityBdUsage5minTotalCum

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412817: fltTcaEqptcapacityBdUsage15minTotalCum

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412818: fltTcaEqptcapacityBdUsage1hTotalCum

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412819: fltTcaEqptcapacityBdUsage1dTotalCum

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412820: fltTcaEqptcapacityBdUsage1wTotalCum

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412821: fltTcaEqptcapacityBdUsage1moTotalCum

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412822: fltTcaEqptcapacityBdUsage1qtrTotalCum

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412823: fltTcaEqptcapacityBdUsage1yearTotalCum

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412824: fltTcaEqptcapacityBdUsage5minTotalPer

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412825: fltTcaEqptcapacityBdUsage15minTotalPer

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412826: fltTcaEqptcapacityBdUsage1hTotalPer

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412827: fltTcaEqptcapacityBdUsage1dTotalPer

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412828: fltTcaEqptcapacityBdUsage1wTotalPer

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412829: fltTcaEqptcapacityBdUsage1moTotalPer

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412830: fltTcaEqptcapacityBdUsage1qtrTotalPer

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412831: fltTcaEqptcapacityBdUsage1yearTotalPer

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412832: fltTcaEqptcapacityBdUsage5minTotalMin

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412833: fltTcaEqptcapacityBdUsage15minTotalMin

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412834: fltTcaEqptcapacityBdUsage1hTotalMin

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412835: fltTcaEqptcapacityBdUsage1dTotalMin

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412836: fltTcaEqptcapacityBdUsage1wTotalMin

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412837: fltTcaEqptcapacityBdUsage1moTotalMin

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412838: fltTcaEqptcapacityBdUsage1qtrTotalMin

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412839: fltTcaEqptcapacityBdUsage1yearTotalMin

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412840: fltTcaEqptcapacityBdUsage5minTotalMax

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412841: fltTcaEqptcapacityBdUsage15minTotalMax

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412842: fltTcaEqptcapacityBdUsage1hTotalMax

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412843: fltTcaEqptcapacityBdUsage1dTotalMax

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412844: fltTcaEqptcapacityBdUsage1wTotalMax

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412845: fltTcaEqptcapacityBdUsage1moTotalMax

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412846: fltTcaEqptcapacityBdUsage1qtrTotalMax

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412847: fltTcaEqptcapacityBdUsage1yearTotalMax

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412848: fltTcaEqptcapacityBdUsage5minTotalAvg

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412849: fltTcaEqptcapacityBdUsage15minTotalAvg

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412850: fltTcaEqptcapacityBdUsage1hTotalAvg

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412851: fltTcaEqptcapacityBdUsage1dTotalAvg

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412852: fltTcaEqptcapacityBdUsage1wTotalAvg

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412853: fltTcaEqptcapacityBdUsage1moTotalAvg

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412854: fltTcaEqptcapacityBdUsage1qtrTotalAvg

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412855: fltTcaEqptcapacityBdUsage1yearTotalAvg

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412880: fltTcaEqptcapacityBdUsage5minTotalTr

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412881: fltTcaEqptcapacityBdUsage15minTotalTr

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412882: fltTcaEqptcapacityBdUsage1hTotalTr

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412883: fltTcaEqptcapacityBdUsage1dTotalTr

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412884: fltTcaEqptcapacityBdUsage1wTotalTr

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412885: fltTcaEqptcapacityBdUsage1moTotalTr

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412886: fltTcaEqptcapacityBdUsage1qtrTotalTr

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412887: fltTcaEqptcapacityBdUsage1yearTotalTr

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412888: fltTcaEqptcapacityBdUsage5minTotalRate

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412889: fltTcaEqptcapacityBdUsage15minTotalRate

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412890: fltTcaEqptcapacityBdUsage1hTotalRate

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412891: fltTcaEqptcapacityBdUsage1dTotalRate

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412892: fltTcaEqptcapacityBdUsage1wTotalRate

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412893: fltTcaEqptcapacityBdUsage1moTotalRate

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412894: fltTcaEqptcapacityBdUsage1qtrTotalRate

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412895: fltTcaEqptcapacityBdUsage1yearTotalRate

Severity: variable

Explanation: This fault is caused by "Total Bridge domain entries rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Bridge domain entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412968: fltTcaEqptcapacityEpgUsage5minTotalCapLast

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412969: fltTcaEqptcapacityEpgUsage15minTotalCapLast

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412970: fltTcaEqptcapacityEpgUsage1hTotalCapLast

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412971: fltTcaEqptcapacityEpgUsage1dTotalCapLast

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412972: fltTcaEqptcapacityEpgUsage1wTotalCapLast

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412973: fltTcaEqptcapacityEpgUsage1moTotalCapLast

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412974: fltTcaEqptcapacityEpgUsage1qtrTotalCapLast

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412975: fltTcaEqptcapacityEpgUsage1yearTotalCapLast

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412984: fltTcaEqptcapacityEpgUsage5minTotalCapCum

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412985: fltTcaEqptcapacityEpgUsage15minTotalCapCum

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412986: fltTcaEqptcapacityEpgUsage1hTotalCapCum

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412987: fltTcaEqptcapacityEpgUsage1dTotalCapCum

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412988: fltTcaEqptcapacityEpgUsage1wTotalCapCum

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412989: fltTcaEqptcapacityEpgUsage1moTotalCapCum

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412990: fltTcaEqptcapacityEpgUsage1qtrTotalCapCum

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412991: fltTcaEqptcapacityEpgUsage1yearTotalCapCum

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412992: fltTcaEqptcapacityEpgUsage5minTotalCapPer

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412993: fltTcaEqptcapacityEpgUsage15minTotalCapPer

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412994: fltTcaEqptcapacityEpgUsage1hTotalCapPer

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412995: fltTcaEqptcapacityEpgUsage1dTotalCapPer

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412996: fltTcaEqptcapacityEpgUsage1wTotalCapPer

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412997: fltTcaEqptcapacityEpgUsage1moTotalCapPer

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412998: fltTcaEqptcapacityEpgUsage1qtrTotalCapPer

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F412999: fltTcaEqptcapacityEpgUsage1yearTotalCapPer

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4130: fltFvNwIssuesExtendedConfig-failed

Severity: minor

Explanation: This fault occurs when an End Point Group / End Point Security Group is incompletely or incorrectly configured.

Recommended Action: If you see this fault, take the following actions:

1. Look at the configuration for issues

2. For multipodDirect-portState-mismatch issue, LLDP Oper state on the usage field of l1PhysIf is not set to 'direct-mpod'

3. For FBR-route-not-present issue, add FBR route before configuring FBR member

4. For further details, refer to the documentation for fv:NwIssuesExtended

5. Verify the End Point Group configuration is correct and complete

6. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F413000: fltTcaEqptcapacityEpgUsage5minTotalCapMin

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413001: fltTcaEqptcapacityEpgUsage15minTotalCapMin

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413002: fltTcaEqptcapacityEpgUsage1hTotalCapMin

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413003: fltTcaEqptcapacityEpgUsage1dTotalCapMin

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413004: fltTcaEqptcapacityEpgUsage1wTotalCapMin

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413005: fltTcaEqptcapacityEpgUsage1moTotalCapMin

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413006: fltTcaEqptcapacityEpgUsage1qtrTotalCapMin

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413007: fltTcaEqptcapacityEpgUsage1yearTotalCapMin

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413008: fltTcaEqptcapacityEpgUsage5minTotalCapMax

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413009: fltTcaEqptcapacityEpgUsage15minTotalCapMax

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413010: fltTcaEqptcapacityEpgUsage1hTotalCapMax

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413011: fltTcaEqptcapacityEpgUsage1dTotalCapMax

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413012: fltTcaEqptcapacityEpgUsage1wTotalCapMax

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413013: fltTcaEqptcapacityEpgUsage1moTotalCapMax

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413014: fltTcaEqptcapacityEpgUsage1qtrTotalCapMax

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413015: fltTcaEqptcapacityEpgUsage1yearTotalCapMax

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413016: fltTcaEqptcapacityEpgUsage5minTotalCapAvg

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413017: fltTcaEqptcapacityEpgUsage15minTotalCapAvg

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413018: fltTcaEqptcapacityEpgUsage1hTotalCapAvg

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413019: fltTcaEqptcapacityEpgUsage1dTotalCapAvg

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413020: fltTcaEqptcapacityEpgUsage1wTotalCapAvg

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413021: fltTcaEqptcapacityEpgUsage1moTotalCapAvg

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413022: fltTcaEqptcapacityEpgUsage1qtrTotalCapAvg

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413023: fltTcaEqptcapacityEpgUsage1yearTotalCapAvg

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413048: fltTcaEqptcapacityEpgUsage5minTotalCapTr

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413049: fltTcaEqptcapacityEpgUsage15minTotalCapTr

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413050: fltTcaEqptcapacityEpgUsage1hTotalCapTr

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413051: fltTcaEqptcapacityEpgUsage1dTotalCapTr

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413052: fltTcaEqptcapacityEpgUsage1wTotalCapTr

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413053: fltTcaEqptcapacityEpgUsage1moTotalCapTr

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413054: fltTcaEqptcapacityEpgUsage1qtrTotalCapTr

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413055: fltTcaEqptcapacityEpgUsage1yearTotalCapTr

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413056: fltTcaEqptcapacityEpgUsage5minTotalCapRate

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413057: fltTcaEqptcapacityEpgUsage15minTotalCapRate

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413058: fltTcaEqptcapacityEpgUsage1hTotalCapRate

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413059: fltTcaEqptcapacityEpgUsage1dTotalCapRate

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413060: fltTcaEqptcapacityEpgUsage1wTotalCapRate

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413061: fltTcaEqptcapacityEpgUsage1moTotalCapRate

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413062: fltTcaEqptcapacityEpgUsage1qtrTotalCapRate

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413063: fltTcaEqptcapacityEpgUsage1yearTotalCapRate

Severity: variable

Explanation: This fault is caused by "Endpoint groups capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Endpoint groups capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413136: fltTcaEqptcapacityEpgUsage5minTotalLast

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413137: fltTcaEqptcapacityEpgUsage15minTotalLast

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413138: fltTcaEqptcapacityEpgUsage1hTotalLast

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413139: fltTcaEqptcapacityEpgUsage1dTotalLast

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413140: fltTcaEqptcapacityEpgUsage1wTotalLast

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413141: fltTcaEqptcapacityEpgUsage1moTotalLast

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413142: fltTcaEqptcapacityEpgUsage1qtrTotalLast

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413143: fltTcaEqptcapacityEpgUsage1yearTotalLast

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413152: fltTcaEqptcapacityEpgUsage5minTotalCum

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413153: fltTcaEqptcapacityEpgUsage15minTotalCum

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413154: fltTcaEqptcapacityEpgUsage1hTotalCum

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413155: fltTcaEqptcapacityEpgUsage1dTotalCum

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413156: fltTcaEqptcapacityEpgUsage1wTotalCum

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413157: fltTcaEqptcapacityEpgUsage1moTotalCum

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413158: fltTcaEqptcapacityEpgUsage1qtrTotalCum

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413159: fltTcaEqptcapacityEpgUsage1yearTotalCum

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413160: fltTcaEqptcapacityEpgUsage5minTotalPer

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413161: fltTcaEqptcapacityEpgUsage15minTotalPer

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413162: fltTcaEqptcapacityEpgUsage1hTotalPer

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413163: fltTcaEqptcapacityEpgUsage1dTotalPer

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413164: fltTcaEqptcapacityEpgUsage1wTotalPer

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413165: fltTcaEqptcapacityEpgUsage1moTotalPer

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413166: fltTcaEqptcapacityEpgUsage1qtrTotalPer

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413167: fltTcaEqptcapacityEpgUsage1yearTotalPer

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413168: fltTcaEqptcapacityEpgUsage5minTotalMin

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413169: fltTcaEqptcapacityEpgUsage15minTotalMin

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413170: fltTcaEqptcapacityEpgUsage1hTotalMin

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413171: fltTcaEqptcapacityEpgUsage1dTotalMin

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413172: fltTcaEqptcapacityEpgUsage1wTotalMin

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413173: fltTcaEqptcapacityEpgUsage1moTotalMin

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413174: fltTcaEqptcapacityEpgUsage1qtrTotalMin

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413175: fltTcaEqptcapacityEpgUsage1yearTotalMin

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413176: fltTcaEqptcapacityEpgUsage5minTotalMax

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413177: fltTcaEqptcapacityEpgUsage15minTotalMax

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413178: fltTcaEqptcapacityEpgUsage1hTotalMax

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413179: fltTcaEqptcapacityEpgUsage1dTotalMax

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413180: fltTcaEqptcapacityEpgUsage1wTotalMax

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413181: fltTcaEqptcapacityEpgUsage1moTotalMax

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413182: fltTcaEqptcapacityEpgUsage1qtrTotalMax

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413183: fltTcaEqptcapacityEpgUsage1yearTotalMax

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413184: fltTcaEqptcapacityEpgUsage5minTotalAvg

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413185: fltTcaEqptcapacityEpgUsage15minTotalAvg

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413186: fltTcaEqptcapacityEpgUsage1hTotalAvg

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413187: fltTcaEqptcapacityEpgUsage1dTotalAvg

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413188: fltTcaEqptcapacityEpgUsage1wTotalAvg

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413189: fltTcaEqptcapacityEpgUsage1moTotalAvg

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413190: fltTcaEqptcapacityEpgUsage1qtrTotalAvg

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413191: fltTcaEqptcapacityEpgUsage1yearTotalAvg

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413216: fltTcaEqptcapacityEpgUsage5minTotalTr

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413217: fltTcaEqptcapacityEpgUsage15minTotalTr

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413218: fltTcaEqptcapacityEpgUsage1hTotalTr

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413219: fltTcaEqptcapacityEpgUsage1dTotalTr

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413220: fltTcaEqptcapacityEpgUsage1wTotalTr

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413221: fltTcaEqptcapacityEpgUsage1moTotalTr

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413222: fltTcaEqptcapacityEpgUsage1qtrTotalTr

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413223: fltTcaEqptcapacityEpgUsage1yearTotalTr

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413224: fltTcaEqptcapacityEpgUsage5minTotalRate

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413225: fltTcaEqptcapacityEpgUsage15minTotalRate

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413226: fltTcaEqptcapacityEpgUsage1hTotalRate

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413227: fltTcaEqptcapacityEpgUsage1dTotalRate

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413228: fltTcaEqptcapacityEpgUsage1wTotalRate

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413229: fltTcaEqptcapacityEpgUsage1moTotalRate

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413230: fltTcaEqptcapacityEpgUsage1qtrTotalRate

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413231: fltTcaEqptcapacityEpgUsage1yearTotalRate

Severity: variable

Explanation: This fault is caused by "Total Endpoint groups rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total Endpoint groups" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4133: fltFvStCEpConfigurationError

Severity: major

Explanation: This fault occurs when a Static Endpoint (fvStCEp) Tag is not correctly configured.

Recommended Action: If you see this fault, take the following actions:

1. multiple-tag-selector-match: The configured Policy Tag(s) match more than one ESG TagSelctor when there is no pre-existing match. As a result, the endpoint is not classified into any ESGs because each endpoint can be associated to only one ESG TagSelector. Remove or update Policy Tag(s) (tagTag) or ESG TagSelctor (fvTagSelector) so that there is only one Policy Tag matching an ESG TagSelector for this endpoint.

2. multiple-tag-selector-match-after-single-match: The configured Policy Tag(s) match more than one ESG TagSelctor after the endpoint was already classified to an ESG via a previously configured tag. As a result, the endpoint remains classified to the original ESG and the new Tag(s) matching other ESG TagSelectors will be ignored at the moment. Remove or update Policy Tag(s) (tagTag) or ESG TagSelctor (fvTagSelector) so that there is only one Policy Tag matching an ESG TagSelector for this endpoint.

3. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F413304: fltTcaEqptcapacityPortUsage5minTotalCapLast

Severity: variable

Explanation: This fault is caused by "Physical ports capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413305: fltTcaEqptcapacityPortUsage15minTotalCapLast

Severity: variable

Explanation: This fault is caused by "Physical ports capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413306: fltTcaEqptcapacityPortUsage1hTotalCapLast

Severity: variable

Explanation: This fault is caused by "Physical ports capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413307: fltTcaEqptcapacityPortUsage1dTotalCapLast

Severity: variable

Explanation: This fault is caused by "Physical ports capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413308: fltTcaEqptcapacityPortUsage1wTotalCapLast

Severity: variable

Explanation: This fault is caused by "Physical ports capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413309: fltTcaEqptcapacityPortUsage1moTotalCapLast

Severity: variable

Explanation: This fault is caused by "Physical ports capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413310: fltTcaEqptcapacityPortUsage1qtrTotalCapLast

Severity: variable

Explanation: This fault is caused by "Physical ports capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413311: fltTcaEqptcapacityPortUsage1yearTotalCapLast

Severity: variable

Explanation: This fault is caused by "Physical ports capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413320: fltTcaEqptcapacityPortUsage5minTotalCapCum

Severity: variable

Explanation: This fault is caused by "Physical ports capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413321: fltTcaEqptcapacityPortUsage15minTotalCapCum

Severity: variable

Explanation: This fault is caused by "Physical ports capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413322: fltTcaEqptcapacityPortUsage1hTotalCapCum

Severity: variable

Explanation: This fault is caused by "Physical ports capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413323: fltTcaEqptcapacityPortUsage1dTotalCapCum

Severity: variable

Explanation: This fault is caused by "Physical ports capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413324: fltTcaEqptcapacityPortUsage1wTotalCapCum

Severity: variable

Explanation: This fault is caused by "Physical ports capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413325: fltTcaEqptcapacityPortUsage1moTotalCapCum

Severity: variable

Explanation: This fault is caused by "Physical ports capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413326: fltTcaEqptcapacityPortUsage1qtrTotalCapCum

Severity: variable

Explanation: This fault is caused by "Physical ports capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413327: fltTcaEqptcapacityPortUsage1yearTotalCapCum

Severity: variable

Explanation: This fault is caused by "Physical ports capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413328: fltTcaEqptcapacityPortUsage5minTotalCapPer

Severity: variable

Explanation: This fault is caused by "Physical ports capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413329: fltTcaEqptcapacityPortUsage15minTotalCapPer

Severity: variable

Explanation: This fault is caused by "Physical ports capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413330: fltTcaEqptcapacityPortUsage1hTotalCapPer

Severity: variable

Explanation: This fault is caused by "Physical ports capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413331: fltTcaEqptcapacityPortUsage1dTotalCapPer

Severity: variable

Explanation: This fault is caused by "Physical ports capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413332: fltTcaEqptcapacityPortUsage1wTotalCapPer

Severity: variable

Explanation: This fault is caused by "Physical ports capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413333: fltTcaEqptcapacityPortUsage1moTotalCapPer

Severity: variable

Explanation: This fault is caused by "Physical ports capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413334: fltTcaEqptcapacityPortUsage1qtrTotalCapPer

Severity: variable

Explanation: This fault is caused by "Physical ports capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413335: fltTcaEqptcapacityPortUsage1yearTotalCapPer

Severity: variable

Explanation: This fault is caused by "Physical ports capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413336: fltTcaEqptcapacityPortUsage5minTotalCapMin

Severity: variable

Explanation: This fault is caused by "Physical ports capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413337: fltTcaEqptcapacityPortUsage15minTotalCapMin

Severity: variable

Explanation: This fault is caused by "Physical ports capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413338: fltTcaEqptcapacityPortUsage1hTotalCapMin

Severity: variable

Explanation: This fault is caused by "Physical ports capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413339: fltTcaEqptcapacityPortUsage1dTotalCapMin

Severity: variable

Explanation: This fault is caused by "Physical ports capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413340: fltTcaEqptcapacityPortUsage1wTotalCapMin

Severity: variable

Explanation: This fault is caused by "Physical ports capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413341: fltTcaEqptcapacityPortUsage1moTotalCapMin

Severity: variable

Explanation: This fault is caused by "Physical ports capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413342: fltTcaEqptcapacityPortUsage1qtrTotalCapMin

Severity: variable

Explanation: This fault is caused by "Physical ports capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413343: fltTcaEqptcapacityPortUsage1yearTotalCapMin

Severity: variable

Explanation: This fault is caused by "Physical ports capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413344: fltTcaEqptcapacityPortUsage5minTotalCapMax

Severity: variable

Explanation: This fault is caused by "Physical ports capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413345: fltTcaEqptcapacityPortUsage15minTotalCapMax

Severity: variable

Explanation: This fault is caused by "Physical ports capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413346: fltTcaEqptcapacityPortUsage1hTotalCapMax

Severity: variable

Explanation: This fault is caused by "Physical ports capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413347: fltTcaEqptcapacityPortUsage1dTotalCapMax

Severity: variable

Explanation: This fault is caused by "Physical ports capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413348: fltTcaEqptcapacityPortUsage1wTotalCapMax

Severity: variable

Explanation: This fault is caused by "Physical ports capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413349: fltTcaEqptcapacityPortUsage1moTotalCapMax

Severity: variable

Explanation: This fault is caused by "Physical ports capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413350: fltTcaEqptcapacityPortUsage1qtrTotalCapMax

Severity: variable

Explanation: This fault is caused by "Physical ports capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413351: fltTcaEqptcapacityPortUsage1yearTotalCapMax

Severity: variable

Explanation: This fault is caused by "Physical ports capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413352: fltTcaEqptcapacityPortUsage5minTotalCapAvg

Severity: variable

Explanation: This fault is caused by "Physical ports capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413353: fltTcaEqptcapacityPortUsage15minTotalCapAvg

Severity: variable

Explanation: This fault is caused by "Physical ports capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413354: fltTcaEqptcapacityPortUsage1hTotalCapAvg

Severity: variable

Explanation: This fault is caused by "Physical ports capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413355: fltTcaEqptcapacityPortUsage1dTotalCapAvg

Severity: variable

Explanation: This fault is caused by "Physical ports capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413356: fltTcaEqptcapacityPortUsage1wTotalCapAvg

Severity: variable

Explanation: This fault is caused by "Physical ports capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413357: fltTcaEqptcapacityPortUsage1moTotalCapAvg

Severity: variable

Explanation: This fault is caused by "Physical ports capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413358: fltTcaEqptcapacityPortUsage1qtrTotalCapAvg

Severity: variable

Explanation: This fault is caused by "Physical ports capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413359: fltTcaEqptcapacityPortUsage1yearTotalCapAvg

Severity: variable

Explanation: This fault is caused by "Physical ports capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413384: fltTcaEqptcapacityPortUsage5minTotalCapTr

Severity: variable

Explanation: This fault is caused by "Physical ports capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413385: fltTcaEqptcapacityPortUsage15minTotalCapTr

Severity: variable

Explanation: This fault is caused by "Physical ports capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413386: fltTcaEqptcapacityPortUsage1hTotalCapTr

Severity: variable

Explanation: This fault is caused by "Physical ports capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413387: fltTcaEqptcapacityPortUsage1dTotalCapTr

Severity: variable

Explanation: This fault is caused by "Physical ports capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413388: fltTcaEqptcapacityPortUsage1wTotalCapTr

Severity: variable

Explanation: This fault is caused by "Physical ports capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413389: fltTcaEqptcapacityPortUsage1moTotalCapTr

Severity: variable

Explanation: This fault is caused by "Physical ports capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413390: fltTcaEqptcapacityPortUsage1qtrTotalCapTr

Severity: variable

Explanation: This fault is caused by "Physical ports capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413391: fltTcaEqptcapacityPortUsage1yearTotalCapTr

Severity: variable

Explanation: This fault is caused by "Physical ports capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413392: fltTcaEqptcapacityPortUsage5minTotalCapRate

Severity: variable

Explanation: This fault is caused by "Physical ports capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413393: fltTcaEqptcapacityPortUsage15minTotalCapRate

Severity: variable

Explanation: This fault is caused by "Physical ports capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413394: fltTcaEqptcapacityPortUsage1hTotalCapRate

Severity: variable

Explanation: This fault is caused by "Physical ports capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413395: fltTcaEqptcapacityPortUsage1dTotalCapRate

Severity: variable

Explanation: This fault is caused by "Physical ports capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413396: fltTcaEqptcapacityPortUsage1wTotalCapRate

Severity: variable

Explanation: This fault is caused by "Physical ports capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413397: fltTcaEqptcapacityPortUsage1moTotalCapRate

Severity: variable

Explanation: This fault is caused by "Physical ports capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413398: fltTcaEqptcapacityPortUsage1qtrTotalCapRate

Severity: variable

Explanation: This fault is caused by "Physical ports capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413399: fltTcaEqptcapacityPortUsage1yearTotalCapRate

Severity: variable

Explanation: This fault is caused by "Physical ports capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Physical ports capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4134: fltFvEpMacTagConfigurationError

Severity: major

Explanation: This fault occurs when an Endpoint (fvEpMacTag) Tag is not correctly configured.

Recommended Action: If you see this fault, take the following actions:

1. multiple-tag-selector-match: The configured Policy Tag(s) match more than one ESG TagSelctor when there is no pre-existing match. As a result, the endpoint is not classified into any ESGs because each endpoint can be associated to only one ESG TagSelector. Remove or update Policy Tag(s) (tagTag) or ESG TagSelctor (fvTagSelector) so that there is only one Policy Tag matching an ESG TagSelector for this endpoint.

2. multiple-tag-selector-match-after-single-match: The configured Policy Tag(s) match more than one ESG TagSelctor after the endpoint was already classified to an ESG via a previously configured tag. As a result, the endpoint remains classified to the original ESG and the new Tag(s) matching other ESG TagSelectors will be ignored at the moment. Remove or update Policy Tag(s) (tagTag) or ESG TagSelctor (fvTagSelector) so that there is only one Policy Tag matching an ESG TagSelector for this endpoint.

3. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F413472: fltTcaEqptcapacityPortUsage5minTotalLast

Severity: variable

Explanation: This fault is caused by "Total physical ports used current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413473: fltTcaEqptcapacityPortUsage15minTotalLast

Severity: variable

Explanation: This fault is caused by "Total physical ports used current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413474: fltTcaEqptcapacityPortUsage1hTotalLast

Severity: variable

Explanation: This fault is caused by "Total physical ports used current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413475: fltTcaEqptcapacityPortUsage1dTotalLast

Severity: variable

Explanation: This fault is caused by "Total physical ports used current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413476: fltTcaEqptcapacityPortUsage1wTotalLast

Severity: variable

Explanation: This fault is caused by "Total physical ports used current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413477: fltTcaEqptcapacityPortUsage1moTotalLast

Severity: variable

Explanation: This fault is caused by "Total physical ports used current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413478: fltTcaEqptcapacityPortUsage1qtrTotalLast

Severity: variable

Explanation: This fault is caused by "Total physical ports used current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413479: fltTcaEqptcapacityPortUsage1yearTotalLast

Severity: variable

Explanation: This fault is caused by "Total physical ports used current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413488: fltTcaEqptcapacityPortUsage5minTotalCum

Severity: variable

Explanation: This fault is caused by "Total physical ports used cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413489: fltTcaEqptcapacityPortUsage15minTotalCum

Severity: variable

Explanation: This fault is caused by "Total physical ports used cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413490: fltTcaEqptcapacityPortUsage1hTotalCum

Severity: variable

Explanation: This fault is caused by "Total physical ports used cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413491: fltTcaEqptcapacityPortUsage1dTotalCum

Severity: variable

Explanation: This fault is caused by "Total physical ports used cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413492: fltTcaEqptcapacityPortUsage1wTotalCum

Severity: variable

Explanation: This fault is caused by "Total physical ports used cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413493: fltTcaEqptcapacityPortUsage1moTotalCum

Severity: variable

Explanation: This fault is caused by "Total physical ports used cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413494: fltTcaEqptcapacityPortUsage1qtrTotalCum

Severity: variable

Explanation: This fault is caused by "Total physical ports used cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413495: fltTcaEqptcapacityPortUsage1yearTotalCum

Severity: variable

Explanation: This fault is caused by "Total physical ports used cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413496: fltTcaEqptcapacityPortUsage5minTotalPer

Severity: variable

Explanation: This fault is caused by "Total physical ports used periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413497: fltTcaEqptcapacityPortUsage15minTotalPer

Severity: variable

Explanation: This fault is caused by "Total physical ports used periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413498: fltTcaEqptcapacityPortUsage1hTotalPer

Severity: variable

Explanation: This fault is caused by "Total physical ports used periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413499: fltTcaEqptcapacityPortUsage1dTotalPer

Severity: variable

Explanation: This fault is caused by "Total physical ports used periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4135: fltFvEpIpTagConfigurationError

Severity: major

Explanation: This fault occurs when an Endpoint (fvEpIpTag) Tag is not correctly configured.

Recommended Action: If you see this fault, take the following actions:

1. multiple-tag-selector-match: The configured Policy Tag(s) match more than one ESG TagSelctor when there is no pre-existing match. As a result, the endpoint is not classified into any ESGs because each endpoint can be associated to only one ESG TagSelector. Remove or update Policy Tag(s) (tagTag) or ESG TagSelctor (fvTagSelector) so that there is only one Policy Tag matching an ESG TagSelector for this endpoint.

2. multiple-tag-selector-match-after-single-match: The configured Policy Tag(s) match more than one ESG TagSelctor after the endpoint was already classified to an ESG via a previously configured tag. As a result, the endpoint remains classified to the original ESG and the new Tag(s) matching other ESG TagSelectors will be ignored at the moment. Remove or update Policy Tag(s) (tagTag) or ESG TagSelctor (fvTagSelector) so that there is only one Policy Tag matching an ESG TagSelector for this endpoint.

3. If the above action did not resolve the issue, create a tech-support file and contact Cisco TAC.

F413500: fltTcaEqptcapacityPortUsage1wTotalPer

Severity: variable

Explanation: This fault is caused by "Total physical ports used periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413501: fltTcaEqptcapacityPortUsage1moTotalPer

Severity: variable

Explanation: This fault is caused by "Total physical ports used periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413502: fltTcaEqptcapacityPortUsage1qtrTotalPer

Severity: variable

Explanation: This fault is caused by "Total physical ports used periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413503: fltTcaEqptcapacityPortUsage1yearTotalPer

Severity: variable

Explanation: This fault is caused by "Total physical ports used periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413504: fltTcaEqptcapacityPortUsage5minTotalMin

Severity: variable

Explanation: This fault is caused by "Total physical ports used minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413505: fltTcaEqptcapacityPortUsage15minTotalMin

Severity: variable

Explanation: This fault is caused by "Total physical ports used minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413506: fltTcaEqptcapacityPortUsage1hTotalMin

Severity: variable

Explanation: This fault is caused by "Total physical ports used minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413507: fltTcaEqptcapacityPortUsage1dTotalMin

Severity: variable

Explanation: This fault is caused by "Total physical ports used minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413508: fltTcaEqptcapacityPortUsage1wTotalMin

Severity: variable

Explanation: This fault is caused by "Total physical ports used minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413509: fltTcaEqptcapacityPortUsage1moTotalMin

Severity: variable

Explanation: This fault is caused by "Total physical ports used minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413510: fltTcaEqptcapacityPortUsage1qtrTotalMin

Severity: variable

Explanation: This fault is caused by "Total physical ports used minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413511: fltTcaEqptcapacityPortUsage1yearTotalMin

Severity: variable

Explanation: This fault is caused by "Total physical ports used minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413512: fltTcaEqptcapacityPortUsage5minTotalMax

Severity: variable

Explanation: This fault is caused by "Total physical ports used maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413513: fltTcaEqptcapacityPortUsage15minTotalMax

Severity: variable

Explanation: This fault is caused by "Total physical ports used maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413514: fltTcaEqptcapacityPortUsage1hTotalMax

Severity: variable

Explanation: This fault is caused by "Total physical ports used maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413515: fltTcaEqptcapacityPortUsage1dTotalMax

Severity: variable

Explanation: This fault is caused by "Total physical ports used maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413516: fltTcaEqptcapacityPortUsage1wTotalMax

Severity: variable

Explanation: This fault is caused by "Total physical ports used maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413517: fltTcaEqptcapacityPortUsage1moTotalMax

Severity: variable

Explanation: This fault is caused by "Total physical ports used maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413518: fltTcaEqptcapacityPortUsage1qtrTotalMax

Severity: variable

Explanation: This fault is caused by "Total physical ports used maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413519: fltTcaEqptcapacityPortUsage1yearTotalMax

Severity: variable

Explanation: This fault is caused by "Total physical ports used maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413520: fltTcaEqptcapacityPortUsage5minTotalAvg

Severity: variable

Explanation: This fault is caused by "Total physical ports used average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413521: fltTcaEqptcapacityPortUsage15minTotalAvg

Severity: variable

Explanation: This fault is caused by "Total physical ports used average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413522: fltTcaEqptcapacityPortUsage1hTotalAvg

Severity: variable

Explanation: This fault is caused by "Total physical ports used average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413523: fltTcaEqptcapacityPortUsage1dTotalAvg

Severity: variable

Explanation: This fault is caused by "Total physical ports used average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413524: fltTcaEqptcapacityPortUsage1wTotalAvg

Severity: variable

Explanation: This fault is caused by "Total physical ports used average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413525: fltTcaEqptcapacityPortUsage1moTotalAvg

Severity: variable

Explanation: This fault is caused by "Total physical ports used average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413526: fltTcaEqptcapacityPortUsage1qtrTotalAvg

Severity: variable

Explanation: This fault is caused by "Total physical ports used average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413527: fltTcaEqptcapacityPortUsage1yearTotalAvg

Severity: variable

Explanation: This fault is caused by "Total physical ports used average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413552: fltTcaEqptcapacityPortUsage5minTotalTr

Severity: variable

Explanation: This fault is caused by "Total physical ports used trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413553: fltTcaEqptcapacityPortUsage15minTotalTr

Severity: variable

Explanation: This fault is caused by "Total physical ports used trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413554: fltTcaEqptcapacityPortUsage1hTotalTr

Severity: variable

Explanation: This fault is caused by "Total physical ports used trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413555: fltTcaEqptcapacityPortUsage1dTotalTr

Severity: variable

Explanation: This fault is caused by "Total physical ports used trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413556: fltTcaEqptcapacityPortUsage1wTotalTr

Severity: variable

Explanation: This fault is caused by "Total physical ports used trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413557: fltTcaEqptcapacityPortUsage1moTotalTr

Severity: variable

Explanation: This fault is caused by "Total physical ports used trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413558: fltTcaEqptcapacityPortUsage1qtrTotalTr

Severity: variable

Explanation: This fault is caused by "Total physical ports used trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413559: fltTcaEqptcapacityPortUsage1yearTotalTr

Severity: variable

Explanation: This fault is caused by "Total physical ports used trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413560: fltTcaEqptcapacityPortUsage5minTotalRate

Severity: variable

Explanation: This fault is caused by "Total physical ports used rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413561: fltTcaEqptcapacityPortUsage15minTotalRate

Severity: variable

Explanation: This fault is caused by "Total physical ports used rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413562: fltTcaEqptcapacityPortUsage1hTotalRate

Severity: variable

Explanation: This fault is caused by "Total physical ports used rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413563: fltTcaEqptcapacityPortUsage1dTotalRate

Severity: variable

Explanation: This fault is caused by "Total physical ports used rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413564: fltTcaEqptcapacityPortUsage1wTotalRate

Severity: variable

Explanation: This fault is caused by "Total physical ports used rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413565: fltTcaEqptcapacityPortUsage1moTotalRate

Severity: variable

Explanation: This fault is caused by "Total physical ports used rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413566: fltTcaEqptcapacityPortUsage1qtrTotalRate

Severity: variable

Explanation: This fault is caused by "Total physical ports used rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413567: fltTcaEqptcapacityPortUsage1yearTotalRate

Severity: variable

Explanation: This fault is caused by "Total physical ports used rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total physical ports used" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4136: fltHinventoryRsAcctToFolderResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F413640: fltTcaEqptcapacityVrfUsage5minTotalCapLast

Severity: variable

Explanation: This fault is caused by "VRF entries capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413641: fltTcaEqptcapacityVrfUsage15minTotalCapLast

Severity: variable

Explanation: This fault is caused by "VRF entries capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413642: fltTcaEqptcapacityVrfUsage1hTotalCapLast

Severity: variable

Explanation: This fault is caused by "VRF entries capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413643: fltTcaEqptcapacityVrfUsage1dTotalCapLast

Severity: variable

Explanation: This fault is caused by "VRF entries capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413644: fltTcaEqptcapacityVrfUsage1wTotalCapLast

Severity: variable

Explanation: This fault is caused by "VRF entries capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413645: fltTcaEqptcapacityVrfUsage1moTotalCapLast

Severity: variable

Explanation: This fault is caused by "VRF entries capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413646: fltTcaEqptcapacityVrfUsage1qtrTotalCapLast

Severity: variable

Explanation: This fault is caused by "VRF entries capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413647: fltTcaEqptcapacityVrfUsage1yearTotalCapLast

Severity: variable

Explanation: This fault is caused by "VRF entries capacity current value" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413656: fltTcaEqptcapacityVrfUsage5minTotalCapCum

Severity: variable

Explanation: This fault is caused by "VRF entries capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413657: fltTcaEqptcapacityVrfUsage15minTotalCapCum

Severity: variable

Explanation: This fault is caused by "VRF entries capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413658: fltTcaEqptcapacityVrfUsage1hTotalCapCum

Severity: variable

Explanation: This fault is caused by "VRF entries capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413659: fltTcaEqptcapacityVrfUsage1dTotalCapCum

Severity: variable

Explanation: This fault is caused by "VRF entries capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413660: fltTcaEqptcapacityVrfUsage1wTotalCapCum

Severity: variable

Explanation: This fault is caused by "VRF entries capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413661: fltTcaEqptcapacityVrfUsage1moTotalCapCum

Severity: variable

Explanation: This fault is caused by "VRF entries capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413662: fltTcaEqptcapacityVrfUsage1qtrTotalCapCum

Severity: variable

Explanation: This fault is caused by "VRF entries capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413663: fltTcaEqptcapacityVrfUsage1yearTotalCapCum

Severity: variable

Explanation: This fault is caused by "VRF entries capacity cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413664: fltTcaEqptcapacityVrfUsage5minTotalCapPer

Severity: variable

Explanation: This fault is caused by "VRF entries capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413665: fltTcaEqptcapacityVrfUsage15minTotalCapPer

Severity: variable

Explanation: This fault is caused by "VRF entries capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413666: fltTcaEqptcapacityVrfUsage1hTotalCapPer

Severity: variable

Explanation: This fault is caused by "VRF entries capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413667: fltTcaEqptcapacityVrfUsage1dTotalCapPer

Severity: variable

Explanation: This fault is caused by "VRF entries capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413668: fltTcaEqptcapacityVrfUsage1wTotalCapPer

Severity: variable

Explanation: This fault is caused by "VRF entries capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413669: fltTcaEqptcapacityVrfUsage1moTotalCapPer

Severity: variable

Explanation: This fault is caused by "VRF entries capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413670: fltTcaEqptcapacityVrfUsage1qtrTotalCapPer

Severity: variable

Explanation: This fault is caused by "VRF entries capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413671: fltTcaEqptcapacityVrfUsage1yearTotalCapPer

Severity: variable

Explanation: This fault is caused by "VRF entries capacity periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413672: fltTcaEqptcapacityVrfUsage5minTotalCapMin

Severity: variable

Explanation: This fault is caused by "VRF entries capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413673: fltTcaEqptcapacityVrfUsage15minTotalCapMin

Severity: variable

Explanation: This fault is caused by "VRF entries capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413674: fltTcaEqptcapacityVrfUsage1hTotalCapMin

Severity: variable

Explanation: This fault is caused by "VRF entries capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413675: fltTcaEqptcapacityVrfUsage1dTotalCapMin

Severity: variable

Explanation: This fault is caused by "VRF entries capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413676: fltTcaEqptcapacityVrfUsage1wTotalCapMin

Severity: variable

Explanation: This fault is caused by "VRF entries capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413677: fltTcaEqptcapacityVrfUsage1moTotalCapMin

Severity: variable

Explanation: This fault is caused by "VRF entries capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413678: fltTcaEqptcapacityVrfUsage1qtrTotalCapMin

Severity: variable

Explanation: This fault is caused by "VRF entries capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413679: fltTcaEqptcapacityVrfUsage1yearTotalCapMin

Severity: variable

Explanation: This fault is caused by "VRF entries capacity minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413680: fltTcaEqptcapacityVrfUsage5minTotalCapMax

Severity: variable

Explanation: This fault is caused by "VRF entries capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413681: fltTcaEqptcapacityVrfUsage15minTotalCapMax

Severity: variable

Explanation: This fault is caused by "VRF entries capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413682: fltTcaEqptcapacityVrfUsage1hTotalCapMax

Severity: variable

Explanation: This fault is caused by "VRF entries capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413683: fltTcaEqptcapacityVrfUsage1dTotalCapMax

Severity: variable

Explanation: This fault is caused by "VRF entries capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413684: fltTcaEqptcapacityVrfUsage1wTotalCapMax

Severity: variable

Explanation: This fault is caused by "VRF entries capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413685: fltTcaEqptcapacityVrfUsage1moTotalCapMax

Severity: variable

Explanation: This fault is caused by "VRF entries capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413686: fltTcaEqptcapacityVrfUsage1qtrTotalCapMax

Severity: variable

Explanation: This fault is caused by "VRF entries capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413687: fltTcaEqptcapacityVrfUsage1yearTotalCapMax

Severity: variable

Explanation: This fault is caused by "VRF entries capacity maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413688: fltTcaEqptcapacityVrfUsage5minTotalCapAvg

Severity: variable

Explanation: This fault is caused by "VRF entries capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413689: fltTcaEqptcapacityVrfUsage15minTotalCapAvg

Severity: variable

Explanation: This fault is caused by "VRF entries capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413690: fltTcaEqptcapacityVrfUsage1hTotalCapAvg

Severity: variable

Explanation: This fault is caused by "VRF entries capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413691: fltTcaEqptcapacityVrfUsage1dTotalCapAvg

Severity: variable

Explanation: This fault is caused by "VRF entries capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413692: fltTcaEqptcapacityVrfUsage1wTotalCapAvg

Severity: variable

Explanation: This fault is caused by "VRF entries capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413693: fltTcaEqptcapacityVrfUsage1moTotalCapAvg

Severity: variable

Explanation: This fault is caused by "VRF entries capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413694: fltTcaEqptcapacityVrfUsage1qtrTotalCapAvg

Severity: variable

Explanation: This fault is caused by "VRF entries capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413695: fltTcaEqptcapacityVrfUsage1yearTotalCapAvg

Severity: variable

Explanation: This fault is caused by "VRF entries capacity average value" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413720: fltTcaEqptcapacityVrfUsage5minTotalCapTr

Severity: variable

Explanation: This fault is caused by "VRF entries capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413721: fltTcaEqptcapacityVrfUsage15minTotalCapTr

Severity: variable

Explanation: This fault is caused by "VRF entries capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413722: fltTcaEqptcapacityVrfUsage1hTotalCapTr

Severity: variable

Explanation: This fault is caused by "VRF entries capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413723: fltTcaEqptcapacityVrfUsage1dTotalCapTr

Severity: variable

Explanation: This fault is caused by "VRF entries capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413724: fltTcaEqptcapacityVrfUsage1wTotalCapTr

Severity: variable

Explanation: This fault is caused by "VRF entries capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413725: fltTcaEqptcapacityVrfUsage1moTotalCapTr

Severity: variable

Explanation: This fault is caused by "VRF entries capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413726: fltTcaEqptcapacityVrfUsage1qtrTotalCapTr

Severity: variable

Explanation: This fault is caused by "VRF entries capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413727: fltTcaEqptcapacityVrfUsage1yearTotalCapTr

Severity: variable

Explanation: This fault is caused by "VRF entries capacity trend" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413728: fltTcaEqptcapacityVrfUsage5minTotalCapRate

Severity: variable

Explanation: This fault is caused by "VRF entries capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413729: fltTcaEqptcapacityVrfUsage15minTotalCapRate

Severity: variable

Explanation: This fault is caused by "VRF entries capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413730: fltTcaEqptcapacityVrfUsage1hTotalCapRate

Severity: variable

Explanation: This fault is caused by "VRF entries capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413731: fltTcaEqptcapacityVrfUsage1dTotalCapRate

Severity: variable

Explanation: This fault is caused by "VRF entries capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413732: fltTcaEqptcapacityVrfUsage1wTotalCapRate

Severity: variable

Explanation: This fault is caused by "VRF entries capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413733: fltTcaEqptcapacityVrfUsage1moTotalCapRate

Severity: variable

Explanation: This fault is caused by "VRF entries capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413734: fltTcaEqptcapacityVrfUsage1qtrTotalCapRate

Severity: variable

Explanation: This fault is caused by "VRF entries capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413735: fltTcaEqptcapacityVrfUsage1yearTotalCapRate

Severity: variable

Explanation: This fault is caused by "VRF entries capacity rate" statistical property crossing threshold level.

Recommended Action: Check the values of "VRF entries capacity" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413808: fltTcaEqptcapacityVrfUsage5minTotalLast

Severity: variable

Explanation: This fault is caused by "Total VRF entries current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413809: fltTcaEqptcapacityVrfUsage15minTotalLast

Severity: variable

Explanation: This fault is caused by "Total VRF entries current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413810: fltTcaEqptcapacityVrfUsage1hTotalLast

Severity: variable

Explanation: This fault is caused by "Total VRF entries current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413811: fltTcaEqptcapacityVrfUsage1dTotalLast

Severity: variable

Explanation: This fault is caused by "Total VRF entries current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413812: fltTcaEqptcapacityVrfUsage1wTotalLast

Severity: variable

Explanation: This fault is caused by "Total VRF entries current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413813: fltTcaEqptcapacityVrfUsage1moTotalLast

Severity: variable

Explanation: This fault is caused by "Total VRF entries current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413814: fltTcaEqptcapacityVrfUsage1qtrTotalLast

Severity: variable

Explanation: This fault is caused by "Total VRF entries current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413815: fltTcaEqptcapacityVrfUsage1yearTotalLast

Severity: variable

Explanation: This fault is caused by "Total VRF entries current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413824: fltTcaEqptcapacityVrfUsage5minTotalCum

Severity: variable

Explanation: This fault is caused by "Total VRF entries cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413825: fltTcaEqptcapacityVrfUsage15minTotalCum

Severity: variable

Explanation: This fault is caused by "Total VRF entries cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413826: fltTcaEqptcapacityVrfUsage1hTotalCum

Severity: variable

Explanation: This fault is caused by "Total VRF entries cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413827: fltTcaEqptcapacityVrfUsage1dTotalCum

Severity: variable

Explanation: This fault is caused by "Total VRF entries cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413828: fltTcaEqptcapacityVrfUsage1wTotalCum

Severity: variable

Explanation: This fault is caused by "Total VRF entries cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413829: fltTcaEqptcapacityVrfUsage1moTotalCum

Severity: variable

Explanation: This fault is caused by "Total VRF entries cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413830: fltTcaEqptcapacityVrfUsage1qtrTotalCum

Severity: variable

Explanation: This fault is caused by "Total VRF entries cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413831: fltTcaEqptcapacityVrfUsage1yearTotalCum

Severity: variable

Explanation: This fault is caused by "Total VRF entries cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413832: fltTcaEqptcapacityVrfUsage5minTotalPer

Severity: variable

Explanation: This fault is caused by "Total VRF entries periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413833: fltTcaEqptcapacityVrfUsage15minTotalPer

Severity: variable

Explanation: This fault is caused by "Total VRF entries periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413834: fltTcaEqptcapacityVrfUsage1hTotalPer

Severity: variable

Explanation: This fault is caused by "Total VRF entries periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413835: fltTcaEqptcapacityVrfUsage1dTotalPer

Severity: variable

Explanation: This fault is caused by "Total VRF entries periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413836: fltTcaEqptcapacityVrfUsage1wTotalPer

Severity: variable

Explanation: This fault is caused by "Total VRF entries periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413837: fltTcaEqptcapacityVrfUsage1moTotalPer

Severity: variable

Explanation: This fault is caused by "Total VRF entries periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413838: fltTcaEqptcapacityVrfUsage1qtrTotalPer

Severity: variable

Explanation: This fault is caused by "Total VRF entries periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413839: fltTcaEqptcapacityVrfUsage1yearTotalPer

Severity: variable

Explanation: This fault is caused by "Total VRF entries periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413840: fltTcaEqptcapacityVrfUsage5minTotalMin

Severity: variable

Explanation: This fault is caused by "Total VRF entries minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413841: fltTcaEqptcapacityVrfUsage15minTotalMin

Severity: variable

Explanation: This fault is caused by "Total VRF entries minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413842: fltTcaEqptcapacityVrfUsage1hTotalMin

Severity: variable

Explanation: This fault is caused by "Total VRF entries minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413843: fltTcaEqptcapacityVrfUsage1dTotalMin

Severity: variable

Explanation: This fault is caused by "Total VRF entries minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413844: fltTcaEqptcapacityVrfUsage1wTotalMin

Severity: variable

Explanation: This fault is caused by "Total VRF entries minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413845: fltTcaEqptcapacityVrfUsage1moTotalMin

Severity: variable

Explanation: This fault is caused by "Total VRF entries minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413846: fltTcaEqptcapacityVrfUsage1qtrTotalMin

Severity: variable

Explanation: This fault is caused by "Total VRF entries minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413847: fltTcaEqptcapacityVrfUsage1yearTotalMin

Severity: variable

Explanation: This fault is caused by "Total VRF entries minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413848: fltTcaEqptcapacityVrfUsage5minTotalMax

Severity: variable

Explanation: This fault is caused by "Total VRF entries maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413849: fltTcaEqptcapacityVrfUsage15minTotalMax

Severity: variable

Explanation: This fault is caused by "Total VRF entries maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413850: fltTcaEqptcapacityVrfUsage1hTotalMax

Severity: variable

Explanation: This fault is caused by "Total VRF entries maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413851: fltTcaEqptcapacityVrfUsage1dTotalMax

Severity: variable

Explanation: This fault is caused by "Total VRF entries maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413852: fltTcaEqptcapacityVrfUsage1wTotalMax

Severity: variable

Explanation: This fault is caused by "Total VRF entries maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413853: fltTcaEqptcapacityVrfUsage1moTotalMax

Severity: variable

Explanation: This fault is caused by "Total VRF entries maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413854: fltTcaEqptcapacityVrfUsage1qtrTotalMax

Severity: variable

Explanation: This fault is caused by "Total VRF entries maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413855: fltTcaEqptcapacityVrfUsage1yearTotalMax

Severity: variable

Explanation: This fault is caused by "Total VRF entries maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413856: fltTcaEqptcapacityVrfUsage5minTotalAvg

Severity: variable

Explanation: This fault is caused by "Total VRF entries average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413857: fltTcaEqptcapacityVrfUsage15minTotalAvg

Severity: variable

Explanation: This fault is caused by "Total VRF entries average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413858: fltTcaEqptcapacityVrfUsage1hTotalAvg

Severity: variable

Explanation: This fault is caused by "Total VRF entries average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413859: fltTcaEqptcapacityVrfUsage1dTotalAvg

Severity: variable

Explanation: This fault is caused by "Total VRF entries average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413860: fltTcaEqptcapacityVrfUsage1wTotalAvg

Severity: variable

Explanation: This fault is caused by "Total VRF entries average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413861: fltTcaEqptcapacityVrfUsage1moTotalAvg

Severity: variable

Explanation: This fault is caused by "Total VRF entries average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413862: fltTcaEqptcapacityVrfUsage1qtrTotalAvg

Severity: variable

Explanation: This fault is caused by "Total VRF entries average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413863: fltTcaEqptcapacityVrfUsage1yearTotalAvg

Severity: variable

Explanation: This fault is caused by "Total VRF entries average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413888: fltTcaEqptcapacityVrfUsage5minTotalTr

Severity: variable

Explanation: This fault is caused by "Total VRF entries trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413889: fltTcaEqptcapacityVrfUsage15minTotalTr

Severity: variable

Explanation: This fault is caused by "Total VRF entries trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413890: fltTcaEqptcapacityVrfUsage1hTotalTr

Severity: variable

Explanation: This fault is caused by "Total VRF entries trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413891: fltTcaEqptcapacityVrfUsage1dTotalTr

Severity: variable

Explanation: This fault is caused by "Total VRF entries trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413892: fltTcaEqptcapacityVrfUsage1wTotalTr

Severity: variable

Explanation: This fault is caused by "Total VRF entries trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413893: fltTcaEqptcapacityVrfUsage1moTotalTr

Severity: variable

Explanation: This fault is caused by "Total VRF entries trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413894: fltTcaEqptcapacityVrfUsage1qtrTotalTr

Severity: variable

Explanation: This fault is caused by "Total VRF entries trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413895: fltTcaEqptcapacityVrfUsage1yearTotalTr

Severity: variable

Explanation: This fault is caused by "Total VRF entries trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413896: fltTcaEqptcapacityVrfUsage5minTotalRate

Severity: variable

Explanation: This fault is caused by "Total VRF entries rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413897: fltTcaEqptcapacityVrfUsage15minTotalRate

Severity: variable

Explanation: This fault is caused by "Total VRF entries rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413898: fltTcaEqptcapacityVrfUsage1hTotalRate

Severity: variable

Explanation: This fault is caused by "Total VRF entries rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413899: fltTcaEqptcapacityVrfUsage1dTotalRate

Severity: variable

Explanation: This fault is caused by "Total VRF entries rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413900: fltTcaEqptcapacityVrfUsage1wTotalRate

Severity: variable

Explanation: This fault is caused by "Total VRF entries rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413901: fltTcaEqptcapacityVrfUsage1moTotalRate

Severity: variable

Explanation: This fault is caused by "Total VRF entries rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413902: fltTcaEqptcapacityVrfUsage1qtrTotalRate

Severity: variable

Explanation: This fault is caused by "Total VRF entries rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F413903: fltTcaEqptcapacityVrfUsage1yearTotalRate

Severity: variable

Explanation: This fault is caused by "Total VRF entries rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Total VRF entries" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4140: fltDhcpDiscoveryHealthDhcpPoolOwnershipCheckFailed

Severity: major

Explanation: This fault is raised when there are more than one APIC as owners for a dhcp pool

Recommended Action: If you see this fault, take the following actions:

1. Collect a tech-support file and contact Cisco TAC.

F4141: fltDhcpDiscoveryHealthDhcpClientLeaseCheckFailed

Severity: warning

Explanation: This fault is raised when there is dhcp client without a lease

Recommended Action: If you see this fault, take the following actions:

1. Collect a tech-support file and contact Cisco TAC.

F4142: fltDhcpDiscoveryHealthDhcpIPPoolIdAssignerMismatch

Severity: warning

Explanation: This fault is raised when there is a dhcp pool ip assigner id mismatch in fnv and idmgr

Recommended Action: If you see this fault, take the following actions:

1. Collect a tech-support file and contact Cisco TAC.

F4143: fltDhcpDiscoveryHealthDhcpClientZeroNodeId

Severity: warning

Explanation: This fault is raised when there is a dhcp client with node id 0 with valid ip

Recommended Action: If you see this fault, take the following actions:

1. Collect a tech-support file and contact Cisco TAC.

F4144: fltDhcpDiscoveryHealthDhcpdFnvUnSync

Severity: major

Explanation: This fault is raised when dhcp client and pool are not in sync with fnv data

Recommended Action: If you see this fault, take the following actions:

1. Collect a tech-support file and contact Cisco TAC.

F4146: fltPatchingPatchPatchingCfgCtrl

Severity: warning

Explanation: This fault is caused by a hardware programming failure

Recommended Action: The system will periodically retry to program the hardware. If the failure is due to lack of hardware resources, free up resources by removing or simplifying existing configuration. One of the reasons for lack of hardware resources is exhaustion of VLANs in ToR. These hardware resources can be examined by looking at capacity dashboard under OPERATIONS tab. Please check entry against the number of VLANs in output of command show vlan summary issued at node where fault is generated to check whether it exceeds above advertised node capacity.

F4148: fltEqptCardOperStChange

Severity: minor

Explanation: LC/FM in failed state

Recommended Action: To recover from this fault, try the following actions

1. Reload LC/FM

2. If the above action did not resolve the issue, collect tech-support and contact Cisco TAC

F4149: fltEqptSlotOperStChange

Severity: minor

Explanation: This fault occurs when you remove LC/FM/SUP/SC from the slot

Recommended Action: To recover from this fault, try the following actions

1. Insert the card back in the slot

2. If the above action did not resolve the issue, collect tech-support and contact Cisco TAC

F4154: fltSynceInstPlatformSupportFault

Severity: major

Explanation: This fault occurs when the syncE feature is enabled on unsupported platform.

Recommended Action: To recover from this fault, enable feature only on supported platform.

F4155: fltSynceEthIfQlFault

Severity: major

Explanation: This fault occurs when the QL option config on interface differs with QL option config at node level

Recommended Action: To recover from this fault, make sure to have same QL option config on both interface and node level

F4156: fltApPluginAppValidationDeferred

Severity: minor

Explanation: Application validation deferred.

Recommended Action: APP validation keeps getting retried until all the information needed to validate an App image are available. Please raise a TAC case only if this fault does not get cleared within one hour.

F4158: fltInfraRsPtpInstPolResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F4159: fltCloudRsGatewayRouterPToRegionResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F415944: fltTcaBgpPeerBytes5minByteInRecvQLast

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415945: fltTcaBgpPeerBytes15minByteInRecvQLast

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415946: fltTcaBgpPeerBytes1hByteInRecvQLast

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415947: fltTcaBgpPeerBytes1dByteInRecvQLast

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415948: fltTcaBgpPeerBytes1wByteInRecvQLast

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415949: fltTcaBgpPeerBytes1moByteInRecvQLast

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415950: fltTcaBgpPeerBytes1qtrByteInRecvQLast

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415951: fltTcaBgpPeerBytes1yearByteInRecvQLast

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415960: fltTcaBgpPeerBytes5minByteInRecvQCum

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415961: fltTcaBgpPeerBytes15minByteInRecvQCum

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415962: fltTcaBgpPeerBytes1hByteInRecvQCum

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415963: fltTcaBgpPeerBytes1dByteInRecvQCum

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415964: fltTcaBgpPeerBytes1wByteInRecvQCum

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415965: fltTcaBgpPeerBytes1moByteInRecvQCum

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415966: fltTcaBgpPeerBytes1qtrByteInRecvQCum

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415967: fltTcaBgpPeerBytes1yearByteInRecvQCum

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415968: fltTcaBgpPeerBytes5minByteInRecvQPer

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415969: fltTcaBgpPeerBytes15minByteInRecvQPer

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415970: fltTcaBgpPeerBytes1hByteInRecvQPer

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415971: fltTcaBgpPeerBytes1dByteInRecvQPer

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415972: fltTcaBgpPeerBytes1wByteInRecvQPer

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415973: fltTcaBgpPeerBytes1moByteInRecvQPer

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415974: fltTcaBgpPeerBytes1qtrByteInRecvQPer

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415975: fltTcaBgpPeerBytes1yearByteInRecvQPer

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415976: fltTcaBgpPeerBytes5minByteInRecvQMin

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415977: fltTcaBgpPeerBytes15minByteInRecvQMin

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415978: fltTcaBgpPeerBytes1hByteInRecvQMin

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415979: fltTcaBgpPeerBytes1dByteInRecvQMin

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415980: fltTcaBgpPeerBytes1wByteInRecvQMin

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415981: fltTcaBgpPeerBytes1moByteInRecvQMin

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415982: fltTcaBgpPeerBytes1qtrByteInRecvQMin

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415983: fltTcaBgpPeerBytes1yearByteInRecvQMin

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415984: fltTcaBgpPeerBytes5minByteInRecvQMax

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415985: fltTcaBgpPeerBytes15minByteInRecvQMax

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415986: fltTcaBgpPeerBytes1hByteInRecvQMax

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415987: fltTcaBgpPeerBytes1dByteInRecvQMax

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415988: fltTcaBgpPeerBytes1wByteInRecvQMax

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415989: fltTcaBgpPeerBytes1moByteInRecvQMax

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415990: fltTcaBgpPeerBytes1qtrByteInRecvQMax

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415991: fltTcaBgpPeerBytes1yearByteInRecvQMax

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415992: fltTcaBgpPeerBytes5minByteInRecvQAvg

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415993: fltTcaBgpPeerBytes15minByteInRecvQAvg

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415994: fltTcaBgpPeerBytes1hByteInRecvQAvg

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415995: fltTcaBgpPeerBytes1dByteInRecvQAvg

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415996: fltTcaBgpPeerBytes1wByteInRecvQAvg

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415997: fltTcaBgpPeerBytes1moByteInRecvQAvg

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415998: fltTcaBgpPeerBytes1qtrByteInRecvQAvg

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F415999: fltTcaBgpPeerBytes1yearByteInRecvQAvg

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4160: fltHcloudRsCtxConnectToCtxPeerResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F416024: fltTcaBgpPeerBytes5minByteInRecvQTr

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416025: fltTcaBgpPeerBytes15minByteInRecvQTr

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416026: fltTcaBgpPeerBytes1hByteInRecvQTr

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416027: fltTcaBgpPeerBytes1dByteInRecvQTr

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416028: fltTcaBgpPeerBytes1wByteInRecvQTr

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416029: fltTcaBgpPeerBytes1moByteInRecvQTr

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416030: fltTcaBgpPeerBytes1qtrByteInRecvQTr

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416031: fltTcaBgpPeerBytes1yearByteInRecvQTr

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416032: fltTcaBgpPeerBytes5minByteInRecvQRate

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416033: fltTcaBgpPeerBytes15minByteInRecvQRate

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416034: fltTcaBgpPeerBytes1hByteInRecvQRate

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416035: fltTcaBgpPeerBytes1dByteInRecvQRate

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416036: fltTcaBgpPeerBytes1wByteInRecvQRate

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416037: fltTcaBgpPeerBytes1moByteInRecvQRate

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416038: fltTcaBgpPeerBytes1qtrByteInRecvQRate

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416039: fltTcaBgpPeerBytes1yearByteInRecvQRate

Severity: variable

Explanation: This fault is caused by "Bytes in Receive Queue rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Receive Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4161: fltHcloudRsCtxConnectToRouteTableResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F416112: fltTcaBgpPeerBytes5minByteInSendQLast

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416113: fltTcaBgpPeerBytes15minByteInSendQLast

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416114: fltTcaBgpPeerBytes1hByteInSendQLast

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416115: fltTcaBgpPeerBytes1dByteInSendQLast

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416116: fltTcaBgpPeerBytes1wByteInSendQLast

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416117: fltTcaBgpPeerBytes1moByteInSendQLast

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416118: fltTcaBgpPeerBytes1qtrByteInSendQLast

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416119: fltTcaBgpPeerBytes1yearByteInSendQLast

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416128: fltTcaBgpPeerBytes5minByteInSendQCum

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416129: fltTcaBgpPeerBytes15minByteInSendQCum

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416130: fltTcaBgpPeerBytes1hByteInSendQCum

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416131: fltTcaBgpPeerBytes1dByteInSendQCum

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416132: fltTcaBgpPeerBytes1wByteInSendQCum

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416133: fltTcaBgpPeerBytes1moByteInSendQCum

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416134: fltTcaBgpPeerBytes1qtrByteInSendQCum

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416135: fltTcaBgpPeerBytes1yearByteInSendQCum

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416136: fltTcaBgpPeerBytes5minByteInSendQPer

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416137: fltTcaBgpPeerBytes15minByteInSendQPer

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416138: fltTcaBgpPeerBytes1hByteInSendQPer

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416139: fltTcaBgpPeerBytes1dByteInSendQPer

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416140: fltTcaBgpPeerBytes1wByteInSendQPer

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416141: fltTcaBgpPeerBytes1moByteInSendQPer

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416142: fltTcaBgpPeerBytes1qtrByteInSendQPer

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416143: fltTcaBgpPeerBytes1yearByteInSendQPer

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416144: fltTcaBgpPeerBytes5minByteInSendQMin

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416145: fltTcaBgpPeerBytes15minByteInSendQMin

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416146: fltTcaBgpPeerBytes1hByteInSendQMin

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416147: fltTcaBgpPeerBytes1dByteInSendQMin

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416148: fltTcaBgpPeerBytes1wByteInSendQMin

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416149: fltTcaBgpPeerBytes1moByteInSendQMin

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416150: fltTcaBgpPeerBytes1qtrByteInSendQMin

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416151: fltTcaBgpPeerBytes1yearByteInSendQMin

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416152: fltTcaBgpPeerBytes5minByteInSendQMax

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416153: fltTcaBgpPeerBytes15minByteInSendQMax

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416154: fltTcaBgpPeerBytes1hByteInSendQMax

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416155: fltTcaBgpPeerBytes1dByteInSendQMax

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416156: fltTcaBgpPeerBytes1wByteInSendQMax

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416157: fltTcaBgpPeerBytes1moByteInSendQMax

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416158: fltTcaBgpPeerBytes1qtrByteInSendQMax

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416159: fltTcaBgpPeerBytes1yearByteInSendQMax

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416160: fltTcaBgpPeerBytes5minByteInSendQAvg

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416161: fltTcaBgpPeerBytes15minByteInSendQAvg

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416162: fltTcaBgpPeerBytes1hByteInSendQAvg

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416163: fltTcaBgpPeerBytes1dByteInSendQAvg

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416164: fltTcaBgpPeerBytes1wByteInSendQAvg

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416165: fltTcaBgpPeerBytes1moByteInSendQAvg

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416166: fltTcaBgpPeerBytes1qtrByteInSendQAvg

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416167: fltTcaBgpPeerBytes1yearByteInSendQAvg

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416192: fltTcaBgpPeerBytes5minByteInSendQTr

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416193: fltTcaBgpPeerBytes15minByteInSendQTr

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416194: fltTcaBgpPeerBytes1hByteInSendQTr

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416195: fltTcaBgpPeerBytes1dByteInSendQTr

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416196: fltTcaBgpPeerBytes1wByteInSendQTr

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416197: fltTcaBgpPeerBytes1moByteInSendQTr

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416198: fltTcaBgpPeerBytes1qtrByteInSendQTr

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416199: fltTcaBgpPeerBytes1yearByteInSendQTr

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4162: fltHcloudRsCtxConnectPeerToNwIntfResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F416200: fltTcaBgpPeerBytes5minByteInSendQRate

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416201: fltTcaBgpPeerBytes15minByteInSendQRate

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416202: fltTcaBgpPeerBytes1hByteInSendQRate

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416203: fltTcaBgpPeerBytes1dByteInSendQRate

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416204: fltTcaBgpPeerBytes1wByteInSendQRate

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416205: fltTcaBgpPeerBytes1moByteInSendQRate

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416206: fltTcaBgpPeerBytes1qtrByteInSendQRate

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416207: fltTcaBgpPeerBytes1yearByteInSendQRate

Severity: variable

Explanation: This fault is caused by "Bytes in Send Queue rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Bytes in Send Queue" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416280: fltTcaBgpPeerBytes5minByteRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416281: fltTcaBgpPeerBytes15minByteRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416282: fltTcaBgpPeerBytes1hByteRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416283: fltTcaBgpPeerBytes1dByteRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416284: fltTcaBgpPeerBytes1wByteRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416285: fltTcaBgpPeerBytes1moByteRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416286: fltTcaBgpPeerBytes1qtrByteRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416287: fltTcaBgpPeerBytes1yearByteRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416296: fltTcaBgpPeerBytes5minByteRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416297: fltTcaBgpPeerBytes15minByteRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416298: fltTcaBgpPeerBytes1hByteRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416299: fltTcaBgpPeerBytes1dByteRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4163: fltHcloudRsCtxPeerToCtxResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F416300: fltTcaBgpPeerBytes1wByteRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416301: fltTcaBgpPeerBytes1moByteRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416302: fltTcaBgpPeerBytes1qtrByteRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416303: fltTcaBgpPeerBytes1yearByteRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416304: fltTcaBgpPeerBytes5minByteRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416305: fltTcaBgpPeerBytes15minByteRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416306: fltTcaBgpPeerBytes1hByteRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416307: fltTcaBgpPeerBytes1dByteRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416308: fltTcaBgpPeerBytes1wByteRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416309: fltTcaBgpPeerBytes1moByteRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416310: fltTcaBgpPeerBytes1qtrByteRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416311: fltTcaBgpPeerBytes1yearByteRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416312: fltTcaBgpPeerBytes5minByteRcvdMin

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416313: fltTcaBgpPeerBytes15minByteRcvdMin

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416314: fltTcaBgpPeerBytes1hByteRcvdMin

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416315: fltTcaBgpPeerBytes1dByteRcvdMin

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416316: fltTcaBgpPeerBytes1wByteRcvdMin

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416317: fltTcaBgpPeerBytes1moByteRcvdMin

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416318: fltTcaBgpPeerBytes1qtrByteRcvdMin

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416319: fltTcaBgpPeerBytes1yearByteRcvdMin

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416320: fltTcaBgpPeerBytes5minByteRcvdMax

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416321: fltTcaBgpPeerBytes15minByteRcvdMax

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416322: fltTcaBgpPeerBytes1hByteRcvdMax

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416323: fltTcaBgpPeerBytes1dByteRcvdMax

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416324: fltTcaBgpPeerBytes1wByteRcvdMax

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416325: fltTcaBgpPeerBytes1moByteRcvdMax

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416326: fltTcaBgpPeerBytes1qtrByteRcvdMax

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416327: fltTcaBgpPeerBytes1yearByteRcvdMax

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416328: fltTcaBgpPeerBytes5minByteRcvdAvg

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416329: fltTcaBgpPeerBytes15minByteRcvdAvg

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416330: fltTcaBgpPeerBytes1hByteRcvdAvg

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416331: fltTcaBgpPeerBytes1dByteRcvdAvg

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416332: fltTcaBgpPeerBytes1wByteRcvdAvg

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416333: fltTcaBgpPeerBytes1moByteRcvdAvg

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416334: fltTcaBgpPeerBytes1qtrByteRcvdAvg

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416335: fltTcaBgpPeerBytes1yearByteRcvdAvg

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416360: fltTcaBgpPeerBytes5minByteRcvdTr

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416361: fltTcaBgpPeerBytes15minByteRcvdTr

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416362: fltTcaBgpPeerBytes1hByteRcvdTr

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416363: fltTcaBgpPeerBytes1dByteRcvdTr

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416364: fltTcaBgpPeerBytes1wByteRcvdTr

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416365: fltTcaBgpPeerBytes1moByteRcvdTr

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416366: fltTcaBgpPeerBytes1qtrByteRcvdTr

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416367: fltTcaBgpPeerBytes1yearByteRcvdTr

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416368: fltTcaBgpPeerBytes5minByteRcvdRate

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416369: fltTcaBgpPeerBytes15minByteRcvdRate

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416370: fltTcaBgpPeerBytes1hByteRcvdRate

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416371: fltTcaBgpPeerBytes1dByteRcvdRate

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416372: fltTcaBgpPeerBytes1wByteRcvdRate

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416373: fltTcaBgpPeerBytes1moByteRcvdRate

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416374: fltTcaBgpPeerBytes1qtrByteRcvdRate

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416375: fltTcaBgpPeerBytes1yearByteRcvdRate

Severity: variable

Explanation: This fault is caused by "Number of Bytes Received rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4164: fltHcloudRsCtxPeerToExtCtxResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F416448: fltTcaBgpPeerBytes5minByteSentLast

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416449: fltTcaBgpPeerBytes15minByteSentLast

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416450: fltTcaBgpPeerBytes1hByteSentLast

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416451: fltTcaBgpPeerBytes1dByteSentLast

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416452: fltTcaBgpPeerBytes1wByteSentLast

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416453: fltTcaBgpPeerBytes1moByteSentLast

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416454: fltTcaBgpPeerBytes1qtrByteSentLast

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416455: fltTcaBgpPeerBytes1yearByteSentLast

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416464: fltTcaBgpPeerBytes5minByteSentCum

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416465: fltTcaBgpPeerBytes15minByteSentCum

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416466: fltTcaBgpPeerBytes1hByteSentCum

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416467: fltTcaBgpPeerBytes1dByteSentCum

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416468: fltTcaBgpPeerBytes1wByteSentCum

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416469: fltTcaBgpPeerBytes1moByteSentCum

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416470: fltTcaBgpPeerBytes1qtrByteSentCum

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416471: fltTcaBgpPeerBytes1yearByteSentCum

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416472: fltTcaBgpPeerBytes5minByteSentPer

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416473: fltTcaBgpPeerBytes15minByteSentPer

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416474: fltTcaBgpPeerBytes1hByteSentPer

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416475: fltTcaBgpPeerBytes1dByteSentPer

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416476: fltTcaBgpPeerBytes1wByteSentPer

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416477: fltTcaBgpPeerBytes1moByteSentPer

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416478: fltTcaBgpPeerBytes1qtrByteSentPer

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416479: fltTcaBgpPeerBytes1yearByteSentPer

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416480: fltTcaBgpPeerBytes5minByteSentMin

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416481: fltTcaBgpPeerBytes15minByteSentMin

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416482: fltTcaBgpPeerBytes1hByteSentMin

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416483: fltTcaBgpPeerBytes1dByteSentMin

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416484: fltTcaBgpPeerBytes1wByteSentMin

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416485: fltTcaBgpPeerBytes1moByteSentMin

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416486: fltTcaBgpPeerBytes1qtrByteSentMin

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416487: fltTcaBgpPeerBytes1yearByteSentMin

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416488: fltTcaBgpPeerBytes5minByteSentMax

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416489: fltTcaBgpPeerBytes15minByteSentMax

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416490: fltTcaBgpPeerBytes1hByteSentMax

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416491: fltTcaBgpPeerBytes1dByteSentMax

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416492: fltTcaBgpPeerBytes1wByteSentMax

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416493: fltTcaBgpPeerBytes1moByteSentMax

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416494: fltTcaBgpPeerBytes1qtrByteSentMax

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416495: fltTcaBgpPeerBytes1yearByteSentMax

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416496: fltTcaBgpPeerBytes5minByteSentAvg

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416497: fltTcaBgpPeerBytes15minByteSentAvg

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416498: fltTcaBgpPeerBytes1hByteSentAvg

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416499: fltTcaBgpPeerBytes1dByteSentAvg

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4165: fltHcloudRsNextHopToCtxPeerResolveFail

Severity: warning

Explanation: The object refers to an object that was not found.

Recommended Action: Make sure that referenced object exists and the name is spelled correctly in the relation object.

F416500: fltTcaBgpPeerBytes1wByteSentAvg

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416501: fltTcaBgpPeerBytes1moByteSentAvg

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416502: fltTcaBgpPeerBytes1qtrByteSentAvg

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416503: fltTcaBgpPeerBytes1yearByteSentAvg

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416528: fltTcaBgpPeerBytes5minByteSentTr

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416529: fltTcaBgpPeerBytes15minByteSentTr

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416530: fltTcaBgpPeerBytes1hByteSentTr

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416531: fltTcaBgpPeerBytes1dByteSentTr

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416532: fltTcaBgpPeerBytes1wByteSentTr

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416533: fltTcaBgpPeerBytes1moByteSentTr

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416534: fltTcaBgpPeerBytes1qtrByteSentTr

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416535: fltTcaBgpPeerBytes1yearByteSentTr

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416536: fltTcaBgpPeerBytes5minByteSentRate

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416537: fltTcaBgpPeerBytes15minByteSentRate

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416538: fltTcaBgpPeerBytes1hByteSentRate

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416539: fltTcaBgpPeerBytes1dByteSentRate

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416540: fltTcaBgpPeerBytes1wByteSentRate

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416541: fltTcaBgpPeerBytes1moByteSentRate

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416542: fltTcaBgpPeerBytes1qtrByteSentRate

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416543: fltTcaBgpPeerBytes1yearByteSentRate

Severity: variable

Explanation: This fault is caused by "Number of Bytes Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Bytes Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4166: fltSvcredirDestmonConfigStFailed

Severity: major

Explanation: This fault occurs when a PBR service destination is used with multiple tracking types

Recommended Action: To recover from this fault, try the following actions

1. Use the destination with single tracking type

2. To recover, delete this destination from all PBR policies where its used, then add the destination with correct tracking type

F416616: fltTcaBgpPeerKeepAlive5minKeepaliveRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416617: fltTcaBgpPeerKeepAlive15minKeepaliveRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416618: fltTcaBgpPeerKeepAlive1hKeepaliveRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416619: fltTcaBgpPeerKeepAlive1dKeepaliveRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416620: fltTcaBgpPeerKeepAlive1wKeepaliveRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416621: fltTcaBgpPeerKeepAlive1moKeepaliveRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416622: fltTcaBgpPeerKeepAlive1qtrKeepaliveRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416623: fltTcaBgpPeerKeepAlive1yearKeepaliveRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416632: fltTcaBgpPeerKeepAlive5minKeepaliveRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416633: fltTcaBgpPeerKeepAlive15minKeepaliveRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416634: fltTcaBgpPeerKeepAlive1hKeepaliveRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416635: fltTcaBgpPeerKeepAlive1dKeepaliveRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416636: fltTcaBgpPeerKeepAlive1wKeepaliveRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416637: fltTcaBgpPeerKeepAlive1moKeepaliveRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416638: fltTcaBgpPeerKeepAlive1qtrKeepaliveRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416639: fltTcaBgpPeerKeepAlive1yearKeepaliveRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416640: fltTcaBgpPeerKeepAlive5minKeepaliveRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416641: fltTcaBgpPeerKeepAlive15minKeepaliveRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416642: fltTcaBgpPeerKeepAlive1hKeepaliveRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416643: fltTcaBgpPeerKeepAlive1dKeepaliveRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416644: fltTcaBgpPeerKeepAlive1wKeepaliveRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416645: fltTcaBgpPeerKeepAlive1moKeepaliveRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416646: fltTcaBgpPeerKeepAlive1qtrKeepaliveRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416647: fltTcaBgpPeerKeepAlive1yearKeepaliveRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416648: fltTcaBgpPeerKeepAlive5minKeepaliveRcvdMin

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416649: fltTcaBgpPeerKeepAlive15minKeepaliveRcvdMin

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416650: fltTcaBgpPeerKeepAlive1hKeepaliveRcvdMin

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416651: fltTcaBgpPeerKeepAlive1dKeepaliveRcvdMin

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416652: fltTcaBgpPeerKeepAlive1wKeepaliveRcvdMin

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416653: fltTcaBgpPeerKeepAlive1moKeepaliveRcvdMin

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416654: fltTcaBgpPeerKeepAlive1qtrKeepaliveRcvdMin

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416655: fltTcaBgpPeerKeepAlive1yearKeepaliveRcvdMin

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416656: fltTcaBgpPeerKeepAlive5minKeepaliveRcvdMax

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416657: fltTcaBgpPeerKeepAlive15minKeepaliveRcvdMax

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416658: fltTcaBgpPeerKeepAlive1hKeepaliveRcvdMax

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416659: fltTcaBgpPeerKeepAlive1dKeepaliveRcvdMax

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416660: fltTcaBgpPeerKeepAlive1wKeepaliveRcvdMax

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416661: fltTcaBgpPeerKeepAlive1moKeepaliveRcvdMax

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416662: fltTcaBgpPeerKeepAlive1qtrKeepaliveRcvdMax

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416663: fltTcaBgpPeerKeepAlive1yearKeepaliveRcvdMax

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416664: fltTcaBgpPeerKeepAlive5minKeepaliveRcvdAvg

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416665: fltTcaBgpPeerKeepAlive15minKeepaliveRcvdAvg

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416666: fltTcaBgpPeerKeepAlive1hKeepaliveRcvdAvg

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416667: fltTcaBgpPeerKeepAlive1dKeepaliveRcvdAvg

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416668: fltTcaBgpPeerKeepAlive1wKeepaliveRcvdAvg

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416669: fltTcaBgpPeerKeepAlive1moKeepaliveRcvdAvg

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416670: fltTcaBgpPeerKeepAlive1qtrKeepaliveRcvdAvg

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416671: fltTcaBgpPeerKeepAlive1yearKeepaliveRcvdAvg

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416696: fltTcaBgpPeerKeepAlive5minKeepaliveRcvdTr

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416697: fltTcaBgpPeerKeepAlive15minKeepaliveRcvdTr

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416698: fltTcaBgpPeerKeepAlive1hKeepaliveRcvdTr

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416699: fltTcaBgpPeerKeepAlive1dKeepaliveRcvdTr

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416700: fltTcaBgpPeerKeepAlive1wKeepaliveRcvdTr

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416701: fltTcaBgpPeerKeepAlive1moKeepaliveRcvdTr

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416702: fltTcaBgpPeerKeepAlive1qtrKeepaliveRcvdTr

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416703: fltTcaBgpPeerKeepAlive1yearKeepaliveRcvdTr

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416704: fltTcaBgpPeerKeepAlive5minKeepaliveRcvdRate

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416705: fltTcaBgpPeerKeepAlive15minKeepaliveRcvdRate

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416706: fltTcaBgpPeerKeepAlive1hKeepaliveRcvdRate

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416707: fltTcaBgpPeerKeepAlive1dKeepaliveRcvdRate

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416708: fltTcaBgpPeerKeepAlive1wKeepaliveRcvdRate

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416709: fltTcaBgpPeerKeepAlive1moKeepaliveRcvdRate

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416710: fltTcaBgpPeerKeepAlive1qtrKeepaliveRcvdRate

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416711: fltTcaBgpPeerKeepAlive1yearKeepaliveRcvdRate

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Received rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416784: fltTcaBgpPeerKeepAlive5minKeepaliveSentLast

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416785: fltTcaBgpPeerKeepAlive15minKeepaliveSentLast

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416786: fltTcaBgpPeerKeepAlive1hKeepaliveSentLast

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416787: fltTcaBgpPeerKeepAlive1dKeepaliveSentLast

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416788: fltTcaBgpPeerKeepAlive1wKeepaliveSentLast

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416789: fltTcaBgpPeerKeepAlive1moKeepaliveSentLast

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416790: fltTcaBgpPeerKeepAlive1qtrKeepaliveSentLast

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416791: fltTcaBgpPeerKeepAlive1yearKeepaliveSentLast

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416800: fltTcaBgpPeerKeepAlive5minKeepaliveSentCum

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416801: fltTcaBgpPeerKeepAlive15minKeepaliveSentCum

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416802: fltTcaBgpPeerKeepAlive1hKeepaliveSentCum

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416803: fltTcaBgpPeerKeepAlive1dKeepaliveSentCum

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416804: fltTcaBgpPeerKeepAlive1wKeepaliveSentCum

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416805: fltTcaBgpPeerKeepAlive1moKeepaliveSentCum

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416806: fltTcaBgpPeerKeepAlive1qtrKeepaliveSentCum

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416807: fltTcaBgpPeerKeepAlive1yearKeepaliveSentCum

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416808: fltTcaBgpPeerKeepAlive5minKeepaliveSentPer

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416809: fltTcaBgpPeerKeepAlive15minKeepaliveSentPer

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416810: fltTcaBgpPeerKeepAlive1hKeepaliveSentPer

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416811: fltTcaBgpPeerKeepAlive1dKeepaliveSentPer

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416812: fltTcaBgpPeerKeepAlive1wKeepaliveSentPer

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416813: fltTcaBgpPeerKeepAlive1moKeepaliveSentPer

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416814: fltTcaBgpPeerKeepAlive1qtrKeepaliveSentPer

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416815: fltTcaBgpPeerKeepAlive1yearKeepaliveSentPer

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416816: fltTcaBgpPeerKeepAlive5minKeepaliveSentMin

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416817: fltTcaBgpPeerKeepAlive15minKeepaliveSentMin

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416818: fltTcaBgpPeerKeepAlive1hKeepaliveSentMin

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416819: fltTcaBgpPeerKeepAlive1dKeepaliveSentMin

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416820: fltTcaBgpPeerKeepAlive1wKeepaliveSentMin

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416821: fltTcaBgpPeerKeepAlive1moKeepaliveSentMin

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416822: fltTcaBgpPeerKeepAlive1qtrKeepaliveSentMin

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416823: fltTcaBgpPeerKeepAlive1yearKeepaliveSentMin

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416824: fltTcaBgpPeerKeepAlive5minKeepaliveSentMax

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416825: fltTcaBgpPeerKeepAlive15minKeepaliveSentMax

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416826: fltTcaBgpPeerKeepAlive1hKeepaliveSentMax

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416827: fltTcaBgpPeerKeepAlive1dKeepaliveSentMax

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416828: fltTcaBgpPeerKeepAlive1wKeepaliveSentMax

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416829: fltTcaBgpPeerKeepAlive1moKeepaliveSentMax

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416830: fltTcaBgpPeerKeepAlive1qtrKeepaliveSentMax

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416831: fltTcaBgpPeerKeepAlive1yearKeepaliveSentMax

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416832: fltTcaBgpPeerKeepAlive5minKeepaliveSentAvg

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416833: fltTcaBgpPeerKeepAlive15minKeepaliveSentAvg

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416834: fltTcaBgpPeerKeepAlive1hKeepaliveSentAvg

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416835: fltTcaBgpPeerKeepAlive1dKeepaliveSentAvg

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416836: fltTcaBgpPeerKeepAlive1wKeepaliveSentAvg

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416837: fltTcaBgpPeerKeepAlive1moKeepaliveSentAvg

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416838: fltTcaBgpPeerKeepAlive1qtrKeepaliveSentAvg

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416839: fltTcaBgpPeerKeepAlive1yearKeepaliveSentAvg

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416864: fltTcaBgpPeerKeepAlive5minKeepaliveSentTr

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416865: fltTcaBgpPeerKeepAlive15minKeepaliveSentTr

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416866: fltTcaBgpPeerKeepAlive1hKeepaliveSentTr

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416867: fltTcaBgpPeerKeepAlive1dKeepaliveSentTr

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416868: fltTcaBgpPeerKeepAlive1wKeepaliveSentTr

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416869: fltTcaBgpPeerKeepAlive1moKeepaliveSentTr

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416870: fltTcaBgpPeerKeepAlive1qtrKeepaliveSentTr

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416871: fltTcaBgpPeerKeepAlive1yearKeepaliveSentTr

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416872: fltTcaBgpPeerKeepAlive5minKeepaliveSentRate

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416873: fltTcaBgpPeerKeepAlive15minKeepaliveSentRate

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416874: fltTcaBgpPeerKeepAlive1hKeepaliveSentRate

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416875: fltTcaBgpPeerKeepAlive1dKeepaliveSentRate

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416876: fltTcaBgpPeerKeepAlive1wKeepaliveSentRate

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416877: fltTcaBgpPeerKeepAlive1moKeepaliveSentRate

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416878: fltTcaBgpPeerKeepAlive1qtrKeepaliveSentRate

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416879: fltTcaBgpPeerKeepAlive1yearKeepaliveSentRate

Severity: variable

Explanation: This fault is caused by "Number of Keepalive Messages Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Keepalive Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416952: fltTcaBgpPeerMsg5minMsgRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of Messages Received current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416953: fltTcaBgpPeerMsg15minMsgRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of Messages Received current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416954: fltTcaBgpPeerMsg1hMsgRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of Messages Received current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416955: fltTcaBgpPeerMsg1dMsgRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of Messages Received current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416956: fltTcaBgpPeerMsg1wMsgRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of Messages Received current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416957: fltTcaBgpPeerMsg1moMsgRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of Messages Received current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416958: fltTcaBgpPeerMsg1qtrMsgRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of Messages Received current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416959: fltTcaBgpPeerMsg1yearMsgRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of Messages Received current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416968: fltTcaBgpPeerMsg5minMsgRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of Messages Received cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416969: fltTcaBgpPeerMsg15minMsgRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of Messages Received cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416970: fltTcaBgpPeerMsg1hMsgRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of Messages Received cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416971: fltTcaBgpPeerMsg1dMsgRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of Messages Received cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416972: fltTcaBgpPeerMsg1wMsgRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of Messages Received cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416973: fltTcaBgpPeerMsg1moMsgRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of Messages Received cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416974: fltTcaBgpPeerMsg1qtrMsgRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of Messages Received cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416975: fltTcaBgpPeerMsg1yearMsgRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of Messages Received cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416976: fltTcaBgpPeerMsg5minMsgRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of Messages Received periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416977: fltTcaBgpPeerMsg15minMsgRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of Messages Received periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416978: fltTcaBgpPeerMsg1hMsgRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of Messages Received periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416979: fltTcaBgpPeerMsg1dMsgRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of Messages Received periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416980: fltTcaBgpPeerMsg1wMsgRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of Messages Received periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416981: fltTcaBgpPeerMsg1moMsgRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of Messages Received periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416982: fltTcaBgpPeerMsg1qtrMsgRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of Messages Received periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416983: fltTcaBgpPeerMsg1yearMsgRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of Messages Received periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416984: fltTcaBgpPeerMsg5minMsgRcvdMin

Severity: variable

Explanation: This fault is caused by "Number of Messages Received minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416985: fltTcaBgpPeerMsg15minMsgRcvdMin

Severity: variable

Explanation: This fault is caused by "Number of Messages Received minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416986: fltTcaBgpPeerMsg1hMsgRcvdMin

Severity: variable

Explanation: This fault is caused by "Number of Messages Received minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416987: fltTcaBgpPeerMsg1dMsgRcvdMin

Severity: variable

Explanation: This fault is caused by "Number of Messages Received minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416988: fltTcaBgpPeerMsg1wMsgRcvdMin

Severity: variable

Explanation: This fault is caused by "Number of Messages Received minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416989: fltTcaBgpPeerMsg1moMsgRcvdMin

Severity: variable

Explanation: This fault is caused by "Number of Messages Received minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416990: fltTcaBgpPeerMsg1qtrMsgRcvdMin

Severity: variable

Explanation: This fault is caused by "Number of Messages Received minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416991: fltTcaBgpPeerMsg1yearMsgRcvdMin

Severity: variable

Explanation: This fault is caused by "Number of Messages Received minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416992: fltTcaBgpPeerMsg5minMsgRcvdMax

Severity: variable

Explanation: This fault is caused by "Number of Messages Received maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416993: fltTcaBgpPeerMsg15minMsgRcvdMax

Severity: variable

Explanation: This fault is caused by "Number of Messages Received maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416994: fltTcaBgpPeerMsg1hMsgRcvdMax

Severity: variable

Explanation: This fault is caused by "Number of Messages Received maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416995: fltTcaBgpPeerMsg1dMsgRcvdMax

Severity: variable

Explanation: This fault is caused by "Number of Messages Received maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416996: fltTcaBgpPeerMsg1wMsgRcvdMax

Severity: variable

Explanation: This fault is caused by "Number of Messages Received maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416997: fltTcaBgpPeerMsg1moMsgRcvdMax

Severity: variable

Explanation: This fault is caused by "Number of Messages Received maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416998: fltTcaBgpPeerMsg1qtrMsgRcvdMax

Severity: variable

Explanation: This fault is caused by "Number of Messages Received maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F416999: fltTcaBgpPeerMsg1yearMsgRcvdMax

Severity: variable

Explanation: This fault is caused by "Number of Messages Received maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417000: fltTcaBgpPeerMsg5minMsgRcvdAvg

Severity: variable

Explanation: This fault is caused by "Number of Messages Received average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417001: fltTcaBgpPeerMsg15minMsgRcvdAvg

Severity: variable

Explanation: This fault is caused by "Number of Messages Received average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417002: fltTcaBgpPeerMsg1hMsgRcvdAvg

Severity: variable

Explanation: This fault is caused by "Number of Messages Received average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417003: fltTcaBgpPeerMsg1dMsgRcvdAvg

Severity: variable

Explanation: This fault is caused by "Number of Messages Received average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417004: fltTcaBgpPeerMsg1wMsgRcvdAvg

Severity: variable

Explanation: This fault is caused by "Number of Messages Received average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417005: fltTcaBgpPeerMsg1moMsgRcvdAvg

Severity: variable

Explanation: This fault is caused by "Number of Messages Received average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417006: fltTcaBgpPeerMsg1qtrMsgRcvdAvg

Severity: variable

Explanation: This fault is caused by "Number of Messages Received average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417007: fltTcaBgpPeerMsg1yearMsgRcvdAvg

Severity: variable

Explanation: This fault is caused by "Number of Messages Received average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417032: fltTcaBgpPeerMsg5minMsgRcvdTr

Severity: variable

Explanation: This fault is caused by "Number of Messages Received trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417033: fltTcaBgpPeerMsg15minMsgRcvdTr

Severity: variable

Explanation: This fault is caused by "Number of Messages Received trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417034: fltTcaBgpPeerMsg1hMsgRcvdTr

Severity: variable

Explanation: This fault is caused by "Number of Messages Received trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417035: fltTcaBgpPeerMsg1dMsgRcvdTr

Severity: variable

Explanation: This fault is caused by "Number of Messages Received trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417036: fltTcaBgpPeerMsg1wMsgRcvdTr

Severity: variable

Explanation: This fault is caused by "Number of Messages Received trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417037: fltTcaBgpPeerMsg1moMsgRcvdTr

Severity: variable

Explanation: This fault is caused by "Number of Messages Received trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417038: fltTcaBgpPeerMsg1qtrMsgRcvdTr

Severity: variable

Explanation: This fault is caused by "Number of Messages Received trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417039: fltTcaBgpPeerMsg1yearMsgRcvdTr

Severity: variable

Explanation: This fault is caused by "Number of Messages Received trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417040: fltTcaBgpPeerMsg5minMsgRcvdRate

Severity: variable

Explanation: This fault is caused by "Number of Messages Received rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417041: fltTcaBgpPeerMsg15minMsgRcvdRate

Severity: variable

Explanation: This fault is caused by "Number of Messages Received rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417042: fltTcaBgpPeerMsg1hMsgRcvdRate

Severity: variable

Explanation: This fault is caused by "Number of Messages Received rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417043: fltTcaBgpPeerMsg1dMsgRcvdRate

Severity: variable

Explanation: This fault is caused by "Number of Messages Received rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417044: fltTcaBgpPeerMsg1wMsgRcvdRate

Severity: variable

Explanation: This fault is caused by "Number of Messages Received rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417045: fltTcaBgpPeerMsg1moMsgRcvdRate

Severity: variable

Explanation: This fault is caused by "Number of Messages Received rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417046: fltTcaBgpPeerMsg1qtrMsgRcvdRate

Severity: variable

Explanation: This fault is caused by "Number of Messages Received rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417047: fltTcaBgpPeerMsg1yearMsgRcvdRate

Severity: variable

Explanation: This fault is caused by "Number of Messages Received rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417120: fltTcaBgpPeerMsg5minMsgSentLast

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417121: fltTcaBgpPeerMsg15minMsgSentLast

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417122: fltTcaBgpPeerMsg1hMsgSentLast

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417123: fltTcaBgpPeerMsg1dMsgSentLast

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417124: fltTcaBgpPeerMsg1wMsgSentLast

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417125: fltTcaBgpPeerMsg1moMsgSentLast

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417126: fltTcaBgpPeerMsg1qtrMsgSentLast

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417127: fltTcaBgpPeerMsg1yearMsgSentLast

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417136: fltTcaBgpPeerMsg5minMsgSentCum

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417137: fltTcaBgpPeerMsg15minMsgSentCum

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417138: fltTcaBgpPeerMsg1hMsgSentCum

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417139: fltTcaBgpPeerMsg1dMsgSentCum

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417140: fltTcaBgpPeerMsg1wMsgSentCum

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417141: fltTcaBgpPeerMsg1moMsgSentCum

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417142: fltTcaBgpPeerMsg1qtrMsgSentCum

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417143: fltTcaBgpPeerMsg1yearMsgSentCum

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417144: fltTcaBgpPeerMsg5minMsgSentPer

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417145: fltTcaBgpPeerMsg15minMsgSentPer

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417146: fltTcaBgpPeerMsg1hMsgSentPer

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417147: fltTcaBgpPeerMsg1dMsgSentPer

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417148: fltTcaBgpPeerMsg1wMsgSentPer

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417149: fltTcaBgpPeerMsg1moMsgSentPer

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417150: fltTcaBgpPeerMsg1qtrMsgSentPer

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417151: fltTcaBgpPeerMsg1yearMsgSentPer

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417152: fltTcaBgpPeerMsg5minMsgSentMin

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417153: fltTcaBgpPeerMsg15minMsgSentMin

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417154: fltTcaBgpPeerMsg1hMsgSentMin

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417155: fltTcaBgpPeerMsg1dMsgSentMin

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417156: fltTcaBgpPeerMsg1wMsgSentMin

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417157: fltTcaBgpPeerMsg1moMsgSentMin

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417158: fltTcaBgpPeerMsg1qtrMsgSentMin

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417159: fltTcaBgpPeerMsg1yearMsgSentMin

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent minimum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417160: fltTcaBgpPeerMsg5minMsgSentMax

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417161: fltTcaBgpPeerMsg15minMsgSentMax

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417162: fltTcaBgpPeerMsg1hMsgSentMax

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417163: fltTcaBgpPeerMsg1dMsgSentMax

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417164: fltTcaBgpPeerMsg1wMsgSentMax

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417165: fltTcaBgpPeerMsg1moMsgSentMax

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417166: fltTcaBgpPeerMsg1qtrMsgSentMax

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417167: fltTcaBgpPeerMsg1yearMsgSentMax

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent maximum value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417168: fltTcaBgpPeerMsg5minMsgSentAvg

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417169: fltTcaBgpPeerMsg15minMsgSentAvg

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417170: fltTcaBgpPeerMsg1hMsgSentAvg

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417171: fltTcaBgpPeerMsg1dMsgSentAvg

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417172: fltTcaBgpPeerMsg1wMsgSentAvg

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417173: fltTcaBgpPeerMsg1moMsgSentAvg

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417174: fltTcaBgpPeerMsg1qtrMsgSentAvg

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417175: fltTcaBgpPeerMsg1yearMsgSentAvg

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent average value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4172: fltPtpInstPtpHighCorrection

Severity: major

Explanation: This fault occurs when the PTP clock has high corrections.

Recommended Action: If you see this fault, take the following actions:

1. Disable/Enable PTP during Maintenance Window to recover TOR.

2. Make sure all top of Rack Switches and Spines have NTP configured and NTP synced to NTP Server.

3. If you are still seeing this, create tech-support ticket and contact Cisco TAC

F417200: fltTcaBgpPeerMsg5minMsgSentTr

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417201: fltTcaBgpPeerMsg15minMsgSentTr

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417202: fltTcaBgpPeerMsg1hMsgSentTr

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417203: fltTcaBgpPeerMsg1dMsgSentTr

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417204: fltTcaBgpPeerMsg1wMsgSentTr

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417205: fltTcaBgpPeerMsg1moMsgSentTr

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417206: fltTcaBgpPeerMsg1qtrMsgSentTr

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417207: fltTcaBgpPeerMsg1yearMsgSentTr

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent trend" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417208: fltTcaBgpPeerMsg5minMsgSentRate

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417209: fltTcaBgpPeerMsg15minMsgSentRate

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417210: fltTcaBgpPeerMsg1hMsgSentRate

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417211: fltTcaBgpPeerMsg1dMsgSentRate

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417212: fltTcaBgpPeerMsg1wMsgSentRate

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417213: fltTcaBgpPeerMsg1moMsgSentRate

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417214: fltTcaBgpPeerMsg1qtrMsgSentRate

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417215: fltTcaBgpPeerMsg1yearMsgSentRate

Severity: variable

Explanation: This fault is caused by "Number of Messages Sent rate" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Messages Sent" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417288: fltTcaBgpPeerMsg5minNotifRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of Notification Messages Received current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Notification Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417289: fltTcaBgpPeerMsg15minNotifRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of Notification Messages Received current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Notification Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417290: fltTcaBgpPeerMsg1hNotifRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of Notification Messages Received current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Notification Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417291: fltTcaBgpPeerMsg1dNotifRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of Notification Messages Received current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Notification Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417292: fltTcaBgpPeerMsg1wNotifRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of Notification Messages Received current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Notification Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417293: fltTcaBgpPeerMsg1moNotifRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of Notification Messages Received current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Notification Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417294: fltTcaBgpPeerMsg1qtrNotifRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of Notification Messages Received current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Notification Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417295: fltTcaBgpPeerMsg1yearNotifRcvdLast

Severity: variable

Explanation: This fault is caused by "Number of Notification Messages Received current value" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Notification Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F4173: fltPtpInstPtpTimeSyncLost

Severity: minor

Explanation: This fault occurs when the PTP lost synchronization with master clock.

Recommended Action: None

1. If you are still seeing this, create tech-support ticket and contact Cisco TAC

F417304: fltTcaBgpPeerMsg5minNotifRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of Notification Messages Received cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Notification Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417305: fltTcaBgpPeerMsg15minNotifRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of Notification Messages Received cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Notification Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417306: fltTcaBgpPeerMsg1hNotifRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of Notification Messages Received cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Notification Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417307: fltTcaBgpPeerMsg1dNotifRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of Notification Messages Received cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Notification Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417308: fltTcaBgpPeerMsg1wNotifRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of Notification Messages Received cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Notification Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417309: fltTcaBgpPeerMsg1moNotifRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of Notification Messages Received cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Notification Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417310: fltTcaBgpPeerMsg1qtrNotifRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of Notification Messages Received cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Notification Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417311: fltTcaBgpPeerMsg1yearNotifRcvdCum

Severity: variable

Explanation: This fault is caused by "Number of Notification Messages Received cumulative" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Notification Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417312: fltTcaBgpPeerMsg5minNotifRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of Notification Messages Received periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Notification Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417313: fltTcaBgpPeerMsg15minNotifRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of Notification Messages Received periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Notification Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417314: fltTcaBgpPeerMsg1hNotifRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of Notification Messages Received periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Notification Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417315: fltTcaBgpPeerMsg1dNotifRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of Notification Messages Received periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Notification Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417316: fltTcaBgpPeerMsg1wNotifRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of Notification Messages Received periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Notification Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417317: fltTcaBgpPeerMsg1moNotifRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of Notification Messages Received periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Notification Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417318: fltTcaBgpPeerMsg1qtrNotifRcvdPer

Severity: variable

Explanation: This fault is caused by "Number of Notification Messages Received periodic" statistical property crossing threshold level.

Recommended Action: Check the values of "Number of Notification Messages Received" statistical counter and either correct the conditions that cause the counter values to cross certain threshold levels, or adjust the threshold values in monitoring policies.

F417319: fltTcaBgpPeerMsg1yearNotifRcvdPer

Severity: variable